(kicad_sch
	(version 20231120)
	(generator "eeschema")
	(generator_version "8.0")
	(paper "A")
	(title_block
		(title "bitaxeHex")
		(date "2024-03-09")
		(rev "303")
	)
	(lib_symbols
		(symbol "Connector:TestPoint"
			(pin_numbers hide)
			(pin_names
				(offset 0.762) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "TP"
				(at 0 6.858 0)
			)
			(property "Value" "TestPoint"
				(at 0 5.08 0)
			)
			(property "Footprint" ""
				(at 5.08 0 0)
			)
			(property "Datasheet" "~"
				(at 5.08 0 0)
			)
			(property "Description" "test point"
				(at 0 0 0)
			)
			(property "ki_keywords" "test point tp"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Pin* Test*"
				(at 0 0 0)
			)
			(symbol "TestPoint_0_1"
				(circle
					(center 0 3.302)
					(radius 0.762)
					(fill
						(type none)
					)
				)
			)
			(symbol "TestPoint_1_1"
				(pin passive line
					(at 0 0 90)
					(length 2.54)
					(name "1")
					(number "1")
				)
			)
		)
		(symbol "Connector_Generic:Conn_02x05_Odd_Even"
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "J"
				(at 1.27 7.62 0)
			)
			(property "Value" "Conn_02x05_Odd_Even"
				(at 1.27 -7.62 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Generic connector, double row, 02x05, odd/even pin numbering scheme (row 1 odd numbers, row 2 even numbers), script generated (kicad-library-utils/schlib/autogen/connector/)"
				(at 0 0 0)
			)
			(property "ki_keywords" "connector"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Connector*:*_2x??_*"
				(at 0 0 0)
			)
			(symbol "Conn_02x05_Odd_Even_1_1"
				(rectangle
					(start -1.27 -4.953)
					(end 0 -5.207)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 -2.413)
					(end 0 -2.667)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 0.127)
					(end 0 -0.127)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 2.667)
					(end 0 2.413)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 5.207)
					(end 0 4.953)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 6.35)
					(end 3.81 -6.35)
					(fill
						(type background)
					)
				)
				(rectangle
					(start 3.81 -4.953)
					(end 2.54 -5.207)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 3.81 -2.413)
					(end 2.54 -2.667)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 3.81 0.127)
					(end 2.54 -0.127)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 3.81 2.667)
					(end 2.54 2.413)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 3.81 5.207)
					(end 2.54 4.953)
					(fill
						(type none)
					)
				)
				(pin passive line
					(at -5.08 5.08 0)
					(length 3.81)
					(name "Pin_1")
					(number "1")
				)
				(pin passive line
					(at 7.62 -5.08 180)
					(length 3.81)
					(name "Pin_10")
					(number "10")
				)
				(pin passive line
					(at 7.62 5.08 180)
					(length 3.81)
					(name "Pin_2")
					(number "2")
				)
				(pin passive line
					(at -5.08 2.54 0)
					(length 3.81)
					(name "Pin_3")
					(number "3")
				)
				(pin passive line
					(at 7.62 2.54 180)
					(length 3.81)
					(name "Pin_4")
					(number "4")
				)
				(pin passive line
					(at -5.08 0 0)
					(length 3.81)
					(name "Pin_5")
					(number "5")
				)
				(pin passive line
					(at 7.62 0 180)
					(length 3.81)
					(name "Pin_6")
					(number "6")
				)
				(pin passive line
					(at -5.08 -2.54 0)
					(length 3.81)
					(name "Pin_7")
					(number "7")
				)
				(pin passive line
					(at 7.62 -2.54 180)
					(length 3.81)
					(name "Pin_8")
					(number "8")
				)
				(pin passive line
					(at -5.08 -5.08 0)
					(length 3.81)
					(name "Pin_9")
					(number "9")
				)
			)
		)
		(symbol "Device:C"
			(pin_numbers hide)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Unpolarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C_*"
				(at 0 0 0)
			)
			(symbol "C_0_1"
				(polyline
					(pts
						(xy -2.032 -0.762) (xy 2.032 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.032 0.762) (xy 2.032 0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:C_Polarized"
			(pin_numbers hide)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C_Polarized"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Polarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "CP_*"
				(at 0 0 0)
			)
			(symbol "C_Polarized_0_1"
				(rectangle
					(start -2.286 0.508)
					(end 2.286 1.016)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.778 2.286) (xy -0.762 2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 2.794) (xy -1.27 1.778)
					)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 2.286 -0.508)
					(end -2.286 -1.016)
					(fill
						(type outline)
					)
				)
			)
			(symbol "C_Polarized_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:L"
			(pin_numbers hide)
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "L"
				(at -1.27 0 90)
			)
			(property "Value" "L"
				(at 1.905 0 90)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Inductor"
				(at 0 0 0)
			)
			(property "ki_keywords" "inductor choke coil reactor magnetic"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Choke_* *Coil* Inductor_* L_*"
				(at 0 0 0)
			)
			(symbol "L_0_1"
				(arc
					(start 0 -2.54)
					(mid 0.6323 -1.905)
					(end 0 -1.27)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 -1.27)
					(mid 0.6323 -0.635)
					(end 0 0)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 0)
					(mid 0.6323 0.635)
					(end 0 1.27)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 1.27)
					(mid 0.6323 1.905)
					(end 0 2.54)
					(fill
						(type none)
					)
				)
			)
			(symbol "L_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "1")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "2")
					(number "2")
				)
			)
		)
		(symbol "Device:R_US"
			(pin_numbers hide)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 2.54 0 90)
			)
			(property "Value" "R_US"
				(at -2.54 0 90)
			)
			(property "Footprint" ""
				(at 1.016 -0.254 90)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Resistor, US symbol"
				(at 0 0 0)
			)
			(property "ki_keywords" "R res resistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R_US_0_1"
				(polyline
					(pts
						(xy 0 -2.286) (xy 0 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.286) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -0.762) (xy 1.016 -1.143) (xy 0 -1.524) (xy -1.016 -1.905) (xy 0 -2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0.762) (xy 1.016 0.381) (xy 0 0) (xy -1.016 -0.381) (xy 0 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.286) (xy 1.016 1.905) (xy 0 1.524) (xy -1.016 1.143) (xy 0 0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_US_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "bitaxe:LMR54410"
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -5.08 7.62 0)
			)
			(property "Value" "LMR54410"
				(at 0 -7.62 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:SOT-23-6"
				(at 2.54 -10.16 0)
			)
			(property "Datasheet" "https://www.ti.com/lit/ds/symlink/lmr54406.pdf"
				(at 0 -13.97 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "DK" "296-LMR54410DBVRCT-ND"
				(at 0 10.16 0)
			)
			(property "partnum" "LMR54410FDBVR"
				(at 0 12.7 0)
			)
			(property "ki_fp_filters" "TSOT-23-5_RIT TSOT-23-5_RIT-M TSOT-23-5_RIT-L"
				(at 0 0 0)
			)
			(symbol "LMR54410_1_1"
				(rectangle
					(start -6.35 6.35)
					(end 6.35 -6.35)
					(fill
						(type background)
					)
				)
				(pin input line
					(at 8.89 0 180)
					(length 2.54)
					(name "CB")
					(number "1")
				)
				(pin power_in line
					(at -8.89 -3.81 0)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin input line
					(at 8.89 -3.81 180)
					(length 2.54)
					(name "FB")
					(number "3")
				)
				(pin input line
					(at -8.89 0 0)
					(length 2.54)
					(name "EN")
					(number "4")
				)
				(pin power_in line
					(at -8.89 3.81 0)
					(length 2.54)
					(name "VIN")
					(number "5")
				)
				(pin output line
					(at 8.89 3.81 180)
					(length 2.54)
					(name "SW")
					(number "6")
				)
			)
		)
		(symbol "bitaxe:MIC5504"
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -6.35 5.08 0)
			)
			(property "Value" "MIC5504"
				(at 0 -6.35 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5_HandSoldering"
				(at 49.53 17.78 0)
			)
			(property "Datasheet" "https://www.digikey.com/en/products/detail/microchip-technology/MIC5504-1-8YM5-TR/5209404"
				(at -7.62 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "DK" "576-4879-1-ND"
				(at 0 0 0)
			)
			(property "partnum" "MIC5504-1.8YM5-TR"
				(at 1.27 0 0)
			)
			(property "ki_fp_filters" "TSOT-23-5_RIT TSOT-23-5_RIT-M TSOT-23-5_RIT-L"
				(at 0 0 0)
			)
			(symbol "MIC5504_1_1"
				(rectangle
					(start -6.35 3.81)
					(end 6.35 -5.08)
					(fill
						(type background)
					)
				)
				(pin power_in line
					(at -8.89 1.27 0)
					(length 2.54)
					(name "VIN")
					(number "1")
				)
				(pin power_in line
					(at 8.89 -1.27 180)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin input line
					(at -8.89 -1.27 0)
					(length 2.54)
					(name "EN")
					(number "3")
				)
				(pin input line
					(at -8.89 -3.81 0)
					(length 2.54)
					(name "NC")
					(number "4")
				)
				(pin output line
					(at 8.89 1.27 180)
					(length 2.54)
					(name "VOUT")
					(number "5")
				)
			)
		)
		(symbol "bitaxe:RT9080-33GJ5"
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U2"
				(at 0 8.382 0)
			)
			(property "Value" "RT9080-33GJ5"
				(at 0 5.842 0)
			)
			(property "Footprint" "bitaxe:RT9080-33GJ5"
				(at 49.53 17.78 0)
			)
			(property "Datasheet" "https://www.richtek.com/assets/product_file/RT9080/DS9080-05.pdf"
				(at -8.89 1.27 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "DK" "1028-1509-1-ND"
				(at 0 0 0)
			)
			(property "PARTNO" "RT9080-33GJ5"
				(at 0 0 0)
			)
			(property "ki_locked" ""
				(at 0 0 0)
			)
			(property "ki_fp_filters" "TSOT-23-5_RIT TSOT-23-5_RIT-M TSOT-23-5_RIT-L"
				(at 0 0 0)
			)
			(symbol "RT9080-33GJ5_1_1"
				(rectangle
					(start -6.35 3.81)
					(end 6.35 -5.08)
					(fill
						(type background)
					)
				)
				(pin power_in line
					(at -8.89 1.27 0)
					(length 2.54)
					(name "VIN")
					(number "1")
				)
				(pin power_in line
					(at 8.89 -3.81 180)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin input line
					(at -8.89 -1.27 0)
					(length 2.54)
					(name "EN")
					(number "3")
				)
				(pin power_in line
					(at 8.89 -1.27 180)
					(length 2.54)
					(name "NC")
					(number "4")
				)
				(pin output line
					(at 8.89 1.27 180)
					(length 2.54)
					(name "VOUT")
					(number "5")
				)
			)
		)
		(symbol "bitaxe:TPS546D24"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -7.62 43.18 0)
			)
			(property "Value" "TPS546D24"
				(at 6.35 43.18 0)
			)
			(property "Footprint" ""
				(at 0 26.67 0)
			)
			(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tps546d24a.pdf"
				(at 0 48.26 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "DK" "296-TPS546D24ARVFRCT-ND"
				(at 0 50.8 0)
			)
			(property "PARTNO" "TPS546D24ARVFR"
				(at 0 53.34 0)
			)
			(symbol "TPS546D24_0_1"
				(rectangle
					(start -11.43 41.91)
					(end 11.43 -35.56)
					(fill
						(type background)
					)
				)
			)
			(symbol "TPS546D24_1_1"
				(pin input line
					(at 13.97 -27.94 180)
					(length 2.54)
					(name "PGD")
					(number "1")
				)
				(pin power_in line
					(at 13.97 30.48 180)
					(length 2.54)
					(name "SW")
					(number "10")
				)
				(pin output line
					(at 13.97 27.94 180)
					(length 2.54)
					(name "SW")
					(number "11")
				)
				(pin power_out line
					(at 13.97 25.4 180)
					(length 2.54)
					(name "SW")
					(number "12")
				)
				(pin output line
					(at 13.97 19.05 180)
					(length 2.54)
					(name "PGND")
					(number "13")
				)
				(pin output line
					(at 13.97 16.51 180)
					(length 2.54)
					(name "PGND")
					(number "14")
				)
				(pin input line
					(at 13.97 13.97 180)
					(length 2.54)
					(name "PGND")
					(number "15")
				)
				(pin input line
					(at 13.97 11.43 180)
					(length 2.54)
					(name "PGND")
					(number "16")
				)
				(pin power_in line
					(at 13.97 8.89 180)
					(length 2.54)
					(name "PGND")
					(number "17")
				)
				(pin input line
					(at 13.97 6.35 180)
					(length 2.54)
					(name "PGND")
					(number "18")
				)
				(pin input line
					(at 13.97 3.81 180)
					(length 2.54)
					(name "PGND")
					(number "19")
				)
				(pin input line
					(at -13.97 -26.67 0)
					(length 2.54)
					(name "PMB_DATA")
					(number "2")
				)
				(pin power_in line
					(at 13.97 1.27 180)
					(length 2.54)
					(name "PGND")
					(number "20")
				)
				(pin input line
					(at -13.97 31.75 0)
					(length 2.54)
					(name "PVIN")
					(number "21")
				)
				(pin input line
					(at -13.97 29.21 0)
					(length 2.54)
					(name "PVIN")
					(number "22")
				)
				(pin input line
					(at -13.97 26.67 0)
					(length 2.54)
					(name "PVIN")
					(number "23")
				)
				(pin input line
					(at -13.97 24.13 0)
					(length 2.54)
					(name "PVIN")
					(number "24")
				)
				(pin input line
					(at -13.97 21.59 0)
					(length 2.54)
					(name "PVIN")
					(number "25")
				)
				(pin input line
					(at -13.97 17.78 0)
					(length 2.54)
					(name "AVIN")
					(number "26")
				)
				(pin input line
					(at -13.97 13.97 0)
					(length 2.54)
					(name "EN/UVLO")
					(number "27")
				)
				(pin output line
					(at -13.97 10.16 0)
					(length 2.54)
					(name "VDD5")
					(number "28")
				)
				(pin power_in line
					(at -13.97 -8.89 0)
					(length 2.54)
					(name "MSEL2")
					(number "29")
				)
				(pin input line
					(at -13.97 -29.21 0)
					(length 2.54)
					(name "PMB_CLK")
					(number "3")
				)
				(pin power_in line
					(at -13.97 -12.7 0)
					(length 2.54)
					(name "VSEL")
					(number "30")
				)
				(pin output line
					(at -13.97 -16.51 0)
					(length 2.54)
					(name "ADRSEL")
					(number "31")
				)
				(pin power_out line
					(at -13.97 -20.32 0)
					(length 2.54)
					(name "MSEL1")
					(number "32")
				)
				(pin output line
					(at 13.97 -6.35 180)
					(length 2.54)
					(name "VOSNS")
					(number "33")
				)
				(pin output line
					(at 13.97 -11.43 180)
					(length 2.54)
					(name "GOSNS")
					(number "34")
				)
				(pin input line
					(at 13.97 -13.97 180)
					(length 2.54)
					(name "VSHARE")
					(number "35")
				)
				(pin input line
					(at 13.97 -16.51 180)
					(length 2.54)
					(name "NC")
					(number "36")
				)
				(pin power_in line
					(at 13.97 -33.02 180)
					(length 2.54)
					(name "AGND")
					(number "37")
				)
				(pin input line
					(at 13.97 -19.05 180)
					(length 2.54)
					(name "SYNC")
					(number "38")
				)
				(pin input line
					(at 13.97 -22.86 180)
					(length 2.54)
					(name "BCX_CLK")
					(number "39")
				)
				(pin input line
					(at -13.97 -5.08 0)
					(length 2.54)
					(name "BP1V5")
					(number "4")
				)
				(pin input line
					(at 13.97 -25.4 180)
					(length 2.54)
					(name "BCX_DAT")
					(number "40")
				)
				(pin power_in line
					(at 13.97 -2.54 180)
					(length 2.54)
					(name "PAD")
					(number "41")
				)
				(pin input line
					(at 13.97 -30.48 180)
					(length 2.54)
					(name "DRTN")
					(number "5")
				)
				(pin input line
					(at -13.97 -31.75 0)
					(length 2.54)
					(name "SMB_ALRT")
					(number "6")
				)
				(pin input line
					(at 13.97 39.37 180)
					(length 2.54)
					(name "BOOT")
					(number "7")
				)
				(pin output line
					(at 13.97 35.56 180)
					(length 2.54)
					(name "SW")
					(number "8")
				)
				(pin power_in line
					(at 13.97 33.02 180)
					(length 2.54)
					(name "SW")
					(number "9")
				)
			)
		)
		(symbol "bitaxe:net-tie"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "T"
				(at -1.27 2.54 0)
			)
			(property "Value" "net-tie"
				(at 0 -2.54 0)
			)
			(property "Footprint" ""
				(at -1.27 -1.27 0)
			)
			(property "Datasheet" ""
				(at -1.27 -1.27 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "net-tie_0_1"
				(rectangle
					(start -3.81 1.27)
					(end 3.81 -1.27)
					(fill
						(type background)
					)
				)
			)
			(symbol "net-tie_1_0"
				(pin bidirectional line
					(at -5.08 0 0)
					(length 1.27)
					(name "")
					(number "1")
				)
				(pin bidirectional line
					(at 5.08 0 180)
					(length 1.27)
					(name "")
					(number "2")
				)
			)
			(symbol "net-tie_1_1"
				(text "net-tie"
					(at 0 0 0)
				)
			)
		)
	)
	(junction
		(at 162.56 58.42)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 203.2 116.84)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 173.99 146.05)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 48.26 92.71)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 52.07 187.96)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 52.07 172.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 96.52 63.5)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 229.87 93.98)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 109.22 198.12)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 124.46 48.26)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 33.02 172.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 121.92 172.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 90.17 20.32)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 135.89 146.05)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 238.76 41.91)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 43.18 172.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 219.71 93.98)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 115.57 55.88)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 109.22 185.42)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 78.74 36.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 162.56 71.12)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 34.29 36.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 124.46 45.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 78.74 20.32)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 162.56 41.91)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 115.57 43.18)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 60.96 187.96)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 248.92 41.91)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 46.99 36.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 57.15 20.32)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 162.56 49.53)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 196.85 160.02)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 57.15 36.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 162.56 46.99)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 185.42 41.91)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 124.46 43.18)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 162.56 44.45)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 162.56 60.96)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 162.56 68.58)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 101.6 36.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 219.71 41.91)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 68.58 36.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 68.58 20.32)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 134.62 180.34)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 168.91 41.91)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 203.2 41.91)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 93.98 116.84)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 248.92 93.98)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 110.49 20.32)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 124.46 53.34)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 236.22 93.98)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 162.56 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 124.46 158.75)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 124.46 50.8)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 162.56 63.5)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 101.6 20.32)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 46.99 20.32)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 209.55 93.98)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 76.2 92.71)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 48.26 105.41)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 134.62 172.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 43.18 187.96)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 109.22 172.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 208.28 146.05)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 86.36 63.5)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 162.56 66.04)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 34.29 20.32)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 101.6 146.05)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 92.71 172.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 203.2 146.05)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 209.55 41.91)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 93.98 105.41)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 130.81 146.05)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 229.87 41.91)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 60.96 180.34)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 86.36 77.47)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 121.92 198.12)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 240.03 41.91)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 194.31 81.28)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 76.2 116.84)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 240.03 93.98)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 90.17 36.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 194.31 93.98)
		(diameter 0)
		(color 0 0 0 0)
	)
	(no_connect
		(at 158.75 102.87)
	)
	(no_connect
		(at 49.53 149.86)
	)
	(no_connect
		(at 121.92 148.59)
	)
	(no_connect
		(at 158.75 96.52)
	)
	(no_connect
		(at 49.53 147.32)
	)
	(no_connect
		(at 36.83 147.32)
	)
	(no_connect
		(at 36.83 154.94)
	)
	(no_connect
		(at 36.83 149.86)
	)
	(no_connect
		(at 36.83 152.4)
	)
	(no_connect
		(at 158.75 91.44)
	)
	(no_connect
		(at 158.75 100.33)
	)
	(no_connect
		(at 158.75 93.98)
	)
	(wire
		(pts
			(xy 130.81 55.88) (xy 124.46 55.88)
		)
	)
	(wire
		(pts
			(xy 162.56 71.12) (xy 162.56 73.66)
		)
	)
	(wire
		(pts
			(xy 203.2 146.05) (xy 208.28 146.05)
		)
	)
	(wire
		(pts
			(xy 203.2 160.02) (xy 196.85 160.02)
		)
	)
	(wire
		(pts
			(xy 173.99 148.59) (xy 173.99 146.05)
		)
	)
	(wire
		(pts
			(xy 240.03 41.91) (xy 248.92 41.91)
		)
	)
	(wire
		(pts
			(xy 22.86 157.48) (xy 36.83 157.48)
		)
	)
	(wire
		(pts
			(xy 120.65 67.31) (xy 130.81 67.31)
		)
	)
	(wire
		(pts
			(xy 203.2 146.05) (xy 203.2 148.59)
		)
	)
	(wire
		(pts
			(xy 48.26 92.71) (xy 48.26 105.41)
		)
	)
	(wire
		(pts
			(xy 57.15 20.32) (xy 46.99 20.32)
		)
	)
	(wire
		(pts
			(xy 162.56 66.04) (xy 162.56 68.58)
		)
	)
	(wire
		(pts
			(xy 158.75 60.96) (xy 162.56 60.96)
		)
	)
	(wire
		(pts
			(xy 194.31 148.59) (xy 196.85 148.59)
		)
	)
	(wire
		(pts
			(xy 158.75 80.01) (xy 181.61 80.01)
		)
	)
	(wire
		(pts
			(xy 96.52 73.66) (xy 96.52 77.47)
		)
	)
	(wire
		(pts
			(xy 96.52 63.5) (xy 86.36 63.5)
		)
	)
	(wire
		(pts
			(xy 134.62 191.77) (xy 134.62 198.12)
		)
	)
	(wire
		(pts
			(xy 240.03 41.91) (xy 240.03 67.31)
		)
	)
	(wire
		(pts
			(xy 102.87 187.96) (xy 102.87 185.42)
		)
	)
	(wire
		(pts
			(xy 158.75 83.82) (xy 185.42 83.82)
		)
	)
	(wire
		(pts
			(xy 121.92 151.13) (xy 124.46 151.13)
		)
	)
	(wire
		(pts
			(xy 158.75 52.07) (xy 162.56 52.07)
		)
	)
	(wire
		(pts
			(xy 194.31 93.98) (xy 198.12 93.98)
		)
	)
	(wire
		(pts
			(xy 165.1 146.05) (xy 173.99 146.05)
		)
	)
	(wire
		(pts
			(xy 179.07 49.53) (xy 182.88 49.53)
		)
	)
	(wire
		(pts
			(xy 185.42 88.9) (xy 185.42 93.98)
		)
	)
	(wire
		(pts
			(xy 158.75 73.66) (xy 162.56 73.66)
		)
	)
	(wire
		(pts
			(xy 46.99 31.75) (xy 46.99 36.83)
		)
	)
	(wire
		(pts
			(xy 49.53 154.94) (xy 63.5 154.94)
		)
	)
	(wire
		(pts
			(xy 203.2 41.91) (xy 209.55 41.91)
		)
	)
	(wire
		(pts
			(xy 162.56 60.96) (xy 162.56 63.5)
		)
	)
	(wire
		(pts
			(xy 33.02 172.72) (xy 33.02 176.53)
		)
	)
	(wire
		(pts
			(xy 175.26 119.38) (xy 175.26 107.95)
		)
	)
	(wire
		(pts
			(xy 43.18 172.72) (xy 52.07 172.72)
		)
	)
	(wire
		(pts
			(xy 31.75 134.62) (xy 40.64 134.62)
		)
	)
	(wire
		(pts
			(xy 52.07 172.72) (xy 52.07 176.53)
		)
	)
	(wire
		(pts
			(xy 82.55 180.34) (xy 86.36 180.34)
		)
	)
	(wire
		(pts
			(xy 121.92 172.72) (xy 109.22 172.72)
		)
	)
	(wire
		(pts
			(xy 67.31 116.84) (xy 76.2 116.84)
		)
	)
	(wire
		(pts
			(xy 158.75 38.1) (xy 161.29 38.1)
		)
	)
	(wire
		(pts
			(xy 92.71 172.72) (xy 92.71 175.26)
		)
	)
	(wire
		(pts
			(xy 162.56 52.07) (xy 162.56 49.53)
		)
	)
	(wire
		(pts
			(xy 60.96 198.12) (xy 109.22 198.12)
		)
	)
	(wire
		(pts
			(xy 133.35 125.73) (xy 139.7 125.73)
		)
	)
	(wire
		(pts
			(xy 96.52 66.04) (xy 96.52 63.5)
		)
	)
	(wire
		(pts
			(xy 48.26 105.41) (xy 53.34 105.41)
		)
	)
	(wire
		(pts
			(xy 124.46 20.32) (xy 110.49 20.32)
		)
	)
	(wire
		(pts
			(xy 60.96 105.41) (xy 93.98 105.41)
		)
	)
	(wire
		(pts
			(xy 124.46 151.13) (xy 124.46 158.75)
		)
	)
	(wire
		(pts
			(xy 203.2 41.91) (xy 203.2 50.8)
		)
	)
	(wire
		(pts
			(xy 203.2 156.21) (xy 203.2 160.02)
		)
	)
	(wire
		(pts
			(xy 109.22 184.15) (xy 109.22 185.42)
		)
	)
	(wire
		(pts
			(xy 115.57 59.69) (xy 115.57 55.88)
		)
	)
	(wire
		(pts
			(xy 60.96 187.96) (xy 52.07 187.96)
		)
	)
	(wire
		(pts
			(xy 101.6 36.83) (xy 110.49 36.83)
		)
	)
	(wire
		(pts
			(xy 138.43 139.7) (xy 135.89 139.7)
		)
	)
	(wire
		(pts
			(xy 78.74 31.75) (xy 78.74 36.83)
		)
	)
	(wire
		(pts
			(xy 26.67 139.7) (xy 40.64 139.7)
		)
	)
	(wire
		(pts
			(xy 134.62 180.34) (xy 139.7 180.34)
		)
	)
	(wire
		(pts
			(xy 67.31 114.3) (xy 67.31 116.84)
		)
	)
	(wire
		(pts
			(xy 93.98 116.84) (xy 160.02 116.84)
		)
	)
	(wire
		(pts
			(xy 219.71 41.91) (xy 219.71 67.31)
		)
	)
	(wire
		(pts
			(xy 78.74 36.83) (xy 90.17 36.83)
		)
	)
	(wire
		(pts
			(xy 46.99 20.32) (xy 34.29 20.32)
		)
	)
	(wire
		(pts
			(xy 124.46 45.72) (xy 130.81 45.72)
		)
	)
	(wire
		(pts
			(xy 33.02 187.96) (xy 33.02 184.15)
		)
	)
	(wire
		(pts
			(xy 203.2 58.42) (xy 203.2 81.28)
		)
	)
	(wire
		(pts
			(xy 121.92 191.77) (xy 121.92 198.12)
		)
	)
	(wire
		(pts
			(xy 92.71 158.75) (xy 124.46 158.75)
		)
	)
	(wire
		(pts
			(xy 229.87 67.31) (xy 229.87 93.98)
		)
	)
	(wire
		(pts
			(xy 158.75 88.9) (xy 185.42 88.9)
		)
	)
	(wire
		(pts
			(xy 48.26 139.7) (xy 60.96 139.7)
		)
	)
	(wire
		(pts
			(xy 219.71 93.98) (xy 229.87 93.98)
		)
	)
	(wire
		(pts
			(xy 48.26 92.71) (xy 53.34 92.71)
		)
	)
	(wire
		(pts
			(xy 52.07 172.72) (xy 60.96 172.72)
		)
	)
	(wire
		(pts
			(xy 168.91 41.91) (xy 185.42 41.91)
		)
	)
	(wire
		(pts
			(xy 238.76 41.91) (xy 240.03 41.91)
		)
	)
	(wire
		(pts
			(xy 124.46 48.26) (xy 130.81 48.26)
		)
	)
	(wire
		(pts
			(xy 176.53 148.59) (xy 173.99 148.59)
		)
	)
	(wire
		(pts
			(xy 115.57 53.34) (xy 115.57 55.88)
		)
	)
	(wire
		(pts
			(xy 130.81 156.21) (xy 130.81 158.75)
		)
	)
	(wire
		(pts
			(xy 210.82 139.7) (xy 208.28 139.7)
		)
	)
	(wire
		(pts
			(xy 22.86 36.83) (xy 34.29 36.83)
		)
	)
	(wire
		(pts
			(xy 115.57 43.18) (xy 124.46 43.18)
		)
	)
	(wire
		(pts
			(xy 158.75 46.99) (xy 162.56 46.99)
		)
	)
	(wire
		(pts
			(xy 158.75 71.12) (xy 162.56 71.12)
		)
	)
	(wire
		(pts
			(xy 190.5 49.53) (xy 198.12 49.53)
		)
	)
	(wire
		(pts
			(xy 240.03 93.98) (xy 248.92 93.98)
		)
	)
	(wire
		(pts
			(xy 209.55 41.91) (xy 209.55 59.69)
		)
	)
	(wire
		(pts
			(xy 86.36 52.07) (xy 86.36 43.18)
		)
	)
	(wire
		(pts
			(xy 86.36 73.66) (xy 86.36 77.47)
		)
	)
	(wire
		(pts
			(xy 78.74 20.32) (xy 68.58 20.32)
		)
	)
	(wire
		(pts
			(xy 185.42 83.82) (xy 185.42 81.28)
		)
	)
	(wire
		(pts
			(xy 240.03 74.93) (xy 240.03 93.98)
		)
	)
	(wire
		(pts
			(xy 236.22 93.98) (xy 240.03 93.98)
		)
	)
	(wire
		(pts
			(xy 82.55 184.15) (xy 92.71 184.15)
		)
	)
	(wire
		(pts
			(xy 68.58 20.32) (xy 68.58 24.13)
		)
	)
	(wire
		(pts
			(xy 60.96 180.34) (xy 60.96 172.72)
		)
	)
	(wire
		(pts
			(xy 121.92 146.05) (xy 130.81 146.05)
		)
	)
	(wire
		(pts
			(xy 162.56 44.45) (xy 162.56 41.91)
		)
	)
	(wire
		(pts
			(xy 229.87 93.98) (xy 236.22 93.98)
		)
	)
	(wire
		(pts
			(xy 68.58 36.83) (xy 78.74 36.83)
		)
	)
	(wire
		(pts
			(xy 93.98 97.79) (xy 93.98 105.41)
		)
	)
	(wire
		(pts
			(xy 93.98 97.79) (xy 130.81 97.79)
		)
	)
	(wire
		(pts
			(xy 209.55 93.98) (xy 219.71 93.98)
		)
	)
	(wire
		(pts
			(xy 134.62 172.72) (xy 134.62 180.34)
		)
	)
	(wire
		(pts
			(xy 109.22 195.58) (xy 109.22 198.12)
		)
	)
	(wire
		(pts
			(xy 43.18 187.96) (xy 33.02 187.96)
		)
	)
	(wire
		(pts
			(xy 76.2 90.17) (xy 76.2 92.71)
		)
	)
	(wire
		(pts
			(xy 185.42 93.98) (xy 194.31 93.98)
		)
	)
	(wire
		(pts
			(xy 165.1 146.05) (xy 165.1 148.59)
		)
	)
	(wire
		(pts
			(xy 238.76 35.56) (xy 238.76 41.91)
		)
	)
	(wire
		(pts
			(xy 236.22 99.06) (xy 236.22 93.98)
		)
	)
	(wire
		(pts
			(xy 229.87 41.91) (xy 238.76 41.91)
		)
	)
	(wire
		(pts
			(xy 194.31 90.17) (xy 194.31 93.98)
		)
	)
	(wire
		(pts
			(xy 46.99 36.83) (xy 57.15 36.83)
		)
	)
	(wire
		(pts
			(xy 90.17 36.83) (xy 101.6 36.83)
		)
	)
	(wire
		(pts
			(xy 90.17 20.32) (xy 78.74 20.32)
		)
	)
	(wire
		(pts
			(xy 196.85 148.59) (xy 196.85 160.02)
		)
	)
	(wire
		(pts
			(xy 182.88 105.41) (xy 182.88 116.84)
		)
	)
	(wire
		(pts
			(xy 160.02 110.49) (xy 160.02 116.84)
		)
	)
	(wire
		(pts
			(xy 219.71 74.93) (xy 219.71 93.98)
		)
	)
	(wire
		(pts
			(xy 101.6 93.98) (xy 130.81 93.98)
		)
	)
	(wire
		(pts
			(xy 182.88 116.84) (xy 203.2 116.84)
		)
	)
	(wire
		(pts
			(xy 110.49 20.32) (xy 110.49 24.13)
		)
	)
	(wire
		(pts
			(xy 118.11 104.14) (xy 130.81 104.14)
		)
	)
	(wire
		(pts
			(xy 49.53 152.4) (xy 63.5 152.4)
		)
	)
	(wire
		(pts
			(xy 124.46 20.32) (xy 124.46 43.18)
		)
	)
	(wire
		(pts
			(xy 111.76 55.88) (xy 115.57 55.88)
		)
	)
	(wire
		(pts
			(xy 135.89 146.05) (xy 139.7 146.05)
		)
	)
	(wire
		(pts
			(xy 76.2 116.84) (xy 93.98 116.84)
		)
	)
	(wire
		(pts
			(xy 86.36 59.69) (xy 86.36 63.5)
		)
	)
	(wire
		(pts
			(xy 162.56 68.58) (xy 162.56 71.12)
		)
	)
	(wire
		(pts
			(xy 120.65 77.47) (xy 120.65 78.74)
		)
	)
	(wire
		(pts
			(xy 124.46 43.18) (xy 124.46 45.72)
		)
	)
	(wire
		(pts
			(xy 78.74 20.32) (xy 78.74 24.13)
		)
	)
	(wire
		(pts
			(xy 86.36 63.5) (xy 86.36 66.04)
		)
	)
	(wire
		(pts
			(xy 124.46 50.8) (xy 130.81 50.8)
		)
	)
	(wire
		(pts
			(xy 124.46 45.72) (xy 124.46 48.26)
		)
	)
	(wire
		(pts
			(xy 162.56 46.99) (xy 162.56 44.45)
		)
	)
	(wire
		(pts
			(xy 17.78 172.72) (xy 33.02 172.72)
		)
	)
	(wire
		(pts
			(xy 158.75 105.41) (xy 182.88 105.41)
		)
	)
	(wire
		(pts
			(xy 109.22 172.72) (xy 109.22 176.53)
		)
	)
	(wire
		(pts
			(xy 43.18 187.96) (xy 43.18 184.15)
		)
	)
	(wire
		(pts
			(xy 60.96 184.15) (xy 60.96 180.34)
		)
	)
	(wire
		(pts
			(xy 48.26 129.54) (xy 60.96 129.54)
		)
	)
	(wire
		(pts
			(xy 92.71 172.72) (xy 97.79 172.72)
		)
	)
	(wire
		(pts
			(xy 48.26 119.38) (xy 175.26 119.38)
		)
	)
	(wire
		(pts
			(xy 135.89 139.7) (xy 135.89 146.05)
		)
	)
	(wire
		(pts
			(xy 162.56 76.2) (xy 158.75 76.2)
		)
	)
	(wire
		(pts
			(xy 64.77 184.15) (xy 60.96 184.15)
		)
	)
	(wire
		(pts
			(xy 248.92 93.98) (xy 254 93.98)
		)
	)
	(wire
		(pts
			(xy 34.29 36.83) (xy 46.99 36.83)
		)
	)
	(wire
		(pts
			(xy 48.26 134.62) (xy 60.96 134.62)
		)
	)
	(wire
		(pts
			(xy 241.3 35.56) (xy 238.76 35.56)
		)
	)
	(wire
		(pts
			(xy 134.62 180.34) (xy 134.62 184.15)
		)
	)
	(wire
		(pts
			(xy 48.26 107.95) (xy 48.26 105.41)
		)
	)
	(wire
		(pts
			(xy 76.2 90.17) (xy 130.81 90.17)
		)
	)
	(wire
		(pts
			(xy 158.75 110.49) (xy 160.02 110.49)
		)
	)
	(wire
		(pts
			(xy 248.92 41.91) (xy 256.54 41.91)
		)
	)
	(wire
		(pts
			(xy 92.71 184.15) (xy 92.71 182.88)
		)
	)
	(wire
		(pts
			(xy 248.92 71.12) (xy 248.92 93.98)
		)
	)
	(wire
		(pts
			(xy 175.26 107.95) (xy 158.75 107.95)
		)
	)
	(wire
		(pts
			(xy 134.62 198.12) (xy 121.92 198.12)
		)
	)
	(wire
		(pts
			(xy 158.75 66.04) (xy 162.56 66.04)
		)
	)
	(wire
		(pts
			(xy 96.52 55.88) (xy 104.14 55.88)
		)
	)
	(wire
		(pts
			(xy 115.57 45.72) (xy 115.57 43.18)
		)
	)
	(wire
		(pts
			(xy 101.6 20.32) (xy 90.17 20.32)
		)
	)
	(wire
		(pts
			(xy 171.45 49.53) (xy 168.91 49.53)
		)
	)
	(wire
		(pts
			(xy 68.58 20.32) (xy 57.15 20.32)
		)
	)
	(wire
		(pts
			(xy 149.86 125.73) (xy 158.75 125.73)
		)
	)
	(wire
		(pts
			(xy 203.2 81.28) (xy 194.31 81.28)
		)
	)
	(wire
		(pts
			(xy 185.42 81.28) (xy 194.31 81.28)
		)
	)
	(wire
		(pts
			(xy 110.49 20.32) (xy 101.6 20.32)
		)
	)
	(wire
		(pts
			(xy 173.99 146.05) (xy 176.53 146.05)
		)
	)
	(wire
		(pts
			(xy 124.46 53.34) (xy 130.81 53.34)
		)
	)
	(wire
		(pts
			(xy 64.77 180.34) (xy 60.96 180.34)
		)
	)
	(wire
		(pts
			(xy 196.85 160.02) (xy 165.1 160.02)
		)
	)
	(wire
		(pts
			(xy 195.58 102.87) (xy 203.2 102.87)
		)
	)
	(wire
		(pts
			(xy 161.29 34.29) (xy 175.26 34.29)
		)
	)
	(wire
		(pts
			(xy 48.26 82.55) (xy 130.81 82.55)
		)
	)
	(wire
		(pts
			(xy 105.41 172.72) (xy 109.22 172.72)
		)
	)
	(wire
		(pts
			(xy 124.46 48.26) (xy 124.46 50.8)
		)
	)
	(wire
		(pts
			(xy 162.56 41.91) (xy 168.91 41.91)
		)
	)
	(wire
		(pts
			(xy 208.28 139.7) (xy 208.28 146.05)
		)
	)
	(wire
		(pts
			(xy 134.62 172.72) (xy 139.7 172.72)
		)
	)
	(wire
		(pts
			(xy 86.36 172.72) (xy 92.71 172.72)
		)
	)
	(wire
		(pts
			(xy 118.11 106.68) (xy 130.81 106.68)
		)
	)
	(wire
		(pts
			(xy 120.65 69.85) (xy 120.65 67.31)
		)
	)
	(wire
		(pts
			(xy 48.26 82.55) (xy 48.26 92.71)
		)
	)
	(wire
		(pts
			(xy 102.87 185.42) (xy 109.22 185.42)
		)
	)
	(wire
		(pts
			(xy 121.92 172.72) (xy 121.92 184.15)
		)
	)
	(wire
		(pts
			(xy 52.07 187.96) (xy 43.18 187.96)
		)
	)
	(wire
		(pts
			(xy 34.29 31.75) (xy 34.29 36.83)
		)
	)
	(wire
		(pts
			(xy 209.55 41.91) (xy 219.71 41.91)
		)
	)
	(wire
		(pts
			(xy 46.99 20.32) (xy 46.99 24.13)
		)
	)
	(wire
		(pts
			(xy 121.92 172.72) (xy 134.62 172.72)
		)
	)
	(wire
		(pts
			(xy 130.81 146.05) (xy 135.89 146.05)
		)
	)
	(wire
		(pts
			(xy 162.56 41.91) (xy 158.75 41.91)
		)
	)
	(wire
		(pts
			(xy 124.46 50.8) (xy 124.46 53.34)
		)
	)
	(wire
		(pts
			(xy 67.31 86.36) (xy 130.81 86.36)
		)
	)
	(wire
		(pts
			(xy 229.87 41.91) (xy 229.87 59.69)
		)
	)
	(wire
		(pts
			(xy 245.11 99.06) (xy 236.22 99.06)
		)
	)
	(wire
		(pts
			(xy 165.1 160.02) (xy 165.1 156.21)
		)
	)
	(wire
		(pts
			(xy 201.93 41.91) (xy 203.2 41.91)
		)
	)
	(wire
		(pts
			(xy 34.29 24.13) (xy 34.29 20.32)
		)
	)
	(wire
		(pts
			(xy 124.46 53.34) (xy 124.46 55.88)
		)
	)
	(wire
		(pts
			(xy 101.6 148.59) (xy 101.6 146.05)
		)
	)
	(wire
		(pts
			(xy 185.42 41.91) (xy 194.31 41.91)
		)
	)
	(wire
		(pts
			(xy 33.02 172.72) (xy 43.18 172.72)
		)
	)
	(wire
		(pts
			(xy 67.31 86.36) (xy 67.31 106.68)
		)
	)
	(wire
		(pts
			(xy 21.59 20.32) (xy 34.29 20.32)
		)
	)
	(wire
		(pts
			(xy 203.2 116.84) (xy 213.36 116.84)
		)
	)
	(wire
		(pts
			(xy 93.98 116.84) (xy 93.98 114.3)
		)
	)
	(wire
		(pts
			(xy 69.85 77.47) (xy 86.36 77.47)
		)
	)
	(wire
		(pts
			(xy 57.15 31.75) (xy 57.15 36.83)
		)
	)
	(wire
		(pts
			(xy 205.74 93.98) (xy 209.55 93.98)
		)
	)
	(wire
		(pts
			(xy 181.61 80.01) (xy 181.61 58.42)
		)
	)
	(wire
		(pts
			(xy 158.75 63.5) (xy 162.56 63.5)
		)
	)
	(wire
		(pts
			(xy 109.22 78.74) (xy 120.65 78.74)
		)
	)
	(wire
		(pts
			(xy 124.46 158.75) (xy 130.81 158.75)
		)
	)
	(wire
		(pts
			(xy 248.92 63.5) (xy 248.92 41.91)
		)
	)
	(wire
		(pts
			(xy 168.91 49.53) (xy 168.91 41.91)
		)
	)
	(wire
		(pts
			(xy 185.42 34.29) (xy 185.42 41.91)
		)
	)
	(wire
		(pts
			(xy 31.75 129.54) (xy 40.64 129.54)
		)
	)
	(wire
		(pts
			(xy 104.14 148.59) (xy 101.6 148.59)
		)
	)
	(wire
		(pts
			(xy 203.2 105.41) (xy 203.2 102.87)
		)
	)
	(wire
		(pts
			(xy 115.57 59.69) (xy 130.81 59.69)
		)
	)
	(wire
		(pts
			(xy 76.2 114.3) (xy 76.2 116.84)
		)
	)
	(wire
		(pts
			(xy 162.56 58.42) (xy 181.61 58.42)
		)
	)
	(wire
		(pts
			(xy 118.11 109.22) (xy 130.81 109.22)
		)
	)
	(wire
		(pts
			(xy 162.56 58.42) (xy 162.56 60.96)
		)
	)
	(wire
		(pts
			(xy 219.71 41.91) (xy 229.87 41.91)
		)
	)
	(wire
		(pts
			(xy 162.56 49.53) (xy 162.56 46.99)
		)
	)
	(wire
		(pts
			(xy 86.36 77.47) (xy 96.52 77.47)
		)
	)
	(wire
		(pts
			(xy 158.75 44.45) (xy 162.56 44.45)
		)
	)
	(wire
		(pts
			(xy 162.56 73.66) (xy 162.56 76.2)
		)
	)
	(wire
		(pts
			(xy 90.17 31.75) (xy 90.17 36.83)
		)
	)
	(wire
		(pts
			(xy 52.07 184.15) (xy 52.07 187.96)
		)
	)
	(wire
		(pts
			(xy 43.18 172.72) (xy 43.18 176.53)
		)
	)
	(wire
		(pts
			(xy 64.77 187.96) (xy 60.96 187.96)
		)
	)
	(wire
		(pts
			(xy 92.71 146.05) (xy 92.71 148.59)
		)
	)
	(wire
		(pts
			(xy 158.75 68.58) (xy 162.56 68.58)
		)
	)
	(wire
		(pts
			(xy 158.75 49.53) (xy 162.56 49.53)
		)
	)
	(wire
		(pts
			(xy 93.98 105.41) (xy 93.98 106.68)
		)
	)
	(wire
		(pts
			(xy 203.2 113.03) (xy 203.2 116.84)
		)
	)
	(wire
		(pts
			(xy 76.2 92.71) (xy 76.2 106.68)
		)
	)
	(wire
		(pts
			(xy 57.15 20.32) (xy 57.15 24.13)
		)
	)
	(wire
		(pts
			(xy 68.58 31.75) (xy 68.58 36.83)
		)
	)
	(wire
		(pts
			(xy 130.81 146.05) (xy 130.81 148.59)
		)
	)
	(wire
		(pts
			(xy 182.88 34.29) (xy 185.42 34.29)
		)
	)
	(wire
		(pts
			(xy 96.52 63.5) (xy 130.81 63.5)
		)
	)
	(wire
		(pts
			(xy 92.71 146.05) (xy 101.6 146.05)
		)
	)
	(wire
		(pts
			(xy 109.22 185.42) (xy 109.22 187.96)
		)
	)
	(wire
		(pts
			(xy 86.36 43.18) (xy 115.57 43.18)
		)
	)
	(wire
		(pts
			(xy 82.55 187.96) (xy 102.87 187.96)
		)
	)
	(wire
		(pts
			(xy 208.28 146.05) (xy 212.09 146.05)
		)
	)
	(wire
		(pts
			(xy 60.96 92.71) (xy 76.2 92.71)
		)
	)
	(wire
		(pts
			(xy 60.96 187.96) (xy 60.96 198.12)
		)
	)
	(wire
		(pts
			(xy 86.36 180.34) (xy 86.36 172.72)
		)
	)
	(wire
		(pts
			(xy 158.75 58.42) (xy 162.56 58.42)
		)
	)
	(wire
		(pts
			(xy 101.6 146.05) (xy 104.14 146.05)
		)
	)
	(wire
		(pts
			(xy 209.55 67.31) (xy 209.55 93.98)
		)
	)
	(wire
		(pts
			(xy 194.31 146.05) (xy 203.2 146.05)
		)
	)
	(wire
		(pts
			(xy 49.53 157.48) (xy 63.5 157.48)
		)
	)
	(wire
		(pts
			(xy 101.6 31.75) (xy 101.6 36.83)
		)
	)
	(wire
		(pts
			(xy 161.29 38.1) (xy 161.29 34.29)
		)
	)
	(wire
		(pts
			(xy 194.31 81.28) (xy 194.31 82.55)
		)
	)
	(wire
		(pts
			(xy 110.49 36.83) (xy 110.49 31.75)
		)
	)
	(wire
		(pts
			(xy 90.17 20.32) (xy 90.17 24.13)
		)
	)
	(wire
		(pts
			(xy 57.15 36.83) (xy 68.58 36.83)
		)
	)
	(wire
		(pts
			(xy 162.56 63.5) (xy 162.56 66.04)
		)
	)
	(wire
		(pts
			(xy 121.92 198.12) (xy 109.22 198.12)
		)
	)
	(wire
		(pts
			(xy 101.6 20.32) (xy 101.6 24.13)
		)
	)
	(wire
		(pts
			(xy 48.26 115.57) (xy 48.26 119.38)
		)
	)
	(wire
		(pts
			(xy 92.71 158.75) (xy 92.71 156.21)
		)
	)
	(text "1V8 LDO"
		(exclude_from_sim no)
		(at 180.34 163.83 0)
	)
	(text "Output \n3.6V nominal\n40A max"
		(exclude_from_sim no)
		(at 251.46 52.07 0)
	)
	(text "TPS546D24 is a Buck regulator that steps 12V down to 3.6V for the BM1366 chain"
		(exclude_from_sim no)
		(at 134.62 20.32 0)
	)
	(text "3V3 LDO"
		(exclude_from_sim no)
		(at 102.87 162.56 0)
	)
	(text "300 mA max"
		(exclude_from_sim no)
		(at 213.36 149.86 0)
	)
	(text "Remove R109, R110, R111\nto isolate the PM Bus from\nthe ESP32 master for \nconfiguration and debug."
		(exclude_from_sim no)
		(at 64.77 138.43 0)
	)
	(text "Max 1.0A"
		(exclude_from_sim no)
		(at 140.97 176.53 0)
	)
	(text "Connect at\nU3 Pin 37"
		(exclude_from_sim no)
		(at 139.7 133.35 0)
	)
	(text "External PMBUS connector\nfor TI GUI tool or I2C debug\n(Optional)"
		(exclude_from_sim no)
		(at 31.75 166.37 0)
	)
	(text "600 mA max"
		(exclude_from_sim no)
		(at 140.97 149.86 0)
	)
	(text "5V Supply"
		(exclude_from_sim no)
		(at 68.58 201.93 0)
	)
	(text "PGD is an open drain output\nfrom the TPS546D24. Pull up to 3.3V"
		(exclude_from_sim no)
		(at 191.77 123.19 0)
	)
	(text "I2C ADDR = 0x24"
		(exclude_from_sim no)
		(at 108.204 96.52 0)
	)
	(label "SW"
		(at 171.45 41.91 0)
		(fields_autoplaced yes)
	)
	(label "AGND"
		(at 133.35 125.73 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 182.88 160.02 0)
		(fields_autoplaced yes)
	)
	(label "CoreV"
		(at 255.27 41.91 180)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 175.26 58.42 180)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 158.75 125.73 180)
		(fields_autoplaced yes)
	)
	(label "PMB_ALRT"
		(at 60.96 139.7 180)
		(fields_autoplaced yes)
	)
	(label "PMB_ALRT"
		(at 63.5 154.94 180)
		(fields_autoplaced yes)
	)
	(label "AGND"
		(at 130.81 116.84 180)
		(fields_autoplaced yes)
	)
	(label "SDA"
		(at 34.29 129.54 0)
		(fields_autoplaced yes)
	)
	(label "PGOOD"
		(at 187.96 116.84 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 109.22 78.74 0)
		(fields_autoplaced yes)
	)
	(label "1V8"
		(at 196.85 146.05 0)
		(fields_autoplaced yes)
	)
	(label "5V"
		(at 95.25 146.05 0)
		(fields_autoplaced yes)
	)
	(label "VIN"
		(at 26.67 20.32 0)
		(fields_autoplaced yes)
	)
	(label "PMB_SDA"
		(at 60.96 129.54 180)
		(fields_autoplaced yes)
	)
	(label "PMB_SCL"
		(at 22.86 157.48 0)
		(fields_autoplaced yes)
	)
	(label "PMB_SCL"
		(at 118.11 106.68 0)
		(fields_autoplaced yes)
	)
	(label "PMB_SDA"
		(at 63.5 157.48 180)
		(fields_autoplaced yes)
	)
	(label "VIN"
		(at 17.78 172.72 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 22.86 36.83 0)
		(fields_autoplaced yes)
	)
	(label "3V3"
		(at 124.46 146.05 0)
		(fields_autoplaced yes)
	)
	(label "AGND"
		(at 69.85 77.47 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 82.55 198.12 0)
		(fields_autoplaced yes)
	)
	(label "PMB_SCL"
		(at 60.96 134.62 180)
		(fields_autoplaced yes)
	)
	(label "SCL"
		(at 34.29 134.62 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 110.49 158.75 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 248.92 93.98 0)
		(fields_autoplaced yes)
	)
	(label "PMB_ALRT"
		(at 118.11 109.22 0)
		(fields_autoplaced yes)
	)
	(label "SMB_ALRT"
		(at 27.94 139.7 0)
		(fields_autoplaced yes)
	)
	(label "AGND"
		(at 96.52 55.88 0)
		(fields_autoplaced yes)
	)
	(label "5V"
		(at 125.73 172.72 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 63.5 152.4 180)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 198.12 49.53 180)
		(fields_autoplaced yes)
	)
	(label "PMB_SDA"
		(at 118.11 104.14 0)
		(fields_autoplaced yes)
	)
	(label "3V3"
		(at 195.58 102.87 0)
		(fields_autoplaced yes)
	)
	(label "3V3"
		(at 167.64 146.05 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "3V3"
		(shape output)
		(at 139.7 146.05 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "VIN"
		(shape input)
		(at 21.59 20.32 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "SDA"
		(shape input)
		(at 31.75 129.54 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "VOUT"
		(shape input)
		(at 256.54 41.91 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "GND"
		(shape input)
		(at 254 93.98 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "SCL"
		(shape input)
		(at 31.75 134.62 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "1V8_IO"
		(shape output)
		(at 212.09 146.05 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "SMB_ALRT"
		(shape input)
		(at 26.67 139.7 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "5V"
		(shape output)
		(at 139.7 172.72 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "PGOOD"
		(shape output)
		(at 213.36 116.84 0)
		(fields_autoplaced yes)
	)
	(symbol
		(lib_id "Device:C")
		(at 179.07 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C23"
			(at 179.07 30.48 90)
		)
		(property "Value" "100nF"
			(at 179.07 38.1 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 182.88 33.3248 0)
		)
		(property "Datasheet" "~"
			(at 179.07 34.29 0)
		)
		(property "Description" ""
			(at 179.07 34.29 0)
		)
		(property "DK" "478-KGM21NR71E104KTCT-ND"
			(at 179.07 34.29 0)
		)
		(property "PARTNO" "KGM21NR71E104KT"
			(at 179.07 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C23")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Polarized")
		(at 248.92 67.31 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C30"
			(at 252.095 66.04 0)
		)
		(property "Value" "180uF"
			(at 252.095 68.58 0)
		)
		(property "Footprint" "Capacitor_SMD:CP_Elec_6.3x5.9"
			(at 249.8852 71.12 0)
		)
		(property "Datasheet" "https://industrial.panasonic.com/cdbs/www-data/pdf/AAB8000/AAB8000C177.pdf"
			(at 248.92 67.31 0)
		)
		(property "Description" ""
			(at 248.92 67.31 0)
		)
		(property "DK" "P16479CT-ND"
			(at 248.92 67.31 0)
		)
		(property "PARTNO" "16SVPF180M"
			(at 248.92 67.31 0)
		)
		(property "HEIGHT" "5.9mm"
			(at 248.92 67.31 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C30")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 44.45 139.7 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 41.91 137.795 90)
		)
		(property "Value" "0R"
			(at 46.99 137.795 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 44.704 138.684 90)
		)
		(property "Datasheet" "~"
			(at 44.45 139.7 0)
		)
		(property "Description" ""
			(at 44.45 139.7 0)
		)
		(property "DK" "311-0.0JRCT-ND"
			(at 44.45 139.7 0)
		)
		(property "PARTNO" "RC0402JR-070RL"
			(at 44.45 139.7 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 92.71 179.07 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 95.885 179.705 0)
		)
		(property "Value" "0.1uF"
			(at 95.885 182.245 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 92.71 179.07 0)
		)
		(property "Datasheet" ""
			(at 92.71 179.07 0)
		)
		(property "Description" ""
			(at 92.71 179.07 0)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 92.71 179.07 0)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 92.71 179.07 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C12")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:L")
		(at 198.12 41.91 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "L2"
			(at 194.945 40.005 90)
		)
		(property "Value" "680nH"
			(at 204.47 40.005 90)
		)
		(property "Footprint" "Inductor_SMD:L_Coilcraft_XAL1010-XXX"
			(at 198.12 41.91 0)
		)
		(property "Datasheet" "https://www.coilcraft.com/getmedia/dd74e670-e705-456a-9a69-585fe02eaf3c/xal1010.pdf"
			(at 198.12 41.91 0)
		)
		(property "Description" ""
			(at 198.12 41.91 0)
		)
		(property "PARTNO" "XAL1010-681MED"
			(at 198.12 41.91 90)
		)
		(property "DK" "2457-XAL1010-681MED-ND"
			(at 198.12 41.91 90)
		)
		(property "Mouser" "994-XAL1010-681MED"
			(at 198.12 41.91 90)
		)
		(property "HEIGHT" "10mm"
			(at 198.12 41.91 90)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "L2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 203.2 152.4 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C25"
			(at 204.47 150.495 0)
		)
		(property "Value" "1uF"
			(at 204.47 155.575 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 203.2 152.4 0)
		)
		(property "Datasheet" ""
			(at 203.2 152.4 0)
		)
		(property "Description" ""
			(at 203.2 152.4 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 203.2 152.4 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 203.2 152.4 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C25")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:LMR54410")
		(at 73.66 184.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U1"
			(at 73.66 172.72 0)
		)
		(property "Value" "LMR54410"
			(at 73.66 175.26 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23-6"
			(at 76.2 194.31 0)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/lmr54406.pdf"
			(at 73.66 198.12 0)
		)
		(property "Description" ""
			(at 73.66 184.15 0)
		)
		(property "DK" "296-LMR54410DBVRCT-ND"
			(at 73.66 173.99 0)
		)
		(property "PARTNO" "LMR54410FDBVR"
			(at 73.66 171.45 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(instances
			(project "bitaxeHex"
				(path
					(reference "U1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 44.45 129.54 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 41.91 127.635 90)
		)
		(property "Value" "0R"
			(at 46.99 127.635 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 44.704 128.524 90)
		)
		(property "Datasheet" "~"
			(at 44.45 129.54 0)
		)
		(property "Description" ""
			(at 44.45 129.54 0)
		)
		(property "DK" "311-0.0JRCT-ND"
			(at 44.45 129.54 0)
		)
		(property "PARTNO" "RC0402JR-070RL"
			(at 44.45 129.54 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 210.82 139.7 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP4"
			(at 217.17 139.7 90)
		)
		(property "Value" "TestPoint"
			(at 216.535 138.4301 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 210.82 134.62 0)
		)
		(property "Datasheet" "~"
			(at 210.82 134.62 0)
		)
		(property "Description" ""
			(at 210.82 139.7 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 194.31 86.36 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C24"
			(at 197.485 85.09 0)
		)
		(property "Value" "100pF"
			(at 197.485 87.63 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 195.2752 90.17 0)
		)
		(property "Datasheet" "~"
			(at 194.31 86.36 0)
		)
		(property "Description" ""
			(at 194.31 86.36 0)
		)
		(property "DK" "732-7431-1-ND"
			(at 194.31 86.36 0)
		)
		(property "PARTNO" "885012005013"
			(at 194.31 86.36 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C24")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 134.62 187.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C20"
			(at 138.43 186.69 0)
		)
		(property "Value" "10uF"
			(at 138.43 189.23 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 135.5852 191.77 0)
		)
		(property "Datasheet" "~"
			(at 134.62 187.96 0)
		)
		(property "Description" ""
			(at 134.62 187.96 0)
		)
		(property "DK" "490-18664-1-ND"
			(at 134.62 187.96 0)
		)
		(property "PARTNO" "GRM21BR61H106ME43L"
			(at 134.62 187.96 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C20")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 201.93 93.98 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R15"
			(at 203.2 91.44 90)
		)
		(property "Value" "49.9R"
			(at 204.47 96.52 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 202.184 92.964 90)
		)
		(property "Datasheet" "~"
			(at 201.93 93.98 0)
		)
		(property "Description" ""
			(at 201.93 93.98 0)
		)
		(property "DK" "311-49.9LRCT-ND"
			(at 201.93 93.98 0)
		)
		(property "PARTNO" "RC0402FR-0749R9L"
			(at 201.93 93.98 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R15")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 219.71 71.12 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C27"
			(at 223.52 69.85 0)
		)
		(property "Value" "47uF"
			(at 223.52 72.39 0)
		)
		(property "Footprint" "Capacitor_SMD:C_1210_3225Metric"
			(at 220.6752 74.93 0)
		)
		(property "Datasheet" "~"
			(at 219.71 71.12 0)
		)
		(property "Description" ""
			(at 219.71 71.12 0)
		)
		(property "DK" "490-6539-1-ND"
			(at 219.71 71.12 0)
		)
		(property "PARTNO" "GRM32ER61C476KE15L"
			(at 219.71 71.12 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C27")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 186.69 49.53 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R14"
			(at 187.96 46.99 90)
		)
		(property "Value" "1R"
			(at 187.325 52.07 90)
		)
		(property "Footprint" "Resistor_SMD:R_1206_3216Metric"
			(at 186.944 48.514 90)
		)
		(property "Datasheet" "~"
			(at 186.69 49.53 0)
		)
		(property "Description" ""
			(at 186.69 49.53 0)
		)
		(property "DK" "CSR1206FT1R00CT-ND"
			(at 186.69 49.53 0)
		)
		(property "PARTNO" "CSR1206FT1R00"
			(at 186.69 49.53 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R14")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 115.57 49.53 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R13"
			(at 117.475 48.26 0)
		)
		(property "Value" "10R"
			(at 117.475 50.8 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 116.586 49.784 90)
		)
		(property "Datasheet" "~"
			(at 115.57 49.53 0)
		)
		(property "Description" ""
			(at 115.57 49.53 0)
		)
		(property "DK" "311-10.0LRCT-ND"
			(at 115.57 49.53 0)
		)
		(property "PARTNO" "RC0402FR-0710RL"
			(at 115.57 49.53 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R13")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 44.45 134.62 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 41.91 132.715 90)
		)
		(property "Value" "0R"
			(at 46.99 132.715 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 44.704 133.604 90)
		)
		(property "Datasheet" "~"
			(at 44.45 134.62 0)
		)
		(property "Description" ""
			(at 44.45 134.62 0)
		)
		(property "DK" "311-0.0JRCT-ND"
			(at 44.45 134.62 0)
		)
		(property "PARTNO" "RC0402JR-070RL"
			(at 44.45 134.62 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:MIC5504")
		(at 185.42 147.32 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U4"
			(at 185.42 138.43 0)
		)
		(property "Value" "MIC5504"
			(at 185.42 140.97 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5_HandSoldering"
			(at 234.95 129.54 0)
		)
		(property "Datasheet" "https://www.digikey.com/en/products/detail/microchip-technology/MIC5504-1-8YM5-TR/5209404"
			(at 177.8 147.32 0)
		)
		(property "Description" ""
			(at 185.42 147.32 0)
		)
		(property "DK" "576-4879-1-ND"
			(at 185.42 147.32 0)
		)
		(property "PARTNO" "MIC5504-1.8YM5-TR"
			(at 185.42 147.32 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(instances
			(project "bitaxeHex"
				(path
					(reference "U4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 209.55 63.5 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C26"
			(at 212.725 62.23 0)
		)
		(property "Value" "2.2nF"
			(at 212.725 64.77 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 210.5152 67.31 0)
		)
		(property "Datasheet" "~"
			(at 209.55 63.5 0)
		)
		(property "Description" ""
			(at 209.55 63.5 0)
		)
		(property "DK" "490-8257-1-ND"
			(at 209.55 63.5 0)
		)
		(property "PARTNO" "GRM155R61H222KA01D"
			(at 209.55 63.5 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C26")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 57.15 105.41 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R5"
			(at 55.245 107.95 90)
		)
		(property "Value" "17.8K"
			(at 61.595 107.95 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 57.404 104.394 90)
		)
		(property "Datasheet" "~"
			(at 57.15 105.41 0)
		)
		(property "Description" ""
			(at 57.15 105.41 0)
		)
		(property "DK" "RMCF0402FT17K8CT-ND"
			(at 57.15 105.41 0)
		)
		(property "PARTNO" "RMCF0402FT17K8"
			(at 57.15 105.41 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 241.3 35.56 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP5"
			(at 247.65 35.56 90)
		)
		(property "Value" "TestPoint"
			(at 247.015 34.2901 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 241.3 30.48 0)
		)
		(property "Datasheet" "~"
			(at 241.3 30.48 0)
		)
		(property "Description" ""
			(at 241.3 35.56 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 110.49 27.94 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C16"
			(at 113.665 26.67 0)
		)
		(property "Value" "2.2nF"
			(at 113.665 29.21 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 111.4552 31.75 0)
		)
		(property "Datasheet" "~"
			(at 110.49 27.94 0)
		)
		(property "Description" ""
			(at 110.49 27.94 0)
		)
		(property "DK" "490-8257-1-ND"
			(at 110.49 27.94 0)
		)
		(property "PARTNO" "GRM155R61H222KA01D"
			(at 110.49 27.94 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C16")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:RT9080-33GJ5")
		(at 113.03 147.32 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U2"
			(at 113.03 138.938 0)
		)
		(property "Value" "RT9080-33GJ5"
			(at 113.03 141.478 0)
		)
		(property "Footprint" "bitaxe:RT9080-33GJ5"
			(at 162.56 129.54 0)
		)
		(property "Datasheet" "https://www.richtek.com/assets/product_file/RT9080/DS9080-05.pdf"
			(at 104.14 146.05 0)
		)
		(property "Description" ""
			(at 113.03 147.32 0)
		)
		(property "DK" "1028-1509-1-ND"
			(at 113.03 147.32 0)
		)
		(property "PARTNO" "RT9080-33GJ5"
			(at 113.03 147.32 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(instances
			(project "bitaxeHex"
				(path
					(reference "U2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 86.36 69.85 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R9"
			(at 80.01 68.58 0)
		)
		(property "Value" "1.37K"
			(at 78.74 71.12 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 87.376 70.104 90)
		)
		(property "Datasheet" "~"
			(at 86.36 69.85 0)
		)
		(property "Description" ""
			(at 86.36 69.85 0)
		)
		(property "DK" "YAG3035CT-ND"
			(at 86.36 69.85 0)
		)
		(property "PARTNO" "RC0402FR-071K37L"
			(at 86.36 69.85 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R9")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 109.22 191.77 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R12"
			(at 111.76 190.5 0)
		)
		(property "Value" "22.1k"
			(at 111.76 193.04 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 110.236 192.024 90)
		)
		(property "Datasheet" "~"
			(at 109.22 191.77 0)
		)
		(property "Description" ""
			(at 109.22 191.77 0)
		)
		(property "DK" "311-22.1KLRCT-ND"
			(at 109.22 191.77 0)
		)
		(property "PARTNO" "RC0402FR-0722K1L"
			(at 109.22 191.77 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R12")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 138.43 139.7 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP2"
			(at 144.78 139.7 90)
		)
		(property "Value" "TestPoint"
			(at 144.145 138.4301 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 138.43 134.62 0)
		)
		(property "Datasheet" "~"
			(at 138.43 134.62 0)
		)
		(property "Description" ""
			(at 138.43 139.7 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:net-tie")
		(at 144.78 125.73 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "T1"
			(at 140.97 120.65 0)
		)
		(property "Value" "net-tie"
			(at 144.78 123.19 0)
		)
		(property "Footprint" "bitaxe:Net-Tie-0.25mm"
			(at 143.51 127 0)
		)
		(property "Datasheet" ""
			(at 143.51 127 0)
		)
		(property "Description" ""
			(at 144.78 125.73 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "T1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 101.6 27.94 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C14"
			(at 104.775 26.67 0)
		)
		(property "Value" "1uF"
			(at 104.775 29.21 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 102.5652 31.75 0)
		)
		(property "Datasheet" "~"
			(at 101.6 27.94 0)
		)
		(property "Description" ""
			(at 101.6 27.94 0)
		)
		(property "DK" "587-1291-1-ND"
			(at 101.6 27.94 0)
		)
		(property "PARTNO" "TMK212BJ105KG-T"
			(at 101.6 27.94 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C14")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 76.2 110.49 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R7"
			(at 78.105 109.22 0)
		)
		(property "Value" "31.6K"
			(at 77.47 111.76 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 77.216 110.744 90)
		)
		(property "Datasheet" "~"
			(at 76.2 110.49 0)
		)
		(property "Description" ""
			(at 76.2 110.49 0)
		)
		(property "DK" "YAG3115CT-ND"
			(at 76.2 110.49 0)
		)
		(property "PARTNO" "RC0402FR-0731K6L"
			(at 76.2 110.49 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 165.1 152.4 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C21"
			(at 166.37 150.495 0)
		)
		(property "Value" "1uF"
			(at 166.37 155.575 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 165.1 152.4 0)
		)
		(property "Datasheet" ""
			(at 165.1 152.4 0)
		)
		(property "Description" ""
			(at 165.1 152.4 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 165.1 152.4 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 165.1 152.4 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C21")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 93.98 110.49 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R10"
			(at 95.885 109.22 0)
		)
		(property "Value" "26.1K"
			(at 95.885 111.76 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 94.996 110.744 90)
		)
		(property "Datasheet" "~"
			(at 93.98 110.49 0)
		)
		(property "Description" ""
			(at 93.98 110.49 0)
		)
		(property "DK" "311-26.1KLRCT-ND"
			(at 93.98 110.49 0)
		)
		(property "PARTNO" "RC0402FR-0726K1L"
			(at 93.98 110.49 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R10")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 109.22 180.34 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R11"
			(at 111.76 179.07 0)
		)
		(property "Value" "115k"
			(at 111.76 181.61 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 110.236 180.594 90)
		)
		(property "Datasheet" "~"
			(at 109.22 180.34 0)
		)
		(property "Description" ""
			(at 109.22 180.34 0)
		)
		(property "DK" "YAG2956CT-ND"
			(at 109.22 180.34 0)
		)
		(property "PARTNO" "RC0402FR-07115KL"
			(at 109.22 180.34 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R11")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 46.99 27.94 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C4"
			(at 50.165 26.67 0)
		)
		(property "Value" "22uF"
			(at 50.165 29.21 0)
		)
		(property "Footprint" "Capacitor_SMD:C_1210_3225Metric"
			(at 47.9552 31.75 0)
		)
		(property "Datasheet" "~"
			(at 46.99 27.94 0)
		)
		(property "Description" ""
			(at 46.99 27.94 0)
		)
		(property "DK" "490-3889-1-ND"
			(at 46.99 27.94 0)
		)
		(property "PARTNO" "GRM32ER61E226KE15L"
			(at 46.99 27.94 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 203.2 54.61 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R16"
			(at 196.85 53.34 0)
		)
		(property "Value" "1.37K"
			(at 195.58 55.88 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 204.216 54.864 90)
		)
		(property "Datasheet" "~"
			(at 203.2 54.61 0)
		)
		(property "Description" ""
			(at 203.2 54.61 0)
		)
		(property "DK" "YAG3035CT-ND"
			(at 203.2 54.61 0)
		)
		(property "PARTNO" "RC0402FR-071K37L"
			(at 203.2 54.61 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R16")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 245.11 99.06 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP6"
			(at 251.46 99.06 90)
		)
		(property "Value" "TestPoint"
			(at 250.825 97.7901 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 245.11 93.98 0)
		)
		(property "Datasheet" "~"
			(at 245.11 93.98 0)
		)
		(property "Description" ""
			(at 245.11 99.06 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 57.15 27.94 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7"
			(at 60.325 26.67 0)
		)
		(property "Value" "22uF"
			(at 60.325 29.21 0)
		)
		(property "Footprint" "Capacitor_SMD:C_1210_3225Metric"
			(at 58.1152 31.75 0)
		)
		(property "Datasheet" "~"
			(at 57.15 27.94 0)
		)
		(property "Description" ""
			(at 57.15 27.94 0)
		)
		(property "DK" "490-3889-1-ND"
			(at 57.15 27.94 0)
		)
		(property "PARTNO" "GRM32ER61E226KE15L"
			(at 57.15 27.94 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 121.92 187.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C18"
			(at 125.73 186.69 0)
		)
		(property "Value" "10uF"
			(at 125.73 189.23 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 122.8852 191.77 0)
		)
		(property "Datasheet" "~"
			(at 121.92 187.96 0)
		)
		(property "Description" ""
			(at 121.92 187.96 0)
		)
		(property "DK" "490-18664-1-ND"
			(at 121.92 187.96 0)
		)
		(property "PARTNO" "GRM21BR61H106ME43L"
			(at 121.92 187.96 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C18")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:L")
		(at 101.6 172.72 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "L1"
			(at 102.235 170.815 90)
		)
		(property "Value" "8.2 uH"
			(at 102.87 174.625 90)
		)
		(property "Footprint" "bitaxe:74438357082"
			(at 101.6 172.72 0)
		)
		(property "Datasheet" "https://www.we-online.com/components/products/datasheet/74438357082.pdf"
			(at 101.6 172.72 0)
		)
		(property "Description" ""
			(at 101.6 172.72 0)
		)
		(property "PARTNO" "78438357082"
			(at 101.6 172.72 90)
		)
		(property "DK" "732-11745-1-ND"
			(at 101.6 172.72 90)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "L1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 67.31 110.49 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 72.39 109.22 0)
		)
		(property "Value" "10k"
			(at 72.39 111.76 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 66.294 110.236 90)
		)
		(property "Datasheet" ""
			(at 67.31 110.49 0)
		)
		(property "Description" ""
			(at 67.31 110.49 0)
		)
		(property "DK" "RMCF0402FT10K0CT-ND"
			(at 67.31 110.49 0)
		)
		(property "PARTNO" "RMCF0402FT10K0"
			(at 67.31 110.49 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 203.2 109.22 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R7"
			(at 205.105 107.95 0)
		)
		(property "Value" "10k"
			(at 205.105 110.49 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 202.184 108.966 90)
		)
		(property "Datasheet" "~"
			(at 203.2 109.22 0)
		)
		(property "Description" ""
			(at 203.2 109.22 0)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 203.2 109.22 0)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 203.2 109.22 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "esp32"
				(path
					(reference "R7")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R17")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 86.36 55.88 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R8"
			(at 80.01 54.61 0)
		)
		(property "Value" "12.7K"
			(at 78.74 57.15 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 87.376 56.134 90)
		)
		(property "Datasheet" "~"
			(at 86.36 55.88 0)
		)
		(property "Description" ""
			(at 86.36 55.88 0)
		)
		(property "DK" "YAG2964CT-ND"
			(at 86.36 55.88 0)
		)
		(property "PARTNO" "RC0402FR-0712K7L"
			(at 86.36 55.88 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 175.26 49.53 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C22"
			(at 175.26 45.72 90)
		)
		(property "Value" "1nF"
			(at 175.26 53.34 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 179.07 48.5648 0)
		)
		(property "Datasheet" "~"
			(at 175.26 49.53 0)
		)
		(property "Description" ""
			(at 175.26 49.53 0)
		)
		(property "DK" "311-1127-1-ND"
			(at 175.26 49.53 0)
		)
		(property "PARTNO" "CC0805KRX7R9BB102"
			(at 175.26 49.53 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C22")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 68.58 27.94 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C8"
			(at 71.755 26.67 0)
		)
		(property "Value" "22uF"
			(at 71.755 29.21 0)
		)
		(property "Footprint" "Capacitor_SMD:C_1210_3225Metric"
			(at 69.5452 31.75 0)
		)
		(property "Datasheet" "~"
			(at 68.58 27.94 0)
		)
		(property "Description" ""
			(at 68.58 27.94 0)
		)
		(property "DK" "490-3889-1-ND"
			(at 68.58 27.94 0)
		)
		(property "PARTNO" "GRM32ER61E226KE15L"
			(at 68.58 27.94 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 52.07 180.34 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 50.165 177.165 0)
		)
		(property "Value" "0.1uF"
			(at 50.8 182.245 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 52.07 180.34 0)
		)
		(property "Datasheet" ""
			(at 52.07 180.34 0)
		)
		(property "Description" ""
			(at 52.07 180.34 0)
		)
		(property "DK" "478-KGM15BR71H104KTCT-ND"
			(at 52.07 180.34 0)
		)
		(property "PARTNO" "KGM15BR71H104KT"
			(at 52.07 180.34 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 107.95 55.88 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C15"
			(at 107.95 52.07 90)
		)
		(property "Value" "1uF"
			(at 107.95 59.69 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 111.76 54.9148 0)
		)
		(property "Datasheet" "~"
			(at 107.95 55.88 0)
		)
		(property "Description" ""
			(at 107.95 55.88 0)
		)
		(property "DK" "587-1291-1-ND"
			(at 107.95 55.88 0)
		)
		(property "PARTNO" "TMK212BJ105KG-T"
			(at 107.95 55.88 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C15")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 92.71 152.4 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C11"
			(at 93.98 150.495 0)
		)
		(property "Value" "1uF"
			(at 93.98 155.575 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 92.71 152.4 0)
		)
		(property "Datasheet" ""
			(at 92.71 152.4 0)
		)
		(property "Description" ""
			(at 92.71 152.4 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 92.71 152.4 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 92.71 152.4 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C11")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Polarized")
		(at 34.29 27.94 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C10"
			(at 37.465 26.67 0)
		)
		(property "Value" "180uF"
			(at 37.465 29.21 0)
		)
		(property "Footprint" "Capacitor_SMD:CP_Elec_6.3x5.9"
			(at 35.2552 31.75 0)
		)
		(property "Datasheet" "https://industrial.panasonic.com/cdbs/www-data/pdf/AAB8000/AAB8000C177.pdf"
			(at 34.29 27.94 0)
		)
		(property "Description" ""
			(at 34.29 27.94 0)
		)
		(property "DK" "P16479CT-ND"
			(at 34.29 27.94 0)
		)
		(property "PARTNO" "16SVPF180M"
			(at 34.29 27.94 0)
		)
		(property "HEIGHT" "5.9mm"
			(at 34.29 27.94 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C10")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector_Generic:Conn_02x05_Odd_Even")
		(at 41.91 152.4 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "J3"
			(at 43.18 144.145 0)
		)
		(property "Value" "Conn_02x05_Odd_Even"
			(at 43.18 144.145 0)
		)
		(property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_2x05_P2.54mm_Vertical"
			(at 41.91 152.4 0)
		)
		(property "Datasheet" "~"
			(at 41.91 152.4 0)
		)
		(property "Description" ""
			(at 41.91 152.4 0)
		)
		(pin "1")
		(pin "10")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "bitaxeHex"
				(path
					(reference "J3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 43.18 180.34 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C3"
			(at 37.465 177.8 0)
		)
		(property "Value" "10uF"
			(at 36.83 182.88 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 44.1452 184.15 0)
		)
		(property "Datasheet" "~"
			(at 43.18 180.34 0)
		)
		(property "Description" ""
			(at 43.18 180.34 0)
		)
		(property "DK" "490-18664-1-ND"
			(at 43.18 180.34 0)
		)
		(property "PARTNO" "GRM21BR61H106ME43L"
			(at 43.18 180.34 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 78.74 27.94 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C9"
			(at 81.915 26.67 0)
		)
		(property "Value" "22uF"
			(at 81.915 29.21 0)
		)
		(property "Footprint" "Capacitor_SMD:C_1210_3225Metric"
			(at 79.7052 31.75 0)
		)
		(property "Datasheet" "~"
			(at 78.74 27.94 0)
		)
		(property "Description" ""
			(at 78.74 27.94 0)
		)
		(property "DK" "490-3889-1-ND"
			(at 78.74 27.94 0)
		)
		(property "PARTNO" "GRM32ER61E226KE15L"
			(at 78.74 27.94 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C9")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 120.65 73.66 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C17"
			(at 123.825 72.39 0)
		)
		(property "Value" "4.7uF"
			(at 123.825 74.93 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 121.6152 77.47 0)
		)
		(property "Datasheet" "~"
			(at 120.65 73.66 0)
		)
		(property "Description" ""
			(at 120.65 73.66 0)
		)
		(property "DK" "490-14306-1-ND"
			(at 120.65 73.66 0)
		)
		(property "PARTNO" "GRM155R61A475MEAAD"
			(at 120.65 73.66 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C17")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:TPS546D24")
		(at 144.78 77.47 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U3"
			(at 144.78 31.75 0)
		)
		(property "Value" "TPS546D24ARVFR"
			(at 144.78 34.29 0)
		)
		(property "Footprint" "bitaxe:LQFN40-CLIP"
			(at 144.78 50.8 0)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tps546d24a.pdf"
			(at 144.78 38.1 0)
		)
		(property "Description" ""
			(at 144.78 77.47 0)
		)
		(property "DK" "296-TPS546D24ARVFRCT-ND"
			(at 144.78 35.56 0)
		)
		(property "PARTNO" "TPS546D24ARVFR"
			(at 144.78 33.02 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "17")
		(pin "18")
		(pin "19")
		(pin "2")
		(pin "20")
		(pin "21")
		(pin "22")
		(pin "23")
		(pin "24")
		(pin "25")
		(pin "26")
		(pin "27")
		(pin "28")
		(pin "29")
		(pin "3")
		(pin "30")
		(pin "31")
		(pin "32")
		(pin "33")
		(pin "34")
		(pin "35")
		(pin "36")
		(pin "37")
		(pin "38")
		(pin "39")
		(pin "4")
		(pin "40")
		(pin "41")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "bitaxeHex"
				(path
					(reference "U3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 90.17 27.94 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C2"
			(at 93.98 26.6699 0)
		)
		(property "Value" "4.7nF"
			(at 93.98 29.2099 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 91.1352 31.75 0)
		)
		(property "Datasheet" "~"
			(at 90.17 27.94 0)
		)
		(property "Description" ""
			(at 90.17 27.94 0)
		)
		(property "DK" "490-1309-1-ND"
			(at 90.17 27.94 0)
		)
		(property "PARTNO" "GRM155R71E472KA01D"
			(at 90.17 27.94 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 229.87 63.5 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C28"
			(at 233.68 62.23 0)
		)
		(property "Value" "47uF"
			(at 233.68 64.77 0)
		)
		(property "Footprint" "Capacitor_SMD:C_1210_3225Metric"
			(at 230.8352 67.31 0)
		)
		(property "Datasheet" "~"
			(at 229.87 63.5 0)
		)
		(property "Description" ""
			(at 229.87 63.5 0)
		)
		(property "DK" "490-6539-1-ND"
			(at 229.87 63.5 0)
		)
		(property "PARTNO" "GRM32ER61C476KE15L"
			(at 229.87 63.5 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C28")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 96.52 69.85 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C13"
			(at 99.695 68.58 0)
		)
		(property "Value" "100nF"
			(at 99.695 71.12 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 97.4852 73.66 0)
		)
		(property "Datasheet" "~"
			(at 96.52 69.85 0)
		)
		(property "Description" ""
			(at 96.52 69.85 0)
		)
		(property "DK" "490-6321-1-ND"
			(at 96.52 69.85 0)
		)
		(property "PARTNO" "GRM155R71A104KA01D"
			(at 96.52 69.85 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C13")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 57.15 92.71 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R4"
			(at 55.245 95.25 90)
		)
		(property "Value" "17.8K"
			(at 62.23 95.25 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 57.404 91.694 90)
		)
		(property "Datasheet" "~"
			(at 57.15 92.71 0)
		)
		(property "Description" ""
			(at 57.15 92.71 0)
		)
		(property "DK" "RMCF0402FT17K8CT-ND"
			(at 57.15 92.71 0)
		)
		(property "PARTNO" "RMCF0402FT17K8"
			(at 57.15 92.71 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 33.02 180.34 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C1"
			(at 26.67 177.8 0)
		)
		(property "Value" "10uF"
			(at 26.67 182.88 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 33.9852 184.15 0)
		)
		(property "Datasheet" "~"
			(at 33.02 180.34 0)
		)
		(property "Description" ""
			(at 33.02 180.34 0)
		)
		(property "DK" "490-18664-1-ND"
			(at 33.02 180.34 0)
		)
		(property "PARTNO" "GRM21BR61H106ME43L"
			(at 33.02 180.34 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 48.26 111.76 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5"
			(at 41.91 110.49 0)
		)
		(property "Value" "1uF"
			(at 40.64 113.03 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 49.2252 115.57 0)
		)
		(property "Datasheet" "~"
			(at 48.26 111.76 0)
		)
		(property "Description" ""
			(at 48.26 111.76 0)
		)
		(property "DK" "490-1550-1-ND"
			(at 48.26 111.76 0)
		)
		(property "PARTNO" "GRM188R60J105KA01D"
			(at 48.26 111.76 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 130.81 152.4 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C19"
			(at 132.08 150.495 0)
		)
		(property "Value" "1uF"
			(at 132.08 155.575 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 130.81 152.4 0)
		)
		(property "Datasheet" ""
			(at 130.81 152.4 0)
		)
		(property "Description" ""
			(at 130.81 152.4 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 130.81 152.4 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 130.81 152.4 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C19")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 101.6 93.98 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP1"
			(at 95.25 93.98 90)
		)
		(property "Value" "TestPoint"
			(at 95.885 95.2499 90)
		)
		(property "Footprint" "bitaxe:TestPoint_Pad_D0.8mm"
			(at 101.6 99.06 0)
		)
		(property "Datasheet" "~"
			(at 101.6 99.06 0)
		)
		(property "Description" ""
			(at 101.6 93.98 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 240.03 71.12 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C29"
			(at 243.078 69.85 0)
		)
		(property "Value" "47uF"
			(at 242.824 72.39 0)
		)
		(property "Footprint" "Capacitor_SMD:C_1210_3225Metric"
			(at 240.9952 74.93 0)
		)
		(property "Datasheet" "~"
			(at 240.03 71.12 0)
		)
		(property "Description" ""
			(at 240.03 71.12 0)
		)
		(property "DK" "490-6539-1-ND"
			(at 240.03 71.12 0)
		)
		(property "PARTNO" "GRM32ER61C476KE15L"
			(at 240.03 71.12 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C29")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 139.7 180.34 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP3"
			(at 146.05 180.34 90)
		)
		(property "Value" "TestPoint"
			(at 145.415 179.0701 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 139.7 175.26 0)
		)
		(property "Datasheet" "~"
			(at 139.7 175.26 0)
		)
		(property "Description" ""
			(at 139.7 180.34 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP3")
					(unit 1)
				)
			)
		)
	)
)