(kicad_sch (version 20230121) (generator eeschema)
  (paper "A4")
  (title_block
    (title "bitaxe, yo!")
    (date "2023-05-02")
    (rev "2.3")
  )
  (lib_symbols
    (symbol "Connector:TestPoint" (pin_numbers hide) (pin_names (offset 0.762) hide) (in_bom yes) (on_board yes)
      (property "Reference" "TP" (at 0 6.858 0))
      (property "Value" "TestPoint" (at 0 5.08 0))
      (property "Footprint" "" (at 5.08 0 0))
      (property "Datasheet" "~" (at 5.08 0 0))
      (property "ki_keywords" "test point tp" (at 0 0 0))
      (property "ki_description" "test point" (at 0 0 0))
      (property "ki_fp_filters" "Pin* Test*" (at 0 0 0))
      (symbol "TestPoint_0_1"
        (circle (center 0 3.302) (radius 0.762)
          (fill (type none))
        )
      )
      (symbol "TestPoint_1_1"
        (pin passive line (at 0 0 90) (length 2.54)
          (name "1")
          (number "1")
        )
      )
    )
    (symbol "Connector_Generic:Conn_01x03" (pin_names (offset 1.016) hide) (in_bom yes) (on_board yes)
      (property "Reference" "J" (at 0 5.08 0))
      (property "Value" "Conn_01x03" (at 0 -5.08 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "connector" (at 0 0 0))
      (property "ki_description" "Generic connector, single row, 01x03, script generated (kicad-library-utils/schlib/autogen/connector/)" (at 0 0 0))
      (property "ki_fp_filters" "Connector*:*_1x??_*" (at 0 0 0))
      (symbol "Conn_01x03_1_1"
        (rectangle (start -1.27 -2.413) (end 0 -2.667)
          (fill (type none))
        )
        (rectangle (start -1.27 0.127) (end 0 -0.127)
          (fill (type none))
        )
        (rectangle (start -1.27 2.667) (end 0 2.413)
          (fill (type none))
        )
        (rectangle (start -1.27 3.81) (end 1.27 -3.81)
          (fill (type background))
        )
        (pin passive line (at -5.08 2.54 0) (length 3.81)
          (name "Pin_1")
          (number "1")
        )
        (pin passive line (at -5.08 0 0) (length 3.81)
          (name "Pin_2")
          (number "2")
        )
        (pin passive line (at -5.08 -2.54 0) (length 3.81)
          (name "Pin_3")
          (number "3")
        )
      )
    )
    (symbol "Connector_Generic:Conn_01x08" (pin_names (offset 1.016) hide) (in_bom yes) (on_board yes)
      (property "Reference" "J" (at 0 10.16 0))
      (property "Value" "Conn_01x08" (at 0 -12.7 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "connector" (at 0 0 0))
      (property "ki_description" "Generic connector, single row, 01x08, script generated (kicad-library-utils/schlib/autogen/connector/)" (at 0 0 0))
      (property "ki_fp_filters" "Connector*:*_1x??_*" (at 0 0 0))
      (symbol "Conn_01x08_1_1"
        (rectangle (start -1.27 -10.033) (end 0 -10.287)
          (fill (type none))
        )
        (rectangle (start -1.27 -7.493) (end 0 -7.747)
          (fill (type none))
        )
        (rectangle (start -1.27 -4.953) (end 0 -5.207)
          (fill (type none))
        )
        (rectangle (start -1.27 -2.413) (end 0 -2.667)
          (fill (type none))
        )
        (rectangle (start -1.27 0.127) (end 0 -0.127)
          (fill (type none))
        )
        (rectangle (start -1.27 2.667) (end 0 2.413)
          (fill (type none))
        )
        (rectangle (start -1.27 5.207) (end 0 4.953)
          (fill (type none))
        )
        (rectangle (start -1.27 7.747) (end 0 7.493)
          (fill (type none))
        )
        (rectangle (start -1.27 8.89) (end 1.27 -11.43)
          (fill (type background))
        )
        (pin passive line (at -5.08 7.62 0) (length 3.81)
          (name "Pin_1")
          (number "1")
        )
        (pin passive line (at -5.08 5.08 0) (length 3.81)
          (name "Pin_2")
          (number "2")
        )
        (pin passive line (at -5.08 2.54 0) (length 3.81)
          (name "Pin_3")
          (number "3")
        )
        (pin passive line (at -5.08 0 0) (length 3.81)
          (name "Pin_4")
          (number "4")
        )
        (pin passive line (at -5.08 -2.54 0) (length 3.81)
          (name "Pin_5")
          (number "5")
        )
        (pin passive line (at -5.08 -5.08 0) (length 3.81)
          (name "Pin_6")
          (number "6")
        )
        (pin passive line (at -5.08 -7.62 0) (length 3.81)
          (name "Pin_7")
          (number "7")
        )
        (pin passive line (at -5.08 -10.16 0) (length 3.81)
          (name "Pin_8")
          (number "8")
        )
      )
    )
    (symbol "Device:C" (pin_numbers hide) (pin_names (offset 0.254)) (in_bom yes) (on_board yes)
      (property "Reference" "C" (at 0.635 2.54 0))
      (property "Value" "C" (at 0.635 -2.54 0))
      (property "Footprint" "" (at 0.9652 -3.81 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "cap capacitor" (at 0 0 0))
      (property "ki_description" "Unpolarized capacitor" (at 0 0 0))
      (property "ki_fp_filters" "C_*" (at 0 0 0))
      (symbol "C_0_1"
        (polyline
          (pts
            (xy -2.032 -0.762)
            (xy 2.032 -0.762)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -2.032 0.762)
            (xy 2.032 0.762)
          )
          (fill (type none))
        )
      )
      (symbol "C_1_1"
        (pin passive line (at 0 3.81 270) (length 2.794)
          (name "~")
          (number "1")
        )
        (pin passive line (at 0 -3.81 90) (length 2.794)
          (name "~")
          (number "2")
        )
      )
    )
    (symbol "Device:Crystal" (pin_numbers hide) (pin_names (offset 1.016) hide) (in_bom yes) (on_board yes)
      (property "Reference" "Y" (at 0 3.81 0))
      (property "Value" "Crystal" (at 0 -3.81 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "quartz ceramic resonator oscillator" (at 0 0 0))
      (property "ki_description" "Two pin crystal" (at 0 0 0))
      (property "ki_fp_filters" "Crystal*" (at 0 0 0))
      (symbol "Crystal_0_1"
        (rectangle (start -1.143 2.54) (end 1.143 -2.54)
          (fill (type none))
        )
        (polyline
          (pts
            (xy -2.54 0)
            (xy -1.905 0)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -1.905 -1.27)
            (xy -1.905 1.27)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 1.905 -1.27)
            (xy 1.905 1.27)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 2.54 0)
            (xy 1.905 0)
          )
          (fill (type none))
        )
      )
      (symbol "Crystal_1_1"
        (pin passive line (at -3.81 0 0) (length 1.27)
          (name "1")
          (number "1")
        )
        (pin passive line (at 3.81 0 180) (length 1.27)
          (name "2")
          (number "2")
        )
      )
    )
    (symbol "Device:R_US" (pin_numbers hide) (pin_names (offset 0)) (in_bom yes) (on_board yes)
      (property "Reference" "R" (at 2.54 0 90))
      (property "Value" "R_US" (at -2.54 0 90))
      (property "Footprint" "" (at 1.016 -0.254 90))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "R res resistor" (at 0 0 0))
      (property "ki_description" "Resistor, US symbol" (at 0 0 0))
      (property "ki_fp_filters" "R_*" (at 0 0 0))
      (symbol "R_US_0_1"
        (polyline
          (pts
            (xy 0 -2.286)
            (xy 0 -2.54)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 2.286)
            (xy 0 2.54)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 -0.762)
            (xy 1.016 -1.143)
            (xy 0 -1.524)
            (xy -1.016 -1.905)
            (xy 0 -2.286)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 0.762)
            (xy 1.016 0.381)
            (xy 0 0)
            (xy -1.016 -0.381)
            (xy 0 -0.762)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 2.286)
            (xy 1.016 1.905)
            (xy 0 1.524)
            (xy -1.016 1.143)
            (xy 0 0.762)
          )
          (fill (type none))
        )
      )
      (symbol "R_US_1_1"
        (pin passive line (at 0 3.81 270) (length 1.27)
          (name "~")
          (number "1")
        )
        (pin passive line (at 0 -3.81 90) (length 1.27)
          (name "~")
          (number "2")
        )
      )
    )
    (symbol "Espressif:ESP32-S3-WROOM-1" (pin_names (offset 1.016)) (in_bom yes) (on_board yes)
      (property "Reference" "U" (at -53.34 38.1 0))
      (property "Value" "ESP32-S3-WROOM-1" (at -53.34 35.56 0))
      (property "Footprint" "Espressif:ESP32-S3-WROOM-1" (at 0 -33.02 0))
      (property "Datasheet" "https://www.espressif.com/sites/default/files/documentation/esp32-s3-wroom-1_wroom-1u_datasheet_en.pdf" (at 0 -35.56 0))
      (property "ki_description" "2.4 GHz WiFi (802.11 b/g/n) and Bluetooth ® 5 (LE) module Built around ESP32S3 series of SoCs, Xtensa ® dualcore 32bit LX7 microprocessor Flash up to 16 MB, PSRAM up to 8 MB 36 GPIOs, rich set of peripherals Onboard PCB antenna" (at 0 0 0))
      (symbol "ESP32-S3-WROOM-1_0_0"
        (rectangle (start -53.34 33.02) (end 55.88 -30.48)
          (fill (type background))
        )
        (text "ESP32-S3-WROOM-1" (at 0 -25.4 0))
        (pin power_in line (at 58.42 -27.94 180) (length 2.54)
          (name "GND")
          (number "1")
        )
        (pin bidirectional line (at -55.88 -17.78 0) (length 2.54)
          (name "GPIO17/U1TXD/ADC2_CH6")
          (number "10")
        )
        (pin bidirectional line (at -55.88 -20.32 0) (length 2.54)
          (name "GPIO18/U1RXD/ADC2_CH7/CLK_OUT3")
          (number "11")
        )
        (pin bidirectional line (at -55.88 5.08 0) (length 2.54)
          (name "GPIO8/TOUCH8/ADC1_CH7/SUBSPICS1")
          (number "12")
        )
        (pin bidirectional line (at 58.42 27.94 180) (length 2.54)
          (name "GPIO19/U1RTS/ADC2_CH8/CLK_OUT2/USB_D-")
          (number "13")
        )
        (pin bidirectional line (at 58.42 30.48 180) (length 2.54)
          (name "GPIO20/U1CTS/ADC2_CH9/CLK_OUT1/USB_D+")
          (number "14")
        )
        (pin bidirectional line (at -55.88 17.78 0) (length 2.54)
          (name "GPIO3/TOUCH3/ADC1_CH2*")
          (number "15")
        )
        (pin bidirectional line (at 58.42 10.16 180) (length 2.54)
          (name "*GPIO46")
          (number "16")
        )
        (pin bidirectional line (at -55.88 2.54 0) (length 2.54)
          (name "GPIO9/TOUCH9/ADC1_CH8/FSPIHD/SUBSPIHD")
          (number "17")
        )
        (pin bidirectional line (at -55.88 0 0) (length 2.54)
          (name "GPIO10/TOUCH10/ADC1_CH9/FSPICS0/FSPIIO4/SUBSPICS0")
          (number "18")
        )
        (pin bidirectional line (at -55.88 -2.54 0) (length 2.54)
          (name "GPIO11/TOUCH11/ADC2_CH0/FSPID/FSPIIO5/SUBSPID")
          (number "19")
        )
        (pin power_in line (at -55.88 -27.94 0) (length 2.54)
          (name "3V3")
          (number "2")
        )
        (pin bidirectional line (at -55.88 -5.08 0) (length 2.54)
          (name "GPIO12/TOUCH12/ADC2_CH1/FSPICLK/FSPIIO6/SUBSPICLK")
          (number "20")
        )
        (pin bidirectional line (at -55.88 -7.62 0) (length 2.54)
          (name "GPIO13/TOUCH13/ADC2_CH2/FSPIQ/FSPIIO7/SUBSPIQ")
          (number "21")
        )
        (pin bidirectional line (at -55.88 -10.16 0) (length 2.54)
          (name "GPIO14/TOUCH14/ADC2_CH3/FSPIWP/FSPIDQS/SUBSPIWP")
          (number "22")
        )
        (pin bidirectional line (at 58.42 15.24 180) (length 2.54)
          (name "GPIO21")
          (number "23")
        )
        (pin bidirectional line (at 58.42 5.08 180) (length 2.54)
          (name "GPIO47/SPICLK_P/SUBSPICLK_P_DIFF")
          (number "24")
        )
        (pin bidirectional line (at 58.42 7.62 180) (length 2.54)
          (name "GPIO48/SPICLK_N/SUBSPICLK_N_DIFF")
          (number "25")
        )
        (pin bidirectional line (at 58.42 12.7 180) (length 2.54)
          (name "*GPIO45")
          (number "26")
        )
        (pin bidirectional line (at -55.88 30.48 0) (length 2.54)
          (name "GPIO0/BOOT*")
          (number "27")
        )
        (pin bidirectional line (at 58.42 -2.54 180) (length 2.54)
          (name "SPIIO6/GPIO35/FSPID/SUBSPID")
          (number "28")
        )
        (pin bidirectional line (at 58.42 -5.08 180) (length 2.54)
          (name "SPIIO7/GPIO36/FSPICLK/SUBSPICLK")
          (number "29")
        )
        (pin input line (at -55.88 27.94 0) (length 2.54)
          (name "EN")
          (number "3")
        )
        (pin bidirectional line (at 58.42 -7.62 180) (length 2.54)
          (name "SPIDQS/GPIO37/FSPIQ/SUBSPIQ")
          (number "30")
        )
        (pin bidirectional line (at 58.42 -10.16 180) (length 2.54)
          (name "GPIO38/FSPIWP/SUBSPIWP")
          (number "31")
        )
        (pin bidirectional line (at 58.42 -12.7 180) (length 2.54)
          (name "MTCK/GPIO39/CLK_OUT3/SUBSPICS1")
          (number "32")
        )
        (pin bidirectional line (at 58.42 -15.24 180) (length 2.54)
          (name "MTDO/GPIO40/CLK_OUT2")
          (number "33")
        )
        (pin bidirectional line (at 58.42 -17.78 180) (length 2.54)
          (name "MTDI/GPIO41/CLK_OUT1")
          (number "34")
        )
        (pin bidirectional line (at 58.42 -20.32 180) (length 2.54)
          (name "MTMS/GPIO42")
          (number "35")
        )
        (pin bidirectional line (at 58.42 17.78 180) (length 2.54)
          (name "U0RXD/GPIO44/CLK_OUT2")
          (number "36")
        )
        (pin bidirectional line (at 58.42 20.32 180) (length 2.54)
          (name "U0TXD/GPIO43/CLK_OUT1")
          (number "37")
        )
        (pin bidirectional line (at -55.88 20.32 0) (length 2.54)
          (name "GPIO2/TOUCH2/ADC1_CH1")
          (number "38")
        )
        (pin bidirectional line (at -55.88 22.86 0) (length 2.54)
          (name "GPIO1/TOUCH1/ADC1_CH0")
          (number "39")
        )
        (pin bidirectional line (at -55.88 15.24 0) (length 2.54)
          (name "GPIO4/TOUCH4/ADC1_CH3")
          (number "4")
        )
        (pin passive line (at 58.42 -27.94 180) (length 2.54) hide
          (name "GND")
          (number "40")
        )
        (pin passive line (at 58.42 -27.94 180) (length 2.54) hide
          (name "GND")
          (number "41")
        )
        (pin bidirectional line (at -55.88 12.7 0) (length 2.54)
          (name "GPIO5/TOUCH5/ADC1_CH4")
          (number "5")
        )
        (pin bidirectional line (at -55.88 10.16 0) (length 2.54)
          (name "GPIO6/TOUCH6/ADC1_CH5")
          (number "6")
        )
        (pin bidirectional line (at -55.88 7.62 0) (length 2.54)
          (name "GPIO7/TOUCH7/ADC1_CH6")
          (number "7")
        )
        (pin bidirectional line (at -55.88 -12.7 0) (length 2.54)
          (name "GPIO15/U0RTS/ADC2_CH4/XTAL_32K_P")
          (number "8")
        )
        (pin bidirectional line (at -55.88 -15.24 0) (length 2.54)
          (name "GPIO16/U0CTS/ADC2_CH5/XTAL_32K_NH5")
          (number "9")
        )
      )
    )
    (symbol "Espressif:TC2030-IDC-NL" (pin_names (offset 1.016) hide) (in_bom yes) (on_board yes)
      (property "Reference" "J" (at 0 -8.89 0))
      (property "Value" "TC2030-IDC-NL" (at 0.635 -11.43 0))
      (property "Footprint" "" (at -1.27 0 0))
      (property "Datasheet" "" (at -1.27 0 0))
      (property "ki_fp_filters" "TC2030*" (at 0 0 0))
      (symbol "TC2030-IDC-NL_0_1"
        (circle (center -2.54 -5.715) (radius 1.4224)
          (fill (type none))
        )
        (circle (center -1.6002 2.54) (radius 0.889)
          (fill (type none))
        )
        (circle (center 0 5.715) (radius 1.27)
          (fill (type none))
        )
      )
      (symbol "TC2030-IDC-NL_1_1"
        (circle (center -1.6002 -2.5908) (radius 0.889)
          (fill (type none))
        )
        (circle (center -1.6002 -0.0508) (radius 0.889)
          (fill (type none))
        )
        (circle (center 1.6002 -2.54) (radius 0.889)
          (fill (type none))
        )
        (circle (center 1.6002 0) (radius 0.889)
          (fill (type none))
        )
        (circle (center 1.6002 2.5908) (radius 0.889)
          (fill (type none))
        )
        (circle (center 2.54 -5.715) (radius 1.4224)
          (fill (type none))
        )
        (pin passive line (at -6.35 2.54 0) (length 3.81)
          (name "Pin_1")
          (number "1")
        )
        (pin passive line (at 6.35 2.54 180) (length 3.81)
          (name "Pin_2")
          (number "2")
        )
        (pin passive line (at -6.35 0 0) (length 3.81)
          (name "Pin_3")
          (number "3")
        )
        (pin passive line (at 6.35 0 180) (length 3.81)
          (name "Pin_4")
          (number "4")
        )
        (pin passive line (at -6.35 -2.54 0) (length 3.81)
          (name "Pin_5")
          (number "5")
        )
        (pin passive line (at 6.35 -2.54 180) (length 3.81)
          (name "Pin_6")
          (number "6")
        )
      )
    )
    (symbol "lcsc:LN1134A182MR-G" (in_bom yes) (on_board yes)
      (property "Reference" "U" (at 0 7.62 0))
      (property "Value" "LN1134A182MR-G" (at 0 -7.62 0))
      (property "Footprint" "lcsc:SOT-23-5_L3.0-W1.7-P0.95-LS2.8-BR" (at 0 -10.16 0))
      (property "Datasheet" "https://lcsc.com/product-detail/Low-Dropout-Regulators-LDO_LN1134A182MR-G_C141424.html" (at 0 -12.7 0))
      (property "Manufacturer" "natlinear(南麟)" (at 0 -15.24 0))
      (property "LCSC Part" "C141424" (at 0 -17.78 0))
      (property "JLC Part" "Extended Part" (at 0 -20.32 0))
      (symbol "LN1134A182MR-G_0_1"
        (rectangle (start -10.16 5.59) (end 10.16 -5.59)
          (fill (type background))
        )
        (pin unspecified line (at -12.7 2.54 0) (length 2.54)
          (name "VIN")
          (number "1")
        )
        (pin unspecified line (at -12.7 0 0) (length 2.54)
          (name "VSS")
          (number "2")
        )
        (pin unspecified line (at -12.7 -2.54 0) (length 2.54)
          (name "CE")
          (number "3")
        )
        (pin unspecified line (at 12.7 -2.54 180) (length 2.54)
          (name "NC")
          (number "4")
        )
        (pin unspecified line (at 12.7 2.54 180) (length 2.54)
          (name "VOUT")
          (number "5")
        )
      )
    )
  )
  (junction (at 39.37 160.02) (diameter 0) (color 0 0 0 0))
  (junction (at 46.99 46.99) (diameter 0) (color 0 0 0 0))
  (junction (at 38.735 33.655) (diameter 0) (color 0 0 0 0))
  (junction (at 46.99 38.735) (diameter 0) (color 0 0 0 0))
  (junction (at 83.82 33.655) (diameter 0) (color 0 0 0 0))
  (junction (at 64.135 160.02) (diameter 0) (color 0 0 0 0))
  (junction (at 245.745 100.33) (diameter 0) (color 0 0 0 0))
  (junction (at 35.56 80.01) (diameter 0) (color 0 0 0 0))
  (junction (at 254 102.87) (diameter 0) (color 0 0 0 0))
  (wire (pts (xy 182.245 48.26) (xy 191.135 48.26)))
  (wire (pts (xy 121.92 172.085) (xy 128.27 172.085)))
  (wire (pts (xy 121.92 177.165) (xy 128.27 177.165)))
  (wire (pts (xy 101.6 55.245) (xy 101.6 57.785)))
  (wire (pts (xy 245.745 100.33) (xy 247.65 100.33)))
  (wire (pts (xy 77.47 33.655) (xy 83.82 33.655)))
  (wire (pts (xy 56.515 160.02) (xy 64.135 160.02)))
  (wire (pts (xy 38.735 44.45) (xy 38.735 46.99)))
  (wire (pts (xy 250.825 139.7) (xy 258.445 139.7)))
  (wire (pts (xy 254 99.06) (xy 254 102.87)))
  (wire (pts (xy 66.04 110.49) (xy 77.47 110.49)))
  (wire (pts (xy 112.395 67.945) (xy 101.6 67.945)))
  (wire (pts (xy 39.37 172.72) (xy 39.37 169.545)))
  (wire (pts (xy 250.825 137.16) (xy 258.445 137.16)))
  (wire (pts (xy 77.47 125.73) (xy 66.04 125.73)))
  (wire (pts (xy 112.395 65.405) (xy 112.395 67.945)))
  (wire (pts (xy 182.245 43.18) (xy 191.135 43.18)))
  (wire (pts (xy 35.56 76.835) (xy 35.56 80.01)))
  (wire (pts (xy 254 86.995) (xy 254 91.44)))
  (wire (pts (xy 35.56 90.805) (xy 35.56 95.25)))
  (wire (pts (xy 83.82 33.655) (xy 83.82 36.195)))
  (wire (pts (xy 245.745 86.995) (xy 245.745 91.44)))
  (wire (pts (xy 64.135 160.02) (xy 71.12 160.02)))
  (wire (pts (xy 69.85 120.65) (xy 77.47 120.65)))
  (wire (pts (xy 38.735 33.655) (xy 38.735 36.83)))
  (wire (pts (xy 77.47 85.09) (xy 66.04 85.09)))
  (wire (pts (xy 46.99 38.735) (xy 46.99 46.99)))
  (wire (pts (xy 62.865 77.47) (xy 77.47 77.47)))
  (wire (pts (xy 83.82 46.99) (xy 83.82 43.815)))
  (wire (pts (xy 32.385 160.02) (xy 39.37 160.02)))
  (wire (pts (xy 39.37 172.72) (xy 64.135 172.72)))
  (wire (pts (xy 39.37 160.02) (xy 39.37 161.925)))
  (wire (pts (xy 250.825 142.24) (xy 258.445 142.24)))
  (wire (pts (xy 46.99 46.99) (xy 83.82 46.99)))
  (wire (pts (xy 121.92 174.625) (xy 128.27 174.625)))
  (wire (pts (xy 69.85 123.19) (xy 77.47 123.19)))
  (wire (pts (xy 83.82 33.655) (xy 90.805 33.655)))
  (wire (pts (xy 245.745 86.995) (xy 254 86.995)))
  (wire (pts (xy 254 102.87) (xy 255.905 102.87)))
  (wire (pts (xy 191.77 90.17) (xy 200.025 90.17)))
  (wire (pts (xy 38.735 33.655) (xy 52.07 33.655)))
  (wire (pts (xy 77.47 128.27) (xy 66.04 128.27)))
  (wire (pts (xy 39.37 160.02) (xy 48.895 160.02)))
  (wire (pts (xy 229.87 142.24) (xy 238.125 142.24)))
  (wire (pts (xy 191.77 102.87) (xy 254 102.87)))
  (wire (pts (xy 35.56 64.135) (xy 35.56 69.215)))
  (wire (pts (xy 46.99 38.735) (xy 52.07 38.735)))
  (wire (pts (xy 182.245 35.56) (xy 182.245 43.18)))
  (wire (pts (xy 66.04 139.065) (xy 71.755 139.065)))
  (wire (pts (xy 171.45 35.56) (xy 182.245 35.56)))
  (wire (pts (xy 171.45 45.72) (xy 191.135 45.72)))
  (wire (pts (xy 35.56 80.01) (xy 35.56 83.185)))
  (wire (pts (xy 121.92 167.005) (xy 128.27 167.005)))
  (wire (pts (xy 121.92 169.545) (xy 128.27 169.545)))
  (wire (pts (xy 191.77 135.89) (xy 206.375 135.89)))
  (wire (pts (xy 229.87 139.7) (xy 238.125 139.7)))
  (wire (pts (xy 66.04 87.63) (xy 77.47 87.63)))
  (wire (pts (xy 101.6 67.945) (xy 101.6 65.405)))
  (wire (pts (xy 64.135 160.02) (xy 64.135 161.925)))
  (wire (pts (xy 66.04 92.71) (xy 77.47 92.71)))
  (wire (pts (xy 229.87 137.16) (xy 238.125 137.16)))
  (wire (pts (xy 191.77 100.33) (xy 245.745 100.33)))
  (wire (pts (xy 34.29 33.655) (xy 38.735 33.655)))
  (wire (pts (xy 171.45 36.83) (xy 171.45 35.56)))
  (wire (pts (xy 191.77 87.63) (xy 200.025 87.63)))
  (wire (pts (xy 121.92 179.705) (xy 128.27 179.705)))
  (wire (pts (xy 52.07 36.195) (xy 46.99 36.195)))
  (wire (pts (xy 46.99 36.195) (xy 46.99 38.735)))
  (wire (pts (xy 245.745 99.06) (xy 245.745 100.33)))
  (wire (pts (xy 64.135 169.545) (xy 64.135 172.72)))
  (wire (pts (xy 112.395 55.245) (xy 101.6 55.245)))
  (wire (pts (xy 35.56 80.01) (xy 77.47 80.01)))
  (wire (pts (xy 171.45 44.45) (xy 171.45 45.72)))
  (wire (pts (xy 121.92 164.465) (xy 128.27 164.465)))
  (wire (pts (xy 66.04 135.89) (xy 77.47 135.89)))
  (wire (pts (xy 112.395 57.785) (xy 112.395 55.245)))
  (wire (pts (xy 66.04 90.17) (xy 77.47 90.17)))
  (wire (pts (xy 38.735 46.99) (xy 46.99 46.99)))
  (text "1-Wire connector for DS18B20 temperature sensor" (at 163.195 52.705 0))
  (text "Program the ESP32 with a ESP-PROG and a Tag Connect TC2030-IDC"
    (at 208.788 150.876 0)
  )
  (text "3V3 Debug Header" (at 120.904 156.464 0))
  (label "3V3" (at 175.26 35.56 0) (fields_autoplaced))
  (label "P_RX" (at 229.87 142.24 0) (fields_autoplaced))
  (label "RX" (at 121.92 167.005 0) (fields_autoplaced))
  (label "EN" (at 68.58 80.01 0) (fields_autoplaced))
  (label "RST" (at 121.92 164.465 0) (fields_autoplaced))
  (label "RST" (at 69.85 85.09 0) (fields_autoplaced))
  (label "SDA" (at 121.92 172.085 0) (fields_autoplaced))
  (label "P_TX" (at 229.87 139.7 0) (fields_autoplaced))
  (label "EN" (at 229.87 137.16 0) (fields_autoplaced))
  (label "XOUT32" (at 66.04 160.02 0) (fields_autoplaced))
  (label "P_RX" (at 195.58 90.17 0) (fields_autoplaced))
  (label "5V" (at 41.91 33.655 0) (fields_autoplaced))
  (label "GND" (at 105.41 67.945 0) (fields_autoplaced))
  (label "3V3" (at 66.675 135.89 0) (fields_autoplaced))
  (label "3V3" (at 247.015 86.995 0) (fields_autoplaced))
  (label "IO0" (at 68.58 77.47 0) (fields_autoplaced))
  (label "3V3" (at 86.995 33.655 0) (fields_autoplaced))
  (label "SDA" (at 207.645 102.87 0) (fields_autoplaced))
  (label "GND" (at 63.5 46.99 0) (fields_autoplaced))
  (label "GND" (at 66.675 139.065 0) (fields_autoplaced))
  (label "XIN32" (at 69.85 120.65 0) (fields_autoplaced))
  (label "TX" (at 70.485 125.73 0) (fields_autoplaced))
  (label "GND" (at 53.975 172.72 0) (fields_autoplaced))
  (label "3V3" (at 255.27 137.16 0) (fields_autoplaced))
  (label "IO0" (at 255.27 142.24 0) (fields_autoplaced))
  (label "SCL" (at 121.92 174.625 0) (fields_autoplaced))
  (label "SCL" (at 207.899 100.33 0) (fields_autoplaced))
  (label "XOUT32" (at 69.85 123.19 0) (fields_autoplaced))
  (label "XIN32" (at 32.385 160.02 0) (fields_autoplaced))
  (label "1WIRE_DATA" (at 179.07 45.72 0) (fields_autoplaced))
  (label "GND" (at 201.93 135.89 0) (fields_autoplaced))
  (label "TX" (at 121.92 169.545 0) (fields_autoplaced))
  (label "3V3" (at 105.41 55.245 0) (fields_autoplaced))
  (label "3V3" (at 121.92 177.165 0) (fields_autoplaced))
  (label "3V3" (at 35.56 66.675 0) (fields_autoplaced))
  (label "GND" (at 35.56 95.25 0) (fields_autoplaced))
  (label "P_TX" (at 195.58 87.63 0) (fields_autoplaced))
  (label "GND" (at 121.92 179.705 0) (fields_autoplaced))
  (label "GND" (at 255.27 139.7 0) (fields_autoplaced))
  (label "1WIRE_DATA" (at 66.04 92.71 0) (fields_autoplaced))
  (label "RX" (at 70.485 128.27 0) (fields_autoplaced))
  (label "3V3" (at 68.58 90.17 0) (fields_autoplaced))
  (label "GND" (at 182.245 48.26 0) (fields_autoplaced))
  (global_label "GND" (shape input) (at 206.375 135.89 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 212.6586 135.8106 0))
  )
  (hierarchical_label "TX" (shape input) (at 66.04 125.73 180) (fields_autoplaced))
  (hierarchical_label "RX" (shape input) (at 66.04 128.27 180) (fields_autoplaced))
  (hierarchical_label "3V3" (shape input) (at 90.805 33.655 0) (fields_autoplaced))
  (hierarchical_label "SCL" (shape input) (at 247.65 100.33 0) (fields_autoplaced))
  (hierarchical_label "RST" (shape input) (at 66.04 85.09 180) (fields_autoplaced))
  (hierarchical_label "SDA" (shape input) (at 255.905 102.87 0) (fields_autoplaced))
  (hierarchical_label "PGOOD" (shape output) (at 66.04 110.49 180) (fields_autoplaced))
  (hierarchical_label "5V" (shape input) (at 34.29 33.655 180) (fields_autoplaced))
  (hierarchical_label "VDD" (shape input) (at 66.04 87.63 180) (fields_autoplaced))
  (symbol (lib_id "Device:R_US") (at 245.745 95.25 180) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "R18" (at 248.92 94.615 0))
    (property "Value" "1k" (at 249.555 97.155 0))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 244.729 94.996 90))
    (property "Datasheet" "~" (at 245.745 95.25 0))
    (property "DK" "" (at 245.745 95.25 0))
    (property "DNP" "T" (at 245.745 95.25 0))
    (pin "1")
    (pin "2")
    (instances
      (project "esp32"
        (path
          (reference "R18") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "R18") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_US") (at 171.45 40.64 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "R20" (at 173.99 39.3699 0))
    (property "Value" "4.7k" (at 173.99 41.9099 0))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 172.466 40.894 90))
    (property "Datasheet" "~" (at 171.45 40.64 0))
    (property "DK" "" (at 171.45 40.64 0))
    (property "PARTNO" "" (at 171.45 40.64 0))
    (pin "1")
    (pin "2")
    (instances
      (project "esp32"
        (path
          (reference "R20") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "R24") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 35.56 86.995 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C50" (at 39.37 85.7249 0))
    (property "Value" "1uF" (at 39.37 88.2649 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 36.5252 90.805 0))
    (property "Datasheet" "" (at 35.56 86.995 0))
    (property "DK" "587-5514-1-ND" (at 35.56 86.995 0))
    (property "PARTNO" "EMK105BJ105MV-F" (at 35.56 86.995 0))
    (pin "1")
    (pin "2")
    (instances
      (project "esp32"
        (path
          (reference "C50") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "C50") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 39.37 165.735 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C30" (at 43.18 164.4649 0))
    (property "Value" "6.8pF" (at 43.18 167.0049 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 40.3352 169.545 0))
    (property "Datasheet" "~" (at 39.37 165.735 0))
    (property "DK" "399-C0402C689C5GAC7867CT-ND" (at 39.37 165.735 0))
    (property "PARTNO" "C0402C689C5GAC7867" (at 39.37 165.735 0))
    (pin "1")
    (pin "2")
    (instances
      (project "esp32"
        (path
          (reference "C30") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "C30") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "lcsc:LN1134A182MR-G") (at 64.77 36.195 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "U2" (at 64.77 26.67 0))
    (property "Value" "LN1134A332MR-G" (at 64.77 29.21 0))
    (property "Footprint" "lcsc:SOT-23-5_L3.0-W1.7-P0.95-LS2.8-BR" (at 64.77 46.355 0))
    (property "Datasheet" "https://www.lcsc.com/product-detail/Linear-Voltage-Regulators-LDO_NATLINEAR-LN1134A332MR-G_C141419.html" (at 64.77 48.895 0))
    (property "Manufacturer" "natlinear(南麟)" (at 64.77 51.435 0))
    (property "LCSC Part" "C141419" (at 64.77 53.975 0))
    (property "JLC Part" "Extended Part" (at 64.77 56.515 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (instances
      (project "Hashat"
        (path
          (reference "U2") (unit 1)
        )
      )
      (project "esp32"
        (path
          (reference "U2") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "U2") (unit 1)
        )
        (path
          (reference "U4") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 112.395 61.595 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C52" (at 116.205 60.3249 0))
    (property "Value" "0.1uF" (at 116.205 62.8649 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 113.3602 65.405 0))
    (property "Datasheet" "" (at 112.395 61.595 0))
    (property "DK" "1292-1639-1-ND" (at 112.395 61.595 0))
    (property "PARTNO" "0402X104K100CT" (at 112.395 61.595 0))
    (pin "1")
    (pin "2")
    (instances
      (project "esp32"
        (path
          (reference "C52") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "C52") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_US") (at 254 95.25 180) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "R19" (at 257.175 94.615 0))
    (property "Value" "1k" (at 257.81 97.155 0))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 252.984 94.996 90))
    (property "Datasheet" "~" (at 254 95.25 0))
    (property "DK" "" (at 254 95.25 0))
    (property "DNP" "T" (at 254 95.25 0))
    (pin "1")
    (pin "2")
    (instances
      (project "esp32"
        (path
          (reference "R19") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "R19") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 64.135 165.735 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C31" (at 67.31 164.4649 0))
    (property "Value" "6.8pF" (at 67.31 167.0049 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 65.1002 169.545 0))
    (property "Datasheet" "~" (at 64.135 165.735 0))
    (property "DK" "399-C0402C689C5GAC7867CT-ND" (at 64.135 165.735 0))
    (property "PARTNO" "C0402C689C5GAC7867" (at 64.135 165.735 0))
    (pin "1")
    (pin "2")
    (instances
      (project "esp32"
        (path
          (reference "C31") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "C31") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector_Generic:Conn_01x03") (at 196.215 45.72 0) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "J7" (at 194.945 40.64 0))
    (property "Value" "Conn_01x03" (at 199.39 43.815 0))
    (property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_1x03_P2.54mm_Vertical" (at 196.215 45.72 0))
    (property "Datasheet" "~" (at 196.215 45.72 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (instances
      (project "bitaxeMax"
        (path
          (reference "J7") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:TestPoint") (at 66.04 139.065 90) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "TP31" (at 59.69 139.065 90))
    (property "Value" "TestPoint" (at 60.325 140.3349 90))
    (property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm" (at 66.04 144.145 0))
    (property "Datasheet" "~" (at 66.04 144.145 0))
    (property "DNP" "T" (at 66.04 139.065 0))
    (pin "1")
    (instances
      (project "esp32"
        (path
          (reference "TP31") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "TP31") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:TestPoint") (at 229.87 139.7 90) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "TP18" (at 223.52 139.7 90))
    (property "Value" "TestPoint" (at 224.155 140.9699 90))
    (property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm" (at 229.87 144.78 0))
    (property "Datasheet" "~" (at 229.87 144.78 0))
    (property "DNP" "T" (at 229.87 139.7 0))
    (pin "1")
    (instances
      (project "esp32"
        (path
          (reference "TP18") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "TP18") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:TestPoint") (at 258.445 142.24 270) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "TP23" (at 264.795 142.24 90))
    (property "Value" "TestPoint" (at 264.16 140.9701 90))
    (property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm" (at 258.445 137.16 0))
    (property "Datasheet" "~" (at 258.445 137.16 0))
    (property "DNP" "T" (at 258.445 142.24 0))
    (pin "1")
    (instances
      (project "esp32"
        (path
          (reference "TP23") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "TP23") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 38.735 40.64 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C19" (at 40.005 38.735 0))
    (property "Value" "1uF" (at 40.005 44.45 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 38.735 40.64 0))
    (property "Datasheet" "" (at 38.735 40.64 0))
    (property "DK" "587-5514-1-ND" (at 38.735 40.64 0))
    (property "PARTNO" "EMK105BJ105MV-F" (at 38.735 40.64 0))
    (pin "1")
    (pin "2")
    (instances
      (project "Hashat"
        (path
          (reference "C19") (unit 1)
        )
      )
      (project "esp32"
        (path
          (reference "C19") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "C19") (unit 1)
        )
        (path
          (reference "C23") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_US") (at 35.56 73.025 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "R20" (at 38.1 71.7549 0))
    (property "Value" "10k" (at 38.1 74.2949 0))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 36.576 73.279 90))
    (property "Datasheet" "~" (at 35.56 73.025 0))
    (property "DK" "311-10KJRCT-ND" (at 35.56 73.025 0))
    (property "PARTNO" "RC0402JR-0710KL" (at 35.56 73.025 0))
    (pin "1")
    (pin "2")
    (instances
      (project "esp32"
        (path
          (reference "R20") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "R20") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Espressif:TC2030-IDC-NL") (at 244.475 139.7 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "J5" (at 244.475 127 0))
    (property "Value" "TC2030-IDC" (at 244.475 129.54 0))
    (property "Footprint" "Connector:Tag-Connect_TC2030-IDC-NL_2x03_P1.27mm_Vertical" (at 243.205 139.7 0))
    (property "Datasheet" "" (at 243.205 139.7 0))
    (property "DNP" "T" (at 244.475 139.7 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (pin "6")
    (instances
      (project "esp32"
        (path
          (reference "J5") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "J5") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 101.6 61.595 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C51" (at 104.775 60.3249 0))
    (property "Value" "10uF" (at 104.775 62.8649 0))
    (property "Footprint" "Capacitor_SMD:C_0805_2012Metric" (at 102.5652 65.405 0))
    (property "Datasheet" "" (at 101.6 61.595 0))
    (property "DK" "1276-1096-1-ND" (at 101.6 61.595 0))
    (property "PARTNO" "CL21A106KOQNNNE" (at 101.6 61.595 0))
    (pin "1")
    (pin "2")
    (instances
      (project "esp32"
        (path
          (reference "C51") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "C51") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:Crystal") (at 52.705 160.02 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "Y1" (at 52.705 153.035 0))
    (property "Value" "32.768kHz" (at 52.705 155.575 0))
    (property "Footprint" "bitaxe:SC32S-7PF20PPM" (at 52.705 160.02 0))
    (property "Datasheet" "https://www.sii.co.jp/en/quartz/files/2013/03/SC-32S_Leaflet_e20151217.pdf" (at 52.705 160.02 0))
    (property "DK" "728-1074-1-ND" (at 52.705 160.02 0))
    (property "PARTNO" "SC32S-7PF20PPM" (at 52.705 160.02 0))
    (pin "1")
    (pin "2")
    (instances
      (project "esp32"
        (path
          (reference "Y1") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "Y1") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 83.82 40.005 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C20" (at 85.09 38.1 0))
    (property "Value" "2.2uF" (at 85.09 43.815 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 83.82 40.005 0))
    (property "Datasheet" "" (at 83.82 40.005 0))
    (property "DK" "" (at 83.82 40.005 0))
    (property "PARTNO" "" (at 83.82 40.005 0))
    (pin "1")
    (pin "2")
    (instances
      (project "Hashat"
        (path
          (reference "C20") (unit 1)
        )
      )
      (project "esp32"
        (path
          (reference "C20") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "C21") (unit 1)
        )
        (path
          (reference "C24") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:TestPoint") (at 66.04 135.89 90) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "TP19" (at 59.69 135.89 90))
    (property "Value" "TestPoint" (at 60.325 137.1599 90))
    (property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm" (at 66.04 140.97 0))
    (property "Datasheet" "~" (at 66.04 140.97 0))
    (property "DNP" "T" (at 66.04 135.89 0))
    (pin "1")
    (instances
      (project "esp32"
        (path
          (reference "TP19") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "TP19") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:TestPoint") (at 229.87 137.16 90) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "TP17" (at 223.52 137.16 90))
    (property "Value" "TestPoint" (at 224.155 138.4299 90))
    (property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm" (at 229.87 142.24 0))
    (property "Datasheet" "~" (at 229.87 142.24 0))
    (property "DNP" "T" (at 229.87 137.16 0))
    (pin "1")
    (instances
      (project "esp32"
        (path
          (reference "TP17") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "TP17") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector_Generic:Conn_01x08") (at 133.35 169.545 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "J6" (at 135.89 169.5449 0))
    (property "Value" "Conn_01x08" (at 135.89 172.0849 0))
    (property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_1x08_P2.54mm_Vertical" (at 133.35 169.545 0))
    (property "Datasheet" "~" (at 133.35 169.545 0))
    (property "DNP" "T" (at 133.35 169.545 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (pin "6")
    (pin "7")
    (pin "8")
    (instances
      (project "esp32"
        (path
          (reference "J6") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "J6") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:TestPoint") (at 229.87 142.24 90) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "TP22" (at 223.52 142.24 90))
    (property "Value" "TestPoint" (at 224.155 143.5099 90))
    (property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm" (at 229.87 147.32 0))
    (property "Datasheet" "~" (at 229.87 147.32 0))
    (property "DNP" "T" (at 229.87 142.24 0))
    (pin "1")
    (instances
      (project "esp32"
        (path
          (reference "TP22") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "TP22") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Espressif:ESP32-S3-WROOM-1") (at 133.35 107.95 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "U12" (at 82.55 73.025 0))
    (property "Value" "ESP32-S3-WROOM-1" (at 179.07 73.025 0))
    (property "Footprint" "Espressif:ESP32-S3-WROOM-1U" (at 133.35 140.97 0))
    (property "Datasheet" "https://www.espressif.com/sites/default/files/documentation/esp32-s3-wroom-1_wroom-1u_datasheet_en.pdf" (at 133.35 143.51 0))
    (property "DK" "1965-ESP32-S3-WROOM-1-N16R8CT-ND" (at 133.35 107.95 0))
    (property "PARTNO" "ESP32-S3-WROOM-1-N16R8" (at 133.35 107.95 0))
    (pin "1")
    (pin "10")
    (pin "11")
    (pin "12")
    (pin "13")
    (pin "14")
    (pin "15")
    (pin "16")
    (pin "17")
    (pin "18")
    (pin "19")
    (pin "2")
    (pin "20")
    (pin "21")
    (pin "22")
    (pin "23")
    (pin "24")
    (pin "25")
    (pin "26")
    (pin "27")
    (pin "28")
    (pin "29")
    (pin "3")
    (pin "30")
    (pin "31")
    (pin "32")
    (pin "33")
    (pin "34")
    (pin "35")
    (pin "36")
    (pin "37")
    (pin "38")
    (pin "39")
    (pin "4")
    (pin "40")
    (pin "41")
    (pin "5")
    (pin "6")
    (pin "7")
    (pin "8")
    (pin "9")
    (instances
      (project "esp32"
        (path
          (reference "U12") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "U12") (unit 1)
        )
      )
    )
  )
  (sheet_instances
    (path (page "1"))
  )
)
