(kicad_sch
	(version 20231120)
	(generator "eeschema")
	(generator_version "8.0")
	(paper "A")
	(title_block
		(title "Bitaxe Ultra")
		(date "2023-12-10")
		(rev "204")
	)
	(lib_symbols
		(symbol "Connector:TestPoint"
			(pin_numbers hide)
			(pin_names
				(offset 0.762) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "TP"
				(at 0 6.858 0)
			)
			(property "Value" "TestPoint"
				(at 0 5.08 0)
			)
			(property "Footprint" ""
				(at 5.08 0 0)
			)
			(property "Datasheet" "~"
				(at 5.08 0 0)
			)
			(property "Description" "test point"
				(at 0 0 0)
			)
			(property "ki_keywords" "test point tp"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Pin* Test*"
				(at 0 0 0)
			)
			(symbol "TestPoint_0_1"
				(circle
					(center 0 3.302)
					(radius 0.762)
					(fill
						(type none)
					)
				)
			)
			(symbol "TestPoint_1_1"
				(pin passive line
					(at 0 0 90)
					(length 2.54)
					(name "1")
					(number "1")
				)
			)
		)
		(symbol "Connector_Generic:Conn_01x05"
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "J"
				(at 0 7.62 0)
			)
			(property "Value" "Conn_01x05"
				(at 0 -7.62 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Generic connector, single row, 01x05, script generated (kicad-library-utils/schlib/autogen/connector/)"
				(at 0 0 0)
			)
			(property "ki_keywords" "connector"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Connector*:*_1x??_*"
				(at 0 0 0)
			)
			(symbol "Conn_01x05_1_1"
				(rectangle
					(start -1.27 -4.953)
					(end 0 -5.207)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 -2.413)
					(end 0 -2.667)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 0.127)
					(end 0 -0.127)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 2.667)
					(end 0 2.413)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 5.207)
					(end 0 4.953)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 6.35)
					(end 1.27 -6.35)
					(fill
						(type background)
					)
				)
				(pin passive line
					(at -5.08 5.08 0)
					(length 3.81)
					(name "Pin_1")
					(number "1")
				)
				(pin passive line
					(at -5.08 2.54 0)
					(length 3.81)
					(name "Pin_2")
					(number "2")
				)
				(pin passive line
					(at -5.08 0 0)
					(length 3.81)
					(name "Pin_3")
					(number "3")
				)
				(pin passive line
					(at -5.08 -2.54 0)
					(length 3.81)
					(name "Pin_4")
					(number "4")
				)
				(pin passive line
					(at -5.08 -5.08 0)
					(length 3.81)
					(name "Pin_5")
					(number "5")
				)
			)
		)
		(symbol "Device:C"
			(pin_numbers hide)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Unpolarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C_*"
				(at 0 0 0)
			)
			(symbol "C_0_1"
				(polyline
					(pts
						(xy -2.032 -0.762) (xy 2.032 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.032 0.762) (xy 2.032 0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:C_Polarized"
			(pin_numbers hide)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C_Polarized"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Polarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "CP_*"
				(at 0 0 0)
			)
			(symbol "C_Polarized_0_1"
				(rectangle
					(start -2.286 0.508)
					(end 2.286 1.016)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.778 2.286) (xy -0.762 2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 2.794) (xy -1.27 1.778)
					)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 2.286 -0.508)
					(end -2.286 -1.016)
					(fill
						(type outline)
					)
				)
			)
			(symbol "C_Polarized_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:R_US"
			(pin_numbers hide)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 2.54 0 90)
			)
			(property "Value" "R_US"
				(at -2.54 0 90)
			)
			(property "Footprint" ""
				(at 1.016 -0.254 90)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Resistor, US symbol"
				(at 0 0 0)
			)
			(property "ki_keywords" "R res resistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R_US_0_1"
				(polyline
					(pts
						(xy 0 -2.286) (xy 0 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.286) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -0.762) (xy 1.016 -1.143) (xy 0 -1.524) (xy -1.016 -1.905) (xy 0 -2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0.762) (xy 1.016 0.381) (xy 0 0) (xy -1.016 -0.381) (xy 0 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.286) (xy 1.016 1.905) (xy 0 1.524) (xy -1.016 1.143) (xy 0 0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_US_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "MCP1824_1"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -7.62 5.08 0)
			)
			(property "Value" "MCP1824_1"
				(at 5.08 5.08 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5"
				(at 0 0 0)
			)
			(property "Datasheet" "https://ww1.microchip.com/downloads/en/DeviceDoc/22070a.pdf"
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "MCP1824_1_0_1"
				(rectangle
					(start -7.62 3.81)
					(end 7.62 -6.35)
					(fill
						(type background)
					)
				)
			)
			(symbol "MCP1824_1_1_0"
				(pin bidirectional line
					(at -10.16 1.27 0)
					(length 2.54)
					(name "VIN")
					(number "1")
				)
				(pin bidirectional line
					(at 10.16 -1.27 180)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin bidirectional line
					(at -10.16 -1.27 0)
					(length 2.54)
					(name "EN")
					(number "3")
				)
				(pin bidirectional line
					(at -10.16 -3.81 0)
					(length 2.54)
					(name "PG")
					(number "4")
				)
				(pin bidirectional line
					(at 10.16 1.27 180)
					(length 2.54)
					(name "VOUT")
					(number "5")
				)
			)
		)
		(symbol "bitaxe:BM1366_mode1"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U14"
				(at 1.9559 24.13 0)
			)
			(property "Value" "BM1366_mode1"
				(at 1.9559 21.59 0)
			)
			(property "Footprint" "bitaxe:BM1366"
				(at 17.78 -33.02 0)
			)
			(property "Datasheet" ""
				(at -7.62 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "BM1366_mode1_0_1"
				(rectangle
					(start -15.24 20.32)
					(end 15.24 -17.78)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy 5.08 -1.27) (xy -5.08 -1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.08 -1.27) (xy 2.54 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.08 -1.27) (xy 2.54 0)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "BM1366_mode1_1_1"
				(pin power_in line
					(at -17.78 17.78 0)
					(length 2.54)
					(name "VDD1_0")
					(number "1")
				)
				(pin input line
					(at -17.78 -5.08 0)
					(length 2.54)
					(name "ADDR0")
					(number "10")
				)
				(pin input line
					(at -17.78 -7.62 0)
					(length 2.54)
					(name "ADDR1")
					(number "11")
				)
				(pin power_in line
					(at -17.78 -10.16 0)
					(length 2.54)
					(name "PLL_VSS")
					(number "12")
				)
				(pin power_in line
					(at -17.78 -12.7 0)
					(length 2.54)
					(name "VDDIO_08_0")
					(number "13")
				)
				(pin power_in line
					(at -17.78 -15.24 0)
					(length 2.54)
					(name "VDDIO_18_0")
					(number "14")
				)
				(pin power_in line
					(at 17.78 -15.24 180)
					(length 2.54)
					(name "VDDIO_18_1")
					(number "15")
				)
				(pin power_in line
					(at 17.78 -12.7 180)
					(length 2.54)
					(name "VDDIO_08_1")
					(number "16")
				)
				(pin power_in line
					(at 17.78 -10.16 180)
					(length 2.54)
					(name "VSS")
					(number "17")
				)
				(pin input line
					(at 17.78 -7.62 180)
					(length 2.54)
					(name "PIN_MODE")
					(number "18")
				)
				(pin output line
					(at 17.78 -5.08 180)
					(length 2.54)
					(name "INV_CLKO")
					(number "19")
				)
				(pin power_in line
					(at -17.78 15.24 0)
					(length 2.54)
					(name "VDD2_0")
					(number "2")
				)
				(pin output line
					(at 17.78 -2.54 180)
					(length 2.54)
					(name "CO")
					(number "20")
				)
				(pin output line
					(at 17.78 0 180)
					(length 2.54)
					(name "CLKO")
					(number "21")
				)
				(pin input line
					(at 17.78 2.54 180)
					(length 2.54)
					(name "RI")
					(number "22")
				)
				(pin output line
					(at 17.78 5.08 180)
					(length 2.54)
					(name "BO")
					(number "23")
				)
				(pin output line
					(at 17.78 7.62 180)
					(length 2.54)
					(name "NRSTO")
					(number "24")
				)
				(pin power_in line
					(at 17.78 10.16 180)
					(length 2.54)
					(name "VSS")
					(number "25")
				)
				(pin power_in line
					(at 17.78 12.7 180)
					(length 2.54)
					(name "VDD3_1")
					(number "26")
				)
				(pin power_in line
					(at 17.78 15.24 180)
					(length 2.54)
					(name "VDD2_1")
					(number "27")
				)
				(pin power_in line
					(at 17.78 17.78 180)
					(length 2.54)
					(name "VDD1_1")
					(number "28")
				)
				(pin power_in line
					(at 0 22.86 270)
					(length 2.54)
					(name "VDD")
					(number "29")
				)
				(pin power_in line
					(at -17.78 12.7 0)
					(length 2.54)
					(name "VDD3_0")
					(number "3")
				)
				(pin power_in line
					(at 0 -20.32 90)
					(length 2.54)
					(name "VSS")
					(number "30")
				)
				(pin power_in line
					(at -17.78 10.16 0)
					(length 2.54)
					(name "VSS")
					(number "4")
				)
				(pin input line
					(at -17.78 7.62 0)
					(length 2.54)
					(name "NRSTI")
					(number "5")
				)
				(pin input line
					(at -17.78 5.08 0)
					(length 2.54)
					(name "BI")
					(number "6")
				)
				(pin output line
					(at -17.78 2.54 0)
					(length 2.54)
					(name "RO")
					(number "7")
				)
				(pin input line
					(at -17.78 0 0)
					(length 2.54)
					(name "CLKI")
					(number "8")
				)
				(pin input line
					(at -17.78 -2.54 0)
					(length 2.54)
					(name "CI")
					(number "9")
				)
			)
		)
		(symbol "bitaxe:MCP1824"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -7.62 5.08 0)
			)
			(property "Value" "MCP1824"
				(at 5.08 5.08 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5"
				(at 0 0 0)
			)
			(property "Datasheet" "https://ww1.microchip.com/downloads/en/DeviceDoc/22070a.pdf"
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "MCP1824_0_1"
				(rectangle
					(start -7.62 3.81)
					(end 7.62 -6.35)
					(fill
						(type background)
					)
				)
			)
			(symbol "MCP1824_1_0"
				(pin bidirectional line
					(at -10.16 1.27 0)
					(length 2.54)
					(name "VIN")
					(number "1")
				)
				(pin bidirectional line
					(at 10.16 -1.27 180)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin bidirectional line
					(at -10.16 -1.27 0)
					(length 2.54)
					(name "EN")
					(number "3")
				)
				(pin bidirectional line
					(at -10.16 -3.81 0)
					(length 2.54)
					(name "PG")
					(number "4")
				)
				(pin bidirectional line
					(at 10.16 1.27 180)
					(length 2.54)
					(name "VOUT")
					(number "5")
				)
			)
		)
		(symbol "bitaxe:TXB0104RGYR"
			(pin_names
				(offset 1.016)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -8.89 12.7 0)
			)
			(property "Value" "TXB0104RGYR"
				(at -8.89 -11.43 0)
			)
			(property "Footprint" ""
				(at 26.67 -34.29 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "TXB0104RGYR_0_0"
				(rectangle
					(start -8.89 12.7)
					(end 10.16 -11.43)
					(fill
						(type background)
					)
				)
				(pin power_in line
					(at -11.43 10.16 0)
					(length 2.54)
					(name "VCCA")
					(number "1")
				)
				(pin bidirectional line
					(at 12.7 -5.08 180)
					(length 2.54)
					(name "B4")
					(number "10")
				)
				(pin bidirectional line
					(at 12.7 -2.54 180)
					(length 2.54)
					(name "B3")
					(number "11")
				)
				(pin bidirectional line
					(at 12.7 0 180)
					(length 2.54)
					(name "B2")
					(number "12")
				)
				(pin bidirectional line
					(at 12.7 2.54 180)
					(length 2.54)
					(name "B1")
					(number "13")
				)
				(pin power_in line
					(at 12.7 10.16 180)
					(length 2.54)
					(name "VCCB")
					(number "14")
				)
				(pin passive line
					(at 12.7 -8.89 180)
					(length 2.54) hide
					(name "GND")
					(number "15")
				)
				(pin passive line
					(at 12.7 -8.89 180)
					(length 2.54) hide
					(name "GND")
					(number "16")
				)
				(pin passive line
					(at 12.7 -8.89 180)
					(length 2.54) hide
					(name "GND")
					(number "17")
				)
				(pin passive line
					(at 12.7 -8.89 180)
					(length 2.54) hide
					(name "GND")
					(number "18")
				)
				(pin passive line
					(at 12.7 -8.89 180)
					(length 2.54) hide
					(name "GND")
					(number "19")
				)
				(pin bidirectional line
					(at -11.43 2.54 0)
					(length 2.54)
					(name "A1")
					(number "2")
				)
				(pin bidirectional line
					(at -11.43 0 0)
					(length 2.54)
					(name "A2")
					(number "3")
				)
				(pin bidirectional line
					(at -11.43 -2.54 0)
					(length 2.54)
					(name "A3")
					(number "4")
				)
				(pin bidirectional line
					(at -11.43 -5.08 0)
					(length 2.54)
					(name "A4")
					(number "5")
				)
				(pin power_in line
					(at 12.7 -8.89 180)
					(length 2.54)
					(name "GND")
					(number "7")
				)
				(pin input line
					(at -11.43 6.35 0)
					(length 2.54)
					(name "OE")
					(number "8")
				)
			)
			(symbol "TXB0104RGYR_1_1"
				(pin no_connect line
					(at -11.43 -8.89 0)
					(length 2.54) hide
					(name "NC")
					(number "6")
				)
				(pin no_connect line
					(at -11.43 -8.89 0)
					(length 2.54) hide
					(name "NC")
					(number "9")
				)
			)
		)
		(symbol "bitaxe:oscillator"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -3.81 5.08 0)
			)
			(property "Value" "oscillator"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at -1.27 -1.27 0)
			)
			(property "Datasheet" ""
				(at -1.27 -1.27 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "oscillator_0_1"
				(rectangle
					(start -5.08 3.81)
					(end 5.08 -3.81)
					(fill
						(type background)
					)
				)
			)
			(symbol "oscillator_1_0"
				(pin bidirectional line
					(at -7.62 1.27 0)
					(length 2.54)
					(name "EN")
					(number "1")
				)
				(pin bidirectional line
					(at -7.62 -1.27 0)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin bidirectional line
					(at 7.62 1.27 180)
					(length 2.54)
					(name "OUT")
					(number "3")
				)
				(pin bidirectional line
					(at 7.62 -1.27 180)
					(length 2.54)
					(name "VIN")
					(number "4")
				)
			)
		)
		(symbol "power:GND"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -6.35 0)
			)
			(property "Value" "GND"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "power-flag"
				(at 0 0 0)
			)
			(symbol "GND_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND")
					(number "1")
				)
			)
		)
	)
	(junction
		(at 120.015 46.355)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 112.395 134.62)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 143.51 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 223.52 44.45)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 154.94 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 216.535 31.115)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 160.655 134.62)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 81.28 134.62)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 224.155 57.785)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 251.46 156.21)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 79.375 172.085)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 105.41 59.055)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 60.325 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 73.025 134.62)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 106.68 134.62)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 247.65 71.12)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 38.1 123.825)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 250.825 31.115)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 151.13 134.62)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 217.17 57.785)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 247.015 44.45)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 223.52 31.115)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 109.22 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 99.695 46.355)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 112.395 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 99.695 59.055)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 72.39 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 120.015 59.055)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 109.855 46.355)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 109.855 59.055)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 83.82 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 205.74 137.16)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 238.125 156.21)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 56.515 123.825)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 141.605 134.62)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 166.37 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 251.46 137.16)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 251.46 57.785)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(wire
		(pts
			(xy 34.29 121.285) (xy 40.64 121.285)
		)
	)
	(wire
		(pts
			(xy 132.08 48.895) (xy 132.08 46.355)
		)
	)
	(wire
		(pts
			(xy 55.88 123.825) (xy 56.515 123.825)
		)
	)
	(wire
		(pts
			(xy 34.29 85.09) (xy 41.275 85.09)
		)
	)
	(wire
		(pts
			(xy 74.295 161.925) (xy 81.915 161.925)
		)
	)
	(wire
		(pts
			(xy 34.29 87.63) (xy 41.275 87.63)
		)
	)
	(wire
		(pts
			(xy 166.37 87.63) (xy 166.37 73.66)
		)
	)
	(wire
		(pts
			(xy 74.295 172.085) (xy 79.375 172.085)
		)
	)
	(wire
		(pts
			(xy 180.34 90.17) (xy 180.34 73.66)
		)
	)
	(wire
		(pts
			(xy 154.94 85.09) (xy 154.94 73.66)
		)
	)
	(wire
		(pts
			(xy 85.725 102.87) (xy 94.615 102.87)
		)
	)
	(wire
		(pts
			(xy 186.69 100.33) (xy 193.675 100.33)
		)
	)
	(wire
		(pts
			(xy 68.58 134.62) (xy 73.025 134.62)
		)
	)
	(wire
		(pts
			(xy 38.1 123.825) (xy 40.64 123.825)
		)
	)
	(wire
		(pts
			(xy 186.055 137.16) (xy 205.74 137.16)
		)
	)
	(wire
		(pts
			(xy 238.125 152.4) (xy 238.125 156.21)
		)
	)
	(wire
		(pts
			(xy 232.41 149.86) (xy 236.855 149.86)
		)
	)
	(wire
		(pts
			(xy 105.41 59.055) (xy 99.695 59.055)
		)
	)
	(wire
		(pts
			(xy 112.395 120.65) (xy 112.395 134.62)
		)
	)
	(wire
		(pts
			(xy 109.22 73.66) (xy 112.395 73.66)
		)
	)
	(wire
		(pts
			(xy 112.395 134.62) (xy 141.605 134.62)
		)
	)
	(wire
		(pts
			(xy 250.825 41.275) (xy 250.825 44.45)
		)
	)
	(wire
		(pts
			(xy 247.015 33.655) (xy 245.745 33.655)
		)
	)
	(wire
		(pts
			(xy 217.17 57.785) (xy 224.155 57.785)
		)
	)
	(wire
		(pts
			(xy 186.69 105.41) (xy 193.675 105.41)
		)
	)
	(wire
		(pts
			(xy 56.515 123.825) (xy 62.865 123.825)
		)
	)
	(wire
		(pts
			(xy 130.175 105.41) (xy 142.875 105.41)
		)
	)
	(wire
		(pts
			(xy 151.13 129.54) (xy 151.13 134.62)
		)
	)
	(wire
		(pts
			(xy 186.69 85.09) (xy 193.675 85.09)
		)
	)
	(wire
		(pts
			(xy 201.93 149.86) (xy 208.28 149.86)
		)
	)
	(wire
		(pts
			(xy 34.29 123.825) (xy 38.1 123.825)
		)
	)
	(wire
		(pts
			(xy 186.69 92.71) (xy 193.675 92.71)
		)
	)
	(wire
		(pts
			(xy 130.175 92.71) (xy 142.875 92.71)
		)
	)
	(wire
		(pts
			(xy 251.46 156.21) (xy 251.46 163.83)
		)
	)
	(wire
		(pts
			(xy 130.175 82.55) (xy 143.51 82.55)
		)
	)
	(wire
		(pts
			(xy 247.65 60.325) (xy 246.38 60.325)
		)
	)
	(wire
		(pts
			(xy 56.515 132.08) (xy 56.515 123.825)
		)
	)
	(wire
		(pts
			(xy 99.695 48.895) (xy 99.695 46.355)
		)
	)
	(wire
		(pts
			(xy 250.825 44.45) (xy 247.015 44.45)
		)
	)
	(wire
		(pts
			(xy 109.855 56.515) (xy 109.855 59.055)
		)
	)
	(wire
		(pts
			(xy 79.375 172.085) (xy 81.915 172.085)
		)
	)
	(wire
		(pts
			(xy 151.13 113.03) (xy 151.13 121.92)
		)
	)
	(wire
		(pts
			(xy 217.17 67.945) (xy 217.17 71.12)
		)
	)
	(wire
		(pts
			(xy 130.175 110.49) (xy 160.655 110.49)
		)
	)
	(wire
		(pts
			(xy 208.28 140.97) (xy 205.74 140.97)
		)
	)
	(wire
		(pts
			(xy 81.28 115.57) (xy 94.615 115.57)
		)
	)
	(wire
		(pts
			(xy 52.705 132.08) (xy 56.515 132.08)
		)
	)
	(wire
		(pts
			(xy 232.41 152.4) (xy 238.125 152.4)
		)
	)
	(wire
		(pts
			(xy 217.17 57.785) (xy 217.17 60.325)
		)
	)
	(wire
		(pts
			(xy 247.65 71.12) (xy 217.17 71.12)
		)
	)
	(wire
		(pts
			(xy 141.605 73.66) (xy 143.51 73.66)
		)
	)
	(wire
		(pts
			(xy 251.46 67.945) (xy 251.46 71.12)
		)
	)
	(wire
		(pts
			(xy 201.93 144.78) (xy 208.28 144.78)
		)
	)
	(wire
		(pts
			(xy 109.855 48.895) (xy 109.855 46.355)
		)
	)
	(wire
		(pts
			(xy 151.13 134.62) (xy 160.655 134.62)
		)
	)
	(wire
		(pts
			(xy 251.46 57.785) (xy 259.715 57.785)
		)
	)
	(wire
		(pts
			(xy 81.915 73.66) (xy 83.82 73.66)
		)
	)
	(wire
		(pts
			(xy 186.69 95.25) (xy 193.675 95.25)
		)
	)
	(wire
		(pts
			(xy 153.035 73.66) (xy 154.94 73.66)
		)
	)
	(wire
		(pts
			(xy 251.46 71.12) (xy 247.65 71.12)
		)
	)
	(wire
		(pts
			(xy 109.22 69.85) (xy 109.22 73.66)
		)
	)
	(wire
		(pts
			(xy 224.155 60.325) (xy 224.155 57.785)
		)
	)
	(wire
		(pts
			(xy 216.535 41.275) (xy 216.535 44.45)
		)
	)
	(wire
		(pts
			(xy 72.39 73.66) (xy 74.295 73.66)
		)
	)
	(wire
		(pts
			(xy 85.725 105.41) (xy 94.615 105.41)
		)
	)
	(wire
		(pts
			(xy 223.52 31.115) (xy 225.425 31.115)
		)
	)
	(wire
		(pts
			(xy 60.325 87.63) (xy 60.325 73.66)
		)
	)
	(wire
		(pts
			(xy 247.65 60.325) (xy 247.65 71.12)
		)
	)
	(wire
		(pts
			(xy 120.015 59.055) (xy 109.855 59.055)
		)
	)
	(wire
		(pts
			(xy 69.85 73.66) (xy 72.39 73.66)
		)
	)
	(wire
		(pts
			(xy 251.46 137.16) (xy 254 137.16)
		)
	)
	(wire
		(pts
			(xy 251.46 137.16) (xy 251.46 145.415)
		)
	)
	(wire
		(pts
			(xy 34.29 95.25) (xy 41.275 95.25)
		)
	)
	(wire
		(pts
			(xy 73.025 130.175) (xy 73.025 134.62)
		)
	)
	(wire
		(pts
			(xy 46.99 73.66) (xy 50.8 73.66)
		)
	)
	(wire
		(pts
			(xy 143.51 73.66) (xy 145.415 73.66)
		)
	)
	(wire
		(pts
			(xy 73.025 134.62) (xy 81.28 134.62)
		)
	)
	(wire
		(pts
			(xy 186.69 97.79) (xy 193.675 97.79)
		)
	)
	(wire
		(pts
			(xy 232.41 147.32) (xy 236.855 147.32)
		)
	)
	(wire
		(pts
			(xy 130.175 87.63) (xy 166.37 87.63)
		)
	)
	(wire
		(pts
			(xy 223.52 33.655) (xy 225.425 33.655)
		)
	)
	(wire
		(pts
			(xy 232.41 156.21) (xy 238.125 156.21)
		)
	)
	(wire
		(pts
			(xy 130.175 90.17) (xy 180.34 90.17)
		)
	)
	(wire
		(pts
			(xy 34.29 82.55) (xy 41.275 82.55)
		)
	)
	(wire
		(pts
			(xy 130.175 107.95) (xy 142.875 107.95)
		)
	)
	(wire
		(pts
			(xy 83.82 82.55) (xy 94.615 82.55)
		)
	)
	(wire
		(pts
			(xy 99.695 59.055) (xy 89.535 59.055)
		)
	)
	(wire
		(pts
			(xy 133.985 73.66) (xy 112.395 73.66)
		)
	)
	(wire
		(pts
			(xy 60.325 73.66) (xy 62.23 73.66)
		)
	)
	(wire
		(pts
			(xy 73.025 113.03) (xy 73.025 122.555)
		)
	)
	(wire
		(pts
			(xy 224.155 57.785) (xy 226.06 57.785)
		)
	)
	(wire
		(pts
			(xy 93.345 73.66) (xy 109.22 73.66)
		)
	)
	(wire
		(pts
			(xy 85.725 107.95) (xy 94.615 107.95)
		)
	)
	(wire
		(pts
			(xy 73.025 113.03) (xy 94.615 113.03)
		)
	)
	(wire
		(pts
			(xy 89.535 56.515) (xy 89.535 59.055)
		)
	)
	(wire
		(pts
			(xy 247.015 33.655) (xy 247.015 44.45)
		)
	)
	(wire
		(pts
			(xy 109.855 59.055) (xy 105.41 59.055)
		)
	)
	(wire
		(pts
			(xy 165.1 73.66) (xy 166.37 73.66)
		)
	)
	(wire
		(pts
			(xy 109.855 46.355) (xy 120.015 46.355)
		)
	)
	(wire
		(pts
			(xy 130.175 95.25) (xy 142.875 95.25)
		)
	)
	(wire
		(pts
			(xy 58.42 73.66) (xy 60.325 73.66)
		)
	)
	(wire
		(pts
			(xy 232.41 144.78) (xy 236.855 144.78)
		)
	)
	(wire
		(pts
			(xy 246.38 57.785) (xy 251.46 57.785)
		)
	)
	(wire
		(pts
			(xy 130.175 100.33) (xy 142.875 100.33)
		)
	)
	(wire
		(pts
			(xy 120.015 48.895) (xy 120.015 46.355)
		)
	)
	(wire
		(pts
			(xy 106.045 69.85) (xy 109.22 69.85)
		)
	)
	(wire
		(pts
			(xy 72.39 85.09) (xy 72.39 73.66)
		)
	)
	(wire
		(pts
			(xy 85.725 92.71) (xy 94.615 92.71)
		)
	)
	(wire
		(pts
			(xy 238.125 156.21) (xy 251.46 156.21)
		)
	)
	(wire
		(pts
			(xy 216.535 31.115) (xy 223.52 31.115)
		)
	)
	(wire
		(pts
			(xy 213.995 31.115) (xy 216.535 31.115)
		)
	)
	(wire
		(pts
			(xy 216.535 31.115) (xy 216.535 33.655)
		)
	)
	(wire
		(pts
			(xy 141.605 129.54) (xy 141.605 134.62)
		)
	)
	(wire
		(pts
			(xy 224.155 60.325) (xy 226.06 60.325)
		)
	)
	(wire
		(pts
			(xy 81.28 129.54) (xy 81.28 134.62)
		)
	)
	(wire
		(pts
			(xy 34.29 100.33) (xy 41.275 100.33)
		)
	)
	(wire
		(pts
			(xy 214.63 57.785) (xy 217.17 57.785)
		)
	)
	(wire
		(pts
			(xy 186.69 87.63) (xy 193.675 87.63)
		)
	)
	(wire
		(pts
			(xy 72.39 85.09) (xy 94.615 85.09)
		)
	)
	(wire
		(pts
			(xy 55.88 121.285) (xy 62.865 121.285)
		)
	)
	(wire
		(pts
			(xy 245.745 31.115) (xy 250.825 31.115)
		)
	)
	(wire
		(pts
			(xy 160.655 110.49) (xy 160.655 134.62)
		)
	)
	(wire
		(pts
			(xy 62.865 100.33) (xy 62.865 121.285)
		)
	)
	(wire
		(pts
			(xy 143.51 82.55) (xy 143.51 73.66)
		)
	)
	(wire
		(pts
			(xy 130.175 115.57) (xy 141.605 115.57)
		)
	)
	(wire
		(pts
			(xy 251.46 153.035) (xy 251.46 156.21)
		)
	)
	(wire
		(pts
			(xy 99.695 56.515) (xy 99.695 59.055)
		)
	)
	(wire
		(pts
			(xy 130.175 85.09) (xy 154.94 85.09)
		)
	)
	(wire
		(pts
			(xy 201.93 152.4) (xy 208.28 152.4)
		)
	)
	(wire
		(pts
			(xy 56.515 106.045) (xy 56.515 109.855)
		)
	)
	(wire
		(pts
			(xy 186.055 153.035) (xy 186.055 163.83)
		)
	)
	(wire
		(pts
			(xy 186.69 107.95) (xy 193.675 107.95)
		)
	)
	(wire
		(pts
			(xy 154.94 73.66) (xy 157.48 73.66)
		)
	)
	(wire
		(pts
			(xy 112.395 73.66) (xy 112.395 77.47)
		)
	)
	(wire
		(pts
			(xy 180.34 73.66) (xy 176.53 73.66)
		)
	)
	(wire
		(pts
			(xy 60.325 87.63) (xy 94.615 87.63)
		)
	)
	(wire
		(pts
			(xy 160.655 134.62) (xy 170.815 134.62)
		)
	)
	(wire
		(pts
			(xy 141.605 115.57) (xy 141.605 121.92)
		)
	)
	(wire
		(pts
			(xy 56.515 95.25) (xy 94.615 95.25)
		)
	)
	(wire
		(pts
			(xy 85.725 97.79) (xy 94.615 97.79)
		)
	)
	(wire
		(pts
			(xy 89.535 46.355) (xy 99.695 46.355)
		)
	)
	(wire
		(pts
			(xy 250.825 31.115) (xy 250.825 33.655)
		)
	)
	(wire
		(pts
			(xy 81.28 115.57) (xy 81.28 121.92)
		)
	)
	(wire
		(pts
			(xy 223.52 44.45) (xy 216.535 44.45)
		)
	)
	(wire
		(pts
			(xy 130.175 97.79) (xy 142.875 97.79)
		)
	)
	(wire
		(pts
			(xy 56.515 95.25) (xy 56.515 98.425)
		)
	)
	(wire
		(pts
			(xy 166.37 73.66) (xy 168.91 73.66)
		)
	)
	(wire
		(pts
			(xy 251.46 57.785) (xy 251.46 60.325)
		)
	)
	(wire
		(pts
			(xy 120.015 46.355) (xy 132.08 46.355)
		)
	)
	(wire
		(pts
			(xy 250.825 31.115) (xy 259.08 31.115)
		)
	)
	(wire
		(pts
			(xy 186.055 145.415) (xy 186.055 137.16)
		)
	)
	(wire
		(pts
			(xy 74.295 167.005) (xy 81.915 167.005)
		)
	)
	(wire
		(pts
			(xy 223.52 33.655) (xy 223.52 31.115)
		)
	)
	(wire
		(pts
			(xy 99.695 46.355) (xy 109.855 46.355)
		)
	)
	(wire
		(pts
			(xy 62.865 100.33) (xy 94.615 100.33)
		)
	)
	(wire
		(pts
			(xy 141.605 134.62) (xy 151.13 134.62)
		)
	)
	(wire
		(pts
			(xy 34.29 105.41) (xy 41.275 105.41)
		)
	)
	(wire
		(pts
			(xy 232.41 137.16) (xy 251.46 137.16)
		)
	)
	(wire
		(pts
			(xy 132.08 56.515) (xy 132.08 59.055)
		)
	)
	(wire
		(pts
			(xy 45.085 132.08) (xy 38.1 132.08)
		)
	)
	(wire
		(pts
			(xy 186.69 102.87) (xy 193.675 102.87)
		)
	)
	(wire
		(pts
			(xy 120.015 56.515) (xy 120.015 59.055)
		)
	)
	(wire
		(pts
			(xy 89.535 48.895) (xy 89.535 46.355)
		)
	)
	(wire
		(pts
			(xy 83.82 73.66) (xy 85.725 73.66)
		)
	)
	(wire
		(pts
			(xy 94.615 90.17) (xy 46.99 90.17)
		)
	)
	(wire
		(pts
			(xy 205.74 140.97) (xy 205.74 137.16)
		)
	)
	(wire
		(pts
			(xy 94.615 110.49) (xy 68.58 110.49)
		)
	)
	(wire
		(pts
			(xy 81.28 134.62) (xy 106.68 134.62)
		)
	)
	(wire
		(pts
			(xy 186.69 82.55) (xy 193.675 82.55)
		)
	)
	(wire
		(pts
			(xy 74.295 164.465) (xy 81.915 164.465)
		)
	)
	(wire
		(pts
			(xy 83.82 73.66) (xy 83.82 82.55)
		)
	)
	(wire
		(pts
			(xy 205.74 137.16) (xy 208.28 137.16)
		)
	)
	(wire
		(pts
			(xy 74.295 169.545) (xy 81.915 169.545)
		)
	)
	(wire
		(pts
			(xy 130.175 113.03) (xy 151.13 113.03)
		)
	)
	(wire
		(pts
			(xy 201.93 147.32) (xy 208.28 147.32)
		)
	)
	(wire
		(pts
			(xy 186.055 163.83) (xy 251.46 163.83)
		)
	)
	(wire
		(pts
			(xy 38.1 132.08) (xy 38.1 123.825)
		)
	)
	(wire
		(pts
			(xy 120.015 59.055) (xy 132.08 59.055)
		)
	)
	(wire
		(pts
			(xy 130.175 102.87) (xy 142.875 102.87)
		)
	)
	(wire
		(pts
			(xy 68.58 110.49) (xy 68.58 134.62)
		)
	)
	(wire
		(pts
			(xy 46.99 90.17) (xy 46.99 73.66)
		)
	)
	(wire
		(pts
			(xy 106.68 134.62) (xy 112.395 134.62)
		)
	)
	(wire
		(pts
			(xy 34.29 107.95) (xy 41.275 107.95)
		)
	)
	(wire
		(pts
			(xy 247.015 44.45) (xy 223.52 44.45)
		)
	)
	(text "1V8 Serial Debug Headers"
		(exclude_from_sim no)
		(at 67.945 156.845 0)
	)
	(text "Reference Voltage Regulators"
		(exclude_from_sim no)
		(at 223.52 24.765 0)
	)
	(text "IO Level Shifter"
		(exclude_from_sim no)
		(at 212.725 130.81 0)
	)
	(label "VDD1_0"
		(at 85.725 82.55 0)
	)
	(label "GND"
		(at 231.775 44.45 0)
	)
	(label "NRSTO"
		(at 142.875 92.71 180)
	)
	(label "GND"
		(at 171.45 90.17 0)
	)
	(label "BO"
		(at 142.875 95.25 180)
	)
	(label "ADDR1"
		(at 85.725 107.95 0)
	)
	(label "GND"
		(at 74.295 172.085 0)
	)
	(label "VDD1_1"
		(at 186.69 82.55 0)
	)
	(label "CLKO"
		(at 186.69 100.33 0)
	)
	(label "INV_CLKO"
		(at 142.875 105.41 180)
	)
	(label "1V8"
		(at 254.635 31.115 0)
	)
	(label "CO"
		(at 186.69 102.87 0)
	)
	(label "PIN_MODE"
		(at 142.875 107.95 180)
	)
	(label "VDD2_1"
		(at 142.875 85.09 180)
	)
	(label "VDD2_1"
		(at 186.69 85.09 0)
	)
	(label "RI"
		(at 186.69 97.79 0)
	)
	(label "GND"
		(at 52.07 90.17 0)
	)
	(label "CI"
		(at 74.295 164.465 0)
	)
	(label "GND"
		(at 116.205 134.62 0)
	)
	(label "5V"
		(at 214.63 57.785 0)
	)
	(label "RO"
		(at 201.93 144.78 0)
	)
	(label "1V8"
		(at 34.29 121.285 0)
	)
	(label "VDD"
		(at 114.3 73.66 0)
	)
	(label "RST_N"
		(at 74.295 169.545 0)
	)
	(label "0V8"
		(at 255.27 57.785 0)
	)
	(label "BI"
		(at 41.275 95.25 180)
	)
	(label "VDD3_1"
		(at 186.69 87.63 0)
	)
	(label "CLKO"
		(at 142.875 100.33 180)
	)
	(label "GND"
		(at 34.29 123.825 0)
	)
	(label "RO"
		(at 74.295 167.005 0)
	)
	(label "VDD3_0"
		(at 85.725 87.63 0)
	)
	(label "5V"
		(at 213.995 31.115 0)
	)
	(label "VDD"
		(at 112.395 46.355 0)
	)
	(label "RO"
		(at 85.725 97.79 0)
	)
	(label "GND"
		(at 56.515 109.855 0)
	)
	(label "VDD1_1"
		(at 142.875 82.55 180)
	)
	(label "ADDR0"
		(at 85.725 105.41 0)
	)
	(label "ADDR0"
		(at 34.925 105.41 0)
	)
	(label "BO"
		(at 186.69 95.25 0)
	)
	(label "1V8"
		(at 200.66 137.16 0)
	)
	(label "CLKI"
		(at 85.725 100.33 0)
	)
	(label "CO"
		(at 142.875 102.87 180)
	)
	(label "RST_N"
		(at 85.725 92.71 0)
	)
	(label "VDD3_0"
		(at 41.275 87.63 180)
	)
	(label "ADDR1"
		(at 34.925 107.95 0)
	)
	(label "1V8"
		(at 85.725 115.57 0)
	)
	(label "GND"
		(at 232.41 71.12 0)
	)
	(label "GND"
		(at 201.93 152.4 0)
	)
	(label "CLKI"
		(at 41.275 100.33 180)
	)
	(label "NRSTO"
		(at 186.69 92.71 0)
	)
	(label "RI"
		(at 142.875 97.79 180)
	)
	(label "VDD1_0"
		(at 41.275 82.55 180)
	)
	(label "PIN_MODE"
		(at 186.69 107.95 0)
	)
	(label "VDD2_0"
		(at 85.725 85.09 0)
	)
	(label "BI"
		(at 85.725 95.25 0)
	)
	(label "GND"
		(at 217.17 163.83 0)
	)
	(label "VDD2_0"
		(at 41.275 85.09 180)
	)
	(label "CI"
		(at 201.93 147.32 0)
	)
	(label "CI"
		(at 85.725 102.87 0)
	)
	(label "VDD3_1"
		(at 142.875 87.63 180)
	)
	(label "1V8"
		(at 59.055 123.825 0)
	)
	(label "0V8"
		(at 85.725 113.03 0)
	)
	(label "GND"
		(at 117.475 59.055 180)
	)
	(label "INV_CLKO"
		(at 186.69 105.41 0)
	)
	(label "1V8"
		(at 74.295 161.925 0)
	)
	(label "RST_N"
		(at 201.93 149.86 0)
	)
	(label "3V3"
		(at 236.22 137.16 0)
	)
	(global_label "GND"
		(shape input)
		(at 170.815 134.62 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 177.0986 134.5406 0)
		)
	)
	(hierarchical_label "RST"
		(shape input)
		(at 236.855 149.86 0)
	)
	(hierarchical_label "5V"
		(shape input)
		(at 213.995 31.115 180)
	)
	(hierarchical_label "3V3"
		(shape input)
		(at 254 137.16 0)
	)
	(hierarchical_label "TX"
		(shape input)
		(at 236.855 147.32 0)
	)
	(hierarchical_label "VDD"
		(shape input)
		(at 106.045 69.85 180)
	)
	(hierarchical_label "RX"
		(shape output)
		(at 236.855 144.78 0)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 34.29 87.63 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP36"
			(at 27.94 87.63 90)
		)
		(property "Value" "TestPoint"
			(at 28.575 86.3601 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 34.29 82.55 0)
		)
		(property "Datasheet" "~"
			(at 34.29 82.55 0)
		)
		(property "Description" ""
			(at 34.29 87.63 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "TP36")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 250.825 37.465 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C24"
			(at 252.095 35.56 0)
		)
		(property "Value" "1uF"
			(at 252.73 41.275 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 250.825 37.465 0)
		)
		(property "Datasheet" ""
			(at 250.825 37.465 0)
		)
		(property "Description" ""
			(at 250.825 37.465 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 250.825 37.465 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 250.825 37.465 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C24")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 216.535 37.465 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C22"
			(at 217.805 35.56 0)
		)
		(property "Value" "1uF"
			(at 217.805 41.275 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 216.535 37.465 0)
		)
		(property "Datasheet" ""
			(at 216.535 37.465 0)
		)
		(property "Description" ""
			(at 216.535 37.465 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 216.535 37.465 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 216.535 37.465 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C22")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 74.295 169.545 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP4"
			(at 67.945 169.545 90)
		)
		(property "Value" "TestPoint"
			(at 68.58 170.8149 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 74.295 174.625 0)
		)
		(property "Datasheet" "~"
			(at 74.295 174.625 0)
		)
		(property "Description" ""
			(at 74.295 169.545 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "TP4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 89.535 52.705 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7"
			(at 90.805 50.8 0)
		)
		(property "Value" "0.1uF"
			(at 90.805 55.88 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 89.535 52.705 0)
		)
		(property "Datasheet" ""
			(at 89.535 52.705 0)
		)
		(property "Description" ""
			(at 89.535 52.705 0)
		)
		(property "DK" "1292-1639-1-ND"
			(at 89.535 52.705 0)
		)
		(property "PARTNO" "0402X104K100CT"
			(at 89.535 52.705 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 193.675 102.87 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP45"
			(at 200.025 102.87 90)
		)
		(property "Value" "TestPoint"
			(at 199.39 104.1399 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 193.675 107.95 0)
		)
		(property "Datasheet" "~"
			(at 193.675 107.95 0)
		)
		(property "Description" ""
			(at 193.675 102.87 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "TP45")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 172.72 73.66 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C18"
			(at 170.18 71.12 90)
		)
		(property "Value" "1uF"
			(at 171.45 74.295 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 172.72 73.66 0)
		)
		(property "Datasheet" ""
			(at 172.72 73.66 0)
		)
		(property "Description" ""
			(at 172.72 73.66 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 172.72 73.66 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 172.72 73.66 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C18")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 106.68 134.62 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR02"
			(at 106.68 140.97 0)
		)
		(property "Value" "GND"
			(at 106.68 139.065 0)
		)
		(property "Footprint" ""
			(at 106.68 134.62 0)
		)
		(property "Datasheet" ""
			(at 106.68 134.62 0)
		)
		(property "Description" ""
			(at 106.68 134.62 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "#PWR02")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 34.29 85.09 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP35"
			(at 27.94 85.09 90)
		)
		(property "Value" "TestPoint"
			(at 28.575 83.8201 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 34.29 80.01 0)
		)
		(property "Datasheet" "~"
			(at 34.29 80.01 0)
		)
		(property "Description" ""
			(at 34.29 85.09 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "TP35")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 34.29 95.25 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP9"
			(at 27.94 95.25 90)
		)
		(property "Value" "TestPoint"
			(at 28.575 93.9801 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 34.29 90.17 0)
		)
		(property "Datasheet" "~"
			(at 34.29 90.17 0)
		)
		(property "Description" ""
			(at 34.29 95.25 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "TP9")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 161.29 73.66 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C17"
			(at 158.75 71.12 90)
		)
		(property "Value" "1uF"
			(at 160.02 74.295 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 161.29 73.66 0)
		)
		(property "Datasheet" ""
			(at 161.29 73.66 0)
		)
		(property "Description" ""
			(at 161.29 73.66 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 161.29 73.66 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 161.29 73.66 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C17")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 74.295 167.005 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP3"
			(at 67.945 167.005 90)
		)
		(property "Value" "TestPoint"
			(at 68.58 165.7351 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 74.295 161.925 0)
		)
		(property "Datasheet" "~"
			(at 74.295 161.925 0)
		)
		(property "Description" ""
			(at 74.295 167.005 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "TP3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector_Generic:Conn_01x05")
		(at 86.995 167.005 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "J3"
			(at 85.725 159.385 0)
		)
		(property "Value" "Conn_01x05"
			(at 89.535 168.2749 0)
		)
		(property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_1x05_P2.54mm_Vertical"
			(at 86.995 167.005 0)
		)
		(property "Datasheet" "~"
			(at 86.995 167.005 0)
		)
		(property "Description" ""
			(at 86.995 167.005 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "J3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 193.675 87.63 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP40"
			(at 200.025 87.63 90)
		)
		(property "Value" "TestPoint"
			(at 199.39 88.8999 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 193.675 92.71 0)
		)
		(property "Datasheet" "~"
			(at 193.675 92.71 0)
		)
		(property "Description" ""
			(at 193.675 87.63 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "TP40")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 251.46 149.225 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C20"
			(at 252.095 147.32 0)
		)
		(property "Value" "0.1uF"
			(at 252.73 153.035 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 251.46 149.225 0)
		)
		(property "Datasheet" ""
			(at 251.46 149.225 0)
		)
		(property "Description" ""
			(at 251.46 149.225 0)
		)
		(property "DK" "1292-1639-1-ND"
			(at 251.46 149.225 0)
		)
		(property "PARTNO" "0402X104K100CT"
			(at 251.46 149.225 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C20")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:oscillator")
		(at 48.26 122.555 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U1"
			(at 44.45 117.475 0)
		)
		(property "Value" "25MHz"
			(at 50.165 127.635 0)
		)
		(property "Footprint" "bitaxe:O 25,0-JO32-B-1V3-1-T1-LF"
			(at 46.99 123.825 0)
		)
		(property "Datasheet" "https://www.jauch.com/downloadfile/5ef1edcfb8e2f73163c8ce8009ef659d1/jo32-1.8-3.3v.pdf"
			(at 46.99 123.825 0)
		)
		(property "Description" ""
			(at 48.26 122.555 0)
		)
		(property "DK" "1908-O250-JO32-B-1V3-1-T1-LFCT-ND"
			(at 48.26 122.555 0)
		)
		(property "PARTNO" "O 25,0-JO32-B-1V3-1-T1-LF"
			(at 48.26 122.555 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "U1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 99.695 52.705 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C9"
			(at 100.965 50.8 0)
		)
		(property "Value" "0.1uF"
			(at 100.965 55.88 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 99.695 52.705 0)
		)
		(property "Datasheet" ""
			(at 99.695 52.705 0)
		)
		(property "Description" ""
			(at 99.695 52.705 0)
		)
		(property "DK" "1292-1639-1-ND"
			(at 99.695 52.705 0)
		)
		(property "PARTNO" "0402X104K100CT"
			(at 99.695 52.705 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C9")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 186.055 149.225 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C19"
			(at 186.69 147.955 0)
		)
		(property "Value" "0.1uF"
			(at 186.69 153.035 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 186.055 149.225 0)
		)
		(property "Datasheet" ""
			(at 186.055 149.225 0)
		)
		(property "Description" ""
			(at 186.055 149.225 0)
		)
		(property "DK" "1292-1639-1-ND"
			(at 186.055 149.225 0)
		)
		(property "PARTNO" "0402X104K100CT"
			(at 186.055 149.225 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C19")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Polarized")
		(at 132.08 52.705 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C13"
			(at 135.255 50.5459 0)
		)
		(property "Value" "330uF"
			(at 135.255 53.0859 0)
		)
		(property "Footprint" "Capacitor_Tantalum_SMD:CP_EIA-7343-31_Kemet-D_Pad2.25x2.55mm_HandSolder"
			(at 133.0452 56.515 0)
		)
		(property "Datasheet" "~"
			(at 132.08 52.705 0)
		)
		(property "Description" ""
			(at 132.08 52.705 0)
		)
		(property "DK" "718-1028-1-ND"
			(at 132.08 52.705 0)
		)
		(property "PARTNO" "293D337X9010E2TE3"
			(at 132.08 52.705 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C13")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 193.675 82.55 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP42"
			(at 200.025 82.55 90)
		)
		(property "Value" "TestPoint"
			(at 199.39 83.8199 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 193.675 87.63 0)
		)
		(property "Datasheet" "~"
			(at 193.675 87.63 0)
		)
		(property "Description" ""
			(at 193.675 82.55 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "TP42")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 193.675 97.79 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP43"
			(at 200.025 97.79 90)
		)
		(property "Value" "TestPoint"
			(at 199.39 99.0599 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 193.675 102.87 0)
		)
		(property "Datasheet" "~"
			(at 193.675 102.87 0)
		)
		(property "Description" ""
			(at 193.675 97.79 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "TP43")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 34.29 82.55 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP34"
			(at 27.94 82.55 90)
		)
		(property "Value" "TestPoint"
			(at 28.575 81.2801 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 34.29 77.47 0)
		)
		(property "Datasheet" "~"
			(at 34.29 77.47 0)
		)
		(property "Description" ""
			(at 34.29 82.55 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "TP34")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 48.895 132.08 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C1"
			(at 46.99 133.35 90)
		)
		(property "Value" "0.1uF"
			(at 55.88 133.35 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 48.895 132.08 0)
		)
		(property "Datasheet" ""
			(at 48.895 132.08 0)
		)
		(property "Description" ""
			(at 48.895 132.08 0)
		)
		(property "DK" "1292-1639-1-ND"
			(at 48.895 132.08 0)
		)
		(property "PARTNO" "0402X104K100CT"
			(at 48.895 132.08 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 259.715 57.785 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP14"
			(at 266.065 57.785 90)
		)
		(property "Value" "TestPoint"
			(at 265.43 56.5151 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 259.715 52.705 0)
		)
		(property "Datasheet" "~"
			(at 259.715 52.705 0)
		)
		(property "Description" ""
			(at 259.715 57.785 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "TP14")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 193.675 92.71 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP38"
			(at 200.025 92.71 90)
		)
		(property "Value" "TestPoint"
			(at 199.39 93.9799 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 193.675 97.79 0)
		)
		(property "Datasheet" "~"
			(at 193.675 97.79 0)
		)
		(property "Description" ""
			(at 193.675 92.71 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "TP38")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 34.29 105.41 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP8"
			(at 27.94 105.41 90)
		)
		(property "Value" "TestPoint"
			(at 28.575 104.1401 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 34.29 100.33 0)
		)
		(property "Datasheet" "~"
			(at 34.29 100.33 0)
		)
		(property "Description" ""
			(at 34.29 105.41 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "TP8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 137.795 73.66 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C12"
			(at 134.62 71.12 90)
		)
		(property "Value" "1uF"
			(at 136.525 74.295 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 137.795 73.66 0)
		)
		(property "Datasheet" ""
			(at 137.795 73.66 0)
		)
		(property "Description" ""
			(at 137.795 73.66 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 137.795 73.66 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 137.795 73.66 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C12")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 109.855 52.705 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C10"
			(at 111.125 50.8 0)
		)
		(property "Value" "1uF"
			(at 111.125 55.88 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 109.855 52.705 0)
		)
		(property "Datasheet" ""
			(at 109.855 52.705 0)
		)
		(property "Description" ""
			(at 109.855 52.705 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 109.855 52.705 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 109.855 52.705 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C10")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "MCP1824_1")
		(lib_id "bitaxe:MCP1824")
		(at 236.22 59.055 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U6"
			(at 229.235 53.975 0)
		)
		(property "Value" "MCP1824T-0802E"
			(at 241.935 53.975 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5"
			(at 236.22 59.055 0)
		)
		(property "Datasheet" "https://ww1.microchip.com/downloads/en/DeviceDoc/22070a.pdf"
			(at 236.22 59.055 0)
		)
		(property "Description" ""
			(at 236.22 59.055 0)
		)
		(property "PARTNO" "MCP1824T-0802E/OT"
			(at 236.22 59.055 0)
		)
		(property "DK" "MCP1824T-0802E/OTCT-ND"
			(at 236.22 59.055 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "U6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:TXB0104RGYR")
		(at 219.71 147.32 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U2"
			(at 212.09 133.35 0)
		)
		(property "Value" "TXB0104RGYR"
			(at 217.17 160.02 0)
		)
		(property "Footprint" "bitaxe:TXB0104"
			(at 246.38 181.61 0)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/txb0104.pdf?HQS=dis-dk-null-digikeymode-dsf-pf-null-wwe&ts=1669420543825&ref_url=https%253A%252F%252Fwww.ti.com%252Fgeneral%252Fdocs%252Fsuppproductinfo.tsp%253FdistId%253D10%2526gotoUrl%253Dhttps%253A%252F%252Fwww.ti.com%252Flit%252Fgpn%252Ftxb0104"
			(at 219.71 147.32 0)
		)
		(property "Description" ""
			(at 219.71 147.32 0)
		)
		(property "DK" "296-21930-1-ND"
			(at 219.71 147.32 0)
		)
		(property "PARTNO" "TXB0104RGYR"
			(at 219.71 147.32 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "17")
		(pin "18")
		(pin "19")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "7")
		(pin "8")
		(pin "6")
		(pin "9")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "U2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 74.295 164.465 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP2"
			(at 67.945 164.465 90)
		)
		(property "Value" "TestPoint"
			(at 68.58 165.7349 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 74.295 169.545 0)
		)
		(property "Datasheet" "~"
			(at 74.295 169.545 0)
		)
		(property "Description" ""
			(at 74.295 164.465 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "TP2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 66.04 73.66 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C3"
			(at 63.5 71.12 90)
		)
		(property "Value" "1uF"
			(at 64.77 74.295 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 66.04 73.66 0)
		)
		(property "Datasheet" ""
			(at 66.04 73.66 0)
		)
		(property "Description" ""
			(at 66.04 73.66 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 66.04 73.66 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 66.04 73.66 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 223.52 44.45 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR04"
			(at 223.52 50.8 0)
		)
		(property "Value" "GND"
			(at 223.52 48.895 0)
		)
		(property "Footprint" ""
			(at 223.52 44.45 0)
		)
		(property "Datasheet" ""
			(at 223.52 44.45 0)
		)
		(property "Description" ""
			(at 223.52 44.45 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "#PWR04")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 120.015 52.705 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C11"
			(at 121.285 50.8 0)
		)
		(property "Value" "1uF"
			(at 121.285 55.88 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 120.015 52.705 0)
		)
		(property "Datasheet" ""
			(at 120.015 52.705 0)
		)
		(property "Description" ""
			(at 120.015 52.705 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 120.015 52.705 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 120.015 52.705 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C11")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 193.675 100.33 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP44"
			(at 200.025 100.33 90)
		)
		(property "Value" "TestPoint"
			(at 199.39 101.5999 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 193.675 105.41 0)
		)
		(property "Datasheet" "~"
			(at 193.675 105.41 0)
		)
		(property "Description" ""
			(at 193.675 100.33 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "TP44")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 73.025 126.365 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C4"
			(at 74.295 124.46 0)
		)
		(property "Value" "1uF"
			(at 74.295 130.175 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 73.025 126.365 0)
		)
		(property "Datasheet" ""
			(at 73.025 126.365 0)
		)
		(property "Description" ""
			(at 73.025 126.365 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 73.025 126.365 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 73.025 126.365 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 141.605 125.73 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C14"
			(at 142.24 123.825 0)
		)
		(property "Value" "1uF"
			(at 142.24 129.54 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 141.605 125.73 0)
		)
		(property "Datasheet" ""
			(at 141.605 125.73 0)
		)
		(property "Description" ""
			(at 141.605 125.73 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 141.605 125.73 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 141.605 125.73 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C14")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 81.28 125.73 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5"
			(at 82.55 123.825 0)
		)
		(property "Value" "1uF"
			(at 82.55 129.54 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 81.28 125.73 0)
		)
		(property "Datasheet" ""
			(at 81.28 125.73 0)
		)
		(property "Description" ""
			(at 81.28 125.73 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 81.28 125.73 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 81.28 125.73 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 193.675 105.41 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP6"
			(at 200.025 105.41 90)
		)
		(property "Value" "TestPoint"
			(at 199.39 106.6799 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 193.675 110.49 0)
		)
		(property "Datasheet" "~"
			(at 193.675 110.49 0)
		)
		(property "Description" ""
			(at 193.675 105.41 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "TP6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 193.675 95.25 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP1"
			(at 200.025 95.25 90)
		)
		(property "Value" "TestPoint"
			(at 199.39 96.5199 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 193.675 100.33 0)
		)
		(property "Datasheet" "~"
			(at 193.675 100.33 0)
		)
		(property "Description" ""
			(at 193.675 95.25 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "TP1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:BM1366_mode1")
		(at 112.395 100.33 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U14"
			(at 114.3509 76.2 0)
		)
		(property "Value" "BM1366_mode1"
			(at 114.3509 78.74 0)
		)
		(property "Footprint" "bitaxe:BM1366"
			(at 104.775 100.33 0)
		)
		(property "Datasheet" ""
			(at 104.775 100.33 0)
		)
		(property "Description" ""
			(at 112.395 100.33 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "17")
		(pin "18")
		(pin "19")
		(pin "2")
		(pin "20")
		(pin "21")
		(pin "22")
		(pin "23")
		(pin "24")
		(pin "25")
		(pin "26")
		(pin "27")
		(pin "28")
		(pin "29")
		(pin "3")
		(pin "30")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "U14")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 34.29 100.33 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP7"
			(at 27.94 100.33 90)
		)
		(property "Value" "TestPoint"
			(at 28.575 99.0601 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 34.29 95.25 0)
		)
		(property "Datasheet" "~"
			(at 34.29 95.25 0)
		)
		(property "Description" ""
			(at 34.29 100.33 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "TP7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 193.675 85.09 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP41"
			(at 200.025 85.09 90)
		)
		(property "Value" "TestPoint"
			(at 199.39 86.3599 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 193.675 90.17 0)
		)
		(property "Datasheet" "~"
			(at 193.675 90.17 0)
		)
		(property "Description" ""
			(at 193.675 85.09 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "TP41")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 259.08 31.115 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 265.43 31.115 90)
		)
		(property "Value" "TestPoint"
			(at 264.795 29.8451 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 259.08 26.035 0)
		)
		(property "Datasheet" "~"
			(at 259.08 26.035 0)
		)
		(property "Description" ""
			(at 259.08 31.115 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 193.675 107.95 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP46"
			(at 200.025 107.95 90)
		)
		(property "Value" "TestPoint"
			(at 199.39 109.2199 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 193.675 113.03 0)
		)
		(property "Datasheet" "~"
			(at 193.675 113.03 0)
		)
		(property "Description" ""
			(at 193.675 107.95 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "TP46")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 34.29 107.95 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP10"
			(at 27.94 107.95 90)
		)
		(property "Value" "TestPoint"
			(at 28.575 106.6801 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 34.29 102.87 0)
		)
		(property "Datasheet" "~"
			(at 34.29 102.87 0)
		)
		(property "Description" ""
			(at 34.29 107.95 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "TP10")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:MCP1824")
		(at 235.585 32.385 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U5"
			(at 229.235 27.305 0)
		)
		(property "Value" "MCP1824T-1802E"
			(at 242.57 27.305 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5"
			(at 235.585 32.385 0)
		)
		(property "Datasheet" "https://ww1.microchip.com/downloads/en/DeviceDoc/22070a.pdf"
			(at 235.585 32.385 0)
		)
		(property "Description" ""
			(at 235.585 32.385 0)
		)
		(property "PARTNO" "MCP1824T-1802E/OT"
			(at 235.585 32.385 0)
		)
		(property "DK" "MCP1824T-1802E/OTCT-ND"
			(at 235.585 32.385 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "U5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 105.41 59.055 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR01"
			(at 105.41 65.405 0)
		)
		(property "Value" "GND"
			(at 105.41 63.5 0)
		)
		(property "Footprint" ""
			(at 105.41 59.055 0)
		)
		(property "Datasheet" ""
			(at 105.41 59.055 0)
		)
		(property "Description" ""
			(at 105.41 59.055 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "#PWR01")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 56.515 102.235 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 52.705 100.965 0)
		)
		(property "Value" "10k"
			(at 52.705 103.505 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 55.499 101.981 90)
		)
		(property "Datasheet" "~"
			(at 56.515 102.235 0)
		)
		(property "Description" ""
			(at 56.515 102.235 0)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 56.515 102.235 0)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 56.515 102.235 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeUltra"
				(path
					(reference "R6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 217.17 64.135 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C23"
			(at 218.44 62.23 0)
		)
		(property "Value" "1uF"
			(at 218.44 67.945 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 217.17 64.135 0)
		)
		(property "Datasheet" ""
			(at 217.17 64.135 0)
		)
		(property "Description" ""
			(at 217.17 64.135 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 217.17 64.135 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 217.17 64.135 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C23")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 151.13 125.73 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C16"
			(at 151.765 123.825 0)
		)
		(property "Value" "1uF"
			(at 152.4 129.54 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 151.13 125.73 0)
		)
		(property "Datasheet" ""
			(at 151.13 125.73 0)
		)
		(property "Description" ""
			(at 151.13 125.73 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 151.13 125.73 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 151.13 125.73 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C16")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 54.61 73.66 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C2"
			(at 52.07 71.12 90)
		)
		(property "Value" "1uF"
			(at 53.34 74.295 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 54.61 73.66 0)
		)
		(property "Datasheet" ""
			(at 54.61 73.66 0)
		)
		(property "Description" ""
			(at 54.61 73.66 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 54.61 73.66 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 54.61 73.66 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 89.535 73.66 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 86.995 71.12 90)
		)
		(property "Value" "1uF"
			(at 88.265 74.295 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 89.535 73.66 0)
		)
		(property "Datasheet" ""
			(at 89.535 73.66 0)
		)
		(property "Description" ""
			(at 89.535 73.66 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 89.535 73.66 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 89.535 73.66 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 251.46 64.135 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C25"
			(at 252.73 62.23 0)
		)
		(property "Value" "1uF"
			(at 252.73 67.945 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 251.46 64.135 0)
		)
		(property "Datasheet" ""
			(at 251.46 64.135 0)
		)
		(property "Description" ""
			(at 251.46 64.135 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 251.46 64.135 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 251.46 64.135 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C25")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 74.295 172.085 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP5"
			(at 67.945 172.085 90)
		)
		(property "Value" "TestPoint"
			(at 68.58 173.3549 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 74.295 177.165 0)
		)
		(property "Datasheet" "~"
			(at 74.295 177.165 0)
		)
		(property "Description" ""
			(at 74.295 172.085 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "TP5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 78.105 73.66 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6"
			(at 75.565 71.12 90)
		)
		(property "Value" "1uF"
			(at 76.835 74.295 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 78.105 73.66 0)
		)
		(property "Datasheet" ""
			(at 78.105 73.66 0)
		)
		(property "Description" ""
			(at 78.105 73.66 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 78.105 73.66 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 78.105 73.66 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 79.375 172.085 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR03"
			(at 79.375 178.435 0)
		)
		(property "Value" "GND"
			(at 79.375 176.53 0)
		)
		(property "Footprint" ""
			(at 79.375 172.085 0)
		)
		(property "Datasheet" ""
			(at 79.375 172.085 0)
		)
		(property "Description" ""
			(at 79.375 172.085 0)
		)
		(pin "1")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "#PWR03")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 149.225 73.66 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C15"
			(at 146.685 71.12 90)
		)
		(property "Value" "1uF"
			(at 147.955 74.295 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 149.225 73.66 0)
		)
		(property "Datasheet" ""
			(at 149.225 73.66 0)
		)
		(property "Description" ""
			(at 149.225 73.66 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 149.225 73.66 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 149.225 73.66 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeUltra"
				(path
					(reference "C15")
					(unit 1)
				)
			)
		)
	)
)
