(kicad_sch
	(version 20231120)
	(generator "eeschema")
	(generator_version "8.0")
	(paper "A")
	(title_block
		(title "bitaxeHex")
		(date "2024-03-09")
		(rev "303")
	)
	(lib_symbols
		(symbol "BM1366_mode1_1"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U14"
				(at 1.9559 24.13 0)
			)
			(property "Value" "BM1366_mode1"
				(at 1.9559 21.59 0)
			)
			(property "Footprint" "bitaxe:BM1366"
				(at 17.78 -33.02 0)
			)
			(property "Datasheet" ""
				(at -7.62 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "BM1366_mode1_1_0_1"
				(rectangle
					(start -15.24 20.32)
					(end 15.24 -17.78)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy 5.08 -1.27) (xy -5.08 -1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.08 -1.27) (xy 2.54 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.08 -1.27) (xy 2.54 0)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "BM1366_mode1_1_1_1"
				(pin power_in line
					(at -17.78 17.78 0)
					(length 2.54)
					(name "VDD1_0")
					(number "1")
				)
				(pin input line
					(at -17.78 -5.08 0)
					(length 2.54)
					(name "ADDR0")
					(number "10")
				)
				(pin input line
					(at -17.78 -7.62 0)
					(length 2.54)
					(name "ADDR1")
					(number "11")
				)
				(pin power_in line
					(at -17.78 -10.16 0)
					(length 2.54)
					(name "PLL_VSS")
					(number "12")
				)
				(pin power_in line
					(at -17.78 -12.7 0)
					(length 2.54)
					(name "VDDIO_08_0")
					(number "13")
				)
				(pin power_in line
					(at -17.78 -15.24 0)
					(length 2.54)
					(name "VDDIO_18_0")
					(number "14")
				)
				(pin power_in line
					(at 17.78 -15.24 180)
					(length 2.54)
					(name "VDDIO_18_1")
					(number "15")
				)
				(pin power_in line
					(at 17.78 -12.7 180)
					(length 2.54)
					(name "VDDIO_08_1")
					(number "16")
				)
				(pin power_in line
					(at 17.78 -10.16 180)
					(length 2.54)
					(name "VSS")
					(number "17")
				)
				(pin input line
					(at 17.78 -7.62 180)
					(length 2.54)
					(name "PIN_MODE")
					(number "18")
				)
				(pin output line
					(at 17.78 -5.08 180)
					(length 2.54)
					(name "INV_CLKO")
					(number "19")
				)
				(pin power_in line
					(at -17.78 15.24 0)
					(length 2.54)
					(name "VDD2_0")
					(number "2")
				)
				(pin output line
					(at 17.78 -2.54 180)
					(length 2.54)
					(name "CO")
					(number "20")
				)
				(pin output line
					(at 17.78 0 180)
					(length 2.54)
					(name "CLKO")
					(number "21")
				)
				(pin input line
					(at 17.78 2.54 180)
					(length 2.54)
					(name "RI")
					(number "22")
				)
				(pin output line
					(at 17.78 5.08 180)
					(length 2.54)
					(name "BO")
					(number "23")
				)
				(pin output line
					(at 17.78 7.62 180)
					(length 2.54)
					(name "NRSTO")
					(number "24")
				)
				(pin power_in line
					(at 17.78 10.16 180)
					(length 2.54)
					(name "VSS")
					(number "25")
				)
				(pin power_in line
					(at 17.78 12.7 180)
					(length 2.54)
					(name "VDD3_1")
					(number "26")
				)
				(pin power_in line
					(at 17.78 15.24 180)
					(length 2.54)
					(name "VDD2_1")
					(number "27")
				)
				(pin power_in line
					(at 17.78 17.78 180)
					(length 2.54)
					(name "VDD1_1")
					(number "28")
				)
				(pin power_in line
					(at 0 22.86 270)
					(length 2.54)
					(name "VDD")
					(number "29")
				)
				(pin power_in line
					(at -17.78 12.7 0)
					(length 2.54)
					(name "VDD3_0")
					(number "3")
				)
				(pin power_in line
					(at 0 -20.32 90)
					(length 2.54)
					(name "VSS")
					(number "30")
				)
				(pin power_in line
					(at -17.78 10.16 0)
					(length 2.54)
					(name "VSS")
					(number "4")
				)
				(pin input line
					(at -17.78 7.62 0)
					(length 2.54)
					(name "NRSTI")
					(number "5")
				)
				(pin input line
					(at -17.78 5.08 0)
					(length 2.54)
					(name "BI")
					(number "6")
				)
				(pin output line
					(at -17.78 2.54 0)
					(length 2.54)
					(name "RO")
					(number "7")
				)
				(pin input line
					(at -17.78 0 0)
					(length 2.54)
					(name "CLKI")
					(number "8")
				)
				(pin input line
					(at -17.78 -2.54 0)
					(length 2.54)
					(name "CI")
					(number "9")
				)
			)
		)
		(symbol "Connector:TestPoint"
			(pin_numbers hide)
			(pin_names
				(offset 0.762) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "TP"
				(at 0 6.858 0)
			)
			(property "Value" "TestPoint"
				(at 0 5.08 0)
			)
			(property "Footprint" ""
				(at 5.08 0 0)
			)
			(property "Datasheet" "~"
				(at 5.08 0 0)
			)
			(property "Description" "test point"
				(at 0 0 0)
			)
			(property "ki_keywords" "test point tp"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Pin* Test*"
				(at 0 0 0)
			)
			(symbol "TestPoint_0_1"
				(circle
					(center 0 3.302)
					(radius 0.762)
					(fill
						(type none)
					)
				)
			)
			(symbol "TestPoint_1_1"
				(pin passive line
					(at 0 0 90)
					(length 2.54)
					(name "1")
					(number "1")
				)
			)
		)
		(symbol "Device:C"
			(pin_numbers hide)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Unpolarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C_*"
				(at 0 0 0)
			)
			(symbol "C_0_1"
				(polyline
					(pts
						(xy -2.032 -0.762) (xy 2.032 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.032 0.762) (xy 2.032 0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:C_Polarized"
			(pin_numbers hide)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C_Polarized"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Polarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "CP_*"
				(at 0 0 0)
			)
			(symbol "C_Polarized_0_1"
				(rectangle
					(start -2.286 0.508)
					(end 2.286 1.016)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.778 2.286) (xy -0.762 2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 2.794) (xy -1.27 1.778)
					)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 2.286 -0.508)
					(end -2.286 -1.016)
					(fill
						(type outline)
					)
				)
			)
			(symbol "C_Polarized_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:R_US"
			(pin_numbers hide)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 2.54 0 90)
			)
			(property "Value" "R_US"
				(at -2.54 0 90)
			)
			(property "Footprint" ""
				(at 1.016 -0.254 90)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Resistor, US symbol"
				(at 0 0 0)
			)
			(property "ki_keywords" "R res resistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R_US_0_1"
				(polyline
					(pts
						(xy 0 -2.286) (xy 0 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.286) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -0.762) (xy 1.016 -1.143) (xy 0 -1.524) (xy -1.016 -1.905) (xy 0 -2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0.762) (xy 1.016 0.381) (xy 0 0) (xy -1.016 -0.381) (xy 0 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.286) (xy 1.016 1.905) (xy 0 1.524) (xy -1.016 1.143) (xy 0 0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_US_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "TLV3544_1"
			(pin_names
				(offset 0.127)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at 7.62 2.54 0)
			)
			(property "Value" "TLV3544"
				(at 11.43 -2.54 0)
			)
			(property "Footprint" "Package_SO:TSSOP-14_4.4x5mm_P0.65mm"
				(at 2.54 0 0)
			)
			(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tlv3542.pdf"
				(at 1.27 0 0)
			)
			(property "Description" "Low-power Operational Amplifier, SOT-353"
				(at 0 0 0)
			)
			(property "ki_locked" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "op amp operational amplifier"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOT*353*SC*70*"
				(at 0 0 0)
			)
			(symbol "TLV3544_1_0_1"
				(polyline
					(pts
						(xy -2.54 5.08) (xy -2.54 -5.08) (xy 7.62 0) (xy -2.54 5.08)
					)
					(fill
						(type background)
					)
				)
			)
			(symbol "TLV3544_1_1_1"
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "1")
				)
				(pin power_in line
					(at 0 -7.62 90)
					(length 3.81)
					(name "V-")
					(number "11")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "2")
				)
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "3")
				)
				(pin power_in line
					(at 0 7.62 270)
					(length 3.81)
					(name "V+")
					(number "4")
				)
			)
			(symbol "TLV3544_1_2_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "5")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "6")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "7")
				)
			)
			(symbol "TLV3544_1_3_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "10")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "8")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "9")
				)
			)
			(symbol "TLV3544_1_4_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "12")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "13")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "14")
				)
			)
		)
		(symbol "TLV3544_2"
			(pin_names
				(offset 0.127)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at 7.62 2.54 0)
			)
			(property "Value" "TLV3544"
				(at 11.43 -2.54 0)
			)
			(property "Footprint" "Package_SO:TSSOP-14_4.4x5mm_P0.65mm"
				(at 2.54 0 0)
			)
			(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tlv3542.pdf"
				(at 1.27 0 0)
			)
			(property "Description" "Low-power Operational Amplifier, SOT-353"
				(at 0 0 0)
			)
			(property "ki_locked" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "op amp operational amplifier"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOT*353*SC*70*"
				(at 0 0 0)
			)
			(symbol "TLV3544_2_0_1"
				(polyline
					(pts
						(xy -2.54 5.08) (xy -2.54 -5.08) (xy 7.62 0) (xy -2.54 5.08)
					)
					(fill
						(type background)
					)
				)
			)
			(symbol "TLV3544_2_1_1"
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "1")
				)
				(pin power_in line
					(at 0 -7.62 90)
					(length 3.81)
					(name "V-")
					(number "11")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "2")
				)
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "3")
				)
				(pin power_in line
					(at 0 7.62 270)
					(length 3.81)
					(name "V+")
					(number "4")
				)
			)
			(symbol "TLV3544_2_2_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "5")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "6")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "7")
				)
			)
			(symbol "TLV3544_2_3_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "10")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "8")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "9")
				)
			)
			(symbol "TLV3544_2_4_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "12")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "13")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "14")
				)
			)
		)
		(symbol "TLV3544_3"
			(pin_names
				(offset 0.127)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at 7.62 2.54 0)
			)
			(property "Value" "TLV3544"
				(at 11.43 -2.54 0)
			)
			(property "Footprint" "Package_SO:TSSOP-14_4.4x5mm_P0.65mm"
				(at 2.54 0 0)
			)
			(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tlv3542.pdf"
				(at 1.27 0 0)
			)
			(property "Description" "Low-power Operational Amplifier, SOT-353"
				(at 0 0 0)
			)
			(property "ki_locked" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "op amp operational amplifier"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOT*353*SC*70*"
				(at 0 0 0)
			)
			(symbol "TLV3544_3_0_1"
				(polyline
					(pts
						(xy -2.54 5.08) (xy -2.54 -5.08) (xy 7.62 0) (xy -2.54 5.08)
					)
					(fill
						(type background)
					)
				)
			)
			(symbol "TLV3544_3_1_1"
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "1")
				)
				(pin power_in line
					(at 0 -7.62 90)
					(length 3.81)
					(name "V-")
					(number "11")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "2")
				)
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "3")
				)
				(pin power_in line
					(at 0 7.62 270)
					(length 3.81)
					(name "V+")
					(number "4")
				)
			)
			(symbol "TLV3544_3_2_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "5")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "6")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "7")
				)
			)
			(symbol "TLV3544_3_3_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "10")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "8")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "9")
				)
			)
			(symbol "TLV3544_3_4_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "12")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "13")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "14")
				)
			)
		)
		(symbol "bitaxe:AP7331"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -7.62 5.08 0)
			)
			(property "Value" "AP7331"
				(at 5.08 5.08 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:TSOT-23-5"
				(at 0 10.16 0)
			)
			(property "Datasheet" "https://www.digikey.com/en/products/detail/diodes-incorporated/AP7331-WG-7/2270813"
				(at 0 7.62 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "AP7331_0_1"
				(rectangle
					(start -7.62 3.81)
					(end 7.62 -6.35)
					(fill
						(type background)
					)
				)
			)
			(symbol "AP7331_1_0"
				(pin power_in line
					(at -10.16 1.27 0)
					(length 2.54)
					(name "VIN")
					(number "1")
				)
				(pin bidirectional line
					(at -10.16 -3.81 0)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin input line
					(at -10.16 -1.27 0)
					(length 2.54)
					(name "EN")
					(number "3")
				)
				(pin bidirectional line
					(at 10.16 -3.81 180)
					(length 2.54)
					(name "ADJ")
					(number "4")
				)
				(pin power_out line
					(at 10.16 1.27 180)
					(length 2.54)
					(name "VOUT")
					(number "5")
				)
			)
		)
		(symbol "bitaxe:BM1366_mode1"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U14"
				(at 1.9559 24.13 0)
			)
			(property "Value" "BM1366_mode1"
				(at 1.9559 21.59 0)
			)
			(property "Footprint" "bitaxe:BM1366"
				(at 17.78 -33.02 0)
			)
			(property "Datasheet" ""
				(at -7.62 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "BM1366_mode1_0_1"
				(rectangle
					(start -15.24 20.32)
					(end 15.24 -17.78)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy 5.08 -1.27) (xy -5.08 -1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.08 -1.27) (xy 2.54 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.08 -1.27) (xy 2.54 0)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "BM1366_mode1_1_1"
				(pin power_in line
					(at -17.78 17.78 0)
					(length 2.54)
					(name "VDD1_0")
					(number "1")
				)
				(pin input line
					(at -17.78 -5.08 0)
					(length 2.54)
					(name "ADDR0")
					(number "10")
				)
				(pin input line
					(at -17.78 -7.62 0)
					(length 2.54)
					(name "ADDR1")
					(number "11")
				)
				(pin power_in line
					(at -17.78 -10.16 0)
					(length 2.54)
					(name "PLL_VSS")
					(number "12")
				)
				(pin power_in line
					(at -17.78 -12.7 0)
					(length 2.54)
					(name "VDDIO_08_0")
					(number "13")
				)
				(pin power_in line
					(at -17.78 -15.24 0)
					(length 2.54)
					(name "VDDIO_18_0")
					(number "14")
				)
				(pin power_in line
					(at 17.78 -15.24 180)
					(length 2.54)
					(name "VDDIO_18_1")
					(number "15")
				)
				(pin power_in line
					(at 17.78 -12.7 180)
					(length 2.54)
					(name "VDDIO_08_1")
					(number "16")
				)
				(pin power_in line
					(at 17.78 -10.16 180)
					(length 2.54)
					(name "VSS")
					(number "17")
				)
				(pin input line
					(at 17.78 -7.62 180)
					(length 2.54)
					(name "PIN_MODE")
					(number "18")
				)
				(pin output line
					(at 17.78 -5.08 180)
					(length 2.54)
					(name "INV_CLKO")
					(number "19")
				)
				(pin power_in line
					(at -17.78 15.24 0)
					(length 2.54)
					(name "VDD2_0")
					(number "2")
				)
				(pin output line
					(at 17.78 -2.54 180)
					(length 2.54)
					(name "CO")
					(number "20")
				)
				(pin output line
					(at 17.78 0 180)
					(length 2.54)
					(name "CLKO")
					(number "21")
				)
				(pin input line
					(at 17.78 2.54 180)
					(length 2.54)
					(name "RI")
					(number "22")
				)
				(pin output line
					(at 17.78 5.08 180)
					(length 2.54)
					(name "BO")
					(number "23")
				)
				(pin output line
					(at 17.78 7.62 180)
					(length 2.54)
					(name "NRSTO")
					(number "24")
				)
				(pin power_in line
					(at 17.78 10.16 180)
					(length 2.54)
					(name "VSS")
					(number "25")
				)
				(pin power_in line
					(at 17.78 12.7 180)
					(length 2.54)
					(name "VDD3_1")
					(number "26")
				)
				(pin power_in line
					(at 17.78 15.24 180)
					(length 2.54)
					(name "VDD2_1")
					(number "27")
				)
				(pin power_in line
					(at 17.78 17.78 180)
					(length 2.54)
					(name "VDD1_1")
					(number "28")
				)
				(pin power_in line
					(at 0 22.86 270)
					(length 2.54)
					(name "VDD")
					(number "29")
				)
				(pin power_in line
					(at -17.78 12.7 0)
					(length 2.54)
					(name "VDD3_0")
					(number "3")
				)
				(pin power_in line
					(at 0 -20.32 90)
					(length 2.54)
					(name "VSS")
					(number "30")
				)
				(pin power_in line
					(at -17.78 10.16 0)
					(length 2.54)
					(name "VSS")
					(number "4")
				)
				(pin input line
					(at -17.78 7.62 0)
					(length 2.54)
					(name "NRSTI")
					(number "5")
				)
				(pin input line
					(at -17.78 5.08 0)
					(length 2.54)
					(name "BI")
					(number "6")
				)
				(pin output line
					(at -17.78 2.54 0)
					(length 2.54)
					(name "RO")
					(number "7")
				)
				(pin input line
					(at -17.78 0 0)
					(length 2.54)
					(name "CLKI")
					(number "8")
				)
				(pin input line
					(at -17.78 -2.54 0)
					(length 2.54)
					(name "CI")
					(number "9")
				)
			)
		)
		(symbol "bitaxe:TLV3544"
			(pin_names
				(offset 0.127)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at 7.62 2.54 0)
			)
			(property "Value" "TLV3544"
				(at 11.43 -2.54 0)
			)
			(property "Footprint" "Package_SO:TSSOP-14_4.4x5mm_P0.65mm"
				(at 2.54 0 0)
			)
			(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tlv3542.pdf"
				(at 1.27 0 0)
			)
			(property "Description" "Low-power Operational Amplifier, SOT-353"
				(at 0 0 0)
			)
			(property "ki_locked" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "op amp operational amplifier"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOT*353*SC*70*"
				(at 0 0 0)
			)
			(symbol "TLV3544_0_1"
				(polyline
					(pts
						(xy -2.54 5.08) (xy -2.54 -5.08) (xy 7.62 0) (xy -2.54 5.08)
					)
					(fill
						(type background)
					)
				)
			)
			(symbol "TLV3544_1_1"
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "1")
				)
				(pin power_in line
					(at 0 -7.62 90)
					(length 3.81)
					(name "V-")
					(number "11")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "2")
				)
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "3")
				)
				(pin power_in line
					(at 0 7.62 270)
					(length 3.81)
					(name "V+")
					(number "4")
				)
			)
			(symbol "TLV3544_2_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "5")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "6")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "7")
				)
			)
			(symbol "TLV3544_3_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "10")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "8")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "9")
				)
			)
			(symbol "TLV3544_4_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "12")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "13")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "14")
				)
			)
		)
		(symbol "bitaxe:oscillator"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -3.81 5.08 0)
			)
			(property "Value" "oscillator"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at -1.27 -1.27 0)
			)
			(property "Datasheet" ""
				(at -1.27 -1.27 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "oscillator_0_1"
				(rectangle
					(start -5.08 3.81)
					(end 5.08 -3.81)
					(fill
						(type background)
					)
				)
			)
			(symbol "oscillator_1_0"
				(pin bidirectional line
					(at -7.62 1.27 0)
					(length 2.54)
					(name "EN")
					(number "1")
				)
				(pin bidirectional line
					(at -7.62 -1.27 0)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin bidirectional line
					(at 7.62 1.27 180)
					(length 2.54)
					(name "OUT")
					(number "3")
				)
				(pin bidirectional line
					(at 7.62 -1.27 180)
					(length 2.54)
					(name "VIN")
					(number "4")
				)
			)
		)
	)
	(junction
		(at 176.53 124.46)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 153.67 40.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 113.03 102.87)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 66.04 176.53)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 246.38 17.78)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 43.18 124.46)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 252.73 33.02)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 129.54 77.47)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 93.98 40.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 165.1 144.78)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 129.54 63.5)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 223.52 151.13)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 38.1 40.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 118.11 63.5)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 91.44 163.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 38.1 45.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 250.19 63.5)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 154.94 144.78)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 116.84 43.18)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 165.1 157.48)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 66.04 144.78)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 142.24 80.01)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 104.14 144.78)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 179.07 63.5)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 162.56 102.87)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 104.14 181.61)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 233.68 43.18)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 142.24 63.5)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 73.66 63.5)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 144.78 157.48)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 91.44 149.86)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 59.69 176.53)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 66.04 163.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 238.76 63.5)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 99.06 124.46)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 156.21 77.47)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 120.65 124.46)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 104.14 176.53)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 254 124.46)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 91.44 194.31)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 59.69 144.78)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 167.64 63.5)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 91.44 181.61)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 118.11 74.93)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 52.07 63.5)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 149.86 82.55)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 106.68 72.39)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 209.55 45.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 104.14 149.86)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 66.04 194.31)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 120.65 100.33)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 27.94 63.5)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 144.78 144.78)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 60.96 43.18)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 205.74 151.13)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 73.66 124.46)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 201.93 124.46)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 99.06 105.41)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 113.03 124.46)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 167.64 74.93)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 245.11 124.46)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 156.21 63.5)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 34.29 124.46)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 179.07 72.39)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 154.94 157.48)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 135.89 80.01)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 227.33 63.5)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 40.64 63.5)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 209.55 40.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 201.93 63.5)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 199.39 63.5)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 153.67 45.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 176.53 105.41)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 176.53 43.18)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 93.98 45.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 106.68 63.5)
		(diameter 0)
		(color 0 0 0 0)
	)
	(no_connect
		(at 219.71 97.79)
	)
	(no_connect
		(at 91.44 97.79)
	)
	(wire
		(pts
			(xy 154.94 154.94) (xy 154.94 157.48)
		)
	)
	(wire
		(pts
			(xy 101.6 181.61) (xy 104.14 181.61)
		)
	)
	(wire
		(pts
			(xy 162.56 124.46) (xy 162.56 119.38)
		)
	)
	(wire
		(pts
			(xy 189.23 40.64) (xy 198.12 40.64)
		)
	)
	(wire
		(pts
			(xy 40.64 74.93) (xy 55.88 74.93)
		)
	)
	(wire
		(pts
			(xy 176.53 43.18) (xy 170.18 43.18)
		)
	)
	(wire
		(pts
			(xy 224.79 29.21) (xy 233.68 29.21)
		)
	)
	(wire
		(pts
			(xy 44.45 34.29) (xy 53.34 34.29)
		)
	)
	(wire
		(pts
			(xy 227.33 43.18) (xy 233.68 43.18)
		)
	)
	(wire
		(pts
			(xy 99.06 105.41) (xy 99.06 111.76)
		)
	)
	(wire
		(pts
			(xy 243.84 43.18) (xy 247.65 43.18)
		)
	)
	(wire
		(pts
			(xy 233.68 29.21) (xy 233.68 43.18)
		)
	)
	(wire
		(pts
			(xy 201.93 63.5) (xy 201.93 67.31)
		)
	)
	(wire
		(pts
			(xy 93.98 45.72) (xy 95.25 45.72)
		)
	)
	(wire
		(pts
			(xy 113.03 102.87) (xy 162.56 102.87)
		)
	)
	(wire
		(pts
			(xy 246.38 33.02) (xy 252.73 33.02)
		)
	)
	(wire
		(pts
			(xy 91.44 74.93) (xy 118.11 74.93)
		)
	)
	(wire
		(pts
			(xy 132.08 45.72) (xy 142.24 45.72)
		)
	)
	(wire
		(pts
			(xy 176.53 147.32) (xy 176.53 144.78)
		)
	)
	(wire
		(pts
			(xy 176.53 119.38) (xy 176.53 124.46)
		)
	)
	(wire
		(pts
			(xy 162.56 102.87) (xy 162.56 111.76)
		)
	)
	(wire
		(pts
			(xy 165.1 63.5) (xy 167.64 63.5)
		)
	)
	(wire
		(pts
			(xy 250.19 63.5) (xy 252.73 63.5)
		)
	)
	(wire
		(pts
			(xy 142.24 80.01) (xy 142.24 63.5)
		)
	)
	(wire
		(pts
			(xy 176.53 29.21) (xy 176.53 43.18)
		)
	)
	(wire
		(pts
			(xy 227.33 72.39) (xy 227.33 63.5)
		)
	)
	(wire
		(pts
			(xy 129.54 63.5) (xy 132.08 63.5)
		)
	)
	(wire
		(pts
			(xy 91.44 181.61) (xy 91.44 184.15)
		)
	)
	(wire
		(pts
			(xy 246.38 27.94) (xy 246.38 33.02)
		)
	)
	(wire
		(pts
			(xy 254 124.46) (xy 254 119.38)
		)
	)
	(wire
		(pts
			(xy 60.96 63.5) (xy 73.66 63.5)
		)
	)
	(wire
		(pts
			(xy 91.44 194.31) (xy 91.44 191.77)
		)
	)
	(wire
		(pts
			(xy 168.91 29.21) (xy 176.53 29.21)
		)
	)
	(wire
		(pts
			(xy 53.34 95.25) (xy 55.88 95.25)
		)
	)
	(wire
		(pts
			(xy 153.67 50.8) (xy 153.67 45.72)
		)
	)
	(wire
		(pts
			(xy 44.45 50.8) (xy 44.45 52.07)
		)
	)
	(wire
		(pts
			(xy 104.14 160.02) (xy 104.14 163.83)
		)
	)
	(wire
		(pts
			(xy 209.55 40.64) (xy 212.09 40.64)
		)
	)
	(wire
		(pts
			(xy 91.44 90.17) (xy 184.15 90.17)
		)
	)
	(wire
		(pts
			(xy 165.1 157.48) (xy 154.94 157.48)
		)
	)
	(wire
		(pts
			(xy 156.21 77.47) (xy 184.15 77.47)
		)
	)
	(wire
		(pts
			(xy 252.73 33.02) (xy 260.35 33.02)
		)
	)
	(wire
		(pts
			(xy 118.11 74.93) (xy 118.11 63.5)
		)
	)
	(wire
		(pts
			(xy 118.11 74.93) (xy 167.64 74.93)
		)
	)
	(wire
		(pts
			(xy 38.1 29.21) (xy 45.72 29.21)
		)
	)
	(wire
		(pts
			(xy 260.35 100.33) (xy 260.35 124.46)
		)
	)
	(wire
		(pts
			(xy 153.67 29.21) (xy 161.29 29.21)
		)
	)
	(wire
		(pts
			(xy 91.44 181.61) (xy 93.98 181.61)
		)
	)
	(wire
		(pts
			(xy 91.44 102.87) (xy 113.03 102.87)
		)
	)
	(wire
		(pts
			(xy 189.23 45.72) (xy 198.12 45.72)
		)
	)
	(wire
		(pts
			(xy 219.71 77.47) (xy 250.19 77.47)
		)
	)
	(wire
		(pts
			(xy 135.89 80.01) (xy 142.24 80.01)
		)
	)
	(wire
		(pts
			(xy 201.93 124.46) (xy 245.11 124.46)
		)
	)
	(wire
		(pts
			(xy 91.44 77.47) (xy 129.54 77.47)
		)
	)
	(wire
		(pts
			(xy 104.14 194.31) (xy 91.44 194.31)
		)
	)
	(wire
		(pts
			(xy 252.73 20.32) (xy 252.73 17.78)
		)
	)
	(wire
		(pts
			(xy 167.64 63.5) (xy 170.18 63.5)
		)
	)
	(wire
		(pts
			(xy 135.89 96.52) (xy 135.89 80.01)
		)
	)
	(wire
		(pts
			(xy 38.1 63.5) (xy 40.64 63.5)
		)
	)
	(wire
		(pts
			(xy 165.1 157.48) (xy 176.53 157.48)
		)
	)
	(wire
		(pts
			(xy 116.84 43.18) (xy 124.46 43.18)
		)
	)
	(wire
		(pts
			(xy 153.67 40.64) (xy 154.94 40.64)
		)
	)
	(wire
		(pts
			(xy 219.71 85.09) (xy 231.14 85.09)
		)
	)
	(wire
		(pts
			(xy 219.71 105.41) (xy 245.11 105.41)
		)
	)
	(wire
		(pts
			(xy 120.65 100.33) (xy 184.15 100.33)
		)
	)
	(wire
		(pts
			(xy 34.29 50.8) (xy 38.1 50.8)
		)
	)
	(wire
		(pts
			(xy 52.07 63.5) (xy 52.07 72.39)
		)
	)
	(wire
		(pts
			(xy 44.45 52.07) (xy 53.34 52.07)
		)
	)
	(wire
		(pts
			(xy 72.39 45.72) (xy 82.55 45.72)
		)
	)
	(wire
		(pts
			(xy 91.44 92.71) (xy 184.15 92.71)
		)
	)
	(wire
		(pts
			(xy 106.68 72.39) (xy 179.07 72.39)
		)
	)
	(wire
		(pts
			(xy 144.78 147.32) (xy 144.78 144.78)
		)
	)
	(wire
		(pts
			(xy 134.62 154.94) (xy 134.62 157.48)
		)
	)
	(wire
		(pts
			(xy 53.34 29.21) (xy 60.96 29.21)
		)
	)
	(wire
		(pts
			(xy 104.14 191.77) (xy 104.14 194.31)
		)
	)
	(wire
		(pts
			(xy 154.94 147.32) (xy 154.94 144.78)
		)
	)
	(wire
		(pts
			(xy 219.71 160.02) (xy 223.52 160.02)
		)
	)
	(wire
		(pts
			(xy 205.74 45.72) (xy 209.55 45.72)
		)
	)
	(wire
		(pts
			(xy 31.75 85.09) (xy 55.88 85.09)
		)
	)
	(wire
		(pts
			(xy 104.14 163.83) (xy 91.44 163.83)
		)
	)
	(wire
		(pts
			(xy 219.71 102.87) (xy 254 102.87)
		)
	)
	(wire
		(pts
			(xy 104.14 149.86) (xy 104.14 152.4)
		)
	)
	(wire
		(pts
			(xy 90.17 45.72) (xy 93.98 45.72)
		)
	)
	(wire
		(pts
			(xy 38.1 50.8) (xy 38.1 45.72)
		)
	)
	(wire
		(pts
			(xy 40.64 74.93) (xy 40.64 63.5)
		)
	)
	(wire
		(pts
			(xy 66.04 179.07) (xy 66.04 176.53)
		)
	)
	(wire
		(pts
			(xy 156.21 77.47) (xy 156.21 63.5)
		)
	)
	(wire
		(pts
			(xy 43.18 119.38) (xy 43.18 124.46)
		)
	)
	(wire
		(pts
			(xy 52.07 63.5) (xy 53.34 63.5)
		)
	)
	(wire
		(pts
			(xy 59.69 176.53) (xy 59.69 181.61)
		)
	)
	(wire
		(pts
			(xy 120.65 124.46) (xy 129.54 124.46)
		)
	)
	(wire
		(pts
			(xy 205.74 151.13) (xy 208.28 151.13)
		)
	)
	(wire
		(pts
			(xy 142.24 63.5) (xy 139.7 63.5)
		)
	)
	(wire
		(pts
			(xy 223.52 151.13) (xy 229.87 151.13)
		)
	)
	(wire
		(pts
			(xy 49.53 63.5) (xy 52.07 63.5)
		)
	)
	(wire
		(pts
			(xy 132.08 40.64) (xy 142.24 40.64)
		)
	)
	(wire
		(pts
			(xy 116.84 29.21) (xy 116.84 43.18)
		)
	)
	(wire
		(pts
			(xy 99.06 124.46) (xy 113.03 124.46)
		)
	)
	(wire
		(pts
			(xy 134.62 147.32) (xy 134.62 144.78)
		)
	)
	(wire
		(pts
			(xy 59.69 144.78) (xy 66.04 144.78)
		)
	)
	(wire
		(pts
			(xy 104.14 181.61) (xy 104.14 176.53)
		)
	)
	(wire
		(pts
			(xy 218.44 63.5) (xy 201.93 63.5)
		)
	)
	(wire
		(pts
			(xy 149.86 82.55) (xy 184.15 82.55)
		)
	)
	(wire
		(pts
			(xy 246.38 17.78) (xy 246.38 20.32)
		)
	)
	(wire
		(pts
			(xy 91.44 80.01) (xy 135.89 80.01)
		)
	)
	(wire
		(pts
			(xy 237.49 63.5) (xy 238.76 63.5)
		)
	)
	(wire
		(pts
			(xy 68.58 179.07) (xy 66.04 179.07)
		)
	)
	(wire
		(pts
			(xy 189.23 63.5) (xy 199.39 63.5)
		)
	)
	(wire
		(pts
			(xy 233.68 43.18) (xy 236.22 43.18)
		)
	)
	(wire
		(pts
			(xy 134.62 144.78) (xy 144.78 144.78)
		)
	)
	(wire
		(pts
			(xy 176.53 105.41) (xy 176.53 111.76)
		)
	)
	(wire
		(pts
			(xy 106.68 72.39) (xy 106.68 63.5)
		)
	)
	(wire
		(pts
			(xy 219.71 80.01) (xy 264.16 80.01)
		)
	)
	(wire
		(pts
			(xy 73.66 110.49) (xy 73.66 124.46)
		)
	)
	(wire
		(pts
			(xy 113.03 124.46) (xy 120.65 124.46)
		)
	)
	(wire
		(pts
			(xy 104.14 176.53) (xy 109.22 176.53)
		)
	)
	(wire
		(pts
			(xy 205.74 50.8) (xy 209.55 50.8)
		)
	)
	(wire
		(pts
			(xy 34.29 119.38) (xy 34.29 124.46)
		)
	)
	(wire
		(pts
			(xy 264.16 63.5) (xy 260.35 63.5)
		)
	)
	(wire
		(pts
			(xy 59.69 189.23) (xy 59.69 194.31)
		)
	)
	(wire
		(pts
			(xy 91.44 105.41) (xy 99.06 105.41)
		)
	)
	(wire
		(pts
			(xy 176.53 154.94) (xy 176.53 157.48)
		)
	)
	(wire
		(pts
			(xy 129.54 77.47) (xy 129.54 63.5)
		)
	)
	(wire
		(pts
			(xy 60.96 43.18) (xy 54.61 43.18)
		)
	)
	(wire
		(pts
			(xy 31.75 92.71) (xy 55.88 92.71)
		)
	)
	(wire
		(pts
			(xy 176.53 43.18) (xy 181.61 43.18)
		)
	)
	(wire
		(pts
			(xy 43.18 105.41) (xy 55.88 105.41)
		)
	)
	(wire
		(pts
			(xy 165.1 154.94) (xy 165.1 157.48)
		)
	)
	(wire
		(pts
			(xy 106.68 63.5) (xy 109.22 63.5)
		)
	)
	(wire
		(pts
			(xy 241.3 17.78) (xy 246.38 17.78)
		)
	)
	(wire
		(pts
			(xy 128.27 63.5) (xy 129.54 63.5)
		)
	)
	(wire
		(pts
			(xy 116.84 132.08) (xy 129.54 132.08)
		)
	)
	(wire
		(pts
			(xy 91.44 87.63) (xy 184.15 87.63)
		)
	)
	(wire
		(pts
			(xy 104.14 144.78) (xy 109.22 144.78)
		)
	)
	(wire
		(pts
			(xy 91.44 149.86) (xy 93.98 149.86)
		)
	)
	(wire
		(pts
			(xy 205.74 160.02) (xy 205.74 151.13)
		)
	)
	(wire
		(pts
			(xy 66.04 194.31) (xy 91.44 194.31)
		)
	)
	(wire
		(pts
			(xy 109.22 29.21) (xy 116.84 29.21)
		)
	)
	(wire
		(pts
			(xy 201.93 110.49) (xy 201.93 124.46)
		)
	)
	(wire
		(pts
			(xy 40.64 63.5) (xy 41.91 63.5)
		)
	)
	(wire
		(pts
			(xy 219.71 92.71) (xy 231.14 92.71)
		)
	)
	(wire
		(pts
			(xy 16.51 45.72) (xy 26.67 45.72)
		)
	)
	(wire
		(pts
			(xy 153.67 63.5) (xy 156.21 63.5)
		)
	)
	(wire
		(pts
			(xy 90.17 40.64) (xy 93.98 40.64)
		)
	)
	(wire
		(pts
			(xy 93.98 29.21) (xy 93.98 40.64)
		)
	)
	(wire
		(pts
			(xy 88.9 149.86) (xy 91.44 149.86)
		)
	)
	(wire
		(pts
			(xy 176.53 124.46) (xy 201.93 124.46)
		)
	)
	(wire
		(pts
			(xy 91.44 100.33) (xy 120.65 100.33)
		)
	)
	(wire
		(pts
			(xy 219.71 74.93) (xy 238.76 74.93)
		)
	)
	(wire
		(pts
			(xy 101.6 149.86) (xy 104.14 149.86)
		)
	)
	(wire
		(pts
			(xy 181.61 95.25) (xy 184.15 95.25)
		)
	)
	(wire
		(pts
			(xy 250.19 77.47) (xy 250.19 63.5)
		)
	)
	(wire
		(pts
			(xy 219.71 87.63) (xy 231.14 87.63)
		)
	)
	(wire
		(pts
			(xy 149.86 82.55) (xy 149.86 96.52)
		)
	)
	(wire
		(pts
			(xy 149.86 50.8) (xy 153.67 50.8)
		)
	)
	(wire
		(pts
			(xy 248.92 63.5) (xy 250.19 63.5)
		)
	)
	(wire
		(pts
			(xy 73.66 124.46) (xy 99.06 124.46)
		)
	)
	(wire
		(pts
			(xy 66.04 144.78) (xy 68.58 144.78)
		)
	)
	(wire
		(pts
			(xy 153.67 29.21) (xy 153.67 40.64)
		)
	)
	(wire
		(pts
			(xy 153.67 45.72) (xy 154.94 45.72)
		)
	)
	(wire
		(pts
			(xy 209.55 45.72) (xy 212.09 45.72)
		)
	)
	(wire
		(pts
			(xy 219.71 72.39) (xy 227.33 72.39)
		)
	)
	(wire
		(pts
			(xy 93.98 50.8) (xy 93.98 45.72)
		)
	)
	(wire
		(pts
			(xy 238.76 74.93) (xy 238.76 63.5)
		)
	)
	(wire
		(pts
			(xy 149.86 45.72) (xy 153.67 45.72)
		)
	)
	(wire
		(pts
			(xy 195.58 59.69) (xy 199.39 59.69)
		)
	)
	(wire
		(pts
			(xy 162.56 124.46) (xy 176.53 124.46)
		)
	)
	(wire
		(pts
			(xy 34.29 102.87) (xy 34.29 111.76)
		)
	)
	(wire
		(pts
			(xy 146.05 96.52) (xy 149.86 96.52)
		)
	)
	(wire
		(pts
			(xy 181.61 97.79) (xy 184.15 97.79)
		)
	)
	(wire
		(pts
			(xy 209.55 29.21) (xy 217.17 29.21)
		)
	)
	(wire
		(pts
			(xy 53.34 97.79) (xy 55.88 97.79)
		)
	)
	(wire
		(pts
			(xy 113.03 124.46) (xy 113.03 119.38)
		)
	)
	(wire
		(pts
			(xy 142.24 80.01) (xy 184.15 80.01)
		)
	)
	(wire
		(pts
			(xy 227.33 63.5) (xy 229.87 63.5)
		)
	)
	(wire
		(pts
			(xy 91.44 72.39) (xy 106.68 72.39)
		)
	)
	(wire
		(pts
			(xy 176.53 105.41) (xy 184.15 105.41)
		)
	)
	(wire
		(pts
			(xy 50.8 176.53) (xy 59.69 176.53)
		)
	)
	(wire
		(pts
			(xy 219.71 82.55) (xy 231.14 82.55)
		)
	)
	(wire
		(pts
			(xy 91.44 163.83) (xy 91.44 161.29)
		)
	)
	(wire
		(pts
			(xy 199.39 151.13) (xy 205.74 151.13)
		)
	)
	(wire
		(pts
			(xy 104.14 181.61) (xy 104.14 184.15)
		)
	)
	(wire
		(pts
			(xy 105.41 63.5) (xy 106.68 63.5)
		)
	)
	(wire
		(pts
			(xy 88.9 181.61) (xy 91.44 181.61)
		)
	)
	(wire
		(pts
			(xy 97.79 63.5) (xy 73.66 63.5)
		)
	)
	(wire
		(pts
			(xy 189.23 50.8) (xy 198.12 50.8)
		)
	)
	(wire
		(pts
			(xy 15.24 80.01) (xy 15.24 63.5)
		)
	)
	(wire
		(pts
			(xy 116.84 63.5) (xy 118.11 63.5)
		)
	)
	(wire
		(pts
			(xy 88.9 176.53) (xy 104.14 176.53)
		)
	)
	(wire
		(pts
			(xy 27.94 77.47) (xy 27.94 63.5)
		)
	)
	(wire
		(pts
			(xy 44.45 35.56) (xy 44.45 34.29)
		)
	)
	(wire
		(pts
			(xy 260.35 124.46) (xy 254 124.46)
		)
	)
	(wire
		(pts
			(xy 68.58 181.61) (xy 66.04 181.61)
		)
	)
	(wire
		(pts
			(xy 165.1 147.32) (xy 165.1 144.78)
		)
	)
	(wire
		(pts
			(xy 144.78 144.78) (xy 154.94 144.78)
		)
	)
	(wire
		(pts
			(xy 43.18 105.41) (xy 43.18 111.76)
		)
	)
	(wire
		(pts
			(xy 252.73 27.94) (xy 252.73 33.02)
		)
	)
	(wire
		(pts
			(xy 219.71 100.33) (xy 260.35 100.33)
		)
	)
	(wire
		(pts
			(xy 120.65 100.33) (xy 120.65 124.46)
		)
	)
	(wire
		(pts
			(xy 246.38 17.78) (xy 252.73 17.78)
		)
	)
	(wire
		(pts
			(xy 156.21 63.5) (xy 157.48 63.5)
		)
	)
	(wire
		(pts
			(xy 26.67 63.5) (xy 27.94 63.5)
		)
	)
	(wire
		(pts
			(xy 226.06 63.5) (xy 227.33 63.5)
		)
	)
	(wire
		(pts
			(xy 245.11 119.38) (xy 245.11 124.46)
		)
	)
	(wire
		(pts
			(xy 31.75 82.55) (xy 55.88 82.55)
		)
	)
	(wire
		(pts
			(xy 34.29 45.72) (xy 38.1 45.72)
		)
	)
	(wire
		(pts
			(xy 27.94 77.47) (xy 55.88 77.47)
		)
	)
	(wire
		(pts
			(xy 134.62 50.8) (xy 142.24 50.8)
		)
	)
	(wire
		(pts
			(xy 264.16 80.01) (xy 264.16 63.5)
		)
	)
	(wire
		(pts
			(xy 55.88 80.01) (xy 15.24 80.01)
		)
	)
	(wire
		(pts
			(xy 144.78 157.48) (xy 134.62 157.48)
		)
	)
	(wire
		(pts
			(xy 68.58 147.32) (xy 66.04 147.32)
		)
	)
	(wire
		(pts
			(xy 66.04 181.61) (xy 66.04 194.31)
		)
	)
	(wire
		(pts
			(xy 43.18 124.46) (xy 73.66 124.46)
		)
	)
	(wire
		(pts
			(xy 60.96 43.18) (xy 66.04 43.18)
		)
	)
	(wire
		(pts
			(xy 179.07 72.39) (xy 184.15 72.39)
		)
	)
	(wire
		(pts
			(xy 90.17 50.8) (xy 93.98 50.8)
		)
	)
	(wire
		(pts
			(xy 66.04 149.86) (xy 66.04 163.83)
		)
	)
	(wire
		(pts
			(xy 66.04 147.32) (xy 66.04 144.78)
		)
	)
	(wire
		(pts
			(xy 99.06 105.41) (xy 176.53 105.41)
		)
	)
	(wire
		(pts
			(xy 209.55 29.21) (xy 209.55 40.64)
		)
	)
	(wire
		(pts
			(xy 34.29 124.46) (xy 43.18 124.46)
		)
	)
	(wire
		(pts
			(xy 199.39 63.5) (xy 201.93 63.5)
		)
	)
	(wire
		(pts
			(xy 219.71 95.25) (xy 223.52 95.25)
		)
	)
	(wire
		(pts
			(xy 59.69 158.75) (xy 59.69 163.83)
		)
	)
	(wire
		(pts
			(xy 38.1 45.72) (xy 39.37 45.72)
		)
	)
	(wire
		(pts
			(xy 68.58 149.86) (xy 66.04 149.86)
		)
	)
	(wire
		(pts
			(xy 73.66 63.5) (xy 73.66 67.31)
		)
	)
	(wire
		(pts
			(xy 254 102.87) (xy 254 111.76)
		)
	)
	(wire
		(pts
			(xy 66.04 176.53) (xy 68.58 176.53)
		)
	)
	(wire
		(pts
			(xy 27.94 100.33) (xy 55.88 100.33)
		)
	)
	(wire
		(pts
			(xy 27.94 63.5) (xy 30.48 63.5)
		)
	)
	(wire
		(pts
			(xy 167.64 74.93) (xy 167.64 63.5)
		)
	)
	(wire
		(pts
			(xy 31.75 87.63) (xy 55.88 87.63)
		)
	)
	(wire
		(pts
			(xy 31.75 90.17) (xy 55.88 90.17)
		)
	)
	(wire
		(pts
			(xy 50.8 144.78) (xy 59.69 144.78)
		)
	)
	(wire
		(pts
			(xy 91.44 95.25) (xy 109.22 95.25)
		)
	)
	(wire
		(pts
			(xy 93.98 40.64) (xy 95.25 40.64)
		)
	)
	(wire
		(pts
			(xy 223.52 148.59) (xy 245.11 148.59)
		)
	)
	(wire
		(pts
			(xy 91.44 82.55) (xy 149.86 82.55)
		)
	)
	(wire
		(pts
			(xy 199.39 148.59) (xy 208.28 148.59)
		)
	)
	(wire
		(pts
			(xy 60.96 29.21) (xy 60.96 43.18)
		)
	)
	(wire
		(pts
			(xy 16.51 40.64) (xy 26.67 40.64)
		)
	)
	(wire
		(pts
			(xy 116.84 43.18) (xy 110.49 43.18)
		)
	)
	(wire
		(pts
			(xy 38.1 40.64) (xy 39.37 40.64)
		)
	)
	(wire
		(pts
			(xy 245.11 124.46) (xy 254 124.46)
		)
	)
	(wire
		(pts
			(xy 179.07 63.5) (xy 181.61 63.5)
		)
	)
	(wire
		(pts
			(xy 99.06 119.38) (xy 99.06 124.46)
		)
	)
	(wire
		(pts
			(xy 76.2 50.8) (xy 82.55 50.8)
		)
	)
	(wire
		(pts
			(xy 167.64 74.93) (xy 184.15 74.93)
		)
	)
	(wire
		(pts
			(xy 27.94 124.46) (xy 34.29 124.46)
		)
	)
	(wire
		(pts
			(xy 19.05 50.8) (xy 26.67 50.8)
		)
	)
	(wire
		(pts
			(xy 93.98 29.21) (xy 101.6 29.21)
		)
	)
	(wire
		(pts
			(xy 245.11 105.41) (xy 245.11 111.76)
		)
	)
	(wire
		(pts
			(xy 34.29 40.64) (xy 38.1 40.64)
		)
	)
	(wire
		(pts
			(xy 34.29 102.87) (xy 55.88 102.87)
		)
	)
	(wire
		(pts
			(xy 199.39 59.69) (xy 199.39 63.5)
		)
	)
	(wire
		(pts
			(xy 72.39 40.64) (xy 82.55 40.64)
		)
	)
	(wire
		(pts
			(xy 66.04 163.83) (xy 91.44 163.83)
		)
	)
	(wire
		(pts
			(xy 154.94 144.78) (xy 165.1 144.78)
		)
	)
	(wire
		(pts
			(xy 162.56 102.87) (xy 184.15 102.87)
		)
	)
	(wire
		(pts
			(xy 88.9 144.78) (xy 104.14 144.78)
		)
	)
	(wire
		(pts
			(xy 212.09 160.02) (xy 205.74 160.02)
		)
	)
	(wire
		(pts
			(xy 149.86 40.64) (xy 153.67 40.64)
		)
	)
	(wire
		(pts
			(xy 59.69 144.78) (xy 59.69 151.13)
		)
	)
	(wire
		(pts
			(xy 179.07 63.5) (xy 179.07 72.39)
		)
	)
	(wire
		(pts
			(xy 165.1 144.78) (xy 176.53 144.78)
		)
	)
	(wire
		(pts
			(xy 27.94 100.33) (xy 27.94 124.46)
		)
	)
	(wire
		(pts
			(xy 144.78 157.48) (xy 154.94 157.48)
		)
	)
	(wire
		(pts
			(xy 104.14 149.86) (xy 104.14 144.78)
		)
	)
	(wire
		(pts
			(xy 219.71 90.17) (xy 231.14 90.17)
		)
	)
	(wire
		(pts
			(xy 59.69 176.53) (xy 66.04 176.53)
		)
	)
	(wire
		(pts
			(xy 59.69 194.31) (xy 66.04 194.31)
		)
	)
	(wire
		(pts
			(xy 91.44 149.86) (xy 91.44 153.67)
		)
	)
	(wire
		(pts
			(xy 38.1 29.21) (xy 38.1 40.64)
		)
	)
	(wire
		(pts
			(xy 177.8 63.5) (xy 179.07 63.5)
		)
	)
	(wire
		(pts
			(xy 113.03 102.87) (xy 113.03 111.76)
		)
	)
	(wire
		(pts
			(xy 91.44 85.09) (xy 184.15 85.09)
		)
	)
	(wire
		(pts
			(xy 238.76 63.5) (xy 241.3 63.5)
		)
	)
	(wire
		(pts
			(xy 142.24 63.5) (xy 146.05 63.5)
		)
	)
	(wire
		(pts
			(xy 144.78 154.94) (xy 144.78 157.48)
		)
	)
	(wire
		(pts
			(xy 223.52 160.02) (xy 223.52 151.13)
		)
	)
	(wire
		(pts
			(xy 209.55 50.8) (xy 209.55 45.72)
		)
	)
	(wire
		(pts
			(xy 118.11 63.5) (xy 120.65 63.5)
		)
	)
	(wire
		(pts
			(xy 129.54 77.47) (xy 156.21 77.47)
		)
	)
	(wire
		(pts
			(xy 138.43 96.52) (xy 135.89 96.52)
		)
	)
	(wire
		(pts
			(xy 52.07 72.39) (xy 55.88 72.39)
		)
	)
	(wire
		(pts
			(xy 205.74 40.64) (xy 209.55 40.64)
		)
	)
	(wire
		(pts
			(xy 59.69 163.83) (xy 66.04 163.83)
		)
	)
	(wire
		(pts
			(xy 15.24 63.5) (xy 19.05 63.5)
		)
	)
	(text "25MHz ASIC clock oscillator"
		(exclude_from_sim no)
		(at 201.93 166.37 0)
	)
	(text "Reference Voltage Regulators"
		(exclude_from_sim no)
		(at 66.04 138.43 0)
	)
	(text "OPAMP Bypass"
		(exclude_from_sim no)
		(at 243.84 36.83 0)
	)
	(text "TOP Voltage Domain\nActual LDO supply voltage:\nThese LDOs get 5V - (2*core voltage)\nWhen core voltage=1.5V, LDO supply is 2.0V\nWhen core voltage=1.2V, LDO supply is 2.6V "
		(exclude_from_sim no)
		(at 16.51 171.45 0)
	)
	(label "1V8"
		(at 229.87 151.13 180)
		(fields_autoplaced yes)
	)
	(label "NRSTI3"
		(at 124.46 43.18 180)
		(fields_autoplaced yes)
	)
	(label "0V8"
		(at 224.79 102.87 0)
		(fields_autoplaced yes)
	)
	(label "1V8"
		(at 43.18 105.41 0)
		(fields_autoplaced yes)
	)
	(label "CLKI3"
		(at 245.11 148.59 180)
		(fields_autoplaced yes)
	)
	(label "-VDD3"
		(at 260.35 33.02 180)
		(fields_autoplaced yes)
	)
	(label "RO3"
		(at 189.23 50.8 0)
		(fields_autoplaced yes)
	)
	(label "-VDD3"
		(at 53.34 52.07 180)
		(fields_autoplaced yes)
	)
	(label "GND3"
		(at 162.56 157.48 180)
		(fields_autoplaced yes)
	)
	(label "0V8"
		(at 176.53 102.87 0)
		(fields_autoplaced yes)
	)
	(label "5V"
		(at 52.07 176.53 0)
		(fields_autoplaced yes)
	)
	(label "NRSTI3"
		(at 31.75 82.55 0)
		(fields_autoplaced yes)
	)
	(label "CLKO3"
		(at 223.52 90.17 0)
		(fields_autoplaced yes)
	)
	(label "GND3"
		(at 175.26 80.01 0)
		(fields_autoplaced yes)
	)
	(label "CI3"
		(at 31.75 92.71 0)
		(fields_autoplaced yes)
	)
	(label "1V8"
		(at 224.79 105.41 0)
		(fields_autoplaced yes)
	)
	(label "5V"
		(at 52.07 144.78 0)
		(fields_autoplaced yes)
	)
	(label "GND3"
		(at 132.08 40.64 0)
		(fields_autoplaced yes)
	)
	(label "VDD3"
		(at 53.34 34.29 180)
		(fields_autoplaced yes)
	)
	(label "CO3"
		(at 223.52 92.71 0)
		(fields_autoplaced yes)
	)
	(label "1V8"
		(at 92.71 105.41 0)
		(fields_autoplaced yes)
	)
	(label "GND3"
		(at 77.47 124.46 0)
		(fields_autoplaced yes)
	)
	(label "RO3"
		(at 31.75 87.63 0)
		(fields_autoplaced yes)
	)
	(label "GND3"
		(at 96.52 80.01 0)
		(fields_autoplaced yes)
	)
	(label "0V8"
		(at 43.18 102.87 0)
		(fields_autoplaced yes)
	)
	(label "GND3"
		(at 72.39 40.64 0)
		(fields_autoplaced yes)
	)
	(label "GND3"
		(at 74.93 194.31 0)
		(fields_autoplaced yes)
	)
	(label "VDD3"
		(at 16.51 45.72 0)
		(fields_autoplaced yes)
	)
	(label "CLKI3"
		(at 31.75 90.17 0)
		(fields_autoplaced yes)
	)
	(label "RI3"
		(at 223.52 87.63 0)
		(fields_autoplaced yes)
	)
	(label "VDD3"
		(at 132.08 45.72 0)
		(fields_autoplaced yes)
	)
	(label "GND3"
		(at 16.51 40.64 0)
		(fields_autoplaced yes)
	)
	(label "-VDD3"
		(at 116.84 132.08 0)
		(fields_autoplaced yes)
	)
	(label "VDD3"
		(at 72.39 45.72 0)
		(fields_autoplaced yes)
	)
	(label "BI3"
		(at 181.61 43.18 180)
		(fields_autoplaced yes)
	)
	(label "BI3"
		(at 31.75 85.09 0)
		(fields_autoplaced yes)
	)
	(label "1V8"
		(at 176.53 105.41 0)
		(fields_autoplaced yes)
	)
	(label "GND3"
		(at 189.23 40.64 0)
		(fields_autoplaced yes)
	)
	(label "1V8"
		(at 199.39 148.59 0)
		(fields_autoplaced yes)
	)
	(label "0V8"
		(at 92.71 102.87 0)
		(fields_autoplaced yes)
	)
	(label "-VDD3"
		(at 189.23 45.72 0)
		(fields_autoplaced yes)
	)
	(label "VDD3"
		(at 204.47 63.5 0)
		(fields_autoplaced yes)
	)
	(label "VDD3"
		(at 157.48 144.78 0)
		(fields_autoplaced yes)
	)
	(label "1V8"
		(at 97.79 176.53 0)
		(fields_autoplaced yes)
	)
	(label "GND3"
		(at 255.27 80.01 0)
		(fields_autoplaced yes)
	)
	(label "GND3"
		(at 205.74 124.46 0)
		(fields_autoplaced yes)
	)
	(label "BO3"
		(at 223.52 85.09 0)
		(fields_autoplaced yes)
	)
	(label "CI3"
		(at 66.04 43.18 180)
		(fields_autoplaced yes)
	)
	(label "GND3"
		(at 199.39 151.13 0)
		(fields_autoplaced yes)
	)
	(label "GND3"
		(at 17.78 80.01 0)
		(fields_autoplaced yes)
	)
	(label "0V8"
		(at 97.79 144.78 0)
		(fields_autoplaced yes)
	)
	(label "GND3"
		(at 74.93 163.83 0)
		(fields_autoplaced yes)
	)
	(label "NRSTO3"
		(at 223.52 82.55 0)
		(fields_autoplaced yes)
	)
	(label "VDD3"
		(at 241.3 17.78 0)
		(fields_autoplaced yes)
	)
	(label "VDD3"
		(at 76.2 63.5 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "BI"
		(shape input)
		(at 134.62 50.8 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "GND3"
		(shape output)
		(at 129.54 124.46 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "VDD3"
		(shape input)
		(at 195.58 59.69 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "CI"
		(shape input)
		(at 19.05 50.8 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "5V"
		(shape input)
		(at 50.8 144.78 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "RO"
		(shape output)
		(at 247.65 43.18 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "5V"
		(shape input)
		(at 50.8 176.53 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "NRSTI"
		(shape input)
		(at 76.2 50.8 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "-VDD3"
		(shape input)
		(at 129.54 132.08 0)
		(fields_autoplaced yes)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 231.14 92.71 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 237.49 92.71 90)
		)
		(property "Value" "TestPoint"
			(at 236.855 91.4401 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 231.14 87.63 0)
		)
		(property "Datasheet" "~"
			(at 231.14 87.63 0)
		)
		(property "Description" ""
			(at 231.14 92.71 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP63")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 256.54 63.5 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C18"
			(at 254 60.96 90)
		)
		(property "Value" "1uF"
			(at 255.27 64.135 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 256.54 63.5 0)
		)
		(property "Datasheet" ""
			(at 256.54 63.5 0)
		)
		(property "Description" ""
			(at 256.54 63.5 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 256.54 63.5 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 256.54 63.5 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C18")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C150")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 222.25 63.5 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C12"
			(at 219.075 60.96 90)
		)
		(property "Value" "1uF"
			(at 220.98 64.135 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 222.25 63.5 0)
		)
		(property "Datasheet" ""
			(at 222.25 63.5 0)
		)
		(property "Description" ""
			(at 222.25 63.5 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 222.25 63.5 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 222.25 63.5 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C12")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C143")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 57.15 63.5 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 54.61 60.96 90)
		)
		(property "Value" "1uF"
			(at 55.88 64.135 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 57.15 63.5 0)
		)
		(property "Datasheet" ""
			(at 57.15 63.5 0)
		)
		(property "Description" ""
			(at 57.15 63.5 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 57.15 63.5 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 57.15 63.5 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C120")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 201.93 40.64 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 198.12 42.545 90)
		)
		(property "Value" "1k"
			(at 205.74 42.545 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 201.676 41.656 90)
		)
		(property "Datasheet" "~"
			(at 201.93 40.64 0)
		)
		(property "Description" ""
			(at 201.93 40.64 0)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 201.93 40.64 0)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 201.93 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R73")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 86.36 45.72 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 82.55 47.625 90)
		)
		(property "Value" "10k"
			(at 90.17 47.625 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 86.614 44.704 90)
		)
		(property "Datasheet" "~"
			(at 86.36 45.72 0)
		)
		(property "Description" ""
			(at 86.36 45.72 0)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 86.36 45.72 0)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 86.36 45.72 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R61")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 104.14 187.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C24"
			(at 105.41 186.055 0)
		)
		(property "Value" "1uF"
			(at 106.045 191.77 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 104.14 187.96 0)
		)
		(property "Datasheet" ""
			(at 104.14 187.96 0)
		)
		(property "Description" ""
			(at 104.14 187.96 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 104.14 187.96 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 104.14 187.96 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C24")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C126")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 161.29 63.5 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C3"
			(at 158.75 60.96 90)
		)
		(property "Value" "1uF"
			(at 160.02 64.135 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 161.29 63.5 0)
		)
		(property "Datasheet" ""
			(at 161.29 63.5 0)
		)
		(property "Description" ""
			(at 161.29 63.5 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 161.29 63.5 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 161.29 63.5 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C3")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C135")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 231.14 85.09 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 237.49 85.09 90)
		)
		(property "Value" "TestPoint"
			(at 236.855 83.8201 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 231.14 80.01 0)
		)
		(property "Datasheet" "~"
			(at 231.14 80.01 0)
		)
		(property "Description" ""
			(at 231.14 85.09 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP60")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 113.03 115.57 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C16"
			(at 113.665 113.665 0)
		)
		(property "Value" "1uF"
			(at 114.3 119.38 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 113.03 115.57 0)
		)
		(property "Datasheet" ""
			(at 113.03 115.57 0)
		)
		(property "Description" ""
			(at 113.03 115.57 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 113.03 115.57 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 113.03 115.57 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C16")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C128")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 231.14 82.55 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 237.49 82.55 90)
		)
		(property "Value" "TestPoint"
			(at 236.855 81.2801 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 231.14 77.47 0)
		)
		(property "Datasheet" "~"
			(at 231.14 77.47 0)
		)
		(property "Description" ""
			(at 231.14 82.55 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP59")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 223.52 95.25 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 229.87 95.25 90)
		)
		(property "Value" "TestPoint"
			(at 229.235 93.9801 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 223.52 90.17 0)
		)
		(property "Datasheet" "~"
			(at 223.52 90.17 0)
		)
		(property "Description" ""
			(at 223.52 95.25 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP58")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Polarized")
		(at 176.53 151.13 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C13"
			(at 179.705 148.9709 0)
		)
		(property "Value" "330uF"
			(at 179.705 151.5109 0)
		)
		(property "Footprint" "Capacitor_Tantalum_SMD:CP_EIA-7343-31_Kemet-D_Pad2.25x2.55mm_HandSolder"
			(at 177.4952 154.94 0)
		)
		(property "Datasheet" "~"
			(at 176.53 151.13 0)
		)
		(property "Description" ""
			(at 176.53 151.13 0)
		)
		(property "DK" "718-1028-1-ND"
			(at 176.53 151.13 0)
		)
		(property "PARTNO" "293D337X9010E2TE3"
			(at 176.53 151.13 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C140")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 165.1 29.21 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 161.29 30.48 90)
		)
		(property "Value" "1k"
			(at 170.18 30.48 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 164.846 30.226 90)
		)
		(property "Datasheet" "~"
			(at 165.1 29.21 0)
		)
		(property "Description" ""
			(at 165.1 29.21 0)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 165.1 29.21 0)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 165.1 29.21 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R72")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 91.44 187.96 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R64"
			(at 85.09 186.69 0)
		)
		(property "Value" "115k"
			(at 85.09 189.23 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 90.424 187.706 90)
		)
		(property "Datasheet" "~"
			(at 91.44 187.96 0)
		)
		(property "Description" ""
			(at 91.44 187.96 0)
		)
		(property "DK" "YAG2956CT-ND"
			(at 91.44 187.96 0)
		)
		(property "PARTNO" "RC0402FR-07115KL"
			(at 91.44 187.96 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R64")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 91.44 157.48 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R63"
			(at 85.09 156.21 0)
		)
		(property "Value" "115k"
			(at 85.09 158.75 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 90.424 157.226 90)
		)
		(property "Datasheet" "~"
			(at 91.44 157.48 0)
		)
		(property "Description" ""
			(at 91.44 157.48 0)
		)
		(property "DK" "YAG2956CT-ND"
			(at 91.44 157.48 0)
		)
		(property "PARTNO" "RC0402FR-07115KL"
			(at 91.44 157.48 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R63")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 254 115.57 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C16"
			(at 254.635 113.665 0)
		)
		(property "Value" "1uF"
			(at 255.27 119.38 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 254 115.57 0)
		)
		(property "Datasheet" ""
			(at 254 115.57 0)
		)
		(property "Description" ""
			(at 254 115.57 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 254 115.57 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 254 115.57 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C16")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C149")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 176.53 115.57 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5"
			(at 177.8 113.665 0)
		)
		(property "Value" "1uF"
			(at 177.8 119.38 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 176.53 115.57 0)
		)
		(property "Datasheet" ""
			(at 176.53 115.57 0)
		)
		(property "Description" ""
			(at 176.53 115.57 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 176.53 115.57 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 176.53 115.57 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C5")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C139")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 173.99 63.5 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6"
			(at 171.45 60.96 90)
		)
		(property "Value" "1uF"
			(at 172.72 64.135 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 173.99 63.5 0)
		)
		(property "Datasheet" ""
			(at 173.99 63.5 0)
		)
		(property "Description" ""
			(at 173.99 63.5 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 173.99 63.5 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 173.99 63.5 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C138")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 220.98 29.21 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 217.17 30.48 90)
		)
		(property "Value" "1k"
			(at 226.06 30.48 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 220.726 30.226 90)
		)
		(property "Datasheet" "~"
			(at 220.98 29.21 0)
		)
		(property "Description" ""
			(at 220.98 29.21 0)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 220.98 29.21 0)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 220.98 29.21 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R76")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 231.14 87.63 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 237.49 87.63 90)
		)
		(property "Value" "TestPoint"
			(at 236.855 86.3601 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 231.14 82.55 0)
		)
		(property "Datasheet" "~"
			(at 231.14 82.55 0)
		)
		(property "Description" ""
			(at 231.14 87.63 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP61")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "TLV3544_2")
		(lib_id "bitaxe:TLV3544")
		(at 100.33 43.18 0)
		(unit 2)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U21"
			(at 107.315 40.005 0)
		)
		(property "Value" "TLV3544"
			(at 108.585 46.99 0)
		)
		(property "Footprint" "Package_SO:TSSOP-14_4.4x5mm_P0.65mm"
			(at 102.87 43.18 0)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tlv3542.pdf"
			(at 101.6 43.18 0)
		)
		(property "Description" ""
			(at 100.33 43.18 0)
		)
		(property "DK" "296-45352-1-ND"
			(at 100.33 43.18 0)
		)
		(property "PARTNO" "TLV3544IPWR"
			(at 100.33 43.18 0)
		)
		(pin "1")
		(pin "11")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "10")
		(pin "8")
		(pin "9")
		(pin "12")
		(pin "13")
		(pin "14")
		(instances
			(project "bitaxeHex"
				(path
					(reference "U21")
					(unit 2)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 135.89 63.5 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C18"
			(at 133.35 60.96 90)
		)
		(property "Value" "1uF"
			(at 134.62 64.135 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 135.89 63.5 0)
		)
		(property "Datasheet" ""
			(at 135.89 63.5 0)
		)
		(property "Description" ""
			(at 135.89 63.5 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 135.89 63.5 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 135.89 63.5 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C18")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C131")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 146.05 50.8 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 142.24 52.705 90)
		)
		(property "Value" "10k"
			(at 149.86 52.705 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 146.304 49.784 90)
		)
		(property "Datasheet" "~"
			(at 146.05 50.8 0)
		)
		(property "Description" ""
			(at 146.05 50.8 0)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 146.05 50.8 0)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 146.05 50.8 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R71")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 142.24 96.52 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 142.24 93.98 90)
		)
		(property "Value" "2k"
			(at 142.24 99.06 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 142.494 95.504 90)
		)
		(property "Datasheet" "~"
			(at 142.24 96.52 0)
		)
		(property "Description" ""
			(at 142.24 96.52 0)
		)
		(property "DK" "YAG2303CT-ND"
			(at 142.24 96.52 0)
		)
		(property "PARTNO" "RT0402BRD072KL"
			(at 142.24 96.52 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R68")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 113.03 63.5 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C15"
			(at 110.49 60.96 90)
		)
		(property "Value" "1uF"
			(at 111.76 64.135 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 113.03 63.5 0)
		)
		(property "Datasheet" ""
			(at 113.03 63.5 0)
		)
		(property "Description" ""
			(at 113.03 63.5 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 113.03 63.5 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 113.03 63.5 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C15")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C127")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 144.78 151.13 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 142.875 147.955 0)
		)
		(property "Value" "0.1uF"
			(at 143.51 153.67 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 144.78 151.13 0)
		)
		(property "Datasheet" ""
			(at 144.78 151.13 0)
		)
		(property "Description" ""
			(at 144.78 151.13 0)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 144.78 151.13 0)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 144.78 151.13 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C132")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 252.73 24.13 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 259.08 20.955 0)
		)
		(property "Value" "1uF"
			(at 258.445 26.67 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 252.73 24.13 0)
		)
		(property "Datasheet" ""
			(at 252.73 24.13 0)
		)
		(property "Description" ""
			(at 252.73 24.13 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 252.73 24.13 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 252.73 24.13 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C148")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 245.11 63.5 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C17"
			(at 242.57 60.96 90)
		)
		(property "Value" "1uF"
			(at 243.84 64.135 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 245.11 63.5 0)
		)
		(property "Datasheet" ""
			(at 245.11 63.5 0)
		)
		(property "Description" ""
			(at 245.11 63.5 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 245.11 63.5 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 245.11 63.5 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C17")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C145")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 45.72 63.5 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6"
			(at 43.18 60.96 90)
		)
		(property "Value" "1uF"
			(at 44.45 64.135 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 45.72 63.5 0)
		)
		(property "Datasheet" ""
			(at 45.72 63.5 0)
		)
		(property "Description" ""
			(at 45.72 63.5 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 45.72 63.5 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 45.72 63.5 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C119")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 146.05 40.64 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 142.24 42.545 90)
		)
		(property "Value" "1k"
			(at 149.86 42.545 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 145.796 41.656 90)
		)
		(property "Datasheet" "~"
			(at 146.05 40.64 0)
		)
		(property "Description" ""
			(at 146.05 40.64 0)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 146.05 40.64 0)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 146.05 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R69")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 30.48 40.64 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 26.67 42.545 90)
		)
		(property "Value" "1k"
			(at 34.29 42.545 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 30.226 41.656 90)
		)
		(property "Datasheet" "~"
			(at 30.48 40.64 0)
		)
		(property "Description" ""
			(at 30.48 40.64 0)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 30.48 40.64 0)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 30.48 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R56")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 149.86 63.5 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C2"
			(at 147.32 60.96 90)
		)
		(property "Value" "1uF"
			(at 148.59 64.135 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 149.86 63.5 0)
		)
		(property "Datasheet" ""
			(at 149.86 63.5 0)
		)
		(property "Description" ""
			(at 149.86 63.5 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 149.86 63.5 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 149.86 63.5 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C2")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C133")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 104.14 156.21 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C24"
			(at 105.41 154.305 0)
		)
		(property "Value" "1uF"
			(at 106.045 160.02 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 104.14 156.21 0)
		)
		(property "Datasheet" ""
			(at 104.14 156.21 0)
		)
		(property "Description" ""
			(at 104.14 156.21 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 104.14 156.21 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 104.14 156.21 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C24")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C125")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "TLV3544_3")
		(lib_id "bitaxe:TLV3544")
		(at 160.02 43.18 0)
		(unit 3)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U21"
			(at 165.735 39.37 0)
		)
		(property "Value" "TLV3544"
			(at 167.64 46.99 0)
		)
		(property "Footprint" "Package_SO:TSSOP-14_4.4x5mm_P0.65mm"
			(at 162.56 43.18 0)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tlv3542.pdf"
			(at 161.29 43.18 0)
		)
		(property "Description" ""
			(at 160.02 43.18 0)
		)
		(property "DK" "296-45352-1-ND"
			(at 160.02 43.18 0)
		)
		(property "PARTNO" "TLV3544IPWR"
			(at 160.02 43.18 0)
		)
		(pin "1")
		(pin "11")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "10")
		(pin "8")
		(pin "9")
		(pin "12")
		(pin "13")
		(pin "14")
		(instances
			(project "bitaxeHex"
				(path
					(reference "U21")
					(unit 3)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 134.62 151.13 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 132.715 147.955 0)
		)
		(property "Value" "0.1uF"
			(at 133.35 153.67 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 134.62 151.13 0)
		)
		(property "Datasheet" ""
			(at 134.62 151.13 0)
		)
		(property "Description" ""
			(at 134.62 151.13 0)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 134.62 151.13 0)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 134.62 151.13 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C130")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 246.38 24.13 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 244.475 20.955 0)
		)
		(property "Value" "0.1uF"
			(at 245.11 26.67 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 246.38 24.13 0)
		)
		(property "Datasheet" ""
			(at 246.38 24.13 0)
		)
		(property "Description" ""
			(at 246.38 24.13 0)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 246.38 24.13 0)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 246.38 24.13 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C147")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 201.93 50.8 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 198.12 52.705 90)
		)
		(property "Value" "10k"
			(at 205.74 52.705 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 202.184 49.784 90)
		)
		(property "Datasheet" "~"
			(at 201.93 50.8 0)
		)
		(property "Description" ""
			(at 201.93 50.8 0)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 201.93 50.8 0)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 201.93 50.8 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R75")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:AP7331")
		(at 78.74 146.05 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U23"
			(at 78.74 140.97 0)
		)
		(property "Value" "AP7331"
			(at 78.74 153.67 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:TSOT-23-5"
			(at 78.74 135.89 0)
		)
		(property "Datasheet" "https://www.digikey.com/en/products/detail/diodes-incorporated/AP7331-WG-7/2270813"
			(at 78.74 138.43 0)
		)
		(property "Description" ""
			(at 78.74 146.05 0)
		)
		(property "DK" "AP7331-WG-7DICT-ND"
			(at 78.74 146.05 0)
		)
		(property "PARTNO" "AP7331-WG-7"
			(at 78.74 146.05 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(instances
			(project "bitaxeHex"
				(path
					(reference "U23")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:TLV3544")
		(at 217.17 43.18 0)
		(unit 4)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U21"
			(at 224.155 38.735 0)
		)
		(property "Value" "TLV3544"
			(at 225.425 46.355 0)
		)
		(property "Footprint" "Package_SO:TSSOP-14_4.4x5mm_P0.65mm"
			(at 219.71 43.18 0)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tlv3542.pdf"
			(at 218.44 43.18 0)
		)
		(property "Description" ""
			(at 217.17 43.18 0)
		)
		(property "DK" "296-45352-1-ND"
			(at 217.17 43.18 0)
		)
		(property "PARTNO" "TLV3544IPWR"
			(at 217.17 43.18 0)
		)
		(pin "1")
		(pin "11")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "10")
		(pin "8")
		(pin "9")
		(pin "12")
		(pin "13")
		(pin "14")
		(instances
			(project "bitaxeHex"
				(path
					(reference "U21")
					(unit 4)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 99.06 115.57 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C14"
			(at 99.695 113.665 0)
		)
		(property "Value" "1uF"
			(at 99.695 119.38 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 99.06 115.57 0)
		)
		(property "Datasheet" ""
			(at 99.06 115.57 0)
		)
		(property "Description" ""
			(at 99.06 115.57 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 99.06 115.57 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 99.06 115.57 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C14")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C123")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 124.46 63.5 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C17"
			(at 121.92 60.96 90)
		)
		(property "Value" "1uF"
			(at 123.19 64.135 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 124.46 63.5 0)
		)
		(property "Datasheet" ""
			(at 124.46 63.5 0)
		)
		(property "Description" ""
			(at 124.46 63.5 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 124.46 63.5 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 124.46 63.5 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C17")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C129")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 181.61 95.25 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 175.26 95.25 90)
		)
		(property "Value" "TestPoint"
			(at 175.895 96.5199 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 181.61 100.33 0)
		)
		(property "Datasheet" "~"
			(at 181.61 100.33 0)
		)
		(property "Description" ""
			(at 181.61 95.25 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP56")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 43.18 115.57 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5"
			(at 44.45 113.665 0)
		)
		(property "Value" "1uF"
			(at 44.45 119.38 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 43.18 115.57 0)
		)
		(property "Datasheet" ""
			(at 43.18 115.57 0)
		)
		(property "Description" ""
			(at 43.18 115.57 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 43.18 115.57 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 43.18 115.57 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C5")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C118")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 165.1 151.13 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C11"
			(at 166.37 149.225 0)
		)
		(property "Value" "1uF"
			(at 166.37 154.305 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 165.1 151.13 0)
		)
		(property "Datasheet" ""
			(at 165.1 151.13 0)
		)
		(property "Description" ""
			(at 165.1 151.13 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 165.1 151.13 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 165.1 151.13 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C11")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C137")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 109.22 144.78 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 115.57 144.78 90)
		)
		(property "Value" "TestPoint"
			(at 114.935 143.5101 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 109.22 139.7 0)
		)
		(property "Datasheet" "~"
			(at 109.22 139.7 0)
		)
		(property "Description" ""
			(at 109.22 144.78 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP54")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 101.6 63.5 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C12"
			(at 98.425 60.96 90)
		)
		(property "Value" "1uF"
			(at 100.33 64.135 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 101.6 63.5 0)
		)
		(property "Datasheet" ""
			(at 101.6 63.5 0)
		)
		(property "Description" ""
			(at 101.6 63.5 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 101.6 63.5 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 101.6 63.5 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C12")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C124")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:AP7331")
		(at 78.74 177.8 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U24"
			(at 78.74 172.72 0)
		)
		(property "Value" "AP7331"
			(at 78.74 185.42 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:TSOT-23-5"
			(at 78.74 167.64 0)
		)
		(property "Datasheet" "https://www.digikey.com/en/products/detail/diodes-incorporated/AP7331-WG-7/2270813"
			(at 78.74 170.18 0)
		)
		(property "Description" ""
			(at 78.74 177.8 0)
		)
		(property "DK" "AP7331-WG-7DICT-ND"
			(at 78.74 177.8 0)
		)
		(property "PARTNO" "AP7331-WG-7"
			(at 78.74 177.8 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(instances
			(project "bitaxeHex"
				(path
					(reference "U24")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 146.05 45.72 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 142.24 47.625 90)
		)
		(property "Value" "10k"
			(at 149.86 47.625 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 146.304 44.704 90)
		)
		(property "Datasheet" "~"
			(at 146.05 45.72 0)
		)
		(property "Description" ""
			(at 146.05 45.72 0)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 146.05 45.72 0)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 146.05 45.72 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R70")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "TLV3544_1")
		(lib_id "bitaxe:TLV3544")
		(at 44.45 43.18 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U21"
			(at 52.07 40.005 0)
		)
		(property "Value" "TLV3544"
			(at 53.975 46.355 0)
		)
		(property "Footprint" "Package_SO:TSSOP-14_4.4x5mm_P0.65mm"
			(at 46.99 43.18 0)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tlv3542.pdf"
			(at 45.72 43.18 0)
		)
		(property "Description" ""
			(at 44.45 43.18 0)
		)
		(property "DK" "296-45352-1-ND"
			(at 44.45 43.18 0)
		)
		(property "PARTNO" "TLV3544IPWR"
			(at 44.45 43.18 0)
		)
		(pin "1")
		(pin "11")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "10")
		(pin "8")
		(pin "9")
		(pin "12")
		(pin "13")
		(pin "14")
		(instances
			(project "bitaxeHex"
				(path
					(reference "U21")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 30.48 50.8 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 26.67 52.705 90)
		)
		(property "Value" "10k"
			(at 34.29 52.705 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 30.734 49.784 90)
		)
		(property "Datasheet" "~"
			(at 30.48 50.8 0)
		)
		(property "Description" ""
			(at 30.48 50.8 0)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 30.48 50.8 0)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 30.48 50.8 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R58")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 215.9 160.02 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 209.55 163.195 90)
		)
		(property "Value" "0.1uF"
			(at 218.44 163.195 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 215.9 160.02 0)
		)
		(property "Datasheet" ""
			(at 215.9 160.02 0)
		)
		(property "Description" ""
			(at 215.9 160.02 0)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 215.9 160.02 0)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 215.9 160.02 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C142")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:BM1366_mode1")
		(at 201.93 90.17 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U14"
			(at 186.69 68.58 0)
		)
		(property "Value" "BM1366_mode1"
			(at 203.8859 68.58 0)
		)
		(property "Footprint" "bitaxe:BM1366"
			(at 194.31 90.17 0)
		)
		(property "Datasheet" ""
			(at 194.31 90.17 0)
		)
		(property "Description" ""
			(at 201.93 90.17 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "17")
		(pin "18")
		(pin "19")
		(pin "2")
		(pin "20")
		(pin "21")
		(pin "22")
		(pin "23")
		(pin "24")
		(pin "25")
		(pin "26")
		(pin "27")
		(pin "28")
		(pin "29")
		(pin "3")
		(pin "30")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "bm1366"
				(path
					(reference "U14")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "U25")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 231.14 90.17 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 237.49 90.17 90)
		)
		(property "Value" "TestPoint"
			(at 236.855 88.9001 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 231.14 85.09 0)
		)
		(property "Datasheet" "~"
			(at 231.14 85.09 0)
		)
		(property "Description" ""
			(at 231.14 90.17 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP62")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 185.42 63.5 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 182.88 60.96 90)
		)
		(property "Value" "1uF"
			(at 184.15 64.135 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 185.42 63.5 0)
		)
		(property "Datasheet" ""
			(at 185.42 63.5 0)
		)
		(property "Description" ""
			(at 185.42 63.5 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 185.42 63.5 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 185.42 63.5 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C141")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 30.48 45.72 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 26.67 47.625 90)
		)
		(property "Value" "10k"
			(at 34.29 47.625 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 30.734 44.704 90)
		)
		(property "Datasheet" "~"
			(at 30.48 45.72 0)
		)
		(property "Description" ""
			(at 30.48 45.72 0)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 30.48 45.72 0)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 30.48 45.72 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R57")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 162.56 115.57 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C4"
			(at 163.83 113.665 0)
		)
		(property "Value" "1uF"
			(at 163.83 119.38 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 162.56 115.57 0)
		)
		(property "Datasheet" ""
			(at 162.56 115.57 0)
		)
		(property "Description" ""
			(at 162.56 115.57 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 162.56 115.57 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 162.56 115.57 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C4")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C136")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 97.79 149.86 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R65"
			(at 97.79 147.32 90)
		)
		(property "Value" "115k"
			(at 97.79 152.4 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 98.044 148.844 90)
		)
		(property "Datasheet" "~"
			(at 97.79 149.86 0)
		)
		(property "Description" ""
			(at 97.79 149.86 0)
		)
		(property "DK" "YAG2956CT-ND"
			(at 97.79 149.86 0)
		)
		(property "PARTNO" "RC0402FR-07115KL"
			(at 97.79 149.86 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R65")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 97.79 181.61 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 97.79 179.07 90)
		)
		(property "Value" "402K"
			(at 97.79 184.15 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 97.536 182.626 90)
		)
		(property "Datasheet" "~"
			(at 97.79 181.61 0)
		)
		(property "Description" ""
			(at 97.79 181.61 0)
		)
		(property "DK" "YAG3151CT-ND"
			(at 97.79 181.61 0)
		)
		(property "PARTNO" "RC0402FR-07402KL"
			(at 97.79 181.61 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R66")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 59.69 185.42 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 57.785 182.245 0)
		)
		(property "Value" "0.1uF"
			(at 58.42 187.96 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 59.69 185.42 0)
		)
		(property "Datasheet" ""
			(at 59.69 185.42 0)
		)
		(property "Description" ""
			(at 59.69 185.42 0)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 59.69 185.42 0)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 59.69 185.42 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C122")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 34.29 63.5 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C3"
			(at 31.75 60.96 90)
		)
		(property "Value" "1uF"
			(at 33.02 64.135 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 34.29 63.5 0)
		)
		(property "Datasheet" ""
			(at 34.29 63.5 0)
		)
		(property "Description" ""
			(at 34.29 63.5 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 34.29 63.5 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 34.29 63.5 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C3")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C116")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 154.94 151.13 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C10"
			(at 156.21 149.225 0)
		)
		(property "Value" "1uF"
			(at 156.21 154.305 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 154.94 151.13 0)
		)
		(property "Datasheet" ""
			(at 154.94 151.13 0)
		)
		(property "Description" ""
			(at 154.94 151.13 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 154.94 151.13 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 154.94 151.13 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C10")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C134")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 86.36 50.8 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 82.55 52.705 90)
		)
		(property "Value" "10k"
			(at 90.17 52.705 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 86.614 49.784 90)
		)
		(property "Datasheet" "~"
			(at 86.36 50.8 0)
		)
		(property "Description" ""
			(at 86.36 50.8 0)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 86.36 50.8 0)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 86.36 50.8 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R62")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 53.34 97.79 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 46.99 97.79 90)
		)
		(property "Value" "TestPoint"
			(at 47.625 99.0599 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 53.34 102.87 0)
		)
		(property "Datasheet" "~"
			(at 53.34 102.87 0)
		)
		(property "Description" ""
			(at 53.34 97.79 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP52")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 53.34 95.25 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 46.99 95.25 90)
		)
		(property "Value" "TestPoint"
			(at 47.625 96.5199 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 53.34 100.33 0)
		)
		(property "Datasheet" "~"
			(at 53.34 100.33 0)
		)
		(property "Description" ""
			(at 53.34 95.25 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP51")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 49.53 29.21 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 45.72 30.48 90)
		)
		(property "Value" "1k"
			(at 54.61 30.48 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 49.276 30.226 90)
		)
		(property "Datasheet" "~"
			(at 49.53 29.21 0)
		)
		(property "Description" ""
			(at 49.53 29.21 0)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 49.53 29.21 0)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 49.53 29.21 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R59")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 109.22 95.25 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 115.57 95.25 90)
		)
		(property "Value" "TestPoint"
			(at 114.935 93.9801 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 109.22 90.17 0)
		)
		(property "Datasheet" "~"
			(at 109.22 90.17 0)
		)
		(property "Description" ""
			(at 109.22 95.25 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP53")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 105.41 29.21 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 101.6 30.48 90)
		)
		(property "Value" "1k"
			(at 110.49 30.48 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 105.156 30.226 90)
		)
		(property "Datasheet" "~"
			(at 105.41 29.21 0)
		)
		(property "Description" ""
			(at 105.41 29.21 0)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 105.41 29.21 0)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 105.41 29.21 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R67")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 109.22 176.53 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 115.57 176.53 90)
		)
		(property "Value" "TestPoint"
			(at 114.935 175.2601 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 109.22 171.45 0)
		)
		(property "Datasheet" "~"
			(at 109.22 171.45 0)
		)
		(property "Description" ""
			(at 109.22 176.53 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP55")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 22.86 63.5 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C2"
			(at 20.32 60.96 90)
		)
		(property "Value" "1uF"
			(at 21.59 64.135 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 22.86 63.5 0)
		)
		(property "Datasheet" ""
			(at 22.86 63.5 0)
		)
		(property "Description" ""
			(at 22.86 63.5 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 22.86 63.5 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 22.86 63.5 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C2")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C115")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 201.93 45.72 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 198.12 47.625 90)
		)
		(property "Value" "10k"
			(at 205.74 47.625 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 202.184 44.704 90)
		)
		(property "Datasheet" "~"
			(at 201.93 45.72 0)
		)
		(property "Description" ""
			(at 201.93 45.72 0)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 201.93 45.72 0)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 201.93 45.72 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R74")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 86.36 40.64 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 82.55 42.545 90)
		)
		(property "Value" "1k"
			(at 90.17 42.545 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 86.106 41.656 90)
		)
		(property "Datasheet" "~"
			(at 86.36 40.64 0)
		)
		(property "Description" ""
			(at 86.36 40.64 0)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 86.36 40.64 0)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 86.36 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R60")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 245.11 115.57 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C14"
			(at 245.745 113.665 0)
		)
		(property "Value" "1uF"
			(at 245.745 119.38 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 245.11 115.57 0)
		)
		(property "Datasheet" ""
			(at 245.11 115.57 0)
		)
		(property "Description" ""
			(at 245.11 115.57 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 245.11 115.57 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 245.11 115.57 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C14")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C146")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:oscillator")
		(at 215.9 149.86 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U1"
			(at 212.09 144.78 0)
		)
		(property "Value" "25MHz"
			(at 217.805 154.94 0)
		)
		(property "Footprint" "bitaxe:O 25,0-JO32-B-1V3-1-T1-LF"
			(at 214.63 151.13 0)
		)
		(property "Datasheet" "https://www.jauch.com/downloadfile/5ef1edcfb8e2f73163c8ce8009ef659d1/jo32-1.8-3.3v.pdf"
			(at 214.63 151.13 0)
		)
		(property "Description" ""
			(at 215.9 149.86 0)
		)
		(property "DK" "1908-O250-JO32-B-1V3-1-T1-LFCT-ND"
			(at 215.9 149.86 0)
		)
		(property "PARTNO" "O 25,0-JO32-B-1V3-1-T1-LF"
			(at 215.9 149.86 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(instances
			(project "bm1366"
				(path
					(reference "U1")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "U26")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 34.29 115.57 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C4"
			(at 35.56 113.665 0)
		)
		(property "Value" "1uF"
			(at 35.56 119.38 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 34.29 115.57 0)
		)
		(property "Datasheet" ""
			(at 34.29 115.57 0)
		)
		(property "Description" ""
			(at 34.29 115.57 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 34.29 115.57 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 34.29 115.57 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C4")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C117")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "BM1366_mode1_1")
		(lib_id "bitaxe:BM1366_mode1")
		(at 73.66 90.17 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U14"
			(at 59.055 68.58 0)
		)
		(property "Value" "BM1366_mode1"
			(at 75.6159 68.58 0)
		)
		(property "Footprint" "bitaxe:BM1366"
			(at 66.04 90.17 0)
		)
		(property "Datasheet" ""
			(at 66.04 90.17 0)
		)
		(property "Description" ""
			(at 73.66 90.17 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "17")
		(pin "18")
		(pin "19")
		(pin "2")
		(pin "20")
		(pin "21")
		(pin "22")
		(pin "23")
		(pin "24")
		(pin "25")
		(pin "26")
		(pin "27")
		(pin "28")
		(pin "29")
		(pin "3")
		(pin "30")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "bm1366"
				(path
					(reference "U14")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "U22")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 240.03 43.18 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 236.22 45.085 90)
		)
		(property "Value" "1k"
			(at 243.84 45.085 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 239.776 44.196 90)
		)
		(property "Datasheet" "~"
			(at 240.03 43.18 0)
		)
		(property "Description" ""
			(at 240.03 43.18 0)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 240.03 43.18 0)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 240.03 43.18 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R77")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 59.69 154.94 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 57.785 151.765 0)
		)
		(property "Value" "0.1uF"
			(at 58.42 157.48 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 59.69 154.94 0)
		)
		(property "Datasheet" ""
			(at 59.69 154.94 0)
		)
		(property "Description" ""
			(at 59.69 154.94 0)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 59.69 154.94 0)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 59.69 154.94 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C121")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 233.68 63.5 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C15"
			(at 231.14 60.96 90)
		)
		(property "Value" "1uF"
			(at 232.41 64.135 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 233.68 63.5 0)
		)
		(property "Datasheet" ""
			(at 233.68 63.5 0)
		)
		(property "Description" ""
			(at 233.68 63.5 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 233.68 63.5 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 233.68 63.5 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C15")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C144")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 181.61 97.79 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 175.26 97.79 90)
		)
		(property "Value" "TestPoint"
			(at 175.895 99.0599 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 181.61 102.87 0)
		)
		(property "Datasheet" "~"
			(at 181.61 102.87 0)
		)
		(property "Description" ""
			(at 181.61 97.79 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP57")
					(unit 1)
				)
			)
		)
	)
)