(kicad_sch
	(version 20231120)
	(generator "eeschema")
	(generator_version "8.0")
	(paper "A4")
	(lib_symbols
		(symbol "+3V3_1"
			(power)
			(pin_numbers hide)
			(pin_names
				(offset 0) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
			)
			(property "Value" "+3V3"
				(at 0 3.556 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+3V3\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+3V3_1_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+3V3_1_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0)
					(name "~")
					(number "1")
				)
			)
		)
		(symbol "+3V3_2"
			(power)
			(pin_numbers hide)
			(pin_names
				(offset 0) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
			)
			(property "Value" "+3V3"
				(at 0 3.556 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+3V3\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+3V3_2_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+3V3_2_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0)
					(name "~")
					(number "1")
				)
			)
		)
		(symbol "+3V3_3"
			(power)
			(pin_numbers hide)
			(pin_names
				(offset 0) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
			)
			(property "Value" "+3V3"
				(at 0 3.556 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+3V3\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+3V3_3_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+3V3_3_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0)
					(name "~")
					(number "1")
				)
			)
		)
		(symbol "Connector:USB_C_Receptacle_USB2.0"
			(pin_names
				(offset 1.016)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "J"
				(at -10.16 19.05 0)
			)
			(property "Value" "USB_C_Receptacle_USB2.0"
				(at 19.05 19.05 0)
			)
			(property "Footprint" ""
				(at 3.81 0 0)
			)
			(property "Datasheet" "https://www.usb.org/sites/default/files/documents/usb_type-c.zip"
				(at 3.81 0 0)
			)
			(property "Description" "USB 2.0-only Type-C Receptacle connector"
				(at 0 0 0)
			)
			(property "ki_keywords" "usb universal serial bus type-C USB2.0"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "USB*C*Receptacle*"
				(at 0 0 0)
			)
			(symbol "USB_C_Receptacle_USB2.0_0_0"
				(rectangle
					(start -0.254 -17.78)
					(end 0.254 -16.764)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 10.16 -14.986)
					(end 9.144 -15.494)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 10.16 -12.446)
					(end 9.144 -12.954)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 10.16 -4.826)
					(end 9.144 -5.334)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 10.16 -2.286)
					(end 9.144 -2.794)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 10.16 0.254)
					(end 9.144 -0.254)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 10.16 2.794)
					(end 9.144 2.286)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 10.16 7.874)
					(end 9.144 7.366)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 10.16 10.414)
					(end 9.144 9.906)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 10.16 15.494)
					(end 9.144 14.986)
					(fill
						(type none)
					)
				)
			)
			(symbol "USB_C_Receptacle_USB2.0_0_1"
				(rectangle
					(start -10.16 17.78)
					(end 10.16 -17.78)
					(fill
						(type background)
					)
				)
				(arc
					(start -8.89 -3.81)
					(mid -6.985 -5.7067)
					(end -5.08 -3.81)
					(fill
						(type none)
					)
				)
				(arc
					(start -7.62 -3.81)
					(mid -6.985 -4.4423)
					(end -6.35 -3.81)
					(fill
						(type none)
					)
				)
				(arc
					(start -7.62 -3.81)
					(mid -6.985 -4.4423)
					(end -6.35 -3.81)
					(fill
						(type outline)
					)
				)
				(rectangle
					(start -7.62 -3.81)
					(end -6.35 3.81)
					(fill
						(type outline)
					)
				)
				(arc
					(start -6.35 3.81)
					(mid -6.985 4.4423)
					(end -7.62 3.81)
					(fill
						(type none)
					)
				)
				(arc
					(start -6.35 3.81)
					(mid -6.985 4.4423)
					(end -7.62 3.81)
					(fill
						(type outline)
					)
				)
				(arc
					(start -5.08 3.81)
					(mid -6.985 5.7067)
					(end -8.89 3.81)
					(fill
						(type none)
					)
				)
				(circle
					(center -2.54 1.143)
					(radius 0.635)
					(fill
						(type outline)
					)
				)
				(circle
					(center 0 -5.842)
					(radius 1.27)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy -8.89 -3.81) (xy -8.89 3.81)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -5.08 3.81) (xy -5.08 -3.81)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -5.842) (xy 0 4.318)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -3.302) (xy -2.54 -0.762) (xy -2.54 0.508)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -2.032) (xy 2.54 0.508) (xy 2.54 1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 4.318) (xy 0 6.858) (xy 1.27 4.318) (xy -1.27 4.318)
					)
					(fill
						(type outline)
					)
				)
				(rectangle
					(start 1.905 1.778)
					(end 3.175 3.048)
					(fill
						(type outline)
					)
				)
			)
			(symbol "USB_C_Receptacle_USB2.0_1_1"
				(pin passive line
					(at 0 -22.86 90)
					(length 5.08)
					(name "GND")
					(number "A1")
				)
				(pin passive line
					(at 0 -22.86 90)
					(length 5.08) hide
					(name "GND")
					(number "A12")
				)
				(pin passive line
					(at 15.24 15.24 180)
					(length 5.08)
					(name "VBUS")
					(number "A4")
				)
				(pin bidirectional line
					(at 15.24 10.16 180)
					(length 5.08)
					(name "CC1")
					(number "A5")
				)
				(pin bidirectional line
					(at 15.24 -2.54 180)
					(length 5.08)
					(name "D+")
					(number "A6")
				)
				(pin bidirectional line
					(at 15.24 2.54 180)
					(length 5.08)
					(name "D-")
					(number "A7")
				)
				(pin bidirectional line
					(at 15.24 -12.7 180)
					(length 5.08)
					(name "SBU1")
					(number "A8")
				)
				(pin passive line
					(at 15.24 15.24 180)
					(length 5.08) hide
					(name "VBUS")
					(number "A9")
				)
				(pin passive line
					(at 0 -22.86 90)
					(length 5.08) hide
					(name "GND")
					(number "B1")
				)
				(pin passive line
					(at 0 -22.86 90)
					(length 5.08) hide
					(name "GND")
					(number "B12")
				)
				(pin passive line
					(at 15.24 15.24 180)
					(length 5.08) hide
					(name "VBUS")
					(number "B4")
				)
				(pin bidirectional line
					(at 15.24 7.62 180)
					(length 5.08)
					(name "CC2")
					(number "B5")
				)
				(pin bidirectional line
					(at 15.24 -5.08 180)
					(length 5.08)
					(name "D+")
					(number "B6")
				)
				(pin bidirectional line
					(at 15.24 0 180)
					(length 5.08)
					(name "D-")
					(number "B7")
				)
				(pin bidirectional line
					(at 15.24 -15.24 180)
					(length 5.08)
					(name "SBU2")
					(number "B8")
				)
				(pin passive line
					(at 15.24 15.24 180)
					(length 5.08) hide
					(name "VBUS")
					(number "B9")
				)
				(pin passive line
					(at -7.62 -22.86 90)
					(length 5.08)
					(name "SHIELD")
					(number "S1")
				)
			)
		)
		(symbol "Connector_Generic:Conn_01x07"
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "J"
				(at 0 10.16 0)
			)
			(property "Value" "Conn_01x07"
				(at 0 -10.16 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Generic connector, single row, 01x07, script generated (kicad-library-utils/schlib/autogen/connector/)"
				(at 0 0 0)
			)
			(property "ki_keywords" "connector"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Connector*:*_1x??_*"
				(at 0 0 0)
			)
			(symbol "Conn_01x07_1_1"
				(rectangle
					(start -1.27 -7.493)
					(end 0 -7.747)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 -4.953)
					(end 0 -5.207)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 -2.413)
					(end 0 -2.667)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 0.127)
					(end 0 -0.127)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 2.667)
					(end 0 2.413)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 5.207)
					(end 0 4.953)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 7.747)
					(end 0 7.493)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 8.89)
					(end 1.27 -8.89)
					(fill
						(type background)
					)
				)
				(pin passive line
					(at -5.08 7.62 0)
					(length 3.81)
					(name "Pin_1")
					(number "1")
				)
				(pin passive line
					(at -5.08 5.08 0)
					(length 3.81)
					(name "Pin_2")
					(number "2")
				)
				(pin passive line
					(at -5.08 2.54 0)
					(length 3.81)
					(name "Pin_3")
					(number "3")
				)
				(pin passive line
					(at -5.08 0 0)
					(length 3.81)
					(name "Pin_4")
					(number "4")
				)
				(pin passive line
					(at -5.08 -2.54 0)
					(length 3.81)
					(name "Pin_5")
					(number "5")
				)
				(pin passive line
					(at -5.08 -5.08 0)
					(length 3.81)
					(name "Pin_6")
					(number "6")
				)
				(pin passive line
					(at -5.08 -7.62 0)
					(length 3.81)
					(name "Pin_7")
					(number "7")
				)
			)
		)
		(symbol "Device:C"
			(pin_numbers hide)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Unpolarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C_*"
				(at 0 0 0)
			)
			(symbol "C_0_1"
				(polyline
					(pts
						(xy -2.032 -0.762) (xy 2.032 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.032 0.762) (xy 2.032 0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:LED"
			(pin_numbers hide)
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "D"
				(at 0 2.54 0)
			)
			(property "Value" "LED"
				(at 0 -2.54 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Light emitting diode"
				(at 0 0 0)
			)
			(property "ki_keywords" "LED diode"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "LED* LED_SMD:* LED_THT:*"
				(at 0 0 0)
			)
			(symbol "LED_0_1"
				(polyline
					(pts
						(xy -1.27 -1.27) (xy -1.27 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 0) (xy 1.27 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 -1.27) (xy 1.27 1.27) (xy -1.27 0) (xy 1.27 -1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -3.048 -0.762) (xy -4.572 -2.286) (xy -3.81 -2.286) (xy -4.572 -2.286) (xy -4.572 -1.524)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.778 -0.762) (xy -3.302 -2.286) (xy -2.54 -2.286) (xy -3.302 -2.286) (xy -3.302 -1.524)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "LED_1_1"
				(pin passive line
					(at -3.81 0 0)
					(length 2.54)
					(name "K")
					(number "1")
				)
				(pin passive line
					(at 3.81 0 180)
					(length 2.54)
					(name "A")
					(number "2")
				)
			)
		)
		(symbol "Device:R"
			(pin_numbers hide)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 2.032 0 90)
			)
			(property "Value" "R"
				(at 0 0 90)
			)
			(property "Footprint" ""
				(at -1.778 0 90)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Resistor"
				(at 0 0 0)
			)
			(property "ki_keywords" "R res resistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R_0_1"
				(rectangle
					(start -1.016 -2.54)
					(end 1.016 2.54)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "GND_1"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -6.35 0)
			)
			(property "Value" "GND_1"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_1_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_1_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND")
					(number "1")
				)
			)
		)
		(symbol "GND_2"
			(power)
			(pin_numbers hide)
			(pin_names
				(offset 0) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -6.35 0)
			)
			(property "Value" "GND"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_2_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_2_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0)
					(name "~")
					(number "1")
				)
			)
		)
		(symbol "GND_3"
			(power)
			(pin_numbers hide)
			(pin_names
				(offset 0) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -6.35 0)
			)
			(property "Value" "GND"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_3_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_3_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0)
					(name "~")
					(number "1")
				)
			)
		)
		(symbol "MCU_ST_STM32L0:STM32L052K6Tx"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -10.16 24.13 0)
			)
			(property "Value" "STM32L052K6Tx"
				(at 7.62 24.13 0)
			)
			(property "Footprint" "Package_QFP:LQFP-32_7x7mm_P0.8mm"
				(at -10.16 -22.86 0)
			)
			(property "Datasheet" "https://www.st.com/resource/en/datasheet/stm32l052k6.pdf"
				(at 0 0 0)
			)
			(property "Description" "STMicroelectronics Arm Cortex-M0+ MCU, 32KB flash, 8KB RAM, 32 MHz, 1.65-3.6V, 25 GPIO, LQFP32"
				(at 0 0 0)
			)
			(property "ki_locked" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "Arm Cortex-M0+ STM32L0 STM32L0x2"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "LQFP*7x7mm*P0.8mm*"
				(at 0 0 0)
			)
			(symbol "STM32L052K6Tx_0_1"
				(rectangle
					(start -10.16 -22.86)
					(end 12.7 22.86)
					(fill
						(type background)
					)
				)
			)
			(symbol "STM32L052K6Tx_1_1"
				(pin power_in line
					(at 0 25.4 270)
					(length 2.54)
					(name "VDD")
					(number "1")
				)
				(pin bidirectional line
					(at 15.24 10.16 180)
					(length 2.54)
					(name "PA4")
					(number "10")
					(alternate "ADC_IN4" bidirectional line)
					(alternate "COMP1_INM" bidirectional line)
					(alternate "COMP2_INM" bidirectional line)
					(alternate "DAC_OUT1" bidirectional line)
					(alternate "SPI1_NSS" bidirectional line)
					(alternate "TIM22_ETR" bidirectional line)
					(alternate "TSC_G2_IO1" bidirectional line)
					(alternate "USART2_CK" bidirectional line)
				)
				(pin bidirectional line
					(at 15.24 7.62 180)
					(length 2.54)
					(name "PA5")
					(number "11")
					(alternate "ADC_IN5" bidirectional line)
					(alternate "COMP1_INM" bidirectional line)
					(alternate "COMP2_INM" bidirectional line)
					(alternate "SPI1_SCK" bidirectional line)
					(alternate "TIM2_CH1" bidirectional line)
					(alternate "TIM2_ETR" bidirectional line)
					(alternate "TSC_G2_IO2" bidirectional line)
				)
				(pin bidirectional line
					(at 15.24 5.08 180)
					(length 2.54)
					(name "PA6")
					(number "12")
					(alternate "ADC_IN6" bidirectional line)
					(alternate "COMP1_OUT" bidirectional line)
					(alternate "SPI1_MISO" bidirectional line)
					(alternate "TIM22_CH1" bidirectional line)
					(alternate "TSC_G2_IO3" bidirectional line)
				)
				(pin bidirectional line
					(at 15.24 2.54 180)
					(length 2.54)
					(name "PA7")
					(number "13")
					(alternate "ADC_IN7" bidirectional line)
					(alternate "COMP2_OUT" bidirectional line)
					(alternate "SPI1_MOSI" bidirectional line)
					(alternate "TIM22_CH2" bidirectional line)
					(alternate "TSC_G2_IO4" bidirectional line)
				)
				(pin bidirectional line
					(at -12.7 2.54 0)
					(length 2.54)
					(name "PB0")
					(number "14")
					(alternate "ADC_IN8" bidirectional line)
					(alternate "SYS_VREF_OUT_PB0" bidirectional line)
					(alternate "TSC_G3_IO2" bidirectional line)
				)
				(pin bidirectional line
					(at -12.7 0 0)
					(length 2.54)
					(name "PB1")
					(number "15")
					(alternate "ADC_IN9" bidirectional line)
					(alternate "SYS_VREF_OUT_PB1" bidirectional line)
					(alternate "TSC_G3_IO3" bidirectional line)
				)
				(pin power_in line
					(at 2.54 -25.4 90)
					(length 2.54)
					(name "VSS")
					(number "16")
				)
				(pin power_in line
					(at 2.54 25.4 270)
					(length 2.54)
					(name "VDD")
					(number "17")
				)
				(pin bidirectional line
					(at 15.24 0 180)
					(length 2.54)
					(name "PA8")
					(number "18")
					(alternate "CRS_SYNC" bidirectional line)
					(alternate "RCC_MCO" bidirectional line)
					(alternate "USART1_CK" bidirectional line)
				)
				(pin bidirectional line
					(at 15.24 -2.54 180)
					(length 2.54)
					(name "PA9")
					(number "19")
					(alternate "DAC_EXTI9" bidirectional line)
					(alternate "RCC_MCO" bidirectional line)
					(alternate "TSC_G4_IO1" bidirectional line)
					(alternate "USART1_TX" bidirectional line)
				)
				(pin bidirectional line
					(at -12.7 10.16 0)
					(length 2.54)
					(name "PC14")
					(number "2")
					(alternate "RCC_OSC32_IN" bidirectional line)
				)
				(pin bidirectional line
					(at 15.24 -5.08 180)
					(length 2.54)
					(name "PA10")
					(number "20")
					(alternate "TSC_G4_IO2" bidirectional line)
					(alternate "USART1_RX" bidirectional line)
				)
				(pin bidirectional line
					(at 15.24 -7.62 180)
					(length 2.54)
					(name "PA11")
					(number "21")
					(alternate "ADC_EXTI11" bidirectional line)
					(alternate "COMP1_OUT" bidirectional line)
					(alternate "SPI1_MISO" bidirectional line)
					(alternate "TSC_G4_IO3" bidirectional line)
					(alternate "USART1_CTS" bidirectional line)
					(alternate "USB_DM" bidirectional line)
				)
				(pin bidirectional line
					(at 15.24 -10.16 180)
					(length 2.54)
					(name "PA12")
					(number "22")
					(alternate "COMP2_OUT" bidirectional line)
					(alternate "SPI1_MOSI" bidirectional line)
					(alternate "TSC_G4_IO4" bidirectional line)
					(alternate "USART1_DE" bidirectional line)
					(alternate "USART1_RTS" bidirectional line)
					(alternate "USB_DP" bidirectional line)
				)
				(pin bidirectional line
					(at 15.24 -12.7 180)
					(length 2.54)
					(name "PA13")
					(number "23")
					(alternate "SYS_SWDIO" bidirectional line)
					(alternate "USB_NOE" bidirectional line)
				)
				(pin bidirectional line
					(at 15.24 -15.24 180)
					(length 2.54)
					(name "PA14")
					(number "24")
					(alternate "SYS_SWCLK" bidirectional line)
					(alternate "USART2_TX" bidirectional line)
				)
				(pin bidirectional line
					(at 15.24 -17.78 180)
					(length 2.54)
					(name "PA15")
					(number "25")
					(alternate "SPI1_NSS" bidirectional line)
					(alternate "TIM2_CH1" bidirectional line)
					(alternate "TIM2_ETR" bidirectional line)
					(alternate "USART2_RX" bidirectional line)
				)
				(pin bidirectional line
					(at -12.7 -2.54 0)
					(length 2.54)
					(name "PB3")
					(number "26")
					(alternate "COMP2_INM" bidirectional line)
					(alternate "SPI1_SCK" bidirectional line)
					(alternate "TIM2_CH2" bidirectional line)
					(alternate "TSC_G5_IO1" bidirectional line)
				)
				(pin bidirectional line
					(at -12.7 -5.08 0)
					(length 2.54)
					(name "PB4")
					(number "27")
					(alternate "COMP2_INP" bidirectional line)
					(alternate "SPI1_MISO" bidirectional line)
					(alternate "TIM22_CH1" bidirectional line)
					(alternate "TSC_G5_IO2" bidirectional line)
				)
				(pin bidirectional line
					(at -12.7 -7.62 0)
					(length 2.54)
					(name "PB5")
					(number "28")
					(alternate "COMP2_INP" bidirectional line)
					(alternate "I2C1_SMBA" bidirectional line)
					(alternate "LPTIM1_IN1" bidirectional line)
					(alternate "SPI1_MOSI" bidirectional line)
					(alternate "TIM22_CH2" bidirectional line)
				)
				(pin bidirectional line
					(at -12.7 -10.16 0)
					(length 2.54)
					(name "PB6")
					(number "29")
					(alternate "COMP2_INP" bidirectional line)
					(alternate "I2C1_SCL" bidirectional line)
					(alternate "LPTIM1_ETR" bidirectional line)
					(alternate "TSC_G5_IO3" bidirectional line)
					(alternate "USART1_TX" bidirectional line)
				)
				(pin bidirectional line
					(at -12.7 7.62 0)
					(length 2.54)
					(name "PC15")
					(number "3")
					(alternate "RCC_OSC32_OUT" bidirectional line)
				)
				(pin bidirectional line
					(at -12.7 -12.7 0)
					(length 2.54)
					(name "PB7")
					(number "30")
					(alternate "COMP2_INP" bidirectional line)
					(alternate "I2C1_SDA" bidirectional line)
					(alternate "LPTIM1_IN2" bidirectional line)
					(alternate "SYS_PVD_IN" bidirectional line)
					(alternate "TSC_G5_IO4" bidirectional line)
					(alternate "USART1_RX" bidirectional line)
				)
				(pin input line
					(at -12.7 15.24 0)
					(length 2.54)
					(name "BOOT0")
					(number "31")
				)
				(pin passive line
					(at 2.54 -25.4 90)
					(length 2.54) hide
					(name "VSS")
					(number "32")
				)
				(pin input line
					(at -12.7 20.32 0)
					(length 2.54)
					(name "NRST")
					(number "4")
				)
				(pin power_in line
					(at 5.08 25.4 270)
					(length 2.54)
					(name "VDDA")
					(number "5")
				)
				(pin bidirectional line
					(at 15.24 20.32 180)
					(length 2.54)
					(name "PA0")
					(number "6")
					(alternate "ADC_IN0" bidirectional line)
					(alternate "COMP1_INM" bidirectional line)
					(alternate "COMP1_OUT" bidirectional line)
					(alternate "RTC_TAMP2" bidirectional line)
					(alternate "SYS_WKUP1" bidirectional line)
					(alternate "TIM2_CH1" bidirectional line)
					(alternate "TIM2_ETR" bidirectional line)
					(alternate "TSC_G1_IO1" bidirectional line)
					(alternate "USART2_CTS" bidirectional line)
				)
				(pin bidirectional line
					(at 15.24 17.78 180)
					(length 2.54)
					(name "PA1")
					(number "7")
					(alternate "ADC_IN1" bidirectional line)
					(alternate "COMP1_INP" bidirectional line)
					(alternate "TIM21_ETR" bidirectional line)
					(alternate "TIM2_CH2" bidirectional line)
					(alternate "TSC_G1_IO2" bidirectional line)
					(alternate "USART2_DE" bidirectional line)
					(alternate "USART2_RTS" bidirectional line)
				)
				(pin bidirectional line
					(at 15.24 15.24 180)
					(length 2.54)
					(name "PA2")
					(number "8")
					(alternate "ADC_IN2" bidirectional line)
					(alternate "COMP2_INM" bidirectional line)
					(alternate "COMP2_OUT" bidirectional line)
					(alternate "TIM21_CH1" bidirectional line)
					(alternate "TIM2_CH3" bidirectional line)
					(alternate "TSC_G1_IO3" bidirectional line)
					(alternate "USART2_TX" bidirectional line)
				)
				(pin bidirectional line
					(at 15.24 12.7 180)
					(length 2.54)
					(name "PA3")
					(number "9")
					(alternate "ADC_IN3" bidirectional line)
					(alternate "COMP2_INP" bidirectional line)
					(alternate "TIM21_CH2" bidirectional line)
					(alternate "TIM2_CH4" bidirectional line)
					(alternate "TSC_G1_IO4" bidirectional line)
					(alternate "USART2_RX" bidirectional line)
				)
			)
		)
		(symbol "Motor:Fan_4pin"
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "M"
				(at 2.54 5.08 0)
			)
			(property "Value" "Fan_4pin"
				(at 2.54 -2.54 0)
			)
			(property "Footprint" ""
				(at 0 0.254 0)
			)
			(property "Datasheet" "http://www.formfactors.org/developer%5Cspecs%5Crev1_2_public.pdf"
				(at 0 0.254 0)
			)
			(property "Description" "Fan, tacho output, PWM input, 4-pin connector"
				(at 0 0 0)
			)
			(property "ki_keywords" "Fan Motor tacho PWM"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "FanPinHeader*P2.54mm*Vertical* PinHeader*P2.54mm*Vertical* TerminalBlock*"
				(at 0 0 0)
			)
			(symbol "Fan_4pin_0_0"
				(arc
					(start -5.588 1.524)
					(mid -5.08 1.0182)
					(end -4.572 1.524)
					(fill
						(type none)
					)
				)
				(arc
					(start -5.08 2.032)
					(mid -5.4392 1.8832)
					(end -5.588 1.524)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -5.08 2.032) (xy -5.334 2.159)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -5.08 2.032) (xy -5.207 1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -4.064 2.54) (xy -4.064 1.016) (xy -3.302 1.016)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "Fan_4pin_0_1"
				(arc
					(start -2.54 -0.508)
					(mid 0.0028 0.9121)
					(end 0 3.81)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -4.064 2.54) (xy -5.08 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -5.08) (xy 0 -4.572)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -2.2352) (xy 0 -2.6416)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 4.2672) (xy 0 4.6228)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 4.572) (xy 0 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.54 -1.016) (xy -4.064 -1.016) (xy -4.064 -2.54) (xy -5.08 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -5.334 -3.302) (xy -5.08 -3.302) (xy -5.08 -3.048) (xy -4.826 -3.048) (xy -4.826 -3.302) (xy -4.318 -3.302)
						(xy -4.318 -3.048) (xy -4.064 -3.048) (xy -4.064 -3.302) (xy -3.556 -3.302)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 0 1.016)
					(radius 3.2512)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 3.81)
					(mid 0.053 0.921)
					(end 2.54 -0.508)
					(fill
						(type none)
					)
				)
				(arc
					(start 2.54 -0.508)
					(mid 0 1.0618)
					(end -2.54 -0.508)
					(fill
						(type none)
					)
				)
			)
			(symbol "Fan_4pin_1_1"
				(pin passive line
					(at 0 -5.08 90)
					(length 2.54)
					(name "-")
					(number "1")
				)
				(pin passive line
					(at 0 7.62 270)
					(length 2.54)
					(name "+")
					(number "2")
				)
				(pin passive line
					(at -7.62 2.54 0)
					(length 2.54)
					(name "Tacho")
					(number "3")
				)
				(pin input line
					(at -7.62 -2.54 0)
					(length 2.54)
					(name "PWM")
					(number "4")
				)
			)
		)
		(symbol "New_Library_0:TXU0102DCK"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U1"
				(at 0 8.89 0)
			)
			(property "Value" "TXU0102-DCU"
				(at 0 6.35 0)
			)
			(property "Footprint" "Package_SO:VSSOP-8_2.3x2mm_P0.5mm"
				(at 2.54 6.35 0)
			)
			(property "Datasheet" ""
				(at -1.27 2.54 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "Distributor" "D"
				(at 0 0 0)
			)
			(property "Manufacturer" "TXU0102DCUR"
				(at 0 0 0)
			)
			(property "OrderNr" "296-TXU0102DCURCT-ND"
				(at 0 0 0)
			)
			(symbol "TXU0102DCK_0_1"
				(rectangle
					(start -6.35 3.81)
					(end 6.35 -7.62)
					(fill
						(type none)
					)
				)
			)
			(symbol "TXU0102DCK_1_1"
				(pin output line
					(at 8.89 -2.54 180)
					(length 2.54)
					(name "B2Y")
					(number "1")
				)
				(pin power_in line
					(at -8.89 -5.08 0)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin power_in line
					(at -8.89 2.54 0)
					(length 2.54)
					(name "VCCA")
					(number "3")
				)
				(pin input line
					(at -8.89 -2.54 0)
					(length 2.54)
					(name "A2")
					(number "4")
				)
				(pin input line
					(at -8.89 0 0)
					(length 2.54)
					(name "A1")
					(number "5")
				)
				(pin input line
					(at 8.89 -5.08 180)
					(length 2.54)
					(name "OE")
					(number "6")
				)
				(pin power_in line
					(at 8.89 2.54 180)
					(length 2.54)
					(name "VCCB")
					(number "7")
				)
				(pin output line
					(at 8.89 0 180)
					(length 2.54)
					(name "B1Y")
					(number "8")
				)
			)
		)
		(symbol "Switch:SW_Push"
			(pin_numbers hide)
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "SW"
				(at 1.27 2.54 0)
			)
			(property "Value" "SW_Push"
				(at 0 -1.524 0)
			)
			(property "Footprint" ""
				(at 0 5.08 0)
			)
			(property "Datasheet" "~"
				(at 0 5.08 0)
			)
			(property "Description" "Push button switch, generic, two pins"
				(at 0 0 0)
			)
			(property "ki_keywords" "switch normally-open pushbutton push-button"
				(at 0 0 0)
			)
			(symbol "SW_Push_0_1"
				(circle
					(center -2.032 0)
					(radius 0.508)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 1.27) (xy 0 3.048)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 1.27) (xy -2.54 1.27)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 2.032 0)
					(radius 0.508)
					(fill
						(type none)
					)
				)
				(pin passive line
					(at -5.08 0 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
				(pin passive line
					(at 5.08 0 180)
					(length 2.54)
					(name "2")
					(number "2")
				)
			)
		)
		(symbol "Transistor_FET:BSS138"
			(pin_names hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "Q"
				(at 5.08 1.905 0)
			)
			(property "Value" "BSS138"
				(at 5.08 0 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:SOT-23"
				(at 5.08 -1.905 0)
			)
			(property "Datasheet" "https://www.onsemi.com/pub/Collateral/BSS138-D.PDF"
				(at 0 0 0)
			)
			(property "Description" "50V Vds, 0.22A Id, N-Channel MOSFET, SOT-23"
				(at 0 0 0)
			)
			(property "ki_keywords" "N-Channel MOSFET"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOT?23*"
				(at 0 0 0)
			)
			(symbol "BSS138_0_1"
				(polyline
					(pts
						(xy 0.254 0) (xy -2.54 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.254 1.905) (xy 0.254 -1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 -1.27) (xy 0.762 -2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 0.508) (xy 0.762 -0.508)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 2.286) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 2.54) (xy 2.54 1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 -2.54) (xy 2.54 0) (xy 0.762 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 -1.778) (xy 3.302 -1.778) (xy 3.302 1.778) (xy 0.762 1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.016 0) (xy 2.032 0.381) (xy 2.032 -0.381) (xy 1.016 0)
					)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy 2.794 0.508) (xy 2.921 0.381) (xy 3.683 0.381) (xy 3.81 0.254)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 3.302 0.381) (xy 2.921 -0.254) (xy 3.683 -0.254) (xy 3.302 0.381)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 1.651 0)
					(radius 2.794)
					(fill
						(type none)
					)
				)
				(circle
					(center 2.54 -1.778)
					(radius 0.254)
					(fill
						(type outline)
					)
				)
				(circle
					(center 2.54 1.778)
					(radius 0.254)
					(fill
						(type outline)
					)
				)
			)
			(symbol "BSS138_1_1"
				(pin input line
					(at -5.08 0 0)
					(length 2.54)
					(name "G")
					(number "1")
				)
				(pin passive line
					(at 2.54 -5.08 90)
					(length 2.54)
					(name "S")
					(number "2")
				)
				(pin passive line
					(at 2.54 5.08 270)
					(length 2.54)
					(name "D")
					(number "3")
				)
			)
		)
		(symbol "clock-rescue:R"
			(pin_numbers hide)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 2.032 0 90)
			)
			(property "Value" "R"
				(at 0 0 90)
			)
			(property "Footprint" ""
				(at -1.778 0 90)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_* R_*"
				(at 0 0 0)
			)
			(symbol "R_0_1"
				(rectangle
					(start -1.016 -2.54)
					(end 1.016 2.54)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "dwc-hat-rescue:+3V3-power"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
			)
			(property "Value" "+3V3-power"
				(at 0 3.556 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "+3V3-power_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+3V3-power_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+3V3")
					(number "1")
				)
			)
		)
		(symbol "dwc-hat-rescue:Conn_02x05_Odd_Even-Connector_Generic"
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "J"
				(at 1.27 7.62 0)
			)
			(property "Value" "Connector_Generic_Conn_02x05_Odd_Even"
				(at 1.27 -7.62 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Connector*:*_2x??_*"
				(at 0 0 0)
			)
			(symbol "Conn_02x05_Odd_Even-Connector_Generic_1_1"
				(rectangle
					(start -1.27 -4.953)
					(end 0 -5.207)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 -2.413)
					(end 0 -2.667)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 0.127)
					(end 0 -0.127)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 2.667)
					(end 0 2.413)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 5.207)
					(end 0 4.953)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 6.35)
					(end 3.81 -6.35)
					(fill
						(type background)
					)
				)
				(rectangle
					(start 3.81 -4.953)
					(end 2.54 -5.207)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 3.81 -2.413)
					(end 2.54 -2.667)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 3.81 0.127)
					(end 2.54 -0.127)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 3.81 2.667)
					(end 2.54 2.413)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 3.81 5.207)
					(end 2.54 4.953)
					(fill
						(type none)
					)
				)
				(pin passive line
					(at -5.08 5.08 0)
					(length 3.81)
					(name "Pin_1")
					(number "1")
				)
				(pin passive line
					(at 7.62 -5.08 180)
					(length 3.81)
					(name "Pin_10")
					(number "10")
				)
				(pin passive line
					(at 7.62 5.08 180)
					(length 3.81)
					(name "Pin_2")
					(number "2")
				)
				(pin passive line
					(at -5.08 2.54 0)
					(length 3.81)
					(name "Pin_3")
					(number "3")
				)
				(pin passive line
					(at 7.62 2.54 180)
					(length 3.81)
					(name "Pin_4")
					(number "4")
				)
				(pin passive line
					(at -5.08 0 0)
					(length 3.81)
					(name "Pin_5")
					(number "5")
				)
				(pin passive line
					(at 7.62 0 180)
					(length 3.81)
					(name "Pin_6")
					(number "6")
				)
				(pin passive line
					(at -5.08 -2.54 0)
					(length 3.81)
					(name "Pin_7")
					(number "7")
				)
				(pin passive line
					(at 7.62 -2.54 180)
					(length 3.81)
					(name "Pin_8")
					(number "8")
				)
				(pin passive line
					(at -5.08 -5.08 0)
					(length 3.81)
					(name "Pin_9")
					(number "9")
				)
			)
		)
		(symbol "dwc-hat-rescue:GND-power"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -6.35 0)
			)
			(property "Value" "GND-power"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "GND-power_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND-power_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND")
					(number "1")
				)
			)
		)
		(symbol "dwc-hat-rescue:R-Device"
			(pin_numbers hide)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 2.032 0 90)
			)
			(property "Value" "Device_R"
				(at 0 0 90)
			)
			(property "Footprint" ""
				(at -1.778 0 90)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R-Device_0_1"
				(rectangle
					(start -1.016 -2.54)
					(end 1.016 2.54)
					(fill
						(type none)
					)
				)
			)
			(symbol "R-Device_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "mylib7:+3V3A"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
			)
			(property "Value" "+3V3A"
				(at 0 3.556 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+3V3\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+3V3A_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+3V3A_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+3V3A")
					(number "1")
				)
			)
		)
		(symbol "mylib7:TMP1075-DRL-SOT563"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -5.08 5.08 0)
			)
			(property "Value" ""
				(at -3.81 1.27 0)
			)
			(property "Footprint" ""
				(at -3.81 1.27 0)
			)
			(property "Datasheet" ""
				(at -3.81 1.27 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "TMP1075-DRL-SOT563_0_1"
				(rectangle
					(start -6.35 3.81)
					(end 5.08 -3.81)
					(fill
						(type none)
					)
				)
			)
			(symbol "TMP1075-DRL-SOT563_1_1"
				(pin open_collector line
					(at -8.89 2.54 0)
					(length 2.54)
					(name "SCL")
					(number "1")
				)
				(pin power_in line
					(at -8.89 0 0)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin open_collector line
					(at -8.89 -2.54 0)
					(length 2.54)
					(name "ALERT")
					(number "3")
				)
				(pin input line
					(at 7.62 -2.54 180)
					(length 2.54)
					(name "A0")
					(number "4")
				)
				(pin power_in line
					(at 7.62 0 180)
					(length 2.54)
					(name "V+")
					(number "5")
				)
				(pin open_collector line
					(at 7.62 2.54 180)
					(length 2.54)
					(name "SDA")
					(number "6")
				)
			)
		)
		(symbol "power:+12V"
			(power)
			(pin_numbers hide)
			(pin_names
				(offset 0) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
			)
			(property "Value" "+12V"
				(at 0 3.556 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+12V\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+12V_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+12V_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0)
					(name "~")
					(number "1")
				)
			)
		)
		(symbol "power:+3V3"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
			)
			(property "Value" "+3V3"
				(at 0 3.556 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+3V3\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+3V3_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+3V3_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+3V3")
					(number "1")
				)
			)
		)
		(symbol "power:+5V"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
			)
			(property "Value" "+5V"
				(at 0 3.556 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+5V\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+5V_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+5V_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+5V")
					(number "1")
				)
			)
		)
		(symbol "power:GND"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -6.35 0)
			)
			(property "Value" "GND"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND")
					(number "1")
				)
			)
		)
		(symbol "vfd1-rescue:C"
			(pin_numbers hide)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C? C_????_* C_???? SMD*_c Capacitor*"
				(at 0 0 0)
			)
			(symbol "C_0_1"
				(polyline
					(pts
						(xy -2.032 -0.762) (xy 2.032 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.032 0.762) (xy 2.032 0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
		)
	)
	(junction
		(at 271.78 113.03)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 92.71 82.55)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 196.85 78.74)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 55.88 152.4)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 69.85 95.25)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 196.85 43.18)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 271.78 139.7)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 149.86 41.91)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 118.11 90.17)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 55.88 154.94)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 241.3 125.73)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 111.76 92.71)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 137.16 41.91)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 257.81 55.88)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 196.85 96.52)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 143.51 41.91)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 109.22 162.56)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 157.48 41.91)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 109.22 167.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 132.08 54.61)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 196.85 60.96)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 67.31 97.79)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 67.31 143.51)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 118.11 69.85)
		(diameter 0)
		(color 0 0 0 0)
	)
	(no_connect
		(at 161.29 74.93)
	)
	(no_connect
		(at 54.61 167.64)
	)
	(no_connect
		(at 91.44 172.72)
	)
	(no_connect
		(at 240.03 58.42)
	)
	(no_connect
		(at 119.38 77.47)
	)
	(no_connect
		(at 91.44 170.18)
	)
	(no_connect
		(at 104.14 172.72)
	)
	(no_connect
		(at 240.03 88.9)
	)
	(no_connect
		(at 104.14 170.18)
	)
	(no_connect
		(at 54.61 165.1)
	)
	(no_connect
		(at 91.44 167.64)
	)
	(no_connect
		(at 147.32 102.87)
	)
	(wire
		(pts
			(xy 137.16 41.91) (xy 137.16 59.69)
		)
	)
	(wire
		(pts
			(xy 241.3 123.19) (xy 241.3 125.73)
		)
	)
	(wire
		(pts
			(xy 257.81 55.88) (xy 257.81 58.42)
		)
	)
	(wire
		(pts
			(xy 238.76 86.36) (xy 238.76 91.44)
		)
	)
	(wire
		(pts
			(xy 69.85 93.98) (xy 69.85 95.25)
		)
	)
	(wire
		(pts
			(xy 175.26 152.4) (xy 175.26 153.67)
		)
	)
	(wire
		(pts
			(xy 116.84 69.85) (xy 118.11 69.85)
		)
	)
	(wire
		(pts
			(xy 54.61 144.78) (xy 58.42 144.78)
		)
	)
	(wire
		(pts
			(xy 66.04 142.24) (xy 67.31 142.24)
		)
	)
	(wire
		(pts
			(xy 184.15 43.18) (xy 184.15 64.77)
		)
	)
	(wire
		(pts
			(xy 175.26 143.51) (xy 175.26 144.78)
		)
	)
	(wire
		(pts
			(xy 91.44 132.08) (xy 100.33 132.08)
		)
	)
	(wire
		(pts
			(xy 275.59 88.9) (xy 275.59 91.44)
		)
	)
	(wire
		(pts
			(xy 257.81 128.27) (xy 257.81 123.19)
		)
	)
	(wire
		(pts
			(xy 118.11 90.17) (xy 119.38 90.17)
		)
	)
	(wire
		(pts
			(xy 147.32 74.93) (xy 161.29 74.93)
		)
	)
	(wire
		(pts
			(xy 92.71 82.55) (xy 119.38 82.55)
		)
	)
	(wire
		(pts
			(xy 184.15 72.39) (xy 184.15 96.52)
		)
	)
	(wire
		(pts
			(xy 196.85 43.18) (xy 196.85 44.45)
		)
	)
	(wire
		(pts
			(xy 234.95 128.27) (xy 257.81 128.27)
		)
	)
	(wire
		(pts
			(xy 132.08 53.34) (xy 132.08 54.61)
		)
	)
	(wire
		(pts
			(xy 157.48 41.91) (xy 157.48 43.18)
		)
	)
	(wire
		(pts
			(xy 234.95 125.73) (xy 241.3 125.73)
		)
	)
	(wire
		(pts
			(xy 248.92 115.57) (xy 248.92 118.11)
		)
	)
	(wire
		(pts
			(xy 111.76 90.17) (xy 118.11 90.17)
		)
	)
	(wire
		(pts
			(xy 186.69 60.96) (xy 186.69 67.31)
		)
	)
	(wire
		(pts
			(xy 147.32 85.09) (xy 161.29 85.09)
		)
	)
	(wire
		(pts
			(xy 105.41 165.1) (xy 104.14 165.1)
		)
	)
	(wire
		(pts
			(xy 257.81 123.19) (xy 264.16 123.19)
		)
	)
	(wire
		(pts
			(xy 118.11 69.85) (xy 119.38 69.85)
		)
	)
	(wire
		(pts
			(xy 67.31 144.78) (xy 66.04 144.78)
		)
	)
	(wire
		(pts
			(xy 147.32 95.25) (xy 161.29 95.25)
		)
	)
	(wire
		(pts
			(xy 104.14 85.09) (xy 119.38 85.09)
		)
	)
	(wire
		(pts
			(xy 55.88 152.4) (xy 58.42 152.4)
		)
	)
	(wire
		(pts
			(xy 262.89 113.03) (xy 271.78 113.03)
		)
	)
	(wire
		(pts
			(xy 147.32 97.79) (xy 161.29 97.79)
		)
	)
	(wire
		(pts
			(xy 205.74 78.74) (xy 209.55 78.74)
		)
	)
	(wire
		(pts
			(xy 248.92 115.57) (xy 118.11 115.57)
		)
	)
	(wire
		(pts
			(xy 256.54 53.34) (xy 270.51 53.34)
		)
	)
	(wire
		(pts
			(xy 81.28 162.56) (xy 91.44 162.56)
		)
	)
	(wire
		(pts
			(xy 149.86 41.91) (xy 157.48 41.91)
		)
	)
	(wire
		(pts
			(xy 107.95 69.85) (xy 109.22 69.85)
		)
	)
	(wire
		(pts
			(xy 147.32 92.71) (xy 161.29 92.71)
		)
	)
	(wire
		(pts
			(xy 134.62 110.49) (xy 134.62 111.76)
		)
	)
	(wire
		(pts
			(xy 118.11 90.17) (xy 118.11 115.57)
		)
	)
	(wire
		(pts
			(xy 109.22 162.56) (xy 104.14 162.56)
		)
	)
	(wire
		(pts
			(xy 210.82 125.73) (xy 210.82 123.19)
		)
	)
	(wire
		(pts
			(xy 127 127) (xy 127 116.84)
		)
	)
	(wire
		(pts
			(xy 147.32 64.77) (xy 184.15 64.77)
		)
	)
	(wire
		(pts
			(xy 224.79 53.34) (xy 240.03 53.34)
		)
	)
	(wire
		(pts
			(xy 67.31 93.98) (xy 67.31 97.79)
		)
	)
	(wire
		(pts
			(xy 31.75 175.26) (xy 31.75 176.53)
		)
	)
	(wire
		(pts
			(xy 196.85 87.63) (xy 196.85 88.9)
		)
	)
	(wire
		(pts
			(xy 109.22 161.29) (xy 109.22 162.56)
		)
	)
	(wire
		(pts
			(xy 147.32 80.01) (xy 161.29 80.01)
		)
	)
	(wire
		(pts
			(xy 55.88 149.86) (xy 55.88 152.4)
		)
	)
	(wire
		(pts
			(xy 256.54 55.88) (xy 257.81 55.88)
		)
	)
	(wire
		(pts
			(xy 147.32 157.48) (xy 147.32 158.75)
		)
	)
	(wire
		(pts
			(xy 205.74 96.52) (xy 209.55 96.52)
		)
	)
	(wire
		(pts
			(xy 104.14 87.63) (xy 119.38 87.63)
		)
	)
	(wire
		(pts
			(xy 257.81 55.88) (xy 257.81 50.8)
		)
	)
	(wire
		(pts
			(xy 257.81 86.36) (xy 257.81 81.28)
		)
	)
	(wire
		(pts
			(xy 198.12 60.96) (xy 196.85 60.96)
		)
	)
	(wire
		(pts
			(xy 92.71 80.01) (xy 92.71 82.55)
		)
	)
	(wire
		(pts
			(xy 67.31 85.09) (xy 67.31 86.36)
		)
	)
	(wire
		(pts
			(xy 275.59 78.74) (xy 275.59 81.28)
		)
	)
	(wire
		(pts
			(xy 238.76 55.88) (xy 238.76 60.96)
		)
	)
	(wire
		(pts
			(xy 149.86 50.8) (xy 149.86 52.07)
		)
	)
	(wire
		(pts
			(xy 246.38 149.86) (xy 264.16 149.86)
		)
	)
	(wire
		(pts
			(xy 147.32 72.39) (xy 184.15 72.39)
		)
	)
	(wire
		(pts
			(xy 127 116.84) (xy 116.84 116.84)
		)
	)
	(wire
		(pts
			(xy 147.32 175.26) (xy 147.32 184.15)
		)
	)
	(wire
		(pts
			(xy 69.85 85.09) (xy 69.85 86.36)
		)
	)
	(wire
		(pts
			(xy 217.17 133.35) (xy 209.55 133.35)
		)
	)
	(wire
		(pts
			(xy 92.71 46.99) (xy 92.71 48.26)
		)
	)
	(wire
		(pts
			(xy 152.4 166.37) (xy 152.4 167.64)
		)
	)
	(wire
		(pts
			(xy 208.28 130.81) (xy 217.17 130.81)
		)
	)
	(wire
		(pts
			(xy 39.37 175.26) (xy 39.37 176.53)
		)
	)
	(wire
		(pts
			(xy 186.69 78.74) (xy 196.85 78.74)
		)
	)
	(wire
		(pts
			(xy 143.51 50.8) (xy 143.51 52.07)
		)
	)
	(wire
		(pts
			(xy 92.71 55.88) (xy 92.71 57.15)
		)
	)
	(wire
		(pts
			(xy 99.06 55.88) (xy 99.06 57.15)
		)
	)
	(wire
		(pts
			(xy 185.42 144.78) (xy 185.42 127)
		)
	)
	(wire
		(pts
			(xy 147.32 77.47) (xy 161.29 77.47)
		)
	)
	(wire
		(pts
			(xy 185.42 127) (xy 127 127)
		)
	)
	(wire
		(pts
			(xy 196.85 78.74) (xy 196.85 80.01)
		)
	)
	(wire
		(pts
			(xy 105.41 64.77) (xy 119.38 64.77)
		)
	)
	(wire
		(pts
			(xy 111.76 92.71) (xy 119.38 92.71)
		)
	)
	(wire
		(pts
			(xy 271.78 138.43) (xy 271.78 139.7)
		)
	)
	(wire
		(pts
			(xy 198.12 78.74) (xy 196.85 78.74)
		)
	)
	(wire
		(pts
			(xy 149.86 41.91) (xy 149.86 43.18)
		)
	)
	(wire
		(pts
			(xy 186.69 60.96) (xy 196.85 60.96)
		)
	)
	(wire
		(pts
			(xy 99.06 92.71) (xy 99.06 101.6)
		)
	)
	(wire
		(pts
			(xy 119.38 167.64) (xy 109.22 167.64)
		)
	)
	(wire
		(pts
			(xy 143.51 41.91) (xy 143.51 43.18)
		)
	)
	(wire
		(pts
			(xy 157.48 50.8) (xy 157.48 52.07)
		)
	)
	(wire
		(pts
			(xy 198.12 96.52) (xy 196.85 96.52)
		)
	)
	(wire
		(pts
			(xy 67.31 97.79) (xy 119.38 97.79)
		)
	)
	(wire
		(pts
			(xy 55.88 157.48) (xy 54.61 157.48)
		)
	)
	(wire
		(pts
			(xy 91.44 127) (xy 100.33 127)
		)
	)
	(wire
		(pts
			(xy 66.04 154.94) (xy 74.93 154.94)
		)
	)
	(wire
		(pts
			(xy 109.22 167.64) (xy 104.14 167.64)
		)
	)
	(wire
		(pts
			(xy 109.22 177.8) (xy 109.22 179.07)
		)
	)
	(wire
		(pts
			(xy 143.51 41.91) (xy 149.86 41.91)
		)
	)
	(wire
		(pts
			(xy 147.32 67.31) (xy 186.69 67.31)
		)
	)
	(wire
		(pts
			(xy 91.44 124.46) (xy 100.33 124.46)
		)
	)
	(wire
		(pts
			(xy 134.62 54.61) (xy 132.08 54.61)
		)
	)
	(wire
		(pts
			(xy 257.81 88.9) (xy 257.81 91.44)
		)
	)
	(wire
		(pts
			(xy 147.32 166.37) (xy 147.32 167.64)
		)
	)
	(wire
		(pts
			(xy 92.71 134.62) (xy 92.71 135.89)
		)
	)
	(wire
		(pts
			(xy 196.85 96.52) (xy 196.85 97.79)
		)
	)
	(wire
		(pts
			(xy 147.32 82.55) (xy 161.29 82.55)
		)
	)
	(wire
		(pts
			(xy 137.16 41.91) (xy 143.51 41.91)
		)
	)
	(wire
		(pts
			(xy 275.59 58.42) (xy 275.59 60.96)
		)
	)
	(wire
		(pts
			(xy 184.15 43.18) (xy 196.85 43.18)
		)
	)
	(wire
		(pts
			(xy 196.85 52.07) (xy 196.85 53.34)
		)
	)
	(wire
		(pts
			(xy 69.85 95.25) (xy 119.38 95.25)
		)
	)
	(wire
		(pts
			(xy 186.69 69.85) (xy 186.69 78.74)
		)
	)
	(wire
		(pts
			(xy 99.06 46.99) (xy 99.06 48.26)
		)
	)
	(wire
		(pts
			(xy 167.64 143.51) (xy 167.64 144.78)
		)
	)
	(wire
		(pts
			(xy 104.14 74.93) (xy 119.38 74.93)
		)
	)
	(wire
		(pts
			(xy 40.64 41.91) (xy 45.72 41.91)
		)
	)
	(wire
		(pts
			(xy 217.17 125.73) (xy 210.82 125.73)
		)
	)
	(wire
		(pts
			(xy 198.12 43.18) (xy 196.85 43.18)
		)
	)
	(wire
		(pts
			(xy 204.47 125.73) (xy 204.47 128.27)
		)
	)
	(wire
		(pts
			(xy 240.03 55.88) (xy 238.76 55.88)
		)
	)
	(wire
		(pts
			(xy 118.11 63.5) (xy 118.11 69.85)
		)
	)
	(wire
		(pts
			(xy 54.61 97.79) (xy 67.31 97.79)
		)
	)
	(wire
		(pts
			(xy 224.79 83.82) (xy 240.03 83.82)
		)
	)
	(wire
		(pts
			(xy 208.28 132.08) (xy 208.28 130.81)
		)
	)
	(wire
		(pts
			(xy 55.88 152.4) (xy 54.61 152.4)
		)
	)
	(wire
		(pts
			(xy 209.55 133.35) (xy 209.55 137.16)
		)
	)
	(wire
		(pts
			(xy 264.16 139.7) (xy 271.78 139.7)
		)
	)
	(wire
		(pts
			(xy 234.95 133.35) (xy 241.3 133.35)
		)
	)
	(wire
		(pts
			(xy 134.62 54.61) (xy 134.62 59.69)
		)
	)
	(wire
		(pts
			(xy 257.81 88.9) (xy 256.54 88.9)
		)
	)
	(wire
		(pts
			(xy 196.85 105.41) (xy 196.85 106.68)
		)
	)
	(wire
		(pts
			(xy 185.42 144.78) (xy 264.16 144.78)
		)
	)
	(wire
		(pts
			(xy 54.61 95.25) (xy 69.85 95.25)
		)
	)
	(wire
		(pts
			(xy 99.06 92.71) (xy 104.14 92.71)
		)
	)
	(wire
		(pts
			(xy 196.85 69.85) (xy 196.85 71.12)
		)
	)
	(wire
		(pts
			(xy 152.4 175.26) (xy 152.4 184.15)
		)
	)
	(wire
		(pts
			(xy 67.31 143.51) (xy 67.31 144.78)
		)
	)
	(wire
		(pts
			(xy 54.61 149.86) (xy 55.88 149.86)
		)
	)
	(wire
		(pts
			(xy 147.32 90.17) (xy 161.29 90.17)
		)
	)
	(wire
		(pts
			(xy 109.22 170.18) (xy 109.22 167.64)
		)
	)
	(wire
		(pts
			(xy 257.81 58.42) (xy 256.54 58.42)
		)
	)
	(wire
		(pts
			(xy 147.32 69.85) (xy 186.69 69.85)
		)
	)
	(wire
		(pts
			(xy 111.76 111.76) (xy 111.76 92.71)
		)
	)
	(wire
		(pts
			(xy 204.47 128.27) (xy 217.17 128.27)
		)
	)
	(wire
		(pts
			(xy 104.14 90.17) (xy 92.71 90.17)
		)
	)
	(wire
		(pts
			(xy 40.64 40.64) (xy 45.72 40.64)
		)
	)
	(wire
		(pts
			(xy 91.44 129.54) (xy 100.33 129.54)
		)
	)
	(wire
		(pts
			(xy 205.74 43.18) (xy 209.55 43.18)
		)
	)
	(wire
		(pts
			(xy 91.44 134.62) (xy 92.71 134.62)
		)
	)
	(wire
		(pts
			(xy 55.88 154.94) (xy 55.88 157.48)
		)
	)
	(wire
		(pts
			(xy 168.91 39.37) (xy 168.91 41.91)
		)
	)
	(wire
		(pts
			(xy 91.44 121.92) (xy 100.33 121.92)
		)
	)
	(wire
		(pts
			(xy 271.78 111.76) (xy 271.78 113.03)
		)
	)
	(wire
		(pts
			(xy 67.31 142.24) (xy 67.31 143.51)
		)
	)
	(wire
		(pts
			(xy 92.71 90.17) (xy 92.71 101.6)
		)
	)
	(wire
		(pts
			(xy 167.64 152.4) (xy 167.64 153.67)
		)
	)
	(wire
		(pts
			(xy 90.17 165.1) (xy 91.44 165.1)
		)
	)
	(wire
		(pts
			(xy 147.32 100.33) (xy 161.29 100.33)
		)
	)
	(wire
		(pts
			(xy 116.84 116.84) (xy 116.84 111.76)
		)
	)
	(wire
		(pts
			(xy 157.48 41.91) (xy 158.75 41.91)
		)
	)
	(wire
		(pts
			(xy 196.85 60.96) (xy 196.85 62.23)
		)
	)
	(wire
		(pts
			(xy 256.54 86.36) (xy 257.81 86.36)
		)
	)
	(wire
		(pts
			(xy 91.44 119.38) (xy 92.71 119.38)
		)
	)
	(wire
		(pts
			(xy 137.16 39.37) (xy 137.16 41.91)
		)
	)
	(wire
		(pts
			(xy 54.61 142.24) (xy 58.42 142.24)
		)
	)
	(wire
		(pts
			(xy 241.3 125.73) (xy 241.3 133.35)
		)
	)
	(wire
		(pts
			(xy 248.92 118.11) (xy 264.16 118.11)
		)
	)
	(wire
		(pts
			(xy 205.74 60.96) (xy 209.55 60.96)
		)
	)
	(wire
		(pts
			(xy 275.59 48.26) (xy 275.59 50.8)
		)
	)
	(wire
		(pts
			(xy 256.54 83.82) (xy 270.51 83.82)
		)
	)
	(wire
		(pts
			(xy 91.44 82.55) (xy 92.71 82.55)
		)
	)
	(wire
		(pts
			(xy 66.04 152.4) (xy 74.93 152.4)
		)
	)
	(wire
		(pts
			(xy 119.38 162.56) (xy 109.22 162.56)
		)
	)
	(wire
		(pts
			(xy 54.61 154.94) (xy 55.88 154.94)
		)
	)
	(wire
		(pts
			(xy 55.88 154.94) (xy 58.42 154.94)
		)
	)
	(wire
		(pts
			(xy 83.82 71.12) (xy 83.82 77.47)
		)
	)
	(wire
		(pts
			(xy 54.61 137.16) (xy 58.42 137.16)
		)
	)
	(wire
		(pts
			(xy 193.04 132.08) (xy 208.28 132.08)
		)
	)
	(wire
		(pts
			(xy 67.31 143.51) (xy 68.58 143.51)
		)
	)
	(wire
		(pts
			(xy 54.61 71.12) (xy 83.82 71.12)
		)
	)
	(wire
		(pts
			(xy 246.38 130.81) (xy 246.38 149.86)
		)
	)
	(wire
		(pts
			(xy 168.91 41.91) (xy 166.37 41.91)
		)
	)
	(wire
		(pts
			(xy 132.08 54.61) (xy 132.08 59.69)
		)
	)
	(wire
		(pts
			(xy 147.32 87.63) (xy 161.29 87.63)
		)
	)
	(wire
		(pts
			(xy 234.95 130.81) (xy 246.38 130.81)
		)
	)
	(wire
		(pts
			(xy 116.84 111.76) (xy 111.76 111.76)
		)
	)
	(wire
		(pts
			(xy 152.4 157.48) (xy 152.4 158.75)
		)
	)
	(wire
		(pts
			(xy 184.15 96.52) (xy 196.85 96.52)
		)
	)
	(wire
		(pts
			(xy 240.03 86.36) (xy 238.76 86.36)
		)
	)
	(label "SWCLK"
		(at 119.38 167.64 180)
		(fields_autoplaced yes)
	)
	(label "SWDIO"
		(at 119.38 162.56 180)
		(fields_autoplaced yes)
	)
	(label "PWM_3V3_EXT"
		(at 149.86 77.47 0)
		(fields_autoplaced yes)
	)
	(label "SPARE1"
		(at 92.71 124.46 0)
		(fields_autoplaced yes)
	)
	(label "Tacho1"
		(at 118.11 100.33 270)
		(fields_autoplaced yes)
	)
	(label "Tacho1"
		(at 256.54 118.11 180)
		(fields_autoplaced yes)
	)
	(label "SWDIO"
		(at 149.86 97.79 0)
		(fields_autoplaced yes)
	)
	(label "USB_D-"
		(at 149.86 92.71 0)
		(fields_autoplaced yes)
	)
	(label "USB_D-"
		(at 68.58 152.4 0)
		(fields_autoplaced yes)
	)
	(label "PWM_3V3"
		(at 116.84 87.63 180)
		(fields_autoplaced yes)
	)
	(label "SWCLK"
		(at 149.86 100.33 0)
		(fields_autoplaced yes)
	)
	(label "USB_D+"
		(at 68.58 154.94 0)
		(fields_autoplaced yes)
	)
	(label "SDA"
		(at 266.7 53.34 180)
		(fields_autoplaced yes)
	)
	(label "X"
		(at 55.88 137.16 0)
		(fields_autoplaced yes)
	)
	(label "SCL"
		(at 224.79 83.82 0)
		(fields_autoplaced yes)
	)
	(label "LED1"
		(at 149.86 80.01 0)
		(fields_autoplaced yes)
	)
	(label "LED2"
		(at 147.32 184.15 90)
		(fields_autoplaced yes)
	)
	(label "SDA"
		(at 266.7 83.82 180)
		(fields_autoplaced yes)
	)
	(label "PWM_3V3"
		(at 204.47 125.73 180)
		(fields_autoplaced yes)
	)
	(label "SDA"
		(at 92.71 132.08 0)
		(fields_autoplaced yes)
	)
	(label "NRST"
		(at 81.28 162.56 0)
		(fields_autoplaced yes)
	)
	(label "LED2"
		(at 149.86 82.55 0)
		(fields_autoplaced yes)
	)
	(label "SCL"
		(at 59.69 95.25 180)
		(fields_autoplaced yes)
	)
	(label "SCL"
		(at 224.79 53.34 0)
		(fields_autoplaced yes)
	)
	(label "NRST"
		(at 111.76 64.77 180)
		(fields_autoplaced yes)
	)
	(label "SDA"
		(at 59.69 97.79 180)
		(fields_autoplaced yes)
	)
	(label "Spare"
		(at 149.86 74.93 0)
		(fields_autoplaced yes)
	)
	(label "PWM_3V3_EXT"
		(at 92.71 121.92 0)
		(fields_autoplaced yes)
	)
	(label "SPARE2"
		(at 92.71 127 0)
		(fields_autoplaced yes)
	)
	(label "PWM_3V3_EXT"
		(at 193.04 132.08 0)
		(fields_autoplaced yes)
	)
	(label "SCL"
		(at 92.71 129.54 0)
		(fields_autoplaced yes)
	)
	(label "Tacho2"
		(at 111.76 101.6 270)
		(fields_autoplaced yes)
	)
	(label "Tacho2"
		(at 259.08 144.78 180)
		(fields_autoplaced yes)
	)
	(label "USB_D+"
		(at 149.86 95.25 0)
		(fields_autoplaced yes)
	)
	(label "LED1"
		(at 152.4 184.15 90)
		(fields_autoplaced yes)
	)
	(hierarchical_label "V_FLEX1"
		(shape input)
		(at 209.55 96.52 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "+5V"
		(shape input)
		(at 40.64 41.91 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "RESET"
		(shape output)
		(at 161.29 85.09 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "Q"
		(shape input)
		(at 104.14 74.93 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "+12V_FAN"
		(shape input)
		(at 262.89 113.03 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "PWR_EN"
		(shape output)
		(at 104.14 85.09 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "V_FLEX4"
		(shape input)
		(at 209.55 43.18 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "TXD"
		(shape output)
		(at 161.29 87.63 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "+12V_FAN"
		(shape input)
		(at 264.16 139.7 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "V_FLEX3"
		(shape input)
		(at 209.55 60.96 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "V_FLEX2"
		(shape input)
		(at 209.55 78.74 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "+3V3"
		(shape input)
		(at 40.64 40.64 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "RXD"
		(shape input)
		(at 161.29 90.17 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "SHUTDOWN"
		(shape bidirectional)
		(at 54.61 71.12 180)
		(fields_autoplaced yes)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 45.72 40.64 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR038"
			(at 41.91 40.64 0)
		)
		(property "Value" "+3V3"
			(at 48.895 40.64 90)
		)
		(property "Footprint" ""
			(at 45.72 40.64 0)
		)
		(property "Datasheet" ""
			(at 45.72 40.64 0)
		)
		(property "Description" ""
			(at 45.72 40.64 0)
		)
		(pin "1")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "#PWR038")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "#PWR020")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR092")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "#PWR020")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 118.11 53.34 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR038"
			(at 118.11 57.15 0)
		)
		(property "Value" "+3V3"
			(at 118.11 48.26 0)
		)
		(property "Footprint" ""
			(at 118.11 53.34 0)
		)
		(property "Datasheet" ""
			(at 118.11 53.34 0)
		)
		(property "Description" ""
			(at 118.11 53.34 0)
		)
		(pin "1")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "#PWR038")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "#PWR020")
					(unit 1)
				)
			)
			(project "eload"
				(path
					(reference "#PWR016")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0108")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 149.86 46.99 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C23"
			(at 151.13 45.085 0)
		)
		(property "Value" "1µ"
			(at 151.13 50.8 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 149.86 46.99 0)
		)
		(property "Datasheet" ""
			(at 149.86 46.99 0)
		)
		(property "Description" ""
			(at 149.86 46.99 0)
		)
		(property "PARTNO" ""
			(at 149.86 46.99 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 149.86 46.99 0)
		)
		(property "Distributor" "D"
			(at 149.86 46.99 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 149.86 46.99 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pi"
				(path
					(reference "C23")
					(unit 1)
				)
			)
			(project "eload"
				(path
					(reference "C14")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C29")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 196.85 88.9 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0124"
			(at 196.85 95.25 0)
		)
		(property "Value" "GND"
			(at 196.85 93.98 0)
		)
		(property "Footprint" ""
			(at 196.85 88.9 0)
		)
		(property "Datasheet" ""
			(at 196.85 88.9 0)
		)
		(property "Description" ""
			(at 196.85 88.9 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0124")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "clock-rescue:R")
		(at 62.23 154.94 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R37"
			(at 62.23 156.972 90)
		)
		(property "Value" "22"
			(at 62.23 154.94 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 62.23 153.162 90)
		)
		(property "Datasheet" ""
			(at 62.23 154.94 0)
		)
		(property "Description" ""
			(at 62.23 154.94 0)
		)
		(property "Manufacturer" "RK73B1JTTD220J"
			(at 62.23 154.94 0)
		)
		(property "Distributor" "D"
			(at 62.23 154.94 0)
		)
		(property "OrderNr" "2019-RK73B1JTTD220JCT-ND"
			(at 62.23 154.94 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "clockmicro"
				(path
					(reference "R37")
					(unit 1)
				)
			)
			(project "fanpi"
				(path
					(reference "R20")
					(unit 1)
				)
			)
			(project "vfd-night-projector-clock"
				(path
					(reference "R28")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "R2")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R22")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_2")
		(lib_id "power:GND")
		(at 238.76 91.44 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0133"
			(at 238.76 97.79 0)
		)
		(property "Value" "GND"
			(at 238.76 96.52 0)
		)
		(property "Footprint" ""
			(at 238.76 91.44 0)
		)
		(property "Datasheet" ""
			(at 238.76 91.44 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 238.76 91.44 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0133")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "dwc-hat-rescue:GND-power")
		(at 90.17 165.1 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR011"
			(at 83.82 165.1 0)
		)
		(property "Value" "GND"
			(at 86.9188 165.227 90)
		)
		(property "Footprint" ""
			(at 90.17 165.1 0)
		)
		(property "Datasheet" ""
			(at 90.17 165.1 0)
		)
		(property "Description" ""
			(at 90.17 165.1 0)
		)
		(pin "1")
		(instances
			(project "dwc-hat"
				(path
					(reference "#PWR011")
					(unit 1)
				)
			)
			(project "fanpi"
				(path
					(reference "#PWR011")
					(unit 1)
				)
			)
			(project "vfd-night-projector-clock"
				(path
					(reference "#PWR041")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "#PWR02")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR098")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "#PWR01")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:TMP1075-DRL-SOT563")
		(at 248.92 55.88 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U89"
			(at 248.285 49.53 0)
		)
		(property "Value" "TMP1075"
			(at 246.38 60.96 0)
		)
		(property "Footprint" "Library2:TMP"
			(at 245.11 54.61 0)
		)
		(property "Datasheet" ""
			(at 245.11 54.61 0)
		)
		(property "Description" ""
			(at 248.92 55.88 0)
		)
		(property "Distributor" "D"
			(at 248.92 55.88 0)
		)
		(property "Manufacturer" "TMP1075NDRLR"
			(at 248.92 55.88 0)
		)
		(property "OrderNr" "296-TMP1075NDRLRCT-ND"
			(at 248.92 55.88 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(instances
			(project "8]axe"
				(path
					(reference "U89")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 196.85 71.12 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0123"
			(at 196.85 77.47 0)
		)
		(property "Value" "GND"
			(at 196.85 76.2 0)
		)
		(property "Footprint" ""
			(at 196.85 71.12 0)
		)
		(property "Datasheet" ""
			(at 196.85 71.12 0)
		)
		(property "Description" ""
			(at 196.85 71.12 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0123")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 149.86 52.07 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR045"
			(at 149.86 58.42 0)
		)
		(property "Value" "GND"
			(at 149.86 55.245 0)
		)
		(property "Footprint" ""
			(at 149.86 52.07 0)
		)
		(property "Datasheet" ""
			(at 149.86 52.07 0)
		)
		(property "Description" ""
			(at 149.86 52.07 0)
		)
		(pin "1")
		(instances
			(project "eload"
				(path
					(reference "#PWR045")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0114")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "+3V3_1")
		(lib_id "power:+3V3")
		(at 257.81 81.28 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0132"
			(at 257.81 85.09 0)
		)
		(property "Value" "+3V3"
			(at 257.81 76.2 0)
		)
		(property "Footprint" ""
			(at 257.81 81.28 0)
		)
		(property "Datasheet" ""
			(at 257.81 81.28 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+3V3\""
			(at 257.81 81.28 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0132")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 31.75 176.53 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR090"
			(at 31.75 182.88 0)
		)
		(property "Value" "GND"
			(at 31.75 181.61 0)
		)
		(property "Footprint" ""
			(at 31.75 176.53 0)
		)
		(property "Datasheet" ""
			(at 31.75 176.53 0)
		)
		(property "Description" ""
			(at 31.75 176.53 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR090")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "dwc-hat-rescue:GND-power")
		(at 109.22 179.07 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR013"
			(at 109.22 185.42 0)
		)
		(property "Value" "GND"
			(at 109.347 182.3212 90)
		)
		(property "Footprint" ""
			(at 109.22 179.07 0)
		)
		(property "Datasheet" ""
			(at 109.22 179.07 0)
		)
		(property "Description" ""
			(at 109.22 179.07 0)
		)
		(pin "1")
		(instances
			(project "dwc-hat"
				(path
					(reference "#PWR013")
					(unit 1)
				)
			)
			(project "fanpi"
				(path
					(reference "#PWR015")
					(unit 1)
				)
			)
			(project "vfd-night-projector-clock"
				(path
					(reference "#PWR043")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "#PWR06")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0107")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "#PWR08")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "vfd1-rescue:C")
		(at 99.06 52.07 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6"
			(at 99.695 49.53 0)
		)
		(property "Value" "100n"
			(at 99.695 54.61 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 100.0252 55.88 0)
		)
		(property "Datasheet" ""
			(at 99.06 52.07 0)
		)
		(property "Description" ""
			(at 99.06 52.07 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 99.06 52.07 0)
		)
		(property "Distributor" "D"
			(at 99.06 52.07 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 99.06 52.07 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "C6")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "C4")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C27")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "C2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 99.06 57.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR052"
			(at 99.06 63.5 0)
		)
		(property "Value" "GND"
			(at 99.06 62.23 0)
		)
		(property "Footprint" ""
			(at 99.06 57.15 0)
		)
		(property "Datasheet" ""
			(at 99.06 57.15 0)
		)
		(property "Description" ""
			(at 99.06 57.15 0)
		)
		(pin "1")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "#PWR052")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "#PWR015")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0103")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "#PWR016")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 152.4 162.56 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R31"
			(at 153.67 161.29 0)
		)
		(property "Value" "560"
			(at 153.67 163.83 0)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 150.622 162.56 90)
		)
		(property "Datasheet" "~"
			(at 152.4 162.56 0)
		)
		(property "Description" ""
			(at 152.4 162.56 0)
		)
		(property "Manufacturer" "ERJ-H3EF5600V"
			(at 152.4 162.56 0)
		)
		(property "Distributor" "D"
			(at 152.4 162.56 0)
		)
		(property "OrderNr" "10-ERJ-H3EF5600VCT-ND"
			(at 152.4 162.56 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pi"
				(path
					(reference "R31")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R30")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "R6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Switch:SW_Push")
		(at 118.11 58.42 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "SW1"
			(at 120.015 57.15 90)
		)
		(property "Value" "boot"
			(at 120.015 59.69 90)
		)
		(property "Footprint" "Button_Switch_SMD:SW_Push_1P1T_NO_CK_KMR2"
			(at 113.03 58.42 0)
		)
		(property "Datasheet" "~"
			(at 113.03 58.42 0)
		)
		(property "Description" ""
			(at 118.11 58.42 0)
		)
		(property "Distributor" "D"
			(at 118.11 58.42 0)
		)
		(property "Manufacturer" "KMR231NG ULC LFS"
			(at 118.11 58.42 0)
		)
		(property "OrderNr" "CKN10284CT-ND"
			(at 118.11 58.42 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "SW1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+3V3A")
		(at 137.16 39.37 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR031"
			(at 137.16 43.18 0)
		)
		(property "Value" "+3V3A"
			(at 137.16 34.29 0)
		)
		(property "Footprint" ""
			(at 137.16 39.37 0)
		)
		(property "Datasheet" ""
			(at 137.16 39.37 0)
		)
		(property "Description" ""
			(at 137.16 39.37 0)
		)
		(pin "1")
		(instances
			(project "eload"
				(path
					(reference "#PWR031")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0111")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 167.64 153.67 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR053"
			(at 167.64 160.02 0)
		)
		(property "Value" "GND"
			(at 167.64 158.75 0)
		)
		(property "Footprint" ""
			(at 167.64 153.67 0)
		)
		(property "Datasheet" ""
			(at 167.64 153.67 0)
		)
		(property "Description" ""
			(at 167.64 153.67 0)
		)
		(pin "1")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "#PWR053")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "#PWR018")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0119")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "#PWR018")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 157.48 46.99 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C9"
			(at 160.655 45.72 0)
		)
		(property "Value" "10µ/50V"
			(at 160.655 48.26 0)
		)
		(property "Footprint" "Capacitor_SMD:C_1206_3216Metric"
			(at 158.4452 50.8 0)
		)
		(property "Datasheet" "~"
			(at 157.48 46.99 0)
		)
		(property "Description" ""
			(at 157.48 46.99 0)
		)
		(property "Distributor" "D"
			(at 157.48 46.99 0)
		)
		(property "Manufacturer" "CL31A106MBHNNNE"
			(at 157.48 46.99 0)
		)
		(property "OrderNr" "1276-6736-1-ND"
			(at 157.48 46.99 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "eload"
				(path
					(reference "C9")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C30")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Motor:Fan_4pin")
		(at 271.78 147.32 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "M3"
			(at 276.225 147.32 0)
		)
		(property "Value" "Fan_4pin"
			(at 276.225 148.59 0)
		)
		(property "Footprint" "Connector:FanPinHeader_1x04_P2.54mm_Vertical"
			(at 271.78 147.066 0)
		)
		(property "Datasheet" "http://www.formfactors.org/developer%5Cspecs%5Crev1_2_public.pdf"
			(at 271.78 147.066 0)
		)
		(property "Description" ""
			(at 271.78 147.32 0)
		)
		(property "Distributor" "D"
			(at 271.78 147.32 0)
		)
		(property "Manufacturer" "0470531000"
			(at 271.78 147.32 0)
		)
		(property "OrderNr" "WM4330-ND"
			(at 271.78 147.32 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(instances
			(project "8]axe"
				(path
					(reference "M3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 68.58 143.51 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR095"
			(at 74.93 143.51 0)
		)
		(property "Value" "GND"
			(at 72.39 143.51 90)
		)
		(property "Footprint" ""
			(at 68.58 143.51 0)
		)
		(property "Datasheet" ""
			(at 68.58 143.51 0)
		)
		(property "Description" ""
			(at 68.58 143.51 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR095")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_1")
		(lib_id "power:GND")
		(at 271.78 152.4 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR0186"
			(at 271.78 158.75 0)
		)
		(property "Value" "GND"
			(at 274.066 155.702 0)
		)
		(property "Footprint" ""
			(at 271.78 152.4 0)
		)
		(property "Datasheet" ""
			(at 271.78 152.4 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 271.78 152.4 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0186")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "vfd1-rescue:C")
		(at 167.64 148.59 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5"
			(at 168.275 146.05 0)
		)
		(property "Value" "100n"
			(at 168.275 151.13 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 168.6052 152.4 0)
		)
		(property "Datasheet" ""
			(at 167.64 148.59 0)
		)
		(property "Description" ""
			(at 167.64 148.59 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 167.64 148.59 0)
		)
		(property "Distributor" "D"
			(at 167.64 148.59 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 167.64 148.59 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "C5")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "C5")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C31")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "C3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 201.93 78.74 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R23"
			(at 201.93 76.2 90)
		)
		(property "Value" "1k"
			(at 201.93 81.28 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 201.93 80.518 90)
		)
		(property "Datasheet" "~"
			(at 201.93 78.74 0)
		)
		(property "Description" ""
			(at 201.93 78.74 0)
		)
		(property "Manufacturer" "RCS06031K00FKEA"
			(at 201.93 78.74 0)
		)
		(property "DK-Partnumber" "541-1.00KHCT-ND"
			(at 201.93 78.74 0)
		)
		(property "Distributor" "D"
			(at 201.93 78.74 0)
		)
		(property "OrderNr" "541-2788-1-ND"
			(at 201.93 78.74 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "R23")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "R5")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R34")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "R8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "+3V3_1")
		(lib_id "power:+3V3")
		(at 275.59 48.26 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0504"
			(at 275.59 52.07 0)
		)
		(property "Value" "+3V3"
			(at 275.59 43.18 0)
		)
		(property "Footprint" ""
			(at 275.59 48.26 0)
		)
		(property "Datasheet" ""
			(at 275.59 48.26 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+3V3\""
			(at 275.59 48.26 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0504")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 99.06 46.99 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR049"
			(at 99.06 50.8 0)
		)
		(property "Value" "+3V3"
			(at 99.06 41.91 0)
		)
		(property "Footprint" ""
			(at 99.06 46.99 0)
		)
		(property "Datasheet" ""
			(at 99.06 46.99 0)
		)
		(property "Description" ""
			(at 99.06 46.99 0)
		)
		(pin "1")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "#PWR049")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "#PWR014")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0102")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "#PWR014")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 107.95 90.17 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R36"
			(at 107.696 90.17 90)
		)
		(property "Value" "3.92k"
			(at 102.108 89.154 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 107.95 91.948 90)
		)
		(property "Datasheet" "~"
			(at 107.95 90.17 0)
		)
		(property "Description" "Resistor"
			(at 107.95 90.17 0)
		)
		(property "DK-Partnumber" "311-3.92KHRCT-ND"
			(at 107.95 90.17 0)
		)
		(property "Distributor" "D"
			(at 107.95 90.17 0)
		)
		(property "Manufacturer" "RC0603FR-073K92L"
			(at 107.95 90.17 0)
		)
		(property "OrderNr" "311-3.92KHRCT-ND"
			(at 107.95 90.17 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "R36")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "vfd1-rescue:C")
		(at 92.71 52.07 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C9"
			(at 93.345 49.53 0)
		)
		(property "Value" "100n"
			(at 93.345 54.61 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 93.6752 55.88 0)
		)
		(property "Datasheet" ""
			(at 92.71 52.07 0)
		)
		(property "Description" ""
			(at 92.71 52.07 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 92.71 52.07 0)
		)
		(property "Distributor" "D"
			(at 92.71 52.07 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 92.71 52.07 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "C9")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "C3")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C26")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "C1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 196.85 53.34 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0122"
			(at 196.85 59.69 0)
		)
		(property "Value" "GND"
			(at 196.85 58.42 0)
		)
		(property "Footprint" ""
			(at 196.85 53.34 0)
		)
		(property "Datasheet" ""
			(at 196.85 53.34 0)
		)
		(property "Description" ""
			(at 196.85 53.34 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0122")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 132.08 53.34 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR038"
			(at 132.08 57.15 0)
		)
		(property "Value" "+3V3"
			(at 132.08 48.26 0)
		)
		(property "Footprint" ""
			(at 132.08 53.34 0)
		)
		(property "Datasheet" ""
			(at 132.08 53.34 0)
		)
		(property "Description" ""
			(at 132.08 53.34 0)
		)
		(pin "1")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "#PWR038")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "#PWR020")
					(unit 1)
				)
			)
			(project "eload"
				(path
					(reference "#PWR016")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0109")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 167.64 143.51 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR048"
			(at 167.64 147.32 0)
		)
		(property "Value" "+3V3"
			(at 167.64 138.43 0)
		)
		(property "Footprint" ""
			(at 167.64 143.51 0)
		)
		(property "Datasheet" ""
			(at 167.64 143.51 0)
		)
		(property "Description" ""
			(at 167.64 143.51 0)
		)
		(pin "1")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "#PWR048")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "#PWR017")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0118")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "#PWR017")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 92.71 57.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR051"
			(at 92.71 63.5 0)
		)
		(property "Value" "GND"
			(at 92.71 62.23 0)
		)
		(property "Footprint" ""
			(at 92.71 57.15 0)
		)
		(property "Datasheet" ""
			(at 92.71 57.15 0)
		)
		(property "Description" ""
			(at 92.71 57.15 0)
		)
		(pin "1")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "#PWR051")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "#PWR013")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0100")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "#PWR013")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 39.37 176.53 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR091"
			(at 39.37 182.88 0)
		)
		(property "Value" "GND"
			(at 39.37 181.61 0)
		)
		(property "Footprint" ""
			(at 39.37 176.53 0)
		)
		(property "Datasheet" ""
			(at 39.37 176.53 0)
		)
		(property "Description" ""
			(at 39.37 176.53 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR091")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "dwc-hat-rescue:R-Device")
		(at 109.22 157.48 0)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R27"
			(at 104.14 154.94 90)
		)
		(property "Value" "10k"
			(at 106.68 154.94 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 107.442 157.48 90)
		)
		(property "Datasheet" ""
			(at 109.22 157.48 0)
		)
		(property "Description" ""
			(at 109.22 157.48 0)
		)
		(property "Distributor" "D"
			(at 109.22 157.48 0)
		)
		(property "Manufacturer" "ERJ-H3EF1002V"
			(at 109.22 157.48 0)
		)
		(property "OrderNr" "10-ERJ-H3EF1002VCT-ND"
			(at 109.22 157.48 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "dwc-hat"
				(path
					(reference "R27")
					(unit 1)
				)
			)
			(project "fanpi"
				(path
					(reference "R3")
					(unit 1)
				)
			)
			(project "vfd-night-projector-clock"
				(path
					(reference "R24")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "R3")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R26")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "R3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "+3V3_1")
		(lib_id "power:+3V3")
		(at 257.81 50.8 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0496"
			(at 257.81 54.61 0)
		)
		(property "Value" "+3V3"
			(at 257.81 45.72 0)
		)
		(property "Footprint" ""
			(at 257.81 50.8 0)
		)
		(property "Datasheet" ""
			(at 257.81 50.8 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+3V3\""
			(at 257.81 50.8 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0496")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "clock-rescue:R")
		(at 62.23 142.24 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R36"
			(at 62.23 139.7 90)
		)
		(property "Value" "5.1k"
			(at 62.23 142.24 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 62.23 140.462 90)
		)
		(property "Datasheet" ""
			(at 62.23 142.24 0)
		)
		(property "Description" ""
			(at 62.23 142.24 0)
		)
		(property "Manufacturer" "ERA-3VEB5101V"
			(at 62.23 142.24 0)
		)
		(property "Distributor" "D"
			(at 62.23 142.24 0)
		)
		(property "OrderNr" "10-ERA-3VEB5101VCT-ND"
			(at 62.23 142.24 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "clockmicro"
				(path
					(reference "R36")
					(unit 1)
				)
			)
			(project "fanpi"
				(path
					(reference "R19")
					(unit 1)
				)
			)
			(project "vfd-night-projector-clock"
				(path
					(reference "R27")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "R1")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R19")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "clock-rescue:R")
		(at 62.23 152.4 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R36"
			(at 62.23 149.86 90)
		)
		(property "Value" "22"
			(at 62.23 152.4 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 62.23 150.622 90)
		)
		(property "Datasheet" ""
			(at 62.23 152.4 0)
		)
		(property "Description" ""
			(at 62.23 152.4 0)
		)
		(property "Manufacturer" "RK73B1JTTD220J"
			(at 62.23 152.4 0)
		)
		(property "Distributor" "D"
			(at 62.23 152.4 0)
		)
		(property "OrderNr" "2019-RK73B1JTTD220JCT-ND"
			(at 62.23 152.4 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "clockmicro"
				(path
					(reference "R36")
					(unit 1)
				)
			)
			(project "fanpi"
				(path
					(reference "R19")
					(unit 1)
				)
			)
			(project "vfd-night-projector-clock"
				(path
					(reference "R27")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "R1")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R21")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "clock-rescue:R")
		(at 62.23 144.78 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R36"
			(at 62.23 147.32 90)
		)
		(property "Value" "5.1k"
			(at 62.23 144.78 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 62.23 146.558 90)
		)
		(property "Datasheet" ""
			(at 62.23 144.78 0)
		)
		(property "Description" ""
			(at 62.23 144.78 0)
		)
		(property "Manufacturer" "ERA-3VEB5101V"
			(at 62.23 144.78 0)
		)
		(property "Distributor" "D"
			(at 62.23 144.78 0)
		)
		(property "OrderNr" "10-ERA-3VEB5101VCT-ND"
			(at 62.23 144.78 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "clockmicro"
				(path
					(reference "R36")
					(unit 1)
				)
			)
			(project "fanpi"
				(path
					(reference "R19")
					(unit 1)
				)
			)
			(project "vfd-night-projector-clock"
				(path
					(reference "R27")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "R1")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R20")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 107.95 69.85 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR040"
			(at 101.6 69.85 0)
		)
		(property "Value" "GND"
			(at 104.14 69.85 90)
		)
		(property "Footprint" ""
			(at 107.95 69.85 0)
		)
		(property "Datasheet" ""
			(at 107.95 69.85 0)
		)
		(property "Description" ""
			(at 107.95 69.85 0)
		)
		(pin "1")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "#PWR040")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "#PWR019")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0105")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "#PWR019")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 175.26 153.67 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR053"
			(at 175.26 160.02 0)
		)
		(property "Value" "GND"
			(at 175.26 158.75 0)
		)
		(property "Footprint" ""
			(at 175.26 153.67 0)
		)
		(property "Datasheet" ""
			(at 175.26 153.67 0)
		)
		(property "Description" ""
			(at 175.26 153.67 0)
		)
		(pin "1")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "#PWR053")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "#PWR018")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0121")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "#PWR018")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+5V")
		(at 241.3 123.19 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR011"
			(at 241.3 127 0)
		)
		(property "Value" "+5V"
			(at 241.3 118.745 0)
		)
		(property "Footprint" ""
			(at 241.3 123.19 0)
		)
		(property "Datasheet" ""
			(at 241.3 123.19 0)
		)
		(property "Description" ""
			(at 241.3 123.19 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR011")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 143.51 52.07 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR028"
			(at 143.51 58.42 0)
		)
		(property "Value" "GND"
			(at 143.51 55.245 0)
		)
		(property "Footprint" ""
			(at 143.51 52.07 0)
		)
		(property "Datasheet" ""
			(at 143.51 52.07 0)
		)
		(property "Description" ""
			(at 143.51 52.07 0)
		)
		(pin "1")
		(instances
			(project "eload"
				(path
					(reference "#PWR028")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0112")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "+3V3_3")
		(lib_id "power:+3V3")
		(at 92.71 101.6 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0126"
			(at 92.71 97.79 0)
		)
		(property "Value" "+3V3"
			(at 92.71 106.68 0)
		)
		(property "Footprint" ""
			(at 92.71 101.6 0)
		)
		(property "Datasheet" ""
			(at 92.71 101.6 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+3V3\""
			(at 92.71 101.6 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0126")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 147.32 157.48 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR0171"
			(at 147.32 161.29 0)
		)
		(property "Value" "+3V3"
			(at 147.32 151.765 90)
		)
		(property "Footprint" ""
			(at 147.32 157.48 0)
		)
		(property "Datasheet" ""
			(at 147.32 157.48 0)
		)
		(property "Description" ""
			(at 147.32 157.48 0)
		)
		(pin "1")
		(instances
			(project "pi"
				(path
					(reference "#PWR0171")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0113")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "#PWR09")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector_Generic:Conn_01x07")
		(at 86.36 127 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp yes)
		(fields_autoplaced yes)
		(property "Reference" "J6"
			(at 86.36 115.57 0)
		)
		(property "Value" "Conn_01x05"
			(at 86.36 118.11 0)
		)
		(property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_1x07_P2.54mm_Vertical"
			(at 86.36 127 0)
		)
		(property "Datasheet" "~"
			(at 86.36 127 0)
		)
		(property "Description" "Generic connector, single row, 01x07, script generated (kicad-library-utils/schlib/autogen/connector/)"
			(at 86.36 127 0)
		)
		(property "Distributor" "-"
			(at 86.36 127 0)
		)
		(pin "4")
		(pin "2")
		(pin "5")
		(pin "3")
		(pin "1")
		(pin "7")
		(pin "6")
		(instances
			(project "8]axe"
				(path
					(reference "J6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "vfd1-rescue:C")
		(at 196.85 101.6 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6"
			(at 196.215 99.06 0)
		)
		(property "Value" "100n"
			(at 196.215 104.14 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 195.8848 105.41 0)
		)
		(property "Datasheet" ""
			(at 196.85 101.6 0)
		)
		(property "Description" ""
			(at 196.85 101.6 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 196.85 101.6 0)
		)
		(property "Distributor" "D"
			(at 196.85 101.6 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 196.85 101.6 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "C6")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "C4")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C36")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "C2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 143.51 46.99 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C23"
			(at 144.78 45.085 0)
		)
		(property "Value" "100n"
			(at 144.78 50.8 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 143.51 46.99 0)
		)
		(property "Datasheet" ""
			(at 143.51 46.99 0)
		)
		(property "Description" ""
			(at 143.51 46.99 0)
		)
		(property "PARTNO" ""
			(at 143.51 46.99 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 143.51 46.99 0)
		)
		(property "Distributor" "D"
			(at 143.51 46.99 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 143.51 46.99 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pi"
				(path
					(reference "C23")
					(unit 1)
				)
			)
			(project "eload"
				(path
					(reference "C15")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C28")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:TMP1075-DRL-SOT563")
		(at 248.92 86.36 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U5023"
			(at 248.285 80.01 0)
		)
		(property "Value" "TMP1075"
			(at 246.38 91.44 0)
		)
		(property "Footprint" "Library2:TMP"
			(at 245.11 85.09 0)
		)
		(property "Datasheet" ""
			(at 245.11 85.09 0)
		)
		(property "Description" ""
			(at 248.92 86.36 0)
		)
		(property "Distributor" "D"
			(at 248.92 86.36 0)
		)
		(property "Manufacturer" "TMP1075NDRLR"
			(at 248.92 86.36 0)
		)
		(property "OrderNr" "296-TMP1075NDRLRCT-ND"
			(at 248.92 86.36 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(instances
			(project "flex1"
				(path
					(reference "U5023")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U12")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 201.93 60.96 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R23"
			(at 201.93 58.42 90)
		)
		(property "Value" "1k"
			(at 201.93 63.5 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 201.93 62.738 90)
		)
		(property "Datasheet" "~"
			(at 201.93 60.96 0)
		)
		(property "Description" ""
			(at 201.93 60.96 0)
		)
		(property "Manufacturer" "RCS06031K00FKEA"
			(at 201.93 60.96 0)
		)
		(property "DK-Partnumber" "541-1.00KHCT-ND"
			(at 201.93 60.96 0)
		)
		(property "Distributor" "D"
			(at 201.93 60.96 0)
		)
		(property "OrderNr" "541-2788-1-ND"
			(at 201.93 60.96 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "R23")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "R5")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R33")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "R8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 210.82 123.19 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR04"
			(at 210.82 127 0)
		)
		(property "Value" "+3V3"
			(at 210.82 118.745 0)
		)
		(property "Footprint" ""
			(at 210.82 123.19 0)
		)
		(property "Datasheet" ""
			(at 210.82 123.19 0)
		)
		(property "Description" ""
			(at 210.82 123.19 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR04")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "dwc-hat-rescue:+3V3-power")
		(at 109.22 153.67 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR012"
			(at 109.22 157.48 0)
		)
		(property "Value" "+3V3"
			(at 105.41 152.4 0)
		)
		(property "Footprint" ""
			(at 109.22 153.67 0)
		)
		(property "Datasheet" ""
			(at 109.22 153.67 0)
		)
		(property "Description" ""
			(at 109.22 153.67 0)
		)
		(pin "1")
		(instances
			(project "dwc-hat"
				(path
					(reference "#PWR012")
					(unit 1)
				)
			)
			(project "fanpi"
				(path
					(reference "#PWR014")
					(unit 1)
				)
			)
			(project "vfd-night-projector-clock"
				(path
					(reference "#PWR042")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "#PWR05")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0106")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "#PWR07")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "dwc-hat-rescue:Conn_02x05_Odd_Even-Connector_Generic")
		(at 96.52 167.64 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "J5"
			(at 97.79 157.0482 0)
		)
		(property "Value" "SWD"
			(at 97.79 159.3596 0)
		)
		(property "Footprint" "Library2:CONN10_3221-10-0300-00_CNC"
			(at 96.52 167.64 0)
		)
		(property "Datasheet" ""
			(at 96.52 167.64 0)
		)
		(property "Description" ""
			(at 96.52 167.64 0)
		)
		(property "Distributor" "D"
			(at 96.52 167.64 0)
		)
		(property "Manufacturer" ""
			(at 96.52 167.64 0)
		)
		(property "OrderNr" "1175-1735-ND"
			(at 96.52 167.64 0)
		)
		(pin "1")
		(pin "10")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "dwc-hat"
				(path
					(reference "J5")
					(unit 1)
				)
			)
			(project "fanpi"
				(path
					(reference "J2")
					(unit 1)
				)
			)
			(project "vfd-night-projector-clock"
				(path
					(reference "J1")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "J2")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "J4")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "J1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Transistor_FET:BSS138")
		(at 86.36 82.55 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "Q4"
			(at 86.995 78.105 0)
		)
		(property "Value" "BSS138"
			(at 92.075 86.36 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23"
			(at 81.28 84.455 0)
		)
		(property "Datasheet" "https://www.onsemi.com/pub/Collateral/BSS138-D.PDF"
			(at 86.36 82.55 0)
		)
		(property "Description" ""
			(at 86.36 82.55 0)
		)
		(property "Distributor" "D"
			(at 86.36 82.55 0)
		)
		(property "OrderNr" "4530-BSS138CT-ND"
			(at 86.36 82.55 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(instances
			(project "8]axe"
				(path
					(reference "Q4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "+3V3_2")
		(lib_id "power:+3V3")
		(at 92.71 119.38 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board no)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0401"
			(at 92.71 123.19 0)
		)
		(property "Value" "+3V3"
			(at 92.71 114.3 0)
		)
		(property "Footprint" ""
			(at 92.71 119.38 0)
		)
		(property "Datasheet" ""
			(at 92.71 119.38 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+3V3\""
			(at 92.71 119.38 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0401")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 83.82 87.63 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR097"
			(at 83.82 93.98 0)
		)
		(property "Value" "GND"
			(at 83.82 92.71 0)
		)
		(property "Footprint" ""
			(at 83.82 87.63 0)
		)
		(property "Datasheet" ""
			(at 83.82 87.63 0)
		)
		(property "Description" ""
			(at 83.82 87.63 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR097")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+12V")
		(at 271.78 111.76 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR0170"
			(at 271.78 115.57 0)
		)
		(property "Value" "+12V"
			(at 271.272 107.442 0)
		)
		(property "Footprint" ""
			(at 271.78 111.76 0)
		)
		(property "Datasheet" ""
			(at 271.78 111.76 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+12V\""
			(at 271.78 111.76 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0170")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:LED")
		(at 147.32 171.45 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "D5"
			(at 144.145 170.4975 90)
		)
		(property "Value" "LED"
			(at 144.145 173.0375 90)
		)
		(property "Footprint" "LED_SMD:LED_1206_3216Metric"
			(at 147.32 171.45 0)
		)
		(property "Datasheet" "~"
			(at 147.32 171.45 0)
		)
		(property "Description" ""
			(at 147.32 171.45 0)
		)
		(property "Distributor" "D"
			(at 147.32 171.45 0)
		)
		(property "OrderNr" "732-4991-1-ND"
			(at 147.32 171.45 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pi"
				(path
					(reference "D5")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "D4")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "D1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "vfd1-rescue:C")
		(at 196.85 66.04 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6"
			(at 196.215 63.5 0)
		)
		(property "Value" "100n"
			(at 196.215 68.58 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 195.8848 69.85 0)
		)
		(property "Datasheet" ""
			(at 196.85 66.04 0)
		)
		(property "Description" ""
			(at 196.85 66.04 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 196.85 66.04 0)
		)
		(property "Distributor" "D"
			(at 196.85 66.04 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 196.85 66.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "C6")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "C4")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C34")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "C2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 107.95 92.71 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R37"
			(at 107.95 92.71 90)
		)
		(property "Value" "3.92k"
			(at 102.616 94.234 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 107.95 94.488 90)
		)
		(property "Datasheet" "~"
			(at 107.95 92.71 0)
		)
		(property "Description" "Resistor"
			(at 107.95 92.71 0)
		)
		(property "DK-Partnumber" "311-3.92KHRCT-ND"
			(at 107.95 92.71 0)
		)
		(property "Distributor" "D"
			(at 107.95 92.71 0)
		)
		(property "Manufacturer" "RC0603FR-073K92L"
			(at 107.95 92.71 0)
		)
		(property "OrderNr" "311-3.92KHRCT-ND"
			(at 107.95 92.71 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "R37")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 113.03 69.85 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R23"
			(at 113.03 67.31 90)
		)
		(property "Value" "100k"
			(at 113.03 72.39 90)
		)
		(property "Footprint" "Resistor_SMD:R_0805_2012Metric"
			(at 113.03 71.628 90)
		)
		(property "Datasheet" "~"
			(at 113.03 69.85 0)
		)
		(property "Description" ""
			(at 113.03 69.85 0)
		)
		(property "Distributor" "D"
			(at 113.03 69.85 0)
		)
		(property "Manufacturer" "RMCF0805FT100K"
			(at 113.03 69.85 0)
		)
		(property "OrderNr" "RMCF0805FT100KCT-ND"
			(at 113.03 69.85 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "R23")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "R5")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R28")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "R8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "New_Library_0:TXU0102DCK")
		(at 226.06 128.27 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U26"
			(at 226.06 119.634 0)
		)
		(property "Value" "TXU0102-DCU"
			(at 226.06 121.92 0)
		)
		(property "Footprint" "Package_SO:VSSOP-8_2.3x2mm_P0.5mm"
			(at 228.6 121.92 0)
		)
		(property "Datasheet" ""
			(at 224.79 125.73 0)
		)
		(property "Description" ""
			(at 226.06 128.27 0)
		)
		(property "Distributor" "D"
			(at 226.06 128.27 0)
		)
		(property "Manufacturer" "TXU0102DCUR"
			(at 226.06 128.27 0)
		)
		(property "OrderNr" "296-TXU0102DCURCT-ND"
			(at 226.06 128.27 0)
		)
		(pin "1")
		(pin "4")
		(pin "7")
		(pin "3")
		(pin "2")
		(pin "5")
		(pin "6")
		(pin "8")
		(instances
			(project "8]axe"
				(path
					(reference "U26")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "+3V3_1")
		(lib_id "power:+3V3")
		(at 275.59 78.74 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0130"
			(at 275.59 82.55 0)
		)
		(property "Value" "+3V3"
			(at 275.59 73.66 0)
		)
		(property "Footprint" ""
			(at 275.59 78.74 0)
		)
		(property "Datasheet" ""
			(at 275.59 78.74 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+3V3\""
			(at 275.59 78.74 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0130")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 275.59 54.61 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C165"
			(at 276.86 52.705 0)
		)
		(property "Value" "100n"
			(at 276.86 58.42 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 275.59 54.61 0)
		)
		(property "Datasheet" ""
			(at 275.59 54.61 0)
		)
		(property "Description" ""
			(at 275.59 54.61 0)
		)
		(property "DK" ""
			(at 275.59 54.61 0)
		)
		(property "PARTNO" ""
			(at 275.59 54.61 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 275.59 54.61 0)
		)
		(property "Distributor" "D"
			(at 275.59 54.61 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 275.59 54.61 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "C165")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 168.91 39.37 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR048"
			(at 168.91 43.18 0)
		)
		(property "Value" "+3V3"
			(at 168.91 34.29 0)
		)
		(property "Footprint" ""
			(at 168.91 39.37 0)
		)
		(property "Datasheet" ""
			(at 168.91 39.37 0)
		)
		(property "Description" ""
			(at 168.91 39.37 0)
		)
		(pin "1")
		(instances
			(project "eload"
				(path
					(reference "#PWR048")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0117")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 201.93 43.18 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R23"
			(at 201.93 40.64 90)
		)
		(property "Value" "1k"
			(at 201.93 45.72 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 201.93 44.958 90)
		)
		(property "Datasheet" "~"
			(at 201.93 43.18 0)
		)
		(property "Description" ""
			(at 201.93 43.18 0)
		)
		(property "Manufacturer" "RCS06031K00FKEA"
			(at 201.93 43.18 0)
		)
		(property "DK-Partnumber" "541-1.00KHCT-ND"
			(at 201.93 43.18 0)
		)
		(property "Distributor" "D"
			(at 201.93 43.18 0)
		)
		(property "OrderNr" "541-2788-1-ND"
			(at 201.93 43.18 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "R23")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "R5")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R32")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "R8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "vfd1-rescue:C")
		(at 196.85 48.26 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6"
			(at 196.215 45.72 0)
		)
		(property "Value" "100n"
			(at 196.215 50.8 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 195.8848 52.07 0)
		)
		(property "Datasheet" ""
			(at 196.85 48.26 0)
		)
		(property "Description" ""
			(at 196.85 48.26 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 196.85 48.26 0)
		)
		(property "Distributor" "D"
			(at 196.85 48.26 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 196.85 48.26 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "C6")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "C4")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C33")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "C2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 92.71 72.39 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR038"
			(at 92.71 76.2 0)
		)
		(property "Value" "+3V3"
			(at 92.71 67.31 0)
		)
		(property "Footprint" ""
			(at 92.71 72.39 0)
		)
		(property "Datasheet" ""
			(at 92.71 72.39 0)
		)
		(property "Description" ""
			(at 92.71 72.39 0)
		)
		(pin "1")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "#PWR038")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "#PWR020")
					(unit 1)
				)
			)
			(project "eload"
				(path
					(reference "#PWR016")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0101")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_2")
		(lib_id "power:GND")
		(at 275.59 91.44 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0129"
			(at 275.59 97.79 0)
		)
		(property "Value" "GND"
			(at 275.59 96.52 0)
		)
		(property "Footprint" ""
			(at 275.59 91.44 0)
		)
		(property "Datasheet" ""
			(at 275.59 91.44 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 275.59 91.44 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0129")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "dwc-hat-rescue:GND-power")
		(at 105.41 165.1 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR014"
			(at 111.76 165.1 0)
		)
		(property "Value" "GND"
			(at 108.6612 164.973 90)
		)
		(property "Footprint" ""
			(at 105.41 165.1 0)
		)
		(property "Datasheet" ""
			(at 105.41 165.1 0)
		)
		(property "Description" ""
			(at 105.41 165.1 0)
		)
		(pin "1")
		(instances
			(project "dwc-hat"
				(path
					(reference "#PWR014")
					(unit 1)
				)
			)
			(project "fanpi"
				(path
					(reference "#PWR016")
					(unit 1)
				)
			)
			(project "vfd-night-projector-clock"
				(path
					(reference "#PWR044")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "#PWR07")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0104")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "#PWR06")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+5V")
		(at 45.72 41.91 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR093"
			(at 41.91 41.91 0)
		)
		(property "Value" "+5V"
			(at 49.53 41.91 90)
		)
		(property "Footprint" ""
			(at 45.72 41.91 0)
		)
		(property "Datasheet" ""
			(at 45.72 41.91 0)
		)
		(property "Description" ""
			(at 45.72 41.91 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR093")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_2")
		(lib_id "power:GND")
		(at 275.59 60.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0506"
			(at 275.59 67.31 0)
		)
		(property "Value" "GND"
			(at 275.59 66.04 0)
		)
		(property "Footprint" ""
			(at 275.59 60.96 0)
		)
		(property "Datasheet" ""
			(at 275.59 60.96 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 275.59 60.96 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0506")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 162.56 41.91 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R29"
			(at 161.29 39.37 0)
		)
		(property "Value" "22"
			(at 163.83 39.37 0)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 162.56 43.688 90)
		)
		(property "Datasheet" "~"
			(at 162.56 41.91 0)
		)
		(property "Description" ""
			(at 162.56 41.91 0)
		)
		(property "Manufacturer" "RK73B1JTTD220J"
			(at 162.56 41.91 0)
		)
		(property "Distributor" "D"
			(at 162.56 41.91 0)
		)
		(property "OrderNr" "2019-RK73B1JTTD220JCT-ND"
			(at 162.56 41.91 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pi"
				(path
					(reference "R29")
					(unit 1)
				)
			)
			(project "eload"
				(path
					(reference "R22")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R31")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+5V")
		(at 175.26 143.51 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0120"
			(at 175.26 147.32 0)
		)
		(property "Value" "+5V"
			(at 175.26 138.43 0)
		)
		(property "Footprint" ""
			(at 175.26 143.51 0)
		)
		(property "Datasheet" ""
			(at 175.26 143.51 0)
		)
		(property "Description" ""
			(at 175.26 143.51 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0120")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 275.59 85.09 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5056"
			(at 276.86 83.185 0)
		)
		(property "Value" "100n"
			(at 276.86 88.9 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 275.59 85.09 0)
		)
		(property "Datasheet" ""
			(at 275.59 85.09 0)
		)
		(property "Description" ""
			(at 275.59 85.09 0)
		)
		(property "DK" ""
			(at 275.59 85.09 0)
		)
		(property "PARTNO" ""
			(at 275.59 85.09 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 275.59 85.09 0)
		)
		(property "Distributor" "D"
			(at 275.59 85.09 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 275.59 85.09 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5056")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C37")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "+3V3_3")
		(lib_id "power:+3V3")
		(at 99.06 101.6 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0127"
			(at 99.06 97.79 0)
		)
		(property "Value" "+3V3"
			(at 99.06 106.68 0)
		)
		(property "Footprint" ""
			(at 99.06 101.6 0)
		)
		(property "Datasheet" ""
			(at 99.06 101.6 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+3V3\""
			(at 99.06 101.6 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0127")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+12V")
		(at 271.78 138.43 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR0185"
			(at 271.78 142.24 0)
		)
		(property "Value" "+12V"
			(at 271.272 135.128 0)
		)
		(property "Footprint" ""
			(at 271.78 138.43 0)
		)
		(property "Datasheet" ""
			(at 271.78 138.43 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+12V\""
			(at 271.78 138.43 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0185")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "vfd1-rescue:C")
		(at 196.85 83.82 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6"
			(at 196.215 81.28 0)
		)
		(property "Value" "100n"
			(at 196.215 86.36 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 195.8848 87.63 0)
		)
		(property "Datasheet" ""
			(at 196.85 83.82 0)
		)
		(property "Description" ""
			(at 196.85 83.82 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 196.85 83.82 0)
		)
		(property "Distributor" "D"
			(at 196.85 83.82 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 196.85 83.82 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "C6")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "C4")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C35")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "C2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 69.85 85.09 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR0170"
			(at 69.85 88.9 0)
		)
		(property "Value" "+3V3"
			(at 69.85 79.375 90)
		)
		(property "Footprint" ""
			(at 69.85 85.09 0)
		)
		(property "Datasheet" ""
			(at 69.85 85.09 0)
		)
		(property "Description" ""
			(at 69.85 85.09 0)
		)
		(pin "1")
		(instances
			(project "pi"
				(path
					(reference "#PWR0170")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR096")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "#PWR011")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_1")
		(lib_id "power:GND")
		(at 209.55 137.16 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR01"
			(at 209.55 143.51 0)
		)
		(property "Value" "GND"
			(at 209.55 142.24 0)
		)
		(property "Footprint" ""
			(at 209.55 137.16 0)
		)
		(property "Datasheet" ""
			(at 209.55 137.16 0)
		)
		(property "Description" ""
			(at 209.55 137.16 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR01")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_2")
		(lib_id "power:GND")
		(at 257.81 91.44 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0131"
			(at 257.81 97.79 0)
		)
		(property "Value" "GND"
			(at 257.81 96.52 0)
		)
		(property "Footprint" ""
			(at 257.81 91.44 0)
		)
		(property "Datasheet" ""
			(at 257.81 91.44 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 257.81 91.44 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0131")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 67.31 85.09 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR0170"
			(at 67.31 88.9 0)
		)
		(property "Value" "+3V3"
			(at 67.31 79.375 90)
		)
		(property "Footprint" ""
			(at 67.31 85.09 0)
		)
		(property "Datasheet" ""
			(at 67.31 85.09 0)
		)
		(property "Description" ""
			(at 67.31 85.09 0)
		)
		(pin "1")
		(instances
			(project "pi"
				(path
					(reference "#PWR0170")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR094")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "#PWR011")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_2")
		(lib_id "power:GND")
		(at 238.76 60.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0391"
			(at 238.76 67.31 0)
		)
		(property "Value" "GND"
			(at 238.76 66.04 0)
		)
		(property "Footprint" ""
			(at 238.76 60.96 0)
		)
		(property "Datasheet" ""
			(at 238.76 60.96 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 238.76 60.96 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0391")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 157.48 52.07 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR046"
			(at 157.48 58.42 0)
		)
		(property "Value" "GND"
			(at 157.48 55.245 0)
		)
		(property "Footprint" ""
			(at 157.48 52.07 0)
		)
		(property "Datasheet" ""
			(at 157.48 52.07 0)
		)
		(property "Description" ""
			(at 157.48 52.07 0)
		)
		(pin "1")
		(instances
			(project "eload"
				(path
					(reference "#PWR046")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0116")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 196.85 106.68 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0125"
			(at 196.85 113.03 0)
		)
		(property "Value" "GND"
			(at 196.85 111.76 0)
		)
		(property "Footprint" ""
			(at 196.85 106.68 0)
		)
		(property "Datasheet" ""
			(at 196.85 106.68 0)
		)
		(property "Description" ""
			(at 196.85 106.68 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0125")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 147.32 162.56 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R30"
			(at 144.78 161.29 0)
		)
		(property "Value" "560"
			(at 144.78 163.83 0)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 149.098 162.56 90)
		)
		(property "Datasheet" "~"
			(at 147.32 162.56 0)
		)
		(property "Description" ""
			(at 147.32 162.56 0)
		)
		(property "Manufacturer" "ERJ-H3EF5600V"
			(at 147.32 162.56 0)
		)
		(property "Distributor" "D"
			(at 147.32 162.56 0)
		)
		(property "OrderNr" "10-ERJ-H3EF5600VCT-ND"
			(at 147.32 162.56 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pi"
				(path
					(reference "R30")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R29")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "R5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_3")
		(lib_id "power:GND")
		(at 92.71 135.89 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board no)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0385"
			(at 92.71 142.24 0)
		)
		(property "Value" "GND"
			(at 92.71 140.97 0)
		)
		(property "Footprint" ""
			(at 92.71 135.89 0)
		)
		(property "Datasheet" ""
			(at 92.71 135.89 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 92.71 135.89 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0385")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:LED")
		(at 152.4 171.45 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "D6"
			(at 156.21 170.18 90)
		)
		(property "Value" "LED"
			(at 157.48 172.72 90)
		)
		(property "Footprint" "LED_SMD:LED_1206_3216Metric"
			(at 152.4 171.45 0)
		)
		(property "Datasheet" "~"
			(at 152.4 171.45 0)
		)
		(property "Description" ""
			(at 152.4 171.45 0)
		)
		(property "Distributor" "D"
			(at 152.4 171.45 0)
		)
		(property "OrderNr" "732-4991-1-ND"
			(at 152.4 171.45 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pi"
				(path
					(reference "D6")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "D5")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "D2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Motor:Fan_4pin")
		(at 271.78 120.65 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "M1"
			(at 276.225 120.65 0)
		)
		(property "Value" "Fan_4pin"
			(at 276.225 121.92 0)
		)
		(property "Footprint" "Connector:FanPinHeader_1x04_P2.54mm_Vertical"
			(at 271.78 120.396 0)
		)
		(property "Datasheet" "http://www.formfactors.org/developer%5Cspecs%5Crev1_2_public.pdf"
			(at 271.78 120.396 0)
		)
		(property "Description" ""
			(at 271.78 120.65 0)
		)
		(property "Distributor" "D"
			(at 271.78 120.65 0)
		)
		(property "Manufacturer" "0470531000"
			(at 271.78 120.65 0)
		)
		(property "OrderNr" "WM4330-ND"
			(at 271.78 120.65 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(instances
			(project "8]axe"
				(path
					(reference "M1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "vfd1-rescue:C")
		(at 175.26 148.59 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5"
			(at 175.895 146.05 0)
		)
		(property "Value" "100n"
			(at 175.895 151.13 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 176.2252 152.4 0)
		)
		(property "Datasheet" ""
			(at 175.26 148.59 0)
		)
		(property "Description" ""
			(at 175.26 148.59 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 175.26 148.59 0)
		)
		(property "Distributor" "D"
			(at 175.26 148.59 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 175.26 148.59 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "C5")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "C5")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C32")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "C3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "MCU_ST_STM32L0:STM32L052K6Tx")
		(at 132.08 85.09 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U3"
			(at 136.8141 110.49 0)
		)
		(property "Value" "STM32L072KZT6"
			(at 136.8141 113.03 0)
		)
		(property "Footprint" "Package_QFP:LQFP-32_7x7mm_P0.8mm"
			(at 121.92 107.95 0)
		)
		(property "Datasheet" ""
			(at 132.08 85.09 0)
		)
		(property "Description" ""
			(at 132.08 85.09 0)
		)
		(property "Distributor" "D"
			(at 132.08 85.09 0)
		)
		(property "Manufacturer" "STM32L072KZT6"
			(at 132.08 85.09 0)
		)
		(property "OrderNr" "497-19668-ND"
			(at 132.08 85.09 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "17")
		(pin "18")
		(pin "19")
		(pin "2")
		(pin "20")
		(pin "21")
		(pin "22")
		(pin "23")
		(pin "24")
		(pin "25")
		(pin "26")
		(pin "27")
		(pin "28")
		(pin "29")
		(pin "3")
		(pin "30")
		(pin "31")
		(pin "32")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "U3")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "U1")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U10")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "U2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 201.93 96.52 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R23"
			(at 201.93 93.98 90)
		)
		(property "Value" "1k"
			(at 201.93 99.06 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 201.93 98.298 90)
		)
		(property "Datasheet" "~"
			(at 201.93 96.52 0)
		)
		(property "Description" ""
			(at 201.93 96.52 0)
		)
		(property "Manufacturer" "RCS06031K00FKEA"
			(at 201.93 96.52 0)
		)
		(property "DK-Partnumber" "541-1.00KHCT-ND"
			(at 201.93 96.52 0)
		)
		(property "Distributor" "D"
			(at 201.93 96.52 0)
		)
		(property "OrderNr" "541-2788-1-ND"
			(at 201.93 96.52 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "R23")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "R5")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R35")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "R8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 67.31 90.17 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R29"
			(at 64.77 88.9 0)
		)
		(property "Value" "1.5k"
			(at 64.77 91.44 0)
		)
		(property "Footprint" "Resistor_SMD:R_0805_2012Metric"
			(at 69.088 90.17 90)
		)
		(property "Datasheet" "~"
			(at 67.31 90.17 0)
		)
		(property "Description" ""
			(at 67.31 90.17 0)
		)
		(property "Distributor" "D"
			(at 67.31 90.17 0)
		)
		(property "Manufacturer" "A129751CT-ND"
			(at 67.31 90.17 0)
		)
		(property "OrderNr" "A129751CT-ND"
			(at 67.31 90.17 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pi"
				(path
					(reference "R29")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R23")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "R7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 92.71 46.99 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR050"
			(at 92.71 50.8 0)
		)
		(property "Value" "+3V3"
			(at 92.71 41.91 0)
		)
		(property "Footprint" ""
			(at 92.71 46.99 0)
		)
		(property "Datasheet" ""
			(at 92.71 46.99 0)
		)
		(property "Description" ""
			(at 92.71 46.99 0)
		)
		(pin "1")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "#PWR050")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "#PWR012")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR099")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "#PWR012")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "dwc-hat-rescue:R-Device")
		(at 109.22 173.99 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R28"
			(at 114.3 171.45 90)
		)
		(property "Value" "10k"
			(at 111.76 171.45 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 110.998 173.99 90)
		)
		(property "Datasheet" ""
			(at 109.22 173.99 0)
		)
		(property "Description" ""
			(at 109.22 173.99 0)
		)
		(property "Distributor" "D"
			(at 109.22 173.99 0)
		)
		(property "Manufacturer" "ERJ-H3EF1002V"
			(at 109.22 173.99 0)
		)
		(property "OrderNr" "10-ERJ-H3EF1002VCT-ND"
			(at 109.22 173.99 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "dwc-hat"
				(path
					(reference "R28")
					(unit 1)
				)
			)
			(project "fanpi"
				(path
					(reference "R4")
					(unit 1)
				)
			)
			(project "vfd-night-projector-clock"
				(path
					(reference "R25")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "R4")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R27")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "R4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_1")
		(lib_id "power:GND")
		(at 271.78 125.73 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR0178"
			(at 271.78 132.08 0)
		)
		(property "Value" "GND"
			(at 274.32 129.286 0)
		)
		(property "Footprint" ""
			(at 271.78 125.73 0)
		)
		(property "Datasheet" ""
			(at 271.78 125.73 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 271.78 125.73 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0178")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "dwc-hat-rescue:R-Device")
		(at 92.71 76.2 0)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R27"
			(at 87.63 73.66 90)
		)
		(property "Value" "10k"
			(at 90.17 73.66 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 90.932 76.2 90)
		)
		(property "Datasheet" ""
			(at 92.71 76.2 0)
		)
		(property "Description" ""
			(at 92.71 76.2 0)
		)
		(property "Distributor" "D"
			(at 92.71 76.2 0)
		)
		(property "Manufacturer" "ERJ-H3EF1002V"
			(at 92.71 76.2 0)
		)
		(property "OrderNr" "10-ERJ-H3EF1002VCT-ND"
			(at 92.71 76.2 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "dwc-hat"
				(path
					(reference "R27")
					(unit 1)
				)
			)
			(project "fanpi"
				(path
					(reference "R3")
					(unit 1)
				)
			)
			(project "vfd-night-projector-clock"
				(path
					(reference "R24")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "R3")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R25")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "R3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 134.62 111.76 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR039"
			(at 134.62 118.11 0)
		)
		(property "Value" "GND"
			(at 134.62 116.84 0)
		)
		(property "Footprint" ""
			(at 134.62 111.76 0)
		)
		(property "Datasheet" ""
			(at 134.62 111.76 0)
		)
		(property "Description" ""
			(at 134.62 111.76 0)
		)
		(pin "1")
		(instances
			(project "vfd-night-projector-clock"
				(path
					(reference "#PWR039")
					(unit 1)
				)
			)
			(project "pi"
				(path
					(reference "#PWR021")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0110")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "#PWR021")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 152.4 157.48 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR0172"
			(at 152.4 161.29 0)
		)
		(property "Value" "+3V3"
			(at 152.4 151.765 90)
		)
		(property "Footprint" ""
			(at 152.4 157.48 0)
		)
		(property "Datasheet" ""
			(at 152.4 157.48 0)
		)
		(property "Description" ""
			(at 152.4 157.48 0)
		)
		(pin "1")
		(instances
			(project "pi"
				(path
					(reference "#PWR0172")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0115")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "#PWR010")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 69.85 90.17 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R29"
			(at 72.39 88.9 0)
		)
		(property "Value" "1.5k"
			(at 72.39 91.44 0)
		)
		(property "Footprint" "Resistor_SMD:R_0805_2012Metric"
			(at 68.072 90.17 90)
		)
		(property "Datasheet" "~"
			(at 69.85 90.17 0)
		)
		(property "Description" ""
			(at 69.85 90.17 0)
		)
		(property "Distributor" "D"
			(at 69.85 90.17 0)
		)
		(property "Manufacturer" "A129751CT-ND"
			(at 69.85 90.17 0)
		)
		(property "OrderNr" "A129751CT-ND"
			(at 69.85 90.17 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pi"
				(path
					(reference "R29")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R24")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "R7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:USB_C_Receptacle_USB2.0")
		(at 39.37 152.4 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "J3"
			(at 39.37 129.54 0)
		)
		(property "Value" "USB_C_Receptacle_USB2.0"
			(at 39.37 132.08 0)
		)
		(property "Footprint" "Connector_USB:USB_C_Receptacle_GCT_USB4105-xx-A_16P_TopMnt_Horizontal"
			(at 43.18 152.4 0)
		)
		(property "Datasheet" "https://www.usb.org/sites/default/files/documents/usb_type-c.zip"
			(at 43.18 152.4 0)
		)
		(property "Description" ""
			(at 39.37 152.4 0)
		)
		(property "Distributor" "D"
			(at 39.37 152.4 0)
		)
		(property "Manufacturer" "USB4105-GF-A"
			(at 39.37 152.4 0)
		)
		(property "OrderNr" "2073-USB4105-GF-ACT-ND"
			(at 39.37 152.4 0)
		)
		(pin "A1")
		(pin "A12")
		(pin "A4")
		(pin "A5")
		(pin "A6")
		(pin "A7")
		(pin "A8")
		(pin "A9")
		(pin "B1")
		(pin "B12")
		(pin "B4")
		(pin "B5")
		(pin "B6")
		(pin "B7")
		(pin "B8")
		(pin "B9")
		(pin "S1")
		(instances
			(project "8]axe"
				(path
					(reference "J3")
					(unit 1)
				)
			)
		)
	)
)
