(kicad_sch
	(version 20231120)
	(generator "eeschema")
	(generator_version "8.0")
	(paper "A")
	(title_block
		(title "bitaxeHex")
		(date "2024-03-09")
		(rev "303")
	)
	(lib_symbols
		(symbol "BM1366_mode0_1"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -13.97 21.59 0)
			)
			(property "Value" "BM1366_mode0"
				(at 11.43 21.59 0)
			)
			(property "Footprint" "bitaxe:BM1366"
				(at 16.51 -33.02 0)
			)
			(property "Datasheet" ""
				(at -7.62 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "BM1366_mode0_1_0_1"
				(rectangle
					(start -15.24 20.32)
					(end 15.24 -17.78)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy -3.81 3.81) (xy -1.27 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -3.81 3.81) (xy -1.27 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -3.81 3.81) (xy 6.35 3.81)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "BM1366_mode0_1_1_1"
				(pin power_in line
					(at -17.78 17.78 0)
					(length 2.54)
					(name "VDD3_0")
					(number "1")
				)
				(pin input line
					(at -17.78 -5.08 0)
					(length 2.54)
					(name "ADDR0")
					(number "10")
				)
				(pin input line
					(at -17.78 -7.62 0)
					(length 2.54)
					(name "ADDR1")
					(number "11")
				)
				(pin power_in line
					(at -17.78 -10.16 0)
					(length 2.54)
					(name "PLL_VSS")
					(number "12")
				)
				(pin power_in line
					(at -17.78 -12.7 0)
					(length 2.54)
					(name "VDDIO_08_0")
					(number "13")
				)
				(pin power_in line
					(at -17.78 -15.24 0)
					(length 2.54)
					(name "VDDIO_18_0")
					(number "14")
				)
				(pin power_in line
					(at 17.78 -15.24 180)
					(length 2.54)
					(name "VDDIO_18_1")
					(number "15")
				)
				(pin power_in line
					(at 17.78 -12.7 180)
					(length 2.54)
					(name "VDDIO_08_1")
					(number "16")
				)
				(pin power_in line
					(at 17.78 -10.16 180)
					(length 2.54)
					(name "VSS")
					(number "17")
				)
				(pin input line
					(at 17.78 -7.62 180)
					(length 2.54)
					(name "PIN_MODE")
					(number "18")
				)
				(pin output line
					(at 17.78 -5.08 180)
					(length 2.54)
					(name "INV_CLKO")
					(number "19")
				)
				(pin power_in line
					(at -17.78 15.24 0)
					(length 2.54)
					(name "VDD2_0")
					(number "2")
				)
				(pin input line
					(at 17.78 -2.54 180)
					(length 2.54)
					(name "NRSTI")
					(number "20")
				)
				(pin input line
					(at 17.78 0 180)
					(length 2.54)
					(name "BI")
					(number "21")
				)
				(pin output line
					(at 17.78 2.54 180)
					(length 2.54)
					(name "RO")
					(number "22")
				)
				(pin input line
					(at 17.78 5.08 180)
					(length 2.54)
					(name "CLKI")
					(number "23")
				)
				(pin input line
					(at 17.78 7.62 180)
					(length 2.54)
					(name "CI")
					(number "24")
				)
				(pin power_in line
					(at 17.78 10.16 180)
					(length 2.54)
					(name "VSS")
					(number "25")
				)
				(pin power_in line
					(at 17.78 12.7 180)
					(length 2.54)
					(name "VDD1_1")
					(number "26")
				)
				(pin power_in line
					(at 17.78 15.24 180)
					(length 2.54)
					(name "VDD2_1")
					(number "27")
				)
				(pin power_in line
					(at 17.78 17.78 180)
					(length 2.54)
					(name "VDD3_1")
					(number "28")
				)
				(pin power_in line
					(at 0 22.86 270)
					(length 2.54)
					(name "VDD")
					(number "29")
				)
				(pin power_in line
					(at -17.78 12.7 0)
					(length 2.54)
					(name "VDD1_0")
					(number "3")
				)
				(pin power_in line
					(at 0 -20.32 90)
					(length 2.54)
					(name "VSS")
					(number "30")
				)
				(pin power_in line
					(at -17.78 10.16 0)
					(length 2.54)
					(name "VSS")
					(number "4")
				)
				(pin output line
					(at -17.78 7.62 0)
					(length 2.54)
					(name "CO")
					(number "5")
				)
				(pin output line
					(at -17.78 5.08 0)
					(length 2.54)
					(name "CLKO")
					(number "6")
				)
				(pin input line
					(at -17.78 2.54 0)
					(length 2.54)
					(name "RI")
					(number "7")
				)
				(pin output line
					(at -17.78 0 0)
					(length 2.54)
					(name "BO")
					(number "8")
				)
				(pin output line
					(at -17.78 -2.54 0)
					(length 2.54)
					(name "NRSTO")
					(number "9")
				)
			)
		)
		(symbol "Connector:TestPoint"
			(pin_numbers hide)
			(pin_names
				(offset 0.762) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "TP"
				(at 0 6.858 0)
			)
			(property "Value" "TestPoint"
				(at 0 5.08 0)
			)
			(property "Footprint" ""
				(at 5.08 0 0)
			)
			(property "Datasheet" "~"
				(at 5.08 0 0)
			)
			(property "Description" "test point"
				(at 0 0 0)
			)
			(property "ki_keywords" "test point tp"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Pin* Test*"
				(at 0 0 0)
			)
			(symbol "TestPoint_0_1"
				(circle
					(center 0 3.302)
					(radius 0.762)
					(fill
						(type none)
					)
				)
			)
			(symbol "TestPoint_1_1"
				(pin passive line
					(at 0 0 90)
					(length 2.54)
					(name "1")
					(number "1")
				)
			)
		)
		(symbol "Device:C"
			(pin_numbers hide)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Unpolarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C_*"
				(at 0 0 0)
			)
			(symbol "C_0_1"
				(polyline
					(pts
						(xy -2.032 -0.762) (xy 2.032 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.032 0.762) (xy 2.032 0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:C_Polarized"
			(pin_numbers hide)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C_Polarized"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Polarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "CP_*"
				(at 0 0 0)
			)
			(symbol "C_Polarized_0_1"
				(rectangle
					(start -2.286 0.508)
					(end 2.286 1.016)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.778 2.286) (xy -0.762 2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 2.794) (xy -1.27 1.778)
					)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 2.286 -0.508)
					(end -2.286 -1.016)
					(fill
						(type outline)
					)
				)
			)
			(symbol "C_Polarized_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:R_US"
			(pin_numbers hide)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 2.54 0 90)
			)
			(property "Value" "R_US"
				(at -2.54 0 90)
			)
			(property "Footprint" ""
				(at 1.016 -0.254 90)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Resistor, US symbol"
				(at 0 0 0)
			)
			(property "ki_keywords" "R res resistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R_US_0_1"
				(polyline
					(pts
						(xy 0 -2.286) (xy 0 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.286) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -0.762) (xy 1.016 -1.143) (xy 0 -1.524) (xy -1.016 -1.905) (xy 0 -2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0.762) (xy 1.016 0.381) (xy 0 0) (xy -1.016 -0.381) (xy 0 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.286) (xy 1.016 1.905) (xy 0 1.524) (xy -1.016 1.143) (xy 0 0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_US_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "TLV3544_1"
			(pin_names
				(offset 0.127)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at 7.62 2.54 0)
			)
			(property "Value" "TLV3544"
				(at 11.43 -2.54 0)
			)
			(property "Footprint" "Package_SO:TSSOP-14_4.4x5mm_P0.65mm"
				(at 2.54 0 0)
			)
			(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tlv3542.pdf"
				(at 1.27 0 0)
			)
			(property "Description" "Low-power Operational Amplifier, SOT-353"
				(at 0 0 0)
			)
			(property "ki_locked" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "op amp operational amplifier"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOT*353*SC*70*"
				(at 0 0 0)
			)
			(symbol "TLV3544_1_0_1"
				(polyline
					(pts
						(xy -2.54 5.08) (xy -2.54 -5.08) (xy 7.62 0) (xy -2.54 5.08)
					)
					(fill
						(type background)
					)
				)
			)
			(symbol "TLV3544_1_1_1"
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "1")
				)
				(pin power_in line
					(at 0 -7.62 90)
					(length 3.81)
					(name "V-")
					(number "11")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "2")
				)
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "3")
				)
				(pin power_in line
					(at 0 7.62 270)
					(length 3.81)
					(name "V+")
					(number "4")
				)
			)
			(symbol "TLV3544_1_2_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "5")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "6")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "7")
				)
			)
			(symbol "TLV3544_1_3_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "10")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "8")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "9")
				)
			)
			(symbol "TLV3544_1_4_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "12")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "13")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "14")
				)
			)
		)
		(symbol "TLV3544_2"
			(pin_names
				(offset 0.127)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at 7.62 2.54 0)
			)
			(property "Value" "TLV3544"
				(at 11.43 -2.54 0)
			)
			(property "Footprint" "Package_SO:TSSOP-14_4.4x5mm_P0.65mm"
				(at 2.54 0 0)
			)
			(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tlv3542.pdf"
				(at 1.27 0 0)
			)
			(property "Description" "Low-power Operational Amplifier, SOT-353"
				(at 0 0 0)
			)
			(property "ki_locked" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "op amp operational amplifier"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOT*353*SC*70*"
				(at 0 0 0)
			)
			(symbol "TLV3544_2_0_1"
				(polyline
					(pts
						(xy -2.54 5.08) (xy -2.54 -5.08) (xy 7.62 0) (xy -2.54 5.08)
					)
					(fill
						(type background)
					)
				)
			)
			(symbol "TLV3544_2_1_1"
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "1")
				)
				(pin power_in line
					(at 0 -7.62 90)
					(length 3.81)
					(name "V-")
					(number "11")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "2")
				)
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "3")
				)
				(pin power_in line
					(at 0 7.62 270)
					(length 3.81)
					(name "V+")
					(number "4")
				)
			)
			(symbol "TLV3544_2_2_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "5")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "6")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "7")
				)
			)
			(symbol "TLV3544_2_3_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "10")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "8")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "9")
				)
			)
			(symbol "TLV3544_2_4_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "12")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "13")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "14")
				)
			)
		)
		(symbol "TLV3544_3"
			(pin_names
				(offset 0.127)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at 7.62 2.54 0)
			)
			(property "Value" "TLV3544"
				(at 11.43 -2.54 0)
			)
			(property "Footprint" "Package_SO:TSSOP-14_4.4x5mm_P0.65mm"
				(at 2.54 0 0)
			)
			(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tlv3542.pdf"
				(at 1.27 0 0)
			)
			(property "Description" "Low-power Operational Amplifier, SOT-353"
				(at 0 0 0)
			)
			(property "ki_locked" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "op amp operational amplifier"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOT*353*SC*70*"
				(at 0 0 0)
			)
			(symbol "TLV3544_3_0_1"
				(polyline
					(pts
						(xy -2.54 5.08) (xy -2.54 -5.08) (xy 7.62 0) (xy -2.54 5.08)
					)
					(fill
						(type background)
					)
				)
			)
			(symbol "TLV3544_3_1_1"
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "1")
				)
				(pin power_in line
					(at 0 -7.62 90)
					(length 3.81)
					(name "V-")
					(number "11")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "2")
				)
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "3")
				)
				(pin power_in line
					(at 0 7.62 270)
					(length 3.81)
					(name "V+")
					(number "4")
				)
			)
			(symbol "TLV3544_3_2_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "5")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "6")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "7")
				)
			)
			(symbol "TLV3544_3_3_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "10")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "8")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "9")
				)
			)
			(symbol "TLV3544_3_4_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "12")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "13")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "14")
				)
			)
		)
		(symbol "bitaxe:AP7331"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -7.62 5.08 0)
			)
			(property "Value" "AP7331"
				(at 5.08 5.08 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:TSOT-23-5"
				(at 0 10.16 0)
			)
			(property "Datasheet" "https://www.digikey.com/en/products/detail/diodes-incorporated/AP7331-WG-7/2270813"
				(at 0 7.62 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "AP7331_0_1"
				(rectangle
					(start -7.62 3.81)
					(end 7.62 -6.35)
					(fill
						(type background)
					)
				)
			)
			(symbol "AP7331_1_0"
				(pin power_in line
					(at -10.16 1.27 0)
					(length 2.54)
					(name "VIN")
					(number "1")
				)
				(pin bidirectional line
					(at -10.16 -3.81 0)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin input line
					(at -10.16 -1.27 0)
					(length 2.54)
					(name "EN")
					(number "3")
				)
				(pin bidirectional line
					(at 10.16 -3.81 180)
					(length 2.54)
					(name "ADJ")
					(number "4")
				)
				(pin power_out line
					(at 10.16 1.27 180)
					(length 2.54)
					(name "VOUT")
					(number "5")
				)
			)
		)
		(symbol "bitaxe:BM1366_mode0"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -13.97 21.59 0)
			)
			(property "Value" "BM1366_mode0"
				(at 11.43 21.59 0)
			)
			(property "Footprint" "bitaxe:BM1366"
				(at 16.51 -33.02 0)
			)
			(property "Datasheet" ""
				(at -7.62 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "BM1366_mode0_0_1"
				(rectangle
					(start -15.24 20.32)
					(end 15.24 -17.78)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy -3.81 3.81) (xy -1.27 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -3.81 3.81) (xy -1.27 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -3.81 3.81) (xy 6.35 3.81)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "BM1366_mode0_1_1"
				(pin power_in line
					(at -17.78 17.78 0)
					(length 2.54)
					(name "VDD3_0")
					(number "1")
				)
				(pin input line
					(at -17.78 -5.08 0)
					(length 2.54)
					(name "ADDR0")
					(number "10")
				)
				(pin input line
					(at -17.78 -7.62 0)
					(length 2.54)
					(name "ADDR1")
					(number "11")
				)
				(pin power_in line
					(at -17.78 -10.16 0)
					(length 2.54)
					(name "PLL_VSS")
					(number "12")
				)
				(pin power_in line
					(at -17.78 -12.7 0)
					(length 2.54)
					(name "VDDIO_08_0")
					(number "13")
				)
				(pin power_in line
					(at -17.78 -15.24 0)
					(length 2.54)
					(name "VDDIO_18_0")
					(number "14")
				)
				(pin power_in line
					(at 17.78 -15.24 180)
					(length 2.54)
					(name "VDDIO_18_1")
					(number "15")
				)
				(pin power_in line
					(at 17.78 -12.7 180)
					(length 2.54)
					(name "VDDIO_08_1")
					(number "16")
				)
				(pin power_in line
					(at 17.78 -10.16 180)
					(length 2.54)
					(name "VSS")
					(number "17")
				)
				(pin input line
					(at 17.78 -7.62 180)
					(length 2.54)
					(name "PIN_MODE")
					(number "18")
				)
				(pin output line
					(at 17.78 -5.08 180)
					(length 2.54)
					(name "INV_CLKO")
					(number "19")
				)
				(pin power_in line
					(at -17.78 15.24 0)
					(length 2.54)
					(name "VDD2_0")
					(number "2")
				)
				(pin input line
					(at 17.78 -2.54 180)
					(length 2.54)
					(name "NRSTI")
					(number "20")
				)
				(pin input line
					(at 17.78 0 180)
					(length 2.54)
					(name "BI")
					(number "21")
				)
				(pin output line
					(at 17.78 2.54 180)
					(length 2.54)
					(name "RO")
					(number "22")
				)
				(pin input line
					(at 17.78 5.08 180)
					(length 2.54)
					(name "CLKI")
					(number "23")
				)
				(pin input line
					(at 17.78 7.62 180)
					(length 2.54)
					(name "CI")
					(number "24")
				)
				(pin power_in line
					(at 17.78 10.16 180)
					(length 2.54)
					(name "VSS")
					(number "25")
				)
				(pin power_in line
					(at 17.78 12.7 180)
					(length 2.54)
					(name "VDD1_1")
					(number "26")
				)
				(pin power_in line
					(at 17.78 15.24 180)
					(length 2.54)
					(name "VDD2_1")
					(number "27")
				)
				(pin power_in line
					(at 17.78 17.78 180)
					(length 2.54)
					(name "VDD3_1")
					(number "28")
				)
				(pin power_in line
					(at 0 22.86 270)
					(length 2.54)
					(name "VDD")
					(number "29")
				)
				(pin power_in line
					(at -17.78 12.7 0)
					(length 2.54)
					(name "VDD1_0")
					(number "3")
				)
				(pin power_in line
					(at 0 -20.32 90)
					(length 2.54)
					(name "VSS")
					(number "30")
				)
				(pin power_in line
					(at -17.78 10.16 0)
					(length 2.54)
					(name "VSS")
					(number "4")
				)
				(pin output line
					(at -17.78 7.62 0)
					(length 2.54)
					(name "CO")
					(number "5")
				)
				(pin output line
					(at -17.78 5.08 0)
					(length 2.54)
					(name "CLKO")
					(number "6")
				)
				(pin input line
					(at -17.78 2.54 0)
					(length 2.54)
					(name "RI")
					(number "7")
				)
				(pin output line
					(at -17.78 0 0)
					(length 2.54)
					(name "BO")
					(number "8")
				)
				(pin output line
					(at -17.78 -2.54 0)
					(length 2.54)
					(name "NRSTO")
					(number "9")
				)
			)
		)
		(symbol "bitaxe:TLV3544"
			(pin_names
				(offset 0.127)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at 7.62 2.54 0)
			)
			(property "Value" "TLV3544"
				(at 11.43 -2.54 0)
			)
			(property "Footprint" "Package_SO:TSSOP-14_4.4x5mm_P0.65mm"
				(at 2.54 0 0)
			)
			(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tlv3542.pdf"
				(at 1.27 0 0)
			)
			(property "Description" "Low-power Operational Amplifier, SOT-353"
				(at 0 0 0)
			)
			(property "ki_locked" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "op amp operational amplifier"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOT*353*SC*70*"
				(at 0 0 0)
			)
			(symbol "TLV3544_0_1"
				(polyline
					(pts
						(xy -2.54 5.08) (xy -2.54 -5.08) (xy 7.62 0) (xy -2.54 5.08)
					)
					(fill
						(type background)
					)
				)
			)
			(symbol "TLV3544_1_1"
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "1")
				)
				(pin power_in line
					(at 0 -7.62 90)
					(length 3.81)
					(name "V-")
					(number "11")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "2")
				)
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "3")
				)
				(pin power_in line
					(at 0 7.62 270)
					(length 3.81)
					(name "V+")
					(number "4")
				)
			)
			(symbol "TLV3544_2_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "5")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "6")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "7")
				)
			)
			(symbol "TLV3544_3_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "10")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "8")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "9")
				)
			)
			(symbol "TLV3544_4_1"
				(pin input line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "+")
					(number "12")
				)
				(pin input line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "-")
					(number "13")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "~")
					(number "14")
				)
			)
		)
		(symbol "bitaxe:oscillator"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -3.81 5.08 0)
			)
			(property "Value" "oscillator"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at -1.27 -1.27 0)
			)
			(property "Datasheet" ""
				(at -1.27 -1.27 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "oscillator_0_1"
				(rectangle
					(start -5.08 3.81)
					(end 5.08 -3.81)
					(fill
						(type background)
					)
				)
			)
			(symbol "oscillator_1_0"
				(pin bidirectional line
					(at -7.62 1.27 0)
					(length 2.54)
					(name "EN")
					(number "1")
				)
				(pin bidirectional line
					(at -7.62 -1.27 0)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin bidirectional line
					(at 7.62 1.27 180)
					(length 2.54)
					(name "OUT")
					(number "3")
				)
				(pin bidirectional line
					(at 7.62 -1.27 180)
					(length 2.54)
					(name "VIN")
					(number "4")
				)
			)
		)
	)
	(junction
		(at 41.91 45.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 52.07 176.53)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 91.44 143.51)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 153.67 157.48)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 203.2 67.31)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 78.74 148.59)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 157.48 40.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 213.36 45.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 100.33 104.14)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 46.99 143.51)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 146.05 67.31)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 143.51 157.48)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 53.34 143.51)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 120.65 83.82)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 41.91 40.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 90.17 176.53)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 129.54 96.52)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 123.19 128.27)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 77.47 181.61)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 55.88 67.31)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 133.35 157.48)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 231.14 67.31)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 254 67.31)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 248.92 128.27)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 229.87 104.14)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 171.45 78.74)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 77.47 67.31)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 133.35 81.28)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 180.34 43.18)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 121.92 78.74)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 90.17 181.61)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 180.34 128.27)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 46.99 128.27)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 153.67 144.78)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 146.05 83.82)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 45.72 176.53)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 53.34 161.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 116.84 106.68)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 160.02 81.28)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 102.87 128.27)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 31.75 67.31)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 256.54 33.02)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 38.1 128.27)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 182.88 67.31)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 160.02 67.31)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 236.22 43.18)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 91.44 148.59)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 44.45 67.31)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 166.37 106.68)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 64.77 43.18)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 97.79 45.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 97.79 40.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 102.87 109.22)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 116.84 128.27)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 213.36 40.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 205.74 128.27)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 110.49 76.2)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 250.19 17.78)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 242.57 67.31)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 120.65 43.18)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 257.81 128.27)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 52.07 194.31)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 191.77 151.13)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 77.47 128.27)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 205.74 67.31)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 171.45 67.31)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 210.82 151.13)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 110.49 67.31)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 133.35 67.31)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 166.37 128.27)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 180.34 109.22)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 133.35 144.78)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 157.48 45.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 121.92 67.31)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 77.47 194.31)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 182.88 76.2)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 78.74 161.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 143.51 144.78)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(wire
		(pts
			(xy 186.69 99.06) (xy 187.96 99.06)
		)
	)
	(wire
		(pts
			(xy 97.79 50.8) (xy 97.79 45.72)
		)
	)
	(wire
		(pts
			(xy 171.45 78.74) (xy 171.45 67.31)
		)
	)
	(wire
		(pts
			(xy 223.52 101.6) (xy 229.87 101.6)
		)
	)
	(wire
		(pts
			(xy 87.63 181.61) (xy 90.17 181.61)
		)
	)
	(wire
		(pts
			(xy 223.52 81.28) (xy 254 81.28)
		)
	)
	(wire
		(pts
			(xy 41.91 67.31) (xy 44.45 67.31)
		)
	)
	(wire
		(pts
			(xy 213.36 29.21) (xy 220.98 29.21)
		)
	)
	(wire
		(pts
			(xy 146.05 83.82) (xy 187.96 83.82)
		)
	)
	(wire
		(pts
			(xy 95.25 86.36) (xy 187.96 86.36)
		)
	)
	(wire
		(pts
			(xy 41.91 40.64) (xy 43.18 40.64)
		)
	)
	(wire
		(pts
			(xy 186.69 148.59) (xy 194.31 148.59)
		)
	)
	(wire
		(pts
			(xy 120.65 29.21) (xy 120.65 43.18)
		)
	)
	(wire
		(pts
			(xy 129.54 96.52) (xy 129.54 100.33)
		)
	)
	(wire
		(pts
			(xy 91.44 148.59) (xy 91.44 143.51)
		)
	)
	(wire
		(pts
			(xy 246.38 43.18) (xy 251.46 43.18)
		)
	)
	(wire
		(pts
			(xy 53.34 161.29) (xy 78.74 161.29)
		)
	)
	(wire
		(pts
			(xy 213.36 40.64) (xy 214.63 40.64)
		)
	)
	(wire
		(pts
			(xy 160.02 104.14) (xy 160.02 128.27)
		)
	)
	(wire
		(pts
			(xy 121.92 78.74) (xy 121.92 67.31)
		)
	)
	(wire
		(pts
			(xy 52.07 194.31) (xy 77.47 194.31)
		)
	)
	(wire
		(pts
			(xy 102.87 109.22) (xy 180.34 109.22)
		)
	)
	(wire
		(pts
			(xy 171.45 78.74) (xy 187.96 78.74)
		)
	)
	(wire
		(pts
			(xy 30.48 128.27) (xy 38.1 128.27)
		)
	)
	(wire
		(pts
			(xy 223.52 99.06) (xy 233.68 99.06)
		)
	)
	(wire
		(pts
			(xy 207.01 160.02) (xy 210.82 160.02)
		)
	)
	(wire
		(pts
			(xy 231.14 76.2) (xy 231.14 67.31)
		)
	)
	(wire
		(pts
			(xy 97.79 29.21) (xy 105.41 29.21)
		)
	)
	(wire
		(pts
			(xy 133.35 154.94) (xy 133.35 157.48)
		)
	)
	(wire
		(pts
			(xy 110.49 76.2) (xy 182.88 76.2)
		)
	)
	(wire
		(pts
			(xy 133.35 144.78) (xy 143.51 144.78)
		)
	)
	(wire
		(pts
			(xy 90.17 194.31) (xy 77.47 194.31)
		)
	)
	(wire
		(pts
			(xy 116.84 128.27) (xy 123.19 128.27)
		)
	)
	(wire
		(pts
			(xy 205.74 128.27) (xy 248.92 128.27)
		)
	)
	(wire
		(pts
			(xy 213.36 29.21) (xy 213.36 40.64)
		)
	)
	(wire
		(pts
			(xy 146.05 67.31) (xy 149.86 67.31)
		)
	)
	(wire
		(pts
			(xy 54.61 181.61) (xy 52.07 181.61)
		)
	)
	(wire
		(pts
			(xy 44.45 78.74) (xy 59.69 78.74)
		)
	)
	(wire
		(pts
			(xy 31.75 81.28) (xy 31.75 67.31)
		)
	)
	(wire
		(pts
			(xy 181.61 67.31) (xy 182.88 67.31)
		)
	)
	(wire
		(pts
			(xy 135.89 45.72) (xy 146.05 45.72)
		)
	)
	(wire
		(pts
			(xy 48.26 50.8) (xy 48.26 52.07)
		)
	)
	(wire
		(pts
			(xy 123.19 147.32) (xy 123.19 144.78)
		)
	)
	(wire
		(pts
			(xy 186.69 101.6) (xy 187.96 101.6)
		)
	)
	(wire
		(pts
			(xy 186.69 151.13) (xy 191.77 151.13)
		)
	)
	(wire
		(pts
			(xy 223.52 109.22) (xy 248.92 109.22)
		)
	)
	(wire
		(pts
			(xy 223.52 78.74) (xy 242.57 78.74)
		)
	)
	(wire
		(pts
			(xy 97.79 45.72) (xy 99.06 45.72)
		)
	)
	(wire
		(pts
			(xy 182.88 76.2) (xy 187.96 76.2)
		)
	)
	(wire
		(pts
			(xy 256.54 33.02) (xy 264.16 33.02)
		)
	)
	(wire
		(pts
			(xy 91.44 161.29) (xy 78.74 161.29)
		)
	)
	(wire
		(pts
			(xy 64.77 29.21) (xy 64.77 43.18)
		)
	)
	(wire
		(pts
			(xy 223.52 104.14) (xy 229.87 104.14)
		)
	)
	(wire
		(pts
			(xy 250.19 33.02) (xy 256.54 33.02)
		)
	)
	(wire
		(pts
			(xy 157.48 40.64) (xy 158.75 40.64)
		)
	)
	(wire
		(pts
			(xy 133.35 157.48) (xy 123.19 157.48)
		)
	)
	(wire
		(pts
			(xy 90.17 181.61) (xy 90.17 184.15)
		)
	)
	(wire
		(pts
			(xy 52.07 179.07) (xy 52.07 176.53)
		)
	)
	(wire
		(pts
			(xy 123.19 128.27) (xy 133.35 128.27)
		)
	)
	(wire
		(pts
			(xy 168.91 67.31) (xy 171.45 67.31)
		)
	)
	(wire
		(pts
			(xy 157.48 67.31) (xy 160.02 67.31)
		)
	)
	(wire
		(pts
			(xy 222.25 67.31) (xy 205.74 67.31)
		)
	)
	(wire
		(pts
			(xy 91.44 148.59) (xy 91.44 151.13)
		)
	)
	(wire
		(pts
			(xy 91.44 158.75) (xy 91.44 161.29)
		)
	)
	(wire
		(pts
			(xy 123.19 154.94) (xy 123.19 157.48)
		)
	)
	(wire
		(pts
			(xy 59.69 83.82) (xy 19.05 83.82)
		)
	)
	(wire
		(pts
			(xy 38.1 106.68) (xy 38.1 115.57)
		)
	)
	(wire
		(pts
			(xy 41.91 50.8) (xy 41.91 45.72)
		)
	)
	(wire
		(pts
			(xy 123.19 104.14) (xy 123.19 128.27)
		)
	)
	(wire
		(pts
			(xy 209.55 45.72) (xy 213.36 45.72)
		)
	)
	(wire
		(pts
			(xy 250.19 17.78) (xy 256.54 17.78)
		)
	)
	(wire
		(pts
			(xy 55.88 76.2) (xy 59.69 76.2)
		)
	)
	(wire
		(pts
			(xy 133.35 147.32) (xy 133.35 144.78)
		)
	)
	(wire
		(pts
			(xy 78.74 161.29) (xy 78.74 158.75)
		)
	)
	(wire
		(pts
			(xy 205.74 67.31) (xy 205.74 71.12)
		)
	)
	(wire
		(pts
			(xy 143.51 144.78) (xy 153.67 144.78)
		)
	)
	(wire
		(pts
			(xy 77.47 67.31) (xy 77.47 71.12)
		)
	)
	(wire
		(pts
			(xy 191.77 151.13) (xy 194.31 151.13)
		)
	)
	(wire
		(pts
			(xy 95.25 88.9) (xy 187.96 88.9)
		)
	)
	(wire
		(pts
			(xy 180.34 123.19) (xy 180.34 128.27)
		)
	)
	(wire
		(pts
			(xy 223.52 88.9) (xy 252.73 88.9)
		)
	)
	(wire
		(pts
			(xy 54.61 179.07) (xy 52.07 179.07)
		)
	)
	(wire
		(pts
			(xy 53.34 143.51) (xy 55.88 143.51)
		)
	)
	(wire
		(pts
			(xy 254 67.31) (xy 256.54 67.31)
		)
	)
	(wire
		(pts
			(xy 153.67 147.32) (xy 153.67 144.78)
		)
	)
	(wire
		(pts
			(xy 95.25 91.44) (xy 187.96 91.44)
		)
	)
	(wire
		(pts
			(xy 19.05 67.31) (xy 22.86 67.31)
		)
	)
	(wire
		(pts
			(xy 256.54 27.94) (xy 256.54 33.02)
		)
	)
	(wire
		(pts
			(xy 95.25 104.14) (xy 100.33 104.14)
		)
	)
	(wire
		(pts
			(xy 101.6 67.31) (xy 77.47 67.31)
		)
	)
	(wire
		(pts
			(xy 133.35 81.28) (xy 160.02 81.28)
		)
	)
	(wire
		(pts
			(xy 41.91 45.72) (xy 43.18 45.72)
		)
	)
	(wire
		(pts
			(xy 210.82 151.13) (xy 217.17 151.13)
		)
	)
	(wire
		(pts
			(xy 165.1 154.94) (xy 165.1 157.48)
		)
	)
	(wire
		(pts
			(xy 146.05 83.82) (xy 146.05 67.31)
		)
	)
	(wire
		(pts
			(xy 38.1 106.68) (xy 59.69 106.68)
		)
	)
	(wire
		(pts
			(xy 46.99 143.51) (xy 53.34 143.51)
		)
	)
	(wire
		(pts
			(xy 38.1 143.51) (xy 46.99 143.51)
		)
	)
	(wire
		(pts
			(xy 138.43 50.8) (xy 146.05 50.8)
		)
	)
	(wire
		(pts
			(xy 31.75 67.31) (xy 34.29 67.31)
		)
	)
	(wire
		(pts
			(xy 38.1 128.27) (xy 46.99 128.27)
		)
	)
	(wire
		(pts
			(xy 191.77 40.64) (xy 201.93 40.64)
		)
	)
	(wire
		(pts
			(xy 53.34 67.31) (xy 55.88 67.31)
		)
	)
	(wire
		(pts
			(xy 199.39 160.02) (xy 191.77 160.02)
		)
	)
	(wire
		(pts
			(xy 109.22 67.31) (xy 110.49 67.31)
		)
	)
	(wire
		(pts
			(xy 77.47 181.61) (xy 80.01 181.61)
		)
	)
	(wire
		(pts
			(xy 242.57 78.74) (xy 242.57 67.31)
		)
	)
	(wire
		(pts
			(xy 120.65 43.18) (xy 114.3 43.18)
		)
	)
	(wire
		(pts
			(xy 78.74 148.59) (xy 81.28 148.59)
		)
	)
	(wire
		(pts
			(xy 191.77 45.72) (xy 201.93 45.72)
		)
	)
	(wire
		(pts
			(xy 116.84 106.68) (xy 116.84 115.57)
		)
	)
	(wire
		(pts
			(xy 160.02 81.28) (xy 187.96 81.28)
		)
	)
	(wire
		(pts
			(xy 48.26 52.07) (xy 57.15 52.07)
		)
	)
	(wire
		(pts
			(xy 48.26 88.9) (xy 59.69 88.9)
		)
	)
	(wire
		(pts
			(xy 76.2 148.59) (xy 78.74 148.59)
		)
	)
	(wire
		(pts
			(xy 38.1 50.8) (xy 41.91 50.8)
		)
	)
	(wire
		(pts
			(xy 123.19 144.78) (xy 133.35 144.78)
		)
	)
	(wire
		(pts
			(xy 241.3 67.31) (xy 242.57 67.31)
		)
	)
	(wire
		(pts
			(xy 46.99 161.29) (xy 53.34 161.29)
		)
	)
	(wire
		(pts
			(xy 46.99 123.19) (xy 46.99 128.27)
		)
	)
	(wire
		(pts
			(xy 257.81 128.27) (xy 257.81 123.19)
		)
	)
	(wire
		(pts
			(xy 20.32 40.64) (xy 30.48 40.64)
		)
	)
	(wire
		(pts
			(xy 95.25 93.98) (xy 187.96 93.98)
		)
	)
	(wire
		(pts
			(xy 223.52 91.44) (xy 252.73 91.44)
		)
	)
	(wire
		(pts
			(xy 38.1 40.64) (xy 41.91 40.64)
		)
	)
	(wire
		(pts
			(xy 257.81 106.68) (xy 257.81 115.57)
		)
	)
	(wire
		(pts
			(xy 95.25 96.52) (xy 129.54 96.52)
		)
	)
	(wire
		(pts
			(xy 248.92 109.22) (xy 248.92 115.57)
		)
	)
	(wire
		(pts
			(xy 248.92 123.19) (xy 248.92 128.27)
		)
	)
	(wire
		(pts
			(xy 55.88 146.05) (xy 53.34 146.05)
		)
	)
	(wire
		(pts
			(xy 113.03 29.21) (xy 120.65 29.21)
		)
	)
	(wire
		(pts
			(xy 143.51 154.94) (xy 143.51 157.48)
		)
	)
	(wire
		(pts
			(xy 203.2 63.5) (xy 203.2 67.31)
		)
	)
	(wire
		(pts
			(xy 31.75 81.28) (xy 59.69 81.28)
		)
	)
	(wire
		(pts
			(xy 88.9 148.59) (xy 91.44 148.59)
		)
	)
	(wire
		(pts
			(xy 64.77 67.31) (xy 77.47 67.31)
		)
	)
	(wire
		(pts
			(xy 229.87 67.31) (xy 231.14 67.31)
		)
	)
	(wire
		(pts
			(xy 95.25 83.82) (xy 120.65 83.82)
		)
	)
	(wire
		(pts
			(xy 153.67 40.64) (xy 157.48 40.64)
		)
	)
	(wire
		(pts
			(xy 30.48 67.31) (xy 31.75 67.31)
		)
	)
	(wire
		(pts
			(xy 120.65 43.18) (xy 128.27 43.18)
		)
	)
	(wire
		(pts
			(xy 48.26 99.06) (xy 59.69 99.06)
		)
	)
	(wire
		(pts
			(xy 38.1 45.72) (xy 41.91 45.72)
		)
	)
	(wire
		(pts
			(xy 209.55 50.8) (xy 213.36 50.8)
		)
	)
	(wire
		(pts
			(xy 180.34 29.21) (xy 180.34 43.18)
		)
	)
	(wire
		(pts
			(xy 77.47 181.61) (xy 77.47 184.15)
		)
	)
	(wire
		(pts
			(xy 76.2 143.51) (xy 91.44 143.51)
		)
	)
	(wire
		(pts
			(xy 182.88 67.31) (xy 185.42 67.31)
		)
	)
	(wire
		(pts
			(xy 193.04 67.31) (xy 203.2 67.31)
		)
	)
	(wire
		(pts
			(xy 121.92 67.31) (xy 124.46 67.31)
		)
	)
	(wire
		(pts
			(xy 24.13 86.36) (xy 59.69 86.36)
		)
	)
	(wire
		(pts
			(xy 100.33 104.14) (xy 123.19 104.14)
		)
	)
	(wire
		(pts
			(xy 160.02 81.28) (xy 160.02 67.31)
		)
	)
	(wire
		(pts
			(xy 153.67 50.8) (xy 157.48 50.8)
		)
	)
	(wire
		(pts
			(xy 133.35 67.31) (xy 135.89 67.31)
		)
	)
	(wire
		(pts
			(xy 266.7 83.82) (xy 266.7 67.31)
		)
	)
	(wire
		(pts
			(xy 153.67 45.72) (xy 157.48 45.72)
		)
	)
	(wire
		(pts
			(xy 102.87 128.27) (xy 116.84 128.27)
		)
	)
	(wire
		(pts
			(xy 90.17 181.61) (xy 90.17 176.53)
		)
	)
	(wire
		(pts
			(xy 120.65 83.82) (xy 146.05 83.82)
		)
	)
	(wire
		(pts
			(xy 250.19 27.94) (xy 250.19 33.02)
		)
	)
	(wire
		(pts
			(xy 95.25 101.6) (xy 100.33 101.6)
		)
	)
	(wire
		(pts
			(xy 157.48 29.21) (xy 157.48 40.64)
		)
	)
	(wire
		(pts
			(xy 95.25 99.06) (xy 101.6 99.06)
		)
	)
	(wire
		(pts
			(xy 199.39 63.5) (xy 203.2 63.5)
		)
	)
	(wire
		(pts
			(xy 166.37 128.27) (xy 166.37 123.19)
		)
	)
	(wire
		(pts
			(xy 91.44 143.51) (xy 96.52 143.51)
		)
	)
	(wire
		(pts
			(xy 116.84 106.68) (xy 166.37 106.68)
		)
	)
	(wire
		(pts
			(xy 209.55 151.13) (xy 210.82 151.13)
		)
	)
	(wire
		(pts
			(xy 95.25 81.28) (xy 133.35 81.28)
		)
	)
	(wire
		(pts
			(xy 24.13 96.52) (xy 59.69 96.52)
		)
	)
	(wire
		(pts
			(xy 77.47 114.3) (xy 77.47 128.27)
		)
	)
	(wire
		(pts
			(xy 19.05 83.82) (xy 19.05 67.31)
		)
	)
	(wire
		(pts
			(xy 160.02 104.14) (xy 187.96 104.14)
		)
	)
	(wire
		(pts
			(xy 30.48 104.14) (xy 59.69 104.14)
		)
	)
	(wire
		(pts
			(xy 46.99 109.22) (xy 59.69 109.22)
		)
	)
	(wire
		(pts
			(xy 229.87 43.18) (xy 236.22 43.18)
		)
	)
	(wire
		(pts
			(xy 135.89 40.64) (xy 146.05 40.64)
		)
	)
	(wire
		(pts
			(xy 90.17 191.77) (xy 90.17 194.31)
		)
	)
	(wire
		(pts
			(xy 231.14 67.31) (xy 233.68 67.31)
		)
	)
	(wire
		(pts
			(xy 45.72 194.31) (xy 52.07 194.31)
		)
	)
	(wire
		(pts
			(xy 55.88 67.31) (xy 55.88 76.2)
		)
	)
	(wire
		(pts
			(xy 166.37 106.68) (xy 166.37 115.57)
		)
	)
	(wire
		(pts
			(xy 80.01 50.8) (xy 86.36 50.8)
		)
	)
	(wire
		(pts
			(xy 97.79 40.64) (xy 99.06 40.64)
		)
	)
	(wire
		(pts
			(xy 203.2 67.31) (xy 205.74 67.31)
		)
	)
	(wire
		(pts
			(xy 165.1 147.32) (xy 165.1 144.78)
		)
	)
	(wire
		(pts
			(xy 46.99 128.27) (xy 77.47 128.27)
		)
	)
	(wire
		(pts
			(xy 180.34 109.22) (xy 187.96 109.22)
		)
	)
	(wire
		(pts
			(xy 52.07 176.53) (xy 54.61 176.53)
		)
	)
	(wire
		(pts
			(xy 264.16 104.14) (xy 264.16 128.27)
		)
	)
	(wire
		(pts
			(xy 157.48 29.21) (xy 165.1 29.21)
		)
	)
	(wire
		(pts
			(xy 44.45 78.74) (xy 44.45 67.31)
		)
	)
	(wire
		(pts
			(xy 120.65 67.31) (xy 121.92 67.31)
		)
	)
	(wire
		(pts
			(xy 76.2 40.64) (xy 86.36 40.64)
		)
	)
	(wire
		(pts
			(xy 110.49 76.2) (xy 110.49 67.31)
		)
	)
	(wire
		(pts
			(xy 223.52 96.52) (xy 252.73 96.52)
		)
	)
	(wire
		(pts
			(xy 48.26 35.56) (xy 48.26 34.29)
		)
	)
	(wire
		(pts
			(xy 95.25 76.2) (xy 110.49 76.2)
		)
	)
	(wire
		(pts
			(xy 223.52 83.82) (xy 266.7 83.82)
		)
	)
	(wire
		(pts
			(xy 223.52 106.68) (xy 257.81 106.68)
		)
	)
	(wire
		(pts
			(xy 245.11 17.78) (xy 250.19 17.78)
		)
	)
	(wire
		(pts
			(xy 242.57 67.31) (xy 245.11 67.31)
		)
	)
	(wire
		(pts
			(xy 153.67 154.94) (xy 153.67 157.48)
		)
	)
	(wire
		(pts
			(xy 209.55 148.59) (xy 231.14 148.59)
		)
	)
	(wire
		(pts
			(xy 132.08 67.31) (xy 133.35 67.31)
		)
	)
	(wire
		(pts
			(xy 74.93 181.61) (xy 77.47 181.61)
		)
	)
	(wire
		(pts
			(xy 264.16 128.27) (xy 257.81 128.27)
		)
	)
	(wire
		(pts
			(xy 102.87 109.22) (xy 102.87 115.57)
		)
	)
	(wire
		(pts
			(xy 52.07 181.61) (xy 52.07 194.31)
		)
	)
	(wire
		(pts
			(xy 76.2 45.72) (xy 86.36 45.72)
		)
	)
	(wire
		(pts
			(xy 254 81.28) (xy 254 67.31)
		)
	)
	(wire
		(pts
			(xy 210.82 160.02) (xy 210.82 151.13)
		)
	)
	(wire
		(pts
			(xy 116.84 128.27) (xy 116.84 123.19)
		)
	)
	(wire
		(pts
			(xy 20.32 45.72) (xy 30.48 45.72)
		)
	)
	(wire
		(pts
			(xy 191.77 50.8) (xy 201.93 50.8)
		)
	)
	(wire
		(pts
			(xy 157.48 50.8) (xy 157.48 45.72)
		)
	)
	(wire
		(pts
			(xy 41.91 29.21) (xy 49.53 29.21)
		)
	)
	(wire
		(pts
			(xy 252.73 67.31) (xy 254 67.31)
		)
	)
	(wire
		(pts
			(xy 102.87 123.19) (xy 102.87 128.27)
		)
	)
	(wire
		(pts
			(xy 256.54 20.32) (xy 256.54 17.78)
		)
	)
	(wire
		(pts
			(xy 133.35 81.28) (xy 133.35 67.31)
		)
	)
	(wire
		(pts
			(xy 180.34 109.22) (xy 180.34 115.57)
		)
	)
	(wire
		(pts
			(xy 95.25 109.22) (xy 102.87 109.22)
		)
	)
	(wire
		(pts
			(xy 53.34 148.59) (xy 53.34 161.29)
		)
	)
	(wire
		(pts
			(xy 223.52 86.36) (xy 252.73 86.36)
		)
	)
	(wire
		(pts
			(xy 97.79 29.21) (xy 97.79 40.64)
		)
	)
	(wire
		(pts
			(xy 180.34 128.27) (xy 205.74 128.27)
		)
	)
	(wire
		(pts
			(xy 236.22 29.21) (xy 236.22 43.18)
		)
	)
	(wire
		(pts
			(xy 166.37 106.68) (xy 187.96 106.68)
		)
	)
	(wire
		(pts
			(xy 93.98 45.72) (xy 97.79 45.72)
		)
	)
	(wire
		(pts
			(xy 160.02 128.27) (xy 166.37 128.27)
		)
	)
	(wire
		(pts
			(xy 64.77 43.18) (xy 58.42 43.18)
		)
	)
	(wire
		(pts
			(xy 213.36 45.72) (xy 214.63 45.72)
		)
	)
	(wire
		(pts
			(xy 46.99 156.21) (xy 46.99 161.29)
		)
	)
	(wire
		(pts
			(xy 166.37 128.27) (xy 180.34 128.27)
		)
	)
	(wire
		(pts
			(xy 45.72 189.23) (xy 45.72 194.31)
		)
	)
	(wire
		(pts
			(xy 129.54 96.52) (xy 187.96 96.52)
		)
	)
	(wire
		(pts
			(xy 48.26 101.6) (xy 59.69 101.6)
		)
	)
	(wire
		(pts
			(xy 153.67 157.48) (xy 165.1 157.48)
		)
	)
	(wire
		(pts
			(xy 24.13 91.44) (xy 59.69 91.44)
		)
	)
	(wire
		(pts
			(xy 157.48 45.72) (xy 158.75 45.72)
		)
	)
	(wire
		(pts
			(xy 229.87 101.6) (xy 229.87 104.14)
		)
	)
	(wire
		(pts
			(xy 205.74 114.3) (xy 205.74 128.27)
		)
	)
	(wire
		(pts
			(xy 90.17 176.53) (xy 95.25 176.53)
		)
	)
	(wire
		(pts
			(xy 93.98 40.64) (xy 97.79 40.64)
		)
	)
	(wire
		(pts
			(xy 180.34 43.18) (xy 185.42 43.18)
		)
	)
	(wire
		(pts
			(xy 45.72 176.53) (xy 45.72 181.61)
		)
	)
	(wire
		(pts
			(xy 133.35 157.48) (xy 143.51 157.48)
		)
	)
	(wire
		(pts
			(xy 30.48 128.27) (xy 30.48 104.14)
		)
	)
	(wire
		(pts
			(xy 153.67 144.78) (xy 165.1 144.78)
		)
	)
	(wire
		(pts
			(xy 229.87 104.14) (xy 264.16 104.14)
		)
	)
	(wire
		(pts
			(xy 160.02 67.31) (xy 161.29 67.31)
		)
	)
	(wire
		(pts
			(xy 228.6 29.21) (xy 236.22 29.21)
		)
	)
	(wire
		(pts
			(xy 182.88 67.31) (xy 182.88 76.2)
		)
	)
	(wire
		(pts
			(xy 36.83 176.53) (xy 45.72 176.53)
		)
	)
	(wire
		(pts
			(xy 209.55 40.64) (xy 213.36 40.64)
		)
	)
	(wire
		(pts
			(xy 121.92 100.33) (xy 120.65 100.33)
		)
	)
	(wire
		(pts
			(xy 110.49 67.31) (xy 113.03 67.31)
		)
	)
	(wire
		(pts
			(xy 100.33 101.6) (xy 100.33 104.14)
		)
	)
	(wire
		(pts
			(xy 236.22 43.18) (xy 238.76 43.18)
		)
	)
	(wire
		(pts
			(xy 153.67 157.48) (xy 143.51 157.48)
		)
	)
	(wire
		(pts
			(xy 191.77 160.02) (xy 191.77 151.13)
		)
	)
	(wire
		(pts
			(xy 64.77 43.18) (xy 69.85 43.18)
		)
	)
	(wire
		(pts
			(xy 266.7 67.31) (xy 264.16 67.31)
		)
	)
	(wire
		(pts
			(xy 74.93 176.53) (xy 90.17 176.53)
		)
	)
	(wire
		(pts
			(xy 93.98 50.8) (xy 97.79 50.8)
		)
	)
	(wire
		(pts
			(xy 48.26 34.29) (xy 57.15 34.29)
		)
	)
	(wire
		(pts
			(xy 248.92 128.27) (xy 257.81 128.27)
		)
	)
	(wire
		(pts
			(xy 250.19 17.78) (xy 250.19 20.32)
		)
	)
	(wire
		(pts
			(xy 223.52 93.98) (xy 252.73 93.98)
		)
	)
	(wire
		(pts
			(xy 95.25 106.68) (xy 116.84 106.68)
		)
	)
	(wire
		(pts
			(xy 120.65 100.33) (xy 120.65 83.82)
		)
	)
	(wire
		(pts
			(xy 55.88 148.59) (xy 53.34 148.59)
		)
	)
	(wire
		(pts
			(xy 78.74 148.59) (xy 78.74 151.13)
		)
	)
	(wire
		(pts
			(xy 77.47 128.27) (xy 102.87 128.27)
		)
	)
	(wire
		(pts
			(xy 46.99 109.22) (xy 46.99 115.57)
		)
	)
	(wire
		(pts
			(xy 57.15 29.21) (xy 64.77 29.21)
		)
	)
	(wire
		(pts
			(xy 223.52 76.2) (xy 231.14 76.2)
		)
	)
	(wire
		(pts
			(xy 22.86 50.8) (xy 30.48 50.8)
		)
	)
	(wire
		(pts
			(xy 55.88 67.31) (xy 57.15 67.31)
		)
	)
	(wire
		(pts
			(xy 46.99 143.51) (xy 46.99 148.59)
		)
	)
	(wire
		(pts
			(xy 121.92 78.74) (xy 171.45 78.74)
		)
	)
	(wire
		(pts
			(xy 143.51 147.32) (xy 143.51 144.78)
		)
	)
	(wire
		(pts
			(xy 180.34 43.18) (xy 173.99 43.18)
		)
	)
	(wire
		(pts
			(xy 44.45 67.31) (xy 45.72 67.31)
		)
	)
	(wire
		(pts
			(xy 77.47 194.31) (xy 77.47 191.77)
		)
	)
	(wire
		(pts
			(xy 53.34 146.05) (xy 53.34 143.51)
		)
	)
	(wire
		(pts
			(xy 41.91 29.21) (xy 41.91 40.64)
		)
	)
	(wire
		(pts
			(xy 95.25 78.74) (xy 121.92 78.74)
		)
	)
	(wire
		(pts
			(xy 120.65 133.35) (xy 132.08 133.35)
		)
	)
	(wire
		(pts
			(xy 171.45 67.31) (xy 173.99 67.31)
		)
	)
	(wire
		(pts
			(xy 146.05 67.31) (xy 143.51 67.31)
		)
	)
	(wire
		(pts
			(xy 24.13 93.98) (xy 59.69 93.98)
		)
	)
	(wire
		(pts
			(xy 213.36 50.8) (xy 213.36 45.72)
		)
	)
	(wire
		(pts
			(xy 38.1 123.19) (xy 38.1 128.27)
		)
	)
	(wire
		(pts
			(xy 172.72 29.21) (xy 180.34 29.21)
		)
	)
	(wire
		(pts
			(xy 45.72 176.53) (xy 52.07 176.53)
		)
	)
	(text "MIDDLE Voltage Domain\nActual LDO supply voltage:\nThese LDOs get 5V - (core voltage)\nWhen core voltage=1.5V, LDO supply is 3.5V\nWhen core voltage=1.2V, LDO supply is 3.8V "
		(exclude_from_sim no)
		(at 16.51 171.45 0)
	)
	(text "Reference Voltage Regulators"
		(exclude_from_sim no)
		(at 53.34 135.89 0)
	)
	(text "25MHz ASIC clock oscillator"
		(exclude_from_sim no)
		(at 187.96 166.37 0)
	)
	(text "OPAMP Bypass"
		(exclude_from_sim no)
		(at 247.65 36.83 0)
	)
	(label "BI2"
		(at 185.42 43.18 180)
		(fields_autoplaced yes)
	)
	(label "GND2"
		(at 186.69 151.13 0)
		(fields_autoplaced yes)
	)
	(label "VDD2"
		(at 135.89 45.72 0)
		(fields_autoplaced yes)
	)
	(label "RO2"
		(at 252.73 91.44 180)
		(fields_autoplaced yes)
	)
	(label "VDD2"
		(at 80.01 67.31 0)
		(fields_autoplaced yes)
	)
	(label "VDD2"
		(at 76.2 45.72 0)
		(fields_autoplaced yes)
	)
	(label "NRSTI2"
		(at 252.73 96.52 180)
		(fields_autoplaced yes)
	)
	(label "VDD2"
		(at 20.32 45.72 0)
		(fields_autoplaced yes)
	)
	(label "VDD2"
		(at 57.15 34.29 180)
		(fields_autoplaced yes)
	)
	(label "GND2"
		(at 60.96 194.31 0)
		(fields_autoplaced yes)
	)
	(label "0V8"
		(at 96.52 106.68 0)
		(fields_autoplaced yes)
	)
	(label "0V8"
		(at 85.09 143.51 0)
		(fields_autoplaced yes)
	)
	(label "1V8"
		(at 96.52 109.22 0)
		(fields_autoplaced yes)
	)
	(label "5V"
		(at 38.1 176.53 0)
		(fields_autoplaced yes)
	)
	(label "GND2"
		(at 151.13 157.48 180)
		(fields_autoplaced yes)
	)
	(label "CI2"
		(at 69.85 43.18 180)
		(fields_autoplaced yes)
	)
	(label "1V8"
		(at 83.82 176.53 0)
		(fields_autoplaced yes)
	)
	(label "NRSTI2"
		(at 128.27 43.18 180)
		(fields_autoplaced yes)
	)
	(label "VDD2"
		(at 208.28 67.31 0)
		(fields_autoplaced yes)
	)
	(label "5V"
		(at 39.37 143.51 0)
		(fields_autoplaced yes)
	)
	(label "GND2"
		(at 21.59 83.82 0)
		(fields_autoplaced yes)
	)
	(label "CLKI2"
		(at 252.73 88.9 180)
		(fields_autoplaced yes)
	)
	(label "GND2"
		(at 135.89 40.64 0)
		(fields_autoplaced yes)
	)
	(label "1V8"
		(at 217.17 151.13 180)
		(fields_autoplaced yes)
	)
	(label "BI2"
		(at 252.73 93.98 180)
		(fields_autoplaced yes)
	)
	(label "GND2"
		(at 76.2 40.64 0)
		(fields_autoplaced yes)
	)
	(label "GND2"
		(at 179.07 83.82 0)
		(fields_autoplaced yes)
	)
	(label "RO2"
		(at 191.77 50.8 0)
		(fields_autoplaced yes)
	)
	(label "1V8"
		(at 186.69 148.59 0)
		(fields_autoplaced yes)
	)
	(label "0V8"
		(at 180.34 106.68 0)
		(fields_autoplaced yes)
	)
	(label "1V8"
		(at 228.6 109.22 0)
		(fields_autoplaced yes)
	)
	(label "-VDD2"
		(at 57.15 52.07 180)
		(fields_autoplaced yes)
	)
	(label "0V8"
		(at 228.6 106.68 0)
		(fields_autoplaced yes)
	)
	(label "1V8"
		(at 46.99 109.22 0)
		(fields_autoplaced yes)
	)
	(label "GND2"
		(at 20.32 40.64 0)
		(fields_autoplaced yes)
	)
	(label "VDD2"
		(at 146.05 144.78 0)
		(fields_autoplaced yes)
	)
	(label "-VDD2"
		(at 120.65 133.35 0)
		(fields_autoplaced yes)
	)
	(label "GND2"
		(at 209.55 128.27 0)
		(fields_autoplaced yes)
	)
	(label "GND2"
		(at 252.73 83.82 180)
		(fields_autoplaced yes)
	)
	(label "GND2"
		(at 191.77 40.64 0)
		(fields_autoplaced yes)
	)
	(label "-VDD2"
		(at 264.16 33.02 180)
		(fields_autoplaced yes)
	)
	(label "GND2"
		(at 62.23 161.29 0)
		(fields_autoplaced yes)
	)
	(label "1V8"
		(at 180.34 109.22 0)
		(fields_autoplaced yes)
	)
	(label "-VDD2"
		(at 191.77 45.72 0)
		(fields_autoplaced yes)
	)
	(label "0V8"
		(at 46.99 106.68 0)
		(fields_autoplaced yes)
	)
	(label "VDD2"
		(at 245.11 17.78 0)
		(fields_autoplaced yes)
	)
	(label "CLKI2"
		(at 231.14 148.59 180)
		(fields_autoplaced yes)
	)
	(label "CI2"
		(at 252.73 86.36 180)
		(fields_autoplaced yes)
	)
	(label "GND2"
		(at 97.79 83.82 0)
		(fields_autoplaced yes)
	)
	(label "GND2"
		(at 81.28 128.27 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "RO"
		(shape output)
		(at 251.46 43.18 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "-VDD2"
		(shape input)
		(at 132.08 133.35 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "5V"
		(shape input)
		(at 36.83 176.53 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "VDD2"
		(shape input)
		(at 199.39 63.5 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "BO"
		(shape output)
		(at 24.13 93.98 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "NRSTI"
		(shape input)
		(at 80.01 50.8 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "NRSTO"
		(shape output)
		(at 24.13 96.52 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "CO"
		(shape output)
		(at 24.13 86.36 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "CI"
		(shape input)
		(at 22.86 50.8 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "GND2"
		(shape output)
		(at 133.35 128.27 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "5V"
		(shape input)
		(at 38.1 143.51 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "BI"
		(shape input)
		(at 138.43 50.8 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "RI"
		(shape input)
		(at 24.13 91.44 180)
		(fields_autoplaced yes)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 125.73 100.33 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 125.73 97.79 90)
		)
		(property "Value" "2k"
			(at 125.73 102.87 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 125.984 99.314 90)
		)
		(property "Datasheet" "~"
			(at 125.73 100.33 0)
		)
		(property "Description" ""
			(at 125.73 100.33 0)
		)
		(property "DK" "YAG2303CT-ND"
			(at 125.73 100.33 0)
		)
		(property "PARTNO" "RT0402BRD072KL"
			(at 125.73 100.33 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R46")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 102.87 119.38 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C14"
			(at 103.505 117.475 0)
		)
		(property "Value" "1uF"
			(at 103.505 123.19 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 102.87 119.38 0)
		)
		(property "Datasheet" ""
			(at 102.87 119.38 0)
		)
		(property "Description" ""
			(at 102.87 119.38 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 102.87 119.38 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 102.87 119.38 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C14")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C89")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 46.99 152.4 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 45.085 149.225 0)
		)
		(property "Value" "0.1uF"
			(at 45.72 154.94 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 46.99 152.4 0)
		)
		(property "Datasheet" ""
			(at 46.99 152.4 0)
		)
		(property "Description" ""
			(at 46.99 152.4 0)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 46.99 152.4 0)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 46.99 152.4 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C84")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 133.35 151.13 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 131.445 147.955 0)
		)
		(property "Value" "0.1uF"
			(at 132.08 153.67 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 133.35 151.13 0)
		)
		(property "Datasheet" ""
			(at 133.35 151.13 0)
		)
		(property "Description" ""
			(at 133.35 151.13 0)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 133.35 151.13 0)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 133.35 151.13 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C95")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 48.26 99.06 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 41.91 99.06 90)
		)
		(property "Value" "TestPoint"
			(at 42.545 100.3299 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 48.26 104.14 0)
		)
		(property "Datasheet" "~"
			(at 48.26 104.14 0)
		)
		(property "Description" ""
			(at 48.26 99.06 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP43")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 60.96 67.31 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 58.42 64.77 90)
		)
		(property "Value" "1uF"
			(at 59.69 67.945 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 60.96 67.31 0)
		)
		(property "Datasheet" ""
			(at 60.96 67.31 0)
		)
		(property "Description" ""
			(at 60.96 67.31 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 60.96 67.31 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 60.96 67.31 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C86")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 205.74 45.72 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 201.93 47.625 90)
		)
		(property "Value" "10k"
			(at 209.55 47.625 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 205.994 44.704 90)
		)
		(property "Datasheet" "~"
			(at 205.74 45.72 0)
		)
		(property "Description" ""
			(at 205.74 45.72 0)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 205.74 45.72 0)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 205.74 45.72 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R52")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 233.68 99.06 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 240.03 99.06 90)
		)
		(property "Value" "TestPoint"
			(at 239.395 97.7901 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 233.68 93.98 0)
		)
		(property "Datasheet" "~"
			(at 233.68 93.98 0)
		)
		(property "Description" ""
			(at 233.68 99.06 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP50")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 116.84 67.31 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C15"
			(at 114.3 64.77 90)
		)
		(property "Value" "1uF"
			(at 115.57 67.945 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 116.84 67.31 0)
		)
		(property "Datasheet" ""
			(at 116.84 67.31 0)
		)
		(property "Description" ""
			(at 116.84 67.31 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 116.84 67.31 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 116.84 67.31 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C15")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C91")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 48.26 88.9 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 41.91 88.9 90)
		)
		(property "Value" "TestPoint"
			(at 42.545 90.1699 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 48.26 93.98 0)
		)
		(property "Datasheet" "~"
			(at 48.26 93.98 0)
		)
		(property "Description" ""
			(at 48.26 88.9 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP42")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 250.19 24.13 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 248.285 20.955 0)
		)
		(property "Value" "0.1uF"
			(at 248.92 26.67 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 250.19 24.13 0)
		)
		(property "Datasheet" ""
			(at 250.19 24.13 0)
		)
		(property "Description" ""
			(at 250.19 24.13 0)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 250.19 24.13 0)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 250.19 24.13 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C111")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 139.7 67.31 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C18"
			(at 137.16 64.77 90)
		)
		(property "Value" "1uF"
			(at 138.43 67.945 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 139.7 67.31 0)
		)
		(property "Datasheet" ""
			(at 139.7 67.31 0)
		)
		(property "Description" ""
			(at 139.7 67.31 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 139.7 67.31 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 139.7 67.31 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C18")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C96")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "BM1366_mode0_1")
		(lib_id "bitaxe:BM1366_mode0")
		(at 77.47 93.98 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U18"
			(at 62.865 72.39 0)
		)
		(property "Value" "BM1366_mode0"
			(at 80.645 72.39 0)
		)
		(property "Footprint" "bitaxe:BM1366"
			(at 69.85 93.98 0)
		)
		(property "Datasheet" ""
			(at 69.85 93.98 0)
		)
		(property "Description" ""
			(at 77.47 93.98 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "17")
		(pin "18")
		(pin "19")
		(pin "2")
		(pin "20")
		(pin "21")
		(pin "22")
		(pin "23")
		(pin "24")
		(pin "25")
		(pin "26")
		(pin "27")
		(pin "28")
		(pin "29")
		(pin "3")
		(pin "30")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "bitaxeHex"
				(path
					(reference "U18")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 256.54 24.13 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 262.89 20.955 0)
		)
		(property "Value" "1uF"
			(at 262.255 26.67 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 256.54 24.13 0)
		)
		(property "Datasheet" ""
			(at 256.54 24.13 0)
		)
		(property "Description" ""
			(at 256.54 24.13 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 256.54 24.13 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 256.54 24.13 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C112")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 77.47 187.96 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R38"
			(at 71.12 186.69 0)
		)
		(property "Value" "115k"
			(at 71.12 189.23 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 76.454 187.706 90)
		)
		(property "Datasheet" "~"
			(at 77.47 187.96 0)
		)
		(property "Description" ""
			(at 77.47 187.96 0)
		)
		(property "DK" "YAG2956CT-ND"
			(at 77.47 187.96 0)
		)
		(property "PARTNO" "RC0402FR-07115KL"
			(at 77.47 187.96 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R38")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 260.35 67.31 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C18"
			(at 257.81 64.77 90)
		)
		(property "Value" "1uF"
			(at 259.08 67.945 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 260.35 67.31 0)
		)
		(property "Datasheet" ""
			(at 260.35 67.31 0)
		)
		(property "Description" ""
			(at 260.35 67.31 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 260.35 67.31 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 260.35 67.31 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C18")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C114")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:oscillator")
		(at 201.93 149.86 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U1"
			(at 198.12 144.78 0)
		)
		(property "Value" "25MHz"
			(at 203.835 154.94 0)
		)
		(property "Footprint" "bitaxe:O 25,0-JO32-B-1V3-1-T1-LF"
			(at 200.66 151.13 0)
		)
		(property "Datasheet" "https://www.jauch.com/downloadfile/5ef1edcfb8e2f73163c8ce8009ef659d1/jo32-1.8-3.3v.pdf"
			(at 200.66 151.13 0)
		)
		(property "Description" ""
			(at 201.93 149.86 0)
		)
		(property "DK" "1908-O250-JO32-B-1V3-1-T1-LFCT-ND"
			(at 201.93 149.86 0)
		)
		(property "PARTNO" "O 25,0-JO32-B-1V3-1-T1-LF"
			(at 201.93 149.86 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(instances
			(project "bm1366"
				(path
					(reference "U1")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "U19")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 105.41 67.31 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C12"
			(at 102.235 64.77 90)
		)
		(property "Value" "1uF"
			(at 104.14 67.945 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 105.41 67.31 0)
		)
		(property "Datasheet" ""
			(at 105.41 67.31 0)
		)
		(property "Description" ""
			(at 105.41 67.31 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 105.41 67.31 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 105.41 67.31 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C12")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C90")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 95.25 176.53 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 101.6 176.53 90)
		)
		(property "Value" "TestPoint"
			(at 100.965 175.2601 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 95.25 171.45 0)
		)
		(property "Datasheet" "~"
			(at 95.25 171.45 0)
		)
		(property "Description" ""
			(at 95.25 176.53 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP45")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 186.69 99.06 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 180.34 99.06 90)
		)
		(property "Value" "TestPoint"
			(at 180.975 100.3299 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 186.69 104.14 0)
		)
		(property "Datasheet" "~"
			(at 186.69 104.14 0)
		)
		(property "Description" ""
			(at 186.69 99.06 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP48")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 90.17 45.72 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 86.36 47.625 90)
		)
		(property "Value" "10k"
			(at 93.98 47.625 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 90.424 44.704 90)
		)
		(property "Datasheet" "~"
			(at 90.17 45.72 0)
		)
		(property "Description" ""
			(at 90.17 45.72 0)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 90.17 45.72 0)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 90.17 45.72 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R43")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 203.2 160.02 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 196.215 163.195 90)
		)
		(property "Value" "0.1uF"
			(at 205.105 163.195 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 203.2 160.02 0)
		)
		(property "Datasheet" ""
			(at 203.2 160.02 0)
		)
		(property "Description" ""
			(at 203.2 160.02 0)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 203.2 160.02 0)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 203.2 160.02 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C106")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 34.29 45.72 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 30.48 47.625 90)
		)
		(property "Value" "10k"
			(at 38.1 47.625 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 34.036 46.736 90)
		)
		(property "Datasheet" "~"
			(at 34.29 45.72 0)
		)
		(property "Description" ""
			(at 34.29 45.72 0)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 34.29 45.72 0)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 34.29 45.72 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R35")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 186.69 101.6 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 180.34 101.6 90)
		)
		(property "Value" "TestPoint"
			(at 180.975 102.8699 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 186.69 106.68 0)
		)
		(property "Datasheet" "~"
			(at 186.69 106.68 0)
		)
		(property "Description" ""
			(at 186.69 101.6 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP49")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "TLV3544_2")
		(lib_id "bitaxe:TLV3544")
		(at 104.14 43.18 0)
		(unit 2)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U15"
			(at 111.125 40.005 0)
		)
		(property "Value" "TLV3544"
			(at 112.395 46.99 0)
		)
		(property "Footprint" "Package_SO:TSSOP-14_4.4x5mm_P0.65mm"
			(at 106.68 43.18 0)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tlv3542.pdf"
			(at 105.41 43.18 0)
		)
		(property "Description" ""
			(at 104.14 43.18 0)
		)
		(property "DK" "296-45352-1-ND"
			(at 104.14 43.18 0)
		)
		(property "PARTNO" "TLV3544IPWR"
			(at 104.14 43.18 0)
		)
		(pin "1")
		(pin "11")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "10")
		(pin "8")
		(pin "9")
		(pin "12")
		(pin "13")
		(pin "14")
		(instances
			(project "bitaxeHex"
				(path
					(reference "U15")
					(unit 2)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 153.67 151.13 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C11"
			(at 154.94 149.225 0)
		)
		(property "Value" "1uF"
			(at 154.94 154.305 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 153.67 151.13 0)
		)
		(property "Datasheet" ""
			(at 153.67 151.13 0)
		)
		(property "Description" ""
			(at 153.67 151.13 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 153.67 151.13 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 153.67 151.13 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C11")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C99")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 53.34 29.21 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 49.53 30.48 90)
		)
		(property "Value" "1k"
			(at 58.42 30.48 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 53.086 30.226 90)
		)
		(property "Datasheet" "~"
			(at 53.34 29.21 0)
		)
		(property "Description" ""
			(at 53.34 29.21 0)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 53.34 29.21 0)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 53.34 29.21 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R37")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 153.67 67.31 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C2"
			(at 151.13 64.77 90)
		)
		(property "Value" "1uF"
			(at 152.4 67.945 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 153.67 67.31 0)
		)
		(property "Datasheet" ""
			(at 153.67 67.31 0)
		)
		(property "Description" ""
			(at 153.67 67.31 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 153.67 67.31 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 153.67 67.31 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C2")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C98")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 91.44 154.94 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C24"
			(at 92.71 153.035 0)
		)
		(property "Value" "1uF"
			(at 93.345 158.75 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 91.44 154.94 0)
		)
		(property "Datasheet" ""
			(at 91.44 154.94 0)
		)
		(property "Description" ""
			(at 91.44 154.94 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 91.44 154.94 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 91.44 154.94 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C24")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C88")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 177.8 67.31 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6"
			(at 175.26 64.77 90)
		)
		(property "Value" "1uF"
			(at 176.53 67.945 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 177.8 67.31 0)
		)
		(property "Datasheet" ""
			(at 177.8 67.31 0)
		)
		(property "Description" ""
			(at 177.8 67.31 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 177.8 67.31 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 177.8 67.31 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C103")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 237.49 67.31 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C15"
			(at 234.95 64.77 90)
		)
		(property "Value" "1uF"
			(at 236.22 67.945 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 237.49 67.31 0)
		)
		(property "Datasheet" ""
			(at 237.49 67.31 0)
		)
		(property "Description" ""
			(at 237.49 67.31 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 237.49 67.31 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 237.49 67.31 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C15")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C108")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 149.86 50.8 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 146.05 52.705 90)
		)
		(property "Value" "10k"
			(at 153.67 52.705 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 150.114 49.784 90)
		)
		(property "Datasheet" "~"
			(at 149.86 50.8 0)
		)
		(property "Description" ""
			(at 149.86 50.8 0)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 149.86 50.8 0)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 149.86 50.8 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R49")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "TLV3544_1")
		(lib_id "bitaxe:TLV3544")
		(at 48.26 43.18 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U15"
			(at 55.88 40.005 0)
		)
		(property "Value" "TLV3544"
			(at 57.785 46.355 0)
		)
		(property "Footprint" "Package_SO:TSSOP-14_4.4x5mm_P0.65mm"
			(at 50.8 43.18 0)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tlv3542.pdf"
			(at 49.53 43.18 0)
		)
		(property "Description" ""
			(at 48.26 43.18 0)
		)
		(property "DK" "296-45352-1-ND"
			(at 48.26 43.18 0)
		)
		(property "PARTNO" "TLV3544IPWR"
			(at 48.26 43.18 0)
		)
		(pin "1")
		(pin "11")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "10")
		(pin "8")
		(pin "9")
		(pin "12")
		(pin "13")
		(pin "14")
		(instances
			(project "bitaxeHex"
				(path
					(reference "U15")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 165.1 67.31 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C3"
			(at 162.56 64.77 90)
		)
		(property "Value" "1uF"
			(at 163.83 67.945 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 165.1 67.31 0)
		)
		(property "Datasheet" ""
			(at 165.1 67.31 0)
		)
		(property "Description" ""
			(at 165.1 67.31 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 165.1 67.31 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 165.1 67.31 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C3")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C100")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:TLV3544")
		(at 219.71 43.18 0)
		(unit 4)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U15"
			(at 226.695 38.735 0)
		)
		(property "Value" "TLV3544"
			(at 227.965 46.355 0)
		)
		(property "Footprint" "Package_SO:TSSOP-14_4.4x5mm_P0.65mm"
			(at 222.25 43.18 0)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tlv3542.pdf"
			(at 220.98 43.18 0)
		)
		(property "Description" ""
			(at 219.71 43.18 0)
		)
		(property "DK" "296-45352-1-ND"
			(at 219.71 43.18 0)
		)
		(property "PARTNO" "TLV3544IPWR"
			(at 219.71 43.18 0)
		)
		(pin "1")
		(pin "11")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "10")
		(pin "8")
		(pin "9")
		(pin "12")
		(pin "13")
		(pin "14")
		(instances
			(project "bitaxeHex"
				(path
					(reference "U15")
					(unit 4)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:AP7331")
		(at 64.77 177.8 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U16"
			(at 64.77 172.72 0)
		)
		(property "Value" "AP7331"
			(at 64.77 185.42 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:TSOT-23-5"
			(at 64.77 167.64 0)
		)
		(property "Datasheet" "https://www.digikey.com/en/products/detail/diodes-incorporated/AP7331-WG-7/2270813"
			(at 64.77 170.18 0)
		)
		(property "Description" ""
			(at 64.77 177.8 0)
		)
		(property "DK" "AP7331-WG-7DICT-ND"
			(at 64.77 177.8 0)
		)
		(property "PARTNO" "AP7331-WG-7"
			(at 64.77 177.8 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(instances
			(project "bitaxeHex"
				(path
					(reference "U16")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 26.67 67.31 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C2"
			(at 24.13 64.77 90)
		)
		(property "Value" "1uF"
			(at 25.4 67.945 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 26.67 67.31 0)
		)
		(property "Datasheet" ""
			(at 26.67 67.31 0)
		)
		(property "Description" ""
			(at 26.67 67.31 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 26.67 67.31 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 26.67 67.31 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C2")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C79")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 149.86 40.64 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 146.05 42.545 90)
		)
		(property "Value" "1k"
			(at 153.67 42.545 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 149.606 41.656 90)
		)
		(property "Datasheet" "~"
			(at 149.86 40.64 0)
		)
		(property "Description" ""
			(at 149.86 40.64 0)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 149.86 40.64 0)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 149.86 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R47")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 46.99 119.38 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5"
			(at 48.26 117.475 0)
		)
		(property "Value" "1uF"
			(at 48.26 123.19 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 46.99 119.38 0)
		)
		(property "Datasheet" ""
			(at 46.99 119.38 0)
		)
		(property "Description" ""
			(at 46.99 119.38 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 46.99 119.38 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 46.99 119.38 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C5")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C83")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 248.92 67.31 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C17"
			(at 246.38 64.77 90)
		)
		(property "Value" "1uF"
			(at 247.65 67.945 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 248.92 67.31 0)
		)
		(property "Datasheet" ""
			(at 248.92 67.31 0)
		)
		(property "Description" ""
			(at 248.92 67.31 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 248.92 67.31 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 248.92 67.31 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C17")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C109")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 224.79 29.21 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 220.98 30.48 90)
		)
		(property "Value" "1k"
			(at 229.87 30.48 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 224.536 30.226 90)
		)
		(property "Datasheet" "~"
			(at 224.79 29.21 0)
		)
		(property "Description" ""
			(at 224.79 29.21 0)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 224.79 29.21 0)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 224.79 29.21 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R54")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:BM1366_mode0")
		(at 205.74 93.98 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U20"
			(at 191.135 72.39 0)
		)
		(property "Value" "BM1366_mode0"
			(at 208.28 72.39 0)
		)
		(property "Footprint" "bitaxe:BM1366"
			(at 198.12 93.98 0)
		)
		(property "Datasheet" ""
			(at 198.12 93.98 0)
		)
		(property "Description" ""
			(at 205.74 93.98 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "17")
		(pin "18")
		(pin "19")
		(pin "2")
		(pin "20")
		(pin "21")
		(pin "22")
		(pin "23")
		(pin "24")
		(pin "25")
		(pin "26")
		(pin "27")
		(pin "28")
		(pin "29")
		(pin "3")
		(pin "30")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "bitaxeHex"
				(path
					(reference "U20")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 90.17 40.64 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 86.36 42.545 90)
		)
		(property "Value" "1k"
			(at 93.98 42.545 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 89.916 41.656 90)
		)
		(property "Datasheet" "~"
			(at 90.17 40.64 0)
		)
		(property "Description" ""
			(at 90.17 40.64 0)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 90.17 40.64 0)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 90.17 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R42")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 45.72 185.42 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 43.815 182.245 0)
		)
		(property "Value" "0.1uF"
			(at 44.45 187.96 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 45.72 185.42 0)
		)
		(property "Datasheet" ""
			(at 45.72 185.42 0)
		)
		(property "Description" ""
			(at 45.72 185.42 0)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 45.72 185.42 0)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 45.72 185.42 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C82")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 85.09 148.59 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R41"
			(at 85.09 146.05 90)
		)
		(property "Value" "115k"
			(at 85.09 151.13 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 85.344 147.574 90)
		)
		(property "Datasheet" "~"
			(at 85.09 148.59 0)
		)
		(property "Description" ""
			(at 85.09 148.59 0)
		)
		(property "DK" "YAG2956CT-ND"
			(at 85.09 148.59 0)
		)
		(property "PARTNO" "RC0402FR-07115KL"
			(at 85.09 148.59 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R41")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 257.81 119.38 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C16"
			(at 258.445 117.475 0)
		)
		(property "Value" "1uF"
			(at 259.08 123.19 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 257.81 119.38 0)
		)
		(property "Datasheet" ""
			(at 257.81 119.38 0)
		)
		(property "Description" ""
			(at 257.81 119.38 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 257.81 119.38 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 257.81 119.38 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C16")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C113")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 78.74 154.94 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R39"
			(at 72.39 153.67 0)
		)
		(property "Value" "115k"
			(at 72.39 156.21 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 77.724 154.686 90)
		)
		(property "Datasheet" "~"
			(at 78.74 154.94 0)
		)
		(property "Description" ""
			(at 78.74 154.94 0)
		)
		(property "DK" "YAG2956CT-ND"
			(at 78.74 154.94 0)
		)
		(property "PARTNO" "RC0402FR-07115KL"
			(at 78.74 154.94 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R39")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 96.52 143.51 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 102.87 143.51 90)
		)
		(property "Value" "TestPoint"
			(at 102.235 142.2401 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 96.52 138.43 0)
		)
		(property "Datasheet" "~"
			(at 96.52 138.43 0)
		)
		(property "Description" ""
			(at 96.52 143.51 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP46")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:AP7331")
		(at 66.04 144.78 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U17"
			(at 66.04 139.7 0)
		)
		(property "Value" "AP7331"
			(at 66.04 152.4 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:TSOT-23-5"
			(at 66.04 134.62 0)
		)
		(property "Datasheet" "https://www.digikey.com/en/products/detail/diodes-incorporated/AP7331-WG-7/2270813"
			(at 66.04 137.16 0)
		)
		(property "Description" ""
			(at 66.04 144.78 0)
		)
		(property "DK" "AP7331-WG-7DICT-ND"
			(at 66.04 144.78 0)
		)
		(property "PARTNO" "AP7331-WG-7"
			(at 66.04 144.78 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(instances
			(project "bitaxeHex"
				(path
					(reference "U17")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 38.1 67.31 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C3"
			(at 35.56 64.77 90)
		)
		(property "Value" "1uF"
			(at 36.83 67.945 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 38.1 67.31 0)
		)
		(property "Datasheet" ""
			(at 38.1 67.31 0)
		)
		(property "Description" ""
			(at 38.1 67.31 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 38.1 67.31 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 38.1 67.31 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C3")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C80")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 248.92 119.38 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C14"
			(at 249.555 117.475 0)
		)
		(property "Value" "1uF"
			(at 249.555 123.19 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 248.92 119.38 0)
		)
		(property "Datasheet" ""
			(at 248.92 119.38 0)
		)
		(property "Description" ""
			(at 248.92 119.38 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 248.92 119.38 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 248.92 119.38 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C14")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C110")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 226.06 67.31 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C12"
			(at 222.885 64.77 90)
		)
		(property "Value" "1uF"
			(at 224.79 67.945 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 226.06 67.31 0)
		)
		(property "Datasheet" ""
			(at 226.06 67.31 0)
		)
		(property "Description" ""
			(at 226.06 67.31 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 226.06 67.31 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 226.06 67.31 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C12")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C107")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 166.37 119.38 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C4"
			(at 167.64 117.475 0)
		)
		(property "Value" "1uF"
			(at 167.64 123.19 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 166.37 119.38 0)
		)
		(property "Datasheet" ""
			(at 166.37 119.38 0)
		)
		(property "Description" ""
			(at 166.37 119.38 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 166.37 119.38 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 166.37 119.38 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C4")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C102")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 205.74 40.64 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 201.93 42.545 90)
		)
		(property "Value" "1k"
			(at 209.55 42.545 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 205.486 41.656 90)
		)
		(property "Datasheet" "~"
			(at 205.74 40.64 0)
		)
		(property "Description" ""
			(at 205.74 40.64 0)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 205.74 40.64 0)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 205.74 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R51")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 83.82 181.61 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 83.82 179.07 90)
		)
		(property "Value" "402K"
			(at 83.82 184.15 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 83.566 182.626 90)
		)
		(property "Datasheet" "~"
			(at 83.82 181.61 0)
		)
		(property "Description" ""
			(at 83.82 181.61 0)
		)
		(property "DK" "YAG3151CT-ND"
			(at 83.82 181.61 0)
		)
		(property "PARTNO" "RC0402FR-07402KL"
			(at 83.82 181.61 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R40")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 189.23 67.31 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 186.69 64.77 90)
		)
		(property "Value" "1uF"
			(at 187.96 67.945 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 189.23 67.31 0)
		)
		(property "Datasheet" ""
			(at 189.23 67.31 0)
		)
		(property "Description" ""
			(at 189.23 67.31 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 189.23 67.31 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 189.23 67.31 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C105")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 48.26 101.6 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 41.91 101.6 90)
		)
		(property "Value" "TestPoint"
			(at 42.545 102.8699 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 48.26 106.68 0)
		)
		(property "Datasheet" "~"
			(at 48.26 106.68 0)
		)
		(property "Description" ""
			(at 48.26 101.6 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP44")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 123.19 151.13 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 121.285 147.955 0)
		)
		(property "Value" "0.1uF"
			(at 121.92 153.67 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 123.19 151.13 0)
		)
		(property "Datasheet" ""
			(at 123.19 151.13 0)
		)
		(property "Description" ""
			(at 123.19 151.13 0)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 123.19 151.13 0)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 123.19 151.13 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C93")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 143.51 151.13 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C10"
			(at 144.78 149.225 0)
		)
		(property "Value" "1uF"
			(at 144.78 154.305 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 143.51 151.13 0)
		)
		(property "Datasheet" ""
			(at 143.51 151.13 0)
		)
		(property "Description" ""
			(at 143.51 151.13 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 143.51 151.13 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 143.51 151.13 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C10")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C97")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 34.29 50.8 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 30.48 52.705 90)
		)
		(property "Value" "10k"
			(at 38.1 52.705 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 34.544 49.784 90)
		)
		(property "Datasheet" "~"
			(at 34.29 50.8 0)
		)
		(property "Description" ""
			(at 34.29 50.8 0)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 34.29 50.8 0)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 34.29 50.8 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R36")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 116.84 119.38 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C14"
			(at 117.475 117.475 0)
		)
		(property "Value" "1uF"
			(at 117.475 123.19 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 116.84 119.38 0)
		)
		(property "Datasheet" ""
			(at 116.84 119.38 0)
		)
		(property "Description" ""
			(at 116.84 119.38 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 116.84 119.38 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 116.84 119.38 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C14")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C92")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "TLV3544_3")
		(lib_id "bitaxe:TLV3544")
		(at 163.83 43.18 0)
		(unit 3)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U15"
			(at 169.545 39.37 0)
		)
		(property "Value" "TLV3544"
			(at 171.45 46.99 0)
		)
		(property "Footprint" "Package_SO:TSSOP-14_4.4x5mm_P0.65mm"
			(at 166.37 43.18 0)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tlv3542.pdf"
			(at 165.1 43.18 0)
		)
		(property "Description" ""
			(at 163.83 43.18 0)
		)
		(property "DK" "296-45352-1-ND"
			(at 163.83 43.18 0)
		)
		(property "PARTNO" "TLV3544IPWR"
			(at 163.83 43.18 0)
		)
		(pin "1")
		(pin "11")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "10")
		(pin "8")
		(pin "9")
		(pin "12")
		(pin "13")
		(pin "14")
		(instances
			(project "bitaxeHex"
				(path
					(reference "U15")
					(unit 3)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 34.29 40.64 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 30.48 42.545 90)
		)
		(property "Value" "1k"
			(at 38.1 42.545 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 34.036 41.656 90)
		)
		(property "Datasheet" "~"
			(at 34.29 40.64 0)
		)
		(property "Description" ""
			(at 34.29 40.64 0)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 34.29 40.64 0)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 34.29 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R34")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 205.74 50.8 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 201.93 52.705 90)
		)
		(property "Value" "10k"
			(at 209.55 52.705 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 205.994 49.784 90)
		)
		(property "Datasheet" "~"
			(at 205.74 50.8 0)
		)
		(property "Description" ""
			(at 205.74 50.8 0)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 205.74 50.8 0)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 205.74 50.8 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R53")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 128.27 67.31 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C17"
			(at 125.73 64.77 90)
		)
		(property "Value" "1uF"
			(at 127 67.945 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 128.27 67.31 0)
		)
		(property "Datasheet" ""
			(at 128.27 67.31 0)
		)
		(property "Description" ""
			(at 128.27 67.31 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 128.27 67.31 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 128.27 67.31 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C17")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C94")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 149.86 45.72 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 146.05 47.625 90)
		)
		(property "Value" "10k"
			(at 153.67 47.625 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 150.114 44.704 90)
		)
		(property "Datasheet" "~"
			(at 149.86 45.72 0)
		)
		(property "Description" ""
			(at 149.86 45.72 0)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 149.86 45.72 0)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 149.86 45.72 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R48")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 38.1 119.38 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C4"
			(at 39.37 117.475 0)
		)
		(property "Value" "1uF"
			(at 39.37 123.19 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 38.1 119.38 0)
		)
		(property "Datasheet" ""
			(at 38.1 119.38 0)
		)
		(property "Description" ""
			(at 38.1 119.38 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 38.1 119.38 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 38.1 119.38 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C4")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C81")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 109.22 29.21 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 105.41 30.48 90)
		)
		(property "Value" "1k"
			(at 114.3 30.48 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 108.966 30.226 90)
		)
		(property "Datasheet" "~"
			(at 109.22 29.21 0)
		)
		(property "Description" ""
			(at 109.22 29.21 0)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 109.22 29.21 0)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 109.22 29.21 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R45")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 49.53 67.31 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6"
			(at 46.99 64.77 90)
		)
		(property "Value" "1uF"
			(at 48.26 67.945 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 49.53 67.31 0)
		)
		(property "Datasheet" ""
			(at 49.53 67.31 0)
		)
		(property "Description" ""
			(at 49.53 67.31 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 49.53 67.31 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 49.53 67.31 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C85")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 242.57 43.18 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 238.76 45.085 90)
		)
		(property "Value" "1k"
			(at 246.38 45.085 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 242.316 44.196 90)
		)
		(property "Datasheet" "~"
			(at 242.57 43.18 0)
		)
		(property "Description" ""
			(at 242.57 43.18 0)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 242.57 43.18 0)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 242.57 43.18 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R55")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 180.34 119.38 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5"
			(at 181.61 117.475 0)
		)
		(property "Value" "1uF"
			(at 181.61 123.19 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 180.34 119.38 0)
		)
		(property "Datasheet" ""
			(at 180.34 119.38 0)
		)
		(property "Description" ""
			(at 180.34 119.38 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 180.34 119.38 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 180.34 119.38 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C5")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C104")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Polarized")
		(at 165.1 151.13 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C13"
			(at 168.275 148.9709 0)
		)
		(property "Value" "330uF"
			(at 168.275 151.5109 0)
		)
		(property "Footprint" "Capacitor_Tantalum_SMD:CP_EIA-7343-31_Kemet-D_Pad2.25x2.55mm_HandSolder"
			(at 166.0652 154.94 0)
		)
		(property "Datasheet" "~"
			(at 165.1 151.13 0)
		)
		(property "Description" ""
			(at 165.1 151.13 0)
		)
		(property "DK" "718-1028-1-ND"
			(at 165.1 151.13 0)
		)
		(property "PARTNO" "293D337X9010E2TE3"
			(at 165.1 151.13 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C101")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 90.17 187.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C24"
			(at 91.44 186.055 0)
		)
		(property "Value" "1uF"
			(at 92.075 191.77 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 90.17 187.96 0)
		)
		(property "Datasheet" ""
			(at 90.17 187.96 0)
		)
		(property "Description" ""
			(at 90.17 187.96 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 90.17 187.96 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 90.17 187.96 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C24")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C87")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 90.17 50.8 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 86.36 52.705 90)
		)
		(property "Value" "10k"
			(at 93.98 52.705 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 90.424 49.784 90)
		)
		(property "Datasheet" "~"
			(at 90.17 50.8 0)
		)
		(property "Description" ""
			(at 90.17 50.8 0)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 90.17 50.8 0)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 90.17 50.8 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R44")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 168.91 29.21 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 165.1 30.48 90)
		)
		(property "Value" "1k"
			(at 173.99 30.48 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 168.656 30.226 90)
		)
		(property "Datasheet" "~"
			(at 168.91 29.21 0)
		)
		(property "Description" ""
			(at 168.91 29.21 0)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 168.91 29.21 0)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 168.91 29.21 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R50")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 101.6 99.06 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 107.95 99.06 90)
		)
		(property "Value" "TestPoint"
			(at 107.315 97.7901 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 101.6 93.98 0)
		)
		(property "Datasheet" "~"
			(at 101.6 93.98 0)
		)
		(property "Description" ""
			(at 101.6 99.06 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP47")
					(unit 1)
				)
			)
		)
	)
)