(kicad_pcb
	(version 20240108)
	(generator "pcbnew")
	(generator_version "8.0")
	(general
		(thickness 1.6)
		(legacy_teardrops no)
	)
	(paper "A4")
	(title_block
		(rev "302")
	)
	(layers
		(0 "F.Cu" signal)
		(1 "In1.Cu" signal)
		(2 "In2.Cu" signal)
		(31 "B.Cu" signal)
		(32 "B.Adhes" user "B.Adhesive")
		(33 "F.Adhes" user "F.Adhesive")
		(34 "B.Paste" user)
		(35 "F.Paste" user)
		(36 "B.SilkS" user "B.Silkscreen")
		(37 "F.SilkS" user "F.Silkscreen")
		(38 "B.Mask" user)
		(39 "F.Mask" user)
		(40 "Dwgs.User" user "User.Drawings")
		(41 "Cmts.User" user "User.Comments")
		(42 "Eco1.User" user "User.Eco1")
		(43 "Eco2.User" user "User.Eco2")
		(44 "Edge.Cuts" user)
		(45 "Margin" user)
		(46 "B.CrtYd" user "B.Courtyard")
		(47 "F.CrtYd" user "F.Courtyard")
		(48 "B.Fab" user)
		(49 "F.Fab" user)
		(50 "User.1" user)
		(51 "User.2" user)
		(52 "User.3" user)
		(53 "User.4" user)
		(54 "User.5" user)
		(55 "User.6" user)
		(56 "User.7" user)
		(57 "User.8" user)
		(58 "User.9" user)
	)
	(setup
		(stackup
			(layer "F.SilkS"
				(type "Top Silk Screen")
			)
			(layer "F.Paste"
				(type "Top Solder Paste")
			)
			(layer "F.Mask"
				(type "Top Solder Mask")
				(thickness 0.01)
			)
			(layer "F.Cu"
				(type "copper")
				(thickness 0.02)
			)
			(layer "dielectric 1"
				(type "core")
				(thickness 0.5)
				(material "FR4")
				(epsilon_r 4.5)
				(loss_tangent 0.02)
			)
			(layer "In1.Cu"
				(type "copper")
				(thickness 0.02)
			)
			(layer "dielectric 2"
				(type "prepreg")
				(thickness 0.5)
				(material "FR4")
				(epsilon_r 4.5)
				(loss_tangent 0.02)
			)
			(layer "In2.Cu"
				(type "copper")
				(thickness 0.02)
			)
			(layer "dielectric 3"
				(type "core")
				(thickness 0.5)
				(material "FR4")
				(epsilon_r 4.5)
				(loss_tangent 0.02)
			)
			(layer "B.Cu"
				(type "copper")
				(thickness 0.02)
			)
			(layer "B.Mask"
				(type "Bottom Solder Mask")
				(thickness 0.01)
			)
			(layer "B.Paste"
				(type "Bottom Solder Paste")
			)
			(layer "B.SilkS"
				(type "Bottom Silk Screen")
			)
			(copper_finish "None")
			(dielectric_constraints no)
		)
		(pad_to_mask_clearance 0)
		(allow_soldermask_bridges_in_footprints no)
		(aux_axis_origin 49.95 175.55)
		(pcbplotparams
			(layerselection 0x00010fc_ffffffff)
			(plot_on_all_layers_selection 0x0000000_00000000)
			(disableapertmacros no)
			(usegerberextensions no)
			(usegerberattributes yes)
			(usegerberadvancedattributes yes)
			(creategerberjobfile no)
			(dashed_line_dash_ratio 12.000000)
			(dashed_line_gap_ratio 3.000000)
			(svgprecision 6)
			(plotframeref no)
			(viasonmask no)
			(mode 1)
			(useauxorigin no)
			(hpglpennumber 1)
			(hpglpenspeed 20)
			(hpglpendiameter 15.000000)
			(pdf_front_fp_property_popups yes)
			(pdf_back_fp_property_popups yes)
			(dxfpolygonmode yes)
			(dxfimperialunits yes)
			(dxfusepcbnewfont yes)
			(psnegative no)
			(psa4output no)
			(plotreference yes)
			(plotvalue no)
			(plotfptext yes)
			(plotinvisibletext no)
			(sketchpadsonfab no)
			(subtractmaskfromsilk yes)
			(outputformat 1)
			(mirror no)
			(drillshape 0)
			(scaleselection 1)
			(outputdirectory "Manufacturing Files/gerbers/")
		)
	)
	(net 0 "")
	(net 1 "GND")
	(net 2 "/VDD")
	(net 3 "/ESP32/EN")
	(net 4 "/5V")
	(net 5 "/3V3")
	(net 6 "/SCL")
	(net 7 "Net-(U3-BP1V5)")
	(net 8 "Net-(U3-DRTN)")
	(net 9 "Net-(U3-EN{slash}UVLO)")
	(net 10 "/1V8")
	(net 11 "Net-(U3-AVIN)")
	(net 12 "Net-(U3-VDD5)")
	(net 13 "Net-(U3-VOSNS)")
	(net 14 "Net-(C22-Pad2)")
	(net 15 "/ESP32/P_TX")
	(net 16 "/ESP32/P_RX")
	(net 17 "/ESP32/IO0")
	(net 18 "/ESP32/XIN32")
	(net 19 "/ESP32/XOUT32")
	(net 20 "/Power/PGOOD")
	(net 21 "Net-(U3-GOSNS)")
	(net 22 "/SDA")
	(net 23 "/BM1366-1/0V8")
	(net 24 "/BM1366-1/1V8")
	(net 25 "Net-(U12-VDD3_0)")
	(net 26 "Net-(U13-INV_CLKO)")
	(net 27 "/BM1366-2/0V8")
	(net 28 "/BM1366-2/1V8")
	(net 29 "Net-(U13-CLKO)")
	(net 30 "Net-(U12-VDD2_0)")
	(net 31 "/NRSTI")
	(net 32 "/RO")
	(net 33 "/CI")
	(net 34 "/BM1366-3/0V8")
	(net 35 "/BM1366-3/1V8")
	(net 36 "Net-(U12-VDD1_0)")
	(net 37 "Net-(U12-VDD1_1)")
	(net 38 "Net-(U12-VDD2_1)")
	(net 39 "Net-(U12-VDD3_1)")
	(net 40 "/Fan/FAN1_TACH")
	(net 41 "/Fan/FAN1_PWM")
	(net 42 "/Fan/FAN2_TACH")
	(net 43 "/Fan/FAN2_PWM")
	(net 44 "Net-(U18-VDD1_0)")
	(net 45 "Net-(U18-VDD2_0)")
	(net 46 "Net-(U22-INV_CLKO)")
	(net 47 "Net-(U18-VDD3_0)")
	(net 48 "Net-(U15A--)")
	(net 49 "Net-(U18-VDD3_1)")
	(net 50 "Net-(U15B--)")
	(net 51 "Net-(U13-ADDR0)")
	(net 52 "Net-(U13-ADDR1)")
	(net 53 "Net-(U18-VDD2_1)")
	(net 54 "/BM1366-1/BI1")
	(net 55 "/VIN")
	(net 56 "Net-(U3-VSEL)")
	(net 57 "Net-(U18-VDD1_1)")
	(net 58 "Net-(U15C--)")
	(net 59 "Net-(U15D--)")
	(net 60 "Net-(U3-ADRSEL)")
	(net 61 "Net-(J6-Pin_4)")
	(net 62 "Net-(J6-Pin_6)")
	(net 63 "Net-(U20-VDD3_1)")
	(net 64 "Net-(U20-VDD2_1)")
	(net 65 "Net-(U20-VDD1_1)")
	(net 66 "Net-(U22-ADDR0)")
	(net 67 "Net-(U22-ADDR1)")
	(net 68 "Net-(U22-VDD3_0)")
	(net 69 "Net-(U22-VDD2_0)")
	(net 70 "Net-(U22-VDD1_0)")
	(net 71 "Net-(U21A--)")
	(net 72 "unconnected-(U13-PIN_MODE-Pad18)")
	(net 73 "Net-(U21B--)")
	(net 74 "/BM1366-3/NRSTO3")
	(net 75 "Net-(U21C--)")
	(net 76 "Net-(U21D--)")
	(net 77 "Net-(J6-Pin_3)")
	(net 78 "Net-(J6-Pin_5)")
	(net 79 "Net-(R54-Pad1)")
	(net 80 "Net-(U6-GPIO4{slash}TOUCH4{slash}ADC1_CH3)")
	(net 81 "Net-(U6-GPIO5{slash}TOUCH5{slash}ADC1_CH4)")
	(net 82 "Net-(R76-Pad1)")
	(net 83 "Net-(U25-VDD1_1)")
	(net 84 "Net-(U25-VDD2_1)")
	(net 85 "Net-(U25-VDD3_1)")
	(net 86 "unconnected-(J3-Pin_1-Pad1)")
	(net 87 "unconnected-(J3-Pin_2-Pad2)")
	(net 88 "unconnected-(J3-Pin_3-Pad3)")
	(net 89 "unconnected-(J3-Pin_4-Pad4)")
	(net 90 "unconnected-(J3-Pin_5-Pad5)")
	(net 91 "/BM1366-3/BO3")
	(net 92 "unconnected-(J3-Pin_7-Pad7)")
	(net 93 "Net-(U6-GPIO6{slash}TOUCH6{slash}ADC1_CH5)")
	(net 94 "/BM1366-1/VDD1")
	(net 95 "/BM1366-2/VDD2")
	(net 96 "/BM1366-3/RI3")
	(net 97 "/BM1366-3/CLKO3")
	(net 98 "/BM1366-3/CO3")
	(net 99 "/BM1366-1/CLKI1")
	(net 100 "/BM1366-2/NRSTI2")
	(net 101 "/BM1366-2/BI2")
	(net 102 "/BM1366-2/RO2")
	(net 103 "/BM1366-2/CI2")
	(net 104 "/BM1366-3/NRSTI3")
	(net 105 "/BM1366-3/BI3")
	(net 106 "/BM1366-3/RO3")
	(net 107 "/BM1366-3/CI3")
	(net 108 "/BM1366-1/NRSTO")
	(net 109 "/BM1366-1/CO")
	(net 110 "/BM1366-1/BO")
	(net 111 "/BM1366-1/RI")
	(net 112 "/BM1366-2/RI")
	(net 113 "/BM1366-2/NRSTO")
	(net 114 "/BM1366-2/BO")
	(net 115 "/BM1366-2/CO")
	(net 116 "unconnected-(U2-NC-Pad4)")
	(net 117 "/ESP32/ASIC_RST")
	(net 118 "/ESP32/ESP32_TX")
	(net 119 "/ESP32/ESP32_RX")
	(net 120 "Net-(U6-GPIO7{slash}TOUCH7{slash}ADC1_CH6)")
	(net 121 "Net-(U6-GPIO8{slash}TOUCH8{slash}ADC1_CH7{slash}SUBSPICS1)")
	(net 122 "Net-(J7-CC1)")
	(net 123 "Net-(U6-GPIO20{slash}U1CTS{slash}ADC2_CH9{slash}CLK_OUT1{slash}USB_D+)")
	(net 124 "Net-(U6-GPIO19{slash}U1RTS{slash}ADC2_CH8{slash}CLK_OUT2{slash}USB_D-)")
	(net 125 "unconnected-(J7-SBU1-PadA8)")
	(net 126 "Net-(J7-CC2)")
	(net 127 "/Power/PMB_ALRT")
	(net 128 "unconnected-(J7-SBU2-PadB8)")
	(net 129 "Net-(U6-GPIO9{slash}TOUCH9{slash}ADC1_CH8{slash}FSPIHD{slash}SUBSPIHD)")
	(net 130 "Net-(U5-OE)")
	(net 131 "Net-(U10-ADJ)")
	(net 132 "Net-(U11-ADJ)")
	(net 133 "Net-(U12-BO)")
	(net 134 "Net-(U18-CLKO)")
	(net 135 "Net-(U12-CO)")
	(net 136 "/BM1366-2/CLKI2")
	(net 137 "Net-(U12-INV_CLKO)")
	(net 138 "Net-(U12-CLKO)")
	(net 139 "/BM1366-3/CLKI3")
	(net 140 "Net-(U12-NRSTO)")
	(net 141 "Net-(U12-RI)")
	(net 142 "Net-(U15A-+)")
	(net 143 "Net-(U16-ADJ)")
	(net 144 "Net-(U17-ADJ)")
	(net 145 "Net-(U15B-+)")
	(net 146 "Net-(U18-RO)")
	(net 147 "Net-(U18-INV_CLKO)")
	(net 148 "Net-(U18-NRSTI)")
	(net 149 "Net-(U15C-+)")
	(net 150 "Net-(U22-VDD3_1)")
	(net 151 "Net-(U22-VDD2_1)")
	(net 152 "Net-(U22-VDD1_1)")
	(net 153 "Net-(U22-RI)")
	(net 154 "Net-(U22-NRSTO)")
	(net 155 "Net-(U22-CO)")
	(net 156 "Net-(U22-CLKO)")
	(net 157 "Net-(U22-BO)")
	(net 158 "Net-(U18-CLKI)")
	(net 159 "Net-(U18-BI)")
	(net 160 "Net-(U18-CI)")
	(net 161 "Net-(U15D-+)")
	(net 162 "Net-(U20-INV_CLKO)")
	(net 163 "Net-(U21A-+)")
	(net 164 "Net-(U21B-+)")
	(net 165 "Net-(U23-ADJ)")
	(net 166 "Net-(U24-ADJ)")
	(net 167 "Net-(U21C-+)")
	(net 168 "Net-(U21D-+)")
	(net 169 "Net-(U25-INV_CLKO)")
	(net 170 "Net-(U5-A4)")
	(net 171 "unconnected-(U6-GPIO10{slash}TOUCH10{slash}ADC1_CH9{slash}FSPICS0{slash}FSPIIO4{slash}SUBSPICS0-Pad18)")
	(net 172 "Net-(U6-GPIO12{slash}TOUCH12{slash}ADC2_CH1{slash}FSPICLK{slash}FSPIIO6{slash}SUBSPICLK)")
	(net 173 "Net-(U6-GPIO14{slash}TOUCH14{slash}ADC2_CH3{slash}FSPIWP{slash}FSPIDQS{slash}SUBSPIWP)")
	(net 174 "Net-(U5-B4)")
	(net 175 "Net-(U5-DIR4)")
	(net 176 "Net-(U6-SPIIO6{slash}GPIO35{slash}FSPID{slash}SUBSPID)")
	(net 177 "Net-(U6-SPIIO7{slash}GPIO36{slash}FSPICLK{slash}SUBSPICLK)")
	(net 178 "Net-(U6-SPIDQS{slash}GPIO37{slash}FSPIQ{slash}SUBSPIQ)")
	(net 179 "Net-(U6-GPIO38{slash}FSPIWP{slash}SUBSPIWP)")
	(net 180 "Net-(J7-VBUS-PadA4)")
	(net 181 "Net-(U12-ADDR0)")
	(net 182 "Net-(U13-VDD3_1)")
	(net 183 "Net-(U12-ADDR1)")
	(net 184 "Net-(U13-VDD2_1)")
	(net 185 "Net-(U18-ADDR0)")
	(net 186 "Net-(U13-VDD1_1)")
	(net 187 "Net-(U18-ADDR1)")
	(net 188 "Net-(U20-ADDR0)")
	(net 189 "Net-(U20-ADDR1)")
	(net 190 "Net-(U25-ADDR0)")
	(net 191 "Net-(U25-ADDR1)")
	(net 192 "unconnected-(U4-NC-Pad4)")
	(net 193 "unconnected-(U6-*GPIO46-Pad16)")
	(net 194 "unconnected-(U6-GPIO21-Pad23)")
	(net 195 "unconnected-(U6-*GPIO45-Pad26)")
	(net 196 "unconnected-(U7-ALERT-Pad3)")
	(net 197 "Net-(U3-MSEL1)")
	(net 198 "Net-(U3-BOOT)")
	(net 199 "/ESP32/VDD_SAMPLE")
	(net 200 "Net-(U1-SW)")
	(net 201 "Net-(U1-CB)")
	(net 202 "Net-(U1-FB)")
	(net 203 "unconnected-(U3-VSHARE-Pad35)")
	(net 204 "unconnected-(U3-SYNC-Pad38)")
	(net 205 "unconnected-(U3-BCX_CLK-Pad39)")
	(net 206 "unconnected-(U3-BCX_DAT-Pad40)")
	(net 207 "/Power/SW")
	(net 208 "Net-(U3-MSEL2)")
	(net 209 "/Power/AGND")
	(net 210 "unconnected-(U3-NC-Pad36)")
	(net 211 "unconnected-(U8-ALERT-Pad3)")
	(net 212 "unconnected-(U9-CLK-Pad9)")
	(net 213 "unconnected-(U9-*ALERT-Pad10)")
	(net 214 "unconnected-(U12-PIN_MODE-Pad18)")
	(net 215 "unconnected-(U22-PIN_MODE-Pad18)")
	(net 216 "unconnected-(U25-PIN_MODE-Pad18)")
	(net 217 "/Power/PMB_SCL")
	(net 218 "/Power/PMB_SDA")
	(net 219 "/SMB_ALRT")
	(footprint "bitaxe:BM1366"
		(locked yes)
		(layer "F.Cu")
		(at 108 125 180)
		(property "Reference" "U18"
			(at 0.05 4.25 0)
			(unlocked yes)
			(layer "F.SilkS")
		)
		(property "Value" "BM1366_mode0"
			(at 0.07 4.58 180)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:BM1366"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0.075 4.2 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(pad "1" smd rect
			(at -2.916 -3.263 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 47 "Net-(U18-VDD3_0)")
			(pinfunction "VDD3_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "2" smd rect
			(at -2.916 -2.761 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 45 "Net-(U18-VDD2_0)")
			(pinfunction "VDD2_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "3" smd rect
			(at -2.916 -2.259 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 44 "Net-(U18-VDD1_0)")
			(pinfunction "VDD1_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "4" smd rect
			(at -2.916 -1.757 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 94 "/BM1366-1/VDD1")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "5" smd rect
			(at -2.916 -1.255 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 115 "/BM1366-2/CO")
			(pinfunction "CO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "6" smd rect
			(at -2.916 -0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 134 "Net-(U18-CLKO)")
			(pinfunction "CLKO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "7" smd rect
			(at -2.916 -0.251 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 112 "/BM1366-2/RI")
			(pinfunction "RI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "8" smd rect
			(at -2.916 0.251 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 114 "/BM1366-2/BO")
			(pinfunction "BO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "9" smd rect
			(at -2.916 0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 113 "/BM1366-2/NRSTO")
			(pinfunction "NRSTO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "10" smd rect
			(at -2.916 1.255 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 185 "Net-(U18-ADDR0)")
			(pinfunction "ADDR0")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "11" smd rect
			(at -2.916 1.757 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 187 "Net-(U18-ADDR1)")
			(pinfunction "ADDR1")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "12" smd rect
			(at -2.916 2.259 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 94 "/BM1366-1/VDD1")
			(pinfunction "PLL_VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "13" smd rect
			(at -2.916 2.761 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 27 "/BM1366-2/0V8")
			(pinfunction "VDDIO_08_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "14" smd rect
			(at -2.916 3.263 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 28 "/BM1366-2/1V8")
			(pinfunction "VDDIO_18_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "15" smd rect
			(at 2.916 3.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 28 "/BM1366-2/1V8")
			(pinfunction "VDDIO_18_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "16" smd rect
			(at 2.916 2.75 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 27 "/BM1366-2/0V8")
			(pinfunction "VDDIO_08_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "17" smd rect
			(at 2.916 2.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 94 "/BM1366-1/VDD1")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "18" smd rect
			(at 2.916 1.75 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 94 "/BM1366-1/VDD1")
			(pinfunction "PIN_MODE")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "19" smd rect
			(at 2.916 1.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 147 "Net-(U18-INV_CLKO)")
			(pinfunction "INV_CLKO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "20" smd rect
			(at 2.916 0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 148 "Net-(U18-NRSTI)")
			(pinfunction "NRSTI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "21" smd rect
			(at 2.916 0.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 159 "Net-(U18-BI)")
			(pinfunction "BI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "22" smd rect
			(at 2.916 -0.251 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 146 "Net-(U18-RO)")
			(pinfunction "RO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "23" smd rect
			(at 2.916 -0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 158 "Net-(U18-CLKI)")
			(pinfunction "CLKI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "24" smd rect
			(at 2.916 -1.255 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 160 "Net-(U18-CI)")
			(pinfunction "CI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "25" smd rect
			(at 2.916 -1.757 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 94 "/BM1366-1/VDD1")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "26" smd rect
			(at 2.916 -2.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 57 "Net-(U18-VDD1_1)")
			(pinfunction "VDD1_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "27" smd rect
			(at 2.916 -2.761 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 53 "Net-(U18-VDD2_1)")
			(pinfunction "VDD2_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "28" smd rect
			(at 2.916 -3.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 49 "Net-(U18-VDD3_1)")
			(pinfunction "VDD3_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "29" smd rect
			(at 0 -2.468 180)
			(size 4.277 1.81)
			(layers "F.Cu" "F.Mask")
			(net 95 "/BM1366-2/VDD2")
			(pinfunction "VDD")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "30" smd rect
			(at 0 1.108 180)
			(size 4.277 4.53)
			(layers "F.Cu" "F.Mask")
			(net 94 "/BM1366-1/VDD1")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(model "${KIPRJMOD}/3d/bm1366.STP"
			(offset
				(xyz 7 24.5 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "bitaxe:Tag-Connect_TC2030-IDC-NL_2x03_P1.27mm_Vertical"
		(layer "F.Cu")
		(at 129.9 59.9 -90)
		(descr "Tag-Connect programming header; http://www.tag-connect.com/Materials/TC2030-IDC-NL.pdf")
		(tags "tag connect programming header pogo pins")
		(property "Reference" "J4"
			(at 3.9 0.05 0)
			(layer "F.SilkS")
		)
		(property "Value" "TC2030-IDC"
			(at 0 -2.3 90)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:Tag-Connect_TC2030-IDC-NL_2x03_P1.27mm_Vertical"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "exclude_from_bom" ""
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "TC2030*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "KEEPOUT"
			(at 0.2 0 90)
			(layer "Cmts.User")
		)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "F.Fab")
		)
		(pad "" np_thru_hole circle
			(at -2.54 0 270)
			(size 0.9906 0.9906)
			(drill 0.9906)
			(layers "*.Cu" "*.Mask")
		)
		(pad "" np_thru_hole circle
			(at 2.54 -1.016 270)
			(size 0.9906 0.9906)
			(drill 0.9906)
			(layers "*.Cu" "*.Mask")
		)
		(pad "" np_thru_hole circle
			(at 2.54 1.016 270)
			(size 0.9906 0.9906)
			(drill 0.9906)
			(layers "*.Cu" "*.Mask")
		)
		(pad "1" connect circle
			(at -1.27 0.635 270)
			(size 0.7874 0.7874)
			(layers "F.Cu" "F.Mask")
			(net 3 "/ESP32/EN")
			(pinfunction "Pin_1")
			(pintype "passive")
		)
		(pad "2" connect circle
			(at -1.27 -0.635 270)
			(size 0.7874 0.7874)
			(layers "F.Cu" "F.Mask")
			(net 5 "/3V3")
			(pinfunction "Pin_2")
			(pintype "passive")
		)
		(pad "3" connect circle
			(at 0 0.635 270)
			(size 0.7874 0.7874)
			(layers "F.Cu" "F.Mask")
			(net 15 "/ESP32/P_TX")
			(pinfunction "Pin_3")
			(pintype "passive")
		)
		(pad "4" connect circle
			(at 0 -0.635 270)
			(size 0.7874 0.7874)
			(layers "F.Cu" "F.Mask")
			(net 1 "GND")
			(pinfunction "Pin_4")
			(pintype "passive")
		)
		(pad "5" connect circle
			(at 1.27 0.635 270)
			(size 0.7874 0.7874)
			(layers "F.Cu" "F.Mask")
			(net 16 "/ESP32/P_RX")
			(pinfunction "Pin_5")
			(pintype "passive")
		)
		(pad "6" connect circle
			(at 1.27 -0.635 270)
			(size 0.7874 0.7874)
			(layers "F.Cu" "F.Mask")
			(net 17 "/ESP32/IO0")
			(pinfunction "Pin_6")
			(pintype "passive")
		)
		(zone
			(net 0)
			(net_name "")
			(layer "F.Cu")
			(hatch full 0.508)
			(connect_pads
				(clearance 0)
			)
			(min_thickness 0.254)
			(filled_areas_thickness no)
			(keepout
				(tracks allowed)
				(vias not_allowed)
				(pads allowed)
				(copperpour not_allowed)
				(footprints not_allowed)
			)
			(fill
				(thermal_gap 0.508)
				(thermal_bridge_width 0.508)
			)
			(polygon
				(pts
					(xy 130.535 61.17) (xy 130.535 58.63) (xy 129.265 58.63) (xy 129.265 61.17)
				)
			)
		)
	)
	(footprint "bitaxe:BM1366"
		(locked yes)
		(layer "F.Cu")
		(at 78 125 180)
		(property "Reference" "U20"
			(at 0 4.25 0)
			(unlocked yes)
			(layer "F.SilkS")
		)
		(property "Value" "BM1366_mode0"
			(at 0.07 4.58 180)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:BM1366"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at -0.025 4.175 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(pad "1" smd rect
			(at -2.916 -3.263 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 49 "Net-(U18-VDD3_1)")
			(pinfunction "VDD3_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "2" smd rect
			(at -2.916 -2.761 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 53 "Net-(U18-VDD2_1)")
			(pinfunction "VDD2_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "3" smd rect
			(at -2.916 -2.259 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 57 "Net-(U18-VDD1_1)")
			(pinfunction "VDD1_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "4" smd rect
			(at -2.916 -1.757 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 94 "/BM1366-1/VDD1")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "5" smd rect
			(at -2.916 -1.255 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 160 "Net-(U18-CI)")
			(pinfunction "CO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "6" smd rect
			(at -2.916 -0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 158 "Net-(U18-CLKI)")
			(pinfunction "CLKO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "7" smd rect
			(at -2.916 -0.251 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 146 "Net-(U18-RO)")
			(pinfunction "RI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "8" smd rect
			(at -2.916 0.251 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 159 "Net-(U18-BI)")
			(pinfunction "BO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "9" smd rect
			(at -2.916 0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 148 "Net-(U18-NRSTI)")
			(pinfunction "NRSTO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "10" smd rect
			(at -2.916 1.255 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 188 "Net-(U20-ADDR0)")
			(pinfunction "ADDR0")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "11" smd rect
			(at -2.916 1.757 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 189 "Net-(U20-ADDR1)")
			(pinfunction "ADDR1")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "12" smd rect
			(at -2.916 2.259 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 94 "/BM1366-1/VDD1")
			(pinfunction "PLL_VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "13" smd rect
			(at -2.916 2.761 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 27 "/BM1366-2/0V8")
			(pinfunction "VDDIO_08_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "14" smd rect
			(at -2.916 3.263 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 28 "/BM1366-2/1V8")
			(pinfunction "VDDIO_18_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "15" smd rect
			(at 2.916 3.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 28 "/BM1366-2/1V8")
			(pinfunction "VDDIO_18_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "16" smd rect
			(at 2.916 2.75 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 27 "/BM1366-2/0V8")
			(pinfunction "VDDIO_08_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "17" smd rect
			(at 2.916 2.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 94 "/BM1366-1/VDD1")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "18" smd rect
			(at 2.916 1.75 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 94 "/BM1366-1/VDD1")
			(pinfunction "PIN_MODE")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "19" smd rect
			(at 2.916 1.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 162 "Net-(U20-INV_CLKO)")
			(pinfunction "INV_CLKO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "20" smd rect
			(at 2.916 0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 100 "/BM1366-2/NRSTI2")
			(pinfunction "NRSTI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "21" smd rect
			(at 2.916 0.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 101 "/BM1366-2/BI2")
			(pinfunction "BI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "22" smd rect
			(at 2.916 -0.251 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 102 "/BM1366-2/RO2")
			(pinfunction "RO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "23" smd rect
			(at 2.916 -0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 136 "/BM1366-2/CLKI2")
			(pinfunction "CLKI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "24" smd rect
			(at 2.916 -1.255 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 103 "/BM1366-2/CI2")
			(pinfunction "CI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "25" smd rect
			(at 2.916 -1.757 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 94 "/BM1366-1/VDD1")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "26" smd rect
			(at 2.916 -2.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 65 "Net-(U20-VDD1_1)")
			(pinfunction "VDD1_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "27" smd rect
			(at 2.916 -2.761 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 64 "Net-(U20-VDD2_1)")
			(pinfunction "VDD2_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "28" smd rect
			(at 2.916 -3.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 63 "Net-(U20-VDD3_1)")
			(pinfunction "VDD3_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "29" smd rect
			(at 0 -2.468 180)
			(size 4.277 1.81)
			(layers "F.Cu" "F.Mask")
			(net 95 "/BM1366-2/VDD2")
			(pinfunction "VDD")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "30" smd rect
			(at 0 1.108 180)
			(size 4.277 4.53)
			(layers "F.Cu" "F.Mask")
			(net 94 "/BM1366-1/VDD1")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(model "${KIPRJMOD}/3d/bm1366.STP"
			(offset
				(xyz 7 24.5 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "F.Cu")
		(at 80.9 71.95)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP5"
			(at -1.4 1.5 0)
			(layer "F.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 1.55 0)
			(layer "F.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 2.125 0.075 0)
			(layer "F.Fab")
		)
		(pad "1" smd circle
			(at 0 0)
			(size 1 1)
			(layers "F.Cu" "F.Mask")
			(net 2 "/VDD")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "F.Cu")
		(at 88.85 53.92 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R18"
			(at -2.28 0.1 -90)
			(layer "F.SilkS")
		)
		(property "Value" "10k"
			(at 0 1.17 90)
			(layer "F.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 5 "/3V3")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 3 "/ESP32/EN")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "bitaxe:hex-heatsink"
		(locked yes)
		(layer "F.Cu")
		(at 92.25 125)
		(property "Reference" "HS1"
			(at 0 -0.5 0)
			(unlocked yes)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "Heatsink"
			(at 0 1 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:hex-heatsink"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.aliexpress.us/item/3256805608902122.html"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 2.5 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
	)
	(footprint "LOGO"
		(layer "F.Cu")
		(at 71.6 170.8)
		(property "Reference" "G***"
			(at -1.3 3.2 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "LOGO"
			(at 0.75 0 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Footprint" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(attr board_only exclude_from_pos_files exclude_from_bom)
	)
	(footprint "bitaxe:7770-screw-terminal"
		(layer "F.Cu")
		(at 71.5 53.225 180)
		(property "Reference" "J2"
			(at 5.236 0.086 0)
			(unlocked yes)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "Conn_01x01"
			(at 0 6 180)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Generic connector, single row, 01x01, script generated (kicad-library-utils/schlib/autogen/connector/)"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "A100886CT-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "63862-1"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(sheetfile "bitaxeHex.kicad_sch")
		(pad "1" thru_hole circle
			(at -2.5 -3.5 180)
			(size 3.2 3.2)
			(drill 1.85)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "Pin_1")
			(pintype "passive")
			(zone_connect 2)
		)
		(pad "1" thru_hole circle
			(at -2.5 3.5 180)
			(size 3.2 3.2)
			(drill 1.85)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "Pin_1")
			(pintype "passive")
			(zone_connect 2)
		)
		(pad "1" thru_hole circle
			(at 2.5 -3.5 180)
			(size 3.2 3.2)
			(drill 1.85)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "Pin_1")
			(pintype "passive")
			(zone_connect 2)
		)
		(pad "1" thru_hole circle
			(at 2.5 3.5 180)
			(size 3.2 3.2)
			(drill 1.85)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "Pin_1")
			(pintype "passive")
			(zone_connect 2)
		)
		(model "${KIPRJMOD}/3d/7770-ScrewTerminal.step"
			(offset
				(xyz 0 0 6.2)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 180 0 0)
			)
		)
	)
	(footprint "kibuzzard-65356D5C"
		(layer "F.Cu")
		(at 79.95 51 180)
		(descr "Generated with KiBuzzard")
		(tags "kb_params=eyJBbGlnbm1lbnRDaG9pY2UiOiAiQ2VudGVyIiwgIkNhcExlZnRDaG9pY2UiOiAiWyIsICJDYXBSaWdodENob2ljZSI6ICJdIiwgIkZvbnRDb21ib0JveCI6ICJVYnVudHVNb25vLUIiLCAiSGVpZ2h0Q3RybCI6ICIxLjI1IiwgIkxheWVyQ29tYm9Cb3giOiAiRi5TaWxrUyIsICJNdWx0aUxpbmVUZXh0IjogIkJPT1QiLCAiUGFkZGluZ0JvdHRvbUN0cmwiOiAiNSIsICJQYWRkaW5nTGVmdEN0cmwiOiAiMTAiLCAiUGFkZGluZ1JpZ2h0Q3RybCI6ICIxMCIsICJQYWRkaW5nVG9wQ3RybCI6ICI1IiwgIldpZHRoQ3RybCI6ICIifQ==")
		(property "Reference" "kibuzzard-65356D5C"
			(at 0 -4.102365 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "G***"
			(at 0 4.102365 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Footprint" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(attr board_only exclude_from_pos_files exclude_from_bom)
	)
	(footprint "MountingHole:MountingHole_3mm_Pad_Via"
		(layer "F.Cu")
		(at 53.5 49.5)
		(descr "Mounting Hole 3mm")
		(tags "mounting hole 3mm")
		(property "Reference" "H1"
			(at 0 -4 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "MountingHole"
			(at 0 4 0)
			(layer "F.Fab")
		)
		(property "Footprint" "MountingHole:MountingHole_3mm_Pad_Via"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "MountingHole*Pad*")
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr exclude_from_pos_files)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" thru_hole circle
			(at -2.25 0)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "1")
			(pintype "input")
		)
		(pad "1" thru_hole circle
			(at -1.59099 -1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "1")
			(pintype "input")
		)
		(pad "1" thru_hole circle
			(at -1.59099 1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "1")
			(pintype "input")
		)
		(pad "1" thru_hole circle
			(at 0 -2.25)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "1")
			(pintype "input")
		)
		(pad "1" thru_hole circle
			(at 0 0)
			(size 6 6)
			(drill 3.1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "1")
			(pintype "input")
		)
		(pad "1" thru_hole circle
			(at 0 2.25)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "1")
			(pintype "input")
		)
		(pad "1" thru_hole circle
			(at 1.59099 -1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "1")
			(pintype "input")
		)
		(pad "1" thru_hole circle
			(at 1.59099 1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "1")
			(pintype "input")
		)
		(pad "1" thru_hole circle
			(at 2.25 0)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "1")
			(pintype "input")
		)
	)
	(footprint "bitaxe:7770-screw-terminal"
		(layer "F.Cu")
		(at 61.775 53.225 180)
		(property "Reference" "J1"
			(at 5.028 0.086 0)
			(unlocked yes)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "Screw Terminal"
			(at 0 6 180)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Generic connector, single row, 01x01, script generated (kicad-library-utils/schlib/autogen/connector/)"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "36-7770-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "36-7770"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(sheetfile "bitaxeHex.kicad_sch")
		(pad "1" thru_hole circle
			(at -2.5 -3.5 180)
			(size 3.2 3.2)
			(drill 1.85)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 55 "/VIN")
			(pinfunction "Pin_1")
			(pintype "passive")
			(zone_connect 2)
		)
		(pad "1" thru_hole circle
			(at -2.5 3.5 180)
			(size 3.2 3.2)
			(drill 1.85)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 55 "/VIN")
			(pinfunction "Pin_1")
			(pintype "passive")
			(zone_connect 2)
		)
		(pad "1" thru_hole circle
			(at 2.5 -3.5 180)
			(size 3.2 3.2)
			(drill 1.85)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 55 "/VIN")
			(pinfunction "Pin_1")
			(pintype "passive")
			(zone_connect 2)
		)
		(pad "1" thru_hole circle
			(at 2.5 3.5 180)
			(size 3.2 3.2)
			(drill 1.85)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 55 "/VIN")
			(pinfunction "Pin_1")
			(pintype "passive")
			(zone_connect 2)
		)
		(model "${KIPRJMOD}/3d/7770-ScrewTerminal.step"
			(offset
				(xyz 0 0 6.2)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 180 0 0)
			)
		)
	)
	(footprint "bitaxe:SC32S-7PF20PPM"
		(layer "F.Cu")
		(at 101.3 58.2 -90)
		(property "Reference" "Y1"
			(at 2.95 0 180)
			(layer "F.SilkS")
		)
		(property "Value" "32.768kHz"
			(at -0.12 -4.36 90)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:SC32S-7PF20PPM"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.sii.co.jp/en/quartz/files/2013/03/SC-32S_Leaflet_e20151217.pdf"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "728-1074-1-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "SC32S-7PF20PPM"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Crystal*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr smd exclude_from_bom dnp)
		(pad "1" smd rect
			(at -1.4224 0 270)
			(size 1.1684 1.6002)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 18 "/ESP32/XIN32")
			(pinfunction "1")
			(pintype "passive")
		)
		(pad "2" smd rect
			(at 1.4224 0 270)
			(size 1.1684 1.6002)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 19 "/ESP32/XOUT32")
			(pinfunction "2")
			(pintype "passive")
		)
		(model "${KIPRJMOD}/3d/XTAL_SC32S-7PF20PPM_EPS.step"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "bitaxe:470531000"
		(layer "F.Cu")
		(at 79.7 60.65)
		(property "Reference" "J8"
			(at 10.1 -0.9 180)
			(layer "F.SilkS")
		)
		(property "Value" "Conn_01x04"
			(at 3.582 -4.093701 0)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:470531000"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "WM4330-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "0470531000"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Connector*:*_1x??_*")
		(sheetname "Fan")
		(sheetfile "fan.kicad_sch")
		(attr through_hole)
		(fp_text user "*"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "" np_thru_hole circle
			(at 5.08 -2.160001 90)
			(size 1.2954 1.2954)
			(drill 1.2954)
			(layers "*.Cu" "*.Mask")
		)
		(pad "1" thru_hole circle
			(at 0 0)
			(size 1.5748 1.5748)
			(drill 1.0668)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "Pin_1")
			(pintype "passive")
		)
		(pad "2" thru_hole circle
			(at 2.54 0)
			(size 1.5748 1.5748)
			(drill 1.0668)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 55 "/VIN")
			(pinfunction "Pin_2")
			(pintype "passive")
		)
		(pad "3" thru_hole circle
			(at 5.08 0)
			(size 1.5748 1.5748)
			(drill 1.0668)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 40 "/Fan/FAN1_TACH")
			(pinfunction "Pin_3")
			(pintype "passive")
		)
		(pad "4" thru_hole circle
			(at 7.62 0)
			(size 1.5748 1.5748)
			(drill 1.0668)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 41 "/Fan/FAN1_PWM")
			(pinfunction "Pin_4")
			(pintype "passive")
		)
		(model "${KIPRJMOD}/3d/470531000.stp"
			(offset
				(xyz 3.8 0 2.5)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz -90 0 180)
			)
		)
	)
	(footprint "bitaxe:3.1mm_mounting"
		(locked yes)
		(layer "F.Cu")
		(at 92.25 97)
		(property "Reference" "H13"
			(at -0.055 -3.55 0)
			(unlocked yes)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "HeatsinkMountingHole"
			(at 0.01 5.23 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:3.1mm_mounting"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "MountingHole*")
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr through_hole exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0.085 3.48 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(pad "" thru_hole circle
			(at 0 0 180)
			(size 5 5)
			(drill 3.1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(zone_connect 0)
		)
	)
	(footprint "bitaxe:TestPoint_Pad_D0.8mm"
		(layer "F.Cu")
		(at 54.7 67.95)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP1"
			(at 0 -1.448 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "TestPoint"
			(at 0 1.55 0)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:TestPoint_Pad_D0.8mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 -1.45 0)
			(layer "F.Fab")
		)
		(pad "1" smd circle
			(at 0 0)
			(size 0.8 0.8)
			(layers "F.Cu" "F.Mask")
			(net 60 "Net-(U3-ADRSEL)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0805_2012Metric"
		(layer "F.Cu")
		(at 56.475 78.25 -90)
		(descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C23"
			(at 3 -0.15 90)
			(layer "F.SilkS")
		)
		(property "Value" "100nF"
			(at 0 1.68 90)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM21NR71E104KTCT-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM21NR71E104KT"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -0.95 0 270)
			(size 1 1.45)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 198 "Net-(U3-BOOT)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.95 0 270)
			(size 1 1.45)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 207 "/Power/SW")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "F.Cu")
		(at 88.05 67.725 180)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R25"
			(at 2.2 0 0)
			(layer "F.SilkS")
		)
		(property "Value" "5.6k"
			(at 0 1.17 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "13-RC0402FR-135K6LCT-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-135K6L"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Fan")
		(sheetfile "fan.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0.025 0)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 180)
			(size 0.54 0.64)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 42 "/Fan/FAN2_TACH")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 180)
			(size 0.54 0.64)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 5 "/3V3")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "bitaxe:TL3340-switch"
		(layer "F.Cu")
		(at 79.8 47.7675 180)
		(property "Reference" "SW2"
			(at 0.03 -2.71 180)
			(unlocked yes)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "SWITCH-SPST"
			(at -0.1 3.9 180)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:TL3340-switch"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://sten-eswitch-13110800-production.s3.amazonaws.com/system/asset/product_line/data_sheet/164/TL3340.pdf"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "EG4627CT-ND"
			(at 0 0 180)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "TL3340AF160QG"
			(at 0 0 180)
			(layer "F.Fab")
			(hide yes)
		)
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0.2 -2.9 180)
			(unlocked yes)
			(layer "F.Fab")
		)
		(pad "" np_thru_hole circle
			(at -2.125 0 180)
			(size 0.9 0.9)
			(drill 0.9)
			(layers "F&B.Cu")
			(solder_mask_margin 0.05)
			(clearance -0.05)
			(zone_connect 0)
		)
		(pad "" smd roundrect
			(at -1.85 1.1 180)
			(size 1.3 0.8)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(clearance 0.05)
			(zone_connect 0)
			(thermal_bridge_angle 45)
		)
		(pad "" smd roundrect
			(at 1.85 1.1 180)
			(size 1.3 0.8)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(clearance 0.05)
			(zone_connect 0)
			(thermal_bridge_angle 45)
		)
		(pad "" np_thru_hole circle
			(at 2.125 0 180)
			(size 0.9 0.9)
			(drill 0.9)
			(layers "F&B.Cu")
			(solder_mask_margin 0.05)
			(clearance -0.05)
			(zone_connect 0)
		)
		(pad "1" smd oval
			(at -1.23 -1.1 180)
			(size 0.74 1.75)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pintype "unspecified")
			(clearance 0.05)
			(zone_connect 0)
			(thermal_bridge_angle 45)
		)
		(pad "1" smd oval
			(at 1.23 -1.1 180)
			(size 0.74 1.75)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pintype "unspecified")
			(clearance 0.05)
			(zone_connect 0)
			(thermal_bridge_angle 45)
		)
		(pad "2" smd roundrect
			(at 0 -1 180)
			(size 0.6 1.8)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 17 "/ESP32/IO0")
			(pintype "unspecified")
			(zone_connect 0)
			(thermal_bridge_angle 45)
		)
		(model "${KIPRJMOD}/3d/TL3340AF160QG.step"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 90 180 180)
			)
		)
	)
	(footprint "MountingHole:MountingHole_3mm_Pad_Via"
		(layer "F.Cu")
		(at 131 172)
		(descr "Mounting Hole 3mm")
		(tags "mounting hole 3mm")
		(property "Reference" "H4"
			(at 0 -4 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "MountingHole"
			(at 0 4 0)
			(layer "F.Fab")
		)
		(property "Footprint" "MountingHole:MountingHole_3mm_Pad_Via"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "MountingHole*")
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr exclude_from_pos_files)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" thru_hole circle
			(at -2.25 0)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at -1.59099 -1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at -1.59099 1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 0 -2.25)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 0 0)
			(size 6 6)
			(drill 3)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 0 2.25)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 1.59099 -1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 1.59099 1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 2.25 0)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
	)
	(footprint "Fiducial:Fiducial_1mm_Mask2mm"
		(layer "F.Cu")
		(at 53.34 54.356)
		(descr "Circular Fiducial, 1mm bare copper, 2mm soldermask opening (Level A)")
		(tags "fiducial")
		(property "Reference" "FID3"
			(at 0 -2 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "Fiducial"
			(at 0 2 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Fiducial:Fiducial_1mm_Mask2mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Fiducial*")
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr smd exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "" smd circle
			(at 0 0)
			(size 1 1)
			(layers "F.Cu" "F.Mask")
			(solder_mask_margin 0.5)
			(clearance 0.5)
		)
	)
	(footprint "Inductor_SMD:L_Coilcraft_XAL1010-XXX"
		(layer "F.Cu")
		(at 70.2 73.6 90)
		(descr "Inductor, Coilcraft, XAL1010-XXX, 10.5x11.8x10.0mm, https://www.coilcraft.com/getmedia/dd74e670-e705-456a-9a69-585fe02eaf3c/xal1010.pdf")
		(tags "Inductor xal")
		(property "Reference" "L2"
			(at -1.3 7.125 180)
			(layer "F.SilkS")
		)
		(property "Value" "680nH"
			(at 0 6.9 90)
			(layer "F.Fab")
		)
		(property "Footprint" "Inductor_SMD:L_Coilcraft_XAL1010-XXX"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.coilcraft.com/getmedia/dd74e670-e705-456a-9a69-585fe02eaf3c/xal1010.pdf"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "2457-XAL1010-681MED-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "HEIGHT" "10mm"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Mouser" "994-XAL1010-681MED"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "XAL1010-681MED"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Choke_* *Coil* Inductor_* L_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "F.Fab")
		)
		(pad "1" smd rect
			(at -3.325 0 90)
			(size 2.38 9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 207 "/Power/SW")
			(pinfunction "1")
			(pintype "passive")
		)
		(pad "2" smd rect
			(at 3.325 0 90)
			(size 2.38 9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 2 "/VDD")
			(pinfunction "2")
			(pintype "passive")
		)
		(model "${KICAD7_3DMODEL_DIR}/Inductor_SMD.3dshapes/L_Coilcraft_XAL1010-XXX.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "F.Cu")
		(at 55.02 64.225 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C13"
			(at 2.35 0.075 0)
			(layer "F.SilkS")
		)
		(property "Value" "100nF"
			(at 0 1.16 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "490-6321-1-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "GRM155R71A104KA01D"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 9 "Net-(U3-EN{slash}UVLO)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 209 "/Power/AGND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0603_1608Metric"
		(layer "F.Cu")
		(at 54 79)
		(descr "Capacitor SMD 0603 (1608 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C5"
			(at -0.025 1.35 180)
			(layer "F.SilkS")
		)
		(property "Value" "1uF"
			(at 0 1.43 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "490-1550-1-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "GRM188R60J105KA01D"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -0.775 0)
			(size 0.9 0.95)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 7 "Net-(U3-BP1V5)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.775 0)
			(size 0.9 0.95)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 8 "Net-(U3-DRTN)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0603_1608Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "F.Cu")
		(at 98.9 56.8 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C36"
			(at 2.3 -0.1 0)
			(layer "F.SilkS")
		)
		(property "Value" "6.8pF"
			(at 0 1.16 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "399-C0402C689C5GAC7867CT-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "C0402C689C5GAC7867"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr smd exclude_from_bom dnp)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 18 "/ESP32/XIN32")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:CP_Elec_6.3x5.9"
		(layer "F.Cu")
		(at 70.5 63.35)
		(descr "SMD capacitor, aluminum electrolytic, Panasonic C6, 6.3x5.9mm")
		(tags "capacitor electrolytic")
		(property "Reference" "C10"
			(at 5.05 -2.3 180)
			(layer "F.SilkS")
		)
		(property "Value" "180uF"
			(at 0 4.35 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:CP_Elec_6.3x5.9"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://industrial.panasonic.com/cdbs/www-data/pdf/AAB8000/AAB8000C177.pdf"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "P16479CT-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "HEIGHT" "5.9mm"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "16SVPF180M"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "CP_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -2.8 0)
			(size 3.5 1.6)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.15625)
			(net 55 "/VIN")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 2.8 0)
			(size 3.5 1.6)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.15625)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/CP_Elec_6.3x5.9.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "bitaxe:3.1mm_mounting"
		(locked yes)
		(layer "F.Cu")
		(at 92.25 153)
		(property "Reference" "H15"
			(at -0.055 -3.55 0)
			(unlocked yes)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "HeatsinkMountingHole"
			(at 0.01 5.23 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:3.1mm_mounting"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "MountingHole*")
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr through_hole exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0.085 3.48 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(pad "" thru_hole circle
			(at 0 0 180)
			(size 5 5)
			(drill 3.1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(zone_connect 0)
		)
	)
	(footprint "Connector_PinHeader_2.54mm:PinHeader_1x06_P2.54mm_Vertical"
		(layer "F.Cu")
		(at 121.76 69.5 -90)
		(descr "Through hole straight pin header, 1x06, 2.54mm pitch, single row")
		(tags "Through hole pin header THT 1x06 2.54mm single row")
		(property "Reference" "J6"
			(at -2.15 6.74 180)
			(layer "F.SilkS")
		)
		(property "Value" "Conn_01x06"
			(at 0 15.03 90)
			(layer "F.Fab")
		)
		(property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_1x06_P2.54mm_Vertical"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" "Generic connector, single row, 01x06, script generated (kicad-library-utils/schlib/autogen/connector/)"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Connector*:*_1x??_*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr through_hole)
		(fp_text user "${REFERENCE}"
			(at 0 6.35 180)
			(layer "F.Fab")
		)
		(pad "1" thru_hole rect
			(at 0 0 270)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 4 "/5V")
			(pinfunction "Pin_1")
			(pintype "passive")
		)
		(pad "2" thru_hole oval
			(at 0 2.54 270)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "Pin_2")
			(pintype "passive")
		)
		(pad "3" thru_hole oval
			(at 0 5.08 270)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 77 "Net-(J6-Pin_3)")
			(pinfunction "Pin_3")
			(pintype "passive")
		)
		(pad "4" thru_hole oval
			(at 0 7.62 270)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 61 "Net-(J6-Pin_4)")
			(pinfunction "Pin_4")
			(pintype "passive")
		)
		(pad "5" thru_hole oval
			(at 0 10.16 270)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 78 "Net-(J6-Pin_5)")
			(pinfunction "Pin_5")
			(pintype "passive")
		)
		(pad "6" thru_hole oval
			(at 0 12.7 270)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 62 "Net-(J6-Pin_6)")
			(pinfunction "Pin_6")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Connector_PinHeader_2.54mm.3dshapes/PinHeader_1x06_P2.54mm_Vertical.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "bitaxe:BM1366"
		(locked yes)
		(layer "F.Cu")
		(at 78 153 180)
		(property "Reference" "U25"
			(at 0 4.25 0)
			(unlocked yes)
			(layer "F.SilkS")
		)
		(property "Value" "BM1366_mode1"
			(at 0.07 4.58 180)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:BM1366"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0.025 4.25 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(pad "1" smd rect
			(at -2.916 -3.263 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 152 "Net-(U22-VDD1_1)")
			(pinfunction "VDD1_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "2" smd rect
			(at -2.916 -2.761 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 151 "Net-(U22-VDD2_1)")
			(pinfunction "VDD2_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "3" smd rect
			(at -2.916 -2.259 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 150 "Net-(U22-VDD3_1)")
			(pinfunction "VDD3_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "4" smd rect
			(at -2.916 -1.757 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 95 "/BM1366-2/VDD2")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "5" smd rect
			(at -2.916 -1.255 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 154 "Net-(U22-NRSTO)")
			(pinfunction "NRSTI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "6" smd rect
			(at -2.916 -0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 157 "Net-(U22-BO)")
			(pinfunction "BI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "7" smd rect
			(at -2.916 -0.251 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 153 "Net-(U22-RI)")
			(pinfunction "RO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "8" smd rect
			(at -2.916 0.251 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 156 "Net-(U22-CLKO)")
			(pinfunction "CLKI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "9" smd rect
			(at -2.916 0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 155 "Net-(U22-CO)")
			(pinfunction "CI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "10" smd rect
			(at -2.916 1.255 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 190 "Net-(U25-ADDR0)")
			(pinfunction "ADDR0")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "11" smd rect
			(at -2.916 1.757 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 191 "Net-(U25-ADDR1)")
			(pinfunction "ADDR1")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "12" smd rect
			(at -2.916 2.259 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 95 "/BM1366-2/VDD2")
			(pinfunction "PLL_VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "13" smd rect
			(at -2.916 2.761 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 34 "/BM1366-3/0V8")
			(pinfunction "VDDIO_08_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "14" smd rect
			(at -2.916 3.263 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 35 "/BM1366-3/1V8")
			(pinfunction "VDDIO_18_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "15" smd rect
			(at 2.916 3.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 35 "/BM1366-3/1V8")
			(pinfunction "VDDIO_18_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "16" smd rect
			(at 2.916 2.75 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 34 "/BM1366-3/0V8")
			(pinfunction "VDDIO_08_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "17" smd rect
			(at 2.916 2.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 95 "/BM1366-2/VDD2")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "18" smd rect
			(at 2.916 1.75 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 216 "unconnected-(U25-PIN_MODE-Pad18)")
			(pinfunction "PIN_MODE")
			(pintype "input+no_connect")
			(thermal_bridge_angle 45)
		)
		(pad "19" smd rect
			(at 2.916 1.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 169 "Net-(U25-INV_CLKO)")
			(pinfunction "INV_CLKO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "20" smd rect
			(at 2.916 0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 98 "/BM1366-3/CO3")
			(pinfunction "CO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "21" smd rect
			(at 2.916 0.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 97 "/BM1366-3/CLKO3")
			(pinfunction "CLKO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "22" smd rect
			(at 2.916 -0.251 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 96 "/BM1366-3/RI3")
			(pinfunction "RI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "23" smd rect
			(at 2.916 -0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 91 "/BM1366-3/BO3")
			(pinfunction "BO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "24" smd rect
			(at 2.916 -1.255 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 74 "/BM1366-3/NRSTO3")
			(pinfunction "NRSTO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "25" smd rect
			(at 2.916 -1.757 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 95 "/BM1366-2/VDD2")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "26" smd rect
			(at 2.916 -2.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 85 "Net-(U25-VDD3_1)")
			(pinfunction "VDD3_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "27" smd rect
			(at 2.916 -2.761 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 84 "Net-(U25-VDD2_1)")
			(pinfunction "VDD2_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "28" smd rect
			(at 2.916 -3.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 83 "Net-(U25-VDD1_1)")
			(pinfunction "VDD1_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "29" smd rect
			(at 0 -2.468 180)
			(size 4.277 1.81)
			(layers "F.Cu" "F.Mask")
			(net 2 "/VDD")
			(pinfunction "VDD")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "30" smd rect
			(at 0 1.108 180)
			(size 4.277 4.53)
			(layers "F.Cu" "F.Mask")
			(net 95 "/BM1366-2/VDD2")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(model "${KIPRJMOD}/3d/bm1366.STP"
			(offset
				(xyz 7 24.5 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "F.Cu")
		(at 55.545 62.5 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R8"
			(at -0.05 1.475 180)
			(layer "F.SilkS")
		)
		(property "Value" "12.7K"
			(at 0 1.17 90)
			(layer "F.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "YAG2964CT-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-0712K7L"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 55 "/VIN")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 9 "Net-(U3-EN{slash}UVLO)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "bitaxe:470531000"
		(layer "F.Cu")
		(at 84.91 72.375)
		(property "Reference" "J9"
			(at 2.89 4.275 180)
			(layer "F.SilkS")
		)
		(property "Value" "Conn_01x04"
			(at 3.9206 -3.76115 0)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:470531000"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "WM4330-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "0470531000"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Connector*:*_1x??_*")
		(sheetname "Fan")
		(sheetfile "fan.kicad_sch")
		(attr through_hole)
		(fp_text user "*"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "" np_thru_hole circle
			(at 5.08 -2.160001 90)
			(size 1.2954 1.2954)
			(drill 1.2954)
			(layers "*.Cu" "*.Mask")
		)
		(pad "1" thru_hole circle
			(at 0 0)
			(size 1.5748 1.5748)
			(drill 1.0668)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "Pin_1")
			(pintype "passive")
		)
		(pad "2" thru_hole circle
			(at 2.54 0)
			(size 1.5748 1.5748)
			(drill 1.0668)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 55 "/VIN")
			(pinfunction "Pin_2")
			(pintype "passive")
		)
		(pad "3" thru_hole circle
			(at 5.08 0)
			(size 1.5748 1.5748)
			(drill 1.0668)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 42 "/Fan/FAN2_TACH")
			(pinfunction "Pin_3")
			(pintype "passive")
		)
		(pad "4" thru_hole circle
			(at 7.62 0)
			(size 1.5748 1.5748)
			(drill 1.0668)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 43 "/Fan/FAN2_PWM")
			(pinfunction "Pin_4")
			(pintype "passive")
		)
		(model "${KIPRJMOD}/3d/470531000.stp"
			(offset
				(xyz 3.8 0 2.5)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz -90 0 180)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "F.Cu")
		(at 88.9 172.7 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C40"
			(at -1.6 -0.6 180)
			(layer "F.SilkS")
		)
		(property "Value" "311-3342-1-ND"
			(at 0 1.16 90)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Fan")
		(sheetfile "fan.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 5 "/3V3")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "bitaxe:3.1mm_mounting"
		(locked yes)
		(layer "F.Cu")
		(at 92.25 125)
		(property "Reference" "H14"
			(at -0.055 -3.55 0)
			(unlocked yes)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "HeatsinkMountingHole"
			(at 0.01 5.23 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:3.1mm_mounting"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "MountingHole*")
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr through_hole exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0.085 3.48 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(pad "" thru_hole circle
			(at 0 0 180)
			(size 5 5)
			(drill 3.1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(zone_connect 0)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "F.Cu")
		(at 81 66.9)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP6"
			(at 0 -1.5 0)
			(layer "F.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 1.55 0)
			(layer "F.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 2.125 0.025 0)
			(layer "F.Fab")
		)
		(pad "1" smd circle
			(at 0 0)
			(size 1 1)
			(layers "F.Cu" "F.Mask")
			(net 1 "GND")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "bitaxe:3.1mm_mounting"
		(locked yes)
		(layer "F.Cu")
		(at 122.5 125)
		(property "Reference" "H10"
			(at -0.055 -3.55 0)
			(unlocked yes)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "HeatsinkMountingHole"
			(at 0.01 5.23 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:3.1mm_mounting"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "MountingHole*")
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr through_hole exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0.085 3.48 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(pad "" thru_hole circle
			(at 0 0 180)
			(size 5 5)
			(drill 3.1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(zone_connect 0)
		)
	)
	(footprint "kibuzzard-65356D4E"
		(layer "F.Cu")
		(at 87.45 50.95 180)
		(descr "Generated with KiBuzzard")
		(tags "kb_params=eyJBbGlnbm1lbnRDaG9pY2UiOiAiQ2VudGVyIiwgIkNhcExlZnRDaG9pY2UiOiAiWyIsICJDYXBSaWdodENob2ljZSI6ICJdIiwgIkZvbnRDb21ib0JveCI6ICJVYnVudHVNb25vLUIiLCAiSGVpZ2h0Q3RybCI6ICIxLjI1IiwgIkxheWVyQ29tYm9Cb3giOiAiRi5TaWxrUyIsICJNdWx0aUxpbmVUZXh0IjogIlJFU0VUIiwgIlBhZGRpbmdCb3R0b21DdHJsIjogIjUiLCAiUGFkZGluZ0xlZnRDdHJsIjogIjEwIiwgIlBhZGRpbmdSaWdodEN0cmwiOiAiMTAiLCAiUGFkZGluZ1RvcEN0cmwiOiAiNSIsICJXaWR0aEN0cmwiOiAiIn0=")
		(property "Reference" "kibuzzard-65356D4E"
			(at 0 -4.102365 180)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "G***"
			(at 0 4.102365 180)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Footprint" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(attr board_only exclude_from_pos_files exclude_from_bom)
	)
	(footprint "Capacitor_SMD:C_1210_3225Metric"
		(layer "F.Cu")
		(at 78.3 68.375 90)
		(descr "Capacitor SMD 1210 (3225 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C27"
			(at -0.375 3 180)
			(layer "F.SilkS")
		)
		(property "Value" "47uF"
			(at 0 2.3 90)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_1210_3225Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "490-6539-1-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "GRM32ER61C476KE15L"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -1.475 0 90)
			(size 1.15 2.7)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.2173913043)
			(net 2 "/VDD")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 1.475 0 90)
			(size 1.15 2.7)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.2173913043)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_1210_3225Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "F.Cu")
		(at 62.325 68)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C2"
			(at 0.725 1.025 0)
			(layer "F.SilkS")
		)
		(property "Value" "4.7nF"
			(at 0 1.16 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "490-1309-1-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "GRM155R71E472KA01D"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0)
			(size 0.56 0.62)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 55 "/VIN")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0)
			(size 0.56 0.62)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "bitaxe:BM1366"
		(locked yes)
		(layer "F.Cu")
		(at 108 153 180)
		(property "Reference" "U22"
			(at 0 4.25 0)
			(unlocked yes)
			(layer "F.SilkS")
		)
		(property "Value" "BM1366_mode1"
			(at 0.07 4.58 180)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:BM1366"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at -0.025 4.25 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(pad "1" smd rect
			(at -2.916 -3.263 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 70 "Net-(U22-VDD1_0)")
			(pinfunction "VDD1_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "2" smd rect
			(at -2.916 -2.761 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 69 "Net-(U22-VDD2_0)")
			(pinfunction "VDD2_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "3" smd rect
			(at -2.916 -2.259 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 68 "Net-(U22-VDD3_0)")
			(pinfunction "VDD3_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "4" smd rect
			(at -2.916 -1.757 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 95 "/BM1366-2/VDD2")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "5" smd rect
			(at -2.916 -1.255 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 104 "/BM1366-3/NRSTI3")
			(pinfunction "NRSTI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "6" smd rect
			(at -2.916 -0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 105 "/BM1366-3/BI3")
			(pinfunction "BI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "7" smd rect
			(at -2.916 -0.251 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 106 "/BM1366-3/RO3")
			(pinfunction "RO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "8" smd rect
			(at -2.916 0.251 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 139 "/BM1366-3/CLKI3")
			(pinfunction "CLKI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "9" smd rect
			(at -2.916 0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 107 "/BM1366-3/CI3")
			(pinfunction "CI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "10" smd rect
			(at -2.916 1.255 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 66 "Net-(U22-ADDR0)")
			(pinfunction "ADDR0")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "11" smd rect
			(at -2.916 1.757 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 67 "Net-(U22-ADDR1)")
			(pinfunction "ADDR1")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "12" smd rect
			(at -2.916 2.259 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 95 "/BM1366-2/VDD2")
			(pinfunction "PLL_VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "13" smd rect
			(at -2.916 2.761 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 34 "/BM1366-3/0V8")
			(pinfunction "VDDIO_08_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "14" smd rect
			(at -2.916 3.263 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 35 "/BM1366-3/1V8")
			(pinfunction "VDDIO_18_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "15" smd rect
			(at 2.916 3.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 35 "/BM1366-3/1V8")
			(pinfunction "VDDIO_18_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "16" smd rect
			(at 2.916 2.75 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 34 "/BM1366-3/0V8")
			(pinfunction "VDDIO_08_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "17" smd rect
			(at 2.916 2.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 95 "/BM1366-2/VDD2")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "18" smd rect
			(at 2.916 1.75 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 215 "unconnected-(U22-PIN_MODE-Pad18)")
			(pinfunction "PIN_MODE")
			(pintype "input+no_connect")
			(thermal_bridge_angle 45)
		)
		(pad "19" smd rect
			(at 2.916 1.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 46 "Net-(U22-INV_CLKO)")
			(pinfunction "INV_CLKO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "20" smd rect
			(at 2.916 0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 155 "Net-(U22-CO)")
			(pinfunction "CO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "21" smd rect
			(at 2.916 0.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 156 "Net-(U22-CLKO)")
			(pinfunction "CLKO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "22" smd rect
			(at 2.916 -0.251 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 153 "Net-(U22-RI)")
			(pinfunction "RI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "23" smd rect
			(at 2.916 -0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 157 "Net-(U22-BO)")
			(pinfunction "BO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "24" smd rect
			(at 2.916 -1.255 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 154 "Net-(U22-NRSTO)")
			(pinfunction "NRSTO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "25" smd rect
			(at 2.916 -1.757 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 95 "/BM1366-2/VDD2")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "26" smd rect
			(at 2.916 -2.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 150 "Net-(U22-VDD3_1)")
			(pinfunction "VDD3_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "27" smd rect
			(at 2.916 -2.761 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 151 "Net-(U22-VDD2_1)")
			(pinfunction "VDD2_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "28" smd rect
			(at 2.916 -3.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 152 "Net-(U22-VDD1_1)")
			(pinfunction "VDD1_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "29" smd rect
			(at 0 -2.468 180)
			(size 4.277 1.81)
			(layers "F.Cu" "F.Mask")
			(net 2 "/VDD")
			(pinfunction "VDD")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "30" smd rect
			(at 0 1.108 180)
			(size 4.277 4.53)
			(layers "F.Cu" "F.Mask")
			(net 95 "/BM1366-2/VDD2")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(model "${KIPRJMOD}/3d/bm1366.STP"
			(offset
				(xyz 7 24.5 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "bitaxe:3.1mm_mounting"
		(locked yes)
		(layer "F.Cu")
		(at 62 125)
		(property "Reference" "H9"
			(at -0.055 -3.55 0)
			(unlocked yes)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "HeatsinkMountingHole"
			(at 0.01 5.23 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:3.1mm_mounting"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "MountingHole*")
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr through_hole exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0.085 3.48 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(pad "" thru_hole circle
			(at 0 0 180)
			(size 5 5)
			(drill 3.1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(zone_connect 0)
		)
	)
	(footprint "Fiducial:Fiducial_1mm_Mask2mm"
		(layer "F.Cu")
		(at 132.842 54.05)
		(descr "Circular Fiducial, 1mm bare copper, 2mm soldermask opening (Level A)")
		(tags "fiducial")
		(property "Reference" "FID1"
			(at 0 -2 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "Fiducial"
			(at 0 2 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Fiducial:Fiducial_1mm_Mask2mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Fiducial*")
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr smd exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "" smd circle
			(at 0 0)
			(size 1 1)
			(layers "F.Cu" "F.Mask")
			(solder_mask_margin 0.5)
			(clearance 0.5)
		)
	)
	(footprint "Package_SO:MSOP-10_3x3mm_P0.5mm"
		(layer "F.Cu")
		(at 93.7 66.675 180)
		(descr "10-Lead Plastic Micro Small Outline Package (MS) [MSOP] (see Microchip Packaging Specification 00000049BS.pdf)")
		(tags "SSOP 0.5")
		(property "Reference" "U9"
			(at 0.025 2.325 0)
			(layer "F.SilkS")
		)
		(property "Value" "EMC2302"
			(at 0 2.6 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Package_SO:MSOP-10_3x3mm_P0.5mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://ww1.microchip.com/downloads/aemDocuments/documents/MSLD/ProductDocuments/DataSheets/EMC2301-2-3-5-Data-Sheet-DS20006532A.pdf"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "EMC2302-2-AIZL-CT-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMC2302-2-AIZL-TR"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "MSOP10_MC_MCH MSOP10_MC_MCH-M MSOP10_MC_MCH-L")
		(sheetname "Fan")
		(sheetfile "fan.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 -0.025 0)
			(layer "F.Fab")
		)
		(pad "1" smd rect
			(at -2.2 -1 180)
			(size 1.4 0.3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 22 "/SDA")
			(pinfunction "SMDATA")
			(pintype "bidirectional")
		)
		(pad "2" smd rect
			(at -2.2 -0.5 180)
			(size 1.4 0.3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 6 "/SCL")
			(pinfunction "SMCLK")
			(pintype "input")
		)
		(pad "3" smd rect
			(at -2.2 0 180)
			(size 1.4 0.3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 5 "/3V3")
			(pinfunction "VDD")
			(pintype "power_in")
		)
		(pad "4" smd rect
			(at -2.2 0.5 180)
			(size 1.4 0.3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "power_in")
		)
		(pad "5" smd rect
			(at -2.2 1 180)
			(size 1.4 0.3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 41 "/Fan/FAN1_PWM")
			(pinfunction "PWM1")
			(pintype "output")
		)
		(pad "6" smd rect
			(at 2.2 1 180)
			(size 1.4 0.3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 40 "/Fan/FAN1_TACH")
			(pinfunction "TACH1")
			(pintype "input")
		)
		(pad "7" smd rect
			(at 2.2 0.5 180)
			(size 1.4 0.3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 43 "/Fan/FAN2_PWM")
			(pinfunction "PWM2")
			(pintype "output")
		)
		(pad "8" smd rect
			(at 2.2 0 180)
			(size 1.4 0.3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 42 "/Fan/FAN2_TACH")
			(pinfunction "TACH2")
			(pintype "input")
		)
		(pad "9" smd rect
			(at 2.2 -0.5 180)
			(size 1.4 0.3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 212 "unconnected-(U9-CLK-Pad9)")
			(pinfunction "CLK")
			(pintype "bidirectional")
		)
		(pad "10" smd rect
			(at 2.2 -1 180)
			(size 1.4 0.3)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 213 "unconnected-(U9-*ALERT-Pad10)")
			(pinfunction "*ALERT")
			(pintype "output")
		)
		(model "${KICAD6_3DMODEL_DIR}/Package_SO.3dshapes/MSOP-10_3x3mm_P0.5mm.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "F.Cu")
		(at 98.9 59.6 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C37"
			(at 0.325 -1.125 180)
			(layer "F.SilkS")
		)
		(property "Value" "6.8pF"
			(at 0 1.16 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "399-C0402C689C5GAC7867CT-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "C0402C689C5GAC7867"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr smd exclude_from_bom dnp)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 19 "/ESP32/XOUT32")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "F.Cu")
		(at 55.045 65.5 180)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R9"
			(at 1.9 -0.075 0)
			(layer "F.SilkS")
		)
		(property "Value" "1.37K"
			(at 0 1.17 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "YAG3035CT-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-071K37L"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 180)
			(size 0.54 0.64)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 9 "Net-(U3-EN{slash}UVLO)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 180)
			(size 0.54 0.64)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 209 "/Power/AGND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "F.Cu")
		(at 56.725 64.4 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R13"
			(at -2.3 -0.125 90)
			(layer "F.SilkS")
		)
		(property "Value" "10R"
			(at 0 1.17 90)
			(layer "F.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-10.0LRCT-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-0710RL"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 55 "/VIN")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 11 "Net-(U3-AVIN)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "bitaxe:LQFN40-CLIP"
		(layer "F.Cu")
		(at 58.4 71.75 90)
		(descr "VQFN, 46 Pin (http://www.ti.com/lit/ds/symlink/lp5036.pdf#page=59), generated with kicad-footprint-generator ipc_noLead_generator.py")
		(tags "VQFN NoLead")
		(property "Reference" "U3"
			(at 3.75 -2.4 180)
			(layer "F.SilkS")
		)
		(property "Value" "TPS546D24ARVFR"
			(at -0.02 6.44 90)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:LQFN40-CLIP"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tps546d24a.pdf"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "296-TPS546D24ARVFRCT-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "TPS546D24ARVFR"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr through_hole)
		(fp_text user "${REFERENCE}"
			(at 3.725 -2.65 180)
			(layer "F.Fab")
		)
		(pad "" smd roundrect
			(at -0.9 -2.1 90)
			(size 1.3 0.9)
			(layers "F.Paste")
			(roundrect_rratio 0.2450977778)
		)
		(pad "" smd roundrect
			(at -0.9 2.1 90)
			(size 1.3 0.9)
			(layers "F.Paste")
			(roundrect_rratio 0.2450977778)
		)
		(pad "" smd roundrect
			(at -0.85 -0.7 90)
			(size 1.4 0.95)
			(layers "F.Paste")
			(roundrect_rratio 0.2450978947)
		)
		(pad "" smd roundrect
			(at -0.85 0.7 90)
			(size 1.4 0.95)
			(layers "F.Paste")
			(roundrect_rratio 0.2450978947)
		)
		(pad "" smd roundrect
			(at 0.85 -0.7 90)
			(size 1.4 0.95)
			(layers "F.Paste")
			(roundrect_rratio 0.2450978947)
		)
		(pad "" smd roundrect
			(at 0.85 0.7 90)
			(size 1.4 0.95)
			(layers "F.Paste")
			(roundrect_rratio 0.2450978947)
		)
		(pad "" smd roundrect
			(at 0.9 -2.1 90)
			(size 1.3 0.9)
			(layers "F.Paste")
			(roundrect_rratio 0.2450977778)
		)
		(pad "" smd roundrect
			(at 0.9 2.1 90)
			(size 1.3 0.9)
			(layers "F.Paste")
			(roundrect_rratio 0.2450977778)
		)
		(pad "1" smd roundrect
			(at -2.5 -2.75 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 20 "/Power/PGOOD")
			(pinfunction "PGD")
			(pintype "input")
		)
		(pad "2" smd roundrect
			(at -2.5 -2.25 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 218 "/Power/PMB_SDA")
			(pinfunction "PMB_DATA")
			(pintype "input")
		)
		(pad "3" smd roundrect
			(at -2.5 -1.75 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 217 "/Power/PMB_SCL")
			(pinfunction "PMB_CLK")
			(pintype "input")
		)
		(pad "4" smd roundrect
			(at -2.5 -1.25 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 7 "Net-(U3-BP1V5)")
			(pinfunction "BP1V5")
			(pintype "input")
		)
		(pad "5" smd roundrect
			(at -2.5 -0.75 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 8 "Net-(U3-DRTN)")
			(pinfunction "DRTN")
			(pintype "input")
		)
		(pad "6" smd roundrect
			(at -2.5 -0.25 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 127 "/Power/PMB_ALRT")
			(pinfunction "SMB_ALRT")
			(pintype "input")
		)
		(pad "7" smd roundrect
			(at -2.5 0.25 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 198 "Net-(U3-BOOT)")
			(pinfunction "BOOT")
			(pintype "input")
		)
		(pad "8" smd roundrect
			(at -2.5 0.75 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 207 "/Power/SW")
			(pinfunction "SW")
			(pintype "output")
		)
		(pad "9" smd roundrect
			(at -2.5 1.25 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 207 "/Power/SW")
			(pinfunction "SW")
			(pintype "power_in")
		)
		(pad "10" smd roundrect
			(at -2.5 1.75 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 207 "/Power/SW")
			(pinfunction "SW")
			(pintype "power_in")
		)
		(pad "11" smd roundrect
			(at -2.5 2.25 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 207 "/Power/SW")
			(pinfunction "SW")
			(pintype "output")
		)
		(pad "12" smd roundrect
			(at -2.5 2.75 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 207 "/Power/SW")
			(pinfunction "SW")
			(pintype "power_out")
		)
		(pad "13" smd roundrect
			(at -1.75 3.5 90)
			(size 0.25 0.8)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pinfunction "PGND")
			(pintype "output")
		)
		(pad "14" smd roundrect
			(at -1.25 3.5 90)
			(size 0.25 0.8)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pinfunction "PGND")
			(pintype "output")
		)
		(pad "15" smd roundrect
			(at -0.75 3.5 90)
			(size 0.25 0.8)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pinfunction "PGND")
			(pintype "input")
		)
		(pad "16" smd roundrect
			(at -0.25 3.5 90)
			(size 0.25 0.8)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pinfunction "PGND")
			(pintype "input")
		)
		(pad "17" smd roundrect
			(at 0.25 3.5 90)
			(size 0.25 0.8)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pinfunction "PGND")
			(pintype "power_in")
		)
		(pad "18" smd roundrect
			(at 0.75 3.5 90)
			(size 0.25 0.8)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pinfunction "PGND")
			(pintype "input")
		)
		(pad "19" smd roundrect
			(at 1.25 3.5 90)
			(size 0.25 0.8)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pinfunction "PGND")
			(pintype "input")
		)
		(pad "20" smd roundrect
			(at 1.75 3.5 90)
			(size 0.25 0.8)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pinfunction "PGND")
			(pintype "power_in")
		)
		(pad "21" smd roundrect
			(at 2.5 2.75 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 55 "/VIN")
			(pinfunction "PVIN")
			(pintype "input")
		)
		(pad "22" smd roundrect
			(at 2.5 2.25 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 55 "/VIN")
			(pinfunction "PVIN")
			(pintype "input")
		)
		(pad "23" smd roundrect
			(at 2.5 1.75 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 55 "/VIN")
			(pinfunction "PVIN")
			(pintype "input")
		)
		(pad "24" smd roundrect
			(at 2.5 1.25 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 55 "/VIN")
			(pinfunction "PVIN")
			(pintype "input")
		)
		(pad "25" smd roundrect
			(at 2.5 0.75 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 55 "/VIN")
			(pinfunction "PVIN")
			(pintype "input")
		)
		(pad "26" smd roundrect
			(at 2.5 0.25 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 11 "Net-(U3-AVIN)")
			(pinfunction "AVIN")
			(pintype "input")
		)
		(pad "27" smd roundrect
			(at 2.5 -0.25 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 9 "Net-(U3-EN{slash}UVLO)")
			(pinfunction "EN/UVLO")
			(pintype "input")
		)
		(pad "28" smd roundrect
			(at 2.5 -0.75 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 12 "Net-(U3-VDD5)")
			(pinfunction "VDD5")
			(pintype "output")
		)
		(pad "29" smd roundrect
			(at 2.5 -1.25 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 208 "Net-(U3-MSEL2)")
			(pinfunction "MSEL2")
			(pintype "power_in")
		)
		(pad "30" smd roundrect
			(at 2.5 -1.75 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 56 "Net-(U3-VSEL)")
			(pinfunction "VSEL")
			(pintype "power_in")
		)
		(pad "31" smd roundrect
			(at 2.5 -2.25 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 60 "Net-(U3-ADRSEL)")
			(pinfunction "ADRSEL")
			(pintype "output")
		)
		(pad "32" smd roundrect
			(at 2.5 -2.75 90)
			(size 0.8 0.25)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 197 "Net-(U3-MSEL1)")
			(pinfunction "MSEL1")
			(pintype "power_out")
		)
		(pad "33" smd roundrect
			(at 1.75 -3.5 90)
			(size 0.25 0.8)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 13 "Net-(U3-VOSNS)")
			(pinfunction "VOSNS")
			(pintype "output")
		)
		(pad "34" smd roundrect
			(at 1.25 -3.5 90)
			(size 0.25 0.8)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 21 "Net-(U3-GOSNS)")
			(pinfunction "GOSNS")
			(pintype "output")
		)
		(pad "35" smd roundrect
			(at 0.75 -3.5 90)
			(size 0.25 0.8)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 203 "unconnected-(U3-VSHARE-Pad35)")
			(pinfunction "VSHARE")
			(pintype "input+no_connect")
		)
		(pad "36" smd roundrect
			(at 0.25 -3.5 90)
			(size 0.25 0.8)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 210 "unconnected-(U3-NC-Pad36)")
			(pinfunction "NC")
			(pintype "input+no_connect")
		)
		(pad "37" smd roundrect
			(at -0.25 -3.5 90)
			(size 0.25 0.8)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 209 "/Power/AGND")
			(pinfunction "AGND")
			(pintype "power_in")
		)
		(pad "38" smd roundrect
			(at -0.75 -3.5 90)
			(size 0.25 0.8)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 204 "unconnected-(U3-SYNC-Pad38)")
			(pinfunction "SYNC")
			(pintype "input+no_connect")
		)
		(pad "39" smd roundrect
			(at -1.25 -3.5 90)
			(size 0.25 0.8)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 205 "unconnected-(U3-BCX_CLK-Pad39)")
			(pinfunction "BCX_CLK")
			(pintype "input+no_connect")
		)
		(pad "40" smd roundrect
			(at -1.75 -3.5 90)
			(size 0.25 0.8)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 206 "unconnected-(U3-BCX_DAT-Pad40)")
			(pinfunction "BCX_DAT")
			(pintype "input+no_connect")
		)
		(pad "41" thru_hole circle
			(at -1.28 -1.4 90)
			(size 0.4 0.4)
			(drill 0.3)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "PAD")
			(pintype "power_in")
		)
		(pad "41" thru_hole circle
			(at -1.28 0 90)
			(size 0.4 0.4)
			(drill 0.3)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "PAD")
			(pintype "power_in")
		)
		(pad "41" thru_hole circle
			(at -1.28 1.4 90)
			(size 0.4 0.4)
			(drill 0.3)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "PAD")
			(pintype "power_in")
		)
		(pad "41" thru_hole circle
			(at 0 -2.4 90)
			(size 0.4 0.4)
			(drill 0.3)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "PAD")
			(pintype "power_in")
		)
		(pad "41" thru_hole circle
			(at 0 -1.4 90)
			(size 0.4 0.4)
			(drill 0.3)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "PAD")
			(pintype "power_in")
		)
		(pad "41" thru_hole circle
			(at 0 0 90)
			(size 0.4 0.4)
			(drill 0.3)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "PAD")
			(pintype "power_in")
		)
		(pad "41" smd rect
			(at 0 0 90)
			(size 3.3 5.3)
			(layers "F.Cu" "F.Mask")
			(net 1 "GND")
			(pinfunction "PAD")
			(pintype "power_in")
		)
		(pad "41" thru_hole circle
			(at 0 1.4 90)
			(size 0.4 0.4)
			(drill 0.3)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "PAD")
			(pintype "power_in")
		)
		(pad "41" thru_hole circle
			(at 0 2.4 90)
			(size 0.4 0.4)
			(drill 0.3)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "PAD")
			(pintype "power_in")
		)
		(pad "41" thru_hole circle
			(at 1.28 -1.4 90)
			(size 0.4 0.4)
			(drill 0.3)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "PAD")
			(pintype "power_in")
		)
		(pad "41" thru_hole circle
			(at 1.28 0 90)
			(size 0.4 0.4)
			(drill 0.3)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "PAD")
			(pintype "power_in")
		)
		(pad "41" thru_hole circle
			(at 1.28 1.4 90)
			(size 0.4 0.4)
			(drill 0.3)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "PAD")
			(pintype "power_in")
		)
		(model "${KIPRJMOD}/3d/RVF0040A.stp"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Fiducial:Fiducial_1mm_Mask2mm"
		(layer "F.Cu")
		(at 58.725 173.825)
		(descr "Circular Fiducial, 1mm bare copper, 2mm soldermask opening (Level A)")
		(tags "fiducial")
		(property "Reference" "FID7"
			(at 0 -2 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "Fiducial"
			(at 0 2 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Fiducial:Fiducial_1mm_Mask2mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Fiducial*")
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr smd exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "" smd circle
			(at 0 0)
			(size 1 1)
			(layers "F.Cu" "F.Mask")
			(solder_mask_margin 0.5)
			(clearance 0.5)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "F.Cu")
		(at 62.325 66.825)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C16"
			(at 2.375 0.025 0)
			(layer "F.SilkS")
		)
		(property "Value" "2.2nF"
			(at 0 1.16 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "490-8257-1-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "GRM155R61H222KA01D"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0)
			(size 0.56 0.62)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 55 "/VIN")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0)
			(size 0.56 0.62)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "bitaxe:SOT5X3-6_DRL_TEX"
		(layer "F.Cu")
		(at 82.7 54.4 180)
		(tags "TMP1075NDRLR ")
		(property "Reference" "U7"
			(at 0.1 -1.95 0)
			(unlocked yes)
			(layer "F.SilkS")
		)
		(property "Value" "TMP1075"
			(at -0.13 4.48 180)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:SOT5X3-6_DRL_TEX"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tmp1075.pdf"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "296-TMP1075NDRLRCT-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "TMP1075NDRLR"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "SOT5X3-6_DRL_TEX SOT5X3-6_DRL_TEX-M SOT5X3-6_DRL_TEX-L")
		(sheetname "Fan")
		(sheetfile "fan.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at -0.125 1.65 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(pad "1" smd rect
			(at -0.8001 -0.499999 180)
			(size 0.7112 0.2286)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 6 "/SCL")
			(pinfunction "SCL")
			(pintype "input")
		)
		(pad "2" smd rect
			(at -0.8001 0 180)
			(size 0.7112 0.2286)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "power_out")
		)
		(pad "3" smd rect
			(at -0.8001 0.499999 180)
			(size 0.7112 0.2286)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 196 "unconnected-(U7-ALERT-Pad3)")
			(pinfunction "ALERT")
			(pintype "output")
		)
		(pad "4" smd rect
			(at 0.8001 0.499999 180)
			(size 0.7112 0.2286)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 22 "/SDA")
			(pinfunction "A0")
			(pintype "input")
		)
		(pad "5" smd rect
			(at 0.8001 0 180)
			(size 0.7112 0.2286)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 5 "/3V3")
			(pinfunction "V+")
			(pintype "power_in")
		)
		(pad "6" smd rect
			(at 0.8001 -0.499999 180)
			(size 0.7112 0.2286)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 22 "/SDA")
			(pinfunction "SDA")
			(pintype "bidirectional")
		)
		(model "${KIPRJMOD}/3d/DRL0006A.stp"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "bitaxe:3.1mm_mounting"
		(locked yes)
		(layer "F.Cu")
		(at 122.5 153)
		(property "Reference" "H12"
			(at -0.055 -3.55 0)
			(unlocked yes)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "HeatsinkMountingHole"
			(at 0.01 5.23 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:3.1mm_mounting"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "MountingHole*")
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr through_hole exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0.085 3.48 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(pad "" thru_hole circle
			(at 0 0 180)
			(size 5 5)
			(drill 3.1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(zone_connect 0)
		)
	)
	(footprint "Capacitor_SMD:C_0805_2012Metric"
		(layer "F.Cu")
		(at 58.575 78.25 -90)
		(descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C22"
			(at 2.95 -0.125 90)
			(layer "F.SilkS")
		)
		(property "Value" "1nF"
			(at 0 1.68 90)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-1127-1-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "CC0805KRX7R9BB102"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 -0.025 90)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -0.95 0 270)
			(size 1 1.45)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 207 "/Power/SW")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.95 0 270)
			(size 1 1.45)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 14 "Net-(C22-Pad2)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "bitaxe:BM1366"
		(locked yes)
		(layer "F.Cu")
		(at 78 97 180)
		(property "Reference" "U13"
			(at 0.022 -4.25 0)
			(unlocked yes)
			(layer "F.SilkS")
		)
		(property "Value" "BM1366_mode1"
			(at 0.07 4.58 180)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:BM1366"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0.025 -4.225 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(pad "1" smd rect
			(at -2.916 -3.263 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 37 "Net-(U12-VDD1_1)")
			(pinfunction "VDD1_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "2" smd rect
			(at -2.916 -2.761 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 38 "Net-(U12-VDD2_1)")
			(pinfunction "VDD2_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "3" smd rect
			(at -2.916 -2.259 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 39 "Net-(U12-VDD3_1)")
			(pinfunction "VDD3_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "4" smd rect
			(at -2.916 -1.757 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "5" smd rect
			(at -2.916 -1.255 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 140 "Net-(U12-NRSTO)")
			(pinfunction "NRSTI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "6" smd rect
			(at -2.916 -0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 133 "Net-(U12-BO)")
			(pinfunction "BI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "7" smd rect
			(at -2.916 -0.251 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 141 "Net-(U12-RI)")
			(pinfunction "RO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "8" smd rect
			(at -2.916 0.251 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 138 "Net-(U12-CLKO)")
			(pinfunction "CLKI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "9" smd rect
			(at -2.916 0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 135 "Net-(U12-CO)")
			(pinfunction "CI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "10" smd rect
			(at -2.916 1.255 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 51 "Net-(U13-ADDR0)")
			(pinfunction "ADDR0")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "11" smd rect
			(at -2.916 1.757 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 52 "Net-(U13-ADDR1)")
			(pinfunction "ADDR1")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "12" smd rect
			(at -2.916 2.259 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "PLL_VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "13" smd rect
			(at -2.916 2.761 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 23 "/BM1366-1/0V8")
			(pinfunction "VDDIO_08_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "14" smd rect
			(at -2.916 3.263 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 24 "/BM1366-1/1V8")
			(pinfunction "VDDIO_18_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "15" smd rect
			(at 2.916 3.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 24 "/BM1366-1/1V8")
			(pinfunction "VDDIO_18_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "16" smd rect
			(at 2.916 2.75 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 23 "/BM1366-1/0V8")
			(pinfunction "VDDIO_08_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "17" smd rect
			(at 2.916 2.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "18" smd rect
			(at 2.916 1.75 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 72 "unconnected-(U13-PIN_MODE-Pad18)")
			(pinfunction "PIN_MODE")
			(pintype "input+no_connect")
			(thermal_bridge_angle 45)
		)
		(pad "19" smd rect
			(at 2.916 1.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 26 "Net-(U13-INV_CLKO)")
			(pinfunction "INV_CLKO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "20" smd rect
			(at 2.916 0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 109 "/BM1366-1/CO")
			(pinfunction "CO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "21" smd rect
			(at 2.916 0.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 29 "Net-(U13-CLKO)")
			(pinfunction "CLKO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "22" smd rect
			(at 2.916 -0.251 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 111 "/BM1366-1/RI")
			(pinfunction "RI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "23" smd rect
			(at 2.916 -0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 110 "/BM1366-1/BO")
			(pinfunction "BO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "24" smd rect
			(at 2.916 -1.255 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 108 "/BM1366-1/NRSTO")
			(pinfunction "NRSTO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "25" smd rect
			(at 2.916 -1.757 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "26" smd rect
			(at 2.916 -2.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 182 "Net-(U13-VDD3_1)")
			(pinfunction "VDD3_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "27" smd rect
			(at 2.916 -2.761 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 184 "Net-(U13-VDD2_1)")
			(pinfunction "VDD2_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "28" smd rect
			(at 2.916 -3.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 186 "Net-(U13-VDD1_1)")
			(pinfunction "VDD1_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "29" smd rect
			(at 0 -2.468 180)
			(size 4.277 1.81)
			(layers "F.Cu" "F.Mask")
			(net 94 "/BM1366-1/VDD1")
			(pinfunction "VDD")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "30" smd rect
			(at 0 1.108 180)
			(size 4.277 4.53)
			(layers "F.Cu" "F.Mask")
			(net 1 "GND")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(model "${KIPRJMOD}/3d/bm1366.STP"
			(offset
				(xyz 7 24.5 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "bitaxe:3.1mm_mounting"
		(locked yes)
		(layer "F.Cu")
		(at 122.5 97)
		(property "Reference" "H8"
			(at -0.055 -3.55 0)
			(unlocked yes)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "HeatsinkMountingHole"
			(at 0.01 5.23 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:3.1mm_mounting"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "MountingHole*")
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr through_hole exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0.085 3.48 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(pad "" thru_hole circle
			(at 0 0 180)
			(size 5 5)
			(drill 3.1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(zone_connect 0)
		)
	)
	(footprint "bitaxe:3.1mm_mounting"
		(locked yes)
		(layer "F.Cu")
		(at 62 97)
		(property "Reference" "H7"
			(at -0.055 -3.55 0)
			(unlocked yes)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "HeatsinkMountingHole"
			(at 0.01 5.23 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:3.1mm_mounting"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "MountingHole*")
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr through_hole exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0.085 3.48 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(pad "" thru_hole circle
			(at 0 0 180)
			(size 5 5)
			(drill 3.1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(zone_connect 0)
		)
	)
	(footprint "Connector_PinHeader_2.54mm:PinHeader_1x04_P2.54mm_Vertical"
		(layer "F.Cu")
		(at 125.8 55.2)
		(descr "Through hole straight pin header, 1x04, 2.54mm pitch, single row")
		(tags "Through hole pin header THT 1x04 2.54mm single row")
		(property "Reference" "J5"
			(at -0.2 9.88 0)
			(layer "F.SilkS")
		)
		(property "Value" "Conn_01x04"
			(at 0 9.95 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_1x04_P2.54mm_Vertical"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Connector*:*_1x??_*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr through_hole exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 3.81 90)
			(layer "F.Fab")
		)
		(pad "1" thru_hole rect
			(at 0 0)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "Pin_1")
			(pintype "passive")
		)
		(pad "2" thru_hole oval
			(at 0 2.54)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 5 "/3V3")
			(pinfunction "Pin_2")
			(pintype "passive")
		)
		(pad "3" thru_hole oval
			(at 0 5.08)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 6 "/SCL")
			(pinfunction "Pin_3")
			(pintype "passive")
		)
		(pad "4" thru_hole oval
			(at 0 7.62)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 22 "/SDA")
			(pinfunction "Pin_4")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Connector_PinHeader_2.54mm.3dshapes/PinHeader_1x04_P2.54mm_Vertical.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "bitaxe:ESP32-S3-WROOM-1U"
		(layer "F.Cu")
		(at 113.1 56.04)
		(descr "ESP32-S3-WROOM-1 is a powerful, generic Wi-Fi + Bluetooth LE MCU modules that have Dual core CPU , a rich set of peripherals, provides acceleration for neural network computing and signal processing workloads. They are an ideal choice for a wide variety of application scenarios related to AI + Internet of Things (AIoT), such as wake word detection and speech commands recognition , face detection and recognition, smart home, smart appliance, smart control panel, smart speaker etc.")
		(tags "esp32-s3")
		(property "Reference" "U6"
			(at 8.7 10.76 0)
			(layer "F.SilkS")
		)
		(property "Value" "ESP32-S3-WROOM-1"
			(at 0 12 0)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:ESP32-S3-WROOM-1U"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.espressif.com/sites/default/files/documentation/esp32-s3-wroom-1_wroom-1u_datasheet_en.pdf"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "1965-ESP32-S3-WROOM-1U-N16R8CT-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "ESP32-S3-WROOM-1U-N16R8"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" smd rect
			(at -8.75 -8.26)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "power_in")
		)
		(pad "2" smd rect
			(at -8.75 -6.99)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 5 "/3V3")
			(pinfunction "3V3")
			(pintype "power_in")
		)
		(pad "3" smd rect
			(at -8.75 -5.72)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 3 "/ESP32/EN")
			(pinfunction "EN")
			(pintype "input")
		)
		(pad "4" smd rect
			(at -8.75 -4.45)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 80 "Net-(U6-GPIO4{slash}TOUCH4{slash}ADC1_CH3)")
			(pinfunction "GPIO4/TOUCH4/ADC1_CH3")
			(pintype "bidirectional")
		)
		(pad "5" smd rect
			(at -8.75 -3.18)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 81 "Net-(U6-GPIO5{slash}TOUCH5{slash}ADC1_CH4)")
			(pinfunction "GPIO5/TOUCH5/ADC1_CH4")
			(pintype "bidirectional")
		)
		(pad "6" smd rect
			(at -8.75 -1.91)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 93 "Net-(U6-GPIO6{slash}TOUCH6{slash}ADC1_CH5)")
			(pinfunction "GPIO6/TOUCH6/ADC1_CH5")
			(pintype "bidirectional")
		)
		(pad "7" smd rect
			(at -8.75 -0.64)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 120 "Net-(U6-GPIO7{slash}TOUCH7{slash}ADC1_CH6)")
			(pinfunction "GPIO7/TOUCH7/ADC1_CH6")
			(pintype "bidirectional")
		)
		(pad "8" smd rect
			(at -8.75 0.63)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 18 "/ESP32/XIN32")
			(pinfunction "GPIO15/U0RTS/ADC2_CH4/XTAL_32K_P")
			(pintype "bidirectional")
		)
		(pad "9" smd rect
			(at -8.75 1.9)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 19 "/ESP32/XOUT32")
			(pinfunction "GPIO16/U0CTS/ADC2_CH5/XTAL_32K_NH5")
			(pintype "bidirectional")
		)
		(pad "10" smd rect
			(at -8.75 3.17)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 118 "/ESP32/ESP32_TX")
			(pinfunction "GPIO17/U1TXD/ADC2_CH6")
			(pintype "bidirectional")
		)
		(pad "11" smd rect
			(at -8.75 4.44)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 119 "/ESP32/ESP32_RX")
			(pinfunction "GPIO18/U1RXD/ADC2_CH7/CLK_OUT3")
			(pintype "bidirectional")
		)
		(pad "12" smd rect
			(at -8.75 5.71)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 121 "Net-(U6-GPIO8{slash}TOUCH8{slash}ADC1_CH7{slash}SUBSPICS1)")
			(pinfunction "GPIO8/TOUCH8/ADC1_CH7/SUBSPICS1")
			(pintype "bidirectional")
		)
		(pad "13" smd rect
			(at -8.75 6.98)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 124 "Net-(U6-GPIO19{slash}U1RTS{slash}ADC2_CH8{slash}CLK_OUT2{slash}USB_D-)")
			(pinfunction "GPIO19/U1RTS/ADC2_CH8/CLK_OUT2/USB_D-")
			(pintype "bidirectional")
		)
		(pad "14" smd rect
			(at -8.75 8.25)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 123 "Net-(U6-GPIO20{slash}U1CTS{slash}ADC2_CH9{slash}CLK_OUT1{slash}USB_D+)")
			(pinfunction "GPIO20/U1CTS/ADC2_CH9/CLK_OUT1/USB_D+")
			(pintype "bidirectional")
		)
		(pad "15" smd rect
			(at -6.985 9.5 90)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 5 "/3V3")
			(pinfunction "GPIO3/TOUCH3/ADC1_CH2*")
			(pintype "bidirectional")
		)
		(pad "16" smd rect
			(at -5.715 9.5 90)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 193 "unconnected-(U6-*GPIO46-Pad16)")
			(pinfunction "*GPIO46")
			(pintype "bidirectional")
		)
		(pad "17" smd rect
			(at -4.445 9.5 90)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 129 "Net-(U6-GPIO9{slash}TOUCH9{slash}ADC1_CH8{slash}FSPIHD{slash}SUBSPIHD)")
			(pinfunction "GPIO9/TOUCH9/ADC1_CH8/FSPIHD/SUBSPIHD")
			(pintype "bidirectional")
		)
		(pad "18" smd rect
			(at -3.175 9.5 90)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 171 "unconnected-(U6-GPIO10{slash}TOUCH10{slash}ADC1_CH9{slash}FSPICS0{slash}FSPIIO4{slash}SUBSPICS0-Pad18)")
			(pinfunction "GPIO10/TOUCH10/ADC1_CH9/FSPICS0/FSPIIO4/SUBSPICS0")
			(pintype "bidirectional")
		)
		(pad "19" smd rect
			(at -1.905 9.5 90)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 20 "/Power/PGOOD")
			(pinfunction "GPIO11/TOUCH11/ADC2_CH0/FSPID/FSPIIO5/SUBSPID")
			(pintype "bidirectional")
		)
		(pad "20" smd rect
			(at -0.635 9.5 90)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 172 "Net-(U6-GPIO12{slash}TOUCH12{slash}ADC2_CH1{slash}FSPICLK{slash}FSPIIO6{slash}SUBSPICLK)")
			(pinfunction "GPIO12/TOUCH12/ADC2_CH1/FSPICLK/FSPIIO6/SUBSPICLK")
			(pintype "bidirectional")
		)
		(pad "21" smd rect
			(at 0.635 9.5 90)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 219 "/SMB_ALRT")
			(pinfunction "GPIO13/TOUCH13/ADC2_CH2/FSPIQ/FSPIIO7/SUBSPIQ")
			(pintype "bidirectional")
		)
		(pad "22" smd rect
			(at 1.905 9.5 90)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 173 "Net-(U6-GPIO14{slash}TOUCH14{slash}ADC2_CH3{slash}FSPIWP{slash}FSPIDQS{slash}SUBSPIWP)")
			(pinfunction "GPIO14/TOUCH14/ADC2_CH3/FSPIWP/FSPIDQS/SUBSPIWP")
			(pintype "bidirectional")
		)
		(pad "23" smd rect
			(at 3.175 9.5 90)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 194 "unconnected-(U6-GPIO21-Pad23)")
			(pinfunction "GPIO21")
			(pintype "bidirectional")
		)
		(pad "24" smd rect
			(at 4.445 9.5 90)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 22 "/SDA")
			(pinfunction "GPIO47/SPICLK_P/SUBSPICLK_P_DIFF")
			(pintype "bidirectional")
		)
		(pad "25" smd rect
			(at 5.715 9.5 90)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 6 "/SCL")
			(pinfunction "GPIO48/SPICLK_N/SUBSPICLK_N_DIFF")
			(pintype "bidirectional")
		)
		(pad "26" smd rect
			(at 6.985 9.5 90)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 195 "unconnected-(U6-*GPIO45-Pad26)")
			(pinfunction "*GPIO45")
			(pintype "bidirectional")
		)
		(pad "27" smd rect
			(at 8.75 8.25 180)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 17 "/ESP32/IO0")
			(pinfunction "GPIO0/BOOT*")
			(pintype "bidirectional")
		)
		(pad "28" smd rect
			(at 8.75 6.98 180)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 176 "Net-(U6-SPIIO6{slash}GPIO35{slash}FSPID{slash}SUBSPID)")
			(pinfunction "SPIIO6/GPIO35/FSPID/SUBSPID")
			(pintype "bidirectional")
		)
		(pad "29" smd rect
			(at 8.75 5.71 180)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 177 "Net-(U6-SPIIO7{slash}GPIO36{slash}FSPICLK{slash}SUBSPICLK)")
			(pinfunction "SPIIO7/GPIO36/FSPICLK/SUBSPICLK")
			(pintype "bidirectional")
		)
		(pad "30" smd rect
			(at 8.75 4.44 180)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 178 "Net-(U6-SPIDQS{slash}GPIO37{slash}FSPIQ{slash}SUBSPIQ)")
			(pinfunction "SPIDQS/GPIO37/FSPIQ/SUBSPIQ")
			(pintype "bidirectional")
		)
		(pad "31" smd rect
			(at 8.75 3.17 180)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 179 "Net-(U6-GPIO38{slash}FSPIWP{slash}SUBSPIWP)")
			(pinfunction "GPIO38/FSPIWP/SUBSPIWP")
			(pintype "bidirectional")
		)
		(pad "32" smd rect
			(at 8.75 1.9 180)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 77 "Net-(J6-Pin_3)")
			(pinfunction "MTCK/GPIO39/CLK_OUT3/SUBSPICS1")
			(pintype "bidirectional")
		)
		(pad "33" smd rect
			(at 8.75 0.63 180)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 61 "Net-(J6-Pin_4)")
			(pinfunction "MTDO/GPIO40/CLK_OUT2")
			(pintype "bidirectional")
		)
		(pad "34" smd rect
			(at 8.75 -0.64 180)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 78 "Net-(J6-Pin_5)")
			(pinfunction "MTDI/GPIO41/CLK_OUT1")
			(pintype "bidirectional")
		)
		(pad "35" smd rect
			(at 8.75 -1.91 180)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 62 "Net-(J6-Pin_6)")
			(pinfunction "MTMS/GPIO42")
			(pintype "bidirectional")
		)
		(pad "36" smd rect
			(at 8.75 -3.18 180)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 16 "/ESP32/P_RX")
			(pinfunction "U0RXD/GPIO44/CLK_OUT2")
			(pintype "bidirectional")
		)
		(pad "37" smd rect
			(at 8.75 -4.45 180)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 15 "/ESP32/P_TX")
			(pinfunction "U0TXD/GPIO43/CLK_OUT1")
			(pintype "bidirectional")
		)
		(pad "38" smd rect
			(at 8.75 -5.72 180)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 199 "/ESP32/VDD_SAMPLE")
			(pinfunction "GPIO2/TOUCH2/ADC1_CH1")
			(pintype "bidirectional")
		)
		(pad "39" smd rect
			(at 8.75 -6.99 180)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 117 "/ESP32/ASIC_RST")
			(pinfunction "GPIO1/TOUCH1/ADC1_CH0")
			(pintype "bidirectional")
		)
		(pad "40" smd rect
			(at 8.75 -8.26 180)
			(size 1.5 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "passive")
		)
		(pad "41" smd rect
			(at -2.9 -1.94 180)
			(size 0.9 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "passive")
		)
		(pad "41" smd rect
			(at -2.9 -0.54 180)
			(size 0.9 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "passive")
		)
		(pad "41" smd rect
			(at -2.9 0.86 180)
			(size 0.9 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "passive")
		)
		(pad "41" smd rect
			(at -1.5 -1.94 180)
			(size 0.9 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "passive")
		)
		(pad "41" smd rect
			(at -1.5 -0.54 180)
			(size 0.9 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "passive")
		)
		(pad "41" smd rect
			(at -1.5 0.86 180)
			(size 0.9 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "passive")
		)
		(pad "41" smd rect
			(at -0.1 -1.94 180)
			(size 0.9 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "passive")
		)
		(pad "41" smd rect
			(at -0.1 -0.54 180)
			(size 0.9 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "passive")
		)
		(pad "41" smd rect
			(at -0.1 0.86 180)
			(size 0.9 0.9)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "passive")
		)
		(model "${KIPRJMOD}/3d/ESP32-S3-WROOM-1U.STEP"
			(offset
				(xyz -9 -9.3 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_1210_3225Metric"
		(layer "F.Cu")
		(at 63.7 60.675)
		(descr "Capacitor SMD 1210 (3225 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C9"
			(at 2.675 -1.95 0)
			(layer "F.SilkS")
		)
		(property "Value" "22uF"
			(at 0 2.3 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_1210_3225Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "490-3889-1-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "GRM32ER61E226KE15L"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -1.475 0)
			(size 1.15 2.7)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.2173913043)
			(net 55 "/VIN")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 1.475 0)
			(size 1.15 2.7)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.2173913043)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_1210_3225Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Fiducial:Fiducial_1mm_Mask2mm"
		(layer "F.Cu")
		(at 125.984 173.228)
		(descr "Circular Fiducial, 1mm bare copper, 2mm soldermask opening (Level A)")
		(tags "fiducial")
		(property "Reference" "FID5"
			(at 0 -2 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "Fiducial"
			(at 0 2 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Fiducial:Fiducial_1mm_Mask2mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Fiducial*")
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr smd exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "" smd circle
			(at 0 0)
			(size 1 1)
			(layers "F.Cu" "F.Mask")
			(solder_mask_margin 0.5)
			(clearance 0.5)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "F.Cu")
		(at 90.3 53.92 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C32"
			(at 2.23 -0.15 90)
			(layer "F.SilkS")
		)
		(property "Value" "1uF"
			(at 0 1.16 90)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 3 "/ESP32/EN")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "MountingHole:MountingHole_3mm_Pad_Via"
		(layer "F.Cu")
		(at 53.5 110.75)
		(descr "Mounting Hole 3mm")
		(tags "mounting hole 3mm")
		(property "Reference" "H5"
			(at 0 -4 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "MountingHole"
			(at 0 4 0)
			(layer "F.Fab")
		)
		(property "Footprint" "MountingHole:MountingHole_3mm_Pad_Via"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "MountingHole*")
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" thru_hole circle
			(at -2.25 0)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at -1.59099 -1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at -1.59099 1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 0 -2.25)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 0 0)
			(size 6 6)
			(drill 3)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 0 2.25)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 1.59099 -1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 1.59099 1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 2.25 0)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
	)
	(footprint "Connector_USB:USB_C_Receptacle_GCT_USB4105-xx-A_16P_TopMnt_Horizontal"
		(layer "F.Cu")
		(at 96.67 49.695 180)
		(descr "USB 2.0 Type C Receptacle, GCT, 16P, top mounted, horizontal, 5A: https://gct.co/files/drawings/usb4105.pdf")
		(tags "USB C Type-C Receptacle SMD USB 2.0 16P 16C USB4105-15-A USB4105-15-A-060 USB4105-15-A-120 USB4105-GF-A USB4105-GF-A-060 USB4105-GF-A-120")
		(property "Reference" "J7"
			(at -0.03 -5.505 0)
			(unlocked yes)
			(layer "F.SilkS")
		)
		(property "Value" "USB_C_Receptacle_USB2.0"
			(at 0 5 180)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" "Connector_USB:USB_C_Receptacle_GCT_USB4105-xx-A_16P_TopMnt_Horizontal"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://gct.co/connector/usb4105"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "2073-USB4105-GF-ACT-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "USB4105-GF-A"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "USB*C*Receptacle*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr through_hole)
		(fp_text user "PCB Edge"
			(at 0 3.1 180)
			(unlocked yes)
			(layer "Dwgs.User")
		)
		(fp_text user "${REFERENCE}"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
		)
		(pad "" np_thru_hole circle
			(at -2.89 -2.605 180)
			(size 0.65 0.65)
			(drill 0.65)
			(layers "F&B.Cu" "*.Mask")
			(clearance 0.01)
		)
		(pad "" np_thru_hole circle
			(at 2.89 -2.605 180)
			(size 0.65 0.65)
			(drill 0.65)
			(layers "F&B.Cu" "*.Mask")
			(clearance 0.1)
		)
		(pad "A1" smd rect
			(at -3.2 -3.725 180)
			(size 0.6 1.06)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "passive")
		)
		(pad "A4" smd rect
			(at -2.4 -3.725 180)
			(size 0.6 1.06)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 180 "Net-(J7-VBUS-PadA4)")
			(pinfunction "VBUS")
			(pintype "passive")
		)
		(pad "A5" smd rect
			(at -1.25 -3.68 180)
			(size 0.3 1.15)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 122 "Net-(J7-CC1)")
			(pinfunction "CC1")
			(pintype "bidirectional")
		)
		(pad "A6" smd rect
			(at -0.25 -3.68 180)
			(size 0.3 1.15)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 123 "Net-(U6-GPIO20{slash}U1CTS{slash}ADC2_CH9{slash}CLK_OUT1{slash}USB_D+)")
			(pinfunction "D+")
			(pintype "bidirectional")
		)
		(pad "A7" smd rect
			(at 0.25 -3.68 180)
			(size 0.3 1.15)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 124 "Net-(U6-GPIO19{slash}U1RTS{slash}ADC2_CH8{slash}CLK_OUT2{slash}USB_D-)")
			(pinfunction "D-")
			(pintype "bidirectional")
		)
		(pad "A8" smd rect
			(at 1.25 -3.68 180)
			(size 0.3 1.15)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 125 "unconnected-(J7-SBU1-PadA8)")
			(pinfunction "SBU1")
			(pintype "bidirectional+no_connect")
		)
		(pad "A9" smd rect
			(at 2.4 -3.725 180)
			(size 0.6 1.06)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 180 "Net-(J7-VBUS-PadA4)")
			(pinfunction "VBUS")
			(pintype "passive")
		)
		(pad "A12" smd rect
			(at 3.2 -3.725 180)
			(size 0.6 1.06)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "passive")
		)
		(pad "B1" smd rect
			(at 3.2 -3.725 180)
			(size 0.6 1.06)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "passive")
		)
		(pad "B4" smd rect
			(at 2.4 -3.725 180)
			(size 0.6 1.06)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 180 "Net-(J7-VBUS-PadA4)")
			(pinfunction "VBUS")
			(pintype "passive")
		)
		(pad "B5" smd rect
			(at 1.75 -3.68 180)
			(size 0.3 1.15)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 126 "Net-(J7-CC2)")
			(pinfunction "CC2")
			(pintype "bidirectional")
		)
		(pad "B6" smd rect
			(at 0.75 -3.68 180)
			(size 0.3 1.15)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 123 "Net-(U6-GPIO20{slash}U1CTS{slash}ADC2_CH9{slash}CLK_OUT1{slash}USB_D+)")
			(pinfunction "D+")
			(pintype "bidirectional")
		)
		(pad "B7" smd rect
			(at -0.75 -3.68 180)
			(size 0.3 1.15)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 124 "Net-(U6-GPIO19{slash}U1RTS{slash}ADC2_CH8{slash}CLK_OUT2{slash}USB_D-)")
			(pinfunction "D-")
			(pintype "bidirectional")
		)
		(pad "B8" smd rect
			(at -1.75 -3.68 180)
			(size 0.3 1.15)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 128 "unconnected-(J7-SBU2-PadB8)")
			(pinfunction "SBU2")
			(pintype "bidirectional+no_connect")
		)
		(pad "B9" smd rect
			(at -2.4 -3.725 180)
			(size 0.6 1.06)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 180 "Net-(J7-VBUS-PadA4)")
			(pinfunction "VBUS")
			(pintype "passive")
		)
		(pad "B12" smd rect
			(at -3.2 -3.725 180)
			(size 0.6 1.06)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "passive")
		)
		(pad "S1" thru_hole oval
			(at -4.32 -3.105 180)
			(size 1 2.1)
			(drill oval 0.6 1.7)
			(layers "*.Cu" "*.Mask" "F.Paste")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "SHIELD")
			(pintype "passive")
		)
		(pad "S1" thru_hole oval
			(at -4.32 1.075 180)
			(size 1 1.8)
			(drill oval 0.6 1.4)
			(layers "*.Cu" "*.Mask" "F.Paste")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "SHIELD")
			(pintype "passive")
		)
		(pad "S1" thru_hole oval
			(at 4.32 -3.105 180)
			(size 1 2.1)
			(drill oval 0.6 1.7)
			(layers "*.Cu" "*.Mask" "F.Paste")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "SHIELD")
			(pintype "passive")
		)
		(pad "S1" thru_hole oval
			(at 4.32 1.075 180)
			(size 1 1.8)
			(drill oval 0.6 1.4)
			(layers "*.Cu" "*.Mask" "F.Paste")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "SHIELD")
			(pintype "passive")
		)
		(model "${KICAD7_3DMODEL_DIR}/Connector_USB.3dshapes/USB_C_Receptacle_GCT_USB4105-xx-A_16P_TopMnt_Horizontal.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "F.Cu")
		(at 103.6 67.225)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R17"
			(at -2.95 0.15 0)
			(layer "F.SilkS")
		)
		(property "Value" "10k"
			(at 0 1.17 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0)
			(size 0.54 0.64)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 20 "/Power/PGOOD")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0)
			(size 0.54 0.64)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 5 "/3V3")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_1206_3216Metric"
		(layer "F.Cu")
		(at 61.85 78.75)
		(descr "Resistor SMD 1206 (3216 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R14"
			(at 0.025 2.7 90)
			(layer "F.SilkS")
		)
		(property "Value" "1R"
			(at 0 1.82 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_1206_3216Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "CSR1206FT1R00CT-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "CSR1206FT1R00"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -1.4625 0)
			(size 1.125 1.75)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.2222222222)
			(net 14 "Net-(C22-Pad2)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 1.4625 0)
			(size 1.125 1.75)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.2222222222)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_1206_3216Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "bitaxe:TL3340-switch"
		(layer "F.Cu")
		(at 87.35 47.7675 180)
		(property "Reference" "SW1"
			(at 0.03 -2.71 180)
			(unlocked yes)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "SWITCH-SPST"
			(at -0.1 3.9 180)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:TL3340-switch"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://sten-eswitch-13110800-production.s3.amazonaws.com/system/asset/product_line/data_sheet/164/TL3340.pdf"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "EG4627CT-ND"
			(at 0 0 180)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "TL3340AF160QG"
			(at 0 0 180)
			(layer "F.Fab")
			(hide yes)
		)
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0.2 -2.9 180)
			(unlocked yes)
			(layer "F.Fab")
		)
		(pad "" np_thru_hole circle
			(at -2.125 0 180)
			(size 0.9 0.9)
			(drill 0.9)
			(layers "F&B.Cu")
			(solder_mask_margin 0.05)
			(clearance -0.05)
			(zone_connect 0)
		)
		(pad "" smd roundrect
			(at -1.85 1.1 180)
			(size 1.3 0.8)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(clearance 0.05)
			(zone_connect 0)
			(thermal_bridge_angle 45)
		)
		(pad "" smd roundrect
			(at 1.85 1.1 180)
			(size 1.3 0.8)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(clearance 0.05)
			(zone_connect 0)
			(thermal_bridge_angle 45)
		)
		(pad "" np_thru_hole circle
			(at 2.125 0 180)
			(size 0.9 0.9)
			(drill 0.9)
			(layers "F&B.Cu")
			(solder_mask_margin 0.05)
			(clearance -0.05)
			(zone_connect 0)
		)
		(pad "1" smd oval
			(at -1.23 -1.1 180)
			(size 0.74 1.75)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pintype "unspecified")
			(clearance 0.05)
			(zone_connect 0)
			(thermal_bridge_angle 45)
		)
		(pad "1" smd oval
			(at 1.23 -1.1 180)
			(size 0.74 1.75)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pintype "unspecified")
			(clearance 0.05)
			(zone_connect 0)
			(thermal_bridge_angle 45)
		)
		(pad "2" smd roundrect
			(at 0 -1 180)
			(size 0.6 1.8)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 3 "/ESP32/EN")
			(pintype "unspecified")
			(zone_connect 0)
			(thermal_bridge_angle 45)
		)
		(model "${KIPRJMOD}/3d/TL3340AF160QG.step"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 90 180 180)
			)
		)
	)
	(footprint "MountingHole:MountingHole_3mm_Pad_Via"
		(layer "F.Cu")
		(at 131 49.5)
		(descr "Mounting Hole 3mm")
		(tags "mounting hole 3mm")
		(property "Reference" "H2"
			(at 0 -4 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "MountingHole"
			(at 0 4 0)
			(layer "F.Fab")
		)
		(property "Footprint" "MountingHole:MountingHole_3mm_Pad_Via"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "MountingHole*Pad*")
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr exclude_from_pos_files)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" thru_hole circle
			(at -2.25 0)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "1")
			(pintype "input")
		)
		(pad "1" thru_hole circle
			(at -1.59099 -1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "1")
			(pintype "input")
		)
		(pad "1" thru_hole circle
			(at -1.59099 1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "1")
			(pintype "input")
		)
		(pad "1" thru_hole circle
			(at 0 -2.25)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "1")
			(pintype "input")
		)
		(pad "1" thru_hole circle
			(at 0 0)
			(size 6 6)
			(drill 3.1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "1")
			(pintype "input")
		)
		(pad "1" thru_hole circle
			(at 0 2.25)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "1")
			(pintype "input")
		)
		(pad "1" thru_hole circle
			(at 1.59099 -1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "1")
			(pintype "input")
		)
		(pad "1" thru_hole circle
			(at 1.59099 1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "1")
			(pintype "input")
		)
		(pad "1" thru_hole circle
			(at 2.25 0)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "1")
			(pintype "input")
		)
	)
	(footprint "MountingHole:MountingHole_3mm_Pad_Via"
		(layer "F.Cu")
		(at 53.5 172)
		(descr "Mounting Hole 3mm")
		(tags "mounting hole 3mm")
		(property "Reference" "H3"
			(at 0 -4 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "MountingHole"
			(at 0 4 0)
			(layer "F.Fab")
		)
		(property "Footprint" "MountingHole:MountingHole_3mm_Pad_Via"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "MountingHole*")
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr exclude_from_pos_files)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" thru_hole circle
			(at -2.25 0)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at -1.59099 -1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at -1.59099 1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 0 -2.25)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 0 0)
			(size 6 6)
			(drill 3)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 0 2.25)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 1.59099 -1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 1.59099 1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 2.25 0)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "F.Cu")
		(at 53.025 70.275 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C24"
			(at 0.025 1.025 -90)
			(layer "F.SilkS")
		)
		(property "Value" "100pF"
			(at 0 1.16 90)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "732-7431-1-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "885012005013"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 13 "Net-(U3-VOSNS)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 21 "Net-(U3-GOSNS)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "bitaxe:3.1mm_mounting"
		(locked yes)
		(layer "F.Cu")
		(at 62 153)
		(property "Reference" "H11"
			(at -0.055 -3.55 0)
			(unlocked yes)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "HeatsinkMountingHole"
			(at 0.01 5.23 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:3.1mm_mounting"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "MountingHole*")
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr through_hole exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0.085 3.48 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(pad "" thru_hole circle
			(at 0 0 180)
			(size 5 5)
			(drill 3.1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(zone_connect 0)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "F.Cu")
		(at 95.6 69.6 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C38"
			(at 0.05 -1.875 180)
			(layer "F.SilkS")
		)
		(property "Value" "311-3342-1-ND"
			(at 0 1.16 90)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Fan")
		(sheetfile "fan.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 5 "/3V3")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "MountingHole:MountingHole_3mm_Pad_Via"
		(layer "F.Cu")
		(at 131 110.75)
		(descr "Mounting Hole 3mm")
		(tags "mounting hole 3mm")
		(property "Reference" "H6"
			(at 0 -4 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "MountingHole"
			(at 0 4 0)
			(layer "F.Fab")
		)
		(property "Footprint" "MountingHole:MountingHole_3mm_Pad_Via"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "MountingHole*")
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" thru_hole circle
			(at -2.25 0)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at -1.59099 -1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at -1.59099 1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 0 -2.25)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 0 0)
			(size 6 6)
			(drill 3)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 0 2.25)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 1.59099 -1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 1.59099 1.59099)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
		(pad "1" thru_hole circle
			(at 2.25 0)
			(size 0.8 0.8)
			(drill 0.5)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
		)
	)
	(footprint "Capacitor_SMD:C_0805_2012Metric"
		(layer "F.Cu")
		(at 63.075 65.275)
		(descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C14"
			(at -0.05 -1.475 180)
			(layer "F.SilkS")
		)
		(property "Value" "1uF"
			(at 0 1.68 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-1291-1-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "TMK212BJ105KG-T"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -0.95 0)
			(size 1 1.45)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 55 "/VIN")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.95 0)
			(size 1 1.45)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "bitaxe:SOT5X3-6_DRL_TEX"
		(layer "F.Cu")
		(at 91.6008 173.2 180)
		(tags "TMP1075NDRLR ")
		(property "Reference" "U8"
			(at 0.0008 1.675 0)
			(unlocked yes)
			(layer "F.SilkS")
		)
		(property "Value" "TMP1075"
			(at -0.13 4.48 180)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:SOT5X3-6_DRL_TEX"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tmp1075.pdf"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "296-TMP1075NDRLRCT-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "TMP1075NDRLR"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "SOT5X3-6_DRL_TEX SOT5X3-6_DRL_TEX-M SOT5X3-6_DRL_TEX-L")
		(sheetname "Fan")
		(sheetfile "fan.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at -0.17 3.22 180)
			(unlocked yes)
			(layer "F.Fab")
		)
		(pad "1" smd rect
			(at -0.8001 -0.499999 180)
			(size 0.7112 0.2286)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 6 "/SCL")
			(pinfunction "SCL")
			(pintype "input")
		)
		(pad "2" smd rect
			(at -0.8001 0 180)
			(size 0.7112 0.2286)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "power_out")
		)
		(pad "3" smd rect
			(at -0.8001 0.499999 180)
			(size 0.7112 0.2286)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 211 "unconnected-(U8-ALERT-Pad3)")
			(pinfunction "ALERT")
			(pintype "output")
		)
		(pad "4" smd rect
			(at 0.8001 0.499999 180)
			(size 0.7112 0.2286)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 6 "/SCL")
			(pinfunction "A0")
			(pintype "input")
		)
		(pad "5" smd rect
			(at 0.8001 0 180)
			(size 0.7112 0.2286)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 5 "/3V3")
			(pinfunction "V+")
			(pintype "power_in")
		)
		(pad "6" smd rect
			(at 0.8001 -0.499999 180)
			(size 0.7112 0.2286)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 22 "/SDA")
			(pinfunction "SDA")
			(pintype "bidirectional")
		)
		(model "${KIPRJMOD}/3d/DRL0006A.stp"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "kibuzzard-65978662"
		(layer "F.Cu")
		(at 66.575 47.125 180)
		(descr "Generated with KiBuzzard")
		(tags "kb_params=eyJBbGlnbm1lbnRDaG9pY2UiOiAiQ2VudGVyIiwgIkNhcExlZnRDaG9pY2UiOiAiWyIsICJDYXBSaWdodENob2ljZSI6ICJdIiwgIkZvbnRDb21ib0JveCI6ICJCZXJrZWxleU1vbm8tQm9sZCIsICJIZWlnaHRDdHJsIjogIjEuMiIsICJMYXllckNvbWJvQm94IjogIkYuU2lsa1MiLCAiTXVsdGlMaW5lVGV4dCI6ICItICAxMlZEQyAgKyIsICJQYWRkaW5nQm90dG9tQ3RybCI6ICI1IiwgIlBhZGRpbmdMZWZ0Q3RybCI6ICI1IiwgIlBhZGRpbmdSaWdodEN0cmwiOiAiNSIsICJQYWRkaW5nVG9wQ3RybCI6ICI1IiwgIldpZHRoQ3RybCI6ICIifQ==")
		(property "Reference" "kibuzzard-65978662"
			(at 0 -4.110672 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Value" "G***"
			(at 0 4.110672 0)
			(layer "F.SilkS")
			(hide yes)
		)
		(property "Footprint" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(attr board_only exclude_from_pos_files exclude_from_bom)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "F.Cu")
		(at 93.3 56.75)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP32"
			(at 0.1 1.55 0)
			(layer "F.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 1.55 0)
			(layer "F.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 -1.45 0)
			(layer "F.Fab")
		)
		(pad "1" smd circle
			(at 0 0)
			(size 1 1)
			(layers "F.Cu" "F.Mask")
			(net 180 "Net-(J7-VBUS-PadA4)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "F.Cu")
		(at 88.025 66.125 180)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R24"
			(at 2.4 -0.075 0)
			(layer "F.SilkS")
		)
		(property "Value" "5.6k"
			(at 0 1.17 0)
			(layer "F.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "13-RC0402FR-135K6LCT-ND"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-135K6L"
			(at 0 0 0)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Fan")
		(sheetfile "fan.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0.27 0)
			(layer "F.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 180)
			(size 0.54 0.64)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 40 "/Fan/FAN1_TACH")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 180)
			(size 0.54 0.64)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(roundrect_rratio 0.25)
			(net 5 "/3V3")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "bitaxe:BM1366"
		(locked yes)
		(layer "F.Cu")
		(at 108 97 180)
		(property "Reference" "U12"
			(at -0.204 -4.25 0)
			(unlocked yes)
			(layer "F.SilkS")
		)
		(property "Value" "BM1366_mode1"
			(at 0.07 4.58 180)
			(unlocked yes)
			(layer "F.Fab")
		)
		(property "Footprint" "bitaxe:BM1366"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at -0.225 -4.25 0)
			(unlocked yes)
			(layer "F.Fab")
		)
		(pad "1" smd rect
			(at -2.916 -3.263 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 36 "Net-(U12-VDD1_0)")
			(pinfunction "VDD1_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "2" smd rect
			(at -2.916 -2.761 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 30 "Net-(U12-VDD2_0)")
			(pinfunction "VDD2_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "3" smd rect
			(at -2.916 -2.259 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 25 "Net-(U12-VDD3_0)")
			(pinfunction "VDD3_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "4" smd rect
			(at -2.916 -1.757 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "5" smd rect
			(at -2.916 -1.255 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 31 "/NRSTI")
			(pinfunction "NRSTI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "6" smd rect
			(at -2.916 -0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 54 "/BM1366-1/BI1")
			(pinfunction "BI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "7" smd rect
			(at -2.916 -0.251 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 32 "/RO")
			(pinfunction "RO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "8" smd rect
			(at -2.916 0.251 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 99 "/BM1366-1/CLKI1")
			(pinfunction "CLKI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "9" smd rect
			(at -2.916 0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 33 "/CI")
			(pinfunction "CI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "10" smd rect
			(at -2.916 1.255 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 181 "Net-(U12-ADDR0)")
			(pinfunction "ADDR0")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "11" smd rect
			(at -2.916 1.757 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 183 "Net-(U12-ADDR1)")
			(pinfunction "ADDR1")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "12" smd rect
			(at -2.916 2.259 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "PLL_VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "13" smd rect
			(at -2.916 2.761 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 23 "/BM1366-1/0V8")
			(pinfunction "VDDIO_08_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "14" smd rect
			(at -2.916 3.263 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 24 "/BM1366-1/1V8")
			(pinfunction "VDDIO_18_0")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "15" smd rect
			(at 2.916 3.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 24 "/BM1366-1/1V8")
			(pinfunction "VDDIO_18_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "16" smd rect
			(at 2.916 2.75 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 23 "/BM1366-1/0V8")
			(pinfunction "VDDIO_08_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "17" smd rect
			(at 2.916 2.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "18" smd rect
			(at 2.916 1.75 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 214 "unconnected-(U12-PIN_MODE-Pad18)")
			(pinfunction "PIN_MODE")
			(pintype "input+no_connect")
			(thermal_bridge_angle 45)
		)
		(pad "19" smd rect
			(at 2.916 1.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 137 "Net-(U12-INV_CLKO)")
			(pinfunction "INV_CLKO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "20" smd rect
			(at 2.916 0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 135 "Net-(U12-CO)")
			(pinfunction "CO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "21" smd rect
			(at 2.916 0.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 138 "Net-(U12-CLKO)")
			(pinfunction "CLKO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "22" smd rect
			(at 2.916 -0.251 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 141 "Net-(U12-RI)")
			(pinfunction "RI")
			(pintype "input")
			(thermal_bridge_angle 45)
		)
		(pad "23" smd rect
			(at 2.916 -0.753 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 133 "Net-(U12-BO)")
			(pinfunction "BO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "24" smd rect
			(at 2.916 -1.255 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 140 "Net-(U12-NRSTO)")
			(pinfunction "NRSTO")
			(pintype "output")
			(thermal_bridge_angle 45)
		)
		(pad "25" smd rect
			(at 2.916 -1.757 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 1 "GND")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "26" smd rect
			(at 2.916 -2.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 39 "Net-(U12-VDD3_1)")
			(pinfunction "VDD3_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "27" smd rect
			(at 2.916 -2.761 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 38 "Net-(U12-VDD2_1)")
			(pinfunction "VDD2_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "28" smd rect
			(at 2.916 -3.25 180)
			(size 0.792 0.221)
			(layers "F.Cu" "F.Paste" "F.Mask")
			(net 37 "Net-(U12-VDD1_1)")
			(pinfunction "VDD1_1")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "29" smd rect
			(at 0 -2.468 180)
			(size 4.277 1.81)
			(layers "F.Cu" "F.Mask")
			(net 94 "/BM1366-1/VDD1")
			(pinfunction "VDD")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(pad "30" smd rect
			(at 0 1.108 180)
			(size 4.277 4.53)
			(layers "F.Cu" "F.Mask")
			(net 1 "GND")
			(pinfunction "VSS")
			(pintype "power_in")
			(thermal_bridge_angle 45)
		)
		(model "${KIPRJMOD}/3d/bm1366.STP"
			(offset
				(xyz 7 24.5 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 108.6 76.15 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C12"
			(at -2.25 0.025 90)
			(layer "B.SilkS")
		)
		(property "Value" "0.1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 200 "Net-(U1-SW)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 201 "Net-(U1-CB)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 69.325 95.475 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP40"
			(at 2.55 0 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 29 "Net-(U13-CLKO)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 98.825 102.97 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C57"
			(at 0 -3.25 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 37 "Net-(U12-VDD1_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 38 "Net-(U12-VDD2_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 97.8375 89.375 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C50"
			(at 1.6 0.4 0)
			(layer "B.SilkS")
		)
		(property "Value" "0.1uF"
			(at 1.651 -1.651 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 105.45 52.35 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP12"
			(at -2.8 -0.1 180)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 180)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 180)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 80 "Net-(U6-GPIO4{slash}TOUCH4{slash}ADC1_CH3)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 72.3 118.3 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C113"
			(at -4 0.1 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 -90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 -90)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 -90)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 -90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 27 "/BM1366-2/0V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 81.025 58.475 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C44"
			(at 2.525 0.125 0)
			(layer "B.SilkS")
		)
		(property "Value" "311-3342-1-ND"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Fan")
		(sheetfile "fan.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 55 "/VIN")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 69.59 130.07 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C107"
			(at -1.75 -0.6 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 63 "Net-(U20-VDD3_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 119.4 147.6 90)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP51"
			(at -2.794 0 90)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 90)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 90)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 90)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 66 "Net-(U22-ADDR0)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 97.95 74.425 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R20"
			(at -2.8 0.05 90)
			(layer "B.SilkS")
		)
		(property "Value" "22.1k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-22.1KLRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-0722K1L"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 199 "/ESP32/VDD_SAMPLE")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0805_2012Metric"
		(layer "B.Cu")
		(at 108.75 80.5 180)
		(descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C18"
			(at -3.25 0.2 0)
			(layer "B.SilkS")
		)
		(property "Value" "10uF"
			(at 0 -1.68 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "490-18664-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "GRM21BR61H106ME43L"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.95 0 180)
			(size 1 1.45)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.95 0 180)
			(size 1 1.45)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 58.025 108.7 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R47"
			(at 2.45 -0.1 90)
			(layer "B.SilkS")
		)
		(property "Value" "1k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 58 "Net-(U15C--)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_Tantalum_SMD:CP_EIA-7343-31_Kemet-D_Pad2.25x2.55mm_HandSolder"
		(layer "B.Cu")
		(at 93 168.3)
		(descr "Tantalum Capacitor SMD Kemet-D (7343-31 Metric), IPC_7351 nominal, (Body size from: http://www.kemet.com/Lists/ProductCatalog/Attachments/253/KEM_TC101_STD.pdf), generated with kicad-footprint-generator")
		(tags "capacitor tantalum")
		(property "Reference" "C140"
			(at 0 3.3 0)
			(layer "B.SilkS")
		)
		(property "Value" "330uF"
			(at 0 -3.1 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_Tantalum_SMD:CP_EIA-7343-31_Kemet-D_Pad2.25x2.55mm_HandSolder"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "718-1028-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "293D337X9010E2TE3"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "CP_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -3.2 0)
			(size 2.25 2.55)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.1111111111)
			(net 2 "/VDD")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 3.2 0)
			(size 2.25 2.55)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.1111111111)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_Tantalum_SMD.3dshapes/CP_EIA-7343-31_Kemet-D.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 111.7 162.1 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C132"
			(at 2.75 0 0)
			(layer "B.SilkS")
		)
		(property "Value" "0.1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 2 "/VDD")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 100.5 159.18 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C129"
			(at -0.72 -2.6 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 151 "Net-(U22-VDD2_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 150 "Net-(U22-VDD3_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Package_TO_SOT_SMD:TSOT-23-5"
		(layer "B.Cu")
		(at 93.7 146.3 180)
		(descr "TSOT, 5 Pin (https://www.jedec.org/sites/default/files/docs/MO-193D.pdf variant AB), generated with kicad-footprint-generator ipc_gullwing_generator.py")
		(tags "TSOT TO_SOT_SMD")
		(property "Reference" "U23"
			(at -0.1 -2.425 180)
			(layer "B.SilkS")
		)
		(property "Value" "AP7331"
			(at 0 -2.4 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Package_TO_SOT_SMD:TSOT-23-5"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.digikey.com/en/products/detail/diodes-incorporated/AP7331-WG-7/2270813"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "AP7331-WG-7DICT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "AP7331-WG-7"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -1.1375 0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pinfunction "VIN")
			(pintype "power_in")
		)
		(pad "2" smd roundrect
			(at -1.1375 0 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pinfunction "GND")
			(pintype "bidirectional")
		)
		(pad "3" smd roundrect
			(at -1.1375 -0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pinfunction "EN")
			(pintype "input")
		)
		(pad "4" smd roundrect
			(at 1.1375 -0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 165 "Net-(U23-ADJ)")
			(pinfunction "ADJ")
			(pintype "bidirectional")
		)
		(pad "5" smd roundrect
			(at 1.1375 0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 34 "/BM1366-3/0V8")
			(pinfunction "VOUT")
			(pintype "power_out")
		)
		(model "${KICAD6_3DMODEL_DIR}/Package_TO_SOT_SMD.3dshapes/TSOT-23-5.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 67.275 113.2 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R37"
			(at -2.28 0.02 90)
			(layer "B.SilkS")
		)
		(property "Value" "1k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 103 "/BM1366-2/CI2")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 48 "Net-(U15A--)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 84.6 144.9 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP54"
			(at 1 1.5 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 34 "/BM1366-3/0V8")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 78.95 53.5 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C39"
			(at -1.65 -0.75 0)
			(layer "B.SilkS")
		)
		(property "Value" "311-3342-1-ND"
			(at 0 -1.16 -90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 -90)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 -90)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Fan")
		(sheetfile "fan.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 -90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 5 "/3V3")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 127.1 85.4 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP22"
			(at -2.7 -0.1 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 174 "Net-(U5-B4)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 90.3 118.3)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R39"
			(at 0.45 1.2 0)
			(layer "B.SilkS")
		)
		(property "Value" "115k"
			(at 0 -1.17 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "YAG2956CT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-07115KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 144 "Net-(U17-ADJ)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 99.675 145.425 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP53"
			(at 0 2.625 90)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 46 "Net-(U22-INV_CLKO)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0805_2012Metric"
		(layer "B.Cu")
		(at 103.15 70.8 180)
		(descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C3"
			(at -2.575 -0.05 0)
			(layer "B.SilkS")
		)
		(property "Value" "10uF"
			(at 0 -1.68 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "490-18664-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "GRM21BR61H106ME43L"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.95 0 180)
			(size 1 1.45)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 55 "/VIN")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.95 0 180)
			(size 1 1.45)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 86.7 130.5 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C94"
			(at -0.475 3.4 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 53 "Net-(U18-VDD2_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 57 "Net-(U18-VDD1_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0805_2012Metric"
		(layer "B.Cu")
		(at 56.6 63.95 -90)
		(descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C15"
			(at 0.5 2.275 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.68 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-1291-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "TMK212BJ105KG-T"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.95 0 270)
			(size 1 1.45)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 209 "/Power/AGND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.95 0 270)
			(size 1 1.45)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 11 "Net-(U3-AVIN)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 70.85 103.07 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C72"
			(at -1.805 0.6 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 186 "Net-(U13-VDD1_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 104.45 80.1)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R12"
			(at -2.9 -0.1 0)
			(layer "B.SilkS")
		)
		(property "Value" "22.1k"
			(at 0 -1.17 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-22.1KLRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-0722K1L"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 202 "Net-(U1-FB)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 120.2 55.65 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP30"
			(at 2.8 0 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 179 "Net-(U6-GPIO38{slash}FSPIWP{slash}SUBSPIWP)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 69.3 93.275 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP41"
			(at 2.5 0.1 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 26 "Net-(U13-INV_CLKO)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 99.3 158.18 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C131"
			(at 0 -2.5 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 150 "Net-(U22-VDD3_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 130.425 137.1)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R73"
			(at 0 -2.475 -90)
			(layer "B.SilkS")
		)
		(property "Value" "1k"
			(at 0 -1.17 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 76 "Net-(U21D--)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 86.925 120.825)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP48"
			(at 2.575 0.325 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 188 "Net-(U20-ADDR0)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 119.35 136.575 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R69"
			(at 2.5 0 90)
			(layer "B.SilkS")
		)
		(property "Value" "1k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 75 "Net-(U21C--)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 114.65 88.825)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP34"
			(at 2.675 -0.05 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 2.75 -0.05 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 183 "Net-(U12-ADDR1)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Package_TO_SOT_SMD:SOT-23-5_HandSoldering"
		(layer "B.Cu")
		(at 127.3 72.3 -90)
		(descr "5-pin SOT23 package")
		(tags "SOT-23-5 hand-soldering")
		(property "Reference" "U4"
			(at 0.1 -2.8 180)
			(layer "B.SilkS")
		)
		(property "Value" "MIC5504"
			(at 0 -2.9 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5_HandSoldering"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.digikey.com/en/products/detail/microchip-technology/MIC5504-1-8YM5-TR/5209404"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "576-4879-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "MIC5504-1.8YM5-TR"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "TSOT-23-5_RIT TSOT-23-5_RIT-M TSOT-23-5_RIT-L")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd rect
			(at -1.35 0.95 270)
			(size 1.56 0.65)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 5 "/3V3")
			(pinfunction "VIN")
			(pintype "power_in")
		)
		(pad "2" smd rect
			(at -1.35 0 270)
			(size 1.56 0.65)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "power_in")
		)
		(pad "3" smd rect
			(at -1.35 -0.95 270)
			(size 1.56 0.65)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 5 "/3V3")
			(pinfunction "EN")
			(pintype "input")
		)
		(pad "4" smd rect
			(at 1.35 -0.95 270)
			(size 1.56 0.65)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 192 "unconnected-(U4-NC-Pad4)")
			(pinfunction "NC")
			(pintype "input")
		)
		(pad "5" smd rect
			(at 1.35 0.95 270)
			(size 1.56 0.65)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 10 "/1V8")
			(pinfunction "VOUT")
			(pintype "output")
		)
		(model "${KICAD6_3DMODEL_DIR}/Package_TO_SOT_SMD.3dshapes/SOT-23-5.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 128.68 138.92 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C147"
			(at 0.055 -2.395 0)
			(layer "B.SilkS")
		)
		(property "Value" "0.1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 2 "/VDD")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 81.475 90.325 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C70"
			(at 2.3 0 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 24 "/BM1366-1/1V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 61.525 105.4875 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R49"
			(at -2.5 0 90)
			(layer "B.SilkS")
		)
		(property "Value" "10k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 110 "/BM1366-1/BO")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 149 "Net-(U15C-+)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 54.075 60.925 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R4"
			(at -0.225 1.325 90)
			(layer "B.SilkS")
		)
		(property "Value" "17.8K"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "RMCF0402FT17K8CT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RMCF0402FT17K8"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 7 "Net-(U3-BP1V5)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 56 "Net-(U3-VSEL)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 88.2 112.6 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C87"
			(at -0.02 2.1 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 28 "/BM1366-2/1V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 100.9 118.5 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C92"
			(at 0.475 1.875 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 27 "/BM1366-2/0V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 125.7 83.4)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C35"
			(at 2.4 0.1 0)
			(layer "B.SilkS")
		)
		(property "Value" "311-3342-1-ND"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 5 "/3V3")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 115.05 90.825)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP33"
			(at 2.675 0 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 181 "Net-(U12-ADDR0)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 114.925 103.605 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C52"
			(at 0.83 -1.95 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 36 "Net-(U12-VDD1_0)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 129.1 54.3 -90)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP26"
			(at -0.1 -2.9 180)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 90)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 90)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 270)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 16 "/ESP32/P_RX")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 99.3 156.4 180)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R68"
			(at 2.4 -0.2 0)
			(layer "B.SilkS")
		)
		(property "Value" "2k"
			(at 0 -1.17 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "YAG2303CT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RT0402BRD072KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 180)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 180)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 154 "Net-(U22-NRSTO)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 97.575 101.97 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C59"
			(at 0.25 -2.25 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 38 "Net-(U12-VDD2_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 39 "Net-(U12-VDD3_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_1210_3225Metric"
		(layer "B.Cu")
		(at 78.3 68.375 90)
		(descr "Capacitor SMD 1210 (3225 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C28"
			(at 3.925 0.05 180)
			(layer "B.SilkS")
		)
		(property "Value" "47uF"
			(at 0 -2.3 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_1210_3225Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "490-6539-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "GRM32ER61C476KE15L"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -1.475 0 90)
			(size 1.15 2.7)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.2173913043)
			(net 2 "/VDD")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 1.475 0 90)
			(size 1.15 2.7)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.2173913043)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_1210_3225Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 116.4 53.4 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP17"
			(at -2.85 0 180)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 180)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 180)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 129 "Net-(U6-GPIO9{slash}TOUCH9{slash}ADC1_CH8{slash}FSPIHD{slash}SUBSPIHD)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 68.39 127.09 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C114"
			(at 1.695 -0.475 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 65 "Net-(U20-VDD1_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.5mm"
		(layer "B.Cu")
		(at 65.5 149.9)
		(descr "SMD pad as test Point, diameter 1.5mm")
		(tags "test point SMD pad")
		(property "Reference" "TP62"
			(at -3 0 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.75 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.65 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0)
			(size 1.5 1.5)
			(layers "B.Cu" "B.Mask")
			(net 97 "/BM1366-3/CLKO3")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 116.8 86 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP11"
			(at 2.55 0.225 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 2.775 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 170 "Net-(U5-A4)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Package_SO:TSSOP-16_4.4x5mm_P0.65mm"
		(layer "B.Cu")
		(at 120.7 83.9 90)
		(descr "TSSOP, 16 Pin (JEDEC MO-153 Var AB https://www.jedec.org/document_search?search_api_views_fulltext=MO-153), generated with kicad-footprint-generator ipc_gullwing_generator.py")
		(tags "TSSOP SO")
		(property "Reference" "U5"
			(at -2 4 0)
			(layer "B.SilkS")
		)
		(property "Value" "SN74AVC4T774"
			(at 0 -3.45 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Package_SO:TSSOP-16_4.4x5mm_P0.65mm"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/sn74avc4t774.pdf"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "296-24739-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "SN74AVC4T774PWR"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -2.8625 2.275 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 5 "/3V3")
			(pinfunction "DIR1")
			(pintype "input")
		)
		(pad "2" smd roundrect
			(at -2.8625 1.625 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pinfunction "DIR2")
			(pintype "input")
		)
		(pad "3" smd roundrect
			(at -2.8625 0.975 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 32 "/RO")
			(pinfunction "A1")
			(pintype "bidirectional")
		)
		(pad "4" smd roundrect
			(at -2.8625 0.325 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 33 "/CI")
			(pinfunction "A2")
			(pintype "bidirectional")
		)
		(pad "5" smd roundrect
			(at -2.8625 -0.325 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 31 "/NRSTI")
			(pinfunction "A3")
			(pintype "bidirectional")
		)
		(pad "6" smd roundrect
			(at -2.8625 -0.975 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 170 "Net-(U5-A4)")
			(pinfunction "A4")
			(pintype "bidirectional")
		)
		(pad "7" smd roundrect
			(at -2.8625 -1.625 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pinfunction "DIR3")
			(pintype "input")
		)
		(pad "8" smd roundrect
			(at -2.8625 -2.275 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 175 "Net-(U5-DIR4)")
			(pinfunction "DIR4")
			(pintype "input")
		)
		(pad "9" smd roundrect
			(at 2.8625 -2.275 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 130 "Net-(U5-OE)")
			(pinfunction "OE")
			(pintype "input")
		)
		(pad "10" smd roundrect
			(at 2.8625 -1.625 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "power_in")
		)
		(pad "11" smd roundrect
			(at 2.8625 -0.975 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 174 "Net-(U5-B4)")
			(pinfunction "B4")
			(pintype "bidirectional")
		)
		(pad "12" smd roundrect
			(at 2.8625 -0.325 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 117 "/ESP32/ASIC_RST")
			(pinfunction "B3")
			(pintype "bidirectional")
		)
		(pad "13" smd roundrect
			(at 2.8625 0.325 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 118 "/ESP32/ESP32_TX")
			(pinfunction "B2")
			(pintype "bidirectional")
		)
		(pad "14" smd roundrect
			(at 2.8625 0.975 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 119 "/ESP32/ESP32_RX")
			(pinfunction "B1")
			(pintype "bidirectional")
		)
		(pad "15" smd roundrect
			(at 2.8625 1.625 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 5 "/3V3")
			(pinfunction "VCCB")
			(pintype "power_in")
		)
		(pad "16" smd roundrect
			(at 2.8625 2.275 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 10 "/1V8")
			(pinfunction "VCCA")
			(pintype "power_in")
		)
		(model "${KICAD6_3DMODEL_DIR}/Package_SO.3dshapes/TSSOP-16_4.4x5mm_P0.65mm.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 70.68 159.8 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C144"
			(at 1.28 -1.3 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 83 "Net-(U25-VDD1_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 84 "Net-(U25-VDD2_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 67.275 110.975 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C111"
			(at -0.17 -2.5 0)
			(layer "B.SilkS")
		)
		(property "Value" "0.1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 88.1 131.9 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C91"
			(at -0.4 2 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at -0.254 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 49 "Net-(U18-VDD3_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 53 "Net-(U18-VDD2_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Package_TO_SOT_SMD:TSOT-23-5"
		(layer "B.Cu")
		(at 93.6375 84.775 180)
		(descr "TSOT, 5 Pin (https://www.jedec.org/sites/default/files/docs/MO-193D.pdf variant AB), generated with kicad-footprint-generator ipc_gullwing_generator.py")
		(tags "TSOT TO_SOT_SMD")
		(property "Reference" "U11"
			(at -0.55 -2.375 180)
			(layer "B.SilkS")
		)
		(property "Value" "AP7331"
			(at -4.572 -2.4 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Package_TO_SOT_SMD:TSOT-23-5"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.digikey.com/en/products/detail/diodes-incorporated/AP7331-WG-7/2270813"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "AP7331-WG-7DICT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "AP7331-WG-7"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -1.1375 0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pinfunction "VIN")
			(pintype "power_in")
		)
		(pad "2" smd roundrect
			(at -1.1375 0 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "bidirectional")
		)
		(pad "3" smd roundrect
			(at -1.1375 -0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pinfunction "EN")
			(pintype "input")
		)
		(pad "4" smd roundrect
			(at 1.1375 -0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 132 "Net-(U11-ADJ)")
			(pinfunction "ADJ")
			(pintype "bidirectional")
		)
		(pad "5" smd roundrect
			(at 1.1375 0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 24 "/BM1366-1/1V8")
			(pinfunction "VOUT")
			(pintype "power_out")
		)
		(model "${KICAD6_3DMODEL_DIR}/Package_TO_SOT_SMD.3dshapes/TSOT-23-5.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 68.98 157.3 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C150"
			(at -0.1 -2.38 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 85 "Net-(U25-VDD3_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 71.425 74.7 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R15"
			(at -0.025 2.025 180)
			(layer "B.SilkS")
		)
		(property "Value" "49.9R"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-49.9LRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-0749R9L"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 21 "Net-(U3-GOSNS)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 97.5 116.8 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C84"
			(at -2.25 0.05 90)
			(layer "B.SilkS")
		)
		(property "Value" "0.1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 82.725 90.325 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C67"
			(at 2.325 0.25 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 23 "/BM1366-1/0V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 122.88 132.91 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R71"
			(at -2.5 0 90)
			(layer "B.SilkS")
		)
		(property "Value" "10k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 114 "/BM1366-2/BO")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 167 "Net-(U21C-+)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 68.225 148.075 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP58"
			(at 0.175 2.575 90)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 169 "Net-(U25-INV_CLKO)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 96.325 74.45 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R19"
			(at 2.275 0.025 90)
			(layer "B.SilkS")
		)
		(property "Value" "7.87k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-7.87KLRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-077K87L"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 199 "/ESP32/VDD_SAMPLE")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 2 "/VDD")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 73.2 90.35 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C76"
			(at 2.25 -0.1 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 23 "/BM1366-1/0V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 72.7 74.7 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R16"
			(at -0.475 1.975 0)
			(layer "B.SilkS")
		)
		(property "Value" "1.37K"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "YAG3035CT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-071K37L"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 2 "/VDD")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 13 "Net-(U3-VOSNS)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 120.2 57.7 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP29"
			(at 2.85 -0.05 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 178 "Net-(U6-SPIDQS{slash}GPIO37{slash}FSPIQ{slash}SUBSPIQ)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 68.39 129.07 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C108"
			(at -0.325 -2.525 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 63 "Net-(U20-VDD3_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 64 "Net-(U20-VDD2_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 105.05 63.05 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP10"
			(at 2.6 0 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 219 "/SMB_ALRT")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 88 117.8 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C88"
			(at 1.55 0.4 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 27 "/BM1366-2/0V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 103.95 81.95 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R11"
			(at -0.1 -2.6 0)
			(layer "B.SilkS")
		)
		(property "Value" "115k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "YAG2956CT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-07115KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 202 "Net-(U1-FB)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 88 141 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C126"
			(at 0 2.7 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0.5 -0.25 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 35 "/BM1366-3/1V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 86.35 101.215 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C66"
			(at 0.27 -3.25 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 39 "Net-(U12-VDD3_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 38 "Net-(U12-VDD2_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 59.475 111.5)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C112"
			(at -0.775 -1.05 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 92.275 70.35 180)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R26"
			(at -2.3 0.1 0)
			(layer "B.SilkS")
		)
		(property "Value" "10k"
			(at 0 -1.17 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Fan")
		(sheetfile "fan.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 180)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 43 "/Fan/FAN2_PWM")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 180)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.5mm"
		(layer "B.Cu")
		(at 65.5 155.6)
		(descr "SMD pad as test Point, diameter 1.5mm")
		(tags "test point SMD pad")
		(property "Reference" "TP60"
			(at -2.9 0.1 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.75 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.65 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0)
			(size 1.5 1.5)
			(layers "B.Cu" "B.Mask")
			(net 91 "/BM1366-3/BO3")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 119.37205 78.7602 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C19"
			(at -2.42795 -0.2398 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 180)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 180)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 180)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 180)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 5 "/3V3")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 87.6 102.255 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C69"
			(at 0.48 -2 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at -0.182 -20.097 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 38 "Net-(U12-VDD2_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 37 "Net-(U12-VDD1_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 67.25 108.7 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R54"
			(at -2.5 -0.125 -90)
			(layer "B.SilkS")
		)
		(property "Value" "1k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 79 "Net-(R54-Pad1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 59 "Net-(U15D--)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_1210_3225Metric"
		(layer "B.Cu")
		(at 63.675 60.4)
		(descr "Capacitor SMD 1210 (3225 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C8"
			(at 3 -1.725 0)
			(layer "B.SilkS")
		)
		(property "Value" "22uF"
			(at 0 -2.3 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_1210_3225Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "490-3889-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "GRM32ER61E226KE15L"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -1.475 0)
			(size 1.15 2.7)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.2173913043)
			(net 55 "/VIN")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 1.475 0)
			(size 1.15 2.7)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.2173913043)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_1210_3225Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 84.7 137.35 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C97"
			(at 0.125 1.525 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Fiducial:Fiducial_1mm_Mask2mm"
		(layer "B.Cu")
		(at 53.8 166.825 180)
		(descr "Circular Fiducial, 1mm bare copper, 2mm soldermask opening (Level A)")
		(tags "fiducial")
		(property "Reference" "FID2"
			(at 0 2 0)
			(layer "B.SilkS")
			(hide yes)
		)
		(property "Value" "Fiducial"
			(at 0 -2 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Fiducial:Fiducial_1mm_Mask2mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Fiducial*")
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr smd exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(solder_mask_margin 0.5)
			(clearance 0.5)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 69.35 146.175 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C149"
			(at -2.85 -0.125 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0.25 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 34 "/BM1366-3/0V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 103.1 160.7 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C124"
			(at 0 -2.5 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 2 "/VDD")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 152 "Net-(U22-VDD1_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 90.5 113.1)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R38"
			(at 0 1.3 0)
			(layer "B.SilkS")
		)
		(property "Value" "115k"
			(at 0 -1.17 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "YAG2956CT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-07115KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 143 "Net-(U16-ADJ)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 72.2 76.45 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C26"
			(at -0.05 -1.25 0)
			(layer "B.SilkS")
		)
		(property "Value" "2.2nF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "490-8257-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "GRM155R61H222KA01D"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 2 "/VDD")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 112.4 146.8 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C118"
			(at 2.8 -0.1 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 35 "/BM1366-3/1V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 84.7 160.62 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C138"
			(at 0.1 -2.5 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at -0.182 -20.097 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 151 "Net-(U22-VDD2_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 152 "Net-(U22-VDD1_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 86.125 109.4 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C60"
			(at 2.35 0.075 -90)
			(layer "B.SilkS")
		)
		(property "Value" "0.1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 99.65 129.495 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C100"
			(at 0.03 3.6 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 57 "Net-(U18-VDD1_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 53 "Net-(U18-VDD2_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 120.72205 73.3602)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP2"
			(at 2.3 0.15 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 5 "/3V3")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Package_SO:TSSOP-14_4.4x5mm_P0.65mm"
		(layer "B.Cu")
		(at 124.78 138.9 90)
		(descr "TSSOP, 14 Pin (JEDEC MO-153 Var AB-1 https://www.jedec.org/document_search?search_api_views_fulltext=MO-153), generated with kicad-footprint-generator ipc_gullwing_generator.py")
		(tags "TSSOP SO")
		(property "Reference" "U21"
			(at -4.5 1.72 0)
			(layer "B.SilkS")
		)
		(property "Value" "TLV3544"
			(at 0 -3.45 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Package_SO:TSSOP-14_4.4x5mm_P0.65mm"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tlv3542.pdf"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "296-45352-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "TLV3544IPWR"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "SOT*353*SC*70*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -2.8625 1.95 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 107 "/BM1366-3/CI3")
			(pintype "output")
		)
		(pad "2" smd roundrect
			(at -2.8625 1.3 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 71 "Net-(U21A--)")
			(pinfunction "-")
			(pintype "input")
		)
		(pad "3" smd roundrect
			(at -2.8625 0.65 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 163 "Net-(U21A-+)")
			(pinfunction "+")
			(pintype "input")
		)
		(pad "4" smd roundrect
			(at -2.8625 0 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 2 "/VDD")
			(pinfunction "V+")
			(pintype "power_in")
		)
		(pad "5" smd roundrect
			(at -2.8625 -0.65 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 164 "Net-(U21B-+)")
			(pinfunction "+")
			(pintype "input")
		)
		(pad "6" smd roundrect
			(at -2.8625 -1.3 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 73 "Net-(U21B--)")
			(pinfunction "-")
			(pintype "input")
		)
		(pad "7" smd roundrect
			(at -2.8625 -1.95 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 104 "/BM1366-3/NRSTI3")
			(pintype "output")
		)
		(pad "8" smd roundrect
			(at 2.8625 -1.95 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 105 "/BM1366-3/BI3")
			(pintype "output")
		)
		(pad "9" smd roundrect
			(at 2.8625 -1.3 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 75 "Net-(U21C--)")
			(pinfunction "-")
			(pintype "input")
		)
		(pad "10" smd roundrect
			(at 2.8625 -0.65 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 167 "Net-(U21C-+)")
			(pinfunction "+")
			(pintype "input")
		)
		(pad "11" smd roundrect
			(at 2.8625 0 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pinfunction "V-")
			(pintype "power_in")
		)
		(pad "12" smd roundrect
			(at 2.8625 0.65 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 168 "Net-(U21D-+)")
			(pinfunction "+")
			(pintype "input")
		)
		(pad "13" smd roundrect
			(at 2.8625 1.3 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 76 "Net-(U21D--)")
			(pinfunction "-")
			(pintype "input")
		)
		(pad "14" smd roundrect
			(at 2.8625 1.95 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 82 "Net-(R76-Pad1)")
			(pintype "output")
		)
		(model "${KICAD6_3DMODEL_DIR}/Package_SO.3dshapes/TSSOP-14_4.4x5mm_P0.65mm.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Package_SO:TSSOP-14_4.4x5mm_P0.65mm"
		(layer "B.Cu")
		(at 63.425 110.9875 90)
		(descr "TSSOP, 14 Pin (JEDEC MO-153 Var AB-1 https://www.jedec.org/document_search?search_api_views_fulltext=MO-153), generated with kicad-footprint-generator ipc_gullwing_generator.py")
		(tags "TSSOP SO")
		(property "Reference" "U15"
			(at -4.5125 -1 0)
			(layer "B.SilkS")
		)
		(property "Value" "TLV3544"
			(at 0 -3.45 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Package_SO:TSSOP-14_4.4x5mm_P0.65mm"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/tlv3542.pdf"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "296-45352-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "TLV3544IPWR"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "SOT*353*SC*70*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -2.8625 1.95 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 103 "/BM1366-2/CI2")
			(pintype "output")
		)
		(pad "2" smd roundrect
			(at -2.8625 1.3 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 48 "Net-(U15A--)")
			(pinfunction "-")
			(pintype "input")
		)
		(pad "3" smd roundrect
			(at -2.8625 0.65 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 142 "Net-(U15A-+)")
			(pinfunction "+")
			(pintype "input")
		)
		(pad "4" smd roundrect
			(at -2.8625 0 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pinfunction "V+")
			(pintype "power_in")
		)
		(pad "5" smd roundrect
			(at -2.8625 -0.65 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 145 "Net-(U15B-+)")
			(pinfunction "+")
			(pintype "input")
		)
		(pad "6" smd roundrect
			(at -2.8625 -1.3 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 50 "Net-(U15B--)")
			(pinfunction "-")
			(pintype "input")
		)
		(pad "7" smd roundrect
			(at -2.8625 -1.95 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 100 "/BM1366-2/NRSTI2")
			(pintype "output")
		)
		(pad "8" smd roundrect
			(at 2.8625 -1.95 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 101 "/BM1366-2/BI2")
			(pintype "output")
		)
		(pad "9" smd roundrect
			(at 2.8625 -1.3 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 58 "Net-(U15C--)")
			(pinfunction "-")
			(pintype "input")
		)
		(pad "10" smd roundrect
			(at 2.8625 -0.65 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 149 "Net-(U15C-+)")
			(pinfunction "+")
			(pintype "input")
		)
		(pad "11" smd roundrect
			(at 2.8625 0 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pinfunction "V-")
			(pintype "power_in")
		)
		(pad "12" smd roundrect
			(at 2.8625 0.65 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 161 "Net-(U15D-+)")
			(pinfunction "+")
			(pintype "input")
		)
		(pad "13" smd roundrect
			(at 2.8625 1.3 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 59 "Net-(U15D--)")
			(pinfunction "-")
			(pintype "input")
		)
		(pad "14" smd roundrect
			(at 2.8625 1.95 90)
			(size 1.475 0.4)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 79 "Net-(R54-Pad1)")
			(pintype "output")
		)
		(model "${KICAD6_3DMODEL_DIR}/Package_SO.3dshapes/TSSOP-14_4.4x5mm_P0.65mm.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 129.5 88.6 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP7"
			(at 2.7 0 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 32 "/RO")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "bitaxe:RT9080-33GJ5"
		(layer "B.Cu")
		(at 118.42205 76.3602)
		(property "Reference" "U2"
			(at -0.6 -2.45 180)
			(layer "B.SilkS")
		)
		(property "Value" "RT9080-33GJ5"
			(at 1.96 4.77 0)
			(layer "B.Fab")
		)
		(property "Footprint" "bitaxe:RT9080-33GJ5"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.richtek.com/assets/product_file/RT9080/DS9080-05.pdf"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "1028-1509-1-ND"
			(at 0 0 90)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RT9080-33GJ5"
			(at 0 0 90)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "TSOT-23-5_RIT TSOT-23-5_RIT-M TSOT-23-5_RIT-L")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(pad "1" smd rect
			(at -1.37795 0.9398)
			(size 0.9525 0.5588)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 4 "/5V")
			(pinfunction "VIN")
			(pintype "power_in")
		)
		(pad "2" smd rect
			(at -1.37795 0)
			(size 0.9525 0.5588)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "power_in")
		)
		(pad "3" smd rect
			(at -1.37795 -0.9398)
			(size 0.9525 0.5588)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 4 "/5V")
			(pinfunction "EN")
			(pintype "input")
		)
		(pad "4" smd rect
			(at 1.37795 -0.9398)
			(size 0.9525 0.5588)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 116 "unconnected-(U2-NC-Pad4)")
			(pinfunction "NC")
			(pintype "power_in+no_connect")
		)
		(pad "5" smd rect
			(at 1.37795 0.9398)
			(size 0.9525 0.5588)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 5 "/3V3")
			(pinfunction "VOUT")
			(pintype "output")
		)
		(model "${KIPRJMOD}/3d/TSOT-23-5_RIT.step"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 111.8 144.5 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C142"
			(at -0.15 2.35 90)
			(layer "B.SilkS")
		)
		(property "Value" "0.1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 35 "/BM1366-3/1V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 84.5 91.45)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP39"
			(at 0.7 -1.4 180)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 52 "Net-(U13-ADDR1)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 84.625 109.4 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C63"
			(at -2.325 -0.025 -90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 73.7 162.5)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C130"
			(at 2.8 -0.05 0)
			(layer "B.SilkS")
		)
		(property "Value" "0.1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 2 "/VDD")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 63.1 89.9 180)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R3"
			(at -2.675 -0.025 0)
			(layer "B.SilkS")
		)
		(property "Value" "0R"
			(at 0 -1.17 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-0.0JRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-070RL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 180)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 219 "/SMB_ALRT")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 180)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 127 "/Power/PMB_ALRT")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 88.3 146.2 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C125"
			(at -1.6 0.8 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 34 "/BM1366-3/0V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 89.7375 86.075)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R30"
			(at 0 -1 0)
			(layer "B.SilkS")
		)
		(property "Value" "115k"
			(at -0.254 -2.54 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "YAG2956CT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-07115KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 132 "Net-(U11-ADJ)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 86.5 157.8 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C133"
			(at 0.28 -2.5 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 150 "Net-(U22-VDD3_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 72.68 159.8 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C143"
			(at -0.92 -1.3 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 2 "/VDD")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 83 "Net-(U25-VDD1_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 115.9 157.62 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C116"
			(at 0.7 -2.6 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 68 "Net-(U22-VDD3_0)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 69 "Net-(U22-VDD2_0)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 114.7 118.5)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C81"
			(at -0.05 -2.06 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 27 "/BM1366-2/0V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 112.5 118.5 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C83"
			(at 0.5 -2 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 28 "/BM1366-2/1V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 94.36 50.3)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R23"
			(at 0.2 -1.2 0)
			(layer "B.SilkS")
		)
		(property "Value" "5.1k"
			(at 0 -1.17 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "13-RC0402FR-135K1LCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-135K1L"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 126 "Net-(J7-CC2)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 117.9 146.1)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP52"
			(at 0.1 2.7 -90)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 67 "Net-(U22-ADDR1)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 111.7 163.5)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C137"
			(at -3 0 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 2 "/VDD")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 101.925 92.025 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP37"
			(at 2.5 -0.05 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 137 "Net-(U12-INV_CLKO)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Connector_PinHeader_2.54mm:PinHeader_2x05_P2.54mm_Vertical"
		(layer "B.Cu")
		(at 54.45 98.97)
		(descr "Through hole straight pin header, 2x05, 2.54mm pitch, double rows")
		(tags "Through hole pin header THT 2x05 2.54mm double row")
		(property "Reference" "J3"
			(at 1.27 2.33 0)
			(layer "B.SilkS")
		)
		(property "Value" "Conn_02x05_Odd_Even"
			(at 1.27 -12.49 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_2x05_P2.54mm_Vertical"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Connector*:*_2x??_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr through_hole)
		(fp_text user "${REFERENCE}"
			(at 1.27 -5.08 90)
			(layer "B.Fab")
		)
		(pad "1" thru_hole rect
			(at 0 0)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 86 "unconnected-(J3-Pin_1-Pad1)")
			(pinfunction "Pin_1")
			(pintype "passive+no_connect")
		)
		(pad "2" thru_hole oval
			(at 2.54 0)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 87 "unconnected-(J3-Pin_2-Pad2)")
			(pinfunction "Pin_2")
			(pintype "passive+no_connect")
		)
		(pad "3" thru_hole oval
			(at 0 -2.54)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 88 "unconnected-(J3-Pin_3-Pad3)")
			(pinfunction "Pin_3")
			(pintype "passive+no_connect")
		)
		(pad "4" thru_hole oval
			(at 2.54 -2.54)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 89 "unconnected-(J3-Pin_4-Pad4)")
			(pinfunction "Pin_4")
			(pintype "passive+no_connect")
		)
		(pad "5" thru_hole oval
			(at 0 -5.08)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 90 "unconnected-(J3-Pin_5-Pad5)")
			(pinfunction "Pin_5")
			(pintype "passive+no_connect")
		)
		(pad "6" thru_hole oval
			(at 2.54 -5.08)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 1 "GND")
			(pinfunction "Pin_6")
			(pintype "passive")
		)
		(pad "7" thru_hole oval
			(at 0 -7.62)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 92 "unconnected-(J3-Pin_7-Pad7)")
			(pinfunction "Pin_7")
			(pintype "passive+no_connect")
		)
		(pad "8" thru_hole oval
			(at 2.54 -7.62)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 127 "/Power/PMB_ALRT")
			(pinfunction "Pin_8")
			(pintype "passive")
		)
		(pad "9" thru_hole oval
			(at 0 -10.16)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 217 "/Power/PMB_SCL")
			(pinfunction "Pin_9")
			(pintype "passive")
		)
		(pad "10" thru_hole oval
			(at 2.54 -10.16)
			(size 1.7 1.7)
			(drill 1)
			(layers "*.Cu" "*.Mask")
			(remove_unused_layers no)
			(net 218 "/Power/PMB_SDA")
			(pinfunction "Pin_10")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:CP_Elec_6.3x7.7"
		(layer "B.Cu")
		(at 88.025 77.475 180)
		(descr "SMD capacitor, aluminum electrolytic, Nichicon, 6.3x7.7mm")
		(tags "capacitor electrolytic")
		(property "Reference" "C41"
			(at 1.85 -4.175 180)
			(layer "B.SilkS")
		)
		(property "Value" "220uF"
			(at 0 -4.35 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:CP_Elec_6.3x7.7"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.we-online.com/components/products/datasheet/865080345012.pdf"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "732-8422-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "HEIGHT" "7.7mm"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "865080345012"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "CP_*")
		(sheetname "Fan")
		(sheetfile "fan.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -2.7 0 180)
			(size 3.5 1.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.15625)
			(net 55 "/VIN")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 2.7 0 180)
			(size 3.5 1.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.15625)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/CP_Elec_6.3x7.7.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 92.475 120.725)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP49"
			(at 2.55 0.55 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 189 "Net-(U20-ADDR1)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 118.05 97.15 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R28"
			(at 0 1.9 180)
			(layer "B.SilkS")
		)
		(property "Value" "10k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 54 "/BM1366-1/BI1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Fiducial:Fiducial_1mm_Mask2mm"
		(layer "B.Cu")
		(at 126.375 47.85 180)
		(descr "Circular Fiducial, 1mm bare copper, 2mm soldermask opening (Level A)")
		(tags "fiducial")
		(property "Reference" "FID8"
			(at 0 2 0)
			(layer "B.SilkS")
			(hide yes)
		)
		(property "Value" "Fiducial"
			(at 0 -2 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Fiducial:Fiducial_1mm_Mask2mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Fiducial*")
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr smd exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(solder_mask_margin 0.5)
			(clearance 0.5)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 126.63 132.91 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R75"
			(at -3 0 90)
			(layer "B.SilkS")
		)
		(property "Value" "10k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 106 "/BM1366-3/RO3")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 168 "Net-(U21D-+)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_Tantalum_SMD:CP_EIA-7343-31_Kemet-D_Pad2.25x2.55mm_HandSolder"
		(layer "B.Cu")
		(at 92.6 107.7)
		(descr "Tantalum Capacitor SMD Kemet-D (7343-31 Metric), IPC_7351 nominal, (Body size from: http://www.kemet.com/Lists/ProductCatalog/Attachments/253/KEM_TC101_STD.pdf), generated with kicad-footprint-generator")
		(tags "capacitor tantalum")
		(property "Reference" "C68"
			(at -0.775 -2.95 180)
			(layer "B.SilkS")
		)
		(property "Value" "330uF"
			(at 0 -3.1 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_Tantalum_SMD:CP_EIA-7343-31_Kemet-D_Pad2.25x2.55mm_HandSolder"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "718-1028-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "293D337X9010E2TE3"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "CP_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -3.2 0)
			(size 2.25 2.55)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.1111111111)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 3.2 0)
			(size 2.25 2.55)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.1111111111)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_Tantalum_SMD.3dshapes/CP_EIA-7343-31_Kemet-D.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 110.2 85.35 90)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP3"
			(at -0.1 -2.2 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 90)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at -0.8 -1.25 90)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 90)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 4 "/5V")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 57.375 68.95 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C17"
			(at 2.425 -0.05 90)
			(layer "B.SilkS")
		)
		(property "Value" "4.7uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "490-14306-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "GRM155R61A475MEAAD"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 12 "Net-(U3-VDD5)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Package_TO_SOT_SMD:SOT-23-6"
		(layer "B.Cu")
		(at 106.2 77.1 90)
		(descr "SOT, 6 Pin (https://www.jedec.org/sites/default/files/docs/Mo-178c.PDF variant AB), generated with kicad-footprint-generator ipc_gullwing_generator.py")
		(tags "SOT TO_SOT_SMD")
		(property "Reference" "U1"
			(at -1.225 -2.775 0)
			(layer "B.SilkS")
		)
		(property "Value" "LMR54410"
			(at 0 -2.4 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23-6"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/lmr54406.pdf"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "296-LMR54410DBVRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "LMR54410FDBVR"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "TSOT-23-5_RIT TSOT-23-5_RIT-M TSOT-23-5_RIT-L")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -1.1375 0.95 90)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 201 "Net-(U1-CB)")
			(pinfunction "CB")
			(pintype "input")
		)
		(pad "2" smd roundrect
			(at -1.1375 0 90)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "power_in")
		)
		(pad "3" smd roundrect
			(at -1.1375 -0.95 90)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 202 "Net-(U1-FB)")
			(pinfunction "FB")
			(pintype "input")
		)
		(pad "4" smd roundrect
			(at 1.1375 -0.95 90)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 55 "/VIN")
			(pinfunction "EN")
			(pintype "input")
		)
		(pad "5" smd roundrect
			(at 1.1375 0 90)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 55 "/VIN")
			(pinfunction "VIN")
			(pintype "power_in")
		)
		(pad "6" smd roundrect
			(at 1.1375 0.95 90)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 200 "Net-(U1-SW)")
			(pinfunction "SW")
			(pintype "output")
		)
		(model "${KICAD6_3DMODEL_DIR}/Package_TO_SOT_SMD.3dshapes/SOT-23-6.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 88.125 129.85 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C96"
			(at 0.2 1.975 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 57 "Net-(U18-VDD1_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 116 100.43 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C45"
			(at -0.295 -1.975 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 25 "Net-(U12-VDD3_0)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 128.85 141.25 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R59"
			(at -2.4 0 90)
			(layer "B.SilkS")
		)
		(property "Value" "1k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 107 "/BM1366-3/CI3")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 71 "Net-(U21A--)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 69.59 128.07 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C109"
			(at 0.05 -3.675 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 64 "Net-(U20-VDD2_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 65 "Net-(U20-VDD1_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.5mm"
		(layer "B.Cu")
		(at 64.725 146.5)
		(descr "SMD pad as test Point, diameter 1.5mm")
		(tags "test point SMD pad")
		(property "Reference" "TP63"
			(at -2.8 -0.1 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.75 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.65 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0)
			(size 1.5 1.5)
			(layers "B.Cu" "B.Mask")
			(net 98 "/BM1366-3/CO3")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 101.675 136.525 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C99"
			(at -1.75 -1.175 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_1210_3225Metric"
		(layer "B.Cu")
		(at 63.65 66.925)
		(descr "Capacitor SMD 1210 (3225 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C4"
			(at 2.2 2.175 0)
			(layer "B.SilkS")
		)
		(property "Value" "22uF"
			(at 0 -2.3 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_1210_3225Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "490-3889-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "GRM32ER61E226KE15L"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -1.475 0)
			(size 1.15 2.7)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.2173913043)
			(net 55 "/VIN")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 1.475 0)
			(size 1.15 2.7)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.2173913043)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_1210_3225Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 62.825 105.5 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R48"
			(at -3.3 0 90)
			(layer "B.SilkS")
		)
		(property "Value" "10k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 149 "Net-(U15C-+)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 70.18 158.2 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C145"
			(at -0.8 -2.48 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 84 "Net-(U25-VDD2_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 85 "Net-(U25-VDD3_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 87.6 100.255 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C64"
			(at -0.02 -2 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 39 "Net-(U12-VDD3_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 54.075 58.2 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R7"
			(at 1.775 -0.025 90)
			(layer "B.SilkS")
		)
		(property "Value" "31.6K"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "YAG3115CT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-0731K6L"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 56 "Net-(U3-VSEL)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 209 "/Power/AGND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 77.3 116.55)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C106"
			(at 0.6 -2.35 90)
			(layer "B.SilkS")
		)
		(property "Value" "0.1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 28 "/BM1366-2/1V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Fiducial:Fiducial_1mm_Mask2mm"
		(layer "B.Cu")
		(at 55.626 53.34 180)
		(descr "Circular Fiducial, 1mm bare copper, 2mm soldermask opening (Level A)")
		(tags "fiducial")
		(property "Reference" "FID6"
			(at 0 2 0)
			(layer "B.SilkS")
			(hide yes)
		)
		(property "Value" "Fiducial"
			(at 0 -2 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Fiducial:Fiducial_1mm_Mask2mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Fiducial*")
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr smd exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(solder_mask_margin 0.5)
			(clearance 0.5)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 86.15 92.925)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP38"
			(at 2.55 0.525 180)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 51 "Net-(U13-ADDR0)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 122.88 144.89 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R62"
			(at -2.25 0 90)
			(layer "B.SilkS")
		)
		(property "Value" "10k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 113 "/BM1366-2/NRSTO")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 164 "Net-(U21B-+)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "bitaxe:O 25,0-JO32-B-1V3-1-T1-LF"
		(layer "B.Cu")
		(at 121.3 104.3 180)
		(property "Reference" "U14"
			(at -3.5 -0.25 0)
			(unlocked yes)
			(layer "B.SilkS")
		)
		(property "Value" "25MHz"
			(at 0.65 4.29 0)
			(unlocked yes)
			(layer "B.Fab")
		)
		(property "Footprint" "bitaxe:O 25,0-JO32-B-1V3-1-T1-LF"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.jauch.com/downloadfile/5ef1edcfb8e2f73163c8ce8009ef659d1/jo32-1.8-3.3v.pdf"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "1908-O250-JO32-B-1V3-1-T1-LFCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "O 25,0-JO32-B-1V3-1-T1-LF"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 3.9785 -0.762 0)
			(unlocked yes)
			(layer "B.Fab")
		)
		(pad "1" smd rect
			(at -1.15 -0.95 180)
			(size 1.3 1.1)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 24 "/BM1366-1/1V8")
			(pinfunction "EN")
			(pintype "bidirectional")
		)
		(pad "2" smd rect
			(at 1.15 -0.95 180)
			(size 1.3 1.1)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "bidirectional")
		)
		(pad "3" smd rect
			(at 1.15 0.95 180)
			(size 1.3 1.1)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 99 "/BM1366-1/CLKI1")
			(pinfunction "OUT")
			(pintype "bidirectional")
		)
		(pad "4" smd rect
			(at -1.15 0.95 180)
			(size 1.3 1.1)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 24 "/BM1366-1/1V8")
			(pinfunction "VIN")
			(pintype "bidirectional")
		)
		(model "${KIPRJMOD}/3d/3225-oscillator.step"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz -90 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 68.75 113.2 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R34"
			(at 0.075 -1.975 180)
			(layer "B.SilkS")
		)
		(property "Value" "1k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 48 "Net-(U15A--)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 106.3 56.55 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP14"
			(at 0.05 -1.7 180)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 180)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 180)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 93 "Net-(U6-GPIO6{slash}TOUCH6{slash}ADC1_CH5)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 96.8375 84.275 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C51"
			(at 1.475 0.25 0)
			(layer "B.SilkS")
		)
		(property "Value" "0.1uF"
			(at 1.778 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 124.13 144.89 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R61"
			(at -3.41 0.05 90)
			(layer "B.SilkS")
		)
		(property "Value" "10k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 2 "/VDD")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 164 "Net-(U21B-+)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0805_2012Metric"
		(layer "B.Cu")
		(at 108.75 82.7 180)
		(descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C20"
			(at 3.45 -0.95 0)
			(layer "B.SilkS")
		)
		(property "Value" "10uF"
			(at 0 -1.68 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "490-18664-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "GRM21BR61H106ME43L"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.95 0 180)
			(size 1 1.45)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.95 0 180)
			(size 1 1.45)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 68.75 108.7 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R51"
			(at 2.475 0.1 90)
			(layer "B.SilkS")
		)
		(property "Value" "1k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 59 "Net-(U15D--)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 112.25 54.1 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP16"
			(at 0 -1.85 180)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 180)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 180)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 121 "Net-(U6-GPIO8{slash}TOUCH8{slash}ADC1_CH7{slash}SUBSPICS1)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 104.6 90.325 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C55"
			(at 2.375 0.025 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 24 "/BM1366-1/1V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 98.46 50.3 180)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R22"
			(at -0.1 1.2 0)
			(layer "B.SilkS")
		)
		(property "Value" "5.1k"
			(at 0 -1.17 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "13-RC0402FR-135K1LCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-135K1L"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 180)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 180)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 122 "Net-(J7-CC1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 89.7375 83.775 180)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R32"
			(at 0.1 1.1 0)
			(layer "B.SilkS")
		)
		(property "Value" "402K"
			(at 0 5.842 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "YAG3151CT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-07402KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 180)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 24 "/BM1366-1/1V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 180)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 132 "Net-(U11-ADJ)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Package_TO_SOT_SMD:TSOT-23-5"
		(layer "B.Cu")
		(at 94.3 112.1 180)
		(descr "TSOT, 5 Pin (https://www.jedec.org/sites/default/files/docs/MO-193D.pdf variant AB), generated with kicad-footprint-generator ipc_gullwing_generator.py")
		(tags "TSOT TO_SOT_SMD")
		(property "Reference" "U16"
			(at 0 -2.4 180)
			(layer "B.SilkS")
		)
		(property "Value" "AP7331"
			(at 0 -2.4 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Package_TO_SOT_SMD:TSOT-23-5"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.digikey.com/en/products/detail/diodes-incorporated/AP7331-WG-7/2270813"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "AP7331-WG-7DICT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "AP7331-WG-7"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -1.1375 0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pinfunction "VIN")
			(pintype "power_in")
		)
		(pad "2" smd roundrect
			(at -1.1375 0 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pinfunction "GND")
			(pintype "bidirectional")
		)
		(pad "3" smd roundrect
			(at -1.1375 -0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pinfunction "EN")
			(pintype "input")
		)
		(pad "4" smd roundrect
			(at 1.1375 -0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 143 "Net-(U16-ADJ)")
			(pinfunction "ADJ")
			(pintype "bidirectional")
		)
		(pad "5" smd roundrect
			(at 1.1375 0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 28 "/BM1366-2/1V8")
			(pinfunction "VOUT")
			(pintype "power_out")
		)
		(model "${KICAD6_3DMODEL_DIR}/Package_TO_SOT_SMD.3dshapes/TSOT-23-5.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 96.9 140.5 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C122"
			(at 0.45 2.3 180)
			(layer "B.SilkS")
		)
		(property "Value" "0.1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 114.5 146.8)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C117"
			(at 0 2.2 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 34 "/BM1366-3/0V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 91.3375 89.075)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R31"
			(at -0.025 -1.075 0)
			(layer "B.SilkS")
		)
		(property "Value" "115k"
			(at 0 5.588 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "YAG2956CT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-07115KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 131 "Net-(U10-ADJ)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 23 "/BM1366-1/0V8")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0805_2012Metric"
		(layer "B.Cu")
		(at 109.2 49.1)
		(descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C31"
			(at 0 -1.6 0)
			(layer "B.SilkS")
		)
		(property "Value" "10uF"
			(at 0 -1.68 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "490-18664-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "GRM21BR61H106ME43L"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.95 0)
			(size 1 1.45)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 5 "/3V3")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.95 0)
			(size 1 1.45)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 101.2375 85.175 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP36"
			(at -2.6375 -0.225 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 24 "/BM1366-1/1V8")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 70.25 106.775 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R55"
			(at 0.075 -1.95 0)
			(layer "B.SilkS")
		)
		(property "Value" "1k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 111 "/BM1366-1/RI")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 79 "Net-(R54-Pad1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 119.6 118.7)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP43"
			(at 2.7 0 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 185 "Net-(U18-ADDR0)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 111.425 90.325 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C48"
			(at 2.325 -0.125 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 24 "/BM1366-1/1V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 131 66.1 -90)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP31"
			(at 1.5 0 180)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 90)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 1.778 2.159 90)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 270)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 17 "/ESP32/IO0")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 98.725 122.05 -90)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP47"
			(at 1.575 0.15 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 90)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 90)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 270)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 147 "Net-(U18-INV_CLKO)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 69.7 100.025 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C78"
			(at 0.25 -1.9 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 182 "Net-(U13-VDD3_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Package_TO_SOT_SMD:TSOT-23-5"
		(layer "B.Cu")
		(at 93.8 141 180)
		(descr "TSOT, 5 Pin (https://www.jedec.org/sites/default/files/docs/MO-193D.pdf variant AB), generated with kicad-footprint-generator ipc_gullwing_generator.py")
		(tags "TSOT TO_SOT_SMD")
		(property "Reference" "U24"
			(at 0 -2.6 180)
			(layer "B.SilkS")
		)
		(property "Value" "AP7331"
			(at 0 -2.4 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Package_TO_SOT_SMD:TSOT-23-5"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.digikey.com/en/products/detail/diodes-incorporated/AP7331-WG-7/2270813"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "AP7331-WG-7DICT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "AP7331-WG-7"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -1.1375 0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pinfunction "VIN")
			(pintype "power_in")
		)
		(pad "2" smd roundrect
			(at -1.1375 0 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pinfunction "GND")
			(pintype "bidirectional")
		)
		(pad "3" smd roundrect
			(at -1.1375 -0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pinfunction "EN")
			(pintype "input")
		)
		(pad "4" smd roundrect
			(at 1.1375 -0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 166 "Net-(U24-ADJ)")
			(pinfunction "ADJ")
			(pintype "bidirectional")
		)
		(pad "5" smd roundrect
			(at 1.1375 0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 35 "/BM1366-3/1V8")
			(pinfunction "VOUT")
			(pintype "power_out")
		)
		(model "${KICAD6_3DMODEL_DIR}/Package_TO_SOT_SMD.3dshapes/TSOT-23-5.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 116.6 80.5)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R21"
			(at -0.3 1.35 180)
			(layer "B.SilkS")
		)
		(property "Value" "20k"
			(at 0 -1.17 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-20.0KLRCT-ND"
			(at 0 0 90)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-0720KL"
			(at 0 0 90)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 130 "Net-(U5-OE)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 116.8 83.95 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP23"
			(at 2.7 -0.05 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 2.55 -0.025 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 175 "Net-(U5-DIR4)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 83.55 118.35 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C102"
			(at 2.775 -0.1 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 27 "/BM1366-2/0V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 86.5 132.3)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C90"
			(at 0 1.2 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 49 "Net-(U18-VDD3_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 73.5 118.3 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C110"
			(at -0.45 2.35 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 -90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 -90)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 -90)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 -90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 28 "/BM1366-2/1V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "bitaxe:O 25,0-JO32-B-1V3-1-T1-LF"
		(layer "B.Cu")
		(at 74 114.8 180)
		(property "Reference" "U19"
			(at -0.6 2.275 0)
			(unlocked yes)
			(layer "B.SilkS")
		)
		(property "Value" "25MHz"
			(at 0.65 4.29 0)
			(unlocked yes)
			(layer "B.Fab")
		)
		(property "Footprint" "bitaxe:O 25,0-JO32-B-1V3-1-T1-LF"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.jauch.com/downloadfile/5ef1edcfb8e2f73163c8ce8009ef659d1/jo32-1.8-3.3v.pdf"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "1908-O250-JO32-B-1V3-1-T1-LFCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "O 25,0-JO32-B-1V3-1-T1-LF"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 5.36 2.32 0)
			(unlocked yes)
			(layer "B.Fab")
		)
		(pad "1" smd rect
			(at -1.15 -0.95 180)
			(size 1.3 1.1)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 28 "/BM1366-2/1V8")
			(pinfunction "EN")
			(pintype "bidirectional")
		)
		(pad "2" smd rect
			(at 1.15 -0.95 180)
			(size 1.3 1.1)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 94 "/BM1366-1/VDD1")
			(pinfunction "GND")
			(pintype "bidirectional")
		)
		(pad "3" smd rect
			(at 1.15 0.95 180)
			(size 1.3 1.1)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 136 "/BM1366-2/CLKI2")
			(pinfunction "OUT")
			(pintype "bidirectional")
		)
		(pad "4" smd rect
			(at -1.15 0.95 180)
			(size 1.3 1.1)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 28 "/BM1366-2/1V8")
			(pinfunction "VIN")
			(pintype "bidirectional")
		)
		(model "${KIPRJMOD}/3d/3225-oscillator.step"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz -90 0 0)
			)
		)
	)
	(footprint "Fiducial:Fiducial_1mm_Mask2mm"
		(layer "B.Cu")
		(at 130.35 166.55 180)
		(descr "Circular Fiducial, 1mm bare copper, 2mm soldermask opening (Level A)")
		(tags "fiducial")
		(property "Reference" "FID4"
			(at 0 2 0)
			(layer "B.SilkS")
			(hide yes)
		)
		(property "Value" "Fiducial"
			(at 0 -2 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Fiducial:Fiducial_1mm_Mask2mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Fiducial*")
		(sheetname "Root")
		(sheetfile "bitaxeHex.kicad_sch")
		(attr smd exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(solder_mask_margin 0.5)
			(clearance 0.5)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 64.125 105.4875 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R52"
			(at -3.3875 0 90)
			(layer "B.SilkS")
		)
		(property "Value" "10k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 161 "Net-(U15D-+)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 120.625 136.575 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R72"
			(at -3 0 90)
			(layer "B.SilkS")
		)
		(property "Value" "1k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 105 "/BM1366-3/BI3")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 75 "Net-(U21C--)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 126.63 144.89 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R58"
			(at -2.25 0.25 90)
			(layer "B.SilkS")
		)
		(property "Value" "10k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 115 "/BM1366-2/CO")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 163 "Net-(U21A-+)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 130.05 141.25 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R56"
			(at 2.375 -0.05 90)
			(layer "B.SilkS")
		)
		(property "Value" "1k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 71 "Net-(U21A--)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 98.825 100.97 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C61"
			(at 0.7 -2 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 39 "Net-(U12-VDD3_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 73 146.15)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C146"
			(at 0.8 2.5 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 35 "/BM1366-3/1V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 112.8 48.8 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP20"
			(at -2.85 -0.3 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 5 "/3V3")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 70.9 100.995 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C77"
			(at -0.105 -3.1 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 184 "Net-(U13-VDD2_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 182 "Net-(U13-VDD3_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 103.65 61.2 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP19"
			(at 2.9 -0.2 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 173 "Net-(U6-GPIO14{slash}TOUCH14{slash}ADC2_CH3{slash}FSPIWP{slash}FSPIDQS{slash}SUBSPIWP)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 90.2 142.2)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R64"
			(at 0.1 1.2 0)
			(layer "B.SilkS")
		)
		(property "Value" "115k"
			(at 0 -1.17 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "YAG2956CT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-07115KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 166 "Net-(U24-ADJ)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 101 160.7 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C127"
			(at 0.1 -2.5 -90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 152 "Net-(U22-VDD1_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 151 "Net-(U22-VDD2_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 105.05 65.1 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP18"
			(at 2.6 0 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 172 "Net-(U6-GPIO12{slash}TOUCH12{slash}ADC2_CH1{slash}FSPICLK{slash}FSPIIO6{slash}SUBSPICLK)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 101.2 141.3 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP55"
			(at -2.5 -0.025 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 35 "/BM1366-3/1V8")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 112.625 90.325 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C47"
			(at 2.41 0.04 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 23 "/BM1366-1/0V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 87.3375 84.475 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C54"
			(at 0.1 2 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 2.794 0 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 24 "/BM1366-1/1V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 101.8 114.4 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP45"
			(at -0.7 1.4 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 28 "/BM1366-2/1V8")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 85.85 117 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP46"
			(at -0.225 1.225 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 27 "/BM1366-2/0V8")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 118.2 47.7 -90)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP24"
			(at -0.35 2.55 180)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 90)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 90)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 270)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 3 "/ESP32/EN")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 117 128.78 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C79"
			(at 0.12 -2 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 44 "Net-(U18-VDD1_0)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 85.2 158.82 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C135"
			(at 0.88 -2.5 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 150 "Net-(U22-VDD3_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 151 "Net-(U22-VDD2_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 90.5 111.2 180)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R40"
			(at 2.3 0.2 180)
			(layer "B.SilkS")
		)
		(property "Value" "402K"
			(at 0 -1.17 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "YAG3151CT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-07402KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 180)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 28 "/BM1366-2/1V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 180)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 143 "Net-(U16-ADJ)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 88.1875 88.715 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP35"
			(at 2.4125 0.34 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 23 "/BM1366-1/0V8")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 62.775 117.19 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R43"
			(at -2.56 -0.05 90)
			(layer "B.SilkS")
		)
		(property "Value" "10k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 145 "Net-(U15B-+)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 86.175 70.55 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C43"
			(at 0.025 0.875 180)
			(layer "B.SilkS")
		)
		(property "Value" "311-3342-1-ND"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Fan")
		(sheetfile "fan.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0.25 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 55 "/VIN")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 115.9 131.7 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C85"
			(at 2.3 -0.3 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 45 "Net-(U18-VDD2_0)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 47 "Net-(U18-VDD3_0)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 96.9 145.8 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C121"
			(at -2.8 0 90)
			(layer "B.SilkS")
		)
		(property "Value" "0.1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 69.475 116.875 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP50"
			(at -0.25 1.325 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 162 "Net-(U20-INV_CLKO)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 103.375 90.35 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C58"
			(at 2.4 -0.1 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 23 "/BM1366-1/0V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 82.3 160.6 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C141"
			(at 0 -2.5 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 152 "Net-(U22-VDD1_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 2 "/VDD")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 103.9 56.55 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP15"
			(at 2.8 0 180)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 180)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 180)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 120 "Net-(U6-GPIO7{slash}TOUCH7{slash}ADC1_CH6)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 99.65 131.495 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C105"
			(at 1.03 2.2 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 49 "Net-(U18-VDD3_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 65.275 117.19 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R36"
			(at -2.485 0.1 90)
			(layer "B.SilkS")
		)
		(property "Value" "10k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 109 "/BM1366-1/CO")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 142 "Net-(U15A-+)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 101.3 106.75)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C62"
			(at 0.4 -1.225 0)
			(layer "B.SilkS")
		)
		(property "Value" "0.1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 90.3 139.7 180)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R66"
			(at 0.046359 -1.3 180)
			(layer "B.SilkS")
		)
		(property "Value" "402K"
			(at 0 -1.17 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "YAG3151CT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-07402KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 180)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 35 "/BM1366-3/1V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 180)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 166 "Net-(U24-ADJ)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 128.675 136.575 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R76"
			(at -2.92 -0.12 90)
			(layer "B.SilkS")
		)
		(property "Value" "1k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 82 "Net-(R76-Pad1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 76 "Net-(U21D--)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 121.03 138.9 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C148"
			(at 0 2.5 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 2 "/VDD")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 53.475 73.75 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R10"
			(at 0 -1.85 180)
			(layer "B.SilkS")
		)
		(property "Value" "26.1K"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-26.1KLRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-0726K1L"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 197 "Net-(U3-MSEL1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 209 "/Power/AGND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Package_TO_SOT_SMD:TSOT-23-5"
		(layer "B.Cu")
		(at 94.9375 89.775 180)
		(descr "TSOT, 5 Pin (https://www.jedec.org/sites/default/files/docs/MO-193D.pdf variant AB), generated with kicad-footprint-generator ipc_gullwing_generator.py")
		(tags "TSOT TO_SOT_SMD")
		(property "Reference" "U10"
			(at -0.3375 -2.425 180)
			(layer "B.SilkS")
		)
		(property "Value" "AP7331"
			(at -3.81 -2.4 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Package_TO_SOT_SMD:TSOT-23-5"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.digikey.com/en/products/detail/diodes-incorporated/AP7331-WG-7/2270813"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "AP7331-WG-7DICT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "AP7331-WG-7"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -1.1375 0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pinfunction "VIN")
			(pintype "power_in")
		)
		(pad "2" smd roundrect
			(at -1.1375 0 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pinfunction "GND")
			(pintype "bidirectional")
		)
		(pad "3" smd roundrect
			(at -1.1375 -0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pinfunction "EN")
			(pintype "input")
		)
		(pad "4" smd roundrect
			(at 1.1375 -0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 131 "Net-(U10-ADJ)")
			(pinfunction "ADJ")
			(pintype "bidirectional")
		)
		(pad "5" smd roundrect
			(at 1.1375 0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 23 "/BM1366-1/0V8")
			(pinfunction "VOUT")
			(pintype "power_out")
		)
		(model "${KICAD6_3DMODEL_DIR}/Package_TO_SOT_SMD.3dshapes/TSOT-23-5.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 120.2 59.75 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP28"
			(at 2.8 -0.1 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 177 "Net-(U6-SPIIO7{slash}GPIO36{slash}FSPICLK{slash}SUBSPICLK)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "bitaxe:O 25,0-JO32-B-1V3-1-T1-LF"
		(layer "B.Cu")
		(at 115.2 143.5 90)
		(property "Reference" "U26"
			(at 2.7 -0.3 0)
			(unlocked yes)
			(layer "B.SilkS")
		)
		(property "Value" "25MHz"
			(at 0.65 4.29 -90)
			(unlocked yes)
			(layer "B.Fab")
		)
		(property "Footprint" "bitaxe:O 25,0-JO32-B-1V3-1-T1-LF"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.jauch.com/downloadfile/5ef1edcfb8e2f73163c8ce8009ef659d1/jo32-1.8-3.3v.pdf"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "1908-O250-JO32-B-1V3-1-T1-LFCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "O 25,0-JO32-B-1V3-1-T1-LF"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 5.36 2.32 -90)
			(unlocked yes)
			(layer "B.Fab")
		)
		(pad "1" smd rect
			(at -1.15 -0.95 90)
			(size 1.3 1.1)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 35 "/BM1366-3/1V8")
			(pinfunction "EN")
			(pintype "bidirectional")
		)
		(pad "2" smd rect
			(at 1.15 -0.95 90)
			(size 1.3 1.1)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 95 "/BM1366-2/VDD2")
			(pinfunction "GND")
			(pintype "bidirectional")
		)
		(pad "3" smd rect
			(at 1.15 0.95 90)
			(size 1.3 1.1)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 139 "/BM1366-3/CLKI3")
			(pinfunction "OUT")
			(pintype "bidirectional")
		)
		(pad "4" smd rect
			(at -1.15 0.95 90)
			(size 1.3 1.1)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 35 "/BM1366-3/1V8")
			(pinfunction "VIN")
			(pintype "bidirectional")
		)
		(model "${KIPRJMOD}/3d/3225-oscillator.step"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz -90 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 100 100 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R33"
			(at 1.45 -1.175 180)
			(layer "B.SilkS")
		)
		(property "Value" "2k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "YAG2303CT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RT0402BRD072KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 140 "Net-(U12-NRSTO)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 124.1 74.9 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C25"
			(at -1.8 0 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 10 "/1V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 73.7 163.8 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C134"
			(at -2.9 0 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 2 "/VDD")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 63.125 87.425 180)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R2"
			(at -2.75 0.075 0)
			(layer "B.SilkS")
		)
		(property "Value" "0R"
			(at 0 -1.17 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-0.0JRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-070RL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 180)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 6 "/SCL")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 180)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 217 "/Power/PMB_SCL")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 90.3 116)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R41"
			(at 0 1.15 0)
			(layer "B.SilkS")
		)
		(property "Value" "115k"
			(at 0 -1.17 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "YAG2956CT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-07115KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 144 "Net-(U17-ADJ)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 27 "/BM1366-2/0V8")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 97.575 103.97 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C56"
			(at -0.575 -1.85 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0.25 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 37 "Net-(U12-VDD1_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 98.55 130.495 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C103"
			(at 0.38 2.4 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 53 "Net-(U18-VDD2_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 49 "Net-(U18-VDD3_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 114.925 101.405 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C46"
			(at 0.03 -3 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 25 "Net-(U12-VDD3_0)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 30 "Net-(U12-VDD2_0)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 117.1 156.62 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C115"
			(at -0.1 -2.4 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 68 "Net-(U22-VDD3_0)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 86.475 150.625)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP56"
			(at 0.7 1.7 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 190 "Net-(U25-ADDR0)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 82.1 118.375 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C104"
			(at 2.95 -0.225 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 -0.25 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 28 "/BM1366-2/1V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 116.2 136.625 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP42"
			(at 2.575 -0.05 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 134 "Net-(U18-CLKO)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 69.7 102.12 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C75"
			(at -0.33 -1.925 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 186 "Net-(U13-VDD1_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 184 "Net-(U13-VDD2_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 89.4375 90.275 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C53"
			(at 1.6 0.3625 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 2.794 0 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 23 "/BM1366-1/0V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 125.38 132.91 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R74"
			(at -3.71 0 90)
			(layer "B.SilkS")
		)
		(property "Value" "10k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 168 "Net-(U21D-+)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 126.45 51.225 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP25"
			(at 1.8 -1.675 180)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 15 "/ESP32/P_TX")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Package_TO_SOT_SMD:TSOT-23-5"
		(layer "B.Cu")
		(at 94.4 117.3 180)
		(descr "TSOT, 5 Pin (https://www.jedec.org/sites/default/files/docs/MO-193D.pdf variant AB), generated with kicad-footprint-generator ipc_gullwing_generator.py")
		(tags "TSOT TO_SOT_SMD")
		(property "Reference" "U17"
			(at 0 -2.5 180)
			(layer "B.SilkS")
		)
		(property "Value" "AP7331"
			(at 0 -2.54 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Package_TO_SOT_SMD:TSOT-23-5"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.digikey.com/en/products/detail/diodes-incorporated/AP7331-WG-7/2270813"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "AP7331-WG-7DICT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "AP7331-WG-7"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -1.1375 0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pinfunction "VIN")
			(pintype "power_in")
		)
		(pad "2" smd roundrect
			(at -1.1375 0 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pinfunction "GND")
			(pintype "bidirectional")
		)
		(pad "3" smd roundrect
			(at -1.1375 -0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pinfunction "EN")
			(pintype "input")
		)
		(pad "4" smd roundrect
			(at 1.1375 -0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 144 "Net-(U17-ADJ)")
			(pinfunction "ADJ")
			(pintype "bidirectional")
		)
		(pad "5" smd roundrect
			(at 1.1375 0.95 180)
			(size 1.325 0.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 27 "/BM1366-2/0V8")
			(pinfunction "VOUT")
			(pintype "power_out")
		)
		(model "${KICAD6_3DMODEL_DIR}/Package_TO_SOT_SMD.3dshapes/TSOT-23-5.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 128.6 130.8 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R77"
			(at -3 -0.1 90)
			(layer "B.SilkS")
		)
		(property "Value" "1k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 112 "/BM1366-2/RI")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 82 "Net-(R76-Pad1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_1210_3225Metric"
		(layer "B.Cu")
		(at 63.7 63.6)
		(descr "Capacitor SMD 1210 (3225 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C7"
			(at 3.125 -0.025 0)
			(layer "B.SilkS")
		)
		(property "Value" "22uF"
			(at 0 -2.3 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_1210_3225Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "490-3889-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "GRM32ER61E226KE15L"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -1.475 0)
			(size 1.15 2.7)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.2173913043)
			(net 55 "/VIN")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 1.475 0)
			(size 1.15 2.7)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.2173913043)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_1210_3225Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.5mm"
		(layer "B.Cu")
		(at 64.7 159.1)
		(descr "SMD pad as test Point, diameter 1.5mm")
		(tags "test point SMD pad")
		(property "Reference" "TP59"
			(at -3.2 -0.1 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.75 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.65 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0)
			(size 1.5 1.5)
			(layers "B.Cu" "B.Mask")
			(net 74 "/BM1366-3/NRSTO3")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 59.25 108.7 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R50"
			(at -2.5 0 90)
			(layer "B.SilkS")
		)
		(property "Value" "1k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 101 "/BM1366-2/BI2")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 58 "Net-(U15C--)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 90.2 147.4)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R63"
			(at 0.175 1.175 0)
			(layer "B.SilkS")
		)
		(property "Value" "115k"
			(at 0 -1.17 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "YAG2956CT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-07115KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 165 "Net-(U23-ADJ)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 53.225 76.025 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R5"
			(at -0.05 -1.6 180)
			(layer "B.SilkS")
		)
		(property "Value" "17.8K"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "RMCF0402FT17K8CT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RMCF0402FT17K8"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 7 "Net-(U3-BP1V5)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 197 "Net-(U3-MSEL1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 74.45 90.35 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C74"
			(at 2.275 0.05 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 24 "/BM1366-1/1V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 103.6 118.5)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C89"
			(at 0.7 2.1 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 28 "/BM1366-2/1V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 108.7 50.9)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C33"
			(at -2.35 -0.05 180)
			(layer "B.SilkS")
		)
		(property "Value" "0.1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 5 "/3V3")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 86.1 137.345 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C93"
			(at -1.05 1.125 90)
			(layer "B.SilkS")
		)
		(property "Value" "0.1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 58.05 113.2 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R42"
			(at 2.375 0.2 90)
			(layer "B.SilkS")
		)
		(property "Value" "1k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 50 "Net-(U15B--)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 98.55 128.495 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C98"
			(at -1.47 1.45 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 57 "Net-(U18-VDD1_1)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:CP_Elec_6.3x7.7"
		(layer "B.Cu")
		(at 85.6 65.5 180)
		(descr "SMD capacitor, aluminum electrolytic, Nichicon, 6.3x7.7mm")
		(tags "capacitor electrolytic")
		(property "Reference" "C42"
			(at 3.05 -4.25 180)
			(layer "B.SilkS")
		)
		(property "Value" "220uF"
			(at 0 -4.35 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:CP_Elec_6.3x7.7"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.we-online.com/components/products/datasheet/865080345012.pdf"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "732-8422-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "HEIGHT" "7.7mm"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "865080345012"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "CP_*")
		(sheetname "Fan")
		(sheetfile "fan.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -2.7 0 180)
			(size 3.5 1.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.15625)
			(net 55 "/VIN")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 2.7 0 180)
			(size 3.5 1.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.15625)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/CP_Elec_6.3x7.7.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 103.7 146.8)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C123"
			(at 0.1 -2.5 -90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 35 "/BM1366-3/1V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "bitaxe:74438357082"
		(layer "B.Cu")
		(at 111.95 75.95 -90)
		(property "Reference" "L1"
			(at -3.15 0 0)
			(unlocked yes)
			(layer "B.SilkS")
		)
		(property "Value" "8.2 uH"
			(at 0.26 -3.21 90)
			(unlocked yes)
			(layer "B.Fab")
		)
		(property "Footprint" "bitaxe:74438357082"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://www.we-online.com/components/products/datasheet/74438357082.pdf"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "732-11745-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "78438357082"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Choke_* *Coil* Inductor_* L_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at -0.03 0 180)
			(unlocked yes)
			(layer "B.Fab")
		)
		(pad "1" smd rect
			(at -1.535 0 270)
			(size 1.68 3.7)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 200 "Net-(U1-SW)")
			(pinfunction "1")
			(pintype "passive")
			(thermal_bridge_angle 45)
		)
		(pad "2" smd rect
			(at 1.535 0 270)
			(size 1.68 3.7)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(net 4 "/5V")
			(pinfunction "2")
			(pintype "passive")
			(thermal_bridge_angle 45)
		)
		(model "${KIPRJMOD}/3d/IND_4030-WE-MAPI_WRE.step"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 105.4 54.4 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP13"
			(at -2.85 -0.05 180)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 180)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 180)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 81 "Net-(U6-GPIO5{slash}TOUCH5{slash}ADC1_CH4)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 91.3375 90.775)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R29"
			(at 0.4625 1.275 0)
			(layer "B.SilkS")
		)
		(property "Value" "115k"
			(at 6.096 0.127 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "YAG2956CT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-07115KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 131 "Net-(U10-ADJ)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 90.5 145)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R65"
			(at 0 1.15 0)
			(layer "B.SilkS")
		)
		(property "Value" "115k"
			(at 0 -1.17 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "YAG2956CT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-07115KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 165 "Net-(U23-ADJ)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 34 "/BM1366-3/0V8")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 115.27205 77.8102 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C11"
			(at 1.5398 0.22205 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 180)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 180)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0603_1608Metric"
		(layer "B.Cu")
		(at 103 75)
		(descr "Capacitor SMD 0603 (1608 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C6"
			(at -1.075 1.3 0)
			(layer "B.SilkS")
		)
		(property "Value" "0.1uF"
			(at 0 -1.43 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM15BR71H104KTCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM15BR71H104KT"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.775 0)
			(size 0.9 0.95)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.775 0)
			(size 0.9 0.95)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 55 "/VIN")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0603_1608Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 119.6 116.6)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP44"
			(at 2.744192 0 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 187 "Net-(U18-ADDR1)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 119.2 141.225 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R60"
			(at 2.25 0 90)
			(layer "B.SilkS")
		)
		(property "Value" "1k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 73 "Net-(U21B--)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 55.275 58.2 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R6"
			(at -2.075 -0.025 90)
			(layer "B.SilkS")
		)
		(property "Value" "10K"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "RMCF0402FT10K0CT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RMCF0402FT10K0"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 209 "/Power/AGND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 208 "Net-(U3-MSEL2)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 130.1 75.4 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP4"
			(at -2.4 -0.1 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 10 "/1V8")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 82.4 146.6 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C139"
			(at 0.6 -2.5 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 35 "/BM1366-3/1V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 86.35 103.255 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C71"
			(at 1.63 0 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at -0.182 -20.097 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 37 "Net-(U12-VDD1_1)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 120.55 141.225 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R67"
			(at -2.25 0 -90)
			(layer "B.SilkS")
		)
		(property "Value" "1k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 104 "/BM1366-3/NRSTI3")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 73 "Net-(U21B--)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 63.125 88.675 180)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R1"
			(at -2.75 0.025 0)
			(layer "B.SilkS")
		)
		(property "Value" "0R"
			(at 0 -1.17 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-0.0JRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-070RL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 180)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 22 "/SDA")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 180)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 218 "/Power/PMB_SDA")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 99.05 120.525 180)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R46"
			(at -0.05 1.85 90)
			(layer "B.SilkS")
		)
		(property "Value" "2k"
			(at 0 -1.17 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "YAG2303CT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RT0402BRD072KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 180)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 180)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 148 "Net-(U18-NRSTI)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 101.1 146.8 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C128"
			(at -0.15 2.425 90)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 34 "/BM1366-3/0V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.5mm"
		(layer "B.Cu")
		(at 68.3 153.2)
		(descr "SMD pad as test Point, diameter 1.5mm")
		(tags "test point SMD pad")
		(property "Reference" "TP61"
			(at -2.7 -0.3 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.75 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.5mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.65 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0)
			(size 1.5 1.5)
			(layers "B.Cu" "B.Mask")
			(net 96 "/BM1366-3/RI3")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 112.8 50.9 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP21"
			(at -3 -0.3 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 1 "GND")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 125.38 144.89 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R57"
			(at -2.25 0.25 90)
			(layer "B.SilkS")
		)
		(property "Value" "10k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 2 "/VDD")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 163 "Net-(U21A-+)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_1210_3225Metric"
		(layer "B.Cu")
		(at 74.75 68.35 90)
		(descr "Capacitor SMD 1210 (3225 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C29"
			(at 3.85 -1.8 0)
			(layer "B.SilkS")
		)
		(property "Value" "47uF"
			(at 0 -2.3 -90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_1210_3225Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "DK" "490-6539-1-ND"
			(at 0 0 -90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "GRM32ER61C476KE15L"
			(at 0 0 -90)
			(unlocked yes)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 -90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -1.475 0 90)
			(size 1.15 2.7)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.217391)
			(net 2 "/VDD")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 1.475 0 90)
			(size 1.15 2.7)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.217391)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD8_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_1210_3225Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 115.9 159.82 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C119"
			(at 0 -2.6 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 69 "Net-(U22-VDD2_0)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 70 "Net-(U22-VDD1_0)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 115.9 129.78 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C80"
			(at 0.62 -2.1 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 44 "Net-(U18-VDD1_0)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 45 "Net-(U18-VDD2_0)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 114.12 159.82 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C120"
			(at 0.82 -1.18 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 70 "Net-(U22-VDD1_0)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 2 "/VDD")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 129.4 93.2 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP9"
			(at 2.7 0 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 31 "/NRSTI")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 120.2 61.8 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP27"
			(at 2.7 0 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 176 "Net-(U6-SPIIO6{slash}GPIO35{slash}FSPID{slash}SUBSPID)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 129.5 90.9 180)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP8"
			(at 2.7 0 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0 180)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 33 "/CI")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 125.7 81.1 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C34"
			(at -2.5 0.1 0)
			(layer "B.SilkS")
		)
		(property "Value" "311-3342-1-ND"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "ESP32")
		(sheetfile "esp32.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 10 "/1V8")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0805_2012Metric"
		(layer "B.Cu")
		(at 103.15 72.9 180)
		(descr "Capacitor SMD 0805 (2012 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf, https://docs.google.com/spreadsheets/d/1BsfQQcO9C6DZCsRaXUlFlo91Tg2WpOkGARC1WS5S8t0/edit?usp=sharing), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C1"
			(at -2.65 0 0)
			(layer "B.SilkS")
		)
		(property "Value" "10uF"
			(at 0 -1.68 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "490-18664-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "GRM21BR61H106ME43L"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.95 0 180)
			(size 1 1.45)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 55 "/VIN")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.95 0 180)
			(size 1 1.45)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0805_2012Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 59.275 113.21 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R45"
			(at -2.39 0.025 90)
			(layer "B.SilkS")
		)
		(property "Value" "1k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-1.00KLRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402FR-071KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 100 "/BM1366-2/NRSTI2")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 50 "Net-(U15B--)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 124.13 132.91 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R70"
			(at -3.21 -0.05 90)
			(layer "B.SilkS")
		)
		(property "Value" "10k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 2 "/VDD")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 167 "Net-(U21C-+)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "TestPoint:TestPoint_Pad_D1.0mm"
		(layer "B.Cu")
		(at 88.35 149.6)
		(descr "SMD pad as test Point, diameter 1.0mm")
		(tags "test point SMD pad")
		(property "Reference" "TP57"
			(at 2.5 0.25 0)
			(layer "B.SilkS")
		)
		(property "Value" "TestPoint"
			(at 0 -1.55 0)
			(layer "B.Fab")
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_D1.0mm"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property ki_fp_filters "Pin* Test*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr exclude_from_pos_files exclude_from_bom)
		(fp_text user "${REFERENCE}"
			(at 0 1.45 0)
			(layer "B.Fab")
		)
		(pad "1" smd circle
			(at 0 0)
			(size 1 1)
			(layers "B.Cu" "B.Mask")
			(net 191 "Net-(U25-ADDR1)")
			(pinfunction "1")
			(pintype "passive")
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 64.025 117.2 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R35"
			(at 3.35 -0.05 90)
			(layer "B.SilkS")
		)
		(property "Value" "10k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 142 "Net-(U15A-+)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_Tantalum_SMD:CP_EIA-7343-31_Kemet-D_Pad2.25x2.55mm_HandSolder"
		(layer "B.Cu")
		(at 93 135.7)
		(descr "Tantalum Capacitor SMD Kemet-D (7343-31 Metric), IPC_7351 nominal, (Body size from: http://www.kemet.com/Lists/ProductCatalog/Attachments/253/KEM_TC101_STD.pdf), generated with kicad-footprint-generator")
		(tags "capacitor tantalum")
		(property "Reference" "C101"
			(at -0.75 3.025 180)
			(layer "B.SilkS")
		)
		(property "Value" "330uF"
			(at 0 -3.1 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_Tantalum_SMD:CP_EIA-7343-31_Kemet-D_Pad2.25x2.55mm_HandSolder"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "718-1028-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "293D337X9010E2TE3"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "CP_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -3.2 0)
			(size 2.25 2.55)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.1111111111)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 3.2 0)
			(size 2.25 2.55)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.1111111111)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_Tantalum_SMD.3dshapes/CP_EIA-7343-31_Kemet-D.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 116 102.63 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C49"
			(at 0.28 -1.875 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 30 "Net-(U12-VDD2_0)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 36 "Net-(U12-VDD1_0)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 101.3 108.45 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C65"
			(at -0.3 -1.375 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 65.375 105.4875 -90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R53"
			(at -2.5 0 90)
			(layer "B.SilkS")
		)
		(property "Value" "10k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 102 "/BM1366-2/RO2")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 270)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 161 "Net-(U15D-+)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 101.675 135.05)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C95"
			(at 1.875 -0.95 0)
			(layer "B.SilkS")
		)
		(property "Value" "0.1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:CP_Elec_6.3x5.9"
		(layer "B.Cu")
		(at 70.9 83.25 180)
		(descr "SMD capacitor, aluminum electrolytic, Panasonic C6, 6.3x5.9mm")
		(tags "capacitor electrolytic")
		(property "Reference" "C30"
			(at 0.55 -4.25 180)
			(layer "B.SilkS")
		)
		(property "Value" "180uF"
			(at 0 -4.35 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:CP_Elec_6.3x5.9"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" "https://industrial.panasonic.com/cdbs/www-data/pdf/AAB8000/AAB8000C177.pdf"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "P16479CT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "HEIGHT" "5.9mm"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "16SVPF180M"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "CP_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -2.8 0 180)
			(size 3.5 1.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.15625)
			(net 2 "/VDD")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 2.8 0 180)
			(size 3.5 1.6)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.15625)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/CP_Elec_6.3x5.9.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 114.1 131.7 180)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C86"
			(at 0.4 -1.3 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 180)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 47 "Net-(U18-VDD3_0)")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 180)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 61.525 117.19 90)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R44"
			(at -2.485 -0.1 90)
			(layer "B.SilkS")
		)
		(property "Value" "10k"
			(at 0 -1.17 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 108 "/BM1366-1/NRSTO")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0 90)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 145 "Net-(U15B-+)")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 126.8 67.8)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C21"
			(at -0.3 -1.1 0)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "Power")
		(sheetfile "power.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 5 "/3V3")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 86.5 146.175 -90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C136"
			(at 1.775 -0.575 180)
			(layer "B.SilkS")
		)
		(property "Value" "1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 -90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "587-5514-1-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "EMK105BJ105MV-F"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-3")
		(sheetfile "bm1366-3.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 34 "/BM1366-3/0V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 270)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 95 "/BM1366-2/VDD2")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 97.5 111.6 90)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C82"
			(at -1.6 0.1 0)
			(layer "B.SilkS")
		)
		(property "Value" "0.1uF"
			(at 0 -1.16 90)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 90)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-2")
		(sheetfile "bm1366-2.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 90)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 94 "/BM1366-1/VDD1")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0 90)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Resistor_SMD:R_0402_1005Metric"
		(layer "B.Cu")
		(at 90.35 63.025)
		(descr "Resistor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 72, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "resistor")
		(property "Reference" "R27"
			(at 2.275 0.025 0)
			(layer "B.SilkS")
		)
		(property "Value" "10k"
			(at 0 -1.17 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Resistor_SMD:R_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "311-10KJRCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "RC0402JR-0710KL"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "R_*")
		(sheetname "Fan")
		(sheetfile "fan.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 41 "/Fan/FAN1_PWM")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.51 0)
			(size 0.54 0.64)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 4 "/5V")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Resistor_SMD.3dshapes/R_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(footprint "Capacitor_SMD:C_0402_1005Metric"
		(layer "B.Cu")
		(at 123 102)
		(descr "Capacitor SMD 0402 (1005 Metric), square (rectangular) end terminal, IPC_7351 nominal, (Body size source: IPC-SM-782 page 76, https://www.pcb-3d.com/wordpress/wp-content/uploads/ipc-sm-782a_amendment_1_and_2.pdf), generated with kicad-footprint-generator")
		(tags "capacitor")
		(property "Reference" "C73"
			(at 2.15 -0.55 0)
			(layer "B.SilkS")
		)
		(property "Value" "0.1uF"
			(at 0 -1.16 0)
			(layer "B.Fab")
		)
		(property "Footprint" "Capacitor_SMD:C_0402_1005Metric"
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Datasheet" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "Description" ""
			(at 0 0 0)
			(unlocked yes)
			(layer "F.Fab")
			(hide yes)
		)
		(property "DK" "478-KGM05AR71C104KHCT-ND"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property "PARTNO" "KGM05AR71C104KH"
			(at 0 0 0)
			(layer "B.Fab")
			(hide yes)
		)
		(property ki_fp_filters "C_*")
		(sheetname "BM1366-1")
		(sheetfile "bm1366-1.kicad_sch")
		(attr smd)
		(fp_text user "${REFERENCE}"
			(at 0 0 0)
			(layer "B.Fab")
		)
		(pad "1" smd roundrect
			(at -0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 24 "/BM1366-1/1V8")
			(pintype "passive")
		)
		(pad "2" smd roundrect
			(at 0.48 0)
			(size 0.56 0.62)
			(layers "B.Cu" "B.Paste" "B.Mask")
			(roundrect_rratio 0.25)
			(net 1 "GND")
			(pintype "passive")
		)
		(model "${KICAD6_3DMODEL_DIR}/Capacitor_SMD.3dshapes/C_0402_1005Metric.wrl"
			(offset
				(xyz 0 0 0)
			)
			(scale
				(xyz 1 1 1)
			)
			(rotate
				(xyz 0 0 0)
			)
		)
	)
	(gr_line
		(start 50 174.5)
		(end 50 47)
		(layer "Edge.Cuts")
	)
	(gr_arc
		(start 51 175.5)
		(mid 50.292893 175.207107)
		(end 50 174.5)
		(layer "Edge.Cuts")
	)
	(gr_line
		(start 133.5 175.5)
		(end 51 175.5)
		(layer "Edge.Cuts")
	)
	(gr_line
		(start 51 46)
		(end 133.5 46)
		(layer "Edge.Cuts")
	)
	(gr_line
		(start 134.5 47)
		(end 134.5 174.5)
		(layer "Edge.Cuts")
	)
	(gr_arc
		(start 50 47)
		(mid 50.292893 46.292893)
		(end 51 46)
		(layer "Edge.Cuts")
	)
	(gr_arc
		(start 134.5 174.5)
		(mid 134.207107 175.207107)
		(end 133.5 175.5)
		(layer "Edge.Cuts")
	)
	(gr_arc
		(start 133.5 46)
		(mid 134.207107 46.292893)
		(end 134.5 47)
		(layer "Edge.Cuts")
	)
	(gr_text "1"
		(at 118 175.15 0)
		(layer "F.Cu")
	)
	(gr_text "2"
		(at 119.5 175.15 0)
		(layer "In1.Cu")
	)
	(gr_text "3"
		(at 122.45 175.15 0)
		(layer "In2.Cu")
	)
	(gr_text "4"
		(at 124 175.15 0)
		(layer "B.Cu")
	)
	(gr_text "AL"
		(at 60.325 91.925 0)
		(layer "B.SilkS")
	)
	(gr_text "CI"
		(at 132.2 91.5 0)
		(layer "B.SilkS")
	)
	(gr_text "NRST"
		(at 134 93.8 0)
		(layer "B.SilkS")
	)
	(gr_text "SDA"
		(at 61.475 89.425 0)
		(layer "B.SilkS")
	)
	(gr_text "RO"
		(at 132.8 89.2 0)
		(layer "B.SilkS")
	)
	(gr_text "GND"
		(at 61.55 94.175 0)
		(layer "B.SilkS")
	)
	(gr_text "SCL"
		(at 53.1 89.425 0)
		(layer "B.SilkS")
	)
	(gr_text "+"
		(at 81.8 72.5 0)
		(layer "F.SilkS")
	)
	(gr_text "GND"
		(at 118.65 70.9 -90)
		(layer "F.SilkS")
	)
	(gr_text "+5V"
		(at 121.4 70.8 -90)
		(layer "F.SilkS")
	)
	(gr_text "303"
		(at 70.6 174.95 0)
		(layer "F.SilkS")
	)
	(gr_text "-"
		(at 81.9 67.45 0)
		(layer "F.SilkS")
	)
	(gr_text "BAP"
		(at 113.4 72.6 0)
		(layer "F.SilkS")
	)
	(gr_text "Slide rail clearance"
		(at 133.4 165.2 90)
		(layer "F.Fab")
	)
	(gr_text "heatsink footprint"
		(at 114.287 169.868 0)
		(layer "F.Fab")
	)
	(gr_text "Slide rail clearance"
		(at 52.4 161.8 90)
		(layer "F.Fab")
	)
	(gr_text "Max component height in\nthese areas is 7mm on back"
		(at 78.925 193.425 0)
		(layer "User.3")
	)
	(gr_text "Max component height in\nthis area is 9mm on back"
		(at 78.725 181.275 0)
		(layer "User.3")
	)
	(dimension
		(type orthogonal)
		(layer "User.2")
		(pts
			(xy 62 153) (xy 122.5 153)
		)
		(height 27.2)
		(orientation 0)
		(gr_text "60.5000 mm"
			(at 92.25 179.05 0)
			(layer "User.2")
		)
		(format
			(prefix "")
			(suffix "")
			(units 3)
			(units_format 1)
			(precision 4)
		)
		(style
			(thickness 0.15)
			(arrow_length 1.27)
			(text_position_mode 0)
			(extension_height 0.58642)
			(extension_offset 0.5) keep_text_aligned)
	)
	(dimension
		(type orthogonal)
		(layer "User.2")
		(pts
			(xy 122.5 153) (xy 122.5 170)
		)
		(height 20.8)
		(orientation 1)
		(gr_text "17.0000 mm"
			(at 142.15 161.5 90)
			(layer "User.2")
		)
		(format
			(prefix "")
			(suffix "")
			(units 3)
			(units_format 1)
			(precision 4)
		)
		(style
			(thickness 0.15)
			(arrow_length 1.27)
			(text_position_mode 0)
			(extension_height 0.58642)
			(extension_offset 0.5) keep_text_aligned)
	)
	(dimension
		(type orthogonal)
		(layer "User.2")
		(pts
			(xy 132.9 175.5) (xy 132.9 46)
		)
		(height 23.5)
		(orientation 1)
		(gr_text "129.5000 mm"
			(at 155.25 110.75 90)
			(layer "User.2")
		)
		(format
			(prefix "")
			(suffix "")
			(units 3)
			(units_format 1)
			(precision 4)
		)
		(style
			(thickness 0.15)
			(arrow_length 1.27)
			(text_position_mode 0)
			(extension_height 0.58642)
			(extension_offset 0.5) keep_text_aligned)
	)
	(dimension
		(type orthogonal)
		(layer "User.2")
		(pts
			(xy 57.25 170) (xy 127.25 170)
		)
		(height 13.8)
		(orientation 0)
		(gr_text "70.0000 mm"
			(at 92.25 182.65 0)
			(layer "User.2")
		)
		(format
			(prefix "")
			(suffix "")
			(units 3)
			(units_format 1)
			(precision 4)
		)
		(style
			(thickness 0.15)
			(arrow_length 1.27)
			(text_position_mode 0)
			(extension_height 0.58642)
			(extension_offset 0.5) keep_text_aligned)
	)
	(dimension
		(type orthogonal)
		(layer "User.2")
		(pts
			(xy 50 173.7) (xy 134.5 173.7)
		)
		(height 18.6)
		(orientation 0)
		(gr_text "84.5000 mm"
			(at 92.25 191.15 0)
			(layer "User.2")
		)
		(format
			(prefix "")
			(suffix "")
			(units 3)
			(units_format 1)
			(precision 4)
		)
		(style
			(thickness 0.15)
			(arrow_length 1.27)
			(text_position_mode 0)
			(extension_height 0.58642)
			(extension_offset 0.5) keep_text_aligned)
	)
	(dimension
		(type orthogonal)
		(layer "User.2")
		(pts
			(xy 122.5 97) (xy 122.5 80)
		)
		(height 20.8)
		(orientation 1)
		(gr_text "17.0000 mm"
			(at 142.15 88.5 90)
			(layer "User.2")
		)
		(format
			(prefix "")
			(suffix "")
			(units 3)
			(units_format 1)
			(precision 4)
		)
		(style
			(thickness 0.15)
			(arrow_length 1.27)
			(text_position_mode 0)
			(extension_height 0.58642)
			(extension_offset 0.5) keep_text_aligned)
	)
	(dimension
		(type orthogonal)
		(layer "User.2")
		(pts
			(xy 122.5 125) (xy 122.5 97)
		)
		(height 20.8)
		(orientation 1)
		(gr_text "28.0000 mm"
			(at 142.15 111 90)
			(layer "User.2")
		)
		(format
			(prefix "")
			(suffix "")
			(units 3)
			(units_format 1)
			(precision 4)
		)
		(style
			(thickness 0.15)
			(arrow_length 1.27)
			(text_position_mode 0)
			(extension_height 0.58642)
			(extension_offset 0.5) keep_text_aligned)
	)
	(dimension
		(type orthogonal)
		(layer "User.2")
		(pts
			(xy 53.5 171.994) (xy 131 172)
		)
		(height 15.906)
		(orientation 0)
		(gr_text "77.5000 mm"
			(at 92.25 186.75 0)
			(layer "User.2")
		)
		(format
			(prefix "")
			(suffix "")
			(units 3)
			(units_format 1)
			(precision 4)
		)
		(style
			(thickness 0.15)
			(arrow_length 1.27)
			(text_position_mode 0)
			(extension_height 0.58642)
			(extension_offset 0.5) keep_text_aligned)
	)
	(dimension
		(type orthogonal)
		(layer "User.2")
		(pts
			(xy 122.5 153) (xy 122.5 125)
		)
		(height 20.8)
		(orientation 1)
		(gr_text "28.0000 mm"
			(at 142.15 139 90)
			(layer "User.2")
		)
		(format
			(prefix "")
			(suffix "")
			(units 3)
			(units_format 1)
			(precision 4)
		)
		(style
			(thickness 0.15)
			(arrow_length 1.27)
			(text_position_mode 0)
			(extension_height 0.58642)
			(extension_offset 0.5) keep_text_aligned)
	)
	(dimension
		(type orthogonal)
		(layer "User.2")
		(pts
			(xy 131 49.5) (xy 131 172)
		)
		(height 19.4)
		(orientation 1)
		(gr_text "122.5000 mm"
			(at 149.25 110.75 90)
			(layer "User.2")
		)
		(format
			(prefix "")
			(suffix "")
			(units 3)
			(units_format 1)
			(precision 4)
		)
		(style
			(thickness 0.15)
			(arrow_length 1.27)
			(text_position_mode 0)
			(extension_height 0.58642)
			(extension_offset 0.5) keep_text_aligned)
	)
	(zone
		(net 95)
		(net_name "/BM1366-2/VDD2")
		(locked yes)
		(layer "F.Cu")
		(hatch edge 0.5)
		(priority 3)
		(connect_pads yes
			(clearance 0.4)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.4)
		)
		(polygon
			(pts
				(xy 113.675 146.325) (xy 110.5 149.5) (xy 110.5 150.164) (xy 105.5 150.164) (xy 105.5 149.5) (xy 102.35 146.325)
				(xy 102.35 131.675) (xy 105.5 128.5) (xy 105.5 128) (xy 110.5 128) (xy 110.5 128.5) (xy 113.675 131.7)
			)
		)
	)
	(zone
		(net 95)
		(net_name "/BM1366-2/VDD2")
		(locked yes)
		(layer "F.Cu")
		(hatch edge 0.5)
		(priority 3)
		(connect_pads yes
			(clearance 0.4)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.4)
		)
		(polygon
			(pts
				(xy 83.825 146.175) (xy 80.5 149.5) (xy 80.5 150.164) (xy 75.5 150.164) (xy 75.5 149.5) (xy 72.45 146.425)
				(xy 72.45 131.55) (xy 75.5 128.5) (xy 75.5 128) (xy 80.5 128) (xy 80.5 128.5) (xy 83.825 131.825)
			)
		)
	)
	(zone
		(net 1)
		(net_name "GND")
		(locked yes)
		(layer "F.Cu")
		(hatch edge 0.5)
		(priority 3)
		(connect_pads yes
			(clearance 0.4)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.4)
		)
		(polygon
			(pts
				(xy 110.575 93.425) (xy 110.5 93.5) (xy 110.5 94.164) (xy 105.5 94.164) (xy 105.5 93.5) (xy 105.375 93.375)
				(xy 105.375 88.075) (xy 106.25 87.2) (xy 109.775 87.2) (xy 110.6 88.025)
			)
		)
	)
	(zone
		(net 1)
		(net_name "GND")
		(layer "F.Cu")
		(hatch edge 0.5)
		(priority 26)
		(connect_pads yes
			(clearance 0.2)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 83.25 54.5) (xy 83.05 54.5) (xy 82.95 54.6) (xy 82.95 55.7) (xy 82.45 55.7) (xy 82.45 53.6)
				(xy 82 53.15) (xy 81.25 53.15) (xy 81.25 52.3) (xy 84 52.3) (xy 84 53.2) (xy 83.35 53.2) (xy 82.95 53.6)
				(xy 82.95 54.15) (xy 83.1 54.3) (xy 83.25 54.3)
			)
		)
	)
	(zone
		(net 1)
		(net_name "GND")
		(layer "F.Cu")
		(hatch edge 0.5)
		(priority 27)
		(connect_pads yes
			(clearance 0.2)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 62.9 74.4) (xy 62.125 73.625) (xy 61.525 73.625) (xy 61.3 73.4) (xy 60.825 73.4) (xy 60.825 70.1)
				(xy 61.3 70.1) (xy 61.525 69.875) (xy 62.125 69.875) (xy 62.875 69.125) (xy 62.875 66.475) (xy 63.85 66.475)
				(xy 64.175 66.15) (xy 64.175 64.725) (xy 73.325 64.725) (xy 73.325 62.025) (xy 65.3 62.025) (xy 65.3 59.05)
				(xy 66.15 59.05) (xy 67.65 57.55) (xy 67.65 56) (xy 68.375 55.275) (xy 74.625 55.275) (xy 75.45 56.1)
				(xy 75.45 57.525) (xy 77.6125 59.6875) (xy 77.6 62.225) (xy 79.75 64.375) (xy 79.75 66.9) (xy 76.85 66.9)
				(xy 75.45 68.325) (xy 65 68.325) (xy 65 74.4)
			)
		)
	)
	(zone
		(net 94)
		(net_name "/BM1366-1/VDD1")
		(locked yes)
		(layer "F.Cu")
		(hatch edge 0.5)
		(priority 3)
		(connect_pads yes
			(clearance 0.4)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.4)
		)
		(polygon
			(pts
				(xy 83.875 118.125) (xy 80.5 121.5) (xy 80.5 122.164) (xy 75.5 122.164) (xy 75.5 121.5) (xy 72.6 118.6)
				(xy 72.6 103.4) (xy 75.5 100.5) (xy 75.5 100) (xy 80.5 100) (xy 80.5 100.5) (xy 83.875 103.875)
			)
		)
	)
	(zone
		(net 2)
		(net_name "/VDD")
		(layer "F.Cu")
		(hatch edge 0.5)
		(priority 10)
		(connect_pads yes
			(clearance 0.4)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 80.325 84.8) (xy 73.85 84.8) (xy 73.85 82) (xy 75.525 80.325) (xy 75.525 75.275) (xy 72.175 71.925)
				(xy 71.5 71.925) (xy 71.15 71.55) (xy 71.15 68.95) (xy 76.125 68.95) (xy 76.9 69.725) (xy 79.75 69.725)
				(xy 82.65 72.625) (xy 82.65 82.475)
			)
		)
	)
	(zone
		(net 1)
		(net_name "GND")
		(layer "F.Cu")
		(hatch edge 0.5)
		(priority 26)
		(connect_pads yes
			(clearance 0.2)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 92.15 173.3) (xy 91.95 173.3) (xy 91.85 173.4) (xy 91.85 174.5) (xy 91.35 174.5) (xy 91.35 172.4)
				(xy 90.9 171.95) (xy 90.15 171.95) (xy 90.15 171.1) (xy 92.9 171.1) (xy 92.9 172) (xy 92.25 172)
				(xy 91.85 172.4) (xy 91.85 172.95) (xy 92 173.1) (xy 92.15 173.1)
			)
		)
	)
	(zone
		(net 2)
		(net_name "/VDD")
		(locked yes)
		(layer "F.Cu")
		(hatch edge 0.5)
		(priority 3)
		(connect_pads yes
			(clearance 0.4)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.4)
		)
		(polygon
			(pts
				(xy 104.25 157.75) (xy 105.5 156.5) (xy 105.5 155.836) (xy 110.5 155.836) (xy 110.5 156.5) (xy 111.75 157.75)
				(xy 111.75 159.75) (xy 109.75 161.75) (xy 106.25 161.75) (xy 104.25 159.75)
			)
		)
	)
	(zone
		(net 94)
		(net_name "/BM1366-1/VDD1")
		(locked yes)
		(layer "F.Cu")
		(hatch edge 0.5)
		(priority 3)
		(connect_pads yes
			(clearance 0.4)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.4)
		)
		(polygon
			(pts
				(xy 113.725 118.275) (xy 110.5 121.5) (xy 110.5 122.164) (xy 105.5 122.164) (xy 105.5 121.5) (xy 102.35 118.325)
				(xy 102.35 103.65) (xy 105.5 100.5) (xy 105.5 100) (xy 110.5 100) (xy 110.5 100.5) (xy 113.725 103.75)
			)
		)
	)
	(zone
		(net 207)
		(net_name "/Power/SW")
		(layer "F.Cu")
		(hatch edge 0.5)
		(priority 7)
		(connect_pads yes
			(clearance 0.2)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 58.95 74.8) (xy 58.95 76) (xy 58.15 76.8) (xy 58.15 77.35) (xy 64.075 77.35) (xy 64.85 78.125)
				(xy 66.025 78.125) (xy 66.025 75.75) (xy 65.1 74.8)
			)
		)
	)
	(zone
		(net 4)
		(net_name "/5V")
		(layer "F.Cu")
		(hatch edge 0.5)
		(priority 13)
		(connect_pads yes
			(clearance 0.4)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 113 83.05) (xy 113 80.95) (xy 109.25 80.95) (xy 108 82.2) (xy 100.225 82.2) (xy 97.4 85.025)
				(xy 97.425 99.725) (xy 94.1 103.125) (xy 94.1 109.95) (xy 97 112.85) (xy 97.05 130.8) (xy 94.45 133.4)
				(xy 94.475 149.075) (xy 95 149.6) (xy 96.925 149.6) (xy 97.5 149.025) (xy 97.525 134.125) (xy 99.65 131.975)
				(xy 99.675 111.65) (xy 97.125 109.1) (xy 97.125 104.125) (xy 100.275 100.975) (xy 100.325 86.425)
				(xy 101.625 85.125) (xy 110.925 85.125)
			)
		)
	)
	(zone
		(net 55)
		(net_name "/VIN")
		(layer "F.Cu")
		(hatch edge 0.5)
		(priority 6)
		(connect_pads yes
			(clearance 0.2)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 61.375 68.75) (xy 61.8 68.325) (xy 61.8 58.65) (xy 62.125 58.325) (xy 64.25 58.325) (xy 65.725 56.875)
				(xy 65.725 55.425) (xy 64.75 54.45) (xy 58.625 54.45) (xy 57.75 55.325) (xy 57.75 65.95) (xy 58.675 66.875)
				(xy 58.675 67.45) (xy 58.975 67.75) (xy 58.975 68.75)
			)
		)
	)
	(zone
		(net 2)
		(net_name "/VDD")
		(locked yes)
		(layer "F.Cu")
		(hatch edge 0.5)
		(priority 3)
		(connect_pads yes
			(clearance 0.4)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.4)
		)
		(polygon
			(pts
				(xy 74.25 157.75) (xy 75.5 156.5) (xy 75.5 155.836) (xy 80.5 155.836) (xy 80.5 156.5) (xy 81.75 157.75)
				(xy 81.75 159.75) (xy 79.75 161.75) (xy 76.25 161.75) (xy 74.25 159.75)
			)
		)
	)
	(zone
		(net 1)
		(net_name "GND")
		(layer "F.Cu")
		(hatch edge 0.5)
		(priority 3)
		(connect_pads yes
			(clearance 0.4)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.4)
		)
		(polygon
			(pts
				(xy 80.625 94.164) (xy 75.375 94.164) (xy 75.375 88.05) (xy 76.225 87.195) (xy 79.825 87.175) (xy 80.6 87.95)
			)
		)
	)
	(zone
		(net 0)
		(net_name "")
		(layers "F&B.Cu")
		(hatch full 0.5)
		(connect_pads yes
			(clearance 0)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(keepout
			(tracks allowed)
			(vias not_allowed)
			(pads not_allowed)
			(copperpour allowed)
			(footprints not_allowed)
		)
		(fill
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 52.513141 114.950008) (xy 50.15 111.8) (xy 50.15 109.55) (xy 52.511299 106.649997) (xy 52.5 55.75)
				(xy 50 55.75) (xy 50 168.375) (xy 52.525 168.375)
			)
		)
	)
	(zone
		(net 0)
		(net_name "")
		(layers "F&B.Cu")
		(hatch full 0.5)
		(connect_pads yes
			(clearance 0)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(keepout
			(tracks allowed)
			(vias not_allowed)
			(pads not_allowed)
			(copperpour allowed)
			(footprints not_allowed)
		)
		(fill
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 132 55.5) (xy 132 106.75) (xy 134.3 109.55) (xy 134.3 111.95) (xy 132 114.85) (xy 132 168.225)
				(xy 134.5 168.225) (xy 134.5 55.5)
			)
		)
	)
	(zone
		(net 207)
		(net_name "/Power/SW")
		(layer "In1.Cu")
		(hatch edge 0.5)
		(priority 28)
		(connect_pads yes
			(clearance 0.4)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 58.95 74.8) (xy 58.95 76.875) (xy 60.55 78.475) (xy 65 78.475) (xy 65.975 77.5) (xy 65.975 75.75)
				(xy 65.025 74.8)
			)
		)
	)
	(zone
		(net 5)
		(net_name "/3V3")
		(layer "In1.Cu")
		(hatch edge 0.5)
		(priority 14)
		(connect_pads
			(clearance 0.4)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 104.55 66.25) (xy 109.9 71.6) (xy 109.9 80.3) (xy 114.95 85.325) (xy 134 85.325) (xy 134 51.4)
				(xy 129.1 46.5) (xy 76.4 46.4) (xy 76.4 50.075) (xy 80.35 54.05) (xy 90.275 54.05) (xy 102.45 66.2)
			)
		)
	)
	(zone
		(net 55)
		(net_name "/VIN")
		(layer "In1.Cu")
		(hatch edge 0.5)
		(priority 32)
		(connect_pads
			(clearance 0)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 57.7 56.725) (xy 65.875 56.725) (xy 65.875 63.425) (xy 62.85 66.45) (xy 62.85 67.95) (xy 58 67.95)
				(xy 58 67.175) (xy 57.525 66.7) (xy 57.525 65.25) (xy 57.175 64.9) (xy 57.175 57.625)
			)
		)
	)
	(zone
		(net 2)
		(net_name "/VDD")
		(layer "In1.Cu")
		(hatch edge 0.5)
		(connect_pads
			(clearance 0.508)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
			(island_removal_mode 2)
			(island_area_min 10)
		)
		(polygon
			(pts
				(xy 105.75 83.575) (xy 102.025 79.85) (xy 100.525 79.85) (xy 100.025 79.35) (xy 100.025 78.225)
				(xy 95.475 73.7) (xy 83.725 73.7) (xy 79.75 69.725) (xy 77.075 69.725) (xy 76.3 68.95) (xy 75.175 68.95)
				(xy 73.2 70.925) (xy 73.2 72.9) (xy 73.85 73.55) (xy 73.85 81.7) (xy 69.875 85.675) (xy 60.9 85.675)
				(xy 60.125 86.45) (xy 50.5 86.45) (xy 50.5 163.5) (xy 62 175) (xy 117.9 175) (xy 117.9 173.15) (xy 124.05 173.15)
				(xy 134.1 163.1) (xy 134.05 85.925) (xy 114.525 85.925) (xy 112.175 83.575)
			)
		)
	)
	(zone
		(net 1)
		(net_name "GND")
		(layer "In1.Cu")
		(hatch edge 0.5)
		(priority 34)
		(connect_pads
			(clearance 0)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 63.45 68.1) (xy 63.45 66.475) (xy 66.5 63.425) (xy 66.5 58.675) (xy 67.725 57.45) (xy 67.725 56.175)
				(xy 68.65 55.275) (xy 74.375 55.275) (xy 75.3 56.2) (xy 75.3 57.375) (xy 77.6 59.675) (xy 77.6 62.225)
				(xy 79.75 64.375) (xy 79.75 66.9) (xy 76.85 66.9) (xy 75.65 68.1)
			)
		)
	)
	(zone
		(net 1)
		(net_name "GND")
		(layer "In1.Cu")
		(hatch edge 0.5)
		(priority 33)
		(connect_pads yes
			(clearance 0)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 69.875 84.8) (xy 65.25 84.8) (xy 63.95 83.5) (xy 63.95 80.125) (xy 66.375 77.675) (xy 66.375 75.575)
				(xy 65.2 74.4) (xy 62.9 74.4) (xy 62.125 73.625) (xy 55.4 73.625) (xy 55.4 69.875) (xy 62.125 69.875)
				(xy 62.675 69.325) (xy 67.65 69.325) (xy 70.725 72.4) (xy 70.725 73.375) (xy 73.175 75.825) (xy 73.175 81.5)
			)
		)
	)
	(zone
		(net 1)
		(net_name "GND")
		(layer "In2.Cu")
		(hatch edge 0.5)
		(priority 2)
		(connect_pads
			(clearance 0.508)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
			(island_removal_mode 2)
			(island_area_min 10)
		)
		(polygon
			(pts
				(xy 50.4 53.6) (xy 57.725 53.6) (xy 57.725 74.25) (xy 50.375 74.25) (xy 50.4 110.8) (xy 134.112 110.8)
				(xy 134.1 51.6) (xy 128.75 46.25) (xy 55.85 46.25) (xy 50.4 51.7)
			)
		)
	)
	(zone
		(net 0)
		(net_name "")
		(layer "In2.Cu")
		(name "no-island")
		(hatch edge 0.5)
		(connect_pads yes
			(clearance 0)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(keepout
			(tracks allowed)
			(vias allowed)
			(pads allowed)
			(copperpour not_allowed)
			(footprints allowed)
		)
		(fill
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 123.4 58.7) (xy 125.8 58.7) (xy 125.8 63) (xy 123.4 63)
			)
		)
	)
	(zone
		(net 95)
		(net_name "/BM1366-2/VDD2")
		(layer "In2.Cu")
		(hatch edge 0.5)
		(priority 4)
		(connect_pads
			(clearance 0.508)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
			(island_removal_mode 1)
			(island_area_min 10)
		)
		(polygon
			(pts
				(xy 50.4 169.6) (xy 55.8 175) (xy 117.9 175.05) (xy 117.9 173.15) (xy 124.05 173.15) (xy 124.05 175.05)
				(xy 128.55 175.05) (xy 134.1 169.5) (xy 134.112 139.2) (xy 50.4 139.192)
			)
		)
	)
	(zone
		(net 94)
		(net_name "/BM1366-1/VDD1")
		(layer "In2.Cu")
		(hatch edge 0.5)
		(priority 1)
		(connect_pads
			(clearance 0.508)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
			(island_removal_mode 1)
			(island_area_min 10)
		)
		(polygon
			(pts
				(xy 50.4 111.252) (xy 50.4 138.684) (xy 134.112 138.684) (xy 134.112 111.252)
			)
		)
	)
	(zone
		(net 209)
		(net_name "/Power/AGND")
		(layer "In2.Cu")
		(hatch full 0.5)
		(priority 31)
		(connect_pads yes
			(clearance 0.3)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 50.375 54.225) (xy 57.15 54.25) (xy 57.15 69.2) (xy 54.875 69.2) (xy 54.875 73.675) (xy 50.375 73.675)
			)
		)
	)
	(zone
		(net 0)
		(net_name "")
		(layer "In2.Cu")
		(hatch full 0.5)
		(connect_pads yes
			(clearance 0)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(keepout
			(tracks allowed)
			(vias allowed)
			(pads allowed)
			(copperpour not_allowed)
			(footprints allowed)
		)
		(fill
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 57.75 58.675) (xy 57.75 67.625) (xy 60.775 67.625) (xy 60.8 58.675)
			)
		)
	)
	(zone
		(net 1)
		(net_name "GND")
		(layer "In2.Cu")
		(hatch edge 0.5)
		(priority 30)
		(connect_pads yes
			(clearance 0)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 61.75 69.7) (xy 55.425 69.7) (xy 55.425 73.775) (xy 61.75 73.775)
			)
		)
	)
	(zone
		(net 1)
		(net_name "GND")
		(layer "B.Cu")
		(hatch edge 0.5)
		(priority 22)
		(connect_pads yes
			(clearance 0.508)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
			(island_removal_mode 1)
			(island_area_min 10)
		)
		(polygon
			(pts
				(xy 100.45 105.8) (xy 96.55 105.8) (xy 96.2 106.15) (xy 96.2 109.2) (xy 96.6 109.6) (xy 100.375 109.6)
				(xy 100.775 109.2) (xy 100.775 106.125)
			)
		)
	)
	(zone
		(net 2)
		(net_name "/VDD")
		(layer "B.Cu")
		(hatch edge 0.5)
		(priority 23)
		(connect_pads yes
			(clearance 0.508)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
			(island_removal_mode 1)
			(island_area_min 10)
		)
		(polygon
			(pts
				(xy 74.2 157) (xy 74.2 164.6) (xy 79.3 169.7) (xy 89.7 169.7) (xy 89.7 166.7) (xy 90.6 165.8) (xy 108.875 165.825)
				(xy 110.4 164.3) (xy 111.2 164.3) (xy 111.2 157) (xy 104.7 157) (xy 104.7 161.3) (xy 103.9 162.1)
				(xy 82.1 162.1) (xy 80.9 160.9) (xy 80.9 157)
			)
		)
	)
	(zone
		(net 94)
		(net_name "/BM1366-1/VDD1")
		(layer "B.Cu")
		(hatch edge 0.5)
		(priority 18)
		(connect_pads yes
			(clearance 0.508)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
			(island_removal_mode 1)
			(island_area_min 10)
		)
		(polygon
			(pts
				(xy 81.1 108.875) (xy 80.55 108.325) (xy 80.55 106.4) (xy 81.45 105.5) (xy 88.6 105.5) (xy 89.1 106)
				(xy 89.1 108.875)
			)
		)
	)
	(zone
		(net 55)
		(net_name "/VIN")
		(layer "B.Cu")
		(hatch edge 0.5)
		(priority 9)
		(connect_pads yes
			(clearance 0.4)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 107.65 72.7) (xy 106.475 73.875) (xy 106.45 75.6) (xy 103.9 75.6) (xy 103.9 74.15) (xy 104.175 73.875)
				(xy 104.2 69.975) (xy 103.9 69.675) (xy 102.8 69.675) (xy 102.8 67.675) (xy 104.975 67.675) (xy 106.4 67.675)
				(xy 107.65 68.925)
			)
		)
	)
	(zone
		(net 207)
		(net_name "/Power/SW")
		(layer "B.Cu")
		(hatch edge 0.5)
		(priority 35)
		(connect_pads
			(clearance 0)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 65 78.475) (xy 65.975 77.5) (xy 65.975 75.75) (xy 65.025 74.8) (xy 58.95 74.8) (xy 58.95 76.875)
				(xy 60.55 78.475)
			)
		)
	)
	(zone
		(net 94)
		(net_name "/BM1366-1/VDD1")
		(layer "B.Cu")
		(hatch edge 0.5)
		(priority 22)
		(connect_pads yes
			(clearance 0.508)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
			(island_removal_mode 1)
			(island_area_min 10)
		)
		(polygon
			(pts
				(xy 100.7 133.75) (xy 96.65 133.75) (xy 96.3 134.1) (xy 96.3 137.2) (xy 96.7 137.6) (xy 100.8 137.6)
				(xy 101.15 137.25) (xy 101.125 134.175)
			)
		)
	)
	(zone
		(net 4)
		(net_name "/5V")
		(layer "B.Cu")
		(hatch edge 0.5)
		(priority 25)
		(connect_pads yes
			(clearance 0.4)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 109.75 79.55) (xy 109.75 83.35) (xy 111.55 83.35) (xy 113.45 81.45) (xy 113.45 77.85) (xy 110.55 77.85)
				(xy 110.55 78.75)
			)
		)
	)
	(zone
		(net 55)
		(net_name "/VIN")
		(layer "B.Cu")
		(hatch edge 0.5)
		(priority 5)
		(connect_pads yes
			(clearance 0.2)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 61.375 68.75) (xy 61.8 68.325) (xy 61.8 58.65) (xy 62.125 58.325) (xy 64.275 58.325) (xy 65.725 56.875)
				(xy 65.725 55.425) (xy 64.75 54.45) (xy 58.625 54.45) (xy 57.75 55.325) (xy 57.75 66.525) (xy 58.975 67.75)
				(xy 58.975 68.75)
			)
		)
	)
	(zone
		(net 95)
		(net_name "/BM1366-2/VDD2")
		(layer "B.Cu")
		(hatch edge 0.5)
		(priority 21)
		(connect_pads yes
			(clearance 0.508)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
			(island_removal_mode 1)
			(island_area_min 10)
		)
		(polygon
			(pts
				(xy 80.95 133.9) (xy 80.95 136.3) (xy 81.525 136.875) (xy 89.6 136.9) (xy 89.6 133.9) (xy 89.1 133.4)
				(xy 81.55 133.4)
			)
		)
	)
	(zone
		(net 2)
		(net_name "/VDD")
		(layer "B.Cu")
		(hatch edge 0.5)
		(priority 29)
		(connect_pads yes
			(clearance 0.4)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 73.85 80.1) (xy 73.85 84.8) (xy 80.325 84.8) (xy 82.65 82.475) (xy 82.65 72.625) (xy 79.75 69.725)
				(xy 73.6 69.7) (xy 73.2 70.1) (xy 73.2 72.9) (xy 73.85 73.55)
			)
		)
	)
	(zone
		(net 1)
		(net_name "GND")
		(layer "B.Cu")
		(hatch edge 0.5)
		(priority 8)
		(connect_pads yes
			(clearance 0.2)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 62.125 73.625) (xy 55.4 73.625) (xy 55.4 69.875) (xy 62.125 69.875) (xy 63 69) (xy 64.6 69)
				(xy 65.275 68.3) (xy 65.3 59.05) (xy 66.15 59.05) (xy 67.65 57.55) (xy 67.65 56) (xy 68.375 55.275)
				(xy 74.625 55.275) (xy 75.425 56.075) (xy 75.45 57.525) (xy 77.6125 59.6875) (xy 77.6 61.075) (xy 79.75 63.225)
				(xy 79.75 66.9) (xy 73.525 66.9) (xy 72.45 68) (xy 72.45 70.75) (xy 70.7 72.5) (xy 70.7 78.925)
				(xy 70.7 80.1) (xy 68.175 82.625) (xy 68.175 84.8) (xy 65.25 84.8) (xy 63.95 83.5) (xy 63.95 80.125)
				(xy 66.375 77.675) (xy 66.375 75.575) (xy 65.2 74.4) (xy 62.9 74.4)
			)
		)
	)
	(zone
		(net 1)
		(net_name "GND")
		(layer "B.Cu")
		(hatch edge 0.5)
		(priority 15)
		(connect_pads yes
			(clearance 0.4)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 106.5 78.5) (xy 105.9 78.5) (xy 105.9 79.1) (xy 105.65 79.35) (xy 105.45 79.35) (xy 105 79.8)
				(xy 105 82.55) (xy 105.9 83.45) (xy 107.55 83.45) (xy 107.55 79.7) (xy 107.2 79.35) (xy 106.75 79.35)
				(xy 106.5 79.1)
			)
		)
	)
	(zone
		(net 95)
		(net_name "/BM1366-2/VDD2")
		(layer "B.Cu")
		(hatch edge 0.5)
		(priority 16)
		(connect_pads yes
			(clearance 0.508)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
			(island_removal_mode 1)
			(island_area_min 10)
		)
		(polygon
			(pts
				(xy 73.2 164.6) (xy 72.4 165.4) (xy 71.375 165.4) (xy 70.375 164.4) (xy 70.375 162.55) (xy 71.325 161.6)
				(xy 73.2 161.6)
			)
		)
	)
	(zone
		(net 200)
		(net_name "Net-(U1-SW)")
		(layer "B.Cu")
		(hatch edge 0.5)
		(priority 11)
		(connect_pads yes
			(clearance 0.4)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 106.9 75.6) (xy 106.9 74.05) (xy 108.05 72.95) (xy 111.45 72.95) (xy 111.975 73.475) (xy 111.975 75.175)
				(xy 110.25 75.175) (xy 109.825 75.6)
			)
		)
	)
	(zone
		(net 95)
		(net_name "/BM1366-2/VDD2")
		(layer "B.Cu")
		(hatch edge 0.5)
		(priority 17)
		(connect_pads yes
			(clearance 0.508)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
			(island_removal_mode 1)
			(island_area_min 10)
		)
		(polygon
			(pts
				(xy 112.95 164.95) (xy 112.2 164.2) (xy 112.2 161.5) (xy 114.25 161.5) (xy 114.925 162.175) (xy 114.925 164.05)
				(xy 114 164.975)
			)
		)
	)
	(zone
		(net 1)
		(net_name "GND")
		(layer "B.Cu")
		(hatch edge 0.5)
		(priority 12)
		(connect_pads yes
			(clearance 0.4)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
		)
		(polygon
			(pts
				(xy 102.125 70.05) (xy 102.125 75.55) (xy 102.525 75.95) (xy 103.7 75.95) (xy 104.2 76.45) (xy 104.2 77.8)
				(xy 103.85 78.15) (xy 100.225 78.15) (xy 98.9 76.85) (xy 98.9 71.725) (xy 100.6 70.05)
			)
		)
	)
	(zone
		(net 95)
		(net_name "/BM1366-2/VDD2")
		(layer "B.Cu")
		(hatch edge 0.5)
		(priority 24)
		(connect_pads yes
			(clearance 0.508)
		)
		(min_thickness 0.25)
		(filled_areas_thickness no)
		(fill yes
			(thermal_gap 0.5)
			(thermal_bridge_width 0.5)
			(island_removal_mode 1)
			(island_area_min 10)
		)
		(polygon
			(pts
				(xy 96.3 166.9) (xy 96.3 169.9) (xy 97.1 170.7) (xy 102.5 170.7) (xy 103.8 169.4) (xy 103.8 167.3)
				(xy 102.6 166.1) (xy 97.1 166.1)
			)
		)
	)
)