(kicad_sch
	(version 20231120)
	(generator "eeschema")
	(generator_version "8.0")
	(paper "A")
	(title_block
		(title "bitaxeHex")
		(date "2024-03-09")
		(rev "303")
	)
	(lib_symbols
		(symbol "BM1366_mode1_1"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U14"
				(at 1.9559 24.13 0)
			)
			(property "Value" "BM1366_mode1"
				(at 1.9559 21.59 0)
			)
			(property "Footprint" "bitaxe:BM1366"
				(at 17.78 -33.02 0)
			)
			(property "Datasheet" ""
				(at -7.62 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "BM1366_mode1_1_0_1"
				(rectangle
					(start -15.24 20.32)
					(end 15.24 -17.78)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy 5.08 -1.27) (xy -5.08 -1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.08 -1.27) (xy 2.54 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.08 -1.27) (xy 2.54 0)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "BM1366_mode1_1_1_1"
				(pin power_in line
					(at -17.78 17.78 0)
					(length 2.54)
					(name "VDD1_0")
					(number "1")
				)
				(pin input line
					(at -17.78 -5.08 0)
					(length 2.54)
					(name "ADDR0")
					(number "10")
				)
				(pin input line
					(at -17.78 -7.62 0)
					(length 2.54)
					(name "ADDR1")
					(number "11")
				)
				(pin power_in line
					(at -17.78 -10.16 0)
					(length 2.54)
					(name "PLL_VSS")
					(number "12")
				)
				(pin power_in line
					(at -17.78 -12.7 0)
					(length 2.54)
					(name "VDDIO_08_0")
					(number "13")
				)
				(pin power_in line
					(at -17.78 -15.24 0)
					(length 2.54)
					(name "VDDIO_18_0")
					(number "14")
				)
				(pin power_in line
					(at 17.78 -15.24 180)
					(length 2.54)
					(name "VDDIO_18_1")
					(number "15")
				)
				(pin power_in line
					(at 17.78 -12.7 180)
					(length 2.54)
					(name "VDDIO_08_1")
					(number "16")
				)
				(pin power_in line
					(at 17.78 -10.16 180)
					(length 2.54)
					(name "VSS")
					(number "17")
				)
				(pin input line
					(at 17.78 -7.62 180)
					(length 2.54)
					(name "PIN_MODE")
					(number "18")
				)
				(pin output line
					(at 17.78 -5.08 180)
					(length 2.54)
					(name "INV_CLKO")
					(number "19")
				)
				(pin power_in line
					(at -17.78 15.24 0)
					(length 2.54)
					(name "VDD2_0")
					(number "2")
				)
				(pin output line
					(at 17.78 -2.54 180)
					(length 2.54)
					(name "CO")
					(number "20")
				)
				(pin output line
					(at 17.78 0 180)
					(length 2.54)
					(name "CLKO")
					(number "21")
				)
				(pin input line
					(at 17.78 2.54 180)
					(length 2.54)
					(name "RI")
					(number "22")
				)
				(pin output line
					(at 17.78 5.08 180)
					(length 2.54)
					(name "BO")
					(number "23")
				)
				(pin output line
					(at 17.78 7.62 180)
					(length 2.54)
					(name "NRSTO")
					(number "24")
				)
				(pin power_in line
					(at 17.78 10.16 180)
					(length 2.54)
					(name "VSS")
					(number "25")
				)
				(pin power_in line
					(at 17.78 12.7 180)
					(length 2.54)
					(name "VDD3_1")
					(number "26")
				)
				(pin power_in line
					(at 17.78 15.24 180)
					(length 2.54)
					(name "VDD2_1")
					(number "27")
				)
				(pin power_in line
					(at 17.78 17.78 180)
					(length 2.54)
					(name "VDD1_1")
					(number "28")
				)
				(pin power_in line
					(at 0 22.86 270)
					(length 2.54)
					(name "VDD")
					(number "29")
				)
				(pin power_in line
					(at -17.78 12.7 0)
					(length 2.54)
					(name "VDD3_0")
					(number "3")
				)
				(pin power_in line
					(at 0 -20.32 90)
					(length 2.54)
					(name "VSS")
					(number "30")
				)
				(pin power_in line
					(at -17.78 10.16 0)
					(length 2.54)
					(name "VSS")
					(number "4")
				)
				(pin input line
					(at -17.78 7.62 0)
					(length 2.54)
					(name "NRSTI")
					(number "5")
				)
				(pin input line
					(at -17.78 5.08 0)
					(length 2.54)
					(name "BI")
					(number "6")
				)
				(pin output line
					(at -17.78 2.54 0)
					(length 2.54)
					(name "RO")
					(number "7")
				)
				(pin input line
					(at -17.78 0 0)
					(length 2.54)
					(name "CLKI")
					(number "8")
				)
				(pin input line
					(at -17.78 -2.54 0)
					(length 2.54)
					(name "CI")
					(number "9")
				)
			)
		)
		(symbol "Connector:TestPoint"
			(pin_numbers hide)
			(pin_names
				(offset 0.762) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "TP"
				(at 0 6.858 0)
			)
			(property "Value" "TestPoint"
				(at 0 5.08 0)
			)
			(property "Footprint" ""
				(at 5.08 0 0)
			)
			(property "Datasheet" "~"
				(at 5.08 0 0)
			)
			(property "Description" "test point"
				(at 0 0 0)
			)
			(property "ki_keywords" "test point tp"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Pin* Test*"
				(at 0 0 0)
			)
			(symbol "TestPoint_0_1"
				(circle
					(center 0 3.302)
					(radius 0.762)
					(fill
						(type none)
					)
				)
			)
			(symbol "TestPoint_1_1"
				(pin passive line
					(at 0 0 90)
					(length 2.54)
					(name "1")
					(number "1")
				)
			)
		)
		(symbol "Device:C"
			(pin_numbers hide)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Unpolarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C_*"
				(at 0 0 0)
			)
			(symbol "C_0_1"
				(polyline
					(pts
						(xy -2.032 -0.762) (xy 2.032 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.032 0.762) (xy 2.032 0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:C_Polarized"
			(pin_numbers hide)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C_Polarized"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Polarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "CP_*"
				(at 0 0 0)
			)
			(symbol "C_Polarized_0_1"
				(rectangle
					(start -2.286 0.508)
					(end 2.286 1.016)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.778 2.286) (xy -0.762 2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 2.794) (xy -1.27 1.778)
					)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 2.286 -0.508)
					(end -2.286 -1.016)
					(fill
						(type outline)
					)
				)
			)
			(symbol "C_Polarized_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:R_US"
			(pin_numbers hide)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 2.54 0 90)
			)
			(property "Value" "R_US"
				(at -2.54 0 90)
			)
			(property "Footprint" ""
				(at 1.016 -0.254 90)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Resistor, US symbol"
				(at 0 0 0)
			)
			(property "ki_keywords" "R res resistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R_US_0_1"
				(polyline
					(pts
						(xy 0 -2.286) (xy 0 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.286) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -0.762) (xy 1.016 -1.143) (xy 0 -1.524) (xy -1.016 -1.905) (xy 0 -2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0.762) (xy 1.016 0.381) (xy 0 0) (xy -1.016 -0.381) (xy 0 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.286) (xy 1.016 1.905) (xy 0 1.524) (xy -1.016 1.143) (xy 0 0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_US_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "bitaxe:AP7331"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -7.62 5.08 0)
			)
			(property "Value" "AP7331"
				(at 5.08 5.08 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:TSOT-23-5"
				(at 0 10.16 0)
			)
			(property "Datasheet" "https://www.digikey.com/en/products/detail/diodes-incorporated/AP7331-WG-7/2270813"
				(at 0 7.62 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "AP7331_0_1"
				(rectangle
					(start -7.62 3.81)
					(end 7.62 -6.35)
					(fill
						(type background)
					)
				)
			)
			(symbol "AP7331_1_0"
				(pin power_in line
					(at -10.16 1.27 0)
					(length 2.54)
					(name "VIN")
					(number "1")
				)
				(pin bidirectional line
					(at -10.16 -3.81 0)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin input line
					(at -10.16 -1.27 0)
					(length 2.54)
					(name "EN")
					(number "3")
				)
				(pin bidirectional line
					(at 10.16 -3.81 180)
					(length 2.54)
					(name "ADJ")
					(number "4")
				)
				(pin power_out line
					(at 10.16 1.27 180)
					(length 2.54)
					(name "VOUT")
					(number "5")
				)
			)
		)
		(symbol "bitaxe:BM1366_mode1"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U14"
				(at 1.9559 24.13 0)
			)
			(property "Value" "BM1366_mode1"
				(at 1.9559 21.59 0)
			)
			(property "Footprint" "bitaxe:BM1366"
				(at 17.78 -33.02 0)
			)
			(property "Datasheet" ""
				(at -7.62 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "BM1366_mode1_0_1"
				(rectangle
					(start -15.24 20.32)
					(end 15.24 -17.78)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy 5.08 -1.27) (xy -5.08 -1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.08 -1.27) (xy 2.54 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.08 -1.27) (xy 2.54 0)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "BM1366_mode1_1_1"
				(pin power_in line
					(at -17.78 17.78 0)
					(length 2.54)
					(name "VDD1_0")
					(number "1")
				)
				(pin input line
					(at -17.78 -5.08 0)
					(length 2.54)
					(name "ADDR0")
					(number "10")
				)
				(pin input line
					(at -17.78 -7.62 0)
					(length 2.54)
					(name "ADDR1")
					(number "11")
				)
				(pin power_in line
					(at -17.78 -10.16 0)
					(length 2.54)
					(name "PLL_VSS")
					(number "12")
				)
				(pin power_in line
					(at -17.78 -12.7 0)
					(length 2.54)
					(name "VDDIO_08_0")
					(number "13")
				)
				(pin power_in line
					(at -17.78 -15.24 0)
					(length 2.54)
					(name "VDDIO_18_0")
					(number "14")
				)
				(pin power_in line
					(at 17.78 -15.24 180)
					(length 2.54)
					(name "VDDIO_18_1")
					(number "15")
				)
				(pin power_in line
					(at 17.78 -12.7 180)
					(length 2.54)
					(name "VDDIO_08_1")
					(number "16")
				)
				(pin power_in line
					(at 17.78 -10.16 180)
					(length 2.54)
					(name "VSS")
					(number "17")
				)
				(pin input line
					(at 17.78 -7.62 180)
					(length 2.54)
					(name "PIN_MODE")
					(number "18")
				)
				(pin output line
					(at 17.78 -5.08 180)
					(length 2.54)
					(name "INV_CLKO")
					(number "19")
				)
				(pin power_in line
					(at -17.78 15.24 0)
					(length 2.54)
					(name "VDD2_0")
					(number "2")
				)
				(pin output line
					(at 17.78 -2.54 180)
					(length 2.54)
					(name "CO")
					(number "20")
				)
				(pin output line
					(at 17.78 0 180)
					(length 2.54)
					(name "CLKO")
					(number "21")
				)
				(pin input line
					(at 17.78 2.54 180)
					(length 2.54)
					(name "RI")
					(number "22")
				)
				(pin output line
					(at 17.78 5.08 180)
					(length 2.54)
					(name "BO")
					(number "23")
				)
				(pin output line
					(at 17.78 7.62 180)
					(length 2.54)
					(name "NRSTO")
					(number "24")
				)
				(pin power_in line
					(at 17.78 10.16 180)
					(length 2.54)
					(name "VSS")
					(number "25")
				)
				(pin power_in line
					(at 17.78 12.7 180)
					(length 2.54)
					(name "VDD3_1")
					(number "26")
				)
				(pin power_in line
					(at 17.78 15.24 180)
					(length 2.54)
					(name "VDD2_1")
					(number "27")
				)
				(pin power_in line
					(at 17.78 17.78 180)
					(length 2.54)
					(name "VDD1_1")
					(number "28")
				)
				(pin power_in line
					(at 0 22.86 270)
					(length 2.54)
					(name "VDD")
					(number "29")
				)
				(pin power_in line
					(at -17.78 12.7 0)
					(length 2.54)
					(name "VDD3_0")
					(number "3")
				)
				(pin power_in line
					(at 0 -20.32 90)
					(length 2.54)
					(name "VSS")
					(number "30")
				)
				(pin power_in line
					(at -17.78 10.16 0)
					(length 2.54)
					(name "VSS")
					(number "4")
				)
				(pin input line
					(at -17.78 7.62 0)
					(length 2.54)
					(name "NRSTI")
					(number "5")
				)
				(pin input line
					(at -17.78 5.08 0)
					(length 2.54)
					(name "BI")
					(number "6")
				)
				(pin output line
					(at -17.78 2.54 0)
					(length 2.54)
					(name "RO")
					(number "7")
				)
				(pin input line
					(at -17.78 0 0)
					(length 2.54)
					(name "CLKI")
					(number "8")
				)
				(pin input line
					(at -17.78 -2.54 0)
					(length 2.54)
					(name "CI")
					(number "9")
				)
			)
		)
		(symbol "bitaxe:oscillator"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -3.81 5.08 0)
			)
			(property "Value" "oscillator"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at -1.27 -1.27 0)
			)
			(property "Datasheet" ""
				(at -1.27 -1.27 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "oscillator_0_1"
				(rectangle
					(start -5.08 3.81)
					(end 5.08 -3.81)
					(fill
						(type background)
					)
				)
			)
			(symbol "oscillator_1_0"
				(pin bidirectional line
					(at -7.62 1.27 0)
					(length 2.54)
					(name "EN")
					(number "1")
				)
				(pin bidirectional line
					(at -7.62 -1.27 0)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin bidirectional line
					(at 7.62 1.27 180)
					(length 2.54)
					(name "OUT")
					(number "3")
				)
				(pin bidirectional line
					(at 7.62 -1.27 180)
					(length 2.54)
					(name "VIN")
					(number "4")
				)
			)
		)
	)
	(junction
		(at 50.8 195.58)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 175.26 107.95)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 88.9 148.59)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 116.84 66.04)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 33.02 127)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 157.48 144.78)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 237.49 66.04)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 248.92 66.04)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 166.37 66.04)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 140.97 82.55)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 44.45 176.53)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 161.29 127)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 157.48 157.48)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 144.78 85.09)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 228.6 153.67)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 128.27 66.04)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 209.55 153.67)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 147.32 144.78)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 111.76 127)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 154.94 80.01)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 39.37 66.04)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 245.11 127)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 105.41 74.93)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 147.32 157.48)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 72.39 127)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 134.62 82.55)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 156.21 127)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 137.16 144.78)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 229.87 127)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 50.8 161.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 177.8 74.93)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 161.29 105.41)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 74.93 148.59)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 74.93 181.61)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 116.84 77.47)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 175.26 127)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 111.76 105.41)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 137.16 157.48)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 128.27 80.01)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 97.79 107.95)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 88.9 143.51)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 97.79 127)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 74.93 161.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 198.12 66.04)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 88.9 176.53)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 177.8 66.04)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 238.76 127)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 74.93 195.58)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 105.41 66.04)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 44.45 143.51)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 200.66 127)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 154.94 66.04)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 50.8 143.51)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 50.8 176.53)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 140.97 66.04)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 41.91 127)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 226.06 66.04)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 88.9 181.61)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 166.37 77.47)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 50.8 66.04)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 118.11 127)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 26.67 66.04)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 200.66 66.04)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 72.39 66.04)
		(diameter 0)
		(color 0 0 0 0)
	)
	(no_connect
		(at 218.44 100.33)
	)
	(no_connect
		(at 90.17 100.33)
	)
	(wire
		(pts
			(xy 27.94 102.87) (xy 54.61 102.87)
		)
	)
	(wire
		(pts
			(xy 156.21 102.87) (xy 182.88 102.87)
		)
	)
	(wire
		(pts
			(xy 127 66.04) (xy 128.27 66.04)
		)
	)
	(wire
		(pts
			(xy 27.94 127) (xy 33.02 127)
		)
	)
	(wire
		(pts
			(xy 41.91 107.95) (xy 54.61 107.95)
		)
	)
	(wire
		(pts
			(xy 90.17 102.87) (xy 118.11 102.87)
		)
	)
	(wire
		(pts
			(xy 26.67 80.01) (xy 26.67 66.04)
		)
	)
	(wire
		(pts
			(xy 48.26 66.04) (xy 50.8 66.04)
		)
	)
	(wire
		(pts
			(xy 218.44 102.87) (xy 245.11 102.87)
		)
	)
	(wire
		(pts
			(xy 156.21 127) (xy 161.29 127)
		)
	)
	(wire
		(pts
			(xy 262.89 66.04) (xy 259.08 66.04)
		)
	)
	(wire
		(pts
			(xy 175.26 107.95) (xy 175.26 114.3)
		)
	)
	(wire
		(pts
			(xy 33.02 105.41) (xy 33.02 114.3)
		)
	)
	(wire
		(pts
			(xy 50.8 143.51) (xy 53.34 143.51)
		)
	)
	(wire
		(pts
			(xy 152.4 66.04) (xy 154.94 66.04)
		)
	)
	(wire
		(pts
			(xy 52.07 100.33) (xy 54.61 100.33)
		)
	)
	(wire
		(pts
			(xy 41.91 127) (xy 72.39 127)
		)
	)
	(wire
		(pts
			(xy 90.17 90.17) (xy 182.88 90.17)
		)
	)
	(wire
		(pts
			(xy 35.56 90.17) (xy 54.61 90.17)
		)
	)
	(wire
		(pts
			(xy 74.93 181.61) (xy 74.93 185.42)
		)
	)
	(wire
		(pts
			(xy 111.76 105.41) (xy 161.29 105.41)
		)
	)
	(wire
		(pts
			(xy 224.79 66.04) (xy 226.06 66.04)
		)
	)
	(wire
		(pts
			(xy 175.26 121.92) (xy 175.26 127)
		)
	)
	(wire
		(pts
			(xy 53.34 148.59) (xy 50.8 148.59)
		)
	)
	(wire
		(pts
			(xy 74.93 195.58) (xy 74.93 193.04)
		)
	)
	(wire
		(pts
			(xy 218.44 80.01) (xy 248.92 80.01)
		)
	)
	(wire
		(pts
			(xy 90.17 77.47) (xy 116.84 77.47)
		)
	)
	(wire
		(pts
			(xy 50.8 148.59) (xy 50.8 161.29)
		)
	)
	(wire
		(pts
			(xy 13.97 82.55) (xy 13.97 66.04)
		)
	)
	(wire
		(pts
			(xy 53.34 181.61) (xy 50.8 181.61)
		)
	)
	(wire
		(pts
			(xy 137.16 157.48) (xy 147.32 157.48)
		)
	)
	(wire
		(pts
			(xy 200.66 113.03) (xy 200.66 127)
		)
	)
	(wire
		(pts
			(xy 140.97 66.04) (xy 144.78 66.04)
		)
	)
	(wire
		(pts
			(xy 156.21 102.87) (xy 156.21 127)
		)
	)
	(wire
		(pts
			(xy 88.9 161.29) (xy 74.93 161.29)
		)
	)
	(wire
		(pts
			(xy 177.8 66.04) (xy 180.34 66.04)
		)
	)
	(wire
		(pts
			(xy 73.66 143.51) (xy 88.9 143.51)
		)
	)
	(wire
		(pts
			(xy 128.27 66.04) (xy 130.81 66.04)
		)
	)
	(wire
		(pts
			(xy 161.29 127) (xy 161.29 121.92)
		)
	)
	(wire
		(pts
			(xy 111.76 127) (xy 118.11 127)
		)
	)
	(wire
		(pts
			(xy 137.16 157.48) (xy 127 157.48)
		)
	)
	(wire
		(pts
			(xy 218.44 77.47) (xy 237.49 77.47)
		)
	)
	(wire
		(pts
			(xy 59.69 66.04) (xy 72.39 66.04)
		)
	)
	(wire
		(pts
			(xy 19.05 87.63) (xy 19.05 88.9)
		)
	)
	(wire
		(pts
			(xy 73.66 148.59) (xy 74.93 148.59)
		)
	)
	(wire
		(pts
			(xy 44.45 143.51) (xy 50.8 143.51)
		)
	)
	(wire
		(pts
			(xy 44.45 143.51) (xy 44.45 148.59)
		)
	)
	(wire
		(pts
			(xy 44.45 161.29) (xy 50.8 161.29)
		)
	)
	(wire
		(pts
			(xy 134.62 82.55) (xy 140.97 82.55)
		)
	)
	(wire
		(pts
			(xy 44.45 176.53) (xy 44.45 182.88)
		)
	)
	(wire
		(pts
			(xy 73.66 176.53) (xy 88.9 176.53)
		)
	)
	(wire
		(pts
			(xy 116.84 77.47) (xy 166.37 77.47)
		)
	)
	(wire
		(pts
			(xy 205.74 151.13) (xy 212.09 151.13)
		)
	)
	(wire
		(pts
			(xy 227.33 153.67) (xy 228.6 153.67)
		)
	)
	(wire
		(pts
			(xy 161.29 105.41) (xy 182.88 105.41)
		)
	)
	(wire
		(pts
			(xy 111.76 105.41) (xy 111.76 114.3)
		)
	)
	(wire
		(pts
			(xy 72.39 127) (xy 97.79 127)
		)
	)
	(wire
		(pts
			(xy 218.44 97.79) (xy 232.41 97.79)
		)
	)
	(wire
		(pts
			(xy 135.89 99.06) (xy 134.62 99.06)
		)
	)
	(wire
		(pts
			(xy 137.16 147.32) (xy 137.16 144.78)
		)
	)
	(wire
		(pts
			(xy 140.97 66.04) (xy 138.43 66.04)
		)
	)
	(wire
		(pts
			(xy 175.26 107.95) (xy 182.88 107.95)
		)
	)
	(wire
		(pts
			(xy 74.93 181.61) (xy 77.47 181.61)
		)
	)
	(wire
		(pts
			(xy 97.79 121.92) (xy 97.79 127)
		)
	)
	(wire
		(pts
			(xy 157.48 147.32) (xy 157.48 144.78)
		)
	)
	(wire
		(pts
			(xy 218.44 105.41) (xy 238.76 105.41)
		)
	)
	(wire
		(pts
			(xy 127 144.78) (xy 137.16 144.78)
		)
	)
	(wire
		(pts
			(xy 90.17 85.09) (xy 144.78 85.09)
		)
	)
	(wire
		(pts
			(xy 90.17 74.93) (xy 105.41 74.93)
		)
	)
	(wire
		(pts
			(xy 157.48 157.48) (xy 168.91 157.48)
		)
	)
	(wire
		(pts
			(xy 105.41 66.04) (xy 107.95 66.04)
		)
	)
	(wire
		(pts
			(xy 118.11 127) (xy 156.21 127)
		)
	)
	(wire
		(pts
			(xy 88.9 158.75) (xy 88.9 161.29)
		)
	)
	(wire
		(pts
			(xy 147.32 154.94) (xy 147.32 157.48)
		)
	)
	(wire
		(pts
			(xy 39.37 77.47) (xy 39.37 66.04)
		)
	)
	(wire
		(pts
			(xy 39.37 66.04) (xy 40.64 66.04)
		)
	)
	(wire
		(pts
			(xy 144.78 85.09) (xy 182.88 85.09)
		)
	)
	(wire
		(pts
			(xy 180.34 97.79) (xy 182.88 97.79)
		)
	)
	(wire
		(pts
			(xy 111.76 127) (xy 111.76 121.92)
		)
	)
	(wire
		(pts
			(xy 194.31 62.23) (xy 198.12 62.23)
		)
	)
	(wire
		(pts
			(xy 218.44 85.09) (xy 256.54 85.09)
		)
	)
	(wire
		(pts
			(xy 228.6 153.67) (xy 234.95 153.67)
		)
	)
	(wire
		(pts
			(xy 209.55 153.67) (xy 212.09 153.67)
		)
	)
	(wire
		(pts
			(xy 33.02 121.92) (xy 33.02 127)
		)
	)
	(wire
		(pts
			(xy 53.34 179.07) (xy 50.8 179.07)
		)
	)
	(wire
		(pts
			(xy 128.27 80.01) (xy 128.27 66.04)
		)
	)
	(wire
		(pts
			(xy 218.44 95.25) (xy 256.54 95.25)
		)
	)
	(wire
		(pts
			(xy 247.65 66.04) (xy 248.92 66.04)
		)
	)
	(wire
		(pts
			(xy 90.17 97.79) (xy 106.68 97.79)
		)
	)
	(wire
		(pts
			(xy 36.83 66.04) (xy 39.37 66.04)
		)
	)
	(wire
		(pts
			(xy 218.44 82.55) (xy 262.89 82.55)
		)
	)
	(wire
		(pts
			(xy 50.8 179.07) (xy 50.8 176.53)
		)
	)
	(wire
		(pts
			(xy 88.9 176.53) (xy 92.71 176.53)
		)
	)
	(wire
		(pts
			(xy 26.67 66.04) (xy 29.21 66.04)
		)
	)
	(wire
		(pts
			(xy 154.94 66.04) (xy 156.21 66.04)
		)
	)
	(wire
		(pts
			(xy 90.17 95.25) (xy 182.88 95.25)
		)
	)
	(wire
		(pts
			(xy 118.11 102.87) (xy 118.11 127)
		)
	)
	(wire
		(pts
			(xy 50.8 74.93) (xy 54.61 74.93)
		)
	)
	(wire
		(pts
			(xy 26.67 80.01) (xy 54.61 80.01)
		)
	)
	(wire
		(pts
			(xy 180.34 100.33) (xy 182.88 100.33)
		)
	)
	(wire
		(pts
			(xy 218.44 90.17) (xy 256.54 90.17)
		)
	)
	(wire
		(pts
			(xy 140.97 82.55) (xy 182.88 82.55)
		)
	)
	(wire
		(pts
			(xy 97.79 107.95) (xy 97.79 114.3)
		)
	)
	(wire
		(pts
			(xy 157.48 154.94) (xy 157.48 157.48)
		)
	)
	(wire
		(pts
			(xy 236.22 66.04) (xy 237.49 66.04)
		)
	)
	(wire
		(pts
			(xy 88.9 181.61) (xy 88.9 184.15)
		)
	)
	(wire
		(pts
			(xy 39.37 77.47) (xy 54.61 77.47)
		)
	)
	(wire
		(pts
			(xy 217.17 66.04) (xy 200.66 66.04)
		)
	)
	(wire
		(pts
			(xy 224.79 162.56) (xy 228.6 162.56)
		)
	)
	(wire
		(pts
			(xy 44.45 195.58) (xy 50.8 195.58)
		)
	)
	(wire
		(pts
			(xy 105.41 74.93) (xy 105.41 66.04)
		)
	)
	(wire
		(pts
			(xy 73.66 181.61) (xy 74.93 181.61)
		)
	)
	(wire
		(pts
			(xy 245.11 102.87) (xy 245.11 127)
		)
	)
	(wire
		(pts
			(xy 177.8 66.04) (xy 177.8 74.93)
		)
	)
	(wire
		(pts
			(xy 262.89 82.55) (xy 262.89 66.04)
		)
	)
	(wire
		(pts
			(xy 105.41 74.93) (xy 177.8 74.93)
		)
	)
	(wire
		(pts
			(xy 34.29 143.51) (xy 44.45 143.51)
		)
	)
	(wire
		(pts
			(xy 116.84 66.04) (xy 119.38 66.04)
		)
	)
	(wire
		(pts
			(xy 205.74 153.67) (xy 209.55 153.67)
		)
	)
	(wire
		(pts
			(xy 50.8 176.53) (xy 53.34 176.53)
		)
	)
	(wire
		(pts
			(xy 44.45 156.21) (xy 44.45 161.29)
		)
	)
	(wire
		(pts
			(xy 13.97 66.04) (xy 17.78 66.04)
		)
	)
	(wire
		(pts
			(xy 154.94 80.01) (xy 182.88 80.01)
		)
	)
	(wire
		(pts
			(xy 229.87 107.95) (xy 229.87 114.3)
		)
	)
	(wire
		(pts
			(xy 248.92 80.01) (xy 248.92 66.04)
		)
	)
	(wire
		(pts
			(xy 88.9 181.61) (xy 88.9 176.53)
		)
	)
	(wire
		(pts
			(xy 137.16 154.94) (xy 137.16 157.48)
		)
	)
	(wire
		(pts
			(xy 88.9 191.77) (xy 88.9 195.58)
		)
	)
	(wire
		(pts
			(xy 88.9 143.51) (xy 92.71 143.51)
		)
	)
	(wire
		(pts
			(xy 134.62 99.06) (xy 134.62 82.55)
		)
	)
	(wire
		(pts
			(xy 25.4 66.04) (xy 26.67 66.04)
		)
	)
	(wire
		(pts
			(xy 44.45 190.5) (xy 44.45 195.58)
		)
	)
	(wire
		(pts
			(xy 218.44 107.95) (xy 229.87 107.95)
		)
	)
	(wire
		(pts
			(xy 88.9 195.58) (xy 74.93 195.58)
		)
	)
	(wire
		(pts
			(xy 218.44 74.93) (xy 226.06 74.93)
		)
	)
	(wire
		(pts
			(xy 33.02 105.41) (xy 54.61 105.41)
		)
	)
	(wire
		(pts
			(xy 50.8 146.05) (xy 50.8 143.51)
		)
	)
	(wire
		(pts
			(xy 238.76 105.41) (xy 238.76 114.3)
		)
	)
	(wire
		(pts
			(xy 96.52 66.04) (xy 72.39 66.04)
		)
	)
	(wire
		(pts
			(xy 176.53 66.04) (xy 177.8 66.04)
		)
	)
	(wire
		(pts
			(xy 54.61 82.55) (xy 13.97 82.55)
		)
	)
	(wire
		(pts
			(xy 52.07 97.79) (xy 54.61 97.79)
		)
	)
	(wire
		(pts
			(xy 85.09 148.59) (xy 88.9 148.59)
		)
	)
	(wire
		(pts
			(xy 90.17 80.01) (xy 128.27 80.01)
		)
	)
	(wire
		(pts
			(xy 74.93 148.59) (xy 77.47 148.59)
		)
	)
	(wire
		(pts
			(xy 90.17 107.95) (xy 97.79 107.95)
		)
	)
	(wire
		(pts
			(xy 50.8 161.29) (xy 74.93 161.29)
		)
	)
	(wire
		(pts
			(xy 237.49 77.47) (xy 237.49 66.04)
		)
	)
	(wire
		(pts
			(xy 175.26 127) (xy 200.66 127)
		)
	)
	(wire
		(pts
			(xy 90.17 82.55) (xy 134.62 82.55)
		)
	)
	(wire
		(pts
			(xy 198.12 66.04) (xy 200.66 66.04)
		)
	)
	(wire
		(pts
			(xy 97.79 127) (xy 111.76 127)
		)
	)
	(wire
		(pts
			(xy 209.55 162.56) (xy 209.55 153.67)
		)
	)
	(wire
		(pts
			(xy 248.92 66.04) (xy 251.46 66.04)
		)
	)
	(wire
		(pts
			(xy 147.32 144.78) (xy 157.48 144.78)
		)
	)
	(wire
		(pts
			(xy 144.78 85.09) (xy 144.78 99.06)
		)
	)
	(wire
		(pts
			(xy 34.29 176.53) (xy 44.45 176.53)
		)
	)
	(wire
		(pts
			(xy 166.37 77.47) (xy 166.37 66.04)
		)
	)
	(wire
		(pts
			(xy 218.44 87.63) (xy 256.54 87.63)
		)
	)
	(wire
		(pts
			(xy 238.76 127) (xy 238.76 121.92)
		)
	)
	(wire
		(pts
			(xy 143.51 99.06) (xy 144.78 99.06)
		)
	)
	(wire
		(pts
			(xy 35.56 95.25) (xy 54.61 95.25)
		)
	)
	(wire
		(pts
			(xy 19.05 96.52) (xy 19.05 100.33)
		)
	)
	(wire
		(pts
			(xy 140.97 82.55) (xy 140.97 66.04)
		)
	)
	(wire
		(pts
			(xy 41.91 107.95) (xy 41.91 114.3)
		)
	)
	(wire
		(pts
			(xy 161.29 105.41) (xy 161.29 114.3)
		)
	)
	(wire
		(pts
			(xy 226.06 66.04) (xy 228.6 66.04)
		)
	)
	(wire
		(pts
			(xy 72.39 66.04) (xy 72.39 69.85)
		)
	)
	(wire
		(pts
			(xy 74.93 161.29) (xy 74.93 158.75)
		)
	)
	(wire
		(pts
			(xy 50.8 181.61) (xy 50.8 195.58)
		)
	)
	(wire
		(pts
			(xy 33.02 127) (xy 41.91 127)
		)
	)
	(wire
		(pts
			(xy 229.87 121.92) (xy 229.87 127)
		)
	)
	(wire
		(pts
			(xy 116.84 77.47) (xy 116.84 66.04)
		)
	)
	(wire
		(pts
			(xy 50.8 195.58) (xy 74.93 195.58)
		)
	)
	(wire
		(pts
			(xy 27.94 102.87) (xy 27.94 127)
		)
	)
	(wire
		(pts
			(xy 53.34 146.05) (xy 50.8 146.05)
		)
	)
	(wire
		(pts
			(xy 90.17 105.41) (xy 111.76 105.41)
		)
	)
	(wire
		(pts
			(xy 154.94 80.01) (xy 154.94 66.04)
		)
	)
	(wire
		(pts
			(xy 41.91 92.71) (xy 54.61 92.71)
		)
	)
	(wire
		(pts
			(xy 217.17 162.56) (xy 209.55 162.56)
		)
	)
	(wire
		(pts
			(xy 74.93 148.59) (xy 74.93 151.13)
		)
	)
	(wire
		(pts
			(xy 90.17 87.63) (xy 182.88 87.63)
		)
	)
	(wire
		(pts
			(xy 168.91 154.94) (xy 168.91 157.48)
		)
	)
	(wire
		(pts
			(xy 104.14 66.04) (xy 105.41 66.04)
		)
	)
	(wire
		(pts
			(xy 137.16 144.78) (xy 147.32 144.78)
		)
	)
	(wire
		(pts
			(xy 128.27 80.01) (xy 154.94 80.01)
		)
	)
	(wire
		(pts
			(xy 168.91 147.32) (xy 168.91 144.78)
		)
	)
	(wire
		(pts
			(xy 218.44 92.71) (xy 232.41 92.71)
		)
	)
	(wire
		(pts
			(xy 50.8 66.04) (xy 50.8 74.93)
		)
	)
	(wire
		(pts
			(xy 35.56 85.09) (xy 54.61 85.09)
		)
	)
	(wire
		(pts
			(xy 245.11 127) (xy 248.92 127)
		)
	)
	(wire
		(pts
			(xy 44.45 176.53) (xy 50.8 176.53)
		)
	)
	(wire
		(pts
			(xy 227.33 151.13) (xy 234.95 151.13)
		)
	)
	(wire
		(pts
			(xy 200.66 127) (xy 229.87 127)
		)
	)
	(wire
		(pts
			(xy 198.12 62.23) (xy 198.12 66.04)
		)
	)
	(wire
		(pts
			(xy 161.29 127) (xy 175.26 127)
		)
	)
	(wire
		(pts
			(xy 177.8 74.93) (xy 182.88 74.93)
		)
	)
	(wire
		(pts
			(xy 90.17 92.71) (xy 182.88 92.71)
		)
	)
	(wire
		(pts
			(xy 166.37 77.47) (xy 182.88 77.47)
		)
	)
	(wire
		(pts
			(xy 157.48 144.78) (xy 168.91 144.78)
		)
	)
	(wire
		(pts
			(xy 147.32 147.32) (xy 147.32 144.78)
		)
	)
	(wire
		(pts
			(xy 97.79 107.95) (xy 175.26 107.95)
		)
	)
	(wire
		(pts
			(xy 115.57 66.04) (xy 116.84 66.04)
		)
	)
	(wire
		(pts
			(xy 228.6 162.56) (xy 228.6 153.67)
		)
	)
	(wire
		(pts
			(xy 166.37 66.04) (xy 168.91 66.04)
		)
	)
	(wire
		(pts
			(xy 127 154.94) (xy 127 157.48)
		)
	)
	(wire
		(pts
			(xy 85.09 181.61) (xy 88.9 181.61)
		)
	)
	(wire
		(pts
			(xy 237.49 66.04) (xy 240.03 66.04)
		)
	)
	(wire
		(pts
			(xy 88.9 148.59) (xy 88.9 143.51)
		)
	)
	(wire
		(pts
			(xy 229.87 127) (xy 238.76 127)
		)
	)
	(wire
		(pts
			(xy 245.11 127) (xy 238.76 127)
		)
	)
	(wire
		(pts
			(xy 72.39 113.03) (xy 72.39 127)
		)
	)
	(wire
		(pts
			(xy 187.96 66.04) (xy 198.12 66.04)
		)
	)
	(wire
		(pts
			(xy 88.9 148.59) (xy 88.9 151.13)
		)
	)
	(wire
		(pts
			(xy 226.06 74.93) (xy 226.06 66.04)
		)
	)
	(wire
		(pts
			(xy 50.8 66.04) (xy 52.07 66.04)
		)
	)
	(wire
		(pts
			(xy 163.83 66.04) (xy 166.37 66.04)
		)
	)
	(wire
		(pts
			(xy 41.91 121.92) (xy 41.91 127)
		)
	)
	(wire
		(pts
			(xy 157.48 157.48) (xy 147.32 157.48)
		)
	)
	(wire
		(pts
			(xy 127 147.32) (xy 127 144.78)
		)
	)
	(wire
		(pts
			(xy 19.05 87.63) (xy 54.61 87.63)
		)
	)
	(wire
		(pts
			(xy 200.66 66.04) (xy 200.66 69.85)
		)
	)
	(text "Reference Voltage Regulators"
		(exclude_from_sim no)
		(at 50.8 137.16 0)
	)
	(text "BOTTOM Voltage Domain\nThese LDOs get full 5V"
		(exclude_from_sim no)
		(at 19.05 168.91 0)
	)
	(text "25MHz ASIC clock oscillator"
		(exclude_from_sim no)
		(at 207.01 144.78 0)
	)
	(label "GND"
		(at 154.94 157.48 180)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 257.81 82.55 0)
		(fields_autoplaced yes)
	)
	(label "0V8"
		(at 41.91 105.41 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 19.05 100.33 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 204.47 127 0)
		(fields_autoplaced yes)
	)
	(label "RO1"
		(at 41.91 90.17 0)
		(fields_autoplaced yes)
	)
	(label "VDD1"
		(at 149.86 144.78 0)
		(fields_autoplaced yes)
	)
	(label "BI1"
		(at 41.91 87.63 0)
		(fields_autoplaced yes)
	)
	(label "VDD1"
		(at 203.2 66.04 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 59.69 195.58 0)
		(fields_autoplaced yes)
	)
	(label "1V8"
		(at 205.74 151.13 0)
		(fields_autoplaced yes)
	)
	(label "CLKI1"
		(at 41.91 92.71 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 59.69 161.29 0)
		(fields_autoplaced yes)
	)
	(label "VDD1"
		(at 74.93 66.04 0)
		(fields_autoplaced yes)
	)
	(label "5V"
		(at 35.56 143.51 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 16.51 82.55 0)
		(fields_autoplaced yes)
	)
	(label "5V"
		(at 35.56 176.53 0)
		(fields_autoplaced yes)
	)
	(label "0V8"
		(at 175.26 105.41 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 97.79 82.55 0)
		(fields_autoplaced yes)
	)
	(label "0V8"
		(at 223.52 105.41 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 104.14 102.87 0)
		(fields_autoplaced yes)
	)
	(label "1V8"
		(at 91.44 107.95 0)
		(fields_autoplaced yes)
	)
	(label "1V8"
		(at 231.14 153.67 0)
		(fields_autoplaced yes)
	)
	(label "CI1"
		(at 41.91 95.25 0)
		(fields_autoplaced yes)
	)
	(label "0V8"
		(at 91.44 105.41 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 205.74 153.67 0)
		(fields_autoplaced yes)
	)
	(label "CLKI1"
		(at 229.87 151.13 0)
		(fields_autoplaced yes)
	)
	(label "1V8"
		(at 82.55 176.53 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 168.91 82.55 0)
		(fields_autoplaced yes)
	)
	(label "1V8"
		(at 41.91 107.95 0)
		(fields_autoplaced yes)
	)
	(label "1V8"
		(at 175.26 107.95 0)
		(fields_autoplaced yes)
	)
	(label "GND"
		(at 76.2 127 0)
		(fields_autoplaced yes)
	)
	(label "0V8"
		(at 82.55 143.51 0)
		(fields_autoplaced yes)
	)
	(label "1V8"
		(at 223.52 107.95 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "NRSTI"
		(shape input)
		(at 35.56 85.09 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "CI"
		(shape input)
		(at 35.56 95.25 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "RI"
		(shape input)
		(at 256.54 90.17 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "5V"
		(shape input)
		(at 34.29 176.53 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "NRSTO"
		(shape output)
		(at 256.54 85.09 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "CO"
		(shape output)
		(at 256.54 95.25 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "GND1"
		(shape output)
		(at 248.92 127 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "5V"
		(shape input)
		(at 34.29 143.51 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "VDD1"
		(shape input)
		(at 194.31 62.23 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "BO"
		(shape output)
		(at 256.54 87.63 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "RO"
		(shape output)
		(at 35.56 90.17 180)
		(fields_autoplaced yes)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 92.71 143.51 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 99.06 143.51 90)
		)
		(property "Value" "TestPoint"
			(at 98.425 142.2401 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 92.71 138.43 0)
		)
		(property "Datasheet" "~"
			(at 92.71 138.43 0)
		)
		(property "Description" ""
			(at 92.71 143.51 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP35")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 21.59 66.04 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C2"
			(at 19.05 63.5 90)
		)
		(property "Value" "1uF"
			(at 20.32 66.675 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 21.59 66.04 0)
		)
		(property "Datasheet" ""
			(at 21.59 66.04 0)
		)
		(property "Description" ""
			(at 21.59 66.04 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 21.59 66.04 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 21.59 66.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C2")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C45")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 172.72 66.04 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6"
			(at 170.18 63.5 90)
		)
		(property "Value" "1uF"
			(at 171.45 66.675 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 172.72 66.04 0)
		)
		(property "Datasheet" ""
			(at 172.72 66.04 0)
		)
		(property "Description" ""
			(at 172.72 66.04 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 172.72 66.04 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 172.72 66.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C69")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 184.15 66.04 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 181.61 63.5 90)
		)
		(property "Value" "1uF"
			(at 182.88 66.675 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 184.15 66.04 0)
		)
		(property "Datasheet" ""
			(at 184.15 66.04 0)
		)
		(property "Description" ""
			(at 184.15 66.04 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 184.15 66.04 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 184.15 66.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C71")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 137.16 151.13 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 135.255 147.955 0)
		)
		(property "Value" "0.1uF"
			(at 135.89 153.67 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 137.16 151.13 0)
		)
		(property "Datasheet" ""
			(at 137.16 151.13 0)
		)
		(property "Description" ""
			(at 137.16 151.13 0)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 137.16 151.13 0)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 137.16 151.13 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C62")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "BM1366_mode1_1")
		(lib_id "bitaxe:BM1366_mode1")
		(at 72.39 92.71 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U14"
			(at 57.15 71.12 0)
		)
		(property "Value" "BM1366_mode1"
			(at 74.93 71.12 0)
		)
		(property "Footprint" "bitaxe:BM1366"
			(at 64.77 92.71 0)
		)
		(property "Datasheet" ""
			(at 64.77 92.71 0)
		)
		(property "Description" ""
			(at 72.39 92.71 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "17")
		(pin "18")
		(pin "19")
		(pin "2")
		(pin "20")
		(pin "21")
		(pin "22")
		(pin "23")
		(pin "24")
		(pin "25")
		(pin "26")
		(pin "27")
		(pin "28")
		(pin "29")
		(pin "3")
		(pin "30")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "bm1366"
				(path
					(reference "U14")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "U12")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 55.88 66.04 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 53.34 63.5 90)
		)
		(property "Value" "1uF"
			(at 54.61 66.675 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 55.88 66.04 0)
		)
		(property "Datasheet" ""
			(at 55.88 66.04 0)
		)
		(property "Description" ""
			(at 55.88 66.04 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 55.88 66.04 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 55.88 66.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C52")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 111.76 66.04 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C15"
			(at 109.22 63.5 90)
		)
		(property "Value" "1uF"
			(at 110.49 66.675 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 111.76 66.04 0)
		)
		(property "Datasheet" ""
			(at 111.76 66.04 0)
		)
		(property "Description" ""
			(at 111.76 66.04 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 111.76 66.04 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 111.76 66.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C15")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C57")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 139.7 99.06 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 139.7 96.52 90)
		)
		(property "Value" "2k"
			(at 139.7 101.6 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 139.954 98.044 90)
		)
		(property "Datasheet" "~"
			(at 139.7 99.06 0)
		)
		(property "Description" ""
			(at 139.7 99.06 0)
		)
		(property "DK" "YAG2303CT-ND"
			(at 139.7 99.06 90)
		)
		(property "PARTNO" "RT0402BRD072KL"
			(at 139.7 99.06 90)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R33")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 243.84 66.04 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C17"
			(at 241.3 63.5 90)
		)
		(property "Value" "1uF"
			(at 242.57 66.675 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 243.84 66.04 0)
		)
		(property "Datasheet" ""
			(at 243.84 66.04 0)
		)
		(property "Description" ""
			(at 243.84 66.04 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 243.84 66.04 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 243.84 66.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C17")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C77")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 33.02 66.04 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C3"
			(at 30.48 63.5 90)
		)
		(property "Value" "1uF"
			(at 31.75 66.675 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 33.02 66.04 0)
		)
		(property "Datasheet" ""
			(at 33.02 66.04 0)
		)
		(property "Description" ""
			(at 33.02 66.04 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 33.02 66.04 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 33.02 66.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C3")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C46")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 106.68 97.79 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 113.03 97.79 90)
		)
		(property "Value" "TestPoint"
			(at 112.395 96.5201 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 106.68 92.71 0)
		)
		(property "Datasheet" "~"
			(at 106.68 92.71 0)
		)
		(property "Description" ""
			(at 106.68 97.79 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP37")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 134.62 66.04 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C18"
			(at 132.08 63.5 90)
		)
		(property "Value" "1uF"
			(at 133.35 66.675 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 134.62 66.04 0)
		)
		(property "Datasheet" ""
			(at 134.62 66.04 0)
		)
		(property "Description" ""
			(at 134.62 66.04 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 134.62 66.04 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 134.62 66.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C18")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C61")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 97.79 118.11 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C14"
			(at 98.425 116.205 0)
		)
		(property "Value" "1uF"
			(at 98.425 121.92 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 97.79 118.11 0)
		)
		(property "Datasheet" ""
			(at 97.79 118.11 0)
		)
		(property "Description" ""
			(at 97.79 118.11 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 97.79 118.11 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 97.79 118.11 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C14")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C55")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 41.91 118.11 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5"
			(at 43.18 116.205 0)
		)
		(property "Value" "1uF"
			(at 43.18 121.92 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 41.91 118.11 0)
		)
		(property "Datasheet" ""
			(at 41.91 118.11 0)
		)
		(property "Description" ""
			(at 41.91 118.11 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 41.91 118.11 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 41.91 118.11 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C5")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C48")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 229.87 118.11 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C14"
			(at 230.505 116.205 0)
		)
		(property "Value" "1uF"
			(at 230.505 121.92 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 229.87 118.11 0)
		)
		(property "Datasheet" ""
			(at 229.87 118.11 0)
		)
		(property "Description" ""
			(at 229.87 118.11 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 229.87 118.11 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 229.87 118.11 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C14")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C74")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 52.07 100.33 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 45.72 100.33 90)
		)
		(property "Value" "TestPoint"
			(at 46.355 101.5999 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 52.07 105.41 0)
		)
		(property "Datasheet" "~"
			(at 52.07 105.41 0)
		)
		(property "Description" ""
			(at 52.07 100.33 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP34")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:AP7331")
		(at 63.5 177.8 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U11"
			(at 63.5 172.72 0)
		)
		(property "Value" "AP7331"
			(at 63.5 185.42 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:TSOT-23-5"
			(at 63.5 167.64 0)
		)
		(property "Datasheet" "https://www.digikey.com/en/products/detail/diodes-incorporated/AP7331-WG-7/2270813"
			(at 63.5 170.18 0)
		)
		(property "Description" ""
			(at 63.5 177.8 0)
		)
		(property "DK" "AP7331-WG-7DICT-ND"
			(at 63.5 177.8 0)
		)
		(property "PARTNO" "AP7331-WG-7"
			(at 63.5 177.8 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(instances
			(project "bitaxeHex"
				(path
					(reference "U11")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:oscillator")
		(at 219.71 152.4 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U1"
			(at 215.9 147.32 0)
		)
		(property "Value" "25MHz"
			(at 221.615 157.48 0)
		)
		(property "Footprint" "bitaxe:O 25,0-JO32-B-1V3-1-T1-LF"
			(at 218.44 153.67 0)
		)
		(property "Datasheet" "https://www.jauch.com/downloadfile/5ef1edcfb8e2f73163c8ce8009ef659d1/jo32-1.8-3.3v.pdf"
			(at 218.44 153.67 0)
		)
		(property "Description" ""
			(at 219.71 152.4 0)
		)
		(property "DK" "1908-O250-JO32-B-1V3-1-T1-LFCT-ND"
			(at 219.71 152.4 0)
		)
		(property "PARTNO" "O 25,0-JO32-B-1V3-1-T1-LF"
			(at 219.71 152.4 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(instances
			(project "bm1366"
				(path
					(reference "U1")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "U14")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 52.07 97.79 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 45.72 97.79 90)
		)
		(property "Value" "TestPoint"
			(at 46.355 99.0599 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 52.07 102.87 0)
		)
		(property "Datasheet" "~"
			(at 52.07 102.87 0)
		)
		(property "Description" ""
			(at 52.07 97.79 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP33")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 180.34 100.33 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 173.99 100.33 90)
		)
		(property "Value" "TestPoint"
			(at 174.625 101.5999 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 180.34 105.41 0)
		)
		(property "Datasheet" "~"
			(at 180.34 105.41 0)
		)
		(property "Description" ""
			(at 180.34 100.33 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP39")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 238.76 118.11 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C16"
			(at 239.395 116.205 0)
		)
		(property "Value" "1uF"
			(at 240.03 121.92 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 238.76 118.11 0)
		)
		(property "Datasheet" ""
			(at 238.76 118.11 0)
		)
		(property "Description" ""
			(at 238.76 118.11 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 238.76 118.11 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 238.76 118.11 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C16")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C76")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:BM1366_mode1")
		(at 200.66 92.71 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U14"
			(at 185.42 71.12 0)
		)
		(property "Value" "BM1366_mode1"
			(at 203.2 71.12 0)
		)
		(property "Footprint" "bitaxe:BM1366"
			(at 193.04 92.71 0)
		)
		(property "Datasheet" ""
			(at 193.04 92.71 0)
		)
		(property "Description" ""
			(at 200.66 92.71 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "17")
		(pin "18")
		(pin "19")
		(pin "2")
		(pin "20")
		(pin "21")
		(pin "22")
		(pin "23")
		(pin "24")
		(pin "25")
		(pin "26")
		(pin "27")
		(pin "28")
		(pin "29")
		(pin "3")
		(pin "30")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "bm1366"
				(path
					(reference "U14")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "U13")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 123.19 66.04 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C17"
			(at 120.65 63.5 90)
		)
		(property "Value" "1uF"
			(at 121.92 66.675 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 123.19 66.04 0)
		)
		(property "Datasheet" ""
			(at 123.19 66.04 0)
		)
		(property "Description" ""
			(at 123.19 66.04 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 123.19 66.04 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 123.19 66.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C17")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C59")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 220.98 162.56 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 213.995 165.735 90)
		)
		(property "Value" "0.1uF"
			(at 222.885 165.735 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 220.98 162.56 0)
		)
		(property "Datasheet" ""
			(at 220.98 162.56 0)
		)
		(property "Description" ""
			(at 220.98 162.56 0)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 220.98 162.56 0)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 220.98 162.56 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C73")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 81.28 181.61 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 81.28 179.07 90)
		)
		(property "Value" "402K"
			(at 81.28 184.15 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 81.026 182.626 90)
		)
		(property "Datasheet" "~"
			(at 81.28 181.61 0)
		)
		(property "Description" ""
			(at 81.28 181.61 0)
		)
		(property "DK" "YAG3151CT-ND"
			(at 81.28 181.61 0)
		)
		(property "PARTNO" "RC0402FR-07402KL"
			(at 81.28 181.61 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R32")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 175.26 118.11 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5"
			(at 176.53 116.205 0)
		)
		(property "Value" "1uF"
			(at 176.53 121.92 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 175.26 118.11 0)
		)
		(property "Datasheet" ""
			(at 175.26 118.11 0)
		)
		(property "Description" ""
			(at 175.26 118.11 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 175.26 118.11 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 175.26 118.11 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C5")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C70")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 44.45 186.69 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 42.545 183.515 0)
		)
		(property "Value" "0.1uF"
			(at 43.18 189.23 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 44.45 186.69 0)
		)
		(property "Datasheet" ""
			(at 44.45 186.69 0)
		)
		(property "Description" ""
			(at 44.45 186.69 0)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 44.45 186.69 0)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 44.45 186.69 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C51")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 160.02 66.04 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C3"
			(at 157.48 63.5 90)
		)
		(property "Value" "1uF"
			(at 158.75 66.675 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 160.02 66.04 0)
		)
		(property "Datasheet" ""
			(at 160.02 66.04 0)
		)
		(property "Description" ""
			(at 160.02 66.04 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 160.02 66.04 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 160.02 66.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C3")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C66")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 232.41 92.71 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 238.76 92.71 90)
		)
		(property "Value" "TestPoint"
			(at 238.125 91.4401 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 232.41 87.63 0)
		)
		(property "Datasheet" "~"
			(at 232.41 87.63 0)
		)
		(property "Description" ""
			(at 232.41 92.71 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP40")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 180.34 97.79 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 173.99 97.79 90)
		)
		(property "Value" "TestPoint"
			(at 174.625 99.0599 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 180.34 102.87 0)
		)
		(property "Datasheet" "~"
			(at 180.34 102.87 0)
		)
		(property "Description" ""
			(at 180.34 97.79 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP38")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 232.41 66.04 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C15"
			(at 229.87 63.5 90)
		)
		(property "Value" "1uF"
			(at 231.14 66.675 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 232.41 66.04 0)
		)
		(property "Datasheet" ""
			(at 232.41 66.04 0)
		)
		(property "Description" ""
			(at 232.41 66.04 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 232.41 66.04 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 232.41 66.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C15")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C75")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 147.32 151.13 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C10"
			(at 148.59 149.225 0)
		)
		(property "Value" "1uF"
			(at 148.59 154.305 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 147.32 151.13 0)
		)
		(property "Datasheet" ""
			(at 147.32 151.13 0)
		)
		(property "Description" ""
			(at 147.32 151.13 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 147.32 151.13 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 147.32 151.13 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C10")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C63")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 100.33 66.04 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C12"
			(at 97.155 63.5 90)
		)
		(property "Value" "1uF"
			(at 99.06 66.675 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 100.33 66.04 0)
		)
		(property "Datasheet" ""
			(at 100.33 66.04 0)
		)
		(property "Description" ""
			(at 100.33 66.04 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 100.33 66.04 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 100.33 66.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C12")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C56")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 157.48 151.13 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C11"
			(at 158.75 149.225 0)
		)
		(property "Value" "1uF"
			(at 158.75 154.305 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 157.48 151.13 0)
		)
		(property "Datasheet" ""
			(at 157.48 151.13 0)
		)
		(property "Description" ""
			(at 157.48 151.13 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 157.48 151.13 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 157.48 151.13 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C11")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C65")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Polarized")
		(at 168.91 151.13 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C13"
			(at 172.085 148.9709 0)
		)
		(property "Value" "330uF"
			(at 172.085 151.5109 0)
		)
		(property "Footprint" "Capacitor_Tantalum_SMD:CP_EIA-7343-31_Kemet-D_Pad2.25x2.55mm_HandSolder"
			(at 169.8752 154.94 0)
		)
		(property "Datasheet" "~"
			(at 168.91 151.13 0)
		)
		(property "Description" ""
			(at 168.91 151.13 0)
		)
		(property "DK" "718-1028-1-ND"
			(at 168.91 151.13 0)
		)
		(property "PARTNO" "293D337X9010E2TE3"
			(at 168.91 151.13 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C68")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 220.98 66.04 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C12"
			(at 217.805 63.5 90)
		)
		(property "Value" "1uF"
			(at 219.71 66.675 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 220.98 66.04 0)
		)
		(property "Datasheet" ""
			(at 220.98 66.04 0)
		)
		(property "Description" ""
			(at 220.98 66.04 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 220.98 66.04 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 220.98 66.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C12")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C72")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 161.29 118.11 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C4"
			(at 162.56 116.205 0)
		)
		(property "Value" "1uF"
			(at 162.56 121.92 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 161.29 118.11 0)
		)
		(property "Datasheet" ""
			(at 161.29 118.11 0)
		)
		(property "Description" ""
			(at 161.29 118.11 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 161.29 118.11 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 161.29 118.11 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C4")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C67")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 148.59 66.04 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C2"
			(at 146.05 63.5 90)
		)
		(property "Value" "1uF"
			(at 147.32 66.675 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 148.59 66.04 0)
		)
		(property "Datasheet" ""
			(at 148.59 66.04 0)
		)
		(property "Description" ""
			(at 148.59 66.04 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 148.59 66.04 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 148.59 66.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C2")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C64")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 74.93 189.23 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R30"
			(at 68.58 187.96 0)
		)
		(property "Value" "115k"
			(at 68.58 190.5 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 73.914 188.976 90)
		)
		(property "Datasheet" "~"
			(at 74.93 189.23 0)
		)
		(property "Description" ""
			(at 74.93 189.23 0)
		)
		(property "DK" "YAG2956CT-ND"
			(at 74.93 189.23 0)
		)
		(property "PARTNO" "RC0402FR-07115KL"
			(at 74.93 189.23 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R30")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:AP7331")
		(at 63.5 144.78 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U10"
			(at 63.5 139.7 0)
		)
		(property "Value" "AP7331"
			(at 63.5 152.4 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:TSOT-23-5"
			(at 63.5 134.62 0)
		)
		(property "Datasheet" "https://www.digikey.com/en/products/detail/diodes-incorporated/AP7331-WG-7/2270813"
			(at 63.5 137.16 0)
		)
		(property "Description" ""
			(at 63.5 144.78 0)
		)
		(property "DK" "AP7331-WG-7DICT-ND"
			(at 63.5 144.78 0)
		)
		(property "PARTNO" "AP7331-WG-7"
			(at 63.5 144.78 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(instances
			(project "bitaxeHex"
				(path
					(reference "U10")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 127 151.13 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 125.095 147.955 0)
		)
		(property "Value" "0.1uF"
			(at 125.73 153.67 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 127 151.13 0)
		)
		(property "Datasheet" ""
			(at 127 151.13 0)
		)
		(property "Description" ""
			(at 127 151.13 0)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 127 151.13 0)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 127 151.13 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C60")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 111.76 118.11 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C16"
			(at 112.395 116.205 0)
		)
		(property "Value" "1uF"
			(at 113.03 121.92 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 111.76 118.11 0)
		)
		(property "Datasheet" ""
			(at 111.76 118.11 0)
		)
		(property "Description" ""
			(at 111.76 118.11 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 111.76 118.11 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 111.76 118.11 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C16")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C58")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 88.9 154.94 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C24"
			(at 90.17 153.035 0)
		)
		(property "Value" "1uF"
			(at 90.805 158.75 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 88.9 154.94 0)
		)
		(property "Datasheet" ""
			(at 88.9 154.94 0)
		)
		(property "Description" ""
			(at 88.9 154.94 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 88.9 154.94 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 88.9 154.94 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C24")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C53")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 33.02 118.11 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C4"
			(at 34.29 116.205 0)
		)
		(property "Value" "1uF"
			(at 34.29 121.92 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 33.02 118.11 0)
		)
		(property "Datasheet" ""
			(at 33.02 118.11 0)
		)
		(property "Description" ""
			(at 33.02 118.11 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 33.02 118.11 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 33.02 118.11 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C4")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C47")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 88.9 187.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C24"
			(at 90.17 186.055 0)
		)
		(property "Value" "1uF"
			(at 90.805 191.77 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 88.9 187.96 0)
		)
		(property "Datasheet" ""
			(at 88.9 187.96 0)
		)
		(property "Description" ""
			(at 88.9 187.96 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 88.9 187.96 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 88.9 187.96 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C24")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C54")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 255.27 66.04 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C18"
			(at 252.73 63.5 90)
		)
		(property "Value" "1uF"
			(at 254 66.675 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 255.27 66.04 0)
		)
		(property "Datasheet" ""
			(at 255.27 66.04 0)
		)
		(property "Description" ""
			(at 255.27 66.04 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 255.27 66.04 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 255.27 66.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C18")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C78")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 232.41 97.79 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 238.76 97.79 90)
		)
		(property "Value" "TestPoint"
			(at 238.125 96.5201 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 232.41 92.71 0)
		)
		(property "Datasheet" "~"
			(at 232.41 92.71 0)
		)
		(property "Description" ""
			(at 232.41 97.79 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP41")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 81.28 148.59 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R31"
			(at 81.28 146.05 90)
		)
		(property "Value" "115k"
			(at 81.28 151.13 90)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 81.534 147.574 90)
		)
		(property "Datasheet" "~"
			(at 81.28 148.59 0)
		)
		(property "Description" ""
			(at 81.28 148.59 0)
		)
		(property "DK" "YAG2956CT-ND"
			(at 81.28 148.59 0)
		)
		(property "PARTNO" "RC0402FR-07115KL"
			(at 81.28 148.59 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R31")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 19.05 92.71 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 15.24 91.44 0)
		)
		(property "Value" "10k"
			(at 15.24 93.98 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 18.034 92.456 90)
		)
		(property "Datasheet" "~"
			(at 19.05 92.71 0)
		)
		(property "Description" ""
			(at 19.05 92.71 0)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 19.05 92.71 0)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 19.05 92.71 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1397"
				(path
					(reference "R6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "R28")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 44.45 66.04 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6"
			(at 41.91 63.5 90)
		)
		(property "Value" "1uF"
			(at 43.18 66.675 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 44.45 66.04 0)
		)
		(property "Datasheet" ""
			(at 44.45 66.04 0)
		)
		(property "Description" ""
			(at 44.45 66.04 0)
		)
		(property "DK" "587-5514-1-ND"
			(at 44.45 66.04 0)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 44.45 66.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C6")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C49")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 74.93 154.94 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R29"
			(at 68.58 153.67 0)
		)
		(property "Value" "115k"
			(at 68.58 156.21 0)
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 73.914 154.686 90)
		)
		(property "Datasheet" "~"
			(at 74.93 154.94 0)
		)
		(property "Description" ""
			(at 74.93 154.94 0)
		)
		(property "DK" "YAG2956CT-ND"
			(at 74.93 154.94 0)
		)
		(property "PARTNO" "RC0402FR-07115KL"
			(at 74.93 154.94 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bitaxeHex"
				(path
					(reference "R29")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 44.45 152.4 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 42.545 149.225 0)
		)
		(property "Value" "0.1uF"
			(at 43.18 154.94 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 44.45 152.4 0)
		)
		(property "Datasheet" ""
			(at 44.45 152.4 0)
		)
		(property "Description" ""
			(at 44.45 152.4 0)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 44.45 152.4 0)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 44.45 152.4 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "bm1366"
				(path
					(reference "C8")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "C50")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 92.71 176.53 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP13"
			(at 99.06 176.53 90)
		)
		(property "Value" "TestPoint"
			(at 98.425 175.2601 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 92.71 171.45 0)
		)
		(property "Datasheet" "~"
			(at 92.71 171.45 0)
		)
		(property "Description" ""
			(at 92.71 176.53 0)
		)
		(pin "1")
		(instances
			(project "bm1366"
				(path
					(reference "TP13")
					(unit 1)
				)
			)
			(project "bitaxeHex"
				(path
					(reference "TP36")
					(unit 1)
				)
			)
		)
	)
)