(kicad_sch
	(version 20231120)
	(generator "eeschema")
	(generator_version "8.0")
	(paper "A")
	(title_block
		(title "Bitaxe Ultra")
		(date "2023-12-10")
		(rev "204")
	)
	(lib_symbols
		(symbol "Connector_Generic:Conn_01x02"
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "J"
				(at 0 2.54 0)
			)
			(property "Value" "Conn_01x02"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Generic connector, single row, 01x02, script generated (kicad-library-utils/schlib/autogen/connector/)"
				(at 0 0 0)
			)
			(property "ki_keywords" "connector"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Connector*:*_1x??_*"
				(at 0 0 0)
			)
			(symbol "Conn_01x02_1_1"
				(rectangle
					(start -1.27 -2.413)
					(end 0 -2.667)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 0.127)
					(end 0 -0.127)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 1.27)
					(end 1.27 -3.81)
					(fill
						(type background)
					)
				)
				(pin passive line
					(at -5.08 0 0)
					(length 3.81)
					(name "Pin_1")
					(number "1")
				)
				(pin passive line
					(at -5.08 -2.54 0)
					(length 3.81)
					(name "Pin_2")
					(number "2")
				)
			)
		)
		(symbol "Device:C"
			(pin_numbers hide)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Unpolarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C_*"
				(at 0 0 0)
			)
			(symbol "C_0_1"
				(polyline
					(pts
						(xy -2.032 -0.762) (xy 2.032 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.032 0.762) (xy 2.032 0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:C_Polarized"
			(pin_numbers hide)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C_Polarized"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Polarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "CP_*"
				(at 0 0 0)
			)
			(symbol "C_Polarized_0_1"
				(rectangle
					(start -2.286 0.508)
					(end 2.286 1.016)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.778 2.286) (xy -0.762 2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 2.794) (xy -1.27 1.778)
					)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 2.286 -0.508)
					(end -2.286 -1.016)
					(fill
						(type outline)
					)
				)
			)
			(symbol "C_Polarized_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:L"
			(pin_numbers hide)
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "L"
				(at -1.27 0 90)
			)
			(property "Value" "L"
				(at 1.905 0 90)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Inductor"
				(at 0 0 0)
			)
			(property "ki_keywords" "inductor choke coil reactor magnetic"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Choke_* *Coil* Inductor_* L_*"
				(at 0 0 0)
			)
			(symbol "L_0_1"
				(arc
					(start 0 -2.54)
					(mid 0.6323 -1.905)
					(end 0 -1.27)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 -1.27)
					(mid 0.6323 -0.635)
					(end 0 0)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 0)
					(mid 0.6323 0.635)
					(end 0 1.27)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 1.27)
					(mid 0.6323 1.905)
					(end 0 2.54)
					(fill
						(type none)
					)
				)
			)
			(symbol "L_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "1")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "2")
					(number "2")
				)
			)
		)
		(symbol "Device:R_US"
			(pin_numbers hide)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 2.54 0 90)
			)
			(property "Value" "R_US"
				(at -2.54 0 90)
			)
			(property "Footprint" ""
				(at 1.016 -0.254 90)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Resistor, US symbol"
				(at 0 0 0)
			)
			(property "ki_keywords" "R res resistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R_US_0_1"
				(polyline
					(pts
						(xy 0 -2.286) (xy 0 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.286) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -0.762) (xy 1.016 -1.143) (xy 0 -1.524) (xy -1.016 -1.905) (xy 0 -2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0.762) (xy 1.016 0.381) (xy 0 0) (xy -1.016 -0.381) (xy 0 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.286) (xy 1.016 1.905) (xy 0 1.524) (xy -1.016 1.143) (xy 0 0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_US_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Sensor:INA260"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -6.35 8.89 0)
			)
			(property "Value" "INA260"
				(at 2.54 8.89 0)
			)
			(property "Footprint" "Package_SO:TSSOP-16_4.4x5mm_P0.65mm"
				(at 0 -15.24 0)
			)
			(property "Datasheet" "http://www.ti.com/lit/ds/symlink/ina260.pdf"
				(at 0 -2.54 0)
			)
			(property "Description" "Current/power/voltage monitor with Integrated 2mΩ Shunt Resistor, 2.7V - 5.5V, I2C, TSSOP-16"
				(at 0 0 0)
			)
			(property "ki_keywords" "Current/power/voltage monitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "TSSOP*4.4x5mm*P0.65mm*"
				(at 0 0 0)
			)
			(symbol "INA260_0_1"
				(rectangle
					(start -7.62 7.62)
					(end 7.62 -7.62)
					(fill
						(type background)
					)
				)
			)
			(symbol "INA260_1_1"
				(pin passive line
					(at -10.16 5.08 0)
					(length 2.54)
					(name "IN+")
					(number "1")
				)
				(pin power_in line
					(at 0 10.16 270)
					(length 2.54)
					(name "VS")
					(number "10")
				)
				(pin passive line
					(at 0 -10.16 90)
					(length 2.54) hide
					(name "GND")
					(number "11")
				)
				(pin passive line
					(at -10.16 2.54 0)
					(length 2.54)
					(name "VBUS")
					(number "12")
				)
				(pin no_connect line
					(at 2.54 -7.62 90)
					(length 2.54) hide
					(name "NC")
					(number "13")
				)
				(pin passive line
					(at -10.16 -5.08 0)
					(length 2.54)
					(name "IN-")
					(number "14")
				)
				(pin passive line
					(at -10.16 -5.08 0)
					(length 2.54) hide
					(name "IN-")
					(number "15")
				)
				(pin passive line
					(at -10.16 -5.08 0)
					(length 2.54) hide
					(name "IN-")
					(number "16")
				)
				(pin passive line
					(at -10.16 5.08 0)
					(length 2.54) hide
					(name "IN+")
					(number "2")
				)
				(pin passive line
					(at -10.16 5.08 0)
					(length 2.54) hide
					(name "IN+")
					(number "3")
				)
				(pin input line
					(at 10.16 -5.08 180)
					(length 2.54)
					(name "A1")
					(number "4")
				)
				(pin input line
					(at 10.16 -2.54 180)
					(length 2.54)
					(name "A0")
					(number "5")
				)
				(pin power_in line
					(at 0 -10.16 90)
					(length 2.54)
					(name "GND")
					(number "6")
				)
				(pin open_collector line
					(at 10.16 5.08 180)
					(length 2.54)
					(name "ALERT")
					(number "7")
				)
				(pin bidirectional line
					(at 10.16 0 180)
					(length 2.54)
					(name "SDA")
					(number "8")
				)
				(pin input line
					(at 10.16 2.54 180)
					(length 2.54)
					(name "SCL")
					(number "9")
				)
			)
		)
		(symbol "Transistor_FET:2N7002K"
			(pin_names hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "Q"
				(at 5.08 1.905 0)
			)
			(property "Value" "2N7002K"
				(at 5.08 0 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:SOT-23"
				(at 5.08 -1.905 0)
			)
			(property "Datasheet" "https://www.diodes.com/assets/Datasheets/ds30896.pdf"
				(at 0 0 0)
			)
			(property "Description" "0.38A Id, 60V Vds, N-Channel MOSFET, SOT-23"
				(at 0 0 0)
			)
			(property "ki_keywords" "N-Channel MOSFET"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOT?23*"
				(at 0 0 0)
			)
			(symbol "2N7002K_0_1"
				(polyline
					(pts
						(xy 0.254 0) (xy -2.54 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.254 1.905) (xy 0.254 -1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 -1.27) (xy 0.762 -2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 0.508) (xy 0.762 -0.508)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 2.286) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 2.54) (xy 2.54 1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 -2.54) (xy 2.54 0) (xy 0.762 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 -1.778) (xy 3.302 -1.778) (xy 3.302 1.778) (xy 0.762 1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.016 0) (xy 2.032 0.381) (xy 2.032 -0.381) (xy 1.016 0)
					)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy 2.794 0.508) (xy 2.921 0.381) (xy 3.683 0.381) (xy 3.81 0.254)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 3.302 0.381) (xy 2.921 -0.254) (xy 3.683 -0.254) (xy 3.302 0.381)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 1.651 0)
					(radius 2.794)
					(fill
						(type none)
					)
				)
				(circle
					(center 2.54 -1.778)
					(radius 0.254)
					(fill
						(type outline)
					)
				)
				(circle
					(center 2.54 1.778)
					(radius 0.254)
					(fill
						(type outline)
					)
				)
			)
			(symbol "2N7002K_1_1"
				(pin input line
					(at -5.08 0 0)
					(length 2.54)
					(name "G")
					(number "1")
				)
				(pin passive line
					(at 2.54 -5.08 90)
					(length 2.54)
					(name "S")
					(number "2")
				)
				(pin passive line
					(at 2.54 5.08 270)
					(length 2.54)
					(name "D")
					(number "3")
				)
			)
		)
		(symbol "bitaxe:DS4432U+"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U10"
				(at -5.08 10.16 0)
			)
			(property "Value" "DS4432U+"
				(at -0.635 -10.16 0)
			)
			(property "Footprint" "Package_SO:TSSOP-8_3x3mm_P0.65mm"
				(at 0 0 0)
			)
			(property "Datasheet" "https://datasheets.maximintegrated.com/en/ds/DS4432.pdf"
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "PARTNO" "DS4432U+"
				(at 0 0 0)
			)
			(property "DK" "DS4432U+-ND"
				(at 0 0 0)
			)
			(symbol "DS4432U+_0_1"
				(rectangle
					(start -6.35 8.89)
					(end 5.08 -8.89)
					(fill
						(type background)
					)
				)
			)
			(symbol "DS4432U+_1_1"
				(pin input line
					(at -8.89 1.27 0)
					(length 2.54)
					(name "SDA")
					(number "1")
				)
				(pin input line
					(at -8.89 -1.27 0)
					(length 2.54)
					(name "SCL")
					(number "2")
				)
				(pin input line
					(at 7.62 -3.81 180)
					(length 2.54)
					(name "FS1")
					(number "3")
				)
				(pin power_in line
					(at -8.89 -6.35 0)
					(length 2.54)
					(name "GND")
					(number "4")
				)
				(pin input line
					(at 7.62 -6.35 180)
					(length 2.54)
					(name "FS0")
					(number "5")
				)
				(pin output line
					(at 7.62 6.35 180)
					(length 2.54)
					(name "OUT0")
					(number "6")
				)
				(pin output line
					(at 7.62 3.81 180)
					(length 2.54)
					(name "OUT1")
					(number "7")
				)
				(pin power_in line
					(at -8.89 6.35 0)
					(length 2.54)
					(name "VCC")
					(number "8")
				)
			)
		)
		(symbol "bitaxe:Q_NMOS_CSD17311Q5_1"
			(pin_names
				(offset 0) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "Q1"
				(at 5.08 1.27 0)
			)
			(property "Value" "CSD17311Q5"
				(at 5.08 -1.27 0)
			)
			(property "Footprint" "TPS40305_supply:CSD17311Q5"
				(at 5.08 2.54 0)
			)
			(property "Datasheet" "https://www.ti.com/lit/ds/symlink/csd17311q5.pdf"
				(at 0 0 0)
			)
			(property "Description" "N-MOSFET transistor, drain/gate/source"
				(at 0 0 0)
			)
			(property "DK" "296-27625-1-ND"
				(at 0 0 0)
			)
			(property "PARTNO" "CSD17311Q5"
				(at 0 0 0)
			)
			(property "ki_keywords" "transistor NMOS N-MOS N-MOSFET"
				(at 0 0 0)
			)
			(symbol "Q_NMOS_CSD17311Q5_1_0_1"
				(polyline
					(pts
						(xy 0.254 0) (xy -2.54 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.254 1.905) (xy 0.254 -1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 -1.27) (xy 0.762 -2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 0.508) (xy 0.762 -0.508)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 2.286) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 2.54) (xy 2.54 1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 -2.54) (xy 2.54 0) (xy 0.762 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 -1.778) (xy 3.302 -1.778) (xy 3.302 1.778) (xy 0.762 1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.016 0) (xy 2.032 0.381) (xy 2.032 -0.381) (xy 1.016 0)
					)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy 2.794 0.508) (xy 2.921 0.381) (xy 3.683 0.381) (xy 3.81 0.254)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 3.302 0.381) (xy 2.921 -0.254) (xy 3.683 -0.254) (xy 3.302 0.381)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 1.651 0)
					(radius 2.794)
					(fill
						(type none)
					)
				)
				(circle
					(center 2.54 -1.778)
					(radius 0.254)
					(fill
						(type outline)
					)
				)
				(circle
					(center 2.54 1.778)
					(radius 0.254)
					(fill
						(type outline)
					)
				)
			)
			(symbol "Q_NMOS_CSD17311Q5_1_1_1"
				(pin passive line
					(at 2.54 -5.08 90)
					(length 2.54) hide
					(name "")
					(number "1")
				)
				(pin passive line
					(at 2.54 -5.08 90)
					(length 2.54) hide
					(name "")
					(number "2")
				)
				(pin passive line
					(at 2.54 -5.08 90)
					(length 2.54)
					(name "S")
					(number "3")
				)
				(pin input line
					(at -5.08 0 0)
					(length 2.54)
					(name "G")
					(number "4")
				)
				(pin passive line
					(at 2.54 5.08 270)
					(length 2.54)
					(name "D")
					(number "5")
				)
			)
		)
		(symbol "bitaxe:TPS40305"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U9"
				(at -10.16 16.51 0)
			)
			(property "Value" "TPS40305"
				(at 5.715 16.51 0)
			)
			(property "Footprint" "TPS40305_supply:TPS40305"
				(at -13.97 -11.43 0)
			)
			(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tps40303.pdf"
				(at -13.97 -11.43 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "DK" "296-37445-1-ND"
				(at 0 0 0)
			)
			(property "PARTNO" "TPS40305DRCR"
				(at 0 0 0)
			)
			(symbol "TPS40305_0_1"
				(rectangle
					(start -11.43 15.24)
					(end 10.16 -13.97)
					(fill
						(type background)
					)
				)
			)
			(symbol "TPS40305_1_1"
				(pin input line
					(at -13.97 12.7 0)
					(length 2.54)
					(name "VDD")
					(number "1")
				)
				(pin input line
					(at 12.7 -12.7 180)
					(length 2.54)
					(name "BP")
					(number "10")
				)
				(pin input line
					(at 0 -16.51 90)
					(length 2.54)
					(name "GND")
					(number "11")
				)
				(pin input line
					(at -13.97 7.62 0)
					(length 2.54)
					(name "EN/SS")
					(number "2")
				)
				(pin input line
					(at 12.7 -7.62 180)
					(length 2.54)
					(name "PGOOD")
					(number "3")
				)
				(pin input line
					(at -13.97 -7.62 0)
					(length 2.54)
					(name "COMP")
					(number "4")
				)
				(pin input line
					(at -13.97 -12.7 0)
					(length 2.54)
					(name "FB")
					(number "5")
				)
				(pin input line
					(at 12.7 7.62 180)
					(length 2.54)
					(name "BOOT")
					(number "6")
				)
				(pin input line
					(at 12.7 12.7 180)
					(length 2.54)
					(name "HDRV")
					(number "7")
				)
				(pin input line
					(at 12.7 2.54 180)
					(length 2.54)
					(name "SW")
					(number "8")
				)
				(pin input line
					(at 12.7 -2.54 180)
					(length 2.54)
					(name "LDRV")
					(number "9")
				)
			)
		)
	)
	(junction
		(at 135.89 116.84)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 46.101 50.165)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 201.93 61.595)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 46.101 47.625)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 213.995 137.795)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 24.511 30.48)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 145.415 42.545)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 182.88 42.545)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 212.725 78.74)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 95.25 50.8)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 182.88 39.37)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 170.18 55.88)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 230.505 78.74)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 212.725 39.37)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 35.306 47.625)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 57.531 30.48)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 100.33 30.48)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 106.045 71.12)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 67.945 149.225)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 35.306 30.48)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 230.505 39.37)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 212.725 61.595)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 81.28 140.97)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 157.48 67.31)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 46.101 30.48)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 57.531 50.165)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.205 39.37)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 80.264 35.56)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 55.88 130.81)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 201.93 39.37)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 95.25 71.12)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 71.12 78.74)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 170.18 67.31)
		(diameter 0)
		(color 0 0 0 0)
	)
	(no_connect
		(at 233.68 121.285)
	)
	(wire
		(pts
			(xy 243.205 39.37) (xy 230.505 39.37)
		)
	)
	(wire
		(pts
			(xy 193.04 111.125) (xy 217.17 111.125)
		)
	)
	(wire
		(pts
			(xy 60.706 61.468) (xy 63.5 61.468)
		)
	)
	(wire
		(pts
			(xy 157.48 66.04) (xy 157.48 67.31)
		)
	)
	(wire
		(pts
			(xy 24.511 30.48) (xy 35.306 30.48)
		)
	)
	(wire
		(pts
			(xy 108.585 50.8) (xy 95.25 50.8)
		)
	)
	(wire
		(pts
			(xy 182.88 35.56) (xy 182.88 39.37)
		)
	)
	(wire
		(pts
			(xy 243.205 48.895) (xy 243.205 39.37)
		)
	)
	(wire
		(pts
			(xy 170.18 55.88) (xy 175.26 55.88)
		)
	)
	(wire
		(pts
			(xy 157.48 55.88) (xy 157.48 58.42)
		)
	)
	(wire
		(pts
			(xy 67.945 116.84) (xy 67.945 125.73)
		)
	)
	(wire
		(pts
			(xy 95.25 60.325) (xy 95.25 61.595)
		)
	)
	(wire
		(pts
			(xy 57.531 44.45) (xy 57.531 50.165)
		)
	)
	(wire
		(pts
			(xy 212.725 55.88) (xy 212.725 61.595)
		)
	)
	(wire
		(pts
			(xy 170.18 45.72) (xy 170.18 55.88)
		)
	)
	(wire
		(pts
			(xy 55.88 130.81) (xy 55.88 119.761)
		)
	)
	(wire
		(pts
			(xy 35.306 44.45) (xy 35.306 47.625)
		)
	)
	(wire
		(pts
			(xy 170.18 67.31) (xy 170.18 65.405)
		)
	)
	(wire
		(pts
			(xy 233.68 113.665) (xy 245.11 113.665)
		)
	)
	(wire
		(pts
			(xy 68.326 44.704) (xy 68.326 50.165)
		)
	)
	(wire
		(pts
			(xy 182.88 20.32) (xy 100.33 20.32)
		)
	)
	(wire
		(pts
			(xy 193.04 114.3) (xy 193.04 111.125)
		)
	)
	(wire
		(pts
			(xy 201.93 39.37) (xy 201.93 41.91)
		)
	)
	(wire
		(pts
			(xy 57.785 133.35) (xy 55.88 133.35)
		)
	)
	(wire
		(pts
			(xy 35.306 47.625) (xy 46.101 47.625)
		)
	)
	(wire
		(pts
			(xy 243.205 39.37) (xy 254 39.37)
		)
	)
	(wire
		(pts
			(xy 55.88 140.97) (xy 55.88 154.305)
		)
	)
	(wire
		(pts
			(xy 80.264 35.56) (xy 68.326 35.56)
		)
	)
	(wire
		(pts
			(xy 128.27 116.84) (xy 135.89 116.84)
		)
	)
	(wire
		(pts
			(xy 87.63 71.12) (xy 87.63 64.77)
		)
	)
	(wire
		(pts
			(xy 87.63 50.8) (xy 87.63 57.15)
		)
	)
	(wire
		(pts
			(xy 49.53 154.305) (xy 55.88 154.305)
		)
	)
	(wire
		(pts
			(xy 209.55 116.205) (xy 217.17 116.205)
		)
	)
	(wire
		(pts
			(xy 46.101 50.165) (xy 57.531 50.165)
		)
	)
	(wire
		(pts
			(xy 78.105 138.43) (xy 81.28 138.43)
		)
	)
	(wire
		(pts
			(xy 122.555 67.31) (xy 157.48 67.31)
		)
	)
	(wire
		(pts
			(xy 81.28 149.225) (xy 67.945 149.225)
		)
	)
	(wire
		(pts
			(xy 80.264 52.07) (xy 80.264 35.56)
		)
	)
	(wire
		(pts
			(xy 213.995 123.825) (xy 217.17 123.825)
		)
	)
	(wire
		(pts
			(xy 46.101 78.74) (xy 71.12 78.74)
		)
	)
	(wire
		(pts
			(xy 201.93 49.53) (xy 201.93 52.07)
		)
	)
	(wire
		(pts
			(xy 57.785 130.81) (xy 55.88 130.81)
		)
	)
	(wire
		(pts
			(xy 57.531 30.48) (xy 57.531 36.83)
		)
	)
	(wire
		(pts
			(xy 95.25 69.215) (xy 95.25 71.12)
		)
	)
	(wire
		(pts
			(xy 212.725 72.39) (xy 212.725 78.74)
		)
	)
	(wire
		(pts
			(xy 41.402 93.726) (xy 49.022 93.726)
		)
	)
	(wire
		(pts
			(xy 157.48 67.31) (xy 170.18 67.31)
		)
	)
	(wire
		(pts
			(xy 238.125 132.715) (xy 238.125 137.795)
		)
	)
	(wire
		(pts
			(xy 230.505 39.37) (xy 230.505 48.895)
		)
	)
	(wire
		(pts
			(xy 212.725 61.595) (xy 212.725 64.77)
		)
	)
	(wire
		(pts
			(xy 140.335 40.64) (xy 140.335 42.545)
		)
	)
	(wire
		(pts
			(xy 71.12 52.07) (xy 80.264 52.07)
		)
	)
	(wire
		(pts
			(xy 182.88 60.96) (xy 182.88 67.31)
		)
	)
	(wire
		(pts
			(xy 81.28 138.43) (xy 81.28 140.97)
		)
	)
	(wire
		(pts
			(xy 135.255 45.72) (xy 170.18 45.72)
		)
	)
	(wire
		(pts
			(xy 135.255 40.64) (xy 140.335 40.64)
		)
	)
	(wire
		(pts
			(xy 24.511 47.625) (xy 35.306 47.625)
		)
	)
	(wire
		(pts
			(xy 233.68 111.125) (xy 245.11 111.125)
		)
	)
	(wire
		(pts
			(xy 24.511 36.83) (xy 24.511 30.48)
		)
	)
	(wire
		(pts
			(xy 230.505 56.515) (xy 230.505 78.74)
		)
	)
	(wire
		(pts
			(xy 46.101 30.48) (xy 46.101 36.83)
		)
	)
	(wire
		(pts
			(xy 35.306 30.48) (xy 46.101 30.48)
		)
	)
	(wire
		(pts
			(xy 213.995 137.795) (xy 213.995 123.825)
		)
	)
	(wire
		(pts
			(xy 45.085 140.335) (xy 45.085 146.05)
		)
	)
	(wire
		(pts
			(xy 140.335 42.545) (xy 145.415 42.545)
		)
	)
	(wire
		(pts
			(xy 230.505 39.37) (xy 212.725 39.37)
		)
	)
	(wire
		(pts
			(xy 100.33 20.32) (xy 100.33 30.48)
		)
	)
	(wire
		(pts
			(xy 182.88 67.31) (xy 170.18 67.31)
		)
	)
	(wire
		(pts
			(xy 67.945 149.225) (xy 67.945 153.67)
		)
	)
	(wire
		(pts
			(xy 233.68 123.825) (xy 238.125 123.825)
		)
	)
	(wire
		(pts
			(xy 135.89 116.84) (xy 141.605 116.84)
		)
	)
	(wire
		(pts
			(xy 170.18 55.88) (xy 170.18 57.785)
		)
	)
	(wire
		(pts
			(xy 182.88 42.545) (xy 182.88 50.8)
		)
	)
	(wire
		(pts
			(xy 95.25 71.12) (xy 87.63 71.12)
		)
	)
	(wire
		(pts
			(xy 46.101 30.48) (xy 57.531 30.48)
		)
	)
	(wire
		(pts
			(xy 230.505 78.74) (xy 243.205 78.74)
		)
	)
	(wire
		(pts
			(xy 193.04 137.795) (xy 213.995 137.795)
		)
	)
	(wire
		(pts
			(xy 78.105 140.97) (xy 81.28 140.97)
		)
	)
	(wire
		(pts
			(xy 67.945 146.05) (xy 67.945 149.225)
		)
	)
	(wire
		(pts
			(xy 135.255 50.8) (xy 144.78 50.8)
		)
	)
	(wire
		(pts
			(xy 106.045 71.12) (xy 95.25 71.12)
		)
	)
	(wire
		(pts
			(xy 35.306 30.48) (xy 35.306 36.83)
		)
	)
	(wire
		(pts
			(xy 135.89 114.3) (xy 135.89 116.84)
		)
	)
	(wire
		(pts
			(xy 71.12 66.548) (xy 71.12 78.74)
		)
	)
	(wire
		(pts
			(xy 46.101 47.625) (xy 46.101 50.165)
		)
	)
	(wire
		(pts
			(xy 145.415 42.545) (xy 182.88 42.545)
		)
	)
	(wire
		(pts
			(xy 182.88 25.4) (xy 182.88 20.32)
		)
	)
	(wire
		(pts
			(xy 46.101 50.165) (xy 46.101 78.74)
		)
	)
	(wire
		(pts
			(xy 24.511 44.45) (xy 24.511 47.625)
		)
	)
	(wire
		(pts
			(xy 46.101 44.45) (xy 46.101 47.625)
		)
	)
	(wire
		(pts
			(xy 122.555 59.69) (xy 122.555 67.31)
		)
	)
	(wire
		(pts
			(xy 212.725 61.595) (xy 222.25 61.595)
		)
	)
	(wire
		(pts
			(xy 212.725 78.74) (xy 230.505 78.74)
		)
	)
	(wire
		(pts
			(xy 193.04 39.37) (xy 201.93 39.37)
		)
	)
	(wire
		(pts
			(xy 209.55 118.745) (xy 217.17 118.745)
		)
	)
	(wire
		(pts
			(xy 108.585 55.88) (xy 106.045 55.88)
		)
	)
	(wire
		(pts
			(xy 108.585 35.56) (xy 80.264 35.56)
		)
	)
	(wire
		(pts
			(xy 57.785 140.97) (xy 55.88 140.97)
		)
	)
	(wire
		(pts
			(xy 201.93 39.37) (xy 212.725 39.37)
		)
	)
	(wire
		(pts
			(xy 135.255 55.88) (xy 157.48 55.88)
		)
	)
	(wire
		(pts
			(xy 140.335 35.56) (xy 140.335 33.655)
		)
	)
	(wire
		(pts
			(xy 201.93 59.69) (xy 201.93 61.595)
		)
	)
	(wire
		(pts
			(xy 41.148 91.186) (xy 49.022 91.186)
		)
	)
	(wire
		(pts
			(xy 243.205 56.515) (xy 243.205 78.74)
		)
	)
	(wire
		(pts
			(xy 201.93 71.12) (xy 106.045 71.12)
		)
	)
	(wire
		(pts
			(xy 71.12 52.07) (xy 71.12 56.388)
		)
	)
	(wire
		(pts
			(xy 95.25 50.8) (xy 87.63 50.8)
		)
	)
	(wire
		(pts
			(xy 57.531 30.48) (xy 100.33 30.48)
		)
	)
	(wire
		(pts
			(xy 140.335 33.655) (xy 145.415 33.655)
		)
	)
	(wire
		(pts
			(xy 145.415 41.275) (xy 145.415 42.545)
		)
	)
	(wire
		(pts
			(xy 45.085 126.365) (xy 45.085 132.715)
		)
	)
	(wire
		(pts
			(xy 135.255 30.48) (xy 175.26 30.48)
		)
	)
	(wire
		(pts
			(xy 55.88 133.35) (xy 55.88 130.81)
		)
	)
	(wire
		(pts
			(xy 100.33 30.48) (xy 108.585 30.48)
		)
	)
	(wire
		(pts
			(xy 68.326 35.56) (xy 68.326 37.084)
		)
	)
	(wire
		(pts
			(xy 212.725 39.37) (xy 212.725 48.26)
		)
	)
	(wire
		(pts
			(xy 182.88 39.37) (xy 185.42 39.37)
		)
	)
	(wire
		(pts
			(xy 135.89 104.14) (xy 135.89 106.68)
		)
	)
	(wire
		(pts
			(xy 238.125 123.825) (xy 238.125 125.095)
		)
	)
	(wire
		(pts
			(xy 201.93 61.595) (xy 201.93 71.12)
		)
	)
	(wire
		(pts
			(xy 135.255 35.56) (xy 140.335 35.56)
		)
	)
	(wire
		(pts
			(xy 78.105 133.35) (xy 90.17 133.35)
		)
	)
	(wire
		(pts
			(xy 81.28 140.97) (xy 81.28 149.225)
		)
	)
	(wire
		(pts
			(xy 106.045 55.88) (xy 106.045 71.12)
		)
	)
	(wire
		(pts
			(xy 182.88 39.37) (xy 182.88 42.545)
		)
	)
	(wire
		(pts
			(xy 238.125 137.795) (xy 213.995 137.795)
		)
	)
	(wire
		(pts
			(xy 193.04 121.92) (xy 193.04 137.795)
		)
	)
	(wire
		(pts
			(xy 52.705 119.761) (xy 55.88 119.761)
		)
	)
	(wire
		(pts
			(xy 16.891 30.48) (xy 24.511 30.48)
		)
	)
	(wire
		(pts
			(xy 78.105 135.89) (xy 90.17 135.89)
		)
	)
	(wire
		(pts
			(xy 57.531 50.165) (xy 68.326 50.165)
		)
	)
	(wire
		(pts
			(xy 201.93 61.595) (xy 212.725 61.595)
		)
	)
	(wire
		(pts
			(xy 71.12 78.74) (xy 212.725 78.74)
		)
	)
	(wire
		(pts
			(xy 95.25 50.8) (xy 95.25 52.705)
		)
	)
	(text "DS4432U+ Lets us change the TPS40305 voltage over I2C"
		(exclude_from_sim no)
		(at 196.215 141.605 0)
	)
	(text "I2C Address: 0x48"
		(exclude_from_sim no)
		(at 217.17 103.505 0)
	)
	(text "The INA260 is tricky to source. INA260AIPW and INA260AIPWR are both fine.\nThis part is totally optional, feel free to leave \nit out if you can't source it. If you DNP it, close J7"
		(exclude_from_sim no)
		(at 45.085 167.005 0)
	)
	(text "Power Monitor"
		(exclude_from_sim no)
		(at 63.5 111.76 0)
	)
	(text "TPS40305 is a Buck regulator that steps 5V down to around 1.5V for the BM1397"
		(exclude_from_sim no)
		(at 106.045 19.05 0)
	)
	(text "I2C Address: 0x40"
		(exclude_from_sim no)
		(at 60.325 158.75 0)
	)
	(text "Vfb = 0.6V"
		(exclude_from_sim no)
		(at 107.95 70.485 0)
	)
	(text "This jumper will let you bypass the power meter"
		(exclude_from_sim no)
		(at 40.386 97.536 0)
	)
	(label "3V3"
		(at 203.835 111.125 0)
	)
	(label "SDA"
		(at 212.725 116.205 0)
	)
	(label "VIN_M"
		(at 18.161 30.48 0)
	)
	(label "GND"
		(at 233.68 78.74 0)
	)
	(label "VIN_M"
		(at 49.53 154.305 0)
	)
	(label "GND"
		(at 61.976 78.74 0)
	)
	(label "VIN"
		(at 44.958 91.186 0)
	)
	(label "GND"
		(at 67.945 153.67 0)
	)
	(label "3V3"
		(at 67.945 121.285 0)
	)
	(label "PGOOD"
		(at 144.78 50.8 180)
	)
	(label "GND"
		(at 45.085 144.145 0)
	)
	(label "SCL"
		(at 81.915 133.35 0)
	)
	(label "VOUT"
		(at 245.745 39.37 0)
	)
	(label "3V3"
		(at 45.085 130.81 0)
	)
	(label "OUT1"
		(at 240.03 113.665 0)
	)
	(label "SCL"
		(at 212.725 118.745 0)
	)
	(label "SDA"
		(at 81.915 135.89 0)
	)
	(label "OUT0"
		(at 217.17 61.595 0)
	)
	(label "OUT0"
		(at 240.03 111.125 0)
	)
	(label "GND"
		(at 223.52 137.795 0)
	)
	(label "VIN_M"
		(at 43.18 93.726 0)
	)
	(label "3V3"
		(at 135.89 104.14 0)
	)
	(label "PGOOD"
		(at 128.27 116.84 0)
	)
	(label "SW"
		(at 178.435 42.545 0)
	)
	(label "GND"
		(at 139.7 67.31 0)
	)
	(label "VIN"
		(at 55.88 121.92 0)
	)
	(global_label "GND"
		(shape input)
		(at 243.205 78.74 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 249.4886 78.6606 0)
		)
	)
	(hierarchical_label "SDA"
		(shape input)
		(at 209.55 116.205 180)
	)
	(hierarchical_label "5V"
		(shape output)
		(at 16.891 30.48 180)
	)
	(hierarchical_label "SCL"
		(shape input)
		(at 209.55 118.745 180)
	)
	(hierarchical_label "3V3"
		(shape input)
		(at 67.945 116.84 0)
	)
	(hierarchical_label "VOUT"
		(shape input)
		(at 254 39.37 0)
	)
	(hierarchical_label "VIN"
		(shape input)
		(at 52.705 119.761 180)
	)
	(hierarchical_label "PWR_EN"
		(shape input)
		(at 60.706 61.468 180)
	)
	(hierarchical_label "3V3"
		(shape input)
		(at 193.04 111.125 180)
	)
	(hierarchical_label "PGOOD"
		(shape output)
		(at 141.605 116.84 0)
	)
	(symbol
		(lib_id "Device:C")
		(at 157.48 62.23 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C43"
			(at 160.655 60.9599 0)
		)
		(property "Value" "10uF"
			(at 160.655 63.4999 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 158.4452 66.04 0)
		)
		(property "Datasheet" ""
			(at 157.48 62.23 0)
		)
		(property "Description" ""
			(at 157.48 62.23 0)
		)
		(property "DK" "1276-1096-1-ND"
			(at 157.48 62.23 0)
		)
		(property "PARTNO" "CL21A106KOQNNNE"
			(at 157.48 62.23 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C43")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 212.725 52.07 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R14"
			(at 214.63 50.7999 0)
		)
		(property "Value" "4.99k"
			(at 214.63 53.3399 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 213.741 52.324 90)
		)
		(property "Datasheet" "~"
			(at 212.725 52.07 0)
		)
		(property "Description" ""
			(at 212.725 52.07 0)
		)
		(property "DK" "311-4.99KLRCT-ND"
			(at 212.725 52.07 0)
		)
		(property "PARTNO" "RC0402FR-074K99L"
			(at 212.725 52.07 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "R14")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 46.101 40.64 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C37"
			(at 49.276 39.3699 0)
		)
		(property "Value" "47uF"
			(at 49.276 41.9099 0)
		)
		(property "Footprint" "Capacitor_SMD:C_1210_3225Metric"
			(at 47.0662 44.45 0)
		)
		(property "Datasheet" "~"
			(at 46.101 40.64 0)
		)
		(property "Description" ""
			(at 46.101 40.64 0)
		)
		(property "DK" "490-6539-1-ND"
			(at 46.101 40.64 0)
		)
		(property "PARTNO" "GRM32ER61C476KE15L"
			(at 46.101 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C37")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Polarized")
		(at 230.505 52.705 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C46"
			(at 233.68 50.5459 0)
		)
		(property "Value" "220uF"
			(at 233.68 53.0859 0)
		)
		(property "Footprint" "bitaxe:CAP_2R5TPE220MAFB"
			(at 231.4702 56.515 0)
		)
		(property "Datasheet" "https://media.digikey.com/pdf/Data%20Sheets/Panasonic%20Capacitors%20PDFs/TPE_Series_POSCAP_Rev02_Oct_2017.pdf"
			(at 230.505 52.705 0)
		)
		(property "Description" ""
			(at 230.505 52.705 0)
		)
		(property "PARTNO" "2R5TPE220MAFB"
			(at 230.505 52.705 0)
		)
		(property "DK" "P16200CT-ND"
			(at 230.505 52.705 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C46")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:TPS40305")
		(at 122.555 43.18 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U9"
			(at 112.395 26.67 0)
		)
		(property "Value" "TPS40305"
			(at 128.27 26.67 0)
		)
		(property "Footprint" "bitaxe:TPS40305"
			(at 108.585 54.61 0)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tps40303.pdf"
			(at 108.585 54.61 0)
		)
		(property "Description" ""
			(at 122.555 43.18 0)
		)
		(property "DK" "296-37445-1-ND"
			(at 122.555 43.18 0)
		)
		(property "PARTNO" "TPS40305DRCR"
			(at 122.555 43.18 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "U9")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Sensor:INA260")
		(at 67.945 135.89 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U8"
			(at 72.39 127 0)
		)
		(property "Value" "INA260"
			(at 70.485 144.78 0)
		)
		(property "Footprint" "Package_SO:TSSOP-16_4.4x5mm_P0.65mm"
			(at 67.945 151.13 0)
		)
		(property "Datasheet" "http://www.ti.com/lit/ds/symlink/ina260.pdf"
			(at 67.945 138.43 0)
		)
		(property "Description" ""
			(at 67.945 135.89 0)
		)
		(property "PARTNO" "INA260AIPW"
			(at 67.945 135.89 0)
		)
		(property "DK" "296-45218-5-ND"
			(at 67.945 135.89 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "U8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 24.511 40.64 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C34"
			(at 27.686 39.3699 0)
		)
		(property "Value" "47uF"
			(at 27.686 41.9099 0)
		)
		(property "Footprint" "Capacitor_SMD:C_1210_3225Metric"
			(at 25.4762 44.45 0)
		)
		(property "Datasheet" "~"
			(at 24.511 40.64 0)
		)
		(property "Description" ""
			(at 24.511 40.64 0)
		)
		(property "DK" "490-6539-1-ND"
			(at 24.511 40.64 0)
		)
		(property "PARTNO" "GRM32ER61C476KE15L"
			(at 24.511 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C34")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:Q_NMOS_CSD17311Q5_1")
		(at 180.34 55.88 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "Q2"
			(at 185.42 54.61 0)
		)
		(property "Value" "CSD17311Q5"
			(at 185.42 57.15 0)
		)
		(property "Footprint" "bitaxe:CSD17311Q5"
			(at 185.42 53.34 0)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/csd17311q5.pdf"
			(at 180.34 55.88 0)
		)
		(property "Description" ""
			(at 180.34 55.88 0)
		)
		(property "DK" "296-27625-1-ND"
			(at 180.34 55.88 0)
		)
		(property "PARTNO" "CSD17311Q5"
			(at 180.34 55.88 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "Q2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 68.326 40.894 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C39"
			(at 71.501 39.6239 0)
		)
		(property "Value" "3.3nF"
			(at 71.501 42.1639 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 69.2912 44.704 0)
		)
		(property "Datasheet" "~"
			(at 68.326 40.894 0)
		)
		(property "Description" ""
			(at 68.326 40.894 0)
		)
		(property "DK" "1276-1552-1-ND"
			(at 68.326 40.894 0)
		)
		(property "PARTNO" "CL05B332KB5NNNC"
			(at 68.326 40.894 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C39")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 35.306 40.64 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C36"
			(at 38.481 39.3699 0)
		)
		(property "Value" "47uF"
			(at 38.481 41.9099 0)
		)
		(property "Footprint" "Capacitor_SMD:C_1210_3225Metric"
			(at 36.2712 44.45 0)
		)
		(property "Datasheet" "~"
			(at 35.306 40.64 0)
		)
		(property "Description" ""
			(at 35.306 40.64 0)
		)
		(property "DK" "490-6539-1-ND"
			(at 35.306 40.64 0)
		)
		(property "PARTNO" "GRM32ER61C476KE15L"
			(at 35.306 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C36")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 57.531 40.64 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C38"
			(at 61.341 39.3699 0)
		)
		(property "Value" "1uF"
			(at 61.341 41.9099 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 58.4962 44.45 0)
		)
		(property "Datasheet" "~"
			(at 57.531 40.64 0)
		)
		(property "Description" ""
			(at 57.531 40.64 0)
		)
		(property "DK" "1276-6471-1-ND"
			(at 57.531 40.64 0)
		)
		(property "PARTNO" "CL21B105KOFNNNG"
			(at 57.531 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C38")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:DS4432U+")
		(at 226.06 117.475 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U10"
			(at 220.98 107.315 0)
		)
		(property "Value" "DS4432U+"
			(at 225.425 127.635 0)
		)
		(property "Footprint" "Package_SO:TSSOP-8_3x3mm_P0.65mm"
			(at 226.06 117.475 0)
		)
		(property "Datasheet" "https://datasheets.maximintegrated.com/en/ds/DS4432.pdf"
			(at 226.06 117.475 0)
		)
		(property "Description" ""
			(at 226.06 117.475 0)
		)
		(property "DK" "DS4432U+-ND"
			(at 226.06 117.475 0)
		)
		(property "PARTNO" "DS4432U+"
			(at 226.06 117.475 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "U10")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 243.205 52.705 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C47"
			(at 246.38 51.4349 0)
		)
		(property "Value" "100uF"
			(at 246.38 53.9749 0)
		)
		(property "Footprint" "Capacitor_SMD:C_1206_3216Metric"
			(at 244.1702 56.515 0)
		)
		(property "Datasheet" "~"
			(at 243.205 52.705 0)
		)
		(property "Description" ""
			(at 243.205 52.705 0)
		)
		(property "PARTNO" "C3216X5R0J107M160AB"
			(at 243.205 52.705 0)
		)
		(property "DK" "445-6008-1-ND"
			(at 243.205 52.705 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C47")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 95.25 56.515 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C41"
			(at 98.425 55.2449 0)
		)
		(property "Value" "1.5nF"
			(at 98.425 57.7849 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 96.2152 60.325 0)
		)
		(property "Datasheet" "~"
			(at 95.25 56.515 0)
		)
		(property "Description" ""
			(at 95.25 56.515 0)
		)
		(property "DK" "311-1128-1-ND"
			(at 95.25 56.515 0)
		)
		(property "PARTNO" "CC0805KRX7R9BB152"
			(at 95.25 56.515 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C41")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 212.725 68.58 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R15"
			(at 214.63 67.3099 0)
		)
		(property "Value" "3.32k"
			(at 214.63 69.8499 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 213.741 68.834 90)
		)
		(property "Datasheet" "~"
			(at 212.725 68.58 0)
		)
		(property "Description" ""
			(at 212.725 68.58 0)
		)
		(property "DK" "311-3.32KLRCT-ND"
			(at 212.725 68.58 0)
		)
		(property "PARTNO" "RC0402FR-073K32L"
			(at 212.725 68.58 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "R15")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 145.415 37.465 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C42"
			(at 149.225 36.1949 0)
		)
		(property "Value" "0.1uF"
			(at 149.225 38.7349 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 146.3802 41.275 0)
		)
		(property "Datasheet" ""
			(at 145.415 37.465 0)
		)
		(property "Description" ""
			(at 145.415 37.465 0)
		)
		(property "DK" "1292-1639-1-ND"
			(at 145.415 37.465 0)
		)
		(property "PARTNO" "0402X104K100CT"
			(at 145.415 37.465 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C42")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Transistor_FET:2N7002K")
		(at 68.58 61.468 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "Q4"
			(at 64.262 62.992 0)
		)
		(property "Value" "2N7002K"
			(at 58.674 65.278 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-323_SC-70"
			(at 73.66 63.373 0)
		)
		(property "Datasheet" "https://www.diodes.com/assets/Datasheets/ds30896.pdf"
			(at 68.58 61.468 0)
		)
		(property "Description" ""
			(at 68.58 61.468 0)
		)
		(property "DK" "2N7002KWCT-ND"
			(at 68.58 61.468 0)
		)
		(property "PARTNO" "2N7002KW"
			(at 68.58 61.468 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "Q4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector_Generic:Conn_01x02")
		(at 54.102 91.186 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "J7"
			(at 57.15 92.4559 0)
		)
		(property "Value" "Conn_01x02"
			(at 57.15 93.7259 0)
		)
		(property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_1x02_P2.54mm_Vertical"
			(at 54.102 91.186 0)
		)
		(property "Datasheet" "~"
			(at 54.102 91.186 0)
		)
		(property "Description" ""
			(at 54.102 91.186 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "J7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 238.125 128.905 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R16"
			(at 240.03 127.635 0)
		)
		(property "Value" "80.6k"
			(at 240.03 130.175 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 239.141 129.159 90)
		)
		(property "Datasheet" "~"
			(at 238.125 128.905 0)
		)
		(property "Description" ""
			(at 238.125 128.905 0)
		)
		(property "DK" "311-80.6KLRCT-ND"
			(at 238.125 128.905 0)
		)
		(property "PARTNO" "RC0402FR-0780K6L"
			(at 238.125 128.905 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "R16")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 193.04 118.11 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C44"
			(at 196.85 116.8399 0)
		)
		(property "Value" "1uF"
			(at 196.85 119.3799 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 194.0052 121.92 0)
		)
		(property "Datasheet" ""
			(at 193.04 118.11 0)
		)
		(property "Description" ""
			(at 193.04 118.11 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 193.04 118.11 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 193.04 118.11 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C44")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 201.93 45.72 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R13"
			(at 203.835 44.4499 0)
		)
		(property "Value" "1.33k"
			(at 203.835 46.9899 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 202.946 45.974 90)
		)
		(property "Datasheet" "~"
			(at 201.93 45.72 0)
		)
		(property "Description" ""
			(at 201.93 45.72 0)
		)
		(property "DK" "311-1.33KLRCT-ND"
			(at 201.93 45.72 0)
		)
		(property "PARTNO" "RC0402FR-071K33L"
			(at 201.93 45.72 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "R13")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 95.25 65.405 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R10"
			(at 97.155 64.1349 0)
		)
		(property "Value" "3.83k"
			(at 97.155 66.6749 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 96.266 65.659 90)
		)
		(property "Datasheet" "~"
			(at 95.25 65.405 0)
		)
		(property "Description" ""
			(at 95.25 65.405 0)
		)
		(property "DK" "311-3.83KLRCT-ND"
			(at 95.25 65.405 0)
		)
		(property "PARTNO" "RC0402FR-073K83L"
			(at 95.25 65.405 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "R10")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:Q_NMOS_CSD17311Q5_1")
		(at 180.34 30.48 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "Q1"
			(at 185.42 29.21 0)
		)
		(property "Value" "CSD17311Q5"
			(at 185.42 31.75 0)
		)
		(property "Footprint" "bitaxe:CSD17311Q5"
			(at 185.42 27.94 0)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/csd17311q5.pdf"
			(at 180.34 30.48 0)
		)
		(property "Description" ""
			(at 180.34 30.48 0)
		)
		(property "DK" "296-27625-1-ND"
			(at 180.34 30.48 0)
		)
		(property "PARTNO" "CSD17311Q5"
			(at 180.34 30.48 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "Q1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 201.93 55.88 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C45"
			(at 205.105 54.6099 0)
		)
		(property "Value" "470pF"
			(at 205.105 57.1499 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 202.8952 59.69 0)
		)
		(property "Datasheet" "~"
			(at 201.93 55.88 0)
		)
		(property "Description" ""
			(at 201.93 55.88 0)
		)
		(property "DK" "1292-1580-1-ND"
			(at 201.93 55.88 0)
		)
		(property "PARTNO" "0805B471K500CT"
			(at 201.93 55.88 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C45")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:L")
		(at 189.23 39.37 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "L1"
			(at 186.055 37.465 90)
		)
		(property "Value" "150nH"
			(at 195.58 37.465 90)
		)
		(property "Footprint" "bitaxe:FP1005R1-R15-R"
			(at 189.23 39.37 0)
		)
		(property "Datasheet" "https://www.eaton.com/content/dam/eaton/products/electronic-components/resources/data-sheet/eaton-fp1005r-high-current-power-inductors-data-sheet.pdf"
			(at 189.23 39.37 0)
		)
		(property "Description" ""
			(at 189.23 39.37 0)
		)
		(property "PARTNO" "FP1005R1-R15-R"
			(at 189.23 39.37 90)
		)
		(property "DK" "513-1568-1-ND"
			(at 189.23 39.37 90)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "L1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 170.18 61.595 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R12"
			(at 172.085 60.3249 0)
		)
		(property "Value" "4.12k"
			(at 172.085 62.8649 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 171.196 61.849 90)
		)
		(property "Datasheet" "~"
			(at 170.18 61.595 0)
		)
		(property "Description" ""
			(at 170.18 61.595 0)
		)
		(property "DK" "RMCF0402FT4K12CT-ND"
			(at 170.18 61.595 0)
		)
		(property "PARTNO" "RMCF0402FT4K12"
			(at 170.18 61.595 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "R12")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 45.085 136.525 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C35"
			(at 48.895 135.2549 0)
		)
		(property "Value" "1uF"
			(at 48.895 137.7949 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 46.0502 140.335 0)
		)
		(property "Datasheet" ""
			(at 45.085 136.525 0)
		)
		(property "Description" ""
			(at 45.085 136.525 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 45.085 136.525 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 45.085 136.525 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C35")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 87.63 60.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C40"
			(at 80.772 60.198 0)
		)
		(property "Value" "180pF"
			(at 76.962 62.738 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 88.5952 64.77 0)
		)
		(property "Datasheet" "~"
			(at 87.63 60.96 0)
		)
		(property "Description" ""
			(at 87.63 60.96 0)
		)
		(property "DK" "311-1114-1-ND"
			(at 87.63 60.96 0)
		)
		(property "PARTNO" "CC0805JRNPO9BN181"
			(at 87.63 60.96 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C40")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 135.89 110.49 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R4"
			(at 138.43 109.2199 0)
		)
		(property "Value" "10k"
			(at 138.43 111.7599 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 136.906 110.744 90)
		)
		(property "Datasheet" "~"
			(at 135.89 110.49 0)
		)
		(property "Description" ""
			(at 135.89 110.49 0)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 135.89 110.49 0)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 135.89 110.49 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "R4")
					(unit 1)
				)
			)
		)
	)
)
