(kicad_sch (version 20230121) (generator eeschema)
  (paper "A4")
  (title_block
    (title "bitaxe, yo!")
    (date "2023-05-02")
    (rev "2.3")
  )
  (lib_symbols
    (symbol "Connector:TestPoint" (pin_numbers hide) (pin_names (offset 0.762) hide) (in_bom yes) (on_board yes)
      (property "Reference" "TP" (at 0 6.858 0))
      (property "Value" "TestPoint" (at 0 5.08 0))
      (property "Footprint" "" (at 5.08 0 0))
      (property "Datasheet" "~" (at 5.08 0 0))
      (property "ki_keywords" "test point tp" (at 0 0 0))
      (property "ki_description" "test point" (at 0 0 0))
      (property "ki_fp_filters" "Pin* Test*" (at 0 0 0))
      (symbol "TestPoint_0_1"
        (circle (center 0 3.302) (radius 0.762)
          (fill (type none))
        )
      )
      (symbol "TestPoint_1_1"
        (pin passive line (at 0 0 90) (length 2.54)
          (name "1")
          (number "1")
        )
      )
    )
    (symbol "Connector_Generic:Conn_01x04" (pin_names (offset 1.016) hide) (in_bom yes) (on_board yes)
      (property "Reference" "J" (at 0 5.08 0))
      (property "Value" "Conn_01x04" (at 0 -7.62 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "connector" (at 0 0 0))
      (property "ki_description" "Generic connector, single row, 01x04, script generated (kicad-library-utils/schlib/autogen/connector/)" (at 0 0 0))
      (property "ki_fp_filters" "Connector*:*_1x??_*" (at 0 0 0))
      (symbol "Conn_01x04_1_1"
        (rectangle (start -1.27 -4.953) (end 0 -5.207)
          (fill (type none))
        )
        (rectangle (start -1.27 -2.413) (end 0 -2.667)
          (fill (type none))
        )
        (rectangle (start -1.27 0.127) (end 0 -0.127)
          (fill (type none))
        )
        (rectangle (start -1.27 2.667) (end 0 2.413)
          (fill (type none))
        )
        (rectangle (start -1.27 3.81) (end 1.27 -6.35)
          (fill (type background))
        )
        (pin passive line (at -5.08 2.54 0) (length 3.81)
          (name "Pin_1")
          (number "1")
        )
        (pin passive line (at -5.08 0 0) (length 3.81)
          (name "Pin_2")
          (number "2")
        )
        (pin passive line (at -5.08 -2.54 0) (length 3.81)
          (name "Pin_3")
          (number "3")
        )
        (pin passive line (at -5.08 -5.08 0) (length 3.81)
          (name "Pin_4")
          (number "4")
        )
      )
    )
    (symbol "DayMiner-eagle-import:RESISTOR0402-RES" (in_bom yes) (on_board yes)
      (property "Reference" "R" (at -3.81 1.4986 0))
      (property "Value" "RESISTOR0402-RES" (at -3.81 -3.302 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "" (at 0 0 0))
      (property "ki_locked" "" (at 0 0 0))
      (symbol "RESISTOR0402-RES_1_0"
        (polyline
          (pts
            (xy -2.54 0)
            (xy -2.159 1.016)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -2.159 1.016)
            (xy -1.524 -1.016)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -1.524 -1.016)
            (xy -0.889 1.016)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -0.889 1.016)
            (xy -0.254 -1.016)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -0.254 -1.016)
            (xy 0.381 1.016)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0.381 1.016)
            (xy 1.016 -1.016)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 1.016 -1.016)
            (xy 1.651 1.016)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 1.651 1.016)
            (xy 2.286 -1.016)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 2.286 -1.016)
            (xy 2.54 0)
          )
          (fill (type none))
        )
        (pin passive line (at -5.08 0 0) (length 2.54)
          (name "1")
          (number "1")
        )
        (pin passive line (at 5.08 0 180) (length 2.54)
          (name "2")
          (number "2")
        )
      )
    )
    (symbol "Device:C" (pin_numbers hide) (pin_names (offset 0.254)) (in_bom yes) (on_board yes)
      (property "Reference" "C" (at 0.635 2.54 0))
      (property "Value" "C" (at 0.635 -2.54 0))
      (property "Footprint" "" (at 0.9652 -3.81 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "cap capacitor" (at 0 0 0))
      (property "ki_description" "Unpolarized capacitor" (at 0 0 0))
      (property "ki_fp_filters" "C_*" (at 0 0 0))
      (symbol "C_0_1"
        (polyline
          (pts
            (xy -2.032 -0.762)
            (xy 2.032 -0.762)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -2.032 0.762)
            (xy 2.032 0.762)
          )
          (fill (type none))
        )
      )
      (symbol "C_1_1"
        (pin passive line (at 0 3.81 270) (length 2.794)
          (name "~")
          (number "1")
        )
        (pin passive line (at 0 -3.81 90) (length 2.794)
          (name "~")
          (number "2")
        )
      )
    )
    (symbol "Device:C_Polarized" (pin_numbers hide) (pin_names (offset 0.254)) (in_bom yes) (on_board yes)
      (property "Reference" "C" (at 0.635 2.54 0))
      (property "Value" "C_Polarized" (at 0.635 -2.54 0))
      (property "Footprint" "" (at 0.9652 -3.81 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "cap capacitor" (at 0 0 0))
      (property "ki_description" "Polarized capacitor" (at 0 0 0))
      (property "ki_fp_filters" "CP_*" (at 0 0 0))
      (symbol "C_Polarized_0_1"
        (rectangle (start -2.286 0.508) (end 2.286 1.016)
          (fill (type none))
        )
        (polyline
          (pts
            (xy -1.778 2.286)
            (xy -0.762 2.286)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -1.27 2.794)
            (xy -1.27 1.778)
          )
          (fill (type none))
        )
        (rectangle (start 2.286 -0.508) (end -2.286 -1.016)
          (fill (type outline))
        )
      )
      (symbol "C_Polarized_1_1"
        (pin passive line (at 0 3.81 270) (length 2.794)
          (name "~")
          (number "1")
        )
        (pin passive line (at 0 -3.81 90) (length 2.794)
          (name "~")
          (number "2")
        )
      )
    )
    (symbol "Device:R_US" (pin_numbers hide) (pin_names (offset 0)) (in_bom yes) (on_board yes)
      (property "Reference" "R" (at 2.54 0 90))
      (property "Value" "R_US" (at -2.54 0 90))
      (property "Footprint" "" (at 1.016 -0.254 90))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "R res resistor" (at 0 0 0))
      (property "ki_description" "Resistor, US symbol" (at 0 0 0))
      (property "ki_fp_filters" "R_*" (at 0 0 0))
      (symbol "R_US_0_1"
        (polyline
          (pts
            (xy 0 -2.286)
            (xy 0 -2.54)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 2.286)
            (xy 0 2.54)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 -0.762)
            (xy 1.016 -1.143)
            (xy 0 -1.524)
            (xy -1.016 -1.905)
            (xy 0 -2.286)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 0.762)
            (xy 1.016 0.381)
            (xy 0 0)
            (xy -1.016 -0.381)
            (xy 0 -0.762)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 2.286)
            (xy 1.016 1.905)
            (xy 0 1.524)
            (xy -1.016 1.143)
            (xy 0 0.762)
          )
          (fill (type none))
        )
      )
      (symbol "R_US_1_1"
        (pin passive line (at 0 3.81 270) (length 1.27)
          (name "~")
          (number "1")
        )
        (pin passive line (at 0 -3.81 90) (length 1.27)
          (name "~")
          (number "2")
        )
      )
    )
    (symbol "dayminer:EMC2101" (in_bom yes) (on_board yes)
      (property "Reference" "U" (at 8.89 8.89 0))
      (property "Value" "EMC2101" (at -6.35 8.89 0))
      (property "Footprint" "" (at 12.7 -8.89 0))
      (property "Datasheet" "" (at 12.7 -8.89 0))
      (symbol "EMC2101_0_1"
        (rectangle (start -10.16 7.62) (end 10.16 -7.62)
          (fill (type background))
        )
      )
      (symbol "EMC2101_1_1"
        (pin power_in line (at -12.7 5.08 0) (length 2.54)
          (name "VDD")
          (number "1")
        )
        (pin input line (at -12.7 0 0) (length 2.54)
          (name "DP")
          (number "2")
        )
        (pin input line (at -12.7 -2.54 0) (length 2.54)
          (name "DN")
          (number "3")
        )
        (pin output line (at 12.7 0 180) (length 2.54)
          (name "FAN")
          (number "4")
        )
        (pin power_in line (at 12.7 -5.08 180) (length 2.54)
          (name "GND")
          (number "5")
        )
        (pin input line (at -12.7 -5.08 0) (length 2.54)
          (name "ALERT/TACH")
          (number "6")
        )
        (pin input line (at 12.7 2.54 180) (length 2.54)
          (name "SMDATA")
          (number "7")
        )
        (pin input line (at 12.7 5.08 180) (length 2.54)
          (name "SMCLK")
          (number "8")
        )
      )
    )
  )
  (junction (at 113.665 78.105) (diameter 0) (color 0 0 0 0))
  (junction (at 191.77 66.04) (diameter 0) (color 0 0 0 0))
  (junction (at 151.13 113.665) (diameter 0) (color 0 0 0 0))
  (junction (at 147.32 111.125) (diameter 0) (color 0 0 0 0))
  (junction (at 144.78 113.665) (diameter 0) (color 0 0 0 0))
  (junction (at 113.665 88.9) (diameter 0) (color 0 0 0 0))
  (junction (at 144.78 127) (diameter 0) (color 0 0 0 0))
  (junction (at 151.13 127) (diameter 0) (color 0 0 0 0))
  (wire (pts (xy 157.48 73.025) (xy 170.815 73.025)))
  (wire (pts (xy 144.78 123.19) (xy 144.78 127)))
  (wire (pts (xy 135.255 111.125) (xy 147.32 111.125)))
  (wire (pts (xy 144.78 127) (xy 151.13 127)))
  (wire (pts (xy 80.645 71.755) (xy 92.075 71.755)))
  (wire (pts (xy 103.505 88.9) (xy 113.665 88.9)))
  (wire (pts (xy 179.07 66.04) (xy 191.77 66.04)))
  (wire (pts (xy 113.665 69.215) (xy 102.87 69.215)))
  (wire (pts (xy 194.31 66.04) (xy 191.77 66.04)))
  (wire (pts (xy 80.645 69.215) (xy 92.71 69.215)))
  (wire (pts (xy 120.015 83.185) (xy 132.08 83.185)))
  (wire (pts (xy 147.32 111.125) (xy 178.435 111.125)))
  (wire (pts (xy 147.32 99.06) (xy 147.32 102.235)))
  (wire (pts (xy 157.48 75.565) (xy 170.815 75.565)))
  (wire (pts (xy 144.78 113.665) (xy 151.13 113.665)))
  (wire (pts (xy 167.005 116.205) (xy 167.005 127)))
  (wire (pts (xy 132.08 78.105) (xy 113.665 78.105)))
  (wire (pts (xy 125.095 73.025) (xy 132.08 73.025)))
  (wire (pts (xy 118.11 88.9) (xy 118.11 80.645)))
  (wire (pts (xy 191.77 81.28) (xy 191.77 83.185)))
  (wire (pts (xy 103.505 71.755) (xy 102.235 71.755)))
  (wire (pts (xy 113.665 78.105) (xy 113.665 79.375)))
  (wire (pts (xy 191.77 66.04) (xy 191.77 73.66)))
  (wire (pts (xy 113.665 78.105) (xy 113.665 69.215)))
  (wire (pts (xy 179.07 66.04) (xy 179.07 68.58)))
  (wire (pts (xy 151.13 113.665) (xy 151.13 115.57)))
  (wire (pts (xy 113.665 88.9) (xy 118.11 88.9)))
  (wire (pts (xy 179.07 78.105) (xy 179.07 76.2)))
  (wire (pts (xy 167.005 116.205) (xy 178.435 116.205)))
  (wire (pts (xy 103.505 71.755) (xy 103.505 88.9)))
  (wire (pts (xy 168.91 108.585) (xy 178.435 108.585)))
  (wire (pts (xy 151.13 113.665) (xy 178.435 113.665)))
  (wire (pts (xy 157.48 83.185) (xy 191.77 83.185)))
  (wire (pts (xy 147.32 109.855) (xy 147.32 111.125)))
  (wire (pts (xy 157.48 78.105) (xy 179.07 78.105)))
  (wire (pts (xy 135.255 113.665) (xy 144.78 113.665)))
  (wire (pts (xy 132.08 80.645) (xy 118.11 80.645)))
  (wire (pts (xy 141.605 127) (xy 144.78 127)))
  (wire (pts (xy 144.78 113.665) (xy 144.78 115.57)))
  (wire (pts (xy 151.13 127) (xy 167.005 127)))
  (wire (pts (xy 113.665 86.995) (xy 113.665 88.9)))
  (wire (pts (xy 151.13 123.19) (xy 151.13 127)))
  (text "I2C Address: 0x4C" (at 136.525 89.535 0))
  (label "FAN_PWM" (at 160.02 78.105 0) (fields_autoplaced))
  (label "TEMP_P" (at 80.645 69.215 0) (fields_autoplaced))
  (label "GND" (at 160.02 83.185 0) (fields_autoplaced))
  (label "SCL" (at 164.465 73.025 0) (fields_autoplaced))
  (label "FAN_TACH" (at 120.015 83.185 0) (fields_autoplaced))
  (label "GND" (at 156.845 127 0) (fields_autoplaced))
  (label "3V3" (at 147.32 100.965 0) (fields_autoplaced))
  (label "FAN_PWM" (at 168.91 108.585 0) (fields_autoplaced))
  (label "3V3" (at 184.15 66.04 0) (fields_autoplaced))
  (label "3V3" (at 125.095 73.025 0) (fields_autoplaced))
  (label "TEMP_N" (at 80.645 71.755 0) (fields_autoplaced))
  (label "5V" (at 137.795 113.665 0) (fields_autoplaced))
  (label "SDA" (at 164.465 75.565 0) (fields_autoplaced))
  (label "FAN_TACH" (at 168.91 111.125 0) (fields_autoplaced))
  (global_label "GND" (shape input) (at 141.605 127 180) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 135.3214 126.9206 0))
  )
  (hierarchical_label "5V" (shape input) (at 135.255 113.665 180) (fields_autoplaced))
  (hierarchical_label "TEMP_P" (shape input) (at 80.645 69.215 180) (fields_autoplaced))
  (hierarchical_label "SCL" (shape input) (at 170.815 73.025 0) (fields_autoplaced))
  (hierarchical_label "TEMP_N" (shape input) (at 80.645 71.755 180) (fields_autoplaced))
  (hierarchical_label "SDA" (shape input) (at 170.815 75.565 0) (fields_autoplaced))
  (hierarchical_label "3V3" (shape input) (at 194.31 66.04 0) (fields_autoplaced))
  (symbol (lib_id "Connector:TestPoint") (at 168.91 108.585 90) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "TP15" (at 162.56 108.585 90))
    (property "Value" "TestPoint" (at 163.195 109.8549 90))
    (property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm" (at 168.91 113.665 0))
    (property "Datasheet" "~" (at 168.91 113.665 0))
    (property "DNP" "T" (at 168.91 108.585 0))
    (pin "1")
    (instances
      (project "bitaxeMax"
        (path
          (reference "TP15") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_US") (at 147.32 106.045 180) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "R36" (at 151.13 104.775 0))
    (property "Value" "10k" (at 151.13 107.315 0))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 146.304 105.791 90))
    (property "Datasheet" "~" (at 147.32 106.045 0))
    (property "DK" "311-10KJRCT-ND" (at 147.32 106.045 0))
    (property "PARTNO" "RC0402JR-0710KL" (at 147.32 106.045 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "R36") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 191.77 77.47 0) (mirror y) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C33" (at 196.215 76.2 0))
    (property "Value" "0.1uF" (at 198.12 80.645 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 191.77 77.47 0))
    (property "Datasheet" "" (at 191.77 77.47 0))
    (property "Value" "311-3342-1-ND" (at 191.77 77.47 0))
    (property "DK" "1292-1639-1-ND" (at 191.77 77.47 0))
    (property "PARTNO" "0402X104K100CT" (at 191.77 77.47 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C33") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 151.13 119.38 0) (mirror y) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C29" (at 155.575 118.11 0))
    (property "Value" "0.1uF" (at 157.48 122.555 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 151.13 119.38 0))
    (property "Datasheet" "" (at 151.13 119.38 0))
    (property "Value" "311-3342-1-ND" (at 151.13 119.38 0))
    (property "DK" "1292-1639-1-ND" (at 151.13 119.38 0))
    (property "PARTNO" "0402X104K100CT" (at 151.13 119.38 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C29") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "DayMiner-eagle-import:RESISTOR0402-RES") (at 97.79 69.215 0) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "R8" (at 93.345 66.04 0))
    (property "Value" "100" (at 97.79 66.04 0))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 97.79 69.215 0))
    (property "Datasheet" "~" (at 97.79 69.215 0))
    (property "DK" "RMCF0402FT100RCT-ND" (at 97.79 69.215 0))
    (property "PARTNO" "RMCF0402FT100R" (at 97.79 69.215 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "R8") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector_Generic:Conn_01x04") (at 183.515 113.665 0) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "J4" (at 183.515 104.14 0))
    (property "Value" "Conn_01x04" (at 183.515 104.14 0))
    (property "Footprint" "bitaxe:470531000" (at 183.515 113.665 0))
    (property "Datasheet" "~" (at 183.515 113.665 0))
    (property "PARTNO" "0470531000" (at 183.515 113.665 0))
    (property "DK" "WM4330-ND" (at 183.515 113.665 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (instances
      (project "bitaxeMax"
        (path
          (reference "J4") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 113.665 83.185 0) (mirror y) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C32" (at 113.03 81.28 0))
    (property "Value" "470pF" (at 113.03 86.36 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 113.665 83.185 0))
    (property "Datasheet" "" (at 113.665 83.185 0))
    (property "DK" "1276-1566-1-ND" (at 113.665 83.185 0))
    (property "PARTNO" "CL05B471KB5NNNC" (at 113.665 83.185 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C32") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:TestPoint") (at 135.255 111.125 90) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "TP16" (at 128.905 111.125 90))
    (property "Value" "TestPoint" (at 129.54 112.3949 90))
    (property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm" (at 135.255 116.205 0))
    (property "Datasheet" "~" (at 135.255 116.205 0))
    (property "DNP" "T" (at 135.255 111.125 0))
    (pin "1")
    (instances
      (project "bitaxeMax"
        (path
          (reference "TP16") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "DayMiner-eagle-import:RESISTOR0402-RES") (at 97.155 71.755 0) (mirror y) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "R7" (at 95.885 75.435 0))
    (property "Value" "100" (at 101.6 75.435 0))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 97.155 71.755 0))
    (property "Datasheet" "~" (at 97.155 71.755 0))
    (property "DK" "RMCF0402FT100RCT-ND" (at 97.155 71.755 0))
    (property "PARTNO" "RMCF0402FT100R" (at 97.155 71.755 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "R7") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C_Polarized") (at 144.78 119.38 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C28" (at 137.795 118.11 0))
    (property "Value" "220uF" (at 135.255 120.65 0))
    (property "Footprint" "Capacitor_SMD:CP_Elec_6.3x7.7" (at 145.7452 123.19 0))
    (property "Datasheet" "~" (at 144.78 119.38 0))
    (property "DK" "732-8422-1-ND" (at 144.78 119.38 0))
    (property "PARTNO" "865080345012" (at 144.78 119.38 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C28") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_US") (at 179.07 72.39 180) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "R9" (at 182.245 71.12 0))
    (property "Value" "10k" (at 182.88 73.66 0))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 178.054 72.136 90))
    (property "Datasheet" "~" (at 179.07 72.39 0))
    (property "DK" "311-10KJRCT-ND" (at 179.07 72.39 0))
    (property "PARTNO" "RC0402JR-0710KL" (at 179.07 72.39 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "R9") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "dayminer:EMC2101") (at 144.78 78.105 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "U7" (at 153.67 69.215 0))
    (property "Value" "EMC2101" (at 138.43 69.215 0))
    (property "Footprint" "Package_SO:TSSOP-8_3x3mm_P0.65mm" (at 157.48 86.995 0))
    (property "Datasheet" "https://ww1.microchip.com/downloads/en/DeviceDoc/2101.pdf" (at 157.48 86.995 0))
    (property "DK" "EMC2101-R-ACZL-CT-ND" (at 144.78 78.105 0))
    (property "PARTNO" "EMC2101-R-ACZL-TR" (at 144.78 78.105 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (pin "6")
    (pin "7")
    (pin "8")
    (instances
      (project "bitaxeMax"
        (path
          (reference "U7") (unit 1)
        )
      )
    )
  )
)
