(kicad_sch
	(version 20231120)
	(generator "eeschema")
	(generator_version "8.0")
	(paper "A")
	(title_block
		(title "bitaxeHex")
		(date "2024-03-09")
		(rev "303")
	)
	(lib_symbols
		(symbol "Connector:TestPoint"
			(pin_numbers hide)
			(pin_names
				(offset 0.762) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "TP"
				(at 0 6.858 0)
			)
			(property "Value" "TestPoint"
				(at 0 5.08 0)
			)
			(property "Footprint" ""
				(at 5.08 0 0)
			)
			(property "Datasheet" "~"
				(at 5.08 0 0)
			)
			(property "Description" "test point"
				(at 0 0 0)
			)
			(property "ki_keywords" "test point tp"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Pin* Test*"
				(at 0 0 0)
			)
			(symbol "TestPoint_0_1"
				(circle
					(center 0 3.302)
					(radius 0.762)
					(fill
						(type none)
					)
				)
			)
			(symbol "TestPoint_1_1"
				(pin passive line
					(at 0 0 90)
					(length 2.54)
					(name "1")
					(number "1")
				)
			)
		)
		(symbol "Connector:USB_C_Receptacle_USB2.0"
			(pin_names
				(offset 1.016)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "J"
				(at -10.16 19.05 0)
			)
			(property "Value" "USB_C_Receptacle_USB2.0"
				(at 19.05 19.05 0)
			)
			(property "Footprint" ""
				(at 3.81 0 0)
			)
			(property "Datasheet" "https://www.usb.org/sites/default/files/documents/usb_type-c.zip"
				(at 3.81 0 0)
			)
			(property "Description" "USB 2.0-only Type-C Receptacle connector"
				(at 0 0 0)
			)
			(property "ki_keywords" "usb universal serial bus type-C USB2.0"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "USB*C*Receptacle*"
				(at 0 0 0)
			)
			(symbol "USB_C_Receptacle_USB2.0_0_0"
				(rectangle
					(start -0.254 -17.78)
					(end 0.254 -16.764)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 10.16 -14.986)
					(end 9.144 -15.494)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 10.16 -12.446)
					(end 9.144 -12.954)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 10.16 -4.826)
					(end 9.144 -5.334)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 10.16 -2.286)
					(end 9.144 -2.794)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 10.16 0.254)
					(end 9.144 -0.254)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 10.16 2.794)
					(end 9.144 2.286)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 10.16 7.874)
					(end 9.144 7.366)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 10.16 10.414)
					(end 9.144 9.906)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 10.16 15.494)
					(end 9.144 14.986)
					(fill
						(type none)
					)
				)
			)
			(symbol "USB_C_Receptacle_USB2.0_0_1"
				(rectangle
					(start -10.16 17.78)
					(end 10.16 -17.78)
					(fill
						(type background)
					)
				)
				(arc
					(start -8.89 -3.81)
					(mid -6.985 -5.7067)
					(end -5.08 -3.81)
					(fill
						(type none)
					)
				)
				(arc
					(start -7.62 -3.81)
					(mid -6.985 -4.4423)
					(end -6.35 -3.81)
					(fill
						(type none)
					)
				)
				(arc
					(start -7.62 -3.81)
					(mid -6.985 -4.4423)
					(end -6.35 -3.81)
					(fill
						(type outline)
					)
				)
				(rectangle
					(start -7.62 -3.81)
					(end -6.35 3.81)
					(fill
						(type outline)
					)
				)
				(arc
					(start -6.35 3.81)
					(mid -6.985 4.4423)
					(end -7.62 3.81)
					(fill
						(type none)
					)
				)
				(arc
					(start -6.35 3.81)
					(mid -6.985 4.4423)
					(end -7.62 3.81)
					(fill
						(type outline)
					)
				)
				(arc
					(start -5.08 3.81)
					(mid -6.985 5.7067)
					(end -8.89 3.81)
					(fill
						(type none)
					)
				)
				(circle
					(center -2.54 1.143)
					(radius 0.635)
					(fill
						(type outline)
					)
				)
				(circle
					(center 0 -5.842)
					(radius 1.27)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy -8.89 -3.81) (xy -8.89 3.81)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -5.08 3.81) (xy -5.08 -3.81)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -5.842) (xy 0 4.318)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -3.302) (xy -2.54 -0.762) (xy -2.54 0.508)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -2.032) (xy 2.54 0.508) (xy 2.54 1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 4.318) (xy 0 6.858) (xy 1.27 4.318) (xy -1.27 4.318)
					)
					(fill
						(type outline)
					)
				)
				(rectangle
					(start 1.905 1.778)
					(end 3.175 3.048)
					(fill
						(type outline)
					)
				)
			)
			(symbol "USB_C_Receptacle_USB2.0_1_1"
				(pin passive line
					(at 0 -22.86 90)
					(length 5.08)
					(name "GND")
					(number "A1")
				)
				(pin passive line
					(at 0 -22.86 90)
					(length 5.08) hide
					(name "GND")
					(number "A12")
				)
				(pin passive line
					(at 15.24 15.24 180)
					(length 5.08)
					(name "VBUS")
					(number "A4")
				)
				(pin bidirectional line
					(at 15.24 10.16 180)
					(length 5.08)
					(name "CC1")
					(number "A5")
				)
				(pin bidirectional line
					(at 15.24 -2.54 180)
					(length 5.08)
					(name "D+")
					(number "A6")
				)
				(pin bidirectional line
					(at 15.24 2.54 180)
					(length 5.08)
					(name "D-")
					(number "A7")
				)
				(pin bidirectional line
					(at 15.24 -12.7 180)
					(length 5.08)
					(name "SBU1")
					(number "A8")
				)
				(pin passive line
					(at 15.24 15.24 180)
					(length 5.08) hide
					(name "VBUS")
					(number "A9")
				)
				(pin passive line
					(at 0 -22.86 90)
					(length 5.08) hide
					(name "GND")
					(number "B1")
				)
				(pin passive line
					(at 0 -22.86 90)
					(length 5.08) hide
					(name "GND")
					(number "B12")
				)
				(pin passive line
					(at 15.24 15.24 180)
					(length 5.08) hide
					(name "VBUS")
					(number "B4")
				)
				(pin bidirectional line
					(at 15.24 7.62 180)
					(length 5.08)
					(name "CC2")
					(number "B5")
				)
				(pin bidirectional line
					(at 15.24 -5.08 180)
					(length 5.08)
					(name "D+")
					(number "B6")
				)
				(pin bidirectional line
					(at 15.24 0 180)
					(length 5.08)
					(name "D-")
					(number "B7")
				)
				(pin bidirectional line
					(at 15.24 -15.24 180)
					(length 5.08)
					(name "SBU2")
					(number "B8")
				)
				(pin passive line
					(at 15.24 15.24 180)
					(length 5.08) hide
					(name "VBUS")
					(number "B9")
				)
				(pin passive line
					(at -7.62 -22.86 90)
					(length 5.08)
					(name "SHIELD")
					(number "S1")
				)
			)
		)
		(symbol "Connector_Generic:Conn_01x04"
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "J"
				(at 0 5.08 0)
			)
			(property "Value" "Conn_01x04"
				(at 0 -7.62 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Generic connector, single row, 01x04, script generated (kicad-library-utils/schlib/autogen/connector/)"
				(at 0 0 0)
			)
			(property "ki_keywords" "connector"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Connector*:*_1x??_*"
				(at 0 0 0)
			)
			(symbol "Conn_01x04_1_1"
				(rectangle
					(start -1.27 -4.953)
					(end 0 -5.207)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 -2.413)
					(end 0 -2.667)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 0.127)
					(end 0 -0.127)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 2.667)
					(end 0 2.413)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 3.81)
					(end 1.27 -6.35)
					(fill
						(type background)
					)
				)
				(pin passive line
					(at -5.08 2.54 0)
					(length 3.81)
					(name "Pin_1")
					(number "1")
				)
				(pin passive line
					(at -5.08 0 0)
					(length 3.81)
					(name "Pin_2")
					(number "2")
				)
				(pin passive line
					(at -5.08 -2.54 0)
					(length 3.81)
					(name "Pin_3")
					(number "3")
				)
				(pin passive line
					(at -5.08 -5.08 0)
					(length 3.81)
					(name "Pin_4")
					(number "4")
				)
			)
		)
		(symbol "Connector_Generic:Conn_01x06"
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "J"
				(at 0 7.62 0)
			)
			(property "Value" "Conn_01x06"
				(at 0 -10.16 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Generic connector, single row, 01x06, script generated (kicad-library-utils/schlib/autogen/connector/)"
				(at 0 0 0)
			)
			(property "ki_keywords" "connector"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Connector*:*_1x??_*"
				(at 0 0 0)
			)
			(symbol "Conn_01x06_1_1"
				(rectangle
					(start -1.27 -7.493)
					(end 0 -7.747)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 -4.953)
					(end 0 -5.207)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 -2.413)
					(end 0 -2.667)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 0.127)
					(end 0 -0.127)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 2.667)
					(end 0 2.413)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 5.207)
					(end 0 4.953)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 6.35)
					(end 1.27 -8.89)
					(fill
						(type background)
					)
				)
				(pin passive line
					(at -5.08 5.08 0)
					(length 3.81)
					(name "Pin_1")
					(number "1")
				)
				(pin passive line
					(at -5.08 2.54 0)
					(length 3.81)
					(name "Pin_2")
					(number "2")
				)
				(pin passive line
					(at -5.08 0 0)
					(length 3.81)
					(name "Pin_3")
					(number "3")
				)
				(pin passive line
					(at -5.08 -2.54 0)
					(length 3.81)
					(name "Pin_4")
					(number "4")
				)
				(pin passive line
					(at -5.08 -5.08 0)
					(length 3.81)
					(name "Pin_5")
					(number "5")
				)
				(pin passive line
					(at -5.08 -7.62 0)
					(length 3.81)
					(name "Pin_6")
					(number "6")
				)
			)
		)
		(symbol "Device:C"
			(pin_numbers hide)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Unpolarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C_*"
				(at 0 0 0)
			)
			(symbol "C_0_1"
				(polyline
					(pts
						(xy -2.032 -0.762) (xy 2.032 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.032 0.762) (xy 2.032 0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:Crystal"
			(pin_numbers hide)
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "Y"
				(at 0 3.81 0)
			)
			(property "Value" "Crystal"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Two pin crystal"
				(at 0 0 0)
			)
			(property "ki_keywords" "quartz ceramic resonator oscillator"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Crystal*"
				(at 0 0 0)
			)
			(symbol "Crystal_0_1"
				(rectangle
					(start -1.143 2.54)
					(end 1.143 -2.54)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.54 0) (xy -1.905 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.905 -1.27) (xy -1.905 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.905 -1.27) (xy 1.905 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 0) (xy 1.905 0)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "Crystal_1_1"
				(pin passive line
					(at -3.81 0 0)
					(length 1.27)
					(name "1")
					(number "1")
				)
				(pin passive line
					(at 3.81 0 180)
					(length 1.27)
					(name "2")
					(number "2")
				)
			)
		)
		(symbol "Device:R_US"
			(pin_numbers hide)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 2.54 0 90)
			)
			(property "Value" "R_US"
				(at -2.54 0 90)
			)
			(property "Footprint" ""
				(at 1.016 -0.254 90)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Resistor, US symbol"
				(at 0 0 0)
			)
			(property "ki_keywords" "R res resistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R_US_0_1"
				(polyline
					(pts
						(xy 0 -2.286) (xy 0 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.286) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -0.762) (xy 1.016 -1.143) (xy 0 -1.524) (xy -1.016 -1.905) (xy 0 -2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0.762) (xy 1.016 0.381) (xy 0 0) (xy -1.016 -0.381) (xy 0 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.286) (xy 1.016 1.905) (xy 0 1.524) (xy -1.016 1.143) (xy 0 0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_US_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "bitaxe:ESP32-S3-WROOM-1"
			(pin_names
				(offset 1.016)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U12"
				(at -50.8 34.925 0)
			)
			(property "Value" "ESP32-S3-WROOM-1"
				(at 45.72 34.925 0)
			)
			(property "Footprint" "Espressif:ESP32-S3-WROOM-1"
				(at 0 -33.02 0)
			)
			(property "Datasheet" "https://www.espressif.com/sites/default/files/documentation/esp32-s3-wroom-1_wroom-1u_datasheet_en.pdf"
				(at 0 -35.56 0)
			)
			(property "Description" "2.4 GHz WiFi (802.11 b/g/n) and Bluetooth ® 5 (LE) module Built around ESP32S3 series of SoCs, Xtensa ® dualcore 32bit LX7 microprocessor Flash up to 16 MB, PSRAM up to 8 MB 36 GPIOs, rich set of peripherals Onboard PCB antenna"
				(at 0 0 0)
			)
			(property "DK" "1965-ESP32-S3-WROOM-1-N16R8CT-ND"
				(at 0 0 0)
			)
			(property "PARTNO" "ESP32-S3-WROOM-1-N16R8"
				(at 0 0 0)
			)
			(symbol "ESP32-S3-WROOM-1_0_0"
				(rectangle
					(start -53.34 33.02)
					(end 55.88 -30.48)
					(fill
						(type background)
					)
				)
				(text "ESP32-S3-WROOM-1"
					(at 0 -25.4 0)
				)
				(pin power_in line
					(at 58.42 -27.94 180)
					(length 2.54)
					(name "GND")
					(number "1")
				)
				(pin bidirectional line
					(at -55.88 -17.78 0)
					(length 2.54)
					(name "GPIO17/U1TXD/ADC2_CH6")
					(number "10")
				)
				(pin bidirectional line
					(at -55.88 -20.32 0)
					(length 2.54)
					(name "GPIO18/U1RXD/ADC2_CH7/CLK_OUT3")
					(number "11")
				)
				(pin bidirectional line
					(at -55.88 5.08 0)
					(length 2.54)
					(name "GPIO8/TOUCH8/ADC1_CH7/SUBSPICS1")
					(number "12")
				)
				(pin bidirectional line
					(at 58.42 27.94 180)
					(length 2.54)
					(name "GPIO19/U1RTS/ADC2_CH8/CLK_OUT2/USB_D-")
					(number "13")
				)
				(pin bidirectional line
					(at 58.42 30.48 180)
					(length 2.54)
					(name "GPIO20/U1CTS/ADC2_CH9/CLK_OUT1/USB_D+")
					(number "14")
				)
				(pin bidirectional line
					(at -55.88 17.78 0)
					(length 2.54)
					(name "GPIO3/TOUCH3/ADC1_CH2*")
					(number "15")
				)
				(pin bidirectional line
					(at 58.42 10.16 180)
					(length 2.54)
					(name "*GPIO46")
					(number "16")
				)
				(pin bidirectional line
					(at -55.88 2.54 0)
					(length 2.54)
					(name "GPIO9/TOUCH9/ADC1_CH8/FSPIHD/SUBSPIHD")
					(number "17")
				)
				(pin bidirectional line
					(at -55.88 0 0)
					(length 2.54)
					(name "GPIO10/TOUCH10/ADC1_CH9/FSPICS0/FSPIIO4/SUBSPICS0")
					(number "18")
				)
				(pin bidirectional line
					(at -55.88 -2.54 0)
					(length 2.54)
					(name "GPIO11/TOUCH11/ADC2_CH0/FSPID/FSPIIO5/SUBSPID")
					(number "19")
				)
				(pin power_in line
					(at -55.88 -27.94 0)
					(length 2.54)
					(name "3V3")
					(number "2")
				)
				(pin bidirectional line
					(at -55.88 -5.08 0)
					(length 2.54)
					(name "GPIO12/TOUCH12/ADC2_CH1/FSPICLK/FSPIIO6/SUBSPICLK")
					(number "20")
				)
				(pin bidirectional line
					(at -55.88 -7.62 0)
					(length 2.54)
					(name "GPIO13/TOUCH13/ADC2_CH2/FSPIQ/FSPIIO7/SUBSPIQ")
					(number "21")
				)
				(pin bidirectional line
					(at -55.88 -10.16 0)
					(length 2.54)
					(name "GPIO14/TOUCH14/ADC2_CH3/FSPIWP/FSPIDQS/SUBSPIWP")
					(number "22")
				)
				(pin bidirectional line
					(at 58.42 15.24 180)
					(length 2.54)
					(name "GPIO21")
					(number "23")
				)
				(pin bidirectional line
					(at 58.42 5.08 180)
					(length 2.54)
					(name "GPIO47/SPICLK_P/SUBSPICLK_P_DIFF")
					(number "24")
				)
				(pin bidirectional line
					(at 58.42 7.62 180)
					(length 2.54)
					(name "GPIO48/SPICLK_N/SUBSPICLK_N_DIFF")
					(number "25")
				)
				(pin bidirectional line
					(at 58.42 12.7 180)
					(length 2.54)
					(name "*GPIO45")
					(number "26")
				)
				(pin bidirectional line
					(at -55.88 30.48 0)
					(length 2.54)
					(name "GPIO0/BOOT*")
					(number "27")
				)
				(pin bidirectional line
					(at 58.42 -2.54 180)
					(length 2.54)
					(name "SPIIO6/GPIO35/FSPID/SUBSPID")
					(number "28")
				)
				(pin bidirectional line
					(at 58.42 -5.08 180)
					(length 2.54)
					(name "SPIIO7/GPIO36/FSPICLK/SUBSPICLK")
					(number "29")
				)
				(pin input line
					(at -55.88 27.94 0)
					(length 2.54)
					(name "EN")
					(number "3")
				)
				(pin bidirectional line
					(at 58.42 -7.62 180)
					(length 2.54)
					(name "SPIDQS/GPIO37/FSPIQ/SUBSPIQ")
					(number "30")
				)
				(pin bidirectional line
					(at 58.42 -10.16 180)
					(length 2.54)
					(name "GPIO38/FSPIWP/SUBSPIWP")
					(number "31")
				)
				(pin bidirectional line
					(at 58.42 -12.7 180)
					(length 2.54)
					(name "MTCK/GPIO39/CLK_OUT3/SUBSPICS1")
					(number "32")
				)
				(pin bidirectional line
					(at 58.42 -15.24 180)
					(length 2.54)
					(name "MTDO/GPIO40/CLK_OUT2")
					(number "33")
				)
				(pin bidirectional line
					(at 58.42 -17.78 180)
					(length 2.54)
					(name "MTDI/GPIO41/CLK_OUT1")
					(number "34")
				)
				(pin bidirectional line
					(at 58.42 -20.32 180)
					(length 2.54)
					(name "MTMS/GPIO42")
					(number "35")
				)
				(pin bidirectional line
					(at 58.42 17.78 180)
					(length 2.54)
					(name "U0RXD/GPIO44/CLK_OUT2")
					(number "36")
				)
				(pin bidirectional line
					(at 58.42 20.32 180)
					(length 2.54)
					(name "U0TXD/GPIO43/CLK_OUT1")
					(number "37")
				)
				(pin bidirectional line
					(at -55.88 20.32 0)
					(length 2.54)
					(name "GPIO2/TOUCH2/ADC1_CH1")
					(number "38")
				)
				(pin bidirectional line
					(at -55.88 22.86 0)
					(length 2.54)
					(name "GPIO1/TOUCH1/ADC1_CH0")
					(number "39")
				)
				(pin bidirectional line
					(at -55.88 15.24 0)
					(length 2.54)
					(name "GPIO4/TOUCH4/ADC1_CH3")
					(number "4")
				)
				(pin passive line
					(at 58.42 -27.94 180)
					(length 2.54) hide
					(name "GND")
					(number "40")
				)
				(pin passive line
					(at 58.42 -27.94 180)
					(length 2.54) hide
					(name "GND")
					(number "41")
				)
				(pin bidirectional line
					(at -55.88 12.7 0)
					(length 2.54)
					(name "GPIO5/TOUCH5/ADC1_CH4")
					(number "5")
				)
				(pin bidirectional line
					(at -55.88 10.16 0)
					(length 2.54)
					(name "GPIO6/TOUCH6/ADC1_CH5")
					(number "6")
				)
				(pin bidirectional line
					(at -55.88 7.62 0)
					(length 2.54)
					(name "GPIO7/TOUCH7/ADC1_CH6")
					(number "7")
				)
				(pin bidirectional line
					(at -55.88 -12.7 0)
					(length 2.54)
					(name "GPIO15/U0RTS/ADC2_CH4/XTAL_32K_P")
					(number "8")
				)
				(pin bidirectional line
					(at -55.88 -15.24 0)
					(length 2.54)
					(name "GPIO16/U0CTS/ADC2_CH5/XTAL_32K_NH5")
					(number "9")
				)
			)
		)
		(symbol "bitaxe:SN74AVC4T774"
			(pin_names
				(offset 1.016)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -6.35 12.7 0)
			)
			(property "Value" "SN74AVC4T774"
				(at -7.62 -19.05 0)
			)
			(property "Footprint" "Package_SO:TSSOP-16_4.4x5mm_P0.65mm"
				(at 2.54 -1.27 0)
			)
			(property "Datasheet" "https://www.ti.com/lit/ds/symlink/sn74avc4t774.pdf"
				(at 2.54 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "DK" "296-24739-1-ND"
				(at 1.27 0 0)
			)
			(property "Partnum" "SN74AVC4T774PWR"
				(at 0 0 0)
			)
			(symbol "SN74AVC4T774_0_0"
				(rectangle
					(start -7.62 11.43)
					(end 7.62 -16.51)
					(fill
						(type background)
					)
				)
			)
			(symbol "SN74AVC4T774_1_0"
				(pin input line
					(at 10.16 -6.35 180)
					(length 2.54)
					(name "DIR1")
					(number "1")
				)
				(pin power_in line
					(at -10.16 -13.97 0)
					(length 2.54)
					(name "GND")
					(number "10")
				)
				(pin bidirectional line
					(at 10.16 -2.54 180)
					(length 2.54)
					(name "B4")
					(number "11")
				)
				(pin bidirectional line
					(at 10.16 0 180)
					(length 2.54)
					(name "B3")
					(number "12")
				)
				(pin bidirectional line
					(at 10.16 2.54 180)
					(length 2.54)
					(name "B2")
					(number "13")
				)
				(pin bidirectional line
					(at 10.16 5.08 180)
					(length 2.54)
					(name "B1")
					(number "14")
				)
				(pin power_in line
					(at 10.16 8.89 180)
					(length 2.54)
					(name "VCCB")
					(number "15")
				)
				(pin power_in line
					(at -10.16 8.89 0)
					(length 2.54)
					(name "VCCA")
					(number "16")
				)
				(pin input line
					(at 10.16 -8.89 180)
					(length 2.54)
					(name "DIR2")
					(number "2")
				)
				(pin bidirectional line
					(at -10.16 5.08 0)
					(length 2.54)
					(name "A1")
					(number "3")
				)
				(pin bidirectional line
					(at -10.16 2.54 0)
					(length 2.54)
					(name "A2")
					(number "4")
				)
				(pin bidirectional line
					(at -10.16 0 0)
					(length 2.54)
					(name "A3")
					(number "5")
				)
				(pin bidirectional line
					(at -10.16 -2.54 0)
					(length 2.54)
					(name "A4")
					(number "6")
				)
				(pin input line
					(at 10.16 -11.43 180)
					(length 2.54)
					(name "DIR3")
					(number "7")
				)
				(pin input line
					(at 10.16 -13.97 180)
					(length 2.54)
					(name "DIR4")
					(number "8")
				)
				(pin input line
					(at -10.16 -8.89 0)
					(length 2.54)
					(name "OE")
					(number "9")
				)
			)
		)
		(symbol "bitaxe:SWITCH-SPST"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "SW1"
				(at 0 3.81 0)
			)
			(property "Value" "SWITCH-SPST"
				(at 0 3.81 0)
			)
			(property "Footprint" "bitaxe:EVQ9P701P-switch"
				(at 0 -7.62 0)
			)
			(property "Datasheet" "https://api.pim.na.industrial.panasonic.com/file_stream/main/fileversion/245500"
				(at 0 -10.16 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "PARTNO" "EVQ-9P701P"
				(at 0 -3.81 0)
			)
			(property "DK" "P19095CT-ND"
				(at 0 -1.27 0)
			)
			(symbol "SWITCH-SPST_0_1"
				(circle
					(center -2.54 0)
					(radius 0.76)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -3.05 1.52) (xy 3.05 1.52)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 1.52) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 2.54 0)
					(radius 0.76)
					(fill
						(type none)
					)
				)
				(pin unspecified line
					(at -5.08 0 0)
					(length 2.54)
					(name "~")
					(number "1")
				)
				(pin unspecified line
					(at 5.08 0 180)
					(length 2.54)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "bitaxe:TC2030-IDC-NL"
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "J5"
				(at 0 12.7 0)
			)
			(property "Value" "TC2030-IDC"
				(at 0 10.16 0)
			)
			(property "Footprint" "Connector:Tag-Connect_TC2030-IDC-NL_2x03_P1.27mm_Vertical"
				(at -1.27 0 0)
			)
			(property "Datasheet" ""
				(at -1.27 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "ki_fp_filters" "TC2030*"
				(at 0 0 0)
			)
			(symbol "TC2030-IDC-NL_0_1"
				(circle
					(center -2.54 -5.715)
					(radius 1.4224)
					(fill
						(type none)
					)
				)
				(circle
					(center -1.6002 2.54)
					(radius 0.889)
					(fill
						(type none)
					)
				)
				(circle
					(center 0 5.715)
					(radius 1.27)
					(fill
						(type none)
					)
				)
			)
			(symbol "TC2030-IDC-NL_1_1"
				(circle
					(center -1.6002 -2.5908)
					(radius 0.889)
					(fill
						(type none)
					)
				)
				(circle
					(center -1.6002 -0.0508)
					(radius 0.889)
					(fill
						(type none)
					)
				)
				(circle
					(center 1.6002 -2.54)
					(radius 0.889)
					(fill
						(type none)
					)
				)
				(circle
					(center 1.6002 0)
					(radius 0.889)
					(fill
						(type none)
					)
				)
				(circle
					(center 1.6002 2.5908)
					(radius 0.889)
					(fill
						(type none)
					)
				)
				(circle
					(center 2.54 -5.715)
					(radius 1.4224)
					(fill
						(type none)
					)
				)
				(pin passive line
					(at -6.35 2.54 0)
					(length 3.81)
					(name "Pin_1")
					(number "1")
				)
				(pin passive line
					(at 6.35 2.54 180)
					(length 3.81)
					(name "Pin_2")
					(number "2")
				)
				(pin passive line
					(at -6.35 0 0)
					(length 3.81)
					(name "Pin_3")
					(number "3")
				)
				(pin passive line
					(at 6.35 0 180)
					(length 3.81)
					(name "Pin_4")
					(number "4")
				)
				(pin passive line
					(at -6.35 -2.54 0)
					(length 3.81)
					(name "Pin_5")
					(number "5")
				)
				(pin passive line
					(at 6.35 -2.54 180)
					(length 3.81)
					(name "Pin_6")
					(number "6")
				)
			)
		)
	)
	(junction
		(at 31.75 57.15)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 49.53 109.22)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 224.79 148.59)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 116.84 177.8)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 107.95 157.48)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 41.91 173.99)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 116.84 175.26)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 251.46 96.52)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 39.37 81.28)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 39.37 167.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 248.92 148.59)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 64.77 185.42)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 36.83 161.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 229.87 76.2)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 31.75 59.69)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 55.88 157.48)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 227.33 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(no_connect
		(at 236.22 86.36)
	)
	(no_connect
		(at 236.22 88.9)
	)
	(wire
		(pts
			(xy 107.95 157.48) (xy 116.84 157.48)
		)
	)
	(wire
		(pts
			(xy 57.15 49.53) (xy 59.69 49.53)
		)
	)
	(wire
		(pts
			(xy 39.37 49.53) (xy 46.99 49.53)
		)
	)
	(wire
		(pts
			(xy 21.59 125.73) (xy 21.59 128.27)
		)
	)
	(wire
		(pts
			(xy 219.71 111.76) (xy 229.87 111.76)
		)
	)
	(wire
		(pts
			(xy 31.75 68.58) (xy 31.75 69.85)
		)
	)
	(wire
		(pts
			(xy 187.96 129.54) (xy 201.93 129.54)
		)
	)
	(wire
		(pts
			(xy 64.77 185.42) (xy 116.84 185.42)
		)
	)
	(wire
		(pts
			(xy 67.31 175.26) (xy 57.15 175.26)
		)
	)
	(wire
		(pts
			(xy 116.84 177.8) (xy 116.84 185.42)
		)
	)
	(wire
		(pts
			(xy 67.31 180.34) (xy 64.77 180.34)
		)
	)
	(wire
		(pts
			(xy 13.97 69.85) (xy 31.75 69.85)
		)
	)
	(wire
		(pts
			(xy 39.37 85.09) (xy 35.56 85.09)
		)
	)
	(wire
		(pts
			(xy 25.4 41.91) (xy 31.75 41.91)
		)
	)
	(wire
		(pts
			(xy 87.63 157.48) (xy 107.95 157.48)
		)
	)
	(wire
		(pts
			(xy 187.96 71.12) (xy 219.71 71.12)
		)
	)
	(wire
		(pts
			(xy 50.8 57.15) (xy 31.75 57.15)
		)
	)
	(wire
		(pts
			(xy 39.37 76.2) (xy 39.37 81.28)
		)
	)
	(wire
		(pts
			(xy 241.3 148.59) (xy 248.92 148.59)
		)
	)
	(wire
		(pts
			(xy 62.23 88.9) (xy 73.66 88.9)
		)
	)
	(wire
		(pts
			(xy 189.23 156.21) (xy 196.85 156.21)
		)
	)
	(wire
		(pts
			(xy 36.83 161.29) (xy 67.31 161.29)
		)
	)
	(wire
		(pts
			(xy 187.96 111.76) (xy 194.31 111.76)
		)
	)
	(wire
		(pts
			(xy 62.23 111.76) (xy 73.66 111.76)
		)
	)
	(wire
		(pts
			(xy 31.75 138.43) (xy 21.59 138.43)
		)
	)
	(wire
		(pts
			(xy 224.79 161.29) (xy 224.79 158.75)
		)
	)
	(wire
		(pts
			(xy 229.87 78.74) (xy 236.22 78.74)
		)
	)
	(wire
		(pts
			(xy 251.46 96.52) (xy 259.08 96.52)
		)
	)
	(wire
		(pts
			(xy 63.5 168.91) (xy 67.31 168.91)
		)
	)
	(wire
		(pts
			(xy 189.23 153.67) (xy 196.85 153.67)
		)
	)
	(wire
		(pts
			(xy 87.63 161.29) (xy 101.6 161.29)
		)
	)
	(wire
		(pts
			(xy 59.69 71.12) (xy 73.66 71.12)
		)
	)
	(wire
		(pts
			(xy 31.75 59.69) (xy 31.75 60.96)
		)
	)
	(wire
		(pts
			(xy 31.75 135.89) (xy 31.75 138.43)
		)
	)
	(wire
		(pts
			(xy 36.83 163.83) (xy 36.83 161.29)
		)
	)
	(wire
		(pts
			(xy 227.33 73.66) (xy 236.22 73.66)
		)
	)
	(wire
		(pts
			(xy 62.23 86.36) (xy 73.66 86.36)
		)
	)
	(wire
		(pts
			(xy 200.66 63.5) (xy 204.47 63.5)
		)
	)
	(wire
		(pts
			(xy 229.87 96.52) (xy 251.46 96.52)
		)
	)
	(wire
		(pts
			(xy 229.87 76.2) (xy 229.87 78.74)
		)
	)
	(wire
		(pts
			(xy 87.63 175.26) (xy 116.84 175.26)
		)
	)
	(wire
		(pts
			(xy 49.53 109.22) (xy 49.53 115.57)
		)
	)
	(wire
		(pts
			(xy 219.71 76.2) (xy 229.87 76.2)
		)
	)
	(wire
		(pts
			(xy 39.37 81.28) (xy 39.37 85.09)
		)
	)
	(wire
		(pts
			(xy 248.92 148.59) (xy 259.08 148.59)
		)
	)
	(wire
		(pts
			(xy 66.04 114.3) (xy 73.66 114.3)
		)
	)
	(wire
		(pts
			(xy 87.63 166.37) (xy 101.6 166.37)
		)
	)
	(wire
		(pts
			(xy 187.96 73.66) (xy 227.33 73.66)
		)
	)
	(wire
		(pts
			(xy 87.63 163.83) (xy 101.6 163.83)
		)
	)
	(wire
		(pts
			(xy 187.96 121.92) (xy 229.87 121.92)
		)
	)
	(wire
		(pts
			(xy 45.72 109.22) (xy 49.53 109.22)
		)
	)
	(wire
		(pts
			(xy 35.56 176.53) (xy 41.91 176.53)
		)
	)
	(wire
		(pts
			(xy 58.42 172.72) (xy 63.5 172.72)
		)
	)
	(wire
		(pts
			(xy 217.17 148.59) (xy 224.79 148.59)
		)
	)
	(wire
		(pts
			(xy 116.84 175.26) (xy 116.84 177.8)
		)
	)
	(wire
		(pts
			(xy 224.79 161.29) (xy 248.92 161.29)
		)
	)
	(wire
		(pts
			(xy 41.91 167.64) (xy 39.37 167.64)
		)
	)
	(wire
		(pts
			(xy 224.79 148.59) (xy 224.79 151.13)
		)
	)
	(wire
		(pts
			(xy 24.13 76.2) (xy 27.94 76.2)
		)
	)
	(wire
		(pts
			(xy 219.71 109.22) (xy 229.87 109.22)
		)
	)
	(wire
		(pts
			(xy 67.31 163.83) (xy 41.91 163.83)
		)
	)
	(wire
		(pts
			(xy 20.32 85.09) (xy 27.94 85.09)
		)
	)
	(wire
		(pts
			(xy 189.23 158.75) (xy 196.85 158.75)
		)
	)
	(wire
		(pts
			(xy 59.69 49.53) (xy 59.69 71.12)
		)
	)
	(wire
		(pts
			(xy 179.07 34.29) (xy 193.04 34.29)
		)
	)
	(wire
		(pts
			(xy 57.15 175.26) (xy 57.15 176.53)
		)
	)
	(wire
		(pts
			(xy 62.23 91.44) (xy 73.66 91.44)
		)
	)
	(wire
		(pts
			(xy 200.66 66.04) (xy 200.66 63.5)
		)
	)
	(wire
		(pts
			(xy 66.04 116.84) (xy 73.66 116.84)
		)
	)
	(wire
		(pts
			(xy 49.53 109.22) (xy 73.66 109.22)
		)
	)
	(wire
		(pts
			(xy 41.91 173.99) (xy 24.13 173.99)
		)
	)
	(wire
		(pts
			(xy 187.96 114.3) (xy 229.87 114.3)
		)
	)
	(wire
		(pts
			(xy 13.97 59.69) (xy 13.97 69.85)
		)
	)
	(wire
		(pts
			(xy 187.96 109.22) (xy 194.31 109.22)
		)
	)
	(wire
		(pts
			(xy 35.56 170.18) (xy 39.37 170.18)
		)
	)
	(wire
		(pts
			(xy 52.07 149.86) (xy 55.88 149.86)
		)
	)
	(wire
		(pts
			(xy 26.67 59.69) (xy 31.75 59.69)
		)
	)
	(wire
		(pts
			(xy 87.63 180.34) (xy 91.44 180.34)
		)
	)
	(wire
		(pts
			(xy 224.79 148.59) (xy 233.68 148.59)
		)
	)
	(wire
		(pts
			(xy 73.66 81.28) (xy 39.37 81.28)
		)
	)
	(wire
		(pts
			(xy 168.91 158.75) (xy 176.53 158.75)
		)
	)
	(wire
		(pts
			(xy 87.63 168.91) (xy 90.17 168.91)
		)
	)
	(wire
		(pts
			(xy 36.83 149.86) (xy 44.45 149.86)
		)
	)
	(wire
		(pts
			(xy 39.37 167.64) (xy 24.13 167.64)
		)
	)
	(wire
		(pts
			(xy 179.07 36.83) (xy 193.04 36.83)
		)
	)
	(wire
		(pts
			(xy 62.23 133.35) (xy 67.31 133.35)
		)
	)
	(wire
		(pts
			(xy 57.15 185.42) (xy 57.15 184.15)
		)
	)
	(wire
		(pts
			(xy 62.23 96.52) (xy 73.66 96.52)
		)
	)
	(wire
		(pts
			(xy 55.88 78.74) (xy 73.66 78.74)
		)
	)
	(wire
		(pts
			(xy 227.33 71.12) (xy 227.33 73.66)
		)
	)
	(wire
		(pts
			(xy 31.75 41.91) (xy 31.75 46.99)
		)
	)
	(wire
		(pts
			(xy 187.96 81.28) (xy 195.58 81.28)
		)
	)
	(wire
		(pts
			(xy 219.71 76.2) (xy 219.71 71.12)
		)
	)
	(wire
		(pts
			(xy 229.87 76.2) (xy 236.22 76.2)
		)
	)
	(wire
		(pts
			(xy 168.91 156.21) (xy 176.53 156.21)
		)
	)
	(wire
		(pts
			(xy 62.23 83.82) (xy 73.66 83.82)
		)
	)
	(wire
		(pts
			(xy 21.59 138.43) (xy 21.59 135.89)
		)
	)
	(wire
		(pts
			(xy 73.66 73.66) (xy 50.8 73.66)
		)
	)
	(wire
		(pts
			(xy 16.51 59.69) (xy 13.97 59.69)
		)
	)
	(wire
		(pts
			(xy 187.96 106.68) (xy 194.31 106.68)
		)
	)
	(wire
		(pts
			(xy 116.84 171.45) (xy 116.84 175.26)
		)
	)
	(wire
		(pts
			(xy 248.92 148.59) (xy 248.92 151.13)
		)
	)
	(wire
		(pts
			(xy 57.15 121.92) (xy 73.66 121.92)
		)
	)
	(wire
		(pts
			(xy 55.88 149.86) (xy 55.88 157.48)
		)
	)
	(wire
		(pts
			(xy 57.15 119.38) (xy 73.66 119.38)
		)
	)
	(wire
		(pts
			(xy 31.75 54.61) (xy 31.75 57.15)
		)
	)
	(wire
		(pts
			(xy 168.91 153.67) (xy 176.53 153.67)
		)
	)
	(wire
		(pts
			(xy 187.96 116.84) (xy 229.87 116.84)
		)
	)
	(wire
		(pts
			(xy 46.99 166.37) (xy 46.99 173.99)
		)
	)
	(wire
		(pts
			(xy 215.9 66.04) (xy 200.66 66.04)
		)
	)
	(wire
		(pts
			(xy 35.56 104.14) (xy 73.66 104.14)
		)
	)
	(wire
		(pts
			(xy 62.23 99.06) (xy 73.66 99.06)
		)
	)
	(wire
		(pts
			(xy 212.09 63.5) (xy 236.22 63.5)
		)
	)
	(wire
		(pts
			(xy 41.91 163.83) (xy 41.91 167.64)
		)
	)
	(wire
		(pts
			(xy 35.56 163.83) (xy 36.83 163.83)
		)
	)
	(wire
		(pts
			(xy 46.99 173.99) (xy 41.91 173.99)
		)
	)
	(wire
		(pts
			(xy 39.37 170.18) (xy 39.37 167.64)
		)
	)
	(wire
		(pts
			(xy 87.63 177.8) (xy 116.84 177.8)
		)
	)
	(wire
		(pts
			(xy 116.84 157.48) (xy 116.84 163.83)
		)
	)
	(wire
		(pts
			(xy 187.96 83.82) (xy 195.58 83.82)
		)
	)
	(wire
		(pts
			(xy 64.77 185.42) (xy 57.15 185.42)
		)
	)
	(wire
		(pts
			(xy 107.95 172.72) (xy 107.95 157.48)
		)
	)
	(wire
		(pts
			(xy 62.23 129.54) (xy 73.66 129.54)
		)
	)
	(wire
		(pts
			(xy 248.92 158.75) (xy 248.92 161.29)
		)
	)
	(wire
		(pts
			(xy 31.75 125.73) (xy 21.59 125.73)
		)
	)
	(wire
		(pts
			(xy 35.56 76.2) (xy 39.37 76.2)
		)
	)
	(wire
		(pts
			(xy 187.96 96.52) (xy 213.36 96.52)
		)
	)
	(wire
		(pts
			(xy 24.13 161.29) (xy 36.83 161.29)
		)
	)
	(wire
		(pts
			(xy 29.21 115.57) (xy 49.53 115.57)
		)
	)
	(wire
		(pts
			(xy 223.52 66.04) (xy 236.22 66.04)
		)
	)
	(wire
		(pts
			(xy 179.07 31.75) (xy 193.04 31.75)
		)
	)
	(wire
		(pts
			(xy 231.14 58.42) (xy 236.22 58.42)
		)
	)
	(wire
		(pts
			(xy 55.88 157.48) (xy 67.31 157.48)
		)
	)
	(wire
		(pts
			(xy 31.75 128.27) (xy 31.75 125.73)
		)
	)
	(wire
		(pts
			(xy 41.91 176.53) (xy 41.91 173.99)
		)
	)
	(wire
		(pts
			(xy 62.23 106.68) (xy 73.66 106.68)
		)
	)
	(wire
		(pts
			(xy 236.22 71.12) (xy 227.33 71.12)
		)
	)
	(wire
		(pts
			(xy 187.96 104.14) (xy 194.31 104.14)
		)
	)
	(wire
		(pts
			(xy 187.96 93.98) (xy 213.36 93.98)
		)
	)
	(wire
		(pts
			(xy 63.5 172.72) (xy 63.5 168.91)
		)
	)
	(wire
		(pts
			(xy 67.31 166.37) (xy 46.99 166.37)
		)
	)
	(wire
		(pts
			(xy 62.23 93.98) (xy 73.66 93.98)
		)
	)
	(wire
		(pts
			(xy 24.13 157.48) (xy 55.88 157.48)
		)
	)
	(wire
		(pts
			(xy 31.75 57.15) (xy 31.75 59.69)
		)
	)
	(wire
		(pts
			(xy 50.8 73.66) (xy 50.8 57.15)
		)
	)
	(wire
		(pts
			(xy 187.96 119.38) (xy 229.87 119.38)
		)
	)
	(wire
		(pts
			(xy 64.77 180.34) (xy 64.77 185.42)
		)
	)
	(wire
		(pts
			(xy 87.63 172.72) (xy 107.95 172.72)
		)
	)
	(wire
		(pts
			(xy 179.07 29.21) (xy 193.04 29.21)
		)
	)
	(text "OLED Display Header\nSSD1306 128x32 I2C OLED"
		(exclude_from_sim no)
		(at 187.96 43.18 0)
	)
	(text "RTC Clock Crystal"
		(exclude_from_sim no)
		(at 231.14 163.83 0)
	)
	(text "Accessory Port"
		(exclude_from_sim no)
		(at 234.95 105.41 0)
	)
	(text "Program the ESP32 with a ESP-PROG and a Tag Connect TC2030-IDC"
		(exclude_from_sim no)
		(at 147.32 167.64 0)
	)
	(text "VDD@3.6V, VDD_SAMPLE=2.65V\nVDD@4.5V, VDD_SAMPLE=3.3V\n"
		(exclude_from_sim no)
		(at 13.97 93.98 0)
	)
	(text "Direction Control\nHIGH=A -> B\nLOW=A <- B"
		(exclude_from_sim no)
		(at 68.58 194.31 0)
	)
	(label "EN"
		(at 43.18 57.15 0)
		(fields_autoplaced yes)
	)
	(label "P_RX"
		(at 168.91 158.75 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 229.87 96.52 0)
		(fields_autoplaced yes)
	)
	(label "3V3"
		(at 111.76 157.48 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 20.32 85.09 0)
		(fields_autoplaced yes)
	)
	(label "3V3"
		(at 62.23 83.82 0)
		(fields_autoplaced yes)
	)
	(label "1V8"
		(at 60.96 157.48 0)
		(fields_autoplaced yes)
	)
	(label "SMB_ALRT"
		(at 33.02 115.57 0)
		(fields_autoplaced yes)
	)
	(label "P_TX"
		(at 168.91 156.21 0)
		(fields_autoplaced yes)
	)
	(label "EN"
		(at 168.91 153.67 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 201.93 66.04 0)
		(fields_autoplaced yes)
	)
	(label "XOUT32"
		(at 259.08 148.59 180)
		(fields_autoplaced yes)
	)
	(label "P_RX"
		(at 195.58 83.82 180)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 21.59 69.85 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 25.4 138.43 0)
		(fields_autoplaced yes)
	)
	(label "3V3"
		(at 63.5 129.54 0)
		(fields_autoplaced yes)
	)
	(label "3V3"
		(at 179.07 31.75 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 179.07 29.21 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 219.71 111.76 0)
		(fields_autoplaced yes)
	)
	(label "SDA"
		(at 203.2 96.52 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 67.31 133.35 180)
		(fields_autoplaced yes)
	)
	(label "ASIC_RST"
		(at 101.6 166.37 180)
		(fields_autoplaced yes)
	)
	(label "XIN32"
		(at 66.04 114.3 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 238.76 161.29 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 39.37 49.53 0)
		(fields_autoplaced yes)
	)
	(label "3V3"
		(at 196.85 153.67 180)
		(fields_autoplaced yes)
	)
	(label "SDA"
		(at 179.07 36.83 0)
		(fields_autoplaced yes)
	)
	(label "IO0"
		(at 194.31 158.75 0)
		(fields_autoplaced yes)
	)
	(label "SCL"
		(at 203.2 93.98 0)
		(fields_autoplaced yes)
	)
	(label "XOUT32"
		(at 66.04 116.84 0)
		(fields_autoplaced yes)
	)
	(label "XIN32"
		(at 217.17 148.59 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 198.12 129.54 0)
		(fields_autoplaced yes)
	)
	(label "3V3"
		(at 25.4 125.73 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 36.83 149.86 0)
		(fields_autoplaced yes)
	)
	(label "IO0"
		(at 64.77 71.12 0)
		(fields_autoplaced yes)
	)
	(label "P_TX"
		(at 195.58 81.28 180)
		(fields_autoplaced yes)
	)
	(label "VDD_SAMPLE"
		(at 41.91 81.28 0)
		(fields_autoplaced yes)
	)
	(label "SCL"
		(at 179.07 34.29 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 196.85 156.21 180)
		(fields_autoplaced yes)
	)
	(label "3V3"
		(at 25.4 41.91 0)
		(fields_autoplaced yes)
	)
	(label "ESP32_TX"
		(at 101.6 163.83 180)
		(fields_autoplaced yes)
	)
	(label "ESP32_RX"
		(at 57.15 121.92 0)
		(fields_autoplaced yes)
	)
	(label "ESP32_RX"
		(at 101.6 161.29 180)
		(fields_autoplaced yes)
	)
	(label "ASIC_RST"
		(at 55.88 78.74 0)
		(fields_autoplaced yes)
	)
	(label "ESP32_TX"
		(at 57.15 119.38 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 86.36 185.42 180)
		(fields_autoplaced yes)
	)
	(global_label "GND"
		(shape input)
		(at 201.93 129.54 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 208.2136 129.4606 0)
		)
	)
	(hierarchical_label "1V8_IO"
		(shape input)
		(at 24.13 157.48 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "SMB_ALRT"
		(shape input)
		(at 29.21 115.57 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "3V3"
		(shape input)
		(at 21.59 125.73 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "SCL"
		(shape input)
		(at 213.36 93.98 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "SDA"
		(shape input)
		(at 213.36 96.52 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "5V"
		(shape input)
		(at 219.71 109.22 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "VDD"
		(shape input)
		(at 24.13 76.2 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "RST"
		(shape output)
		(at 24.13 173.99 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "PGOOD"
		(shape output)
		(at 35.56 104.14 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "TX"
		(shape output)
		(at 24.13 167.64 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "RX"
		(shape input)
		(at 24.13 161.29 180)
		(fields_autoplaced yes)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 208.28 63.5 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R3"
			(at 204.47 62.23 90)
		)
		(property "Value" "5.1k"
			(at 212.725 62.23 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 208.534 62.484 90)
		)
		(property "Datasheet" "~"
			(at 208.28 63.5 0)
		)
		(property "Description" ""
			(at 208.28 63.5 0)
		)
		(property "DK" "13-RC0402FR-135K1LCT-ND"
			(at 208.28 63.5 0)
		)
		(property "PARTNO" "RC0402FR-135K1L"
			(at 208.28 63.5 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "esp32"
				(path
					(reference "R3")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R22")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 31.75 64.77 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C50"
			(at 35.56 63.4999 0)
		)
		(property "Value" "1uF"
			(at 35.56 66.0399 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 32.7152 68.58 0)
		)
		(property "Datasheet" ""
			(at 31.75 64.77 0)
		)
		(property "Description" ""
			(at 31.75 64.77 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 31.75 64.77 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 31.75 64.77 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "esp32"
				(path
					(reference "C50")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C32")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 62.23 93.98 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP15"
			(at 55.88 93.98 90)
		)
		(property "Value" "TestPoint"
			(at 56.515 92.7101 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 62.23 88.9 0)
		)
		(property "Datasheet" "~"
			(at 62.23 88.9 0)
		)
		(property "Description" ""
			(at 62.23 93.98 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP15")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 31.75 76.2 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R19"
			(at 31.75 73.66 90)
		)
		(property "Value" "7.87k"
			(at 31.75 78.74 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 31.496 77.216 90)
		)
		(property "Datasheet" "~"
			(at 31.75 76.2 0)
		)
		(property "Description" ""
			(at 31.75 76.2 0)
		)
		(property "DK" "311-7.87KLRCT-ND"
			(at 31.75 76.2 0)
		)
		(property "PARTNO" "RC0402FR-077K87L"
			(at 31.75 76.2 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R19")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 194.31 104.14 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP27"
			(at 200.66 104.14 90)
		)
		(property "Value" "TestPoint"
			(at 200.025 102.8701 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 194.31 99.06 0)
		)
		(property "Datasheet" "~"
			(at 194.31 99.06 0)
		)
		(property "Description" ""
			(at 194.31 104.14 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP27")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 224.79 154.94 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp yes)
		(fields_autoplaced yes)
		(property "Reference" "C36"
			(at 228.6 153.6699 0)
		)
		(property "Value" "6.8pF"
			(at 228.6 156.2099 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 225.7552 158.75 0)
		)
		(property "Datasheet" "~"
			(at 224.79 154.94 0)
		)
		(property "Description" ""
			(at 224.79 154.94 0)
		)
		(property "DK" "399-C0402C689C5GAC7867CT-ND"
			(at 224.79 154.94 0)
		)
		(property "PARTNO" "C0402C689C5GAC7867"
			(at 224.79 154.94 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C36")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 116.84 167.64 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C25"
			(at 117.475 166.37 0)
		)
		(property "Value" "311-3342-1-ND"
			(at 116.84 167.64 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 116.84 167.64 0)
		)
		(property "Datasheet" ""
			(at 116.84 167.64 0)
		)
		(property "Description" ""
			(at 116.84 167.64 0)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 116.84 167.64 0)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 116.84 167.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "Hashat"
				(path
					(reference "C25")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C35")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 48.26 149.86 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C25"
			(at 50.165 145.415 90)
		)
		(property "Value" "311-3342-1-ND"
			(at 48.26 149.86 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 48.26 149.86 0)
		)
		(property "Datasheet" ""
			(at 48.26 149.86 0)
		)
		(property "Description" ""
			(at 48.26 149.86 0)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 48.26 149.86 0)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 48.26 149.86 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "Hashat"
				(path
					(reference "C25")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C34")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 35.56 163.83 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP7"
			(at 28.575 163.83 90)
		)
		(property "Value" "TestPoint"
			(at 29.845 165.0999 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 35.56 168.91 0)
		)
		(property "Datasheet" "~"
			(at 35.56 168.91 0)
		)
		(property "Description" ""
			(at 35.56 163.83 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 31.75 132.08 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C33"
			(at 35.56 130.8099 0)
		)
		(property "Value" "0.1uF"
			(at 35.56 133.3499 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 32.7152 135.89 0)
		)
		(property "Datasheet" ""
			(at 31.75 132.08 0)
		)
		(property "Description" ""
			(at 31.75 132.08 0)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 31.75 132.08 0)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 31.75 132.08 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C33")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 62.23 96.52 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP16"
			(at 55.88 96.52 90)
		)
		(property "Value" "TestPoint"
			(at 56.515 95.2501 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 62.23 91.44 0)
		)
		(property "Datasheet" "~"
			(at 62.23 91.44 0)
		)
		(property "Description" ""
			(at 62.23 96.52 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP16")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 231.14 58.42 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP32"
			(at 224.79 58.42 90)
		)
		(property "Value" "TestPoint"
			(at 225.425 59.6899 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 231.14 63.5 0)
		)
		(property "Datasheet" "~"
			(at 231.14 63.5 0)
		)
		(property "Description" ""
			(at 231.14 58.42 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP32")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector_Generic:Conn_01x04")
		(at 198.12 31.75 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "J5"
			(at 201.295 31.75 0)
		)
		(property "Value" "Conn_01x04"
			(at 201.295 34.29 0)
		)
		(property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_1x04_P2.54mm_Vertical"
			(at 198.12 31.75 0)
		)
		(property "Datasheet" "~"
			(at 198.12 31.75 0)
		)
		(property "Description" ""
			(at 198.12 31.75 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(instances
			(project "bitaxeHex"
				(path
					(reference "J5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 62.23 86.36 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP12"
			(at 55.88 86.36 90)
		)
		(property "Value" "TestPoint"
			(at 56.515 85.0901 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 62.23 81.28 0)
		)
		(property "Datasheet" "~"
			(at 62.23 81.28 0)
		)
		(property "Description" ""
			(at 62.23 86.36 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP12")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 194.31 109.22 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP29"
			(at 200.66 109.22 90)
		)
		(property "Value" "TestPoint"
			(at 200.025 107.9501 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 194.31 104.14 0)
		)
		(property "Datasheet" "~"
			(at 194.31 104.14 0)
		)
		(property "Description" ""
			(at 194.31 109.22 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP29")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 219.71 66.04 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R5"
			(at 215.9 64.77 90)
		)
		(property "Value" "5.1k"
			(at 224.155 64.77 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 219.964 65.024 90)
		)
		(property "Datasheet" "~"
			(at 219.71 66.04 0)
		)
		(property "Description" ""
			(at 219.71 66.04 0)
		)
		(property "DK" "13-RC0402FR-135K1LCT-ND"
			(at 219.71 66.04 0)
		)
		(property "PARTNO" "RC0402FR-135K1L"
			(at 219.71 66.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "esp32"
				(path
					(reference "R5")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R23")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 62.23 99.06 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP17"
			(at 55.88 99.06 90)
		)
		(property "Value" "TestPoint"
			(at 56.515 97.7901 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 62.23 93.98 0)
		)
		(property "Datasheet" "~"
			(at 62.23 93.98 0)
		)
		(property "Description" ""
			(at 62.23 99.06 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP17")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 248.92 154.94 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp yes)
		(fields_autoplaced yes)
		(property "Reference" "C37"
			(at 252.095 153.6699 0)
		)
		(property "Value" "6.8pF"
			(at 252.095 156.2099 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 249.8852 158.75 0)
		)
		(property "Datasheet" "~"
			(at 248.92 154.94 0)
		)
		(property "Description" ""
			(at 248.92 154.94 0)
		)
		(property "DK" "399-C0402C689C5GAC7867CT-ND"
			(at 248.92 154.94 0)
		)
		(property "PARTNO" "C0402C689C5GAC7867"
			(at 248.92 154.94 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C37")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:SWITCH-SPST")
		(at 52.07 49.53 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "SW2"
			(at 52.07 44.45 0)
		)
		(property "Value" "SWITCH-SPST"
			(at 52.07 45.72 0)
		)
		(property "Footprint" "bitaxe:TL3340-switch"
			(at 52.07 57.15 0)
		)
		(property "Datasheet" "https://sten-eswitch-13110800-production.s3.amazonaws.com/system/asset/product_line/data_sheet/164/TL3340.pdf"
			(at 52.07 59.69 0)
		)
		(property "Description" ""
			(at 52.07 49.53 0)
		)
		(property "PARTNO" "TL3340AF160QG"
			(at 52.07 53.34 0)
		)
		(property "DK" "EG4627CT-ND"
			(at 52.07 50.8 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "SW2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 90.17 168.91 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP22"
			(at 96.52 168.91 90)
		)
		(property "Value" "TestPoint"
			(at 95.885 167.6401 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 90.17 163.83 0)
		)
		(property "Datasheet" "~"
			(at 90.17 163.83 0)
		)
		(property "Description" ""
			(at 90.17 168.91 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP22")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 194.31 111.76 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP30"
			(at 200.66 111.76 90)
		)
		(property "Value" "TestPoint"
			(at 200.025 110.4901 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 194.31 106.68 0)
		)
		(property "Datasheet" "~"
			(at 194.31 106.68 0)
		)
		(property "Description" ""
			(at 194.31 111.76 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP30")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 62.23 88.9 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 55.88 88.9 90)
		)
		(property "Value" "TestPoint"
			(at 56.515 87.6301 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 62.23 83.82 0)
		)
		(property "Datasheet" "~"
			(at 62.23 83.82 0)
		)
		(property "Description" ""
			(at 62.23 88.9 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 58.42 172.72 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP11"
			(at 52.07 172.72 90)
		)
		(property "Value" "TestPoint"
			(at 52.705 173.9899 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 58.42 177.8 0)
		)
		(property "Datasheet" "~"
			(at 58.42 177.8 0)
		)
		(property "Description" ""
			(at 58.42 172.72 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP11")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 62.23 133.35 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP21"
			(at 55.88 133.35 90)
		)
		(property "Value" "TestPoint"
			(at 56.515 134.6199 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 62.23 138.43 0)
		)
		(property "Datasheet" "~"
			(at 62.23 138.43 0)
		)
		(property "Description" ""
			(at 62.23 133.35 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP21")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 168.91 156.21 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP25"
			(at 162.56 156.21 90)
		)
		(property "Value" "TestPoint"
			(at 163.195 157.4799 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 168.91 161.29 0)
		)
		(property "Datasheet" "~"
			(at 168.91 161.29 0)
		)
		(property "Description" ""
			(at 168.91 156.21 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP25")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 196.85 158.75 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP31"
			(at 203.2 158.75 90)
		)
		(property "Value" "TestPoint"
			(at 202.565 157.4801 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 196.85 153.67 0)
		)
		(property "Datasheet" "~"
			(at 196.85 153.67 0)
		)
		(property "Description" ""
			(at 196.85 158.75 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP31")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 31.75 50.8 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R20"
			(at 34.29 49.5299 0)
		)
		(property "Value" "10k"
			(at 34.29 52.0699 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 32.766 51.054 90)
		)
		(property "Datasheet" "~"
			(at 31.75 50.8 0)
		)
		(property "Description" ""
			(at 31.75 50.8 0)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 31.75 50.8 0)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 31.75 50.8 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "esp32"
				(path
					(reference "R20")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R18")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector_Generic:Conn_01x06")
		(at 234.95 114.3 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "J6"
			(at 237.49 114.2999 0)
		)
		(property "Value" "Conn_01x06"
			(at 237.49 116.8399 0)
		)
		(property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_1x06_P2.54mm_Vertical"
			(at 234.95 114.3 0)
		)
		(property "Datasheet" "~"
			(at 234.95 114.3 0)
		)
		(property "Description" "Generic connector, single row, 01x06, script generated (kicad-library-utils/schlib/autogen/connector/)"
			(at 234.95 114.3 0)
		)
		(pin "3")
		(pin "2")
		(pin "1")
		(pin "5")
		(pin "4")
		(pin "6")
		(instances
			(project "bitaxeHex"
				(path
					(reference "J6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 91.44 180.34 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP23"
			(at 104.775 180.34 90)
		)
		(property "Value" "TestPoint"
			(at 97.155 179.0701 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 91.44 175.26 0)
		)
		(property "Datasheet" "~"
			(at 91.44 175.26 0)
		)
		(property "Description" ""
			(at 91.44 180.34 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP23")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 31.75 85.09 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R20"
			(at 31.75 82.55 90)
		)
		(property "Value" "22.1k"
			(at 31.75 87.63 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 32.004 84.074 90)
		)
		(property "Datasheet" "~"
			(at 31.75 85.09 0)
		)
		(property "Description" ""
			(at 31.75 85.09 0)
		)
		(property "DK" "311-22.1KLRCT-ND"
			(at 31.75 85.09 0)
		)
		(property "PARTNO" "RC0402FR-0722K1L"
			(at 31.75 85.09 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R20")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:TC2030-IDC-NL")
		(at 182.88 156.21 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "J4"
			(at 182.88 143.51 0)
		)
		(property "Value" "TC2030-IDC"
			(at 182.88 146.05 0)
		)
		(property "Footprint" "bitaxe:Tag-Connect_TC2030-IDC-NL_2x03_P1.27mm_Vertical"
			(at 181.61 156.21 0)
		)
		(property "Datasheet" ""
			(at 181.61 156.21 0)
		)
		(property "Description" ""
			(at 182.88 156.21 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(instances
			(project "bitaxeHex"
				(path
					(reference "J4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 194.31 106.68 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP28"
			(at 200.66 106.68 90)
		)
		(property "Value" "TestPoint"
			(at 200.025 105.4101 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 194.31 101.6 0)
		)
		(property "Datasheet" "~"
			(at 194.31 101.6 0)
		)
		(property "Description" ""
			(at 194.31 106.68 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP28")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 21.59 132.08 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C31"
			(at 24.765 130.8099 0)
		)
		(property "Value" "10uF"
			(at 24.765 133.3499 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 22.5552 135.89 0)
		)
		(property "Datasheet" ""
			(at 21.59 132.08 0)
		)
		(property "Description" ""
			(at 21.59 132.08 0)
		)
		(property "DK" "490-18664-1-ND"
			(at 21.59 132.08 0)
		)
		(property "PARTNO" "GRM21BR61H106ME43L"
			(at 21.59 132.08 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "C31")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:Crystal")
		(at 237.49 148.59 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp yes)
		(property "Reference" "Y1"
			(at 237.49 141.605 0)
		)
		(property "Value" "32.768kHz"
			(at 237.49 144.145 0)
		)
		(property "Footprint" "bitaxe:SC32S-7PF20PPM"
			(at 237.49 148.59 0)
		)
		(property "Datasheet" "https://www.sii.co.jp/en/quartz/files/2013/03/SC-32S_Leaflet_e20151217.pdf"
			(at 237.49 148.59 0)
		)
		(property "Description" ""
			(at 237.49 148.59 0)
		)
		(property "DK" "728-1074-1-ND"
			(at 237.49 148.59 0)
		)
		(property "PARTNO" "SC32S-7PF20PPM"
			(at 237.49 148.59 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "Y1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 62.23 91.44 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP14"
			(at 55.88 91.44 90)
		)
		(property "Value" "TestPoint"
			(at 56.515 90.1701 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 62.23 86.36 0)
		)
		(property "Datasheet" "~"
			(at 62.23 86.36 0)
		)
		(property "Description" ""
			(at 62.23 91.44 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP14")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 62.23 106.68 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP18"
			(at 55.88 106.68 90)
		)
		(property "Value" "TestPoint"
			(at 56.515 107.9499 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 62.23 111.76 0)
		)
		(property "Datasheet" "~"
			(at 62.23 111.76 0)
		)
		(property "Description" ""
			(at 62.23 106.68 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP18")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:SN74AVC4T774")
		(at 77.47 166.37 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U5"
			(at 77.47 151.13 0)
		)
		(property "Value" "SN74AVC4T774"
			(at 77.47 153.67 0)
		)
		(property "Footprint" "Package_SO:TSSOP-16_4.4x5mm_P0.65mm"
			(at 80.01 167.64 0)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/sn74avc4t774.pdf"
			(at 80.01 166.37 0)
		)
		(property "Description" ""
			(at 77.47 166.37 0)
		)
		(property "DK" "296-24739-1-ND"
			(at 78.74 166.37 0)
		)
		(property "PARTNO" "SN74AVC4T774PWR"
			(at 77.47 166.37 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "bitaxeHex"
				(path
					(reference "U5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:USB_C_Receptacle_USB2.0")
		(at 251.46 73.66 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "J8"
			(at 261.62 54.61 0)
		)
		(property "Value" "USB_C_Receptacle_USB2.0"
			(at 240.03 52.07 0)
		)
		(property "Footprint" "Connector_USB:USB_C_Receptacle_GCT_USB4105-xx-A_16P_TopMnt_Horizontal"
			(at 247.65 73.66 0)
		)
		(property "Datasheet" "https://gct.co/connector/usb4105"
			(at 247.65 73.66 0)
		)
		(property "Description" ""
			(at 251.46 73.66 0)
		)
		(property "DK" "2073-USB4105-GF-ACT-ND"
			(at 251.46 73.66 0)
		)
		(property "PARTNO" "USB4105-GF-A"
			(at 251.46 73.66 0)
		)
		(pin "A1")
		(pin "A12")
		(pin "A4")
		(pin "A5")
		(pin "A6")
		(pin "A7")
		(pin "A8")
		(pin "A9")
		(pin "B1")
		(pin "B12")
		(pin "B4")
		(pin "B5")
		(pin "B6")
		(pin "B7")
		(pin "B8")
		(pin "B9")
		(pin "S1")
		(instances
			(project "esp32"
				(path
					(reference "J8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "J7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 62.23 111.76 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP19"
			(at 55.88 111.76 90)
		)
		(property "Value" "TestPoint"
			(at 56.515 113.0299 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 62.23 116.84 0)
		)
		(property "Datasheet" "~"
			(at 62.23 116.84 0)
		)
		(property "Description" ""
			(at 62.23 111.76 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP19")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 35.56 176.53 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP9"
			(at 29.21 176.53 90)
		)
		(property "Value" "TestPoint"
			(at 29.845 177.7999 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 35.56 181.61 0)
		)
		(property "Datasheet" "~"
			(at 35.56 181.61 0)
		)
		(property "Description" ""
			(at 35.56 176.53 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP9")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 62.23 129.54 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP20"
			(at 55.88 129.54 90)
		)
		(property "Value" "TestPoint"
			(at 56.515 130.8099 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 62.23 134.62 0)
		)
		(property "Datasheet" "~"
			(at 62.23 134.62 0)
		)
		(property "Description" ""
			(at 62.23 129.54 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP20")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 168.91 153.67 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP24"
			(at 162.56 153.67 90)
		)
		(property "Value" "TestPoint"
			(at 163.195 154.9399 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 168.91 158.75 0)
		)
		(property "Datasheet" "~"
			(at 168.91 158.75 0)
		)
		(property "Description" ""
			(at 168.91 153.67 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP24")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:SWITCH-SPST")
		(at 21.59 59.69 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "SW1"
			(at 21.59 54.61 0)
		)
		(property "Value" "SWITCH-SPST"
			(at 21.59 55.88 0)
		)
		(property "Footprint" "bitaxe:TL3340-switch"
			(at 21.59 67.31 0)
		)
		(property "Datasheet" "https://sten-eswitch-13110800-production.s3.amazonaws.com/system/asset/product_line/data_sheet/164/TL3340.pdf"
			(at 21.59 69.85 0)
		)
		(property "Description" ""
			(at 21.59 59.69 0)
		)
		(property "PARTNO" "TL3340AF160QG"
			(at 21.59 63.5 0)
		)
		(property "DK" "EG4627CT-ND"
			(at 21.59 60.96 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "SW1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 168.91 158.75 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP26"
			(at 162.56 158.75 90)
		)
		(property "Value" "TestPoint"
			(at 163.195 160.0199 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 168.91 163.83 0)
		)
		(property "Datasheet" "~"
			(at 168.91 163.83 0)
		)
		(property "Description" ""
			(at 168.91 158.75 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP26")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 45.72 109.22 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP10"
			(at 39.37 109.22 90)
		)
		(property "Value" "TestPoint"
			(at 40.005 110.4899 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 45.72 114.3 0)
		)
		(property "Datasheet" "~"
			(at 45.72 114.3 0)
		)
		(property "Description" ""
			(at 45.72 109.22 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP10")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 35.56 170.18 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP8"
			(at 29.21 170.18 90)
		)
		(property "Value" "TestPoint"
			(at 29.845 171.4499 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 35.56 175.26 0)
		)
		(property "Datasheet" "~"
			(at 35.56 175.26 0)
		)
		(property "Description" ""
			(at 35.56 170.18 0)
		)
		(pin "1")
		(instances
			(project "bitaxeHex"
				(path
					(reference "TP8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:ESP32-S3-WROOM-1")
		(at 129.54 101.6 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U6"
			(at 78.74 66.675 0)
		)
		(property "Value" "ESP32-S3-WROOM-1"
			(at 175.26 66.675 0)
		)
		(property "Footprint" "bitaxe:ESP32-S3-WROOM-1U"
			(at 129.54 134.62 0)
		)
		(property "Datasheet" "https://www.espressif.com/sites/default/files/documentation/esp32-s3-wroom-1_wroom-1u_datasheet_en.pdf"
			(at 129.54 137.16 0)
		)
		(property "Description" ""
			(at 129.54 101.6 0)
		)
		(property "DK" "1965-ESP32-S3-WROOM-1U-N16R8CT-ND"
			(at 129.54 101.6 0)
		)
		(property "PARTNO" "ESP32-S3-WROOM-1U-N16R8"
			(at 129.54 101.6 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "17")
		(pin "18")
		(pin "19")
		(pin "2")
		(pin "20")
		(pin "21")
		(pin "22")
		(pin "23")
		(pin "24")
		(pin "25")
		(pin "26")
		(pin "27")
		(pin "28")
		(pin "29")
		(pin "3")
		(pin "30")
		(pin "31")
		(pin "32")
		(pin "33")
		(pin "34")
		(pin "35")
		(pin "36")
		(pin "37")
		(pin "38")
		(pin "39")
		(pin "4")
		(pin "40")
		(pin "41")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "bitaxeHex"
				(path
					(reference "U6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 57.15 180.34 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R8"
			(at 52.705 179.07 0)
		)
		(property "Value" "20k"
			(at 52.705 181.61 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 56.134 180.086 90)
		)
		(property "Datasheet" "~"
			(at 57.15 180.34 0)
		)
		(property "Description" ""
			(at 57.15 180.34 0)
		)
		(property "DK" "311-20.0KLRCT-ND"
			(at 57.15 180.34 0)
		)
		(property "PARTNO" "RC0402FR-0720KL"
			(at 57.15 180.34 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "esp32"
				(path
					(reference "R8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R21")
					(unit 1)
				)
			)
		)
	)
)