(kicad_sch (version 20230121) (generator eeschema)
  (paper "A4")
  (title_block
    (title "bitaxe, yo!")
    (date "2023-05-02")
    (rev "2.3")
  )
  (lib_symbols
    (symbol "Connector:TestPoint" (pin_numbers hide) (pin_names (offset 0.762) hide) (in_bom yes) (on_board yes)
      (property "Reference" "TP" (at 0 6.858 0))
      (property "Value" "TestPoint" (at 0 5.08 0))
      (property "Footprint" "" (at 5.08 0 0))
      (property "Datasheet" "~" (at 5.08 0 0))
      (property "ki_keywords" "test point tp" (at 0 0 0))
      (property "ki_description" "test point" (at 0 0 0))
      (property "ki_fp_filters" "Pin* Test*" (at 0 0 0))
      (symbol "TestPoint_0_1"
        (circle (center 0 3.302) (radius 0.762)
          (fill (type none))
        )
      )
      (symbol "TestPoint_1_1"
        (pin passive line (at 0 0 90) (length 2.54)
          (name "1")
          (number "1")
        )
      )
    )
    (symbol "Connector_Generic:Conn_01x05" (pin_names (offset 1.016) hide) (in_bom yes) (on_board yes)
      (property "Reference" "J" (at 0 7.62 0))
      (property "Value" "Conn_01x05" (at 0 -7.62 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "connector" (at 0 0 0))
      (property "ki_description" "Generic connector, single row, 01x05, script generated (kicad-library-utils/schlib/autogen/connector/)" (at 0 0 0))
      (property "ki_fp_filters" "Connector*:*_1x??_*" (at 0 0 0))
      (symbol "Conn_01x05_1_1"
        (rectangle (start -1.27 -4.953) (end 0 -5.207)
          (fill (type none))
        )
        (rectangle (start -1.27 -2.413) (end 0 -2.667)
          (fill (type none))
        )
        (rectangle (start -1.27 0.127) (end 0 -0.127)
          (fill (type none))
        )
        (rectangle (start -1.27 2.667) (end 0 2.413)
          (fill (type none))
        )
        (rectangle (start -1.27 5.207) (end 0 4.953)
          (fill (type none))
        )
        (rectangle (start -1.27 6.35) (end 1.27 -6.35)
          (fill (type background))
        )
        (pin passive line (at -5.08 5.08 0) (length 3.81)
          (name "Pin_1")
          (number "1")
        )
        (pin passive line (at -5.08 2.54 0) (length 3.81)
          (name "Pin_2")
          (number "2")
        )
        (pin passive line (at -5.08 0 0) (length 3.81)
          (name "Pin_3")
          (number "3")
        )
        (pin passive line (at -5.08 -2.54 0) (length 3.81)
          (name "Pin_4")
          (number "4")
        )
        (pin passive line (at -5.08 -5.08 0) (length 3.81)
          (name "Pin_5")
          (number "5")
        )
      )
    )
    (symbol "Device:C" (pin_numbers hide) (pin_names (offset 0.254)) (in_bom yes) (on_board yes)
      (property "Reference" "C" (at 0.635 2.54 0))
      (property "Value" "C" (at 0.635 -2.54 0))
      (property "Footprint" "" (at 0.9652 -3.81 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "cap capacitor" (at 0 0 0))
      (property "ki_description" "Unpolarized capacitor" (at 0 0 0))
      (property "ki_fp_filters" "C_*" (at 0 0 0))
      (symbol "C_0_1"
        (polyline
          (pts
            (xy -2.032 -0.762)
            (xy 2.032 -0.762)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -2.032 0.762)
            (xy 2.032 0.762)
          )
          (fill (type none))
        )
      )
      (symbol "C_1_1"
        (pin passive line (at 0 3.81 270) (length 2.794)
          (name "~")
          (number "1")
        )
        (pin passive line (at 0 -3.81 90) (length 2.794)
          (name "~")
          (number "2")
        )
      )
    )
    (symbol "Device:C_Polarized" (pin_numbers hide) (pin_names (offset 0.254)) (in_bom yes) (on_board yes)
      (property "Reference" "C" (at 0.635 2.54 0))
      (property "Value" "C_Polarized" (at 0.635 -2.54 0))
      (property "Footprint" "" (at 0.9652 -3.81 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "cap capacitor" (at 0 0 0))
      (property "ki_description" "Polarized capacitor" (at 0 0 0))
      (property "ki_fp_filters" "CP_*" (at 0 0 0))
      (symbol "C_Polarized_0_1"
        (rectangle (start -2.286 0.508) (end 2.286 1.016)
          (fill (type none))
        )
        (polyline
          (pts
            (xy -1.778 2.286)
            (xy -0.762 2.286)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy -1.27 2.794)
            (xy -1.27 1.778)
          )
          (fill (type none))
        )
        (rectangle (start 2.286 -0.508) (end -2.286 -1.016)
          (fill (type outline))
        )
      )
      (symbol "C_Polarized_1_1"
        (pin passive line (at 0 3.81 270) (length 2.794)
          (name "~")
          (number "1")
        )
        (pin passive line (at 0 -3.81 90) (length 2.794)
          (name "~")
          (number "2")
        )
      )
    )
    (symbol "Device:R_US" (pin_numbers hide) (pin_names (offset 0)) (in_bom yes) (on_board yes)
      (property "Reference" "R" (at 2.54 0 90))
      (property "Value" "R_US" (at -2.54 0 90))
      (property "Footprint" "" (at 1.016 -0.254 90))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "R res resistor" (at 0 0 0))
      (property "ki_description" "Resistor, US symbol" (at 0 0 0))
      (property "ki_fp_filters" "R_*" (at 0 0 0))
      (symbol "R_US_0_1"
        (polyline
          (pts
            (xy 0 -2.286)
            (xy 0 -2.54)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 2.286)
            (xy 0 2.54)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 -0.762)
            (xy 1.016 -1.143)
            (xy 0 -1.524)
            (xy -1.016 -1.905)
            (xy 0 -2.286)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 0.762)
            (xy 1.016 0.381)
            (xy 0 0)
            (xy -1.016 -0.381)
            (xy 0 -0.762)
          )
          (fill (type none))
        )
        (polyline
          (pts
            (xy 0 2.286)
            (xy 1.016 1.905)
            (xy 0 1.524)
            (xy -1.016 1.143)
            (xy 0 0.762)
          )
          (fill (type none))
        )
      )
      (symbol "R_US_1_1"
        (pin passive line (at 0 3.81 270) (length 1.27)
          (name "~")
          (number "1")
        )
        (pin passive line (at 0 -3.81 90) (length 1.27)
          (name "~")
          (number "2")
        )
      )
    )
    (symbol "bitaxe:BM1397_mode1" (in_bom yes) (on_board yes)
      (property "Reference" "IC" (at -17.78 17.78 0))
      (property "Value" "BM1397_mode1" (at -17.78 -30.48 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "" (at 0 0 0))
      (property "ki_locked" "" (at 0 0 0))
      (symbol "BM1397_mode1_1_0"
        (pin bidirectional line (at -20.32 15.24 0) (length 2.54)
          (name "VDD3_0")
          (number "1")
        )
        (pin bidirectional line (at -20.32 -7.62 0) (length 2.54)
          (name "RO")
          (number "10")
        )
        (pin bidirectional line (at -20.32 -10.16 0) (length 2.54)
          (name "CI")
          (number "11")
        )
        (pin bidirectional line (at -20.32 -12.7 0) (length 2.54)
          (name "CLKI")
          (number "12")
        )
        (pin bidirectional line (at -20.32 -15.24 0) (length 2.54)
          (name "PLL_VSS")
          (number "13")
        )
        (pin bidirectional line (at -20.32 -17.78 0) (length 2.54)
          (name "PLL_VDD")
          (number "14")
        )
        (pin bidirectional line (at -20.32 -20.32 0) (length 2.54)
          (name "VDDIO_08_0")
          (number "15")
        )
        (pin bidirectional line (at -20.32 -22.86 0) (length 2.54)
          (name "VDDIO_18_0")
          (number "16")
        )
        (pin bidirectional line (at 17.78 -22.86 180) (length 2.54)
          (name "VDDIO_18_1")
          (number "17")
        )
        (pin bidirectional line (at 17.78 -20.32 180) (length 2.54)
          (name "VDDIO_08_1")
          (number "18")
        )
        (pin bidirectional line (at 17.78 -17.78 180) (length 2.54)
          (name "VSS")
          (number "19")
        )
        (pin bidirectional line (at -20.32 12.7 0) (length 2.54)
          (name "VDD2_0")
          (number "2")
        )
        (pin bidirectional line (at 17.78 -15.24 180) (length 2.54)
          (name "PIN_MODE")
          (number "20")
        )
        (pin bidirectional line (at 17.78 -12.7 180) (length 2.54)
          (name "TEMP_N")
          (number "21")
        )
        (pin bidirectional line (at 17.78 -10.16 180) (length 2.54)
          (name "TEMP_P")
          (number "22")
        )
        (pin bidirectional line (at 17.78 -7.62 180) (length 2.54)
          (name "RF")
          (number "23")
        )
        (pin bidirectional line (at 17.78 -5.08 180) (length 2.54)
          (name "TF")
          (number "24")
        )
        (pin bidirectional line (at 17.78 -2.54 180) (length 2.54)
          (name "CLKO")
          (number "25")
        )
        (pin bidirectional line (at 17.78 0 180) (length 2.54)
          (name "CO")
          (number "26")
        )
        (pin bidirectional line (at 17.78 2.54 180) (length 2.54)
          (name "RI")
          (number "27")
        )
        (pin bidirectional line (at 17.78 5.08 180) (length 2.54)
          (name "NRSTO")
          (number "28")
        )
        (pin bidirectional line (at 17.78 7.62 180) (length 2.54)
          (name "BO")
          (number "29")
        )
        (pin bidirectional line (at -20.32 10.16 0) (length 2.54)
          (name "VDD1_0")
          (number "3")
        )
        (pin bidirectional line (at 17.78 10.16 180) (length 2.54)
          (name "VDD1_1")
          (number "30")
        )
        (pin bidirectional line (at 17.78 12.7 180) (length 2.54)
          (name "VDD2_1")
          (number "31")
        )
        (pin bidirectional line (at 17.78 15.24 180) (length 2.54)
          (name "VDD3_1")
          (number "32")
        )
        (pin bidirectional line (at 0 20.32 270) (length 2.54)
          (name "VDD")
          (number "33")
        )
        (pin bidirectional line (at 0 -30.48 90) (length 2.54)
          (name "VSS_0")
          (number "34")
        )
        (pin bidirectional line (at -20.32 7.62 0) (length 2.54)
          (name "ADDR0")
          (number "4")
        )
        (pin bidirectional line (at -20.32 5.08 0) (length 2.54)
          (name "ADDR1")
          (number "5")
        )
        (pin bidirectional line (at -20.32 2.54 0) (length 2.54)
          (name "ADDR2")
          (number "6")
        )
        (pin bidirectional line (at -20.32 0 0) (length 2.54)
          (name "TEST")
          (number "7")
        )
        (pin bidirectional line (at -20.32 -2.54 0) (length 2.54)
          (name "BI")
          (number "8")
        )
        (pin bidirectional line (at -20.32 -5.08 0) (length 2.54)
          (name "NRSTI")
          (number "9")
        )
      )
      (symbol "BM1397_mode1_1_1"
        (rectangle (start -17.78 17.78) (end 15.24 -27.94)
          (fill (type background))
        )
      )
    )
    (symbol "lcsc:LN1134A182MR-G" (in_bom yes) (on_board yes)
      (property "Reference" "U" (at 0 7.62 0))
      (property "Value" "LN1134A182MR-G" (at 0 -7.62 0))
      (property "Footprint" "lcsc:SOT-23-5_L3.0-W1.7-P0.95-LS2.8-BR" (at 0 -10.16 0))
      (property "Datasheet" "https://lcsc.com/product-detail/Low-Dropout-Regulators-LDO_LN1134A182MR-G_C141424.html" (at 0 -12.7 0))
      (property "Manufacturer" "natlinear(南麟)" (at 0 -15.24 0))
      (property "LCSC Part" "C141424" (at 0 -17.78 0))
      (property "JLC Part" "Extended Part" (at 0 -20.32 0))
      (symbol "LN1134A182MR-G_0_1"
        (rectangle (start -10.16 5.59) (end 10.16 -5.59)
          (fill (type background))
        )
        (pin unspecified line (at -12.7 2.54 0) (length 2.54)
          (name "VIN")
          (number "1")
        )
        (pin unspecified line (at -12.7 0 0) (length 2.54)
          (name "VSS")
          (number "2")
        )
        (pin unspecified line (at -12.7 -2.54 0) (length 2.54)
          (name "CE")
          (number "3")
        )
        (pin unspecified line (at 12.7 -2.54 180) (length 2.54)
          (name "NC")
          (number "4")
        )
        (pin unspecified line (at 12.7 2.54 180) (length 2.54)
          (name "VOUT")
          (number "5")
        )
      )
    )
    (symbol "lcsc:OT322525MJBA4SL" (in_bom yes) (on_board yes)
      (property "Reference" "X" (at -1.27 5.08 0))
      (property "Value" "OT322525MJBA4SL" (at 0 -6.35 0))
      (property "Footprint" "lcsc:OSC-SMD_4P-L3.2-W2.5-BL" (at 0 -8.89 0))
      (property "Datasheet" "https://lcsc.com/product-detail/SMD-Oscillators-XO_Yangxing-Tech-OT322525MJBA4SL_C669088.html" (at 0 -11.43 0))
      (property "Manufacturer" "YXC(扬兴晶振)" (at 0 -13.97 0))
      (property "LCSC Part" "C669088" (at 0 -16.51 0))
      (property "JLC Part" "Extended Part" (at 0 -19.05 0))
      (symbol "OT322525MJBA4SL_0_1"
        (rectangle (start -6.35 3.81) (end 5.08 -3.81)
          (fill (type background))
        )
        (pin unspecified line (at -8.89 1.27 0) (length 2.54)
          (name "EN")
          (number "1")
        )
        (pin unspecified line (at -8.89 -1.27 0) (length 2.54)
          (name "GND")
          (number "2")
        )
        (pin unspecified line (at 7.62 1.27 180) (length 2.54)
          (name "OUT")
          (number "3")
        )
        (pin unspecified line (at 7.62 -1.27 180) (length 2.54)
          (name "VDD")
          (number "4")
        )
      )
    )
    (symbol "lcsc:SGM2036-ADJYN5G_TR" (in_bom yes) (on_board yes)
      (property "Reference" "U" (at 0 7.62 0))
      (property "Value" "SGM2036-ADJYN5G/TR" (at 0 -7.62 0))
      (property "Footprint" "lcsc:SOT-23-5_L3.0-W1.7-P0.95-LS2.8-BR" (at 0 -10.16 0))
      (property "Datasheet" "https://lcsc.com/product-detail/Others_SG-Micro-SGM2036-ADJYN5G-TR_C194594.html" (at 0 -12.7 0))
      (property "Manufacturer" "SGMICRO(圣邦微)" (at 0 -15.24 0))
      (property "LCSC Part" "C194594" (at 0 -17.78 0))
      (property "JLC Part" "Extended Part" (at 0 -20.32 0))
      (symbol "SGM2036-ADJYN5G_TR_0_1"
        (rectangle (start -11.43 5.08) (end 11.43 -5.08)
          (fill (type background))
        )
        (pin unspecified line (at -13.97 2.54 0) (length 2.54)
          (name "IN")
          (number "1")
        )
        (pin unspecified line (at -13.97 0 0) (length 2.54)
          (name "GND")
          (number "2")
        )
        (pin unspecified line (at -13.97 -2.54 0) (length 2.54)
          (name "EN")
          (number "3")
        )
        (pin unspecified line (at 13.97 -2.54 180) (length 2.54)
          (name "BP/FB")
          (number "4")
        )
        (pin unspecified line (at 13.97 2.54 180) (length 2.54)
          (name "OUT")
          (number "5")
        )
      )
    )
    (symbol "lcsc:SN74LVC1T45DBVR" (in_bom yes) (on_board yes)
      (property "Reference" "U" (at 0 7.62 0))
      (property "Value" "SN74LVC1T45DBVR" (at 0 -7.62 0))
      (property "Footprint" "lcsc:SOT-23-6_L2.9-W1.6-P0.95-LS2.8-BR" (at 0 -10.16 0))
      (property "Datasheet" "https://lcsc.com/product-detail/74-Series_TI_SN74LVC1T45DBVR_SN74LVC1T45DBVR_C7843.html" (at 0 -12.7 0))
      (property "Manufacturer" "TI(德州仪器)" (at 0 -15.24 0))
      (property "LCSC Part" "C7843" (at 0 -17.78 0))
      (property "JLC Part" "Extended Part" (at 0 -20.32 0))
      (symbol "SN74LVC1T45DBVR_0_1"
        (rectangle (start -6.35 5.08) (end 8.89 -5.08)
          (fill (type background))
        )
        (pin unspecified line (at -8.89 2.54 0) (length 2.54)
          (name "VCCA")
          (number "1")
        )
        (pin unspecified line (at 11.43 -2.54 180) (length 2.54)
          (name "GND")
          (number "2")
        )
        (pin unspecified line (at -8.89 0 0) (length 2.54)
          (name "A")
          (number "3")
        )
        (pin unspecified line (at 11.43 0 180) (length 2.54)
          (name "B")
          (number "4")
        )
        (pin unspecified line (at -8.89 -2.54 0) (length 2.54)
          (name "DIR")
          (number "5")
        )
        (pin unspecified line (at 11.43 2.54 180) (length 2.54)
          (name "VCCB")
          (number "6")
        )
      )
    )
    (symbol "power:GND" (power) (pin_names (offset 0)) (in_bom yes) (on_board yes)
      (property "Reference" "#PWR" (at 0 -6.35 0))
      (property "Value" "GND" (at 0 -3.81 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "" (at 0 0 0))
      (property "ki_keywords" "power-flag" (at 0 0 0))
      (property "ki_description" "Power symbol creates a global label with name \"GND\" , ground" (at 0 0 0))
      (symbol "GND_0_1"
        (polyline
          (pts
            (xy 0 0)
            (xy 0 -1.27)
            (xy 1.27 -1.27)
            (xy 0 -2.54)
            (xy -1.27 -1.27)
            (xy 0 -1.27)
          )
          (fill (type none))
        )
      )
      (symbol "GND_1_1"
        (pin power_in line (at 0 0 270) (length 0) hide
          (name "GND")
          (number "1")
        )
      )
    )
  )
  (junction (at 120.015 46.355) (diameter 0) (color 0 0 0 0))
  (junction (at 210.82 57.785) (diameter 0) (color 0 0 0 0))
  (junction (at 112.395 134.62) (diameter 0) (color 0 0 0 0))
  (junction (at 151.13 107.95) (diameter 0) (color 0 0 0 0))
  (junction (at 133.35 73.66) (diameter 0) (color 0 0 0 0))
  (junction (at 146.05 134.62) (diameter 0) (color 0 0 0 0))
  (junction (at 144.78 73.66) (diameter 0) (color 0 0 0 0))
  (junction (at 264.795 122.555) (diameter 0) (color 0 0 0 0))
  (junction (at 209.55 45.085) (diameter 0) (color 0 0 0 0))
  (junction (at 45.72 184.15) (diameter 0) (color 0 0 0 0))
  (junction (at 105.41 59.055) (diameter 0) (color 0 0 0 0))
  (junction (at 65.405 73.66) (diameter 0) (color 0 0 0 0))
  (junction (at 139.065 134.62) (diameter 0) (color 0 0 0 0))
  (junction (at 106.68 134.62) (diameter 0) (color 0 0 0 0))
  (junction (at 246.38 31.75) (diameter 0) (color 0 0 0 0))
  (junction (at 209.55 76.835) (diameter 0) (color 0 0 0 0))
  (junction (at 151.13 110.49) (diameter 0) (color 0 0 0 0))
  (junction (at 217.17 111.125) (diameter 0) (color 0 0 0 0))
  (junction (at 195.58 147.32) (diameter 0) (color 0 0 0 0))
  (junction (at 264.795 97.79) (diameter 0) (color 0 0 0 0))
  (junction (at 201.93 122.555) (diameter 0) (color 0 0 0 0))
  (junction (at 195.58 122.555) (diameter 0) (color 0 0 0 0))
  (junction (at 195.58 97.79) (diameter 0) (color 0 0 0 0))
  (junction (at 81.28 134.62) (diameter 0) (color 0 0 0 0))
  (junction (at 246.38 111.125) (diameter 0) (color 0 0 0 0))
  (junction (at 246.38 160.655) (diameter 0) (color 0 0 0 0))
  (junction (at 46.99 100.33) (diameter 0) (color 0 0 0 0))
  (junction (at 201.93 57.785) (diameter 0) (color 0 0 0 0))
  (junction (at 145.415 95.25) (diameter 0) (color 0 0 0 0))
  (junction (at 109.22 73.66) (diameter 0) (color 0 0 0 0))
  (junction (at 99.695 46.355) (diameter 0.9144) (color 0 0 0 0))
  (junction (at 112.395 73.66) (diameter 0) (color 0 0 0 0))
  (junction (at 62.865 132.715) (diameter 0) (color 0 0 0 0))
  (junction (at 99.695 59.055) (diameter 0.9144) (color 0 0 0 0))
  (junction (at 201.295 31.75) (diameter 0) (color 0 0 0 0))
  (junction (at 77.47 73.66) (diameter 0) (color 0 0 0 0))
  (junction (at 89.535 115.57) (diameter 0) (color 0 0 0 0))
  (junction (at 73.66 92.71) (diameter 0) (color 0 0 0 0))
  (junction (at 120.015 59.055) (diameter 0) (color 0 0 0 0))
  (junction (at 109.855 46.355) (diameter 0.9144) (color 0 0 0 0))
  (junction (at 217.17 160.655) (diameter 0) (color 0 0 0 0))
  (junction (at 248.285 57.785) (diameter 0) (color 0 0 0 0))
  (junction (at 209.55 36.83) (diameter 0) (color 0 0 0 0))
  (junction (at 264.795 147.32) (diameter 0) (color 0 0 0 0))
  (junction (at 109.855 59.055) (diameter 0.9144) (color 0 0 0 0))
  (junction (at 88.9 73.66) (diameter 0) (color 0 0 0 0))
  (junction (at 58.42 102.87) (diameter 0) (color 0 0 0 0))
  (junction (at 245.11 57.785) (diameter 0) (color 0 0 0 0))
  (junction (at 246.38 135.89) (diameter 0) (color 0 0 0 0))
  (junction (at 156.21 73.66) (diameter 0) (color 0 0 0 0))
  (junction (at 74.295 134.62) (diameter 0) (color 0 0 0 0))
  (wire (pts (xy 62.865 110.49) (xy 92.075 110.49)))
  (wire (pts (xy 132.08 48.895) (xy 132.08 46.355)))
  (wire (pts (xy 195.58 97.79) (xy 221.615 97.79)))
  (wire (pts (xy 246.38 31.75) (xy 246.38 34.29)))
  (wire (pts (xy 130.175 118.11) (xy 146.05 118.11)))
  (wire (pts (xy 40.64 173.99) (xy 48.26 173.99)))
  (wire (pts (xy 156.21 87.63) (xy 156.21 73.66)))
  (wire (pts (xy 85.09 105.41) (xy 92.075 105.41)))
  (wire (pts (xy 201.295 42.545) (xy 201.295 45.085)))
  (wire (pts (xy 40.64 184.15) (xy 45.72 184.15)))
  (wire (pts (xy 144.78 85.09) (xy 144.78 73.66)))
  (wire (pts (xy 130.175 107.95) (xy 151.13 107.95)))
  (wire (pts (xy 264.795 135.89) (xy 264.795 131.445)))
  (wire (pts (xy 130.175 120.65) (xy 139.065 120.65)))
  (wire (pts (xy 217.17 111.125) (xy 246.38 111.125)))
  (wire (pts (xy 151.13 107.95) (xy 163.195 107.95)))
  (wire (pts (xy 46.99 73.66) (xy 55.88 73.66)))
  (wire (pts (xy 221.615 127.635) (xy 201.93 127.635)))
  (wire (pts (xy 212.09 100.33) (xy 221.615 100.33)))
  (wire (pts (xy 38.1 135.255) (xy 31.75 135.255)))
  (wire (pts (xy 105.41 59.055) (xy 99.695 59.055)))
  (wire (pts (xy 264.795 97.79) (xy 264.795 99.06)))
  (wire (pts (xy 248.285 57.785) (xy 248.285 62.865)))
  (wire (pts (xy 85.09 107.95) (xy 92.075 107.95)))
  (wire (pts (xy 73.66 92.71) (xy 81.28 92.71)))
  (wire (pts (xy 248.285 57.785) (xy 253.365 57.785)))
  (wire (pts (xy 195.58 147.32) (xy 195.58 148.59)))
  (wire (pts (xy 109.22 73.66) (xy 112.395 73.66)))
  (wire (pts (xy 217.17 102.87) (xy 217.17 111.125)))
  (wire (pts (xy 112.395 134.62) (xy 139.065 134.62)))
  (wire (pts (xy 58.42 112.395) (xy 58.42 115.57)))
  (wire (pts (xy 209.55 34.29) (xy 209.55 36.83)))
  (wire (pts (xy 195.58 111.125) (xy 217.17 111.125)))
  (wire (pts (xy 152.4 134.62) (xy 152.4 115.57)))
  (wire (pts (xy 195.58 131.445) (xy 195.58 135.89)))
  (wire (pts (xy 191.135 147.32) (xy 195.58 147.32)))
  (wire (pts (xy 241.935 102.87) (xy 246.38 102.87)))
  (wire (pts (xy 212.09 125.095) (xy 221.615 125.095)))
  (wire (pts (xy 264.795 97.79) (xy 271.145 97.79)))
  (wire (pts (xy 214.63 62.865) (xy 210.82 62.865)))
  (wire (pts (xy 212.09 149.86) (xy 221.615 149.86)))
  (wire (pts (xy 195.58 135.89) (xy 246.38 135.89)))
  (wire (pts (xy 151.13 106.045) (xy 151.13 107.95)))
  (wire (pts (xy 246.38 45.085) (xy 246.38 41.91)))
  (wire (pts (xy 195.58 122.555) (xy 195.58 123.825)))
  (wire (pts (xy 241.935 122.555) (xy 264.795 122.555)))
  (wire (pts (xy 99.695 48.895) (xy 99.695 46.355)))
  (wire (pts (xy 109.855 56.515) (xy 109.855 59.055)))
  (wire (pts (xy 195.58 156.21) (xy 195.58 160.655)))
  (wire (pts (xy 45.72 184.15) (xy 48.26 184.15)))
  (wire (pts (xy 201.93 122.555) (xy 201.93 127.635)))
  (wire (pts (xy 130.175 85.09) (xy 144.78 85.09)))
  (wire (pts (xy 209.55 36.83) (xy 214.63 36.83)))
  (wire (pts (xy 246.38 102.87) (xy 246.38 111.125)))
  (wire (pts (xy 166.37 73.66) (xy 172.72 73.66)))
  (wire (pts (xy 81.28 120.65) (xy 92.075 120.65)))
  (wire (pts (xy 241.935 100.33) (xy 248.92 100.33)))
  (wire (pts (xy 66.675 113.03) (xy 92.075 113.03)))
  (wire (pts (xy 74.295 129.54) (xy 74.295 134.62)))
  (wire (pts (xy 241.935 152.4) (xy 246.38 152.4)))
  (wire (pts (xy 131.445 73.66) (xy 133.35 73.66)))
  (wire (pts (xy 109.855 48.895) (xy 109.855 46.355)))
  (wire (pts (xy 86.995 73.66) (xy 88.9 73.66)))
  (wire (pts (xy 142.875 73.66) (xy 144.78 73.66)))
  (wire (pts (xy 109.22 69.85) (xy 109.22 73.66)))
  (wire (pts (xy 73.66 95.25) (xy 81.28 95.25)))
  (wire (pts (xy 77.47 73.66) (xy 79.375 73.66)))
  (wire (pts (xy 92.075 118.11) (xy 89.535 118.11)))
  (wire (pts (xy 30.48 132.715) (xy 38.1 132.715)))
  (wire (pts (xy 50.165 143.51) (xy 60.96 143.51)))
  (wire (pts (xy 195.58 97.79) (xy 195.58 99.06)))
  (wire (pts (xy 242.57 62.865) (xy 245.11 62.865)))
  (wire (pts (xy 201.93 76.835) (xy 201.93 70.485)))
  (wire (pts (xy 65.405 87.63) (xy 65.405 73.66)))
  (wire (pts (xy 221.615 152.4) (xy 217.17 152.4)))
  (wire (pts (xy 264.795 160.655) (xy 264.795 156.21)))
  (wire (pts (xy 120.015 59.055) (xy 109.855 59.055)))
  (wire (pts (xy 89.535 115.57) (xy 92.075 115.57)))
  (wire (pts (xy 248.285 70.485) (xy 248.285 76.835)))
  (wire (pts (xy 74.93 73.66) (xy 77.47 73.66)))
  (wire (pts (xy 151.13 112.395) (xy 151.13 110.49)))
  (wire (pts (xy 192.405 57.785) (xy 201.93 57.785)))
  (wire (pts (xy 88.9 95.25) (xy 92.075 95.25)))
  (wire (pts (xy 242.57 57.785) (xy 245.11 57.785)))
  (wire (pts (xy 241.935 125.095) (xy 248.92 125.095)))
  (wire (pts (xy 245.11 57.785) (xy 248.285 57.785)))
  (wire (pts (xy 133.35 73.66) (xy 135.255 73.66)))
  (wire (pts (xy 146.685 97.79) (xy 145.415 97.79)))
  (wire (pts (xy 217.17 152.4) (xy 217.17 160.655)))
  (wire (pts (xy 46.99 100.33) (xy 46.99 103.505)))
  (wire (pts (xy 201.93 57.785) (xy 210.82 57.785)))
  (wire (pts (xy 196.85 31.75) (xy 201.295 31.75)))
  (wire (pts (xy 58.42 102.87) (xy 92.075 102.87)))
  (wire (pts (xy 130.175 95.25) (xy 145.415 95.25)))
  (wire (pts (xy 99.695 59.055) (xy 89.535 59.055)))
  (wire (pts (xy 123.825 73.66) (xy 112.395 73.66)))
  (wire (pts (xy 74.295 134.62) (xy 81.28 134.62)))
  (wire (pts (xy 65.405 73.66) (xy 67.31 73.66)))
  (wire (pts (xy 210.82 57.785) (xy 214.63 57.785)))
  (wire (pts (xy 98.425 73.66) (xy 109.22 73.66)))
  (wire (pts (xy 92.075 82.55) (xy 88.9 82.55)))
  (wire (pts (xy 60.96 135.255) (xy 54.61 135.255)))
  (wire (pts (xy 73.66 92.71) (xy 73.66 95.25)))
  (wire (pts (xy 66.675 113.03) (xy 66.675 134.62)))
  (wire (pts (xy 46.99 115.57) (xy 58.42 115.57)))
  (wire (pts (xy 74.295 115.57) (xy 89.535 115.57)))
  (wire (pts (xy 89.535 56.515) (xy 89.535 59.055)))
  (wire (pts (xy 152.4 112.395) (xy 151.13 112.395)))
  (wire (pts (xy 109.855 59.055) (xy 105.41 59.055)))
  (wire (pts (xy 264.795 111.125) (xy 264.795 106.68)))
  (wire (pts (xy 191.135 97.79) (xy 195.58 97.79)))
  (wire (pts (xy 154.94 73.66) (xy 156.21 73.66)))
  (wire (pts (xy 109.855 46.355) (xy 120.015 46.355)))
  (wire (pts (xy 209.55 45.085) (xy 246.38 45.085)))
  (wire (pts (xy 201.295 45.085) (xy 209.55 45.085)))
  (wire (pts (xy 63.5 73.66) (xy 65.405 73.66)))
  (wire (pts (xy 201.93 57.785) (xy 201.93 62.865)))
  (wire (pts (xy 120.015 48.895) (xy 120.015 46.355)))
  (wire (pts (xy 241.935 97.79) (xy 264.795 97.79)))
  (wire (pts (xy 106.045 69.85) (xy 109.22 69.85)))
  (wire (pts (xy 240.03 31.75) (xy 246.38 31.75)))
  (wire (pts (xy 77.47 85.09) (xy 77.47 73.66)))
  (wire (pts (xy 31.75 135.255) (xy 31.75 143.51)))
  (wire (pts (xy 246.38 135.89) (xy 264.795 135.89)))
  (wire (pts (xy 74.295 121.92) (xy 74.295 115.57)))
  (wire (pts (xy 146.05 134.62) (xy 152.4 134.62)))
  (wire (pts (xy 191.135 122.555) (xy 195.58 122.555)))
  (wire (pts (xy 145.415 95.25) (xy 155.575 95.25)))
  (wire (pts (xy 73.66 90.17) (xy 73.66 92.71)))
  (wire (pts (xy 210.82 62.865) (xy 210.82 57.785)))
  (wire (pts (xy 246.38 127.635) (xy 246.38 135.89)))
  (wire (pts (xy 139.065 129.54) (xy 139.065 134.62)))
  (wire (pts (xy 146.05 118.11) (xy 146.05 121.92)))
  (wire (pts (xy 81.28 129.54) (xy 81.28 134.62)))
  (wire (pts (xy 195.58 147.32) (xy 221.615 147.32)))
  (wire (pts (xy 195.58 106.68) (xy 195.58 111.125)))
  (wire (pts (xy 163.195 95.25) (xy 170.815 95.25)))
  (wire (pts (xy 195.58 160.655) (xy 217.17 160.655)))
  (wire (pts (xy 81.28 90.17) (xy 73.66 90.17)))
  (wire (pts (xy 146.05 129.54) (xy 146.05 134.62)))
  (wire (pts (xy 217.17 160.655) (xy 246.38 160.655)))
  (wire (pts (xy 133.35 82.55) (xy 133.35 73.66)))
  (wire (pts (xy 264.795 147.32) (xy 264.795 148.59)))
  (wire (pts (xy 99.695 56.515) (xy 99.695 59.055)))
  (wire (pts (xy 246.38 160.655) (xy 264.795 160.655)))
  (wire (pts (xy 31.75 143.51) (xy 42.545 143.51)))
  (wire (pts (xy 151.13 110.49) (xy 163.195 110.49)))
  (wire (pts (xy 209.55 76.835) (xy 248.285 76.835)))
  (wire (pts (xy 201.295 31.75) (xy 214.63 31.75)))
  (wire (pts (xy 246.38 152.4) (xy 246.38 160.655)))
  (wire (pts (xy 221.615 102.87) (xy 217.17 102.87)))
  (wire (pts (xy 195.58 122.555) (xy 201.93 122.555)))
  (wire (pts (xy 58.42 102.87) (xy 58.42 104.775)))
  (wire (pts (xy 144.78 73.66) (xy 147.32 73.66)))
  (wire (pts (xy 112.395 73.66) (xy 112.395 77.47)))
  (wire (pts (xy 130.175 82.55) (xy 133.35 82.55)))
  (wire (pts (xy 46.99 100.33) (xy 92.075 100.33)))
  (wire (pts (xy 92.075 87.63) (xy 65.405 87.63)))
  (wire (pts (xy 139.065 120.65) (xy 139.065 121.92)))
  (wire (pts (xy 264.795 122.555) (xy 271.145 122.555)))
  (wire (pts (xy 89.535 46.355) (xy 99.695 46.355)))
  (wire (pts (xy 81.28 121.92) (xy 81.28 120.65)))
  (wire (pts (xy 209.55 60.325) (xy 209.55 76.835)))
  (wire (pts (xy 245.11 57.785) (xy 245.11 62.865)))
  (wire (pts (xy 201.295 31.75) (xy 201.295 34.925)))
  (wire (pts (xy 130.175 87.63) (xy 156.21 87.63)))
  (wire (pts (xy 92.075 85.09) (xy 77.47 85.09)))
  (wire (pts (xy 156.21 73.66) (xy 158.75 73.66)))
  (wire (pts (xy 264.795 147.32) (xy 271.145 147.32)))
  (wire (pts (xy 60.96 143.51) (xy 60.96 135.255)))
  (wire (pts (xy 120.015 46.355) (xy 132.08 46.355)))
  (wire (pts (xy 130.175 110.49) (xy 151.13 110.49)))
  (wire (pts (xy 40.64 179.07) (xy 48.26 179.07)))
  (wire (pts (xy 46.99 111.125) (xy 46.99 115.57)))
  (wire (pts (xy 88.9 92.71) (xy 92.075 92.71)))
  (wire (pts (xy 89.535 118.11) (xy 89.535 115.57)))
  (wire (pts (xy 99.695 46.355) (xy 109.855 46.355)))
  (wire (pts (xy 214.63 34.29) (xy 209.55 34.29)))
  (wire (pts (xy 241.935 127.635) (xy 246.38 127.635)))
  (wire (pts (xy 152.4 115.57) (xy 130.175 115.57)))
  (wire (pts (xy 132.08 56.515) (xy 132.08 59.055)))
  (wire (pts (xy 50.165 102.87) (xy 58.42 102.87)))
  (wire (pts (xy 246.38 31.75) (xy 253.365 31.75)))
  (wire (pts (xy 120.015 56.515) (xy 120.015 59.055)))
  (wire (pts (xy 89.535 48.895) (xy 89.535 46.355)))
  (wire (pts (xy 88.9 73.66) (xy 90.805 73.66)))
  (wire (pts (xy 241.935 149.86) (xy 250.825 149.86)))
  (wire (pts (xy 201.93 122.555) (xy 221.615 122.555)))
  (wire (pts (xy 145.415 97.79) (xy 145.415 95.25)))
  (wire (pts (xy 209.55 76.835) (xy 201.93 76.835)))
  (wire (pts (xy 264.795 122.555) (xy 264.795 123.825)))
  (wire (pts (xy 81.28 134.62) (xy 106.68 134.62)))
  (wire (pts (xy 246.38 111.125) (xy 264.795 111.125)))
  (wire (pts (xy 54.61 132.715) (xy 62.865 132.715)))
  (wire (pts (xy 40.64 176.53) (xy 48.26 176.53)))
  (wire (pts (xy 88.9 73.66) (xy 88.9 82.55)))
  (wire (pts (xy 209.55 36.83) (xy 209.55 45.085)))
  (wire (pts (xy 40.64 181.61) (xy 48.26 181.61)))
  (wire (pts (xy 241.935 147.32) (xy 264.795 147.32)))
  (wire (pts (xy 214.63 60.325) (xy 209.55 60.325)))
  (wire (pts (xy 120.015 59.055) (xy 132.08 59.055)))
  (wire (pts (xy 112.395 134.62) (xy 112.395 128.27)))
  (wire (pts (xy 62.865 110.49) (xy 62.865 132.715)))
  (wire (pts (xy 139.065 134.62) (xy 146.05 134.62)))
  (wire (pts (xy 88.9 90.17) (xy 92.075 90.17)))
  (wire (pts (xy 66.675 134.62) (xy 74.295 134.62)))
  (wire (pts (xy 106.68 134.62) (xy 112.395 134.62)))
  (wire (pts (xy 151.765 106.045) (xy 151.13 106.045)))
  (text "Reference Voltage Regulators" (at 214.63 21.59 0))
  (text "DIR LOW is A <- B" (at 222.25 157.48 0))
  (text "DIR HI is A -> B" (at 222.25 132.715 0))
  (text "DIR LOW is A <- B" (at 222.25 107.95 0))
  (label "GND" (at 40.64 184.15 0) (fields_autoplaced))
  (label "BM_RST" (at 243.205 149.86 0) (fields_autoplaced))
  (label "TEMP_P" (at 143.51 107.95 0) (fields_autoplaced))
  (label "1V8" (at 167.64 95.25 0) (fields_autoplaced))
  (label "1V8" (at 249.555 31.75 0) (fields_autoplaced))
  (label "1V8" (at 55.88 135.255 0) (fields_autoplaced))
  (label "CI" (at 40.64 176.53 0) (fields_autoplaced))
  (label "GND" (at 116.205 134.62 0) (fields_autoplaced))
  (label "0V8" (at 132.715 118.11 0) (fields_autoplaced))
  (label "1V8" (at 132.715 120.65 0) (fields_autoplaced))
  (label "VDD" (at 114.3 73.66 0) (fields_autoplaced))
  (label "RST_N" (at 40.64 181.61 0) (fields_autoplaced))
  (label "GND" (at 74.93 92.71 0) (fields_autoplaced))
  (label "RO" (at 40.64 179.07 0) (fields_autoplaced))
  (label "GND" (at 50.165 115.57 0) (fields_autoplaced))
  (label "GND" (at 233.68 135.89 180) (fields_autoplaced))
  (label "GND" (at 226.06 45.085 0) (fields_autoplaced))
  (label "VDD" (at 112.395 46.355 0) (fields_autoplaced))
  (label "3V3" (at 250.825 122.555 0) (fields_autoplaced))
  (label "1V8" (at 212.725 122.555 0) (fields_autoplaced))
  (label "GND" (at 233.68 111.125 180) (fields_autoplaced))
  (label "5V" (at 204.47 31.75 0) (fields_autoplaced))
  (label "BM_CI" (at 243.205 100.33 0) (fields_autoplaced))
  (label "1V8" (at 85.09 120.65 0) (fields_autoplaced))
  (label "RO" (at 85.09 105.41 0) (fields_autoplaced))
  (label "GND" (at 233.68 160.655 180) (fields_autoplaced))
  (label "RST_N" (at 50.165 102.87 0) (fields_autoplaced))
  (label "CI" (at 85.09 107.95 0) (fields_autoplaced))
  (label "GND" (at 33.655 135.255 0) (fields_autoplaced))
  (label "5V" (at 196.215 57.785 0) (fields_autoplaced))
  (label "GND" (at 168.275 73.66 0) (fields_autoplaced))
  (label "0V8" (at 250.19 57.785 0) (fields_autoplaced))
  (label "3V3" (at 250.825 97.79 0) (fields_autoplaced))
  (label "3V3" (at 250.825 147.32 0) (fields_autoplaced))
  (label "GND" (at 228.6 76.835 0) (fields_autoplaced))
  (label "CI" (at 214.63 100.33 0) (fields_autoplaced))
  (label "1V8" (at 33.655 132.715 0) (fields_autoplaced))
  (label "BM_RO" (at 243.205 125.095 0) (fields_autoplaced))
  (label "RST_N" (at 214.63 149.86 0) (fields_autoplaced))
  (label "1V8" (at 212.725 147.32 0) (fields_autoplaced))
  (label "1V8" (at 212.725 97.79 0) (fields_autoplaced))
  (label "0V8" (at 85.09 115.57 0) (fields_autoplaced))
  (label "GND" (at 117.475 59.055 180) (fields_autoplaced))
  (label "1V8" (at 40.64 173.99 0) (fields_autoplaced))
  (label "TEMP_N" (at 143.51 110.49 0) (fields_autoplaced))
  (label "GND" (at 48.26 73.66 0) (fields_autoplaced))
  (label "RO" (at 212.725 125.095 0) (fields_autoplaced))
  (global_label "GND" (shape input) (at 152.4 134.62 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 158.6836 134.5406 0))
  )
  (hierarchical_label "BM_RST" (shape input) (at 250.825 149.86 0) (fields_autoplaced))
  (hierarchical_label "TEMP_N" (shape input) (at 163.195 110.49 0) (fields_autoplaced))
  (hierarchical_label "BM_CI" (shape input) (at 248.92 100.33 0) (fields_autoplaced))
  (hierarchical_label "VDD" (shape input) (at 106.045 69.85 180) (fields_autoplaced))
  (hierarchical_label "5V" (shape input) (at 196.85 31.75 180) (fields_autoplaced))
  (hierarchical_label "BM_RO" (shape output) (at 248.92 125.095 0) (fields_autoplaced))
  (hierarchical_label "TEMP_P" (shape input) (at 163.195 107.95 0) (fields_autoplaced))
  (hierarchical_label "3V3" (shape input) (at 271.145 97.79 0) (fields_autoplaced))
  (symbol (lib_id "Device:C") (at 195.58 127.635 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C21" (at 196.215 126.365 0))
    (property "Value" "0.1uF" (at 196.215 131.445 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 195.58 127.635 0))
    (property "Datasheet" "" (at 195.58 127.635 0))
    (property "Value" "311-3342-1-ND" (at 195.58 127.635 0))
    (property "DK" "1292-1639-1-ND" (at 195.58 127.635 0))
    (property "PARTNO" "0402X104K100CT" (at 195.58 127.635 0))
    (pin "1")
    (pin "2")
    (instances
      (project "Hashat"
        (path
          (reference "C21") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "C53") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:TestPoint") (at 40.64 181.61 90) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "TP4" (at 34.29 181.61 90))
    (property "Value" "TestPoint" (at 34.925 182.8799 90))
    (property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm" (at 40.64 186.69 0))
    (property "Datasheet" "~" (at 40.64 186.69 0))
    (property "DNP" "T" (at 40.64 181.61 0))
    (pin "1")
    (instances
      (project "bitaxeMax"
        (path
          (reference "TP4") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 89.535 52.705 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C7" (at 90.805 50.8 0))
    (property "Value" "0.1uF" (at 90.805 55.88 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 89.535 52.705 0))
    (property "Datasheet" "" (at 89.535 52.705 0))
    (property "Value" "311-3342-1-ND" (at 89.535 52.705 0))
    (property "DK" "1292-1639-1-ND" (at 89.535 52.705 0))
    (property "PARTNO" "0402X104K100CT" (at 89.535 52.705 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C7") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 162.56 73.66 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C18" (at 160.02 71.12 90))
    (property "Value" "1uF" (at 161.29 74.295 90))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 162.56 73.66 0))
    (property "Datasheet" "" (at 162.56 73.66 0))
    (property "Value" "587-5514-1-ND" (at 162.56 73.66 0))
    (property "DK" "587-5514-1-ND" (at 162.56 73.66 0))
    (property "PARTNO" "EMK105BJ105MV-F" (at 162.56 73.66 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C18") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 106.68 134.62 0) (mirror y) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR02" (at 106.68 140.97 0))
    (property "Value" "GND" (at 106.68 139.065 0))
    (property "Footprint" "" (at 106.68 134.62 0))
    (property "Datasheet" "" (at 106.68 134.62 0))
    (pin "1")
    (instances
      (project "bitaxeMax"
        (path
          (reference "#PWR02") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_US") (at 159.385 95.25 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "R6" (at 163.195 93.98 90))
    (property "Value" "10k" (at 154.305 93.98 90))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 159.639 94.234 90))
    (property "Datasheet" "~" (at 159.385 95.25 0))
    (property "DK" "311-10KJRCT-ND" (at 159.385 95.25 0))
    (property "PARTNO" "RC0402JR-0710KL" (at 159.385 95.25 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "R6") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 151.13 73.66 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C17" (at 148.59 71.12 90))
    (property "Value" "1uF" (at 149.86 74.295 90))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 151.13 73.66 0))
    (property "Datasheet" "" (at 151.13 73.66 0))
    (property "Value" "587-5514-1-ND" (at 151.13 73.66 0))
    (property "DK" "587-5514-1-ND" (at 151.13 73.66 0))
    (property "PARTNO" "EMK105BJ105MV-F" (at 151.13 73.66 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C17") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:TestPoint") (at 212.09 149.86 90) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "TP23" (at 205.74 149.86 90))
    (property "Value" "TestPoint" (at 206.375 151.1299 90))
    (property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm" (at 212.09 154.94 0))
    (property "Datasheet" "~" (at 212.09 154.94 0))
    (property "DNP" "T" (at 212.09 149.86 0))
    (pin "1")
    (instances
      (project "Hashat"
        (path
          (reference "TP23") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "TP33") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:TestPoint") (at 46.99 100.33 90) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "TP24" (at 40.64 100.33 90))
    (property "Value" "TestPoint" (at 41.275 101.5999 90))
    (property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm" (at 46.99 105.41 0))
    (property "Datasheet" "~" (at 46.99 105.41 0))
    (property "DNP" "T" (at 46.99 100.33 0))
    (pin "1")
    (instances
      (project "bitaxeMax"
        (path
          (reference "TP24") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 201.295 38.735 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C19" (at 202.565 36.83 0))
    (property "Value" "1uF" (at 202.565 42.545 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 201.295 38.735 0))
    (property "Datasheet" "" (at 201.295 38.735 0))
    (property "DK" "587-5514-1-ND" (at 201.295 38.735 0))
    (property "PARTNO" "EMK105BJ105MV-F" (at 201.295 38.735 0))
    (pin "1")
    (pin "2")
    (instances
      (project "Hashat"
        (path
          (reference "C19") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "C19") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 264.795 152.4 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C35" (at 265.43 151.13 0))
    (property "Value" "0.1uF" (at 265.43 156.21 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 264.795 152.4 0))
    (property "Datasheet" "" (at 264.795 152.4 0))
    (property "Value" "311-3342-1-ND" (at 264.795 152.4 0))
    (property "DK" "1292-1639-1-ND" (at 264.795 152.4 0))
    (property "PARTNO" "0402X104K100CT" (at 264.795 152.4 0))
    (pin "1")
    (pin "2")
    (instances
      (project "Hashat"
        (path
          (reference "C35") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "C57") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "bitaxe:BM1397_mode1") (at 112.395 97.79 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "IC1" (at 94.615 127.635 0))
    (property "Value" "BM1397_mode1" (at 115.57 127.635 0))
    (property "Footprint" "bitaxe:BM1397" (at 112.395 97.79 0))
    (property "Datasheet" "" (at 112.395 97.79 0))
    (property "DNP" "T" (at 112.395 97.79 0))
    (pin "1")
    (pin "10")
    (pin "11")
    (pin "12")
    (pin "13")
    (pin "14")
    (pin "15")
    (pin "16")
    (pin "17")
    (pin "18")
    (pin "19")
    (pin "2")
    (pin "20")
    (pin "21")
    (pin "22")
    (pin "23")
    (pin "24")
    (pin "25")
    (pin "26")
    (pin "27")
    (pin "28")
    (pin "29")
    (pin "3")
    (pin "30")
    (pin "31")
    (pin "32")
    (pin "33")
    (pin "34")
    (pin "4")
    (pin "5")
    (pin "6")
    (pin "7")
    (pin "8")
    (pin "9")
    (instances
      (project "bitaxeMax"
        (path
          (reference "IC1") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:TestPoint") (at 40.64 179.07 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "TP3" (at 34.29 179.07 90))
    (property "Value" "TestPoint" (at 34.925 177.8001 90))
    (property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm" (at 40.64 173.99 0))
    (property "Datasheet" "~" (at 40.64 173.99 0))
    (property "DNP" "T" (at 40.64 179.07 0))
    (pin "1")
    (instances
      (project "bitaxeMax"
        (path
          (reference "TP3") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector_Generic:Conn_01x05") (at 53.34 179.07 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "J3" (at 52.07 171.45 0))
    (property "Value" "Conn_01x05" (at 55.88 180.3399 0))
    (property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_1x05_P2.54mm_Vertical" (at 53.34 179.07 0))
    (property "Datasheet" "~" (at 53.34 179.07 0))
    (property "DNP" "T" (at 53.34 179.07 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (instances
      (project "bitaxeMax"
        (path
          (reference "J3") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 246.38 38.1 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C20" (at 247.65 36.195 0))
    (property "Value" "2.2uF" (at 247.65 41.91 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 246.38 38.1 0))
    (property "Datasheet" "" (at 246.38 38.1 0))
    (property "DK" "" (at 246.38 38.1 0))
    (property "PARTNO" "" (at 246.38 38.1 0))
    (pin "1")
    (pin "2")
    (instances
      (project "Hashat"
        (path
          (reference "C20") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "C21") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 99.695 52.705 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C9" (at 100.965 50.8 0))
    (property "Value" "0.1uF" (at 100.965 55.88 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 99.695 52.705 0))
    (property "Datasheet" "" (at 99.695 52.705 0))
    (property "Value" "311-3342-1-ND" (at 99.695 52.705 0))
    (property "DK" "1292-1639-1-ND" (at 99.695 52.705 0))
    (property "PARTNO" "0402X104K100CT" (at 99.695 52.705 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C9") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C_Polarized") (at 132.08 52.705 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "C13" (at 135.255 50.5459 0))
    (property "Value" "330uF" (at 135.255 53.0859 0))
    (property "Footprint" "Capacitor_Tantalum_SMD:CP_EIA-7343-31_Kemet-D_Pad2.25x2.55mm_HandSolder" (at 133.0452 56.515 0))
    (property "Datasheet" "~" (at 132.08 52.705 0))
    (property "DK" "718-1028-1-ND" (at 132.08 52.705 0))
    (property "PARTNO" "293D337X9010E2TE3" (at 132.08 52.705 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C13") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:TestPoint") (at 253.365 57.785 270) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "TP14" (at 259.715 57.785 90))
    (property "Value" "TestPoint" (at 259.08 56.5151 90))
    (property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm" (at 253.365 52.705 0))
    (property "Datasheet" "~" (at 253.365 52.705 0))
    (property "DNP" "T" (at 253.365 57.785 0))
    (pin "1")
    (instances
      (project "bitaxeMax"
        (path
          (reference "TP14") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_US") (at 85.09 90.17 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp yes)
    (property "Reference" "R21" (at 88.9 88.9 90))
    (property "Value" "0" (at 81.28 88.9 90))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 85.344 89.154 90))
    (property "Datasheet" "~" (at 85.09 90.17 0))
    (property "DK" "RMCF0402ZT0R00CT-ND" (at 85.09 90.17 0))
    (property "PARTNO" "RMCF0402ZT0R00" (at 85.09 90.17 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "R21") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_US") (at 85.09 92.71 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp yes)
    (property "Reference" "R22" (at 88.9 91.44 90))
    (property "Value" "0" (at 81.28 91.44 90))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 85.344 91.694 90))
    (property "Datasheet" "~" (at 85.09 92.71 0))
    (property "DK" "RMCF0402ZT0R00CT-ND" (at 85.09 92.71 0))
    (property "PARTNO" "RMCF0402ZT0R00" (at 85.09 92.71 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "R22") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 127.635 73.66 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C12" (at 124.46 71.12 90))
    (property "Value" "1uF" (at 126.365 74.295 90))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 127.635 73.66 0))
    (property "Datasheet" "" (at 127.635 73.66 0))
    (property "Value" "587-5514-1-ND" (at 127.635 73.66 0))
    (property "DK" "587-5514-1-ND" (at 127.635 73.66 0))
    (property "PARTNO" "EMK105BJ105MV-F" (at 127.635 73.66 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C12") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 109.855 52.705 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C10" (at 111.125 50.8 0))
    (property "Value" "1uF" (at 111.125 55.88 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 109.855 52.705 0))
    (property "Datasheet" "" (at 109.855 52.705 0))
    (property "Value" "587-5514-1-ND" (at 109.855 52.705 0))
    (property "DK" "587-5514-1-ND" (at 109.855 52.705 0))
    (property "PARTNO" "EMK105BJ105MV-F" (at 109.855 52.705 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C10") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:TestPoint") (at 40.64 176.53 90) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "TP2" (at 34.29 176.53 90))
    (property "Value" "TestPoint" (at 34.925 177.7999 90))
    (property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm" (at 40.64 181.61 0))
    (property "Datasheet" "~" (at 40.64 181.61 0))
    (property "DNP" "T" (at 40.64 176.53 0))
    (pin "1")
    (instances
      (project "bitaxeMax"
        (path
          (reference "TP2") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 46.355 143.51 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C48" (at 44.45 144.78 90))
    (property "Value" "0.1uF" (at 53.34 144.78 90))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 46.355 143.51 0))
    (property "Datasheet" "" (at 46.355 143.51 0))
    (property "Value" "311-3342-1-ND" (at 46.355 143.51 0))
    (property "DK" "1292-1639-1-ND" (at 46.355 143.51 0))
    (property "PARTNO" "0402X104K100CT" (at 46.355 143.51 0))
    (pin "1")
    (pin "2")
    (instances
      (project "Hashat"
        (path
          (reference "C48") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "C58") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "lcsc:SN74LVC1T45DBVR") (at 230.505 149.86 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "U8" (at 230.505 140.335 0))
    (property "Value" "SN74LVC1T45DBVR" (at 230.505 142.875 0))
    (property "Footprint" "lcsc:SOT-23-6_L2.9-W1.6-P0.95-LS2.8-BR" (at 230.505 160.02 0))
    (property "Datasheet" "https://lcsc.com/product-detail/74-Series_TI_SN74LVC1T45DBVR_SN74LVC1T45DBVR_C7843.html" (at 230.505 162.56 0))
    (property "Manufacturer" "TI(德州仪器)" (at 230.505 165.1 0))
    (property "LCSC Part" "C7843" (at 230.505 167.64 0))
    (property "JLC Part" "Extended Part" (at 230.505 170.18 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (pin "6")
    (instances
      (project "Hashat"
        (path
          (reference "U8") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "U16") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 71.12 73.66 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C3" (at 68.58 71.12 90))
    (property "Value" "1uF" (at 69.85 74.295 90))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 71.12 73.66 0))
    (property "Datasheet" "" (at 71.12 73.66 0))
    (property "Value" "587-5514-1-ND" (at 71.12 73.66 0))
    (property "DK" "587-5514-1-ND" (at 71.12 73.66 0))
    (property "PARTNO" "EMK105BJ105MV-F" (at 71.12 73.66 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C3") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "lcsc:LN1134A182MR-G") (at 227.33 34.29 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "U2" (at 227.33 24.765 0))
    (property "Value" "LN1134A182MR-G" (at 227.33 27.305 0))
    (property "Footprint" "lcsc:SOT-23-5_L3.0-W1.7-P0.95-LS2.8-BR" (at 227.33 44.45 0))
    (property "Datasheet" "https://lcsc.com/product-detail/Low-Dropout-Regulators-LDO_LN1134A182MR-G_C141424.html" (at 227.33 46.99 0))
    (property "Manufacturer" "natlinear(南麟)" (at 227.33 49.53 0))
    (property "LCSC Part" "C141424" (at 227.33 52.07 0))
    (property "JLC Part" "Extended Part" (at 227.33 54.61 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (instances
      (project "Hashat"
        (path
          (reference "U2") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "U2") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "lcsc:OT322525MJBA4SL") (at 46.99 133.985 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "X1" (at 46.99 126.365 0))
    (property "Value" "OT322525MJBA4SL" (at 46.99 128.905 0))
    (property "Footprint" "lcsc:OSC-SMD_4P-L3.2-W2.5-BL" (at 46.99 142.875 0))
    (property "Datasheet" "https://lcsc.com/product-detail/SMD-Oscillators-XO_Yangxing-Tech-OT322525MJBA4SL_C669088.html" (at 46.99 145.415 0))
    (property "Manufacturer" "YXC(扬兴晶振)" (at 46.99 147.955 0))
    (property "LCSC Part" "C669088" (at 46.99 150.495 0))
    (property "JLC Part" "Extended Part" (at 46.99 153.035 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (instances
      (project "Hashat"
        (path
          (reference "X1") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "X1") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "lcsc:SGM2036-ADJYN5G_TR") (at 228.6 60.325 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "U4" (at 228.6 50.8 0))
    (property "Value" "SGM2036-ADJYN5G/TR" (at 228.6 53.34 0))
    (property "Footprint" "lcsc:SOT-23-5_L3.0-W1.7-P0.95-LS2.8-BR" (at 228.6 70.485 0))
    (property "Datasheet" "https://lcsc.com/product-detail/Others_SG-Micro-SGM2036-ADJYN5G-TR_C194594.html" (at 228.6 73.025 0))
    (property "Manufacturer" "SGMICRO(圣邦微)" (at 228.6 75.565 0))
    (property "LCSC Part" "C194594" (at 228.6 78.105 0))
    (property "JLC Part" "Extended Part" (at 228.6 80.645 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (instances
      (project "Hashat"
        (path
          (reference "U4") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "U3") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 120.015 52.705 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C11" (at 121.285 50.8 0))
    (property "Value" "1uF" (at 121.285 55.88 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 120.015 52.705 0))
    (property "Datasheet" "" (at 120.015 52.705 0))
    (property "Value" "587-5514-1-ND" (at 120.015 52.705 0))
    (property "DK" "587-5514-1-ND" (at 120.015 52.705 0))
    (property "PARTNO" "EMK105BJ105MV-F" (at 120.015 52.705 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C11") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 195.58 152.4 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C31" (at 196.215 151.13 0))
    (property "Value" "0.1uF" (at 196.215 156.21 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 195.58 152.4 0))
    (property "Datasheet" "" (at 195.58 152.4 0))
    (property "Value" "311-3342-1-ND" (at 195.58 152.4 0))
    (property "DK" "1292-1639-1-ND" (at 195.58 152.4 0))
    (property "PARTNO" "0402X104K100CT" (at 195.58 152.4 0))
    (pin "1")
    (pin "2")
    (instances
      (project "Hashat"
        (path
          (reference "C31") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "C54") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 248.285 66.675 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C24" (at 249.555 64.77 0))
    (property "Value" "1uF" (at 249.555 70.485 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 248.285 66.675 0))
    (property "Datasheet" "" (at 248.285 66.675 0))
    (property "DK" "587-5514-1-ND" (at 248.285 66.675 0))
    (property "PARTNO" "EMK105BJ105MV-F" (at 248.285 66.675 0))
    (pin "1")
    (pin "2")
    (instances
      (project "Hashat"
        (path
          (reference "C24") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "C26") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 74.295 125.73 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C4" (at 75.565 123.825 0))
    (property "Value" "1uF" (at 75.565 129.54 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 74.295 125.73 0))
    (property "Datasheet" "" (at 74.295 125.73 0))
    (property "Value" "587-5514-1-ND" (at 74.295 125.73 0))
    (property "DK" "587-5514-1-ND" (at 74.295 125.73 0))
    (property "PARTNO" "EMK105BJ105MV-F" (at 74.295 125.73 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C4") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 139.065 125.73 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C14" (at 139.7 123.825 0))
    (property "Value" "1uF" (at 139.7 129.54 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 139.065 125.73 0))
    (property "Datasheet" "" (at 139.065 125.73 0))
    (property "Value" "587-5514-1-ND" (at 139.065 125.73 0))
    (property "DK" "587-5514-1-ND" (at 139.065 125.73 0))
    (property "PARTNO" "EMK105BJ105MV-F" (at 139.065 125.73 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C14") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 81.28 125.73 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C5" (at 82.55 123.825 0))
    (property "Value" "1uF" (at 82.55 129.54 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 81.28 125.73 0))
    (property "Datasheet" "" (at 81.28 125.73 0))
    (property "Value" "587-5514-1-ND" (at 81.28 125.73 0))
    (property "DK" "587-5514-1-ND" (at 81.28 125.73 0))
    (property "PARTNO" "EMK105BJ105MV-F" (at 81.28 125.73 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C5") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:TestPoint") (at 212.09 100.33 90) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "TP14" (at 205.74 100.33 90))
    (property "Value" "TestPoint" (at 206.375 101.5999 90))
    (property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm" (at 212.09 105.41 0))
    (property "Datasheet" "~" (at 212.09 105.41 0))
    (property "DNP" "T" (at 212.09 100.33 0))
    (pin "1")
    (instances
      (project "Hashat"
        (path
          (reference "TP14") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "TP20") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:TestPoint") (at 253.365 31.75 270) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "TP13" (at 259.715 31.75 90))
    (property "Value" "TestPoint" (at 259.08 30.4801 90))
    (property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm" (at 253.365 26.67 0))
    (property "Datasheet" "~" (at 253.365 26.67 0))
    (property "DNP" "T" (at 253.365 31.75 0))
    (pin "1")
    (instances
      (project "bitaxeMax"
        (path
          (reference "TP13") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 264.795 127.635 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C26" (at 265.43 126.365 0))
    (property "Value" "0.1uF" (at 265.43 131.445 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 264.795 127.635 0))
    (property "Datasheet" "" (at 264.795 127.635 0))
    (property "Value" "311-3342-1-ND" (at 264.795 127.635 0))
    (property "DK" "1292-1639-1-ND" (at 264.795 127.635 0))
    (property "PARTNO" "0402X104K100CT" (at 264.795 127.635 0))
    (pin "1")
    (pin "2")
    (instances
      (project "Hashat"
        (path
          (reference "C26") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "C56") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "lcsc:SN74LVC1T45DBVR") (at 230.505 100.33 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "U5" (at 230.505 90.805 0))
    (property "Value" "SN74LVC1T45DBVR" (at 230.505 93.345 0))
    (property "Footprint" "lcsc:SOT-23-6_L2.9-W1.6-P0.95-LS2.8-BR" (at 230.505 110.49 0))
    (property "Datasheet" "https://lcsc.com/product-detail/74-Series_TI_SN74LVC1T45DBVR_SN74LVC1T45DBVR_C7843.html" (at 230.505 113.03 0))
    (property "Manufacturer" "TI(德州仪器)" (at 230.505 115.57 0))
    (property "LCSC Part" "C7843" (at 230.505 118.11 0))
    (property "JLC Part" "Extended Part" (at 230.505 120.65 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (pin "6")
    (instances
      (project "Hashat"
        (path
          (reference "U5") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "U14") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:TestPoint") (at 62.865 132.715 0) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "TP1" (at 62.865 139.065 90))
    (property "Value" "TestPoint" (at 64.1349 138.43 90))
    (property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm" (at 67.945 132.715 0))
    (property "Datasheet" "~" (at 67.945 132.715 0))
    (property "DNP" "T" (at 62.865 132.715 0))
    (pin "1")
    (instances
      (project "Hashat"
        (path
          (reference "TP1") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "TP36") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "lcsc:SN74LVC1T45DBVR") (at 230.505 125.095 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "U3" (at 230.505 115.57 0))
    (property "Value" "SN74LVC1T45DBVR" (at 230.505 118.11 0))
    (property "Footprint" "lcsc:SOT-23-6_L2.9-W1.6-P0.95-LS2.8-BR" (at 230.505 135.255 0))
    (property "Datasheet" "https://lcsc.com/product-detail/74-Series_TI_SN74LVC1T45DBVR_SN74LVC1T45DBVR_C7843.html" (at 230.505 137.795 0))
    (property "Manufacturer" "TI(德州仪器)" (at 230.505 140.335 0))
    (property "LCSC Part" "C7843" (at 230.505 142.875 0))
    (property "JLC Part" "Extended Part" (at 230.505 145.415 0))
    (pin "1")
    (pin "2")
    (pin "3")
    (pin "4")
    (pin "5")
    (pin "6")
    (instances
      (project "Hashat"
        (path
          (reference "U3") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "U15") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_US") (at 85.09 95.25 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "R23" (at 88.9 93.98 90))
    (property "Value" "0" (at 81.28 93.98 90))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 85.344 94.234 90))
    (property "Datasheet" "~" (at 85.09 95.25 0))
    (property "DK" "RMCF0402ZT0R00CT-ND" (at 85.09 95.25 0))
    (property "PARTNO" "RMCF0402ZT0R00" (at 85.09 95.25 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "R23") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 105.41 59.055 0) (mirror y) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR01" (at 105.41 65.405 0))
    (property "Value" "GND" (at 105.41 63.5 0))
    (property "Footprint" "" (at 105.41 59.055 0))
    (property "Datasheet" "" (at 105.41 59.055 0))
    (pin "1")
    (instances
      (project "bitaxeMax"
        (path
          (reference "#PWR01") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:TestPoint") (at 146.685 97.79 270) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "TP32" (at 153.035 97.79 90))
    (property "Value" "TestPoint" (at 152.4 96.5201 90))
    (property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm" (at 146.685 92.71 0))
    (property "Datasheet" "~" (at 146.685 92.71 0))
    (property "DNP" "T" (at 146.685 97.79 0))
    (pin "1")
    (instances
      (project "bitaxeMax"
        (path
          (reference "TP32") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_US") (at 58.42 108.585 180) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "R1" (at 57.15 104.775 90))
    (property "Value" "1k" (at 57.15 112.395 90))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 57.404 108.331 90))
    (property "Datasheet" "~" (at 58.42 108.585 0))
    (property "DK" "YAG2306CT-ND" (at 58.42 108.585 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "R1") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 201.93 66.675 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C22" (at 203.2 64.77 0))
    (property "Value" "1uF" (at 203.2 70.485 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 201.93 66.675 0))
    (property "Datasheet" "" (at 201.93 66.675 0))
    (property "DK" "587-5514-1-ND" (at 201.93 66.675 0))
    (property "PARTNO" "EMK105BJ105MV-F" (at 201.93 66.675 0))
    (pin "1")
    (pin "2")
    (instances
      (project "Hashat"
        (path
          (reference "C22") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "C20") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 146.05 125.73 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C16" (at 146.685 123.825 0))
    (property "Value" "1uF" (at 147.32 129.54 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 146.05 125.73 0))
    (property "Datasheet" "" (at 146.05 125.73 0))
    (property "Value" "587-5514-1-ND" (at 146.05 125.73 0))
    (property "DK" "587-5514-1-ND" (at 146.05 125.73 0))
    (property "PARTNO" "EMK105BJ105MV-F" (at 146.05 125.73 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C16") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:TestPoint") (at 212.09 125.095 90) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "TP19" (at 205.74 125.095 90))
    (property "Value" "TestPoint" (at 206.375 126.3649 90))
    (property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm" (at 212.09 130.175 0))
    (property "Datasheet" "~" (at 212.09 130.175 0))
    (property "DNP" "T" (at 212.09 125.095 0))
    (pin "1")
    (instances
      (project "Hashat"
        (path
          (reference "TP19") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "TP21") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:TestPoint") (at 152.4 112.395 270) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "TP12" (at 158.75 112.395 90))
    (property "Value" "TestPoint" (at 158.115 111.1251 90))
    (property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm" (at 152.4 107.315 0))
    (property "Datasheet" "~" (at 152.4 107.315 0))
    (property "DNP" "T" (at 152.4 112.395 0))
    (pin "1")
    (instances
      (project "bitaxeMax"
        (path
          (reference "TP12") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 59.69 73.66 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C2" (at 57.15 71.12 90))
    (property "Value" "1uF" (at 58.42 74.295 90))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 59.69 73.66 0))
    (property "Datasheet" "" (at 59.69 73.66 0))
    (property "Value" "587-5514-1-ND" (at 59.69 73.66 0))
    (property "DK" "587-5514-1-ND" (at 59.69 73.66 0))
    (property "PARTNO" "EMK105BJ105MV-F" (at 59.69 73.66 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C2") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 264.795 102.87 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C25" (at 265.43 101.6 0))
    (property "Value" "0.1uF" (at 265.43 106.68 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 264.795 102.87 0))
    (property "Datasheet" "" (at 264.795 102.87 0))
    (property "Value" "311-3342-1-ND" (at 264.795 102.87 0))
    (property "DK" "1292-1639-1-ND" (at 264.795 102.87 0))
    (property "PARTNO" "0402X104K100CT" (at 264.795 102.87 0))
    (pin "1")
    (pin "2")
    (instances
      (project "Hashat"
        (path
          (reference "C25") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "C55") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 195.58 102.87 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C23" (at 196.215 101.6 0))
    (property "Value" "0.1uF" (at 196.215 106.68 0))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 195.58 102.87 0))
    (property "Datasheet" "" (at 195.58 102.87 0))
    (property "Value" "311-3342-1-ND" (at 195.58 102.87 0))
    (property "DK" "1292-1639-1-ND" (at 195.58 102.87 0))
    (property "PARTNO" "0402X104K100CT" (at 195.58 102.87 0))
    (pin "1")
    (pin "2")
    (instances
      (project "Hashat"
        (path
          (reference "C23") (unit 1)
        )
      )
      (project "bitaxeMax"
        (path
          (reference "C48") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:TestPoint") (at 151.765 106.045 270) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "TP11" (at 158.115 106.045 90))
    (property "Value" "TestPoint" (at 157.48 104.7751 90))
    (property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm" (at 151.765 100.965 0))
    (property "Datasheet" "~" (at 151.765 100.965 0))
    (property "DNP" "T" (at 151.765 106.045 0))
    (pin "1")
    (instances
      (project "bitaxeMax"
        (path
          (reference "TP11") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 94.615 73.66 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C8" (at 92.075 71.12 90))
    (property "Value" "1uF" (at 93.345 74.295 90))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 94.615 73.66 0))
    (property "Datasheet" "" (at 94.615 73.66 0))
    (property "Value" "587-5514-1-ND" (at 94.615 73.66 0))
    (property "DK" "587-5514-1-ND" (at 94.615 73.66 0))
    (property "PARTNO" "EMK105BJ105MV-F" (at 94.615 73.66 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C8") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector:TestPoint") (at 40.64 184.15 90) (mirror x) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "TP5" (at 34.29 184.15 90))
    (property "Value" "TestPoint" (at 34.925 185.4199 90))
    (property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm" (at 40.64 189.23 0))
    (property "Datasheet" "~" (at 40.64 189.23 0))
    (property "DNP" "T" (at 40.64 184.15 0))
    (pin "1")
    (instances
      (project "bitaxeMax"
        (path
          (reference "TP5") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 83.185 73.66 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C6" (at 80.645 71.12 90))
    (property "Value" "1uF" (at 81.915 74.295 90))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 83.185 73.66 0))
    (property "Datasheet" "" (at 83.185 73.66 0))
    (property "Value" "587-5514-1-ND" (at 83.185 73.66 0))
    (property "DK" "587-5514-1-ND" (at 83.185 73.66 0))
    (property "PARTNO" "EMK105BJ105MV-F" (at 83.185 73.66 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C6") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "power:GND") (at 45.72 184.15 0) (mirror y) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "#PWR03" (at 45.72 190.5 0))
    (property "Value" "GND" (at 45.72 188.595 0))
    (property "Footprint" "" (at 45.72 184.15 0))
    (property "Datasheet" "" (at 45.72 184.15 0))
    (pin "1")
    (instances
      (project "bitaxeMax"
        (path
          (reference "#PWR03") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:C") (at 139.065 73.66 90) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "C15" (at 136.525 71.12 90))
    (property "Value" "1uF" (at 137.795 74.295 90))
    (property "Footprint" "Capacitor_SMD:C_0402_1005Metric" (at 139.065 73.66 0))
    (property "Datasheet" "" (at 139.065 73.66 0))
    (property "Value" "587-5514-1-ND" (at 139.065 73.66 0))
    (property "DK" "587-5514-1-ND" (at 139.065 73.66 0))
    (property "PARTNO" "EMK105BJ105MV-F" (at 139.065 73.66 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "C15") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Device:R_US") (at 46.99 107.315 180) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "R30" (at 45.72 103.505 90))
    (property "Value" "1k" (at 45.72 111.125 90))
    (property "Footprint" "Resistor_SMD:R_0402_1005Metric" (at 45.974 107.061 90))
    (property "Datasheet" "~" (at 46.99 107.315 0))
    (property "DK" "YAG2306CT-ND" (at 46.99 107.315 0))
    (pin "1")
    (pin "2")
    (instances
      (project "bitaxeMax"
        (path
          (reference "R30") (unit 1)
        )
      )
    )
  )
)
