(kicad_sch (version 20230121) (generator eeschema)
  (paper "A4")
  (title_block
    (title "bitaxe, yo!")
    (date "2023-05-02")
    (rev "2.3")
  )
  (lib_symbols
    (symbol "Device:C" (pin_numbers hide) (pin_names (offset 0.254)) (in_bom yes) (on_board yes)
      (property "Reference" "C" (at 0.635 2.54 0))
      (property "Value" "C" (at 0.635 -2.54 0))
      (property "Footprint" "" (at 0.9652 -3.81 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "cap capacitor" (at 0 0 0))
      (property "ki_description" "Unpolarized capacitor" (at 0 0 0))
      (property "ki_fp_filters" "C_*" (at 0 0 0))
      (symbol "C_0_1"
        (polyline
          (pts
            (xy -2.032 -0.762)
            (xy 2.032 -0.762)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -2.032 0.762)
            (xy 2.032 0.762)
          )
          (fill (type none))
        )
      )
      (symbol "C_1_1"
        (pin passive line (at 0 3.81 270) (length 2.794)
          (name "~")
          (number "1")
        )
        (pin passive line (at 0 -3.81 90) (length 2.794)
          (name "~")
          (number "2")
        )
      )
    )
    (symbol "Device:C_Polarized" (pin_numbers hide) (pin_names (offset 0.254)) (in_bom yes) (on_board yes)
      (property "Reference" "C" (at 0.635 2.54 0))
      (property "Value" "C_Polarized" (at 0.635 -2.54 0))
      (property "Footprint" "" (at 0.9652 -3.81 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "cap capacitor" (at 0 0 0))
      (property "ki_description" "Polarized capacitor" (at 0 0 0))
      (property "ki_fp_filters" "CP_*" (at 0 0 0))
      (symbol "C_Polarized_0_1"
        (rectangle (start -2.286 0.508) (end 2.286 1.016)
          (fill (type none))
        )
        (polyline
          (pts
            (xy -1.778 2.286)
            (xy -0.762 2.286)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -1.27 2.794)
            (xy -1.27 1.778)
          )
          (fill (type none))
        )
        (rectangle (start 2.286 -0.508) (end -2.286 -1.016)
          (fill (type outline))
        )
      )
      (symbol "C_Polarized_1_1"
        (pin passive line (at 0 3.81 270) (length 2.794)
          (name "~")
          (number "1")
        )
        (pin passive line (at 0 -3.81 90) (length 2.794)
          (name "~")
          (number "2")
        )
      )
    )
    (symbol "Device:L" (pin_numbers hide) (pin_names (offset 1.016) hide) (in_bom yes) (on_board yes)
      (property "Reference" "L" (at -1.27 0 90))
      (property "Value" "L" (at 1.905 0 90))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "inductor choke coil reactor magnetic" (at 0 0 0))
      (property "ki_description" "Inductor" (at 0 0 0))
      (property "ki_fp_filters" "Choke_* *Coil* Inductor_* L_*" (at 0 0 0))
      (symbol "L_0_1"
        (arc (start 0 -2.54) (mid 0.6323 -1.905) (end 0 -1.27)
          (fill (type none))
        )
        (arc (start 0 -1.27) (mid 0.6323 -0.635) (end 0 0)
          (fill (type none))
        )
        (arc (start 0 0) (mid 0.6323 0.635) (end 0 1.27)
          (fill (type none))
        )
        (arc (start 0 1.27) (mid 0.6323 1.905) (end 0 2.54)
          (fill (type none))
        )
      )
      (symbol "L_1_1"
        (pin passive line (at 0 3.81 270) (length 1.27)
          (name "1")
          (number "1")
        )
        (pin passive line (at 0 -3.81 90) (length 1.27)
          (name "2")
          (number "2")
        )
      )
    )
    (symbol "Device:R_US" (pin_numbers hide) (pin_names (offset 0)) (in_bom yes) (on_board yes)
      (property "Reference" "R" (at 2.54 0 90))
      (property "Value" "R_US" (at -2.54 0 90))
      (property "Footprint" "" (at 1.016 -0.254 90))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "R res resistor" (at 0 0 0))
      (property "ki_description" "Resistor, US symbol" (at 0 0 0))
      (property "ki_fp_filters" "R_*" (at 0 0 0))
      (symbol "R_US_0_1"
        (polyline
          (pts
            (xy 0 -2.286)
            (xy 0 -2.54)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 2.286)
            (xy 0 2.54)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 -0.762)
            (xy 1.016 -1.143)
            (xy 0 -1.524)
            (xy -1.016 -1.905)
            (xy 0 -2.286)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 0.762)
            (xy 1.016 0.381)
            (xy 0 0)
            (xy -1.016 -0.381)
            (xy 0 -0.762)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 2.286)
            (xy 1.016 1.905)
            (xy 0 1.524)
            (xy -1.016 1.143)
            (xy 0 0.762)
          )
          (fill (type none))
        )
      )
      (symbol "R_US_1_1"
        (pin passive line (at 0 3.81 270) (length 1.27)
          (name "~")
          (number "1")
        )
        (pin passive line (at 0 -3.81 90) (length 1.27)
          (name "~")
          (number "2")
        )
      )
    )
    (symbol "Q_NMOS_CSD17311Q5_1" (pin_names (offset 0) hide) (in_bom yes) (on_board yes)
      (property "Reference" "Q" (at 5.08 1.27 0))
      (property "Value" "Q_NMOS_CSD17311Q5_1" (at 5.08 -1.27 0))
      (property "Footprint" "" (at 5.08 2.54 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "transistor NMOS N-MOS N-MOSFET" (at 0 0 0))
      (property "ki_description" "N-MOSFET transistor, drain/gate/source" (at 0 0 0))
      (symbol "Q_NMOS_CSD17311Q5_1_0_1"
        (polyline
          (pts
            (xy 0.254 0)
            (xy -2.54 0)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0.254 1.905)
            (xy 0.254 -1.905)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0.762 -1.27)
            (xy 0.762 -2.286)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0.762 0.508)
            (xy 0.762 -0.508)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0.762 2.286)
            (xy 0.762 1.27)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 2.54 2.54)
            (xy 2.54 1.778)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 2.54 -2.54)
            (xy 2.54 0)
            (xy 0.762 0)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0.762 -1.778)
            (xy 3.302 -1.778)
            (xy 3.302 1.778)
            (xy 0.762 1.778)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 1.016 0)
            (xy 2.032 0.381)
            (xy 2.032 -0.381)
            (xy 1.016 0)
          )
          (fill (type outline))
        )
        (polyline
          (pts
            (xy 2.794 0.508)
            (xy 2.921 0.381)
            (xy 3.683 0.381)
            (xy 3.81 0.254)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 3.302 0.381)
            (xy 2.921 -0.254)
            (xy 3.683 -0.254)
            (xy 3.302 0.381)
          )
          (fill (type none))
        )
        (circle (center 1.651 0) (radius 2.794)
          (fill (type none))
        )
        (circle (center 2.54 -1.778) (radius 0.254)
          (fill (type outline))
        )
        (circle (center 2.54 1.778) (radius 0.254)
          (fill (type outline))
        )
      )
      (symbol "Q_NMOS_CSD17311Q5_1_1_1"
        (pin passive line (at 2.54 -5.08 90) (length 2.54) hide
          (name "")
          (number "1")
        )
        (pin passive line (at 2.54 -5.08 90) (length 2.54) hide
          (name "")
          (number "2")
        )
        (pin passive line (at 2.54 -5.08 90) (length 2.54)
          (name "S")
          (number "3")
        )
        (pin input line (at -5.08 0 0) (length 2.54)
          (name "G")
          (number "4")
        )
        (pin passive line (at 2.54 5.08 270) (length 2.54)
          (name "D")
          (number "5")
        )
      )
    )
    (symbol "TPS40305:DS4432U+" (in_bom yes) (on_board yes)
      (property "Reference" "U" (at 3.81 10.16 0))
      (property "Value" "DS4432U+" (at -1.27 -10.16 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "" (at 0 0 0))
      (symbol "DS4432U+_0_1"
        (rectangle (start -6.35 8.89) (end 5.08 -8.89)
          (fill (type background))
        )
      )
      (symbol "DS4432U+_1_1"
        (pin input line (at -8.89 1.27 0) (length 2.54)
          (name "SDA")
          (number "1")
        )
        (pin input line (at -8.89 -1.27 0) (length 2.54)
          (name "SCL")
          (number "2")
        )
        (pin input line (at 7.62 -3.81 180) (length 2.54)
          (name "FS1")
          (number "3")
        )
        (pin power_in line (at -8.89 -6.35 0) (length 2.54)
          (name "GND")
          (number "4")
        )
        (pin input line (at 7.62 -6.35 180) (length 2.54)
          (name "FS0")
          (number "5")
        )
        (pin output line (at 7.62 6.35 180) (length 2.54)
          (name "OUT0")
          (number "6")
        )
        (pin output line (at 7.62 3.81 180) (length 2.54)
          (name "OUT1")
          (number "7")
        )
        (pin power_in line (at -8.89 6.35 0) (length 2.54)
          (name "VCC")
          (number "8")
        )
      )
    )
    (symbol "TPS40305:TPS40305" (in_bom yes) (on_board yes)
      (property "Reference" "U" (at 10.16 16.51 0))
      (property "Value" "TPS40305" (at -7.62 16.51 0))
      (property "Footprint" "" (at -13.97 -11.43 0))
      (property "Datasheet" "" (at -13.97 -11.43 0))
      (symbol "TPS40305_0_1"
        (rectangle (start -11.43 15.24) (end 10.16 -13.97)
          (fill (type background))
        )
      )
      (symbol "TPS40305_1_1"
        (pin input line (at -13.97 12.7 0) (length 2.54)
          (name "VDD")
          (number "1")
        )
        (pin input line (at 12.7 -12.7 180) (length 2.54)
          (name "BP")
          (number "10")
        )
        (pin input line (at 0 -16.51 90) (length 2.54)
          (name "GND")
          (number "11")
        )
        (pin input line (at -13.97 7.62 0) (length 2.54)
          (name "SS")
          (number "2")
        )
        (pin input line (at 12.7 -7.62 180) (length 2.54)
          (name "PGOOD")
          (number "3")
        )
        (pin input line (at -13.97 -7.62 0) (length 2.54)
          (name "COMP")
          (number "4")
        )
        (pin input line (at -13.97 -12.7 0) (length 2.54)
          (name "FB")
          (number "5")
        )
        (pin input line (at 12.7 7.62 180) (length 2.54)
          (name "BOOT")
          (number "6")
        )
        (pin input line (at 12.7 12.7 180) (length 2.54)
          (name "HDRV")
          (number "7")
        )
        (pin input line (at 12.7 2.54 180) (length 2.54)
          (name "SW")
          (number "8")
        )
        (pin input line (at 12.7 -2.54 180) (length 2.54)
          (name "LDRV")
          (number "9")
        )
      )
    )
    (symbol "lcsc:INA219AIDCNR" (in_bom yes) (on_board yes)
      (property "Reference" "U" (at 0 8.89 0))
      (property "Value" "INA219AIDCNR" (at 0 -8.89 0))
      (property "Footprint" "lcsc:SOT-23-8_L3.0-W1.7-P0.65-LS2.8-BR" (at 0 -11.43 0))
      (property "Datasheet" "https://lcsc.com/product-detail/PMIC-Current-Power-Monitors-Regulators_TI_INA219AIDCNR_INA219AIDCNR_C87469.html" (at 0 -13.97 0))
      (property "Manufacturer" "TI(德州仪器)" (at 0 -16.51 0))
      (property "LCSC Part" "C87469" (at 0 -19.05 0))
      (property "JLC Part" "Extended Part" (at 0 -21.59 0))
      (symbol "INA219AIDCNR_0_1"
        (rectangle (start -7.62 6.86) (end 7.62 -6.86)
          (fill (type background))
        )
        (pin unspecified line (at -10.16 3.81 0) (length 2.54)
          (name "IN+")
          (number "1")
        )
        (pin unspecified line (at -10.16 1.27 0) (length 2.54)
          (name "IN-")
          (number "2")
        )
        (pin unspecified line (at 10.16 -5.08 180) (length 2.54)
          (name "GND")
          (number "3")
        )
        (pin unspecified line (at -10.16 -3.81 0) (length 2.54)
          (name "VS")
          (number "4")
        )
        (pin unspecified line (at 10.16 2.54 180) (length 2.54)
          (name "SCL")
          (number "5")
        )
        (pin unspecified line (at 10.16 5.08 180) (length 2.54)
          (name "SDA")
          (number "6")
        )
        (pin unspecified line (at 10.16 -2.54 180) (length 2.54)
          (name "A0")
          (number "7")
        )
        (pin unspecified line (at 10.16 0 180) (length 2.54)
          (name "A1")
          (number "8")
        )
      )
    )
  )
  (junction (at 135.89 116.84) (diameter 0) (color 0 0 0 0))
  (junction (at 62.865 50.165) (diameter 0) (color 0 0 0 0))
  (junction (at 201.93 61.595) (diameter 0) (color 0 0 0 0))
  (junction (at 62.865 47.625) (diameter 0) (color 0 0 0 0))
  (junction (at 238.125 137.795) (diameter 0) (color 0 0 0 0))
  (junction (at 85.09 132.08) (diameter 0) (color 0 0 0 0))
  (junction (at 153.67 50.8) (diameter 0) (color 0 0 0 0))
  (junction (at 213.995 137.795) (diameter 0) (color 0 0 0 0))
  (junction (at 41.275 30.48) (diameter 0) (color 0 0 0 0))
  (junction (at 145.415 42.545) (diameter 0) (color 0 0 0 0))
  (junction (at 182.88 42.545) (diameter 0) (color 0 0 0 0))
  (junction (at 212.725 78.74) (diameter 0) (color 0 0 0 0))
  (junction (at 95.25 50.8) (diameter 0) (color 0 0 0 0))
  (junction (at 182.88 39.37) (diameter 0) (color 0 0 0 0))
  (junction (at 170.18 55.88) (diameter 0) (color 0 0 0 0))
  (junction (at 43.18 140.335) (diameter 0) (color 0 0 0 0))
  (junction (at 43.18 121.92) (diameter 0) (color 0 0 0 0))
  (junction (at 230.505 78.74) (diameter 0) (color 0 0 0 0))
  (junction (at 212.725 39.37) (diameter 0) (color 0 0 0 0))
  (junction (at 52.07 47.625) (diameter 0) (color 0 0 0 0))
  (junction (at 74.295 30.48) (diameter 0) (color 0 0 0 0))
  (junction (at 100.33 30.48) (diameter 0) (color 0 0 0 0))
  (junction (at 106.045 71.12) (diameter 0) (color 0 0 0 0))
  (junction (at 52.07 30.48) (diameter 0) (color 0 0 0 0))
  (junction (at 230.505 39.37) (diameter 0) (color 0 0 0 0))
  (junction (at 212.725 61.595) (diameter 0) (color 0 0 0 0))
  (junction (at 157.48 67.31) (diameter 0) (color 0 0 0 0))
  (junction (at 62.865 30.48) (diameter 0) (color 0 0 0 0))
  (junction (at 74.295 50.165) (diameter 0) (color 0 0 0 0))
  (junction (at 243.205 39.37) (diameter 0) (color 0 0 0 0))
  (junction (at 85.09 134.62) (diameter 0) (color 0 0 0 0))
  (junction (at 201.93 39.37) (diameter 0) (color 0 0 0 0))
  (junction (at 95.25 71.12) (diameter 0) (color 0 0 0 0))
  (junction (at 170.18 67.31) (diameter 0) (color 0 0 0 0))
  (wire (pts (xy 247.015 137.795) (xy 238.125 137.795)))
  (wire (pts (xy 243.205 39.37) (xy 230.505 39.37)))
  (wire (pts (xy 193.04 111.125) (xy 217.17 111.125)))
  (wire (pts (xy 157.48 63.5) (xy 157.48 67.31)))
  (wire (pts (xy 41.275 30.48) (xy 52.07 30.48)))
  (wire (pts (xy 108.585 50.8) (xy 95.25 50.8)))
  (wire (pts (xy 85.09 132.08) (xy 85.09 134.62)))
  (wire (pts (xy 182.88 35.56) (xy 182.88 39.37)))
  (wire (pts (xy 43.18 121.92) (xy 52.07 121.92)))
  (wire (pts (xy 243.205 48.895) (xy 243.205 39.37)))
  (wire (pts (xy 170.18 55.88) (xy 175.26 55.88)))
  (wire (pts (xy 30.48 121.92) (xy 21.59 121.92)))
  (wire (pts (xy 95.25 60.325) (xy 95.25 61.595)))
  (wire (pts (xy 30.48 140.335) (xy 21.59 140.335)))
  (wire (pts (xy 74.295 44.45) (xy 74.295 50.165)))
  (wire (pts (xy 212.725 55.88) (xy 212.725 61.595)))
  (wire (pts (xy 170.18 45.72) (xy 170.18 55.88)))
  (wire (pts (xy 104.14 120.015) (xy 104.14 125.73)))
  (wire (pts (xy 52.07 44.45) (xy 52.07 47.625)))
  (wire (pts (xy 170.18 67.31) (xy 170.18 65.405)))
  (wire (pts (xy 85.09 44.45) (xy 85.09 50.165)))
  (wire (pts (xy 247.015 132.715) (xy 247.015 137.795)))
  (wire (pts (xy 182.88 20.32) (xy 100.33 20.32)))
  (wire (pts (xy 193.04 114.3) (xy 193.04 111.125)))
  (wire (pts (xy 201.93 39.37) (xy 201.93 41.91)))
  (wire (pts (xy 52.07 125.73) (xy 60.96 125.73)))
  (wire (pts (xy 52.07 47.625) (xy 62.865 47.625)))
  (wire (pts (xy 243.205 39.37) (xy 254 39.37)))
  (wire (pts (xy 38.1 121.92) (xy 43.18 121.92)))
  (wire (pts (xy 124.46 116.84) (xy 135.89 116.84)))
  (wire (pts (xy 87.63 71.12) (xy 87.63 64.77)))
  (wire (pts (xy 87.63 50.8) (xy 87.63 57.15)))
  (wire (pts (xy 209.55 116.205) (xy 217.17 116.205)))
  (wire (pts (xy 62.865 50.165) (xy 74.295 50.165)))
  (wire (pts (xy 122.555 67.31) (xy 157.48 67.31)))
  (wire (pts (xy 43.18 134.62) (xy 43.18 140.335)))
  (wire (pts (xy 213.995 123.825) (xy 217.17 123.825)))
  (wire (pts (xy 62.865 78.74) (xy 212.725 78.74)))
  (wire (pts (xy 85.09 134.62) (xy 104.14 134.62)))
  (wire (pts (xy 201.93 49.53) (xy 201.93 52.07)))
  (wire (pts (xy 74.295 30.48) (xy 74.295 36.83)))
  (wire (pts (xy 95.25 69.215) (xy 95.25 71.12)))
  (wire (pts (xy 233.68 121.285) (xy 247.015 121.285)))
  (wire (pts (xy 212.725 72.39) (xy 212.725 78.74)))
  (wire (pts (xy 157.48 67.31) (xy 170.18 67.31)))
  (wire (pts (xy 238.125 132.715) (xy 238.125 137.795)))
  (wire (pts (xy 153.67 55.88) (xy 153.67 50.8)))
  (wire (pts (xy 230.505 39.37) (xy 230.505 48.895)))
  (wire (pts (xy 212.725 61.595) (xy 212.725 64.77)))
  (wire (pts (xy 140.335 40.64) (xy 140.335 42.545)))
  (wire (pts (xy 182.88 60.96) (xy 182.88 67.31)))
  (wire (pts (xy 135.255 45.72) (xy 170.18 45.72)))
  (wire (pts (xy 135.255 40.64) (xy 140.335 40.64)))
  (wire (pts (xy 41.275 47.625) (xy 52.07 47.625)))
  (wire (pts (xy 233.68 111.125) (xy 255.27 111.125)))
  (wire (pts (xy 135.255 55.88) (xy 153.67 55.88)))
  (wire (pts (xy 41.275 36.83) (xy 41.275 30.48)))
  (wire (pts (xy 230.505 56.515) (xy 230.505 78.74)))
  (wire (pts (xy 62.865 30.48) (xy 62.865 36.83)))
  (wire (pts (xy 60.96 128.27) (xy 52.07 128.27)))
  (wire (pts (xy 152.4 50.8) (xy 153.67 50.8)))
  (wire (pts (xy 52.07 30.48) (xy 62.865 30.48)))
  (wire (pts (xy 213.995 137.795) (xy 213.995 123.825)))
  (wire (pts (xy 140.335 42.545) (xy 145.415 42.545)))
  (wire (pts (xy 43.18 121.92) (xy 43.18 127)))
  (wire (pts (xy 230.505 39.37) (xy 212.725 39.37)))
  (wire (pts (xy 100.33 20.32) (xy 100.33 30.48)))
  (wire (pts (xy 182.88 67.31) (xy 170.18 67.31)))
  (wire (pts (xy 233.68 123.825) (xy 238.125 123.825)))
  (wire (pts (xy 135.89 116.84) (xy 146.685 116.84)))
  (wire (pts (xy 170.18 55.88) (xy 170.18 57.785)))
  (wire (pts (xy 182.88 42.545) (xy 182.88 50.8)))
  (wire (pts (xy 95.25 71.12) (xy 87.63 71.12)))
  (wire (pts (xy 21.59 134.62) (xy 21.59 140.335)))
  (wire (pts (xy 81.28 132.08) (xy 85.09 132.08)))
  (wire (pts (xy 62.865 30.48) (xy 74.295 30.48)))
  (wire (pts (xy 230.505 78.74) (xy 243.205 78.74)))
  (wire (pts (xy 43.18 140.335) (xy 52.07 140.335)))
  (wire (pts (xy 193.04 137.795) (xy 213.995 137.795)))
  (wire (pts (xy 52.07 128.27) (xy 52.07 140.335)))
  (wire (pts (xy 135.255 50.8) (xy 144.78 50.8)))
  (wire (pts (xy 106.045 71.12) (xy 95.25 71.12)))
  (wire (pts (xy 157.48 50.8) (xy 157.48 55.88)))
  (wire (pts (xy 255.27 61.595) (xy 255.27 111.125)))
  (wire (pts (xy 52.07 30.48) (xy 52.07 36.83)))
  (wire (pts (xy 135.89 114.3) (xy 135.89 116.84)))
  (wire (pts (xy 62.865 47.625) (xy 62.865 50.165)))
  (wire (pts (xy 145.415 42.545) (xy 182.88 42.545)))
  (wire (pts (xy 81.28 124.46) (xy 93.98 124.46)))
  (wire (pts (xy 182.88 25.4) (xy 182.88 20.32)))
  (wire (pts (xy 62.865 50.165) (xy 62.865 78.74)))
  (wire (pts (xy 247.015 121.285) (xy 247.015 125.095)))
  (wire (pts (xy 41.275 44.45) (xy 41.275 47.625)))
  (wire (pts (xy 62.865 44.45) (xy 62.865 47.625)))
  (wire (pts (xy 122.555 59.69) (xy 122.555 67.31)))
  (wire (pts (xy 212.725 61.595) (xy 255.27 61.595)))
  (wire (pts (xy 21.59 121.92) (xy 21.59 127)))
  (wire (pts (xy 212.725 78.74) (xy 230.505 78.74)))
  (wire (pts (xy 85.09 129.54) (xy 85.09 132.08)))
  (wire (pts (xy 193.04 39.37) (xy 201.93 39.37)))
  (wire (pts (xy 209.55 118.745) (xy 217.17 118.745)))
  (wire (pts (xy 108.585 55.88) (xy 106.045 55.88)))
  (wire (pts (xy 108.585 35.56) (xy 85.09 35.56)))
  (wire (pts (xy 201.93 39.37) (xy 212.725 39.37)))
  (wire (pts (xy 153.67 50.8) (xy 157.48 50.8)))
  (wire (pts (xy 140.335 35.56) (xy 140.335 33.655)))
  (wire (pts (xy 201.93 59.69) (xy 201.93 61.595)))
  (wire (pts (xy 243.205 56.515) (xy 243.205 78.74)))
  (wire (pts (xy 201.93 71.12) (xy 106.045 71.12)))
  (wire (pts (xy 95.25 50.8) (xy 87.63 50.8)))
  (wire (pts (xy 74.295 30.48) (xy 100.33 30.48)))
  (wire (pts (xy 81.28 127) (xy 93.98 127)))
  (wire (pts (xy 140.335 33.655) (xy 145.415 33.655)))
  (wire (pts (xy 145.415 41.275) (xy 145.415 42.545)))
  (wire (pts (xy 135.255 30.48) (xy 175.26 30.48)))
  (wire (pts (xy 100.33 30.48) (xy 108.585 30.48)))
  (wire (pts (xy 85.09 35.56) (xy 85.09 36.83)))
  (wire (pts (xy 212.725 39.37) (xy 212.725 48.26)))
  (wire (pts (xy 182.88 39.37) (xy 185.42 39.37)))
  (wire (pts (xy 38.1 140.335) (xy 43.18 140.335)))
  (wire (pts (xy 135.89 100.33) (xy 135.89 106.68)))
  (wire (pts (xy 238.125 123.825) (xy 238.125 125.095)))
  (wire (pts (xy 201.93 61.595) (xy 201.93 71.12)))
  (wire (pts (xy 135.255 35.56) (xy 140.335 35.56)))
  (wire (pts (xy 106.045 55.88) (xy 106.045 71.12)))
  (wire (pts (xy 182.88 39.37) (xy 182.88 42.545)))
  (wire (pts (xy 52.07 121.92) (xy 52.07 125.73)))
  (wire (pts (xy 238.125 137.795) (xy 213.995 137.795)))
  (wire (pts (xy 104.14 133.35) (xy 104.14 134.62)))
  (wire (pts (xy 55.245 133.35) (xy 60.96 133.35)))
  (wire (pts (xy 81.28 134.62) (xy 85.09 134.62)))
  (wire (pts (xy 193.04 121.92) (xy 193.04 137.795)))
  (wire (pts (xy 33.655 30.48) (xy 41.275 30.48)))
  (wire (pts (xy 74.295 50.165) (xy 85.09 50.165)))
  (wire (pts (xy 81.28 129.54) (xy 85.09 129.54)))
  (wire (pts (xy 201.93 61.595) (xy 212.725 61.595)))
  (wire (pts (xy 95.25 50.8) (xy 95.25 52.705)))
  (text "I2C Address: 0x48" (at 217.17 103.505 0))
  (text "I2C Address: 0x40" (at 48.26 145.415 0))
  (text "Vfb = 0.6V" (at 107.95 70.485 0))
  (text "The DS4432U+ is a current DAC. \nit's used to adjust the TPS40305 output voltage over I2C"
    (at 202.565 143.51 0)
  )
  (text "Power Monitor" (at 49.53 113.03 0))
  (text "To bypass the power monitor replace R2 with 0 ohm and DNP the rest"
    (at 33.655 151.13 0)
  )
  (text "PGOOD is an open drain output\nfrom the TPS40305. Pull up to 3.3V"
    (at 123.19 123.19 0)
  )
  (label "VIN_M" (at 22.86 140.335 0) (fields_autoplaced))
  (label "3V3" (at 203.835 111.125 0) (fields_autoplaced))
  (label "SDA" (at 212.725 116.205 0) (fields_autoplaced))
  (label "VIN_M" (at 34.925 30.48 0) (fields_autoplaced))
  (label "GND" (at 233.68 78.74 0) (fields_autoplaced))
  (label "SCL" (at 89.535 127 0) (fields_autoplaced))
  (label "GND" (at 78.74 78.74 0) (fields_autoplaced))
  (label "3V3" (at 104.14 123.825 0) (fields_autoplaced))
  (label "3V3" (at 55.245 133.35 0) (fields_autoplaced))
  (label "PGOOD" (at 137.16 50.8 0) (fields_autoplaced))
  (label "SDA" (at 89.535 124.46 0) (fields_autoplaced))
  (label "GND" (at 92.71 134.62 0) (fields_autoplaced))
  (label "VOUT" (at 245.745 39.37 0) (fields_autoplaced))
  (label "SCL" (at 212.725 118.745 0) (fields_autoplaced))
  (label "OUT0" (at 217.17 61.595 0) (fields_autoplaced))
  (label "OUT0" (at 240.03 111.125 0) (fields_autoplaced))
  (label "GND" (at 223.52 137.795 0) (fields_autoplaced))
  (label "3V3" (at 135.89 104.14 0) (fields_autoplaced))
  (label "VIN" (at 22.86 121.92 0) (fields_autoplaced))
  (label "PGOOD" (at 127 116.84 0) (fields_autoplaced))
  (label "SW" (at 178.435 42.545 0) (fields_autoplaced))
  (label "GND" (at 139.7 67.31 0) (fields_autoplaced))
  (global_label "GND" (shape input) (at 243.205 78.74 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 249.4886 78.6606 0))
  )
  (hierarchical_label "SDA" (shape input) (at 209.55 116.205 180) (fields_autoplaced))
  (hierarchical_label "VIN" (shape input) (at 21.59 121.92 180) (fields_autoplaced))
  (hierarchical_label "5V" (shape output) (at 33.655 30.48 180) (fields_autoplaced))
  (hierarchical_label "SCL" (shape input) (at 209.55 118.745 180) (fields_autoplaced))
  (hierarchical_label "VOUT" (shape input) (at 254 39.37 0) (fields_autoplaced))
  (hierarchical_label "3V3" (shape input) (at 193.04 111.125 180) (fields_autoplaced))
  (hierarchical_label "PGOOD" (shape output) (at 146.685 116.84 0) (fields_autoplaced))
  (symbol (lib_id "Device:C") (at 157.48 59.69 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C43" (at 160.655 58.4199 0))
    (property "Value" "10uF" (at 160.655 60.9599 0))
    (property "Footprint" "Capacitor_SMD:C_0805_2012Metric" (at 158.4452 63.5 0))
    (property "Datasheet" "" (at 157.48 59.69 0))
    (property "DK" "1276-1096-1-ND" (at 157.48 59.69 0))
    (property "PARTNO" "CL21A106KOQNNNE" (at 157.48 59.69 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C43") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_US") (at 212.725 52.07 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "R14" (at 214.63 50.7999 0))
    (property "Value" "4.99k" (at 214.63 53.3399 0))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 213.741 52.324 90))
    (property "Datasheet" "~" (at 212.725 52.07 0))
    (property "DK" "311-4.99KLRCT-ND" (at 212.725 52.07 0))
    (property "PARTNO" "RC0402FR-074K99L" (at 212.725 52.07 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "R14") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_US") (at 21.59 130.81 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "R2" (at 24.13 129.5399 0))
    (property "Value" "2m" (at 24.13 132.0799 0))
    (property "Footprint" "Resistor_SMD:R_1206_3216Metric" (at 22.606 131.064 90))
    (property "Datasheet" "~" (at 21.59 130.81 0))
    (property "DK" "" (at 21.59 130.81 0))
    (property "PARTNO" "" (at 21.59 130.81 0))
    (property "LCSC" "C5127773" (at 21.59 130.81 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "R2") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 62.865 40.64 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C37" (at 66.04 39.3699 0))
    (property "Value" "47uF" (at 66.04 41.9099 0))
    (property "Footprint" "Capacitor_SMD:C_1210_3225Metric" (at 63.8302 44.45 0))
    (property "Datasheet" "~" (at 62.865 40.64 0))
    (property "DK" "490-6539-1-ND" (at 62.865 40.64 0))
    (property "PARTNO" "GRM32ER61C476KE15L" (at 62.865 40.64 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C37") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C_Polarized") (at 230.505 52.705 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C46" (at 233.68 50.5459 0))
    (property "Value" "220uF" (at 233.68 53.0859 0))
    (property "Footprint" "TPS40305_supply:CAP_2R5TPE220MAFB" (at 231.4702 56.515 0))
    (property "Datasheet" "https://media.digikey.com/pdf/Data%20Sheets/Panasonic%20Capacitors%20PDFs/TPE_Series_POSCAP_Rev02_Oct_2017.pdf" (at 230.505 52.705 0))
    (property "PARTNO" "2R5TPE220MAFB" (at 230.505 52.705 0))
    (property "DK" "P16200CT-ND" (at 230.505 52.705 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C46") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "TPS40305:TPS40305") (at 122.555 43.18 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "U9" (at 112.395 26.67 0))
    (property "Value" "TPS40305" (at 128.27 26.67 0))
    (property "Footprint" "TPS40305_supply:TPS40305" (at 108.585 54.61 0))
    (property "Datasheet" "https://www.ti.com/lit/ds/symlink/tps40303.pdf" (at 108.585 54.61 0))
    (property "DK" "296-37445-1-ND" (at 122.555 43.18 0))
    (property "PARTNO" "TPS40305DRCR" (at 122.555 43.18 0))
    (pin "1")
    (pin "10")
    (pin "11")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (pin "6")
    (pin "7")
    (pin "8")
    (pin "9")
    (instances
      (project "bitaxeMax"
        (path
          (reference "U9") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 41.275 40.64 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C34" (at 44.45 39.3699 0))
    (property "Value" "47uF" (at 44.45 41.9099 0))
    (property "Footprint" "Capacitor_SMD:C_1210_3225Metric" (at 42.2402 44.45 0))
    (property "Datasheet" "~" (at 41.275 40.64 0))
    (property "DK" "490-6539-1-ND" (at 41.275 40.64 0))
    (property "PARTNO" "GRM32ER61C476KE15L" (at 41.275 40.64 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C34") (unit 1)
        )
      )
    )
  )
  (symbol (lib_name "Q_NMOS_CSD17311Q5_1") (lib_id "TPS40305:Q_NMOS_CSD17311Q5") (at 180.34 55.88 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "Q2" (at 185.42 54.61 0))
    (property "Value" "CSD17311Q5" (at 185.42 57.15 0))
    (property "Footprint" "TPS40305_supply:CSD17311Q5" (at 185.42 53.34 0))
    (property "Datasheet" "https://www.ti.com/lit/ds/symlink/csd17311q5.pdf" (at 180.34 55.88 0))
    (property "DK" "296-27625-1-ND" (at 180.34 55.88 0))
    (property "PARTNO" "CSD17311Q5" (at 180.34 55.88 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (instances
      (project "bitaxeMax"
        (path
          (reference "Q2") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 85.09 40.64 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C39" (at 88.265 39.3699 0))
    (property "Value" "3.3nF" (at 88.265 41.9099 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 86.0552 44.45 0))
    (property "Datasheet" "~" (at 85.09 40.64 0))
    (property "DK" "1276-1552-1-ND" (at 85.09 40.64 0))
    (property "PARTNO" "CL05B332KB5NNNC" (at 85.09 40.64 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C39") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_US") (at 34.29 121.92 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "R5" (at 34.29 117.475 90))
    (property "Value" "0" (at 34.29 120.015 90))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 34.544 120.904 90))
    (property "Datasheet" "~" (at 34.29 121.92 0))
    (property "DK" "RMCF0402ZT0R00CT-ND" (at 34.29 121.92 0))
    (property "PARTNO" "RMCF0402ZT0R00" (at 34.29 121.92 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "R5") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 52.07 40.64 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C36" (at 55.245 39.3699 0))
    (property "Value" "47uF" (at 55.245 41.9099 0))
    (property "Footprint" "Capacitor_SMD:C_1210_3225Metric" (at 53.0352 44.45 0))
    (property "Datasheet" "~" (at 52.07 40.64 0))
    (property "DK" "490-6539-1-ND" (at 52.07 40.64 0))
    (property "PARTNO" "GRM32ER61C476KE15L" (at 52.07 40.64 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C36") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 74.295 40.64 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C38" (at 78.105 39.3699 0))
    (property "Value" "1uF" (at 78.105 41.9099 0))
    (property "Footprint" "Capacitor_SMD:C_0805_2012Metric" (at 75.2602 44.45 0))
    (property "Datasheet" "~" (at 74.295 40.64 0))
    (property "DK" "1276-6471-1-ND" (at 74.295 40.64 0))
    (property "PARTNO" "CL21B105KOFNNNG" (at 74.295 40.64 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C38") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "TPS40305:DS4432U+") (at 226.06 117.475 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "U10" (at 220.98 107.315 0))
    (property "Value" "DS4432U+" (at 225.425 127.635 0))
    (property "Footprint" "Package_SO:TSSOP-8_3x3mm_P0.65mm" (at 226.06 117.475 0))
    (property "Datasheet" "https://datasheets.maximintegrated.com/en/ds/DS4432.pdf" (at 226.06 117.475 0))
    (property "DK" "DS4432U+-ND" (at 226.06 117.475 0))
    (property "PARTNO" "DS4432U+" (at 226.06 117.475 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (pin "6")
    (pin "7")
    (pin "8")
    (instances
      (project "bitaxeMax"
        (path
          (reference "U10") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 243.205 52.705 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C47" (at 246.38 51.4349 0))
    (property "Value" "100uF" (at 246.38 53.9749 0))
    (property "Footprint" "Capacitor_SMD:C_1206_3216Metric" (at 244.1702 56.515 0))
    (property "Datasheet" "~" (at 243.205 52.705 0))
    (property "PARTNO" "C3216X5R0J107M160AB" (at 243.205 52.705 0))
    (property "DK" "445-6008-1-ND" (at 243.205 52.705 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C47") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 95.25 56.515 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C41" (at 98.425 55.2449 0))
    (property "Value" "1.5nF" (at 98.425 57.7849 0))
    (property "Footprint" "Capacitor_SMD:C_0805_2012Metric" (at 96.2152 60.325 0))
    (property "Datasheet" "~" (at 95.25 56.515 0))
    (property "DK" "311-1128-1-ND" (at 95.25 56.515 0))
    (property "PARTNO" "CC0805KRX7R9BB152" (at 95.25 56.515 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C41") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_US") (at 34.29 140.335 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "R3" (at 34.29 135.89 90))
    (property "Value" "0" (at 34.29 138.43 90))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 34.544 139.319 90))
    (property "Datasheet" "~" (at 34.29 140.335 0))
    (property "DK" "RMCF0402ZT0R00CT-ND" (at 34.29 140.335 0))
    (property "PARTNO" "RMCF0402ZT0R00" (at 34.29 140.335 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "R3") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_US") (at 212.725 68.58 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "R15" (at 214.63 67.3099 0))
    (property "Value" "3.32k" (at 214.63 69.8499 0))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 213.741 68.834 90))
    (property "Datasheet" "~" (at 212.725 68.58 0))
    (property "DK" "311-3.32KLRCT-ND" (at 212.725 68.58 0))
    (property "PARTNO" "RC0402FR-073K32L" (at 212.725 68.58 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "R15") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_US") (at 148.59 50.8 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "R11" (at 148.59 48.26 90))
    (property "Value" "100k" (at 148.59 53.34 90))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 148.844 49.784 90))
    (property "Datasheet" "~" (at 148.59 50.8 0))
    (property "DK" "311-100KJRCT-ND" (at 148.59 50.8 0))
    (property "PARTNO" "RC0402JR-07100KL" (at 148.59 50.8 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "R11") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 145.415 37.465 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C42" (at 149.225 36.1949 0))
    (property "Value" "0.1uF" (at 149.225 38.7349 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 146.3802 41.275 0))
    (property "Datasheet" "" (at 145.415 37.465 0))
    (property "DK" "1292-1639-1-ND" (at 145.415 37.465 0))
    (property "PARTNO" "0402X104K100CT" (at 145.415 37.465 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C42") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 43.18 130.81 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp yes)
    (property "Reference" "C27" (at 46.99 129.5399 0))
    (property "Value" "~" (at 46.99 132.0799 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 44.1452 134.62 0))
    (property "Datasheet" "" (at 43.18 130.81 0))
    (property "DK" "587-5514-1-ND" (at 43.18 130.81 0))
    (property "PARTNO" "EMK105BJ105MV-F" (at 43.18 130.81 0))
    (property "DNP" "T" (at 43.18 130.81 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C27") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_US") (at 238.125 128.905 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "R16" (at 240.03 127.6349 0))
    (property "Value" "80k" (at 240.03 130.1749 0))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 239.141 129.159 90))
    (property "Datasheet" "~" (at 238.125 128.905 0))
    (property "DK" "311-80.6KLRCT-ND" (at 238.125 128.905 0))
    (property "PARTNO" "RC0402FR-0780K6L" (at 238.125 128.905 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "R16") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 193.04 118.11 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C44" (at 196.85 116.8399 0))
    (property "Value" "1uF" (at 196.85 119.3799 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 194.0052 121.92 0))
    (property "Datasheet" "" (at 193.04 118.11 0))
    (property "DK" "587-5514-1-ND" (at 193.04 118.11 0))
    (property "PARTNO" "EMK105BJ105MV-F" (at 193.04 118.11 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C44") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_US") (at 201.93 45.72 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "R13" (at 203.835 44.4499 0))
    (property "Value" "1.33k" (at 203.835 46.9899 0))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 202.946 45.974 90))
    (property "Datasheet" "~" (at 201.93 45.72 0))
    (property "DK" "311-1.33KLRCT-ND" (at 201.93 45.72 0))
    (property "PARTNO" "RC0402FR-071K33L" (at 201.93 45.72 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "R13") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 104.14 129.54 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C25" (at 107.95 128.2699 0))
    (property "Value" "1uF" (at 107.95 130.8099 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 105.1052 133.35 0))
    (property "Datasheet" "" (at 104.14 129.54 0))
    (property "DK" "587-5514-1-ND" (at 104.14 129.54 0))
    (property "PARTNO" "EMK105BJ105MV-F" (at 104.14 129.54 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C25") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_US") (at 95.25 65.405 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "R10" (at 97.155 64.1349 0))
    (property "Value" "3.83k" (at 97.155 66.6749 0))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 96.266 65.659 90))
    (property "Datasheet" "~" (at 95.25 65.405 0))
    (property "DK" "311-3.83KLRCT-ND" (at 95.25 65.405 0))
    (property "PARTNO" "RC0402FR-073K83L" (at 95.25 65.405 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "R10") (unit 1)
        )
      )
    )
  )
  (symbol (lib_name "Q_NMOS_CSD17311Q5_1") (lib_id "TPS40305:Q_NMOS_CSD17311Q5") (at 180.34 30.48 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "Q1" (at 185.42 29.21 0))
    (property "Value" "CSD17311Q5" (at 185.42 31.75 0))
    (property "Footprint" "TPS40305_supply:CSD17311Q5" (at 185.42 27.94 0))
    (property "Datasheet" "https://www.ti.com/lit/ds/symlink/csd17311q5.pdf" (at 180.34 30.48 0))
    (property "DK" "296-27625-1-ND" (at 180.34 30.48 0))
    (property "PARTNO" "CSD17311Q5" (at 180.34 30.48 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (instances
      (project "bitaxeMax"
        (path
          (reference "Q1") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 201.93 55.88 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C45" (at 205.105 54.6099 0))
    (property "Value" "470pF" (at 205.105 57.1499 0))
    (property "Footprint" "Capacitor_SMD:C_0805_2012Metric" (at 202.8952 59.69 0))
    (property "Datasheet" "~" (at 201.93 55.88 0))
    (property "DK" "1292-1580-1-ND" (at 201.93 55.88 0))
    (property "PARTNO" "0805B471K500CT" (at 201.93 55.88 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C45") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:L") (at 189.23 39.37 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "L1" (at 186.055 37.465 90))
    (property "Value" "150nH" (at 195.58 37.465 90))
    (property "Footprint" "TPS40305_supply:FP1005R1-R15-R" (at 189.23 39.37 0))
    (property "Datasheet" "https://www.eaton.com/content/dam/eaton/products/electronic-components/resources/data-sheet/eaton-fp1005r-high-current-power-inductors-data-sheet.pdf" (at 189.23 39.37 0))
    (property "PARTNO" "FP1005R1-R15-R" (at 189.23 39.37 90))
    (property "DK" "513-1568-1-ND" (at 189.23 39.37 90))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "L1") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_US") (at 247.015 128.905 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "R17" (at 248.92 127.6349 0))
    (property "Value" "DNP" (at 248.92 130.1749 0))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 248.031 129.159 90))
    (property "Datasheet" "~" (at 247.015 128.905 0))
    (property "DNP" "T" (at 247.015 128.905 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "R17") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_US") (at 170.18 61.595 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "R12" (at 172.085 60.3249 0))
    (property "Value" "4.12k" (at 172.085 62.8649 0))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 171.196 61.849 90))
    (property "Datasheet" "~" (at 170.18 61.595 0))
    (property "DK" "RMCF0402FT4K12CT-ND" (at 170.18 61.595 0))
    (property "PARTNO" "RMCF0402FT4K12" (at 170.18 61.595 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "R12") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 87.63 60.96 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C40" (at 81.915 60.325 0))
    (property "Value" "180pF" (at 78.105 62.865 0))
    (property "Footprint" "Capacitor_SMD:C_0805_2012Metric" (at 88.5952 64.77 0))
    (property "Datasheet" "~" (at 87.63 60.96 0))
    (property "DK" "311-1114-1-ND" (at 87.63 60.96 0))
    (property "PARTNO" "CC0805JRNPO9BN181" (at 87.63 60.96 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C40") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "lcsc:INA219AIDCNR") (at 71.12 129.54 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "U6" (at 71.12 118.745 0))
    (property "Value" "INA219AIDCNR" (at 71.12 121.285 0))
    (property "Footprint" "lcsc:SOT-23-8_L3.0-W1.7-P0.65-LS2.8-BR" (at 71.12 140.97 0))
    (property "Datasheet" "https://lcsc.com/product-detail/PMIC-Current-Power-Monitors-Regulators_TI_INA219AIDCNR_INA219AIDCNR_C87469.html" (at 71.12 143.51 0))
    (property "Manufacturer" "TI(德州仪器)" (at 71.12 146.05 0))
    (property "LCSC Part" "C87469" (at 71.12 148.59 0))
    (property "JLC Part" "Extended Part" (at 71.12 151.13 0))
    (property "DK" "296-23770-1-ND" (at 71.12 129.54 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (pin "6")
    (pin "7")
    (pin "8")
    (instances
      (project "bitaxeMax"
        (path
          (reference "U6") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_US") (at 135.89 110.49 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "R4" (at 138.43 109.2199 0))
    (property "Value" "10k" (at 138.43 111.7599 0))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 136.906 110.744 90))
    (property "Datasheet" "~" (at 135.89 110.49 0))
    (property "DK" "311-10KJRCT-ND" (at 135.89 110.49 0))
    (property "PARTNO" "RC0402JR-0710KL" (at 135.89 110.49 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "R4") (unit 1)
        )
      )
    )
  )
)
