(kicad_sch (version 20230121) (generator eeschema)
  (paper "A")
  (title_block
    (title "bitaxe, yo!")
    (date "2023-05-02")
    (rev "2.3")
  )
  (lib_symbols
    (symbol "Connector_Generic:Conn_01x01" (pin_names (offset 1.016) hide) (in_bom yes) (on_board yes)
      (property "Reference" "J" (at 0 2.54 0))
      (property "Value" "Conn_01x01" (at 0 -2.54 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "connector" (at 0 0 0))
      (property "ki_description" "Generic connector, single row, 01x01, script generated (kicad-library-utils/schlib/autogen/connector/)" (at 0 0 0))
      (property "ki_fp_filters" "Connector*:*_1x??_*" (at 0 0 0))
      (symbol "Conn_01x01_1_1"
        (rectangle (start -1.27 0.127) (end 0 -0.127)
          (fill (type none))
        )
        (rectangle (start -1.27 1.27) (end 1.27 -1.27)
          (fill (type background))
        )
        (pin passive line (at -5.08 0 0) (length 3.81)
          (name "Pin_1")
          (number "1")
        )
      )
    )
    (symbol "Mechanical:MountingHole" (pin_names (offset 1.016)) (in_bom yes) (on_board yes)
      (property "Reference" "H" (at 0 5.08 0))
      (property "Value" "MountingHole" (at 0 3.175 0))
      (property "Footprint" "" (at 0 0 0))
      (property "Datasheet" "~" (at 0 0 0))
      (property "ki_keywords" "mounting hole" (at 0 0 0))
      (property "ki_description" "Mounting Hole without connection" (at 0 0 0))
      (property "ki_fp_filters" "MountingHole*" (at 0 0 0))
      (symbol "MountingHole_0_1"
        (circle (center 0 0) (radius 1.27)
          (fill (type none))
        )
      )
    )
  )
  (junction (at 179.07 79.375) (diameter 0) (color 0 0 0 0))
  (junction (at 176.53 81.915) (diameter 0) (color 0 0 0 0))
  (wire (pts (xy 135.89 101.6) (xy 144.78 101.6)))
  (wire (pts (xy 100.33 96.52) (xy 121.285 96.52)))
  (wire (pts (xy 99.695 57.15) (xy 176.53 57.15)))
  (wire (pts (xy 163.195 125.095) (xy 179.07 125.095)))
  (wire (pts (xy 166.37 81.915) (xy 176.53 81.915)))
  (wire (pts (xy 75.565 55.245) (xy 82.55 55.245)))
  (wire (pts (xy 100.33 81.915) (xy 144.78 81.915)))
  (wire (pts (xy 144.78 76.835) (xy 120.015 76.835)))
  (wire (pts (xy 57.785 60.325) (xy 62.23 60.325)))
  (wire (pts (xy 118.745 99.06) (xy 118.745 121.92)))
  (wire (pts (xy 138.43 132.08) (xy 145.415 132.08)))
  (wire (pts (xy 120.015 76.835) (xy 120.015 62.865)))
  (wire (pts (xy 179.07 59.69) (xy 179.07 79.375)))
  (wire (pts (xy 121.285 96.52) (xy 121.285 119.38)))
  (wire (pts (xy 99.695 59.69) (xy 179.07 59.69)))
  (wire (pts (xy 145.415 121.92) (xy 118.745 121.92)))
  (wire (pts (xy 57.785 52.705) (xy 82.55 52.705)))
  (wire (pts (xy 176.53 81.915) (xy 176.53 127.635)))
  (wire (pts (xy 176.53 57.15) (xy 176.53 81.915)))
  (wire (pts (xy 166.37 79.375) (xy 179.07 79.375)))
  (wire (pts (xy 100.33 99.06) (xy 118.745 99.06)))
  (wire (pts (xy 145.415 119.38) (xy 121.285 119.38)))
  (wire (pts (xy 73.66 86.36) (xy 82.55 86.36)))
  (wire (pts (xy 135.89 104.14) (xy 144.78 104.14)))
  (wire (pts (xy 100.33 79.375) (xy 144.78 79.375)))
  (wire (pts (xy 163.195 127.635) (xy 176.53 127.635)))
  (wire (pts (xy 73.66 81.28) (xy 73.66 60.325)))
  (wire (pts (xy 73.66 83.82) (xy 82.55 83.82)))
  (wire (pts (xy 179.07 125.095) (xy 179.07 79.375)))
  (wire (pts (xy 120.015 62.865) (xy 99.695 62.865)))
  (wire (pts (xy 138.43 129.54) (xy 145.415 129.54)))
  (wire (pts (xy 82.55 81.28) (xy 73.66 81.28)))
  (wire (pts (xy 73.66 60.325) (xy 82.55 60.325)))
  (wire (pts (xy 100.33 84.455) (xy 144.78 84.455)))
  (wire (pts (xy 135.89 106.68) (xy 144.78 106.68)))
  (wire (pts (xy 99.695 53.34) (xy 107.315 53.34)))
  (label "VDD" (at 135.89 101.6 0) (fields_autoplaced))
  (label "TEMP_N" (at 102.87 99.06 0) (fields_autoplaced))
  (label "3V3" (at 73.66 86.36 0) (fields_autoplaced))
  (label "RST" (at 135.89 84.455 0) (fields_autoplaced))
  (label "VDD" (at 78.74 81.28 0) (fields_autoplaced))
  (label "5V" (at 75.565 55.245 0) (fields_autoplaced))
  (label "5V" (at 138.43 129.54 0) (fields_autoplaced))
  (label "SDA" (at 168.275 79.375 0) (fields_autoplaced))
  (label "RX" (at 135.89 79.375 0) (fields_autoplaced))
  (label "3V3" (at 103.505 53.34 0) (fields_autoplaced))
  (label "3V3" (at 135.89 104.14 0) (fields_autoplaced))
  (label "SCL" (at 168.275 81.915 0) (fields_autoplaced))
  (label "5V" (at 135.89 106.68 0) (fields_autoplaced))
  (label "3V3" (at 138.43 132.08 0) (fields_autoplaced))
  (label "5V" (at 73.66 83.82 0) (fields_autoplaced))
  (label "GND" (at 57.785 60.325 0) (fields_autoplaced))
  (label "TEMP_P" (at 102.87 96.52 0) (fields_autoplaced))
  (label "TX" (at 135.89 81.915 0) (fields_autoplaced))
  (global_label "GND" (shape input) (at 62.23 60.325 0) (fields_autoplaced)
    (property "Intersheetrefs" "${INTERSHEET_REFS}" (at 68.5136 60.2456 0))
  )
  (symbol (lib_id "Connector_Generic:Conn_01x01") (at 52.705 52.705 180) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "J1" (at 52.705 50.165 0))
    (property "Value" "Conn_01x01" (at 52.705 48.895 0))
    (property "Footprint" "TPS40305_supply:63862-1" (at 52.705 52.705 0))
    (property "Datasheet" "https://www.te.com/commerce/DocumentDelivery/DDEController?Action=srchrtrv&DocNm=63862&DocType=Customer+Drawing&DocLang=English" (at 52.705 52.705 0))
    (property "DK" "A100886CT-ND" (at 52.705 52.705 0))
    (property "PARTNO" "63862-1" (at 52.705 52.705 0))
    (pin "1")
    (instances
      (project "bitaxeMax"
        (path
          (reference "J1") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Mechanical:MountingHole") (at 37.465 179.07 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "H3" (at 40.005 177.7999 0))
    (property "Value" "AlignmentHole" (at 40.005 180.3399 0))
    (property "Footprint" "MountingHole:MountingHole_2.2mm_M2" (at 37.465 179.07 0))
    (property "Datasheet" "~" (at 37.465 179.07 0))
    (property "PARTNO" "https://www.amazon.com/dp/B07MDFS1YS" (at 37.465 179.07 0))
    (property "DNP" "T" (at 37.465 179.07 0))
    (instances
      (project "bitaxeMax"
        (path
          (reference "H3") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Mechanical:MountingHole") (at 37.465 172.72 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "H2" (at 40.005 171.4499 0))
    (property "Value" "AlignmentHole" (at 40.005 173.9899 0))
    (property "Footprint" "MountingHole:MountingHole_2.2mm_M2" (at 37.465 172.72 0))
    (property "Datasheet" "~" (at 37.465 172.72 0))
    (property "PARTNO" "https://www.amazon.com/dp/B07MDFS1YS" (at 37.465 172.72 0))
    (property "DNP" "T" (at 37.465 172.72 0))
    (instances
      (project "bitaxeMax"
        (path
          (reference "H2") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Connector_Generic:Conn_01x01") (at 52.705 60.325 180) (unit 1)
    (in_bom yes) (on_board yes) (dnp no)
    (property "Reference" "J2" (at 52.705 57.785 0))
    (property "Value" "Conn_01x01" (at 52.705 56.515 0))
    (property "Footprint" "TPS40305_supply:63862-1" (at 52.705 60.325 0))
    (property "Datasheet" "https://www.te.com/commerce/DocumentDelivery/DDEController?Action=srchrtrv&DocNm=63862&DocType=Customer+Drawing&DocLang=English" (at 52.705 60.325 0))
    (property "DK" "A100886CT-ND" (at 52.705 60.325 0))
    (property "PARTNO" "63862-1" (at 52.705 60.325 0))
    (pin "1")
    (instances
      (project "bitaxeMax"
        (path
          (reference "J2") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Mechanical:MountingHole") (at 37.465 166.37 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "H1" (at 40.005 165.0999 0))
    (property "Value" "AlignmentHole" (at 40.005 167.6399 0))
    (property "Footprint" "MountingHole:MountingHole_2.2mm_M2" (at 37.465 166.37 0))
    (property "Datasheet" "~" (at 37.465 166.37 0))
    (property "PARTNO" "https://www.amazon.com/dp/B07MDFS1YS" (at 37.465 166.37 0))
    (property "DNP" "T" (at 37.465 166.37 0))
    (instances
      (project "bitaxeMax"
        (path
          (reference "H1") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Mechanical:MountingHole") (at 63.5 186.055 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "H6" (at 66.04 184.7849 0))
    (property "Value" "MountingHole" (at 66.04 187.3249 0))
    (property "Footprint" "MountingHole:MountingHole_3.5mm" (at 63.5 186.055 0))
    (property "Datasheet" "~" (at 63.5 186.055 0))
    (property "DNP" "T" (at 63.5 186.055 0))
    (instances
      (project "bitaxeMax"
        (path
          (reference "H6") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Mechanical:MountingHole") (at 63.5 178.435 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "H5" (at 66.04 177.1649 0))
    (property "Value" "MountingHole" (at 66.04 179.7049 0))
    (property "Footprint" "MountingHole:MountingHole_3.5mm" (at 63.5 178.435 0))
    (property "Datasheet" "~" (at 63.5 178.435 0))
    (property "DNP" "T" (at 63.5 178.435 0))
    (instances
      (project "bitaxeMax"
        (path
          (reference "H5") (unit 1)
        )
      )
    )
  )
  (symbol (lib_id "Mechanical:MountingHole") (at 37.465 186.055 0) (unit 1)
    (in_bom yes) (on_board yes) (dnp no) (fields_autoplaced)
    (property "Reference" "H4" (at 40.005 184.7849 0))
    (property "Value" "AlignmentHole" (at 40.005 187.3249 0))
    (property "Footprint" "MountingHole:MountingHole_2.2mm_M2" (at 37.465 186.055 0))
    (property "Datasheet" "~" (at 37.465 186.055 0))
    (property "PARTNO" "https://www.amazon.com/dp/B07MDFS1YS" (at 37.465 186.055 0))
    (property "DNP" "T" (at 37.465 186.055 0))
    (instances
      (project "bitaxeMax"
        (path
          (reference "H4") (unit 1)
        )
      )
    )
  )
  (sheet (at 82.55 74.93) (size 17.78 26.67) (fields_autoplaced)
    (fill (color 255 255 194 1.0000))
    (property "Sheetname" "BM1397" (at 82.55 74.2184 0))
    (property "Sheetfile" "bm1397.kicad_sch" (at 82.55 102.1846 0))
    (pin "3V3" input (at 82.55 86.36 180))
    (pin "5V" input (at 82.55 83.82 180))
    (pin "TEMP_P" output (at 100.33 96.52 0))
    (pin "TEMP_N" output (at 100.33 99.06 0))
    (pin "VDD" input (at 82.55 81.28 180))
    (pin "BM_CI" input (at 100.33 81.915 0))
    (pin "BM_RO" output (at 100.33 79.375 0))
    (pin "BM_RST" input (at 100.33 84.455 0))
    (instances
      (project "bitaxeMax"
        (path (page "4"))
      )
    )
  )
  (sheet (at 145.415 116.205) (size 17.78 18.415) (fields_autoplaced)
    (fill (color 255 255 194 1.0000))
    (property "Sheetname" "Fan" (at 145.415 115.4934 0))
    (property "Sheetfile" "fan.kicad_sch" (at 145.415 135.2046 0))
    (pin "TEMP_N" input (at 145.415 121.92 180))
    (pin "TEMP_P" input (at 145.415 119.38 180))
    (pin "SDA" bidirectional (at 163.195 125.095 0))
    (pin "SCL" input (at 163.195 127.635 0))
    (pin "5V" input (at 145.415 129.54 180))
    (pin "3V3" input (at 145.415 132.08 180))
    (instances
      (project "bitaxeMax"
        (path (page "5"))
      )
    )
  )
  (sheet (at 82.55 49.53) (size 17.145 16.51) (fields_autoplaced)
    (fill (color 255 255 194 1.0000))
    (property "Sheetname" "Power" (at 82.55 48.8184 0))
    (property "Sheetfile" "power.kicad_sch" (at 82.55 66.6246 0))
    (pin "VOUT" output (at 82.55 60.325 180))
    (pin "VIN" input (at 82.55 52.705 180))
    (pin "SCL" input (at 99.695 57.15 0))
    (pin "SDA" bidirectional (at 99.695 59.69 0))
    (pin "5V" output (at 82.55 55.245 180))
    (pin "3V3" input (at 99.695 53.34 0))
    (pin "PGOOD" output (at 99.695 62.865 0))
    (instances
      (project "bitaxeMax"
        (path (page "2"))
      )
    )
  )
  (sheet (at 144.78 74.295) (size 21.59 34.925) (fields_autoplaced)
    (fill (color 255 255 194 1.0000))
    (property "Sheetname" "ESP32" (at 144.78 73.5834 0))
    (property "Sheetfile" "esp32.kicad_sch" (at 144.78 109.8046 0))
    (pin "SDA" bidirectional (at 166.37 79.375 0))
    (pin "SCL" output (at 166.37 81.915 0))
    (pin "RX" input (at 144.78 79.375 180))
    (pin "TX" output (at 144.78 81.915 180))
    (pin "RST" output (at 144.78 84.455 180))
    (pin "5V" input (at 144.78 106.68 180))
    (pin "3V3" output (at 144.78 104.14 180))
    (pin "PGOOD" input (at 144.78 76.835 180))
    (pin "VDD" input (at 144.78 101.6 180))
    (instances
      (project "bitaxeMax"
        (path (page "3"))
      )
    )
  )
  (sheet_instances
    (path (page "1"))
  )
)
