(kicad_sch
	(version 20231120)
	(generator "eeschema")
	(generator_version "8.0")
	(paper "A")
	(title_block
		(title "bitaxeHex")
		(date "2023-12-28")
		(rev "302")
	)
	(lib_symbols
		(symbol "74xGxx:74LVC1G175"
			(pin_names
				(offset 1.016)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -5.08 10.16 0)
			)
			(property "Value" "74LVC1G175"
				(at 10.16 -10.16 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "http://www.ti.com/lit/sg/scyt129e/scyt129e.pdf"
				(at 0 0 0)
			)
			(property "Description" "Single D Flip-Flop w/ Asnynchronus Clear, Low-Voltage CMOS"
				(at 0 0 0)
			)
			(property "ki_keywords" "Single D Flip-Flop Clear CMOS"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOT* SC*"
				(at 0 0 0)
			)
			(symbol "74LVC1G175_0_1"
				(rectangle
					(start -7.62 7.62)
					(end 7.62 -7.62)
					(fill
						(type background)
					)
				)
			)
			(symbol "74LVC1G175_1_1"
				(pin input clock
					(at -12.7 0 0)
					(length 5.08)
					(name "C")
					(number "1")
				)
				(pin power_in line
					(at 0 -12.7 90)
					(length 5.08)
					(name "GND")
					(number "2")
				)
				(pin input line
					(at -12.7 5.08 0)
					(length 5.08)
					(name "D")
					(number "3")
				)
				(pin output line
					(at 12.7 5.08 180)
					(length 5.08)
					(name "Q")
					(number "4")
				)
				(pin power_in line
					(at 0 12.7 270)
					(length 5.08)
					(name "VCC")
					(number "5")
				)
				(pin input line
					(at -12.7 -5.08 0)
					(length 5.08)
					(name "~{CLR}")
					(number "6")
				)
			)
		)
		(symbol "Connector:TestPoint"
			(pin_numbers hide)
			(pin_names
				(offset 0.762) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "TP"
				(at 0 6.858 0)
			)
			(property "Value" "TestPoint"
				(at 0 5.08 0)
			)
			(property "Footprint" ""
				(at 5.08 0 0)
			)
			(property "Datasheet" "~"
				(at 5.08 0 0)
			)
			(property "Description" "test point"
				(at 0 0 0)
			)
			(property "ki_keywords" "test point tp"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Pin* Test*"
				(at 0 0 0)
			)
			(symbol "TestPoint_0_1"
				(circle
					(center 0 3.302)
					(radius 0.762)
					(fill
						(type none)
					)
				)
			)
			(symbol "TestPoint_1_1"
				(pin passive line
					(at 0 0 90)
					(length 2.54)
					(name "1")
					(number "1")
				)
			)
		)
		(symbol "Device:C"
			(pin_numbers hide)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Unpolarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C_*"
				(at 0 0 0)
			)
			(symbol "C_0_1"
				(polyline
					(pts
						(xy -2.032 -0.762) (xy 2.032 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.032 0.762) (xy 2.032 0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:C_Small"
			(pin_numbers hide)
			(pin_names
				(offset 0.254) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.254 1.778 0)
			)
			(property "Value" "C_Small"
				(at 0.254 -2.032 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Unpolarized capacitor, small symbol"
				(at 0 0 0)
			)
			(property "ki_keywords" "capacitor cap"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C_*"
				(at 0 0 0)
			)
			(symbol "C_Small_0_1"
				(polyline
					(pts
						(xy -1.524 -0.508) (xy 1.524 -0.508)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.524 0.508) (xy 1.524 0.508)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_Small_1_1"
				(pin passive line
					(at 0 2.54 270)
					(length 2.032)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -2.54 90)
					(length 2.032)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:D_Schottky"
			(pin_numbers hide)
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "D"
				(at 0 2.54 0)
			)
			(property "Value" "D_Schottky"
				(at 0 -2.54 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Schottky diode"
				(at 0 0 0)
			)
			(property "ki_keywords" "diode Schottky"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "TO-???* *_Diode_* *SingleDiode* D_*"
				(at 0 0 0)
			)
			(symbol "D_Schottky_0_1"
				(polyline
					(pts
						(xy 1.27 0) (xy -1.27 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 1.27) (xy 1.27 -1.27) (xy -1.27 0) (xy 1.27 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.905 0.635) (xy -1.905 1.27) (xy -1.27 1.27) (xy -1.27 -1.27) (xy -0.635 -1.27) (xy -0.635 -0.635)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "D_Schottky_1_1"
				(pin passive line
					(at -3.81 0 0)
					(length 2.54)
					(name "K")
					(number "1")
				)
				(pin passive line
					(at 3.81 0 180)
					(length 2.54)
					(name "A")
					(number "2")
				)
			)
		)
		(symbol "Device:L"
			(pin_numbers hide)
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "L"
				(at -1.27 0 90)
			)
			(property "Value" "L"
				(at 1.905 0 90)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Inductor"
				(at 0 0 0)
			)
			(property "ki_keywords" "inductor choke coil reactor magnetic"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Choke_* *Coil* Inductor_* L_*"
				(at 0 0 0)
			)
			(symbol "L_0_1"
				(arc
					(start 0 -2.54)
					(mid 0.6323 -1.905)
					(end 0 -1.27)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 -1.27)
					(mid 0.6323 -0.635)
					(end 0 0)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 0)
					(mid 0.6323 0.635)
					(end 0 1.27)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 1.27)
					(mid 0.6323 1.905)
					(end 0 2.54)
					(fill
						(type none)
					)
				)
			)
			(symbol "L_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "1")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "2")
					(number "2")
				)
			)
		)
		(symbol "Device:R"
			(pin_numbers hide)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 2.032 0 90)
			)
			(property "Value" "R"
				(at 0 0 90)
			)
			(property "Footprint" ""
				(at -1.778 0 90)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Resistor"
				(at 0 0 0)
			)
			(property "ki_keywords" "R res resistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R_0_1"
				(rectangle
					(start -1.016 -2.54)
					(end 1.016 2.54)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Jumper:SolderJumper_2_Open"
			(pin_names
				(offset 0) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "JP"
				(at 0 2.032 0)
			)
			(property "Value" "SolderJumper_2_Open"
				(at 0 -2.54 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Solder Jumper, 2-pole, open"
				(at 0 0 0)
			)
			(property "ki_keywords" "solder jumper SPST"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SolderJumper*Open*"
				(at 0 0 0)
			)
			(symbol "SolderJumper_2_Open_0_1"
				(arc
					(start -0.254 1.016)
					(mid -1.2656 0)
					(end -0.254 -1.016)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.254 1.016)
					(mid -1.2656 0)
					(end -0.254 -1.016)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy -0.254 1.016) (xy -0.254 -1.016)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.254 1.016) (xy 0.254 -1.016)
					)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.254 -1.016)
					(mid 1.2656 0)
					(end 0.254 1.016)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.254 -1.016)
					(mid 1.2656 0)
					(end 0.254 1.016)
					(fill
						(type outline)
					)
				)
			)
			(symbol "SolderJumper_2_Open_1_1"
				(pin passive line
					(at -3.81 0 0)
					(length 2.54)
					(name "A")
					(number "1")
				)
				(pin passive line
					(at 3.81 0 180)
					(length 2.54)
					(name "B")
					(number "2")
				)
			)
		)
		(symbol "Regulator_Linear:AZ1117-3.3"
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -3.81 3.175 0)
			)
			(property "Value" "AZ1117-3.3"
				(at 0 3.175 0)
			)
			(property "Footprint" ""
				(at 0 6.35 0)
			)
			(property "Datasheet" "https://www.diodes.com/assets/Datasheets/AZ1117.pdf"
				(at 0 0 0)
			)
			(property "Description" "1A 20V Fixed LDO Linear Regulator, 3.3V, SOT-89/SOT-223/TO-220/TO-252/TO-263"
				(at 0 0 0)
			)
			(property "ki_keywords" "Fixed Voltage Regulator 1A Positive LDO"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOT?223* SOT?89* TO?220* TO?252* TO?263*"
				(at 0 0 0)
			)
			(symbol "AZ1117-3.3_0_1"
				(rectangle
					(start -5.08 1.905)
					(end 5.08 -5.08)
					(fill
						(type background)
					)
				)
			)
			(symbol "AZ1117-3.3_1_1"
				(pin power_in line
					(at 0 -7.62 90)
					(length 2.54)
					(name "GND")
					(number "1")
				)
				(pin power_out line
					(at 7.62 0 180)
					(length 2.54)
					(name "VO")
					(number "2")
				)
				(pin power_in line
					(at -7.62 0 0)
					(length 2.54)
					(name "VI")
					(number "3")
				)
			)
		)
		(symbol "Regulator_Linear:NCP718xSN500"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -3.81 6.35 0)
			)
			(property "Value" "NCP718xSN500"
				(at 6.35 6.35 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5"
				(at 0 8.89 0)
			)
			(property "Datasheet" "https://www.onsemi.com/pub/Collateral/NCP718-D.PDF"
				(at 0 12.7 0)
			)
			(property "Description" "300-mA, Wide Input Voltage, Low-IQ LDO, 5.0V, SOT-23"
				(at 0 0 0)
			)
			(property "ki_keywords" "Single Output LDO Wide Input"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOT?23*"
				(at 0 0 0)
			)
			(symbol "NCP718xSN500_0_1"
				(rectangle
					(start -5.08 -5.08)
					(end 5.08 5.08)
					(fill
						(type background)
					)
				)
				(pin power_in line
					(at -7.62 2.54 0)
					(length 2.54)
					(name "IN")
					(number "1")
				)
				(pin power_in line
					(at 0 -7.62 90)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin input line
					(at -7.62 0 0)
					(length 2.54)
					(name "EN")
					(number "3")
				)
				(pin no_connect line
					(at 5.08 0 180)
					(length 2.54) hide
					(name "NC")
					(number "4")
				)
				(pin power_out line
					(at 7.62 2.54 180)
					(length 2.54)
					(name "OUT")
					(number "5")
				)
			)
		)
		(symbol "Transistor_FET:AON6411"
			(pin_names hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "Q"
				(at 5.08 1.905 0)
			)
			(property "Value" "AON6411"
				(at 5.08 0 0)
			)
			(property "Footprint" "Package_DFN_QFN:AO_DFN-8-1EP_5.55x5.2mm_P1.27mm_EP4.12x4.6mm"
				(at 5.08 -1.905 0)
			)
			(property "Datasheet" "http://www.aosmd.com/res/data_sheets/AON6411.pdf"
				(at 0 0 90)
			)
			(property "Description" "P-Channel MOSFET, -85A Id, -20V Vds, DFN-8"
				(at 0 0 0)
			)
			(property "ki_keywords" "P-Channel MOSFET"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "AO*DFN*8*1EP*5.55x5.2mm*P1.27mm*EP4.12x4.6mm*"
				(at 0 0 0)
			)
			(symbol "AON6411_0_1"
				(polyline
					(pts
						(xy 0.254 0) (xy -2.54 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.254 1.905) (xy 0.254 -1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 -1.27) (xy 0.762 -2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 0.508) (xy 0.762 -0.508)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 2.286) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 2.54) (xy 2.54 1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 -2.54) (xy 2.54 0) (xy 0.762 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 1.778) (xy 3.302 1.778) (xy 3.302 -1.778) (xy 0.762 -1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.286 0) (xy 1.27 0.381) (xy 1.27 -0.381) (xy 2.286 0)
					)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy 2.794 -0.508) (xy 2.921 -0.381) (xy 3.683 -0.381) (xy 3.81 -0.254)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 3.302 -0.381) (xy 2.921 0.254) (xy 3.683 0.254) (xy 3.302 -0.381)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 1.651 0)
					(radius 2.794)
					(fill
						(type none)
					)
				)
				(circle
					(center 2.54 -1.778)
					(radius 0.254)
					(fill
						(type outline)
					)
				)
				(circle
					(center 2.54 1.778)
					(radius 0.254)
					(fill
						(type outline)
					)
				)
			)
			(symbol "AON6411_1_1"
				(pin passive line
					(at 2.54 -5.08 90)
					(length 2.54)
					(name "S")
					(number "1")
				)
				(pin passive line
					(at 2.54 -5.08 90)
					(length 2.54) hide
					(name "S")
					(number "2")
				)
				(pin passive line
					(at 2.54 -5.08 90)
					(length 2.54) hide
					(name "S")
					(number "3")
				)
				(pin input line
					(at -5.08 0 0)
					(length 2.54)
					(name "G")
					(number "4")
				)
				(pin passive line
					(at 2.54 5.08 270)
					(length 2.54)
					(name "D")
					(number "5")
				)
			)
		)
		(symbol "Transistor_FET:BSS138"
			(pin_names hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "Q"
				(at 5.08 1.905 0)
			)
			(property "Value" "BSS138"
				(at 5.08 0 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:SOT-23"
				(at 5.08 -1.905 0)
			)
			(property "Datasheet" "https://www.onsemi.com/pub/Collateral/BSS138-D.PDF"
				(at 0 0 0)
			)
			(property "Description" "50V Vds, 0.22A Id, N-Channel MOSFET, SOT-23"
				(at 0 0 0)
			)
			(property "ki_keywords" "N-Channel MOSFET"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOT?23*"
				(at 0 0 0)
			)
			(symbol "BSS138_0_1"
				(polyline
					(pts
						(xy 0.254 0) (xy -2.54 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.254 1.905) (xy 0.254 -1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 -1.27) (xy 0.762 -2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 0.508) (xy 0.762 -0.508)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 2.286) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 2.54) (xy 2.54 1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 -2.54) (xy 2.54 0) (xy 0.762 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 -1.778) (xy 3.302 -1.778) (xy 3.302 1.778) (xy 0.762 1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.016 0) (xy 2.032 0.381) (xy 2.032 -0.381) (xy 1.016 0)
					)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy 2.794 0.508) (xy 2.921 0.381) (xy 3.683 0.381) (xy 3.81 0.254)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 3.302 0.381) (xy 2.921 -0.254) (xy 3.683 -0.254) (xy 3.302 0.381)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 1.651 0)
					(radius 2.794)
					(fill
						(type none)
					)
				)
				(circle
					(center 2.54 -1.778)
					(radius 0.254)
					(fill
						(type outline)
					)
				)
				(circle
					(center 2.54 1.778)
					(radius 0.254)
					(fill
						(type outline)
					)
				)
			)
			(symbol "BSS138_1_1"
				(pin input line
					(at -5.08 0 0)
					(length 2.54)
					(name "G")
					(number "1")
				)
				(pin passive line
					(at 2.54 -5.08 90)
					(length 2.54)
					(name "S")
					(number "2")
				)
				(pin passive line
					(at 2.54 5.08 270)
					(length 2.54)
					(name "D")
					(number "3")
				)
			)
		)
		(symbol "mylib7:+5V_PWR"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR020"
				(at 0 -3.81 0)
			)
			(property "Value" "+5V_PWR"
				(at 0 4.445 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+1V2\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+5V_PWR_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+5V_PWR_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+5V_PWR")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+5V_PWR_EXT"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR021"
				(at 0 -3.81 0)
			)
			(property "Value" "+5V_PWR_EXT"
				(at 0 4.445 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+1V2\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+5V_PWR_EXT_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+5V_PWR_EXT_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+5V_PWR_EXT")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+6.5V"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR034"
				(at 0 -3.81 0)
			)
			(property "Value" "+6.5V"
				(at 0 4.445 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+6.5V_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+6.5V_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+5V")
					(number "1")
				)
			)
		)
		(symbol "pferdibank-rescue:AP3211-mylib"
			(pin_names
				(offset 1.016)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -5.08 11.43 0)
			)
			(property "Value" "mylib_AP3211"
				(at 0 -15.24 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:SOT-23-6"
				(at -5.08 5.08 0)
			)
			(property "Datasheet" ""
				(at -5.08 5.08 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "AP3211-mylib_0_1"
				(rectangle
					(start -6.35 10.16)
					(end 5.08 -12.7)
					(fill
						(type none)
					)
				)
			)
			(symbol "AP3211-mylib_1_1"
				(pin passive line
					(at 7.62 7.62 180)
					(length 2.54)
					(name "BS")
					(number "1")
				)
				(pin power_in line
					(at -8.89 -10.16 0)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin input line
					(at 7.62 -10.16 180)
					(length 2.54)
					(name "FB")
					(number "3")
				)
				(pin input line
					(at -8.89 0 0)
					(length 2.54)
					(name "EN")
					(number "4")
				)
				(pin input line
					(at -8.89 7.62 0)
					(length 2.54)
					(name "IN")
					(number "5")
				)
				(pin power_out line
					(at 7.62 0 180)
					(length 2.54)
					(name "SW")
					(number "6")
				)
			)
		)
		(symbol "power:+12V"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
			)
			(property "Value" "+12V"
				(at 0 3.556 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+12V\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+12V_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+12V_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+12V")
					(number "1")
				)
			)
		)
		(symbol "power:+3V3"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
			)
			(property "Value" "+3V3"
				(at 0 3.556 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+3V3\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+3V3_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+3V3_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+3V3")
					(number "1")
				)
			)
		)
		(symbol "power:+5V"
			(power)
			(pin_numbers hide)
			(pin_names
				(offset 0) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
			)
			(property "Value" "+5V"
				(at 0 3.556 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+5V\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+5V_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+5V_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0)
					(name "~")
					(number "1")
				)
			)
		)
		(symbol "power:GND"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -6.35 0)
			)
			(property "Value" "GND"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND")
					(number "1")
				)
			)
		)
		(symbol "power:PWR_FLAG"
			(power)
			(pin_numbers hide)
			(pin_names
				(offset 0) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#FLG"
				(at 0 1.905 0)
			)
			(property "Value" "PWR_FLAG"
				(at 0 3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Special symbol for telling ERC where power comes from"
				(at 0 0 0)
			)
			(property "ki_keywords" "flag power"
				(at 0 0 0)
			)
			(symbol "PWR_FLAG_0_0"
				(pin power_out line
					(at 0 0 90)
					(length 0)
					(name "pwr")
					(number "1")
				)
			)
			(symbol "PWR_FLAG_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 1.27) (xy -1.016 1.905) (xy 0 2.54) (xy 1.016 1.905) (xy 0 1.27)
					)
					(fill
						(type none)
					)
				)
			)
		)
	)
	(junction
		(at 113.03 161.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 44.45 153.67)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 134.62 161.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 175.26 99.06)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 151.13 107.95)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 64.77 161.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 77.47 171.45)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 218.44 146.05)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 184.15 81.28)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 104.14 161.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 161.29 91.44)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 33.02 153.67)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 123.19 113.03)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 184.15 104.14)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 77.47 161.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 161.29 81.28)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 200.66 104.14)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 115.57 118.11)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 161.29 93.98)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 165.1 99.06)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 240.03 146.05)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 99.06 161.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 123.19 180.34)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 168.91 81.28)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 90.17 161.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 134.62 180.34)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 218.44 148.59)
		(diameter 0)
		(color 0 0 0 0)
	)
	(wire
		(pts
			(xy 104.14 92.71) (xy 151.13 92.71)
		)
	)
	(wire
		(pts
			(xy 77.47 161.29) (xy 74.93 161.29)
		)
	)
	(wire
		(pts
			(xy 184.15 96.52) (xy 184.15 104.14)
		)
	)
	(wire
		(pts
			(xy 77.47 171.45) (xy 77.47 170.18)
		)
	)
	(wire
		(pts
			(xy 200.66 96.52) (xy 200.66 104.14)
		)
	)
	(wire
		(pts
			(xy 134.62 161.29) (xy 134.62 167.64)
		)
	)
	(wire
		(pts
			(xy 115.57 118.11) (xy 124.46 118.11)
		)
	)
	(wire
		(pts
			(xy 184.15 81.28) (xy 200.66 81.28)
		)
	)
	(wire
		(pts
			(xy 33.02 165.1) (xy 33.02 153.67)
		)
	)
	(wire
		(pts
			(xy 240.03 146.05) (xy 240.03 151.13)
		)
	)
	(wire
		(pts
			(xy 123.19 180.34) (xy 123.19 181.61)
		)
	)
	(wire
		(pts
			(xy 161.29 113.03) (xy 161.29 127)
		)
	)
	(wire
		(pts
			(xy 161.29 90.17) (xy 161.29 91.44)
		)
	)
	(wire
		(pts
			(xy 175.26 91.44) (xy 175.26 99.06)
		)
	)
	(wire
		(pts
			(xy 158.75 93.98) (xy 158.75 95.25)
		)
	)
	(wire
		(pts
			(xy 240.03 146.05) (xy 243.84 146.05)
		)
	)
	(wire
		(pts
			(xy 134.62 157.48) (xy 134.62 161.29)
		)
	)
	(wire
		(pts
			(xy 228.6 156.21) (xy 228.6 161.29)
		)
	)
	(wire
		(pts
			(xy 162.56 93.98) (xy 161.29 93.98)
		)
	)
	(wire
		(pts
			(xy 161.29 81.28) (xy 161.29 82.55)
		)
	)
	(wire
		(pts
			(xy 236.22 146.05) (xy 240.03 146.05)
		)
	)
	(wire
		(pts
			(xy 113.03 180.34) (xy 123.19 180.34)
		)
	)
	(wire
		(pts
			(xy 44.45 153.67) (xy 45.72 153.67)
		)
	)
	(wire
		(pts
			(xy 165.1 99.06) (xy 165.1 110.49)
		)
	)
	(wire
		(pts
			(xy 165.1 118.11) (xy 165.1 127)
		)
	)
	(wire
		(pts
			(xy 99.06 161.29) (xy 97.79 161.29)
		)
	)
	(wire
		(pts
			(xy 64.77 161.29) (xy 67.31 161.29)
		)
	)
	(wire
		(pts
			(xy 168.91 81.28) (xy 168.91 86.36)
		)
	)
	(wire
		(pts
			(xy 77.47 172.72) (xy 77.47 171.45)
		)
	)
	(wire
		(pts
			(xy 33.02 151.13) (xy 33.02 153.67)
		)
	)
	(wire
		(pts
			(xy 115.57 109.22) (xy 115.57 118.11)
		)
	)
	(wire
		(pts
			(xy 176.53 91.44) (xy 175.26 91.44)
		)
	)
	(wire
		(pts
			(xy 130.81 161.29) (xy 134.62 161.29)
		)
	)
	(wire
		(pts
			(xy 158.75 102.87) (xy 161.29 102.87)
		)
	)
	(wire
		(pts
			(xy 104.14 160.02) (xy 104.14 161.29)
		)
	)
	(wire
		(pts
			(xy 134.62 180.34) (xy 134.62 175.26)
		)
	)
	(wire
		(pts
			(xy 168.91 104.14) (xy 184.15 104.14)
		)
	)
	(wire
		(pts
			(xy 218.44 148.59) (xy 220.98 148.59)
		)
	)
	(wire
		(pts
			(xy 115.57 118.11) (xy 115.57 119.38)
		)
	)
	(wire
		(pts
			(xy 165.1 99.06) (xy 175.26 99.06)
		)
	)
	(wire
		(pts
			(xy 77.47 181.61) (xy 77.47 180.34)
		)
	)
	(wire
		(pts
			(xy 104.14 118.11) (xy 115.57 118.11)
		)
	)
	(wire
		(pts
			(xy 113.03 167.64) (xy 113.03 161.29)
		)
	)
	(wire
		(pts
			(xy 115.57 100.33) (xy 115.57 101.6)
		)
	)
	(wire
		(pts
			(xy 162.56 99.06) (xy 162.56 93.98)
		)
	)
	(wire
		(pts
			(xy 77.47 160.02) (xy 77.47 161.29)
		)
	)
	(wire
		(pts
			(xy 218.44 148.59) (xy 218.44 151.13)
		)
	)
	(wire
		(pts
			(xy 33.02 181.61) (xy 33.02 172.72)
		)
	)
	(wire
		(pts
			(xy 44.45 161.29) (xy 45.72 161.29)
		)
	)
	(wire
		(pts
			(xy 200.66 81.28) (xy 200.66 86.36)
		)
	)
	(wire
		(pts
			(xy 90.17 167.64) (xy 90.17 161.29)
		)
	)
	(wire
		(pts
			(xy 99.06 157.48) (xy 99.06 161.29)
		)
	)
	(wire
		(pts
			(xy 64.77 161.29) (xy 64.77 160.02)
		)
	)
	(wire
		(pts
			(xy 44.45 171.45) (xy 45.72 171.45)
		)
	)
	(wire
		(pts
			(xy 104.14 113.03) (xy 123.19 113.03)
		)
	)
	(wire
		(pts
			(xy 151.13 92.71) (xy 151.13 107.95)
		)
	)
	(wire
		(pts
			(xy 193.04 91.44) (xy 191.77 91.44)
		)
	)
	(wire
		(pts
			(xy 184.15 104.14) (xy 200.66 104.14)
		)
	)
	(wire
		(pts
			(xy 218.44 146.05) (xy 218.44 148.59)
		)
	)
	(wire
		(pts
			(xy 200.66 104.14) (xy 203.2 104.14)
		)
	)
	(wire
		(pts
			(xy 184.15 81.28) (xy 168.91 81.28)
		)
	)
	(wire
		(pts
			(xy 44.45 181.61) (xy 44.45 171.45)
		)
	)
	(wire
		(pts
			(xy 33.02 153.67) (xy 44.45 153.67)
		)
	)
	(wire
		(pts
			(xy 161.29 81.28) (xy 152.4 81.28)
		)
	)
	(wire
		(pts
			(xy 62.23 171.45) (xy 77.47 171.45)
		)
	)
	(wire
		(pts
			(xy 191.77 91.44) (xy 191.77 99.06)
		)
	)
	(wire
		(pts
			(xy 62.23 161.29) (xy 64.77 161.29)
		)
	)
	(wire
		(pts
			(xy 77.47 162.56) (xy 77.47 161.29)
		)
	)
	(wire
		(pts
			(xy 218.44 158.75) (xy 218.44 161.29)
		)
	)
	(wire
		(pts
			(xy 113.03 161.29) (xy 115.57 161.29)
		)
	)
	(wire
		(pts
			(xy 240.03 143.51) (xy 240.03 146.05)
		)
	)
	(wire
		(pts
			(xy 64.77 181.61) (xy 64.77 180.34)
		)
	)
	(wire
		(pts
			(xy 123.19 180.34) (xy 134.62 180.34)
		)
	)
	(wire
		(pts
			(xy 240.03 158.75) (xy 240.03 161.29)
		)
	)
	(wire
		(pts
			(xy 64.77 153.67) (xy 64.77 154.94)
		)
	)
	(wire
		(pts
			(xy 168.91 96.52) (xy 168.91 104.14)
		)
	)
	(wire
		(pts
			(xy 134.62 161.29) (xy 140.97 161.29)
		)
	)
	(wire
		(pts
			(xy 113.03 180.34) (xy 113.03 175.26)
		)
	)
	(wire
		(pts
			(xy 62.23 153.67) (xy 64.77 153.67)
		)
	)
	(wire
		(pts
			(xy 104.14 161.29) (xy 113.03 161.29)
		)
	)
	(wire
		(pts
			(xy 151.13 107.95) (xy 153.67 107.95)
		)
	)
	(wire
		(pts
			(xy 44.45 153.67) (xy 44.45 161.29)
		)
	)
	(wire
		(pts
			(xy 36.83 25.4) (xy 40.64 25.4)
		)
	)
	(wire
		(pts
			(xy 90.17 161.29) (xy 77.47 161.29)
		)
	)
	(wire
		(pts
			(xy 165.1 99.06) (xy 162.56 99.06)
		)
	)
	(wire
		(pts
			(xy 123.19 113.03) (xy 123.19 119.38)
		)
	)
	(wire
		(pts
			(xy 175.26 99.06) (xy 191.77 99.06)
		)
	)
	(wire
		(pts
			(xy 137.16 127) (xy 137.16 125.73)
		)
	)
	(wire
		(pts
			(xy 123.19 113.03) (xy 124.46 113.03)
		)
	)
	(wire
		(pts
			(xy 220.98 146.05) (xy 218.44 146.05)
		)
	)
	(wire
		(pts
			(xy 99.06 161.29) (xy 104.14 161.29)
		)
	)
	(wire
		(pts
			(xy 158.75 93.98) (xy 161.29 93.98)
		)
	)
	(wire
		(pts
			(xy 123.19 100.33) (xy 123.19 107.95)
		)
	)
	(wire
		(pts
			(xy 36.83 27.94) (xy 40.64 27.94)
		)
	)
	(wire
		(pts
			(xy 123.19 168.91) (xy 123.19 180.34)
		)
	)
	(wire
		(pts
			(xy 161.29 91.44) (xy 161.29 93.98)
		)
	)
	(wire
		(pts
			(xy 218.44 143.51) (xy 218.44 146.05)
		)
	)
	(wire
		(pts
			(xy 123.19 107.95) (xy 124.46 107.95)
		)
	)
	(wire
		(pts
			(xy 184.15 81.28) (xy 184.15 86.36)
		)
	)
	(wire
		(pts
			(xy 149.86 107.95) (xy 151.13 107.95)
		)
	)
	(wire
		(pts
			(xy 90.17 181.61) (xy 90.17 175.26)
		)
	)
	(wire
		(pts
			(xy 168.91 81.28) (xy 161.29 81.28)
		)
	)
	(wire
		(pts
			(xy 64.77 172.72) (xy 64.77 161.29)
		)
	)
	(hierarchical_label "+6.5V"
		(shape output)
		(at 104.14 160.02 90)
		(fields_autoplaced yes)
	)
	(hierarchical_label "Q"
		(shape output)
		(at 104.14 92.71 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "+5V_PWR_EXT"
		(shape input)
		(at 36.83 25.4 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "+12V"
		(shape input)
		(at 33.02 153.67 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "+5V_PWR"
		(shape output)
		(at 36.83 27.94 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "PWR_EN"
		(shape input)
		(at 104.14 113.03 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "SHUTDOWN"
		(shape input)
		(at 104.14 118.11 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "+3V3"
		(shape output)
		(at 140.97 161.29 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "+5V"
		(shape output)
		(at 243.84 146.05 0)
		(fields_autoplaced yes)
	)
	(symbol
		(lib_id "power:GND")
		(at 137.16 127 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR026"
			(at 137.16 133.35 0)
		)
		(property "Value" "GND"
			(at 137.16 132.715 0)
		)
		(property "Footprint" ""
			(at 137.16 127 0)
		)
		(property "Datasheet" ""
			(at 137.16 127 0)
		)
		(property "Description" ""
			(at 137.16 127 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR026")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 90.17 181.61 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR044"
			(at 90.17 187.96 0)
		)
		(property "Value" "GND"
			(at 90.297 186.0042 0)
		)
		(property "Footprint" ""
			(at 90.17 181.61 0)
		)
		(property "Datasheet" ""
			(at 90.17 181.61 0)
		)
		(property "Description" ""
			(at 90.17 181.61 0)
		)
		(pin "1")
		(instances
			(project "pferdibank"
				(path
					(reference "#PWR044")
					(unit 1)
				)
			)
			(project "power"
				(path
					(reference "#PWR032")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR032")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+6.5V")
		(at 99.06 157.48 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR034"
			(at 99.06 161.29 0)
		)
		(property "Value" "+6.5V"
			(at 99.06 152.146 90)
		)
		(property "Footprint" ""
			(at 99.06 157.48 0)
		)
		(property "Datasheet" ""
			(at 99.06 157.48 0)
		)
		(property "Description" ""
			(at 99.06 157.48 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR034")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 161.29 127 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR031"
			(at 161.29 133.35 0)
		)
		(property "Value" "GND"
			(at 161.29 132.715 0)
		)
		(property "Footprint" ""
			(at 161.29 127 0)
		)
		(property "Datasheet" ""
			(at 161.29 127 0)
		)
		(property "Description" ""
			(at 161.29 127 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR031")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 240.03 154.94 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C218"
			(at 241.3 153.035 0)
		)
		(property "Value" "1µ"
			(at 241.935 158.75 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 240.03 154.94 0)
		)
		(property "Datasheet" ""
			(at 240.03 154.94 0)
		)
		(property "Description" ""
			(at 240.03 154.94 0)
		)
		(property "DK" ""
			(at 240.03 154.94 0)
		)
		(property "PARTNO" ""
			(at 240.03 154.94 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 240.03 154.94 0)
		)
		(property "Distributor" "D"
			(at 240.03 154.94 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 240.03 154.94 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "C218")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:D_Schottky")
		(at 64.77 176.53 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "D9"
			(at 59.2836 176.53 0)
		)
		(property "Value" "PMEG4030EP,115"
			(at 68.58 180.34 0)
		)
		(property "Footprint" "Diode_SMD:D_SOD-128"
			(at 64.77 176.53 0)
		)
		(property "Datasheet" "~"
			(at 64.77 176.53 0)
		)
		(property "Description" ""
			(at 64.77 176.53 0)
		)
		(property "Distributor" "D"
			(at 64.77 176.53 0)
		)
		(property "Manufacturer" "PMEG4030EP,115"
			(at 64.77 176.53 0)
		)
		(property "OrderNr" "1727-5841-1-ND"
			(at 64.77 176.53 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pferdibank"
				(path
					(reference "D9")
					(unit 1)
				)
			)
			(project "power"
				(path
					(reference "D1")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "D3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 123.19 181.61 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR034"
			(at 123.19 187.96 0)
		)
		(property "Value" "GND"
			(at 123.317 186.0042 0)
		)
		(property "Footprint" ""
			(at 123.19 181.61 0)
		)
		(property "Datasheet" ""
			(at 123.19 181.61 0)
		)
		(property "Description" ""
			(at 123.19 181.61 0)
		)
		(pin "1")
		(instances
			(project "pferdibank"
				(path
					(reference "#PWR034")
					(unit 1)
				)
			)
			(project "power"
				(path
					(reference "#PWR034")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR035")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 115.57 123.19 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C2"
			(at 112.395 121.92 0)
		)
		(property "Value" "100n"
			(at 112.395 124.46 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 114.6048 127 0)
		)
		(property "Datasheet" "~"
			(at 115.57 123.19 0)
		)
		(property "Description" ""
			(at 115.57 123.19 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 115.57 123.19 0)
		)
		(property "Distributor" "D"
			(at 115.57 123.19 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 115.57 123.19 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "C2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 134.62 157.48 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR035"
			(at 134.62 161.29 0)
		)
		(property "Value" "+3V3"
			(at 134.62 153.035 0)
		)
		(property "Footprint" ""
			(at 134.62 157.48 0)
		)
		(property "Datasheet" ""
			(at 134.62 157.48 0)
		)
		(property "Description" ""
			(at 134.62 157.48 0)
		)
		(pin "1")
		(instances
			(project "power"
				(path
					(reference "#PWR035")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR037")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 149.86 123.19 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C4"
			(at 153.035 121.92 0)
		)
		(property "Value" "100n"
			(at 153.035 124.46 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 150.8252 127 0)
		)
		(property "Datasheet" "~"
			(at 149.86 123.19 0)
		)
		(property "Description" ""
			(at 149.86 123.19 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 149.86 123.19 0)
		)
		(property "Distributor" "D"
			(at 149.86 123.19 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 149.86 123.19 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "C4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 123.19 127 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR023"
			(at 123.19 133.35 0)
		)
		(property "Value" "GND"
			(at 123.19 132.715 0)
		)
		(property "Footprint" ""
			(at 123.19 127 0)
		)
		(property "Datasheet" ""
			(at 123.19 127 0)
		)
		(property "Description" ""
			(at 123.19 127 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR023")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 161.29 86.36 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R5"
			(at 158.75 86.995 90)
		)
		(property "Value" "10k"
			(at 161.29 86.36 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 163.068 86.36 90)
		)
		(property "Datasheet" "~"
			(at 161.29 86.36 0)
		)
		(property "Description" ""
			(at 161.29 86.36 0)
		)
		(property "Manufacturer" "ERJ-H3EF1002V"
			(at 161.29 86.36 0)
		)
		(property "Distributor" "D"
			(at 161.29 86.36 0)
		)
		(property "OrderNr" "10-ERJ-H3EF1002VCT-ND"
			(at 161.29 86.36 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "R5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Regulator_Linear:NCP718xSN500")
		(at 228.6 148.59 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U113"
			(at 228.6 138.43 0)
		)
		(property "Value" "NCP718xSN500"
			(at 228.6 140.97 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5"
			(at 228.6 139.7 0)
		)
		(property "Datasheet" "https://www.onsemi.com/pub/Collateral/NCP718-D.PDF"
			(at 228.6 135.89 0)
		)
		(property "Description" "300-mA, Wide Input Voltage, Low-IQ LDO, 5.0V, SOT-23"
			(at 228.6 148.59 0)
		)
		(property "Distributor" "D"
			(at 228.6 148.59 0)
		)
		(property "Manufacturer" "NCP718BSN500T1G"
			(at 228.6 148.59 0)
		)
		(property "OrderNr" "NCP718BSN500T1GOSCT-ND"
			(at 228.6 148.59 0)
		)
		(pin "3")
		(pin "1")
		(pin "5")
		(pin "2")
		(pin "4")
		(instances
			(project "8]axe"
				(path
					(reference "U113")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 123.19 100.33 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR022"
			(at 123.19 104.14 0)
		)
		(property "Value" "+3V3"
			(at 123.19 97.155 0)
		)
		(property "Footprint" ""
			(at 123.19 100.33 0)
		)
		(property "Datasheet" ""
			(at 123.19 100.33 0)
		)
		(property "Description" ""
			(at 123.19 100.33 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR022")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+5V")
		(at 240.03 143.51 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0445"
			(at 240.03 147.32 0)
		)
		(property "Value" "+5V"
			(at 240.03 138.43 0)
		)
		(property "Footprint" ""
			(at 240.03 143.51 0)
		)
		(property "Datasheet" ""
			(at 240.03 143.51 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+5V\""
			(at 240.03 143.51 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0445")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Transistor_FET:AON6411")
		(at 198.12 91.44 0)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "Q5"
			(at 194.945 88.265 0)
		)
		(property "Value" "TPH1R712MD,L1Q"
			(at 203.835 82.55 90)
		)
		(property "Footprint" "Package_TO_SOT_SMD:LFPAK56"
			(at 203.2 89.535 0)
		)
		(property "Datasheet" "http://www.aosmd.com/res/data_sheets/AON6411.pdf"
			(at 198.12 91.44 90)
		)
		(property "Description" ""
			(at 198.12 91.44 0)
		)
		(property "Distributor" "D"
			(at 198.12 91.44 0)
		)
		(property "Manufacturer" "TPH1R712MD,L1Q"
			(at 198.12 91.44 0)
		)
		(property "OrderNr" "TPH1R712MDL1QCT-ND"
			(at 198.12 91.44 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(instances
			(project "8]axe"
				(path
					(reference "Q5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 115.57 105.41 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R1"
			(at 113.03 105.41 90)
		)
		(property "Value" "10k"
			(at 118.11 105.41 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 117.348 105.41 90)
		)
		(property "Datasheet" "~"
			(at 115.57 105.41 0)
		)
		(property "Description" ""
			(at 115.57 105.41 0)
		)
		(property "Manufacturer" "ERJ-H3EF1002V"
			(at 115.57 105.41 0)
		)
		(property "Distributor" "D"
			(at 115.57 105.41 0)
		)
		(property "OrderNr" "10-ERJ-H3EF1002VCT-ND"
			(at 115.57 105.41 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "R1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 64.77 157.48 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C15"
			(at 67.31 154.94 0)
		)
		(property "Value" "10n/250V"
			(at 67.31 152.4 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 64.77 157.48 0)
		)
		(property "Datasheet" "~"
			(at 64.77 157.48 0)
		)
		(property "Description" ""
			(at 64.77 157.48 0)
		)
		(property "Distributor" "D"
			(at 64.77 157.48 0)
		)
		(property "Manufacturer" "C2012X5R2E103M125AA"
			(at 64.77 157.48 0)
		)
		(property "OrderNr" "445-14446-1-ND"
			(at 64.77 157.48 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pferdibank"
				(path
					(reference "C15")
					(unit 1)
				)
			)
			(project "power"
				(path
					(reference "C17")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 228.6 161.29 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR0402"
			(at 228.6 167.64 0)
		)
		(property "Value" "GND"
			(at 228.727 165.6842 0)
		)
		(property "Footprint" ""
			(at 228.6 161.29 0)
		)
		(property "Datasheet" ""
			(at 228.6 161.29 0)
		)
		(property "Description" ""
			(at 228.6 161.29 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0402")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Jumper:SolderJumper_2_Open")
		(at 158.75 99.06 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "JP4"
			(at 153.416 99.06 90)
		)
		(property "Value" "SolderJumper_2_Open"
			(at 161.29 100.33 90)
		)
		(property "Footprint" "Jumper:SolderJumper-2_P1.3mm_Open_RoundedPad1.0x1.5mm"
			(at 158.75 99.06 0)
		)
		(property "Datasheet" "~"
			(at 158.75 99.06 0)
		)
		(property "Description" ""
			(at 158.75 99.06 0)
		)
		(property "Distributor" "-"
			(at 158.75 99.06 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "JP4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 64.77 181.61 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR034"
			(at 64.77 187.96 0)
		)
		(property "Value" "GND"
			(at 64.897 186.0042 0)
		)
		(property "Footprint" ""
			(at 64.77 181.61 0)
		)
		(property "Datasheet" ""
			(at 64.77 181.61 0)
		)
		(property "Description" ""
			(at 64.77 181.61 0)
		)
		(pin "1")
		(instances
			(project "pferdibank"
				(path
					(reference "#PWR034")
					(unit 1)
				)
			)
			(project "power"
				(path
					(reference "#PWR030")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR024")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 77.47 181.61 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR038"
			(at 77.47 187.96 0)
		)
		(property "Value" "GND"
			(at 77.597 186.0042 0)
		)
		(property "Footprint" ""
			(at 77.47 181.61 0)
		)
		(property "Datasheet" ""
			(at 77.47 181.61 0)
		)
		(property "Description" ""
			(at 77.47 181.61 0)
		)
		(pin "1")
		(instances
			(project "pferdibank"
				(path
					(reference "#PWR038")
					(unit 1)
				)
			)
			(project "power"
				(path
					(reference "#PWR031")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR027")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 218.44 161.29 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR0431"
			(at 218.44 167.64 0)
		)
		(property "Value" "GND"
			(at 218.567 165.6842 0)
		)
		(property "Footprint" ""
			(at 218.44 161.29 0)
		)
		(property "Datasheet" ""
			(at 218.44 161.29 0)
		)
		(property "Description" ""
			(at 218.44 161.29 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0431")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "pferdibank-rescue:AP3211-mylib")
		(at 54.61 161.29 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U3"
			(at 53.975 146.939 0)
		)
		(property "Value" "AP3211"
			(at 53.975 149.2504 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23-6"
			(at 49.53 156.21 0)
		)
		(property "Datasheet" ""
			(at 49.53 156.21 0)
		)
		(property "Description" ""
			(at 54.61 161.29 0)
		)
		(property "Distributor" "D"
			(at 54.61 161.29 0)
		)
		(property "Manufacturer" "AP3211KTR-G1"
			(at 54.61 161.29 0)
		)
		(property "OrderNr" "AP3211KTR-G1DICT-ND"
			(at 54.61 161.29 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(instances
			(project "pferdibank"
				(path
					(reference "U3")
					(unit 1)
				)
			)
			(project "power"
				(path
					(reference "U1")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "74xGxx:74LVC1G175")
		(at 137.16 113.03 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U2"
			(at 140.335 102.235 0)
		)
		(property "Value" "74LVC1G175"
			(at 144.145 104.14 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23-6"
			(at 137.16 113.03 0)
		)
		(property "Datasheet" "http://www.ti.com/lit/sg/scyt129e/scyt129e.pdf"
			(at 137.16 113.03 0)
		)
		(property "Description" ""
			(at 137.16 113.03 0)
		)
		(property "Distributor" "D"
			(at 137.16 113.03 0)
		)
		(property "Manufacturer" "SN74LVC1G175DBVR"
			(at 137.16 113.03 0)
		)
		(property "OrderNr" "296-17617-1-ND"
			(at 137.16 113.03 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(instances
			(project "8]axe"
				(path
					(reference "U2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 77.47 160.02 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP2"
			(at 78.9432 157.0228 0)
		)
		(property "Value" "3V3"
			(at 78.9432 159.3342 0)
		)
		(property "Footprint" "TestPoint:TestPoint_Pad_2.0x2.0mm"
			(at 82.55 160.02 0)
		)
		(property "Datasheet" "~"
			(at 82.55 160.02 0)
		)
		(property "Description" ""
			(at 77.47 160.02 0)
		)
		(property "Distributor" "-"
			(at 77.47 160.02 0)
		)
		(pin "1")
		(instances
			(project "pferdibank"
				(path
					(reference "TP2")
					(unit 1)
				)
			)
			(project "power"
				(path
					(reference "TP1")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "TP1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Transistor_FET:AON6411")
		(at 181.61 91.44 0)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "Q3"
			(at 178.435 88.265 0)
		)
		(property "Value" "TPH1R712MD,L1Q"
			(at 187.325 82.55 90)
		)
		(property "Footprint" "Package_TO_SOT_SMD:LFPAK56"
			(at 186.69 89.535 0)
		)
		(property "Datasheet" "http://www.aosmd.com/res/data_sheets/AON6411.pdf"
			(at 181.61 91.44 90)
		)
		(property "Description" ""
			(at 181.61 91.44 0)
		)
		(property "Distributor" "D"
			(at 181.61 91.44 0)
		)
		(property "Manufacturer" "TPH1R712MD,L1Q"
			(at 181.61 91.44 0)
		)
		(property "OrderNr" "TPH1R712MDL1QCT-ND"
			(at 181.61 91.44 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(instances
			(project "8]axe"
				(path
					(reference "Q3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Jumper:SolderJumper_2_Open")
		(at 165.1 114.3 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "JP2"
			(at 167.64 114.3 90)
		)
		(property "Value" "SolderJumper_2_Open"
			(at 167.64 115.57 90)
		)
		(property "Footprint" "Jumper:SolderJumper-2_P1.3mm_Open_RoundedPad1.0x1.5mm"
			(at 165.1 114.3 0)
		)
		(property "Datasheet" "~"
			(at 165.1 114.3 0)
		)
		(property "Description" ""
			(at 165.1 114.3 0)
		)
		(property "Distributor" "-"
			(at 165.1 114.3 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "JP2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 134.62 171.45 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C24"
			(at 137.541 170.2816 0)
		)
		(property "Value" "22µ/16V"
			(at 137.541 172.593 0)
		)
		(property "Footprint" "Capacitor_SMD:C_1206_3216Metric"
			(at 135.5852 175.26 0)
		)
		(property "Datasheet" "~"
			(at 134.62 171.45 0)
		)
		(property "Description" ""
			(at 134.62 171.45 0)
		)
		(property "Distributor" "D"
			(at 134.62 171.45 0)
		)
		(property "Manufacturer" "CL31A226MOCLNNC"
			(at 134.62 171.45 0)
		)
		(property "OrderNr" "1276-2728-1-ND"
			(at 134.62 171.45 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pferdibank"
				(path
					(reference "C24")
					(unit 1)
				)
			)
			(project "power"
				(path
					(reference "C21")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:L")
		(at 71.12 161.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "L1"
			(at 69.85 165.1 90)
		)
		(property "Value" "4.7µH/2A/3A"
			(at 71.12 162.56 90)
		)
		(property "Footprint" "Inductor_SMD:L_Taiyo-Yuden_NR-50xx"
			(at 71.12 161.29 0)
		)
		(property "Datasheet" "~"
			(at 71.12 161.29 0)
		)
		(property "Description" ""
			(at 71.12 161.29 0)
		)
		(property "Distributor" "D"
			(at 71.12 161.29 0)
		)
		(property "Manufacturer" "LQH5BPN4R7NT0L"
			(at 71.12 161.29 0)
		)
		(property "OrderNr" "490-7779-1-ND"
			(at 71.12 161.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pferdibank"
				(path
					(reference "L1")
					(unit 1)
				)
			)
			(project "power"
				(path
					(reference "L1")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "L1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 113.03 171.45 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C9"
			(at 112.395 168.91 0)
		)
		(property "Value" "10µ/50V"
			(at 116.84 173.99 0)
		)
		(property "Footprint" "Capacitor_SMD:C_1206_3216Metric"
			(at 112.0648 175.26 0)
		)
		(property "Datasheet" "~"
			(at 113.03 171.45 0)
		)
		(property "Description" ""
			(at 113.03 171.45 0)
		)
		(property "Distributor" "D"
			(at 113.03 171.45 0)
		)
		(property "Manufacturer" "CL31A106MBHNNNE"
			(at 113.03 171.45 0)
		)
		(property "OrderNr" "1276-6736-1-ND"
			(at 113.03 171.45 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pferdibank"
				(path
					(reference "C9")
					(unit 1)
				)
			)
			(project "power"
				(path
					(reference "C20")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 90.17 171.45 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C24"
			(at 93.091 170.2816 0)
		)
		(property "Value" "22µ/16V"
			(at 93.091 172.593 0)
		)
		(property "Footprint" "Capacitor_SMD:C_1206_3216Metric"
			(at 91.1352 175.26 0)
		)
		(property "Datasheet" "~"
			(at 90.17 171.45 0)
		)
		(property "Description" ""
			(at 90.17 171.45 0)
		)
		(property "Distributor" "D"
			(at 90.17 171.45 0)
		)
		(property "Manufacturer" "CL31A226MOCLNNC"
			(at 90.17 171.45 0)
		)
		(property "OrderNr" "1276-2728-1-ND"
			(at 90.17 171.45 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pferdibank"
				(path
					(reference "C24")
					(unit 1)
				)
			)
			(project "power"
				(path
					(reference "C19")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Regulator_Linear:AZ1117-3.3")
		(at 123.19 161.29 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U2"
			(at 123.19 154.94 0)
		)
		(property "Value" "1117-3.3"
			(at 123.19 157.48 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-223-3_TabPin2"
			(at 123.19 154.94 0)
		)
		(property "Datasheet" "https://www.diodes.com/assets/Datasheets/AZ1117.pdf"
			(at 123.19 161.29 0)
		)
		(property "Description" ""
			(at 123.19 161.29 0)
		)
		(property "Distributor" "D"
			(at 123.19 161.29 0)
		)
		(property "Manufacturer" "LM1117IMPX-3.3/NOPB"
			(at 123.19 161.29 0)
		)
		(property "OrderNr" "LM1117IMPX-3.3/NOPBCT-ND"
			(at 123.19 161.29 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(instances
			(project "power"
				(path
					(reference "U2")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 165.1 127 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR033"
			(at 165.1 133.35 0)
		)
		(property "Value" "GND"
			(at 165.1 132.715 0)
		)
		(property "Footprint" ""
			(at 165.1 127 0)
		)
		(property "Datasheet" ""
			(at 165.1 127 0)
		)
		(property "Description" ""
			(at 165.1 127 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR033")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 33.02 168.91 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C9"
			(at 35.941 167.7416 0)
		)
		(property "Value" "10µ/50V"
			(at 35.941 170.053 0)
		)
		(property "Footprint" "Capacitor_SMD:C_1206_3216Metric"
			(at 33.9852 172.72 0)
		)
		(property "Datasheet" "~"
			(at 33.02 168.91 0)
		)
		(property "Description" ""
			(at 33.02 168.91 0)
		)
		(property "Distributor" "D"
			(at 33.02 168.91 0)
		)
		(property "Manufacturer" "CL31A106MBHNNNE"
			(at 33.02 168.91 0)
		)
		(property "OrderNr" "1276-6736-1-ND"
			(at 33.02 168.91 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pferdibank"
				(path
					(reference "C9")
					(unit 1)
				)
			)
			(project "power"
				(path
					(reference "C10")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 115.57 100.33 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR020"
			(at 115.57 104.14 0)
		)
		(property "Value" "+3V3"
			(at 115.57 97.155 0)
		)
		(property "Footprint" ""
			(at 115.57 100.33 0)
		)
		(property "Datasheet" ""
			(at 115.57 100.33 0)
		)
		(property "Description" ""
			(at 115.57 100.33 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR020")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+6.5V")
		(at 218.44 143.51 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR0444"
			(at 218.44 147.32 0)
		)
		(property "Value" "+6.5V"
			(at 218.44 138.176 90)
		)
		(property "Footprint" ""
			(at 218.44 143.51 0)
		)
		(property "Datasheet" ""
			(at 218.44 143.51 0)
		)
		(property "Description" ""
			(at 218.44 143.51 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0444")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+5V_PWR_EXT")
		(at 152.4 81.28 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR030"
			(at 156.21 81.28 0)
		)
		(property "Value" "+5V_PWR_EXT"
			(at 149.225 81.28 90)
		)
		(property "Footprint" ""
			(at 152.4 81.28 0)
		)
		(property "Datasheet" ""
			(at 152.4 81.28 0)
		)
		(property "Description" ""
			(at 152.4 81.28 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR030")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Transistor_FET:BSS138")
		(at 158.75 107.95 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "Q1"
			(at 154.94 106.045 0)
		)
		(property "Value" "BSS138"
			(at 152.4 111.125 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23"
			(at 163.83 109.855 0)
		)
		(property "Datasheet" "https://www.onsemi.com/pub/Collateral/BSS138-D.PDF"
			(at 158.75 107.95 0)
		)
		(property "Description" ""
			(at 158.75 107.95 0)
		)
		(property "Distributor" "D"
			(at 158.75 107.95 0)
		)
		(property "OrderNr" "4530-BSS138CT-ND"
			(at 158.75 107.95 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(instances
			(project "8]axe"
				(path
					(reference "Q1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 44.45 181.61 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR027"
			(at 44.45 187.96 0)
		)
		(property "Value" "GND"
			(at 44.577 186.0042 0)
		)
		(property "Footprint" ""
			(at 44.45 181.61 0)
		)
		(property "Datasheet" ""
			(at 44.45 181.61 0)
		)
		(property "Description" ""
			(at 44.45 181.61 0)
		)
		(pin "1")
		(instances
			(project "pferdibank"
				(path
					(reference "#PWR027")
					(unit 1)
				)
			)
			(project "power"
				(path
					(reference "#PWR029")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR019")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Transistor_FET:AON6411")
		(at 166.37 91.44 0)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "Q2"
			(at 163.83 88.265 0)
		)
		(property "Value" "TPH1R712MD,L1Q"
			(at 172.085 81.915 90)
		)
		(property "Footprint" "Package_TO_SOT_SMD:LFPAK56"
			(at 171.45 89.535 0)
		)
		(property "Datasheet" "http://www.aosmd.com/res/data_sheets/AON6411.pdf"
			(at 166.37 91.44 90)
		)
		(property "Description" ""
			(at 166.37 91.44 0)
		)
		(property "Distributor" "D"
			(at 166.37 91.44 0)
		)
		(property "Manufacturer" "TPH1R712MD,L1Q"
			(at 166.37 91.44 0)
		)
		(property "OrderNr" "TPH1R712MDL1QCT-ND"
			(at 166.37 91.44 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(instances
			(project "8]axe"
				(path
					(reference "Q2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 149.86 119.38 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR028"
			(at 149.86 123.19 0)
		)
		(property "Value" "+3V3"
			(at 149.86 114.935 0)
		)
		(property "Footprint" ""
			(at 149.86 119.38 0)
		)
		(property "Datasheet" ""
			(at 149.86 119.38 0)
		)
		(property "Description" ""
			(at 149.86 119.38 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR028")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 123.19 123.19 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R2"
			(at 120.65 123.19 90)
		)
		(property "Value" "10k"
			(at 125.73 123.19 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 124.968 123.19 90)
		)
		(property "Datasheet" "~"
			(at 123.19 123.19 0)
		)
		(property "Description" ""
			(at 123.19 123.19 0)
		)
		(property "Manufacturer" "ERJ-H3EF1002V"
			(at 123.19 123.19 0)
		)
		(property "Distributor" "D"
			(at 123.19 123.19 0)
		)
		(property "OrderNr" "10-ERJ-H3EF1002VCT-ND"
			(at 123.19 123.19 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "R2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 115.57 127 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR021"
			(at 115.57 133.35 0)
		)
		(property "Value" "GND"
			(at 115.57 132.715 0)
		)
		(property "Footprint" ""
			(at 115.57 127 0)
		)
		(property "Datasheet" ""
			(at 115.57 127 0)
		)
		(property "Description" ""
			(at 115.57 127 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR021")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Jumper:SolderJumper_2_Open")
		(at 93.98 161.29 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "JP1"
			(at 93.98 158.115 0)
		)
		(property "Value" "SolderJumper_2_Open"
			(at 93.98 158.115 0)
		)
		(property "Footprint" "Jumper:SolderJumper-2_P1.3mm_Open_RoundedPad1.0x1.5mm"
			(at 93.98 161.29 0)
		)
		(property "Datasheet" "~"
			(at 93.98 161.29 0)
		)
		(property "Description" ""
			(at 93.98 161.29 0)
		)
		(property "Distributor" "-"
			(at 93.98 161.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "JP1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 149.86 127 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR029"
			(at 149.86 133.35 0)
		)
		(property "Value" "GND"
			(at 149.86 132.08 0)
		)
		(property "Footprint" ""
			(at 149.86 127 0)
		)
		(property "Datasheet" ""
			(at 149.86 127 0)
		)
		(property "Description" ""
			(at 149.86 127 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR029")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 33.02 181.61 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR023"
			(at 33.02 187.96 0)
		)
		(property "Value" "GND"
			(at 33.147 186.0042 0)
		)
		(property "Footprint" ""
			(at 33.02 181.61 0)
		)
		(property "Datasheet" ""
			(at 33.02 181.61 0)
		)
		(property "Description" ""
			(at 33.02 181.61 0)
		)
		(pin "1")
		(instances
			(project "pferdibank"
				(path
					(reference "#PWR023")
					(unit 1)
				)
			)
			(project "power"
				(path
					(reference "#PWR028")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR018")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 113.03 161.29 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#FLG01"
			(at 113.03 159.385 0)
		)
		(property "Value" "PWR_FLAG"
			(at 113.03 156.21 0)
		)
		(property "Footprint" ""
			(at 113.03 161.29 0)
		)
		(property "Datasheet" "~"
			(at 113.03 161.29 0)
		)
		(property "Description" ""
			(at 113.03 161.29 0)
		)
		(pin "1")
		(instances
			(project "power"
				(path
					(reference "#FLG01")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG01")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 77.47 166.37 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R24"
			(at 79.248 165.2016 0)
		)
		(property "Value" "49.9k"
			(at 79.248 167.513 0)
		)
		(property "Footprint" "Resistor_SMD:R_0805_2012Metric"
			(at 75.692 166.37 90)
		)
		(property "Datasheet" "~"
			(at 77.47 166.37 0)
		)
		(property "Description" ""
			(at 77.47 166.37 0)
		)
		(property "Distributor" "D"
			(at 77.47 166.37 0)
		)
		(property "Manufacturer" "RC0805FR-0749K9L"
			(at 77.47 166.37 0)
		)
		(property "OrderNr" "311-49.9KCRCT-ND"
			(at 77.47 166.37 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pferdibank"
				(path
					(reference "R24")
					(unit 1)
				)
			)
			(project "power"
				(path
					(reference "R11")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+12V")
		(at 33.02 151.13 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR015"
			(at 33.02 154.94 0)
		)
		(property "Value" "+12V"
			(at 33.02 146.05 0)
		)
		(property "Footprint" ""
			(at 33.02 151.13 0)
		)
		(property "Datasheet" ""
			(at 33.02 151.13 0)
		)
		(property "Description" ""
			(at 33.02 151.13 0)
		)
		(pin "1")
		(instances
			(project "power"
				(path
					(reference "#PWR015")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR017")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 77.47 176.53 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R25"
			(at 79.248 175.3616 0)
		)
		(property "Value" "7.15k"
			(at 79.248 177.673 0)
		)
		(property "Footprint" "Resistor_SMD:R_0805_2012Metric"
			(at 75.692 176.53 90)
		)
		(property "Datasheet" "~"
			(at 77.47 176.53 0)
		)
		(property "Description" ""
			(at 77.47 176.53 0)
		)
		(property "Distributor" "D"
			(at 77.47 176.53 0)
		)
		(property "Manufacturer" "RMCF0805FT7K15"
			(at 77.47 176.53 0)
		)
		(property "OrderNr" "RMCF0805FT7K15CT-ND"
			(at 77.47 176.53 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pferdibank"
				(path
					(reference "R25")
					(unit 1)
				)
			)
			(project "power"
				(path
					(reference "R12")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+5V_PWR")
		(at 203.2 104.14 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR036"
			(at 199.39 104.14 0)
		)
		(property "Value" "+5V_PWR"
			(at 207.01 104.1399 90)
		)
		(property "Footprint" ""
			(at 203.2 104.14 0)
		)
		(property "Datasheet" ""
			(at 203.2 104.14 0)
		)
		(property "Description" ""
			(at 203.2 104.14 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR036")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 218.44 154.94 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C225"
			(at 217.17 153.035 0)
		)
		(property "Value" "1µ"
			(at 216.535 158.75 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 218.44 154.94 0)
		)
		(property "Datasheet" ""
			(at 218.44 154.94 0)
		)
		(property "Description" ""
			(at 218.44 154.94 0)
		)
		(property "DK" ""
			(at 218.44 154.94 0)
		)
		(property "PARTNO" ""
			(at 218.44 154.94 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 218.44 154.94 0)
		)
		(property "Distributor" "D"
			(at 218.44 154.94 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 218.44 154.94 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "C225")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 137.16 100.33 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR025"
			(at 137.16 104.14 0)
		)
		(property "Value" "+3V3"
			(at 137.16 95.25 0)
		)
		(property "Footprint" ""
			(at 137.16 100.33 0)
		)
		(property "Datasheet" ""
			(at 137.16 100.33 0)
		)
		(property "Description" ""
			(at 137.16 100.33 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR025")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 240.03 161.29 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR0432"
			(at 240.03 167.64 0)
		)
		(property "Value" "GND"
			(at 240.157 165.6842 0)
		)
		(property "Footprint" ""
			(at 240.03 161.29 0)
		)
		(property "Datasheet" ""
			(at 240.03 161.29 0)
		)
		(property "Description" ""
			(at 240.03 161.29 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0432")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 134.62 180.34 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#FLG02"
			(at 134.62 182.245 0)
		)
		(property "Value" "PWR_FLAG"
			(at 134.62 184.785 0)
		)
		(property "Footprint" ""
			(at 134.62 180.34 0)
		)
		(property "Datasheet" "~"
			(at 134.62 180.34 0)
		)
		(property "Description" ""
			(at 134.62 180.34 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#FLG02")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+5V_PWR")
		(at 40.64 27.94 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR016"
			(at 36.83 27.94 0)
		)
		(property "Value" "+5V_PWR"
			(at 44.45 27.94 90)
		)
		(property "Footprint" ""
			(at 40.64 27.94 0)
		)
		(property "Datasheet" ""
			(at 40.64 27.94 0)
		)
		(property "Description" ""
			(at 40.64 27.94 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR016")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+5V_PWR_EXT")
		(at 40.64 25.4 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR015"
			(at 36.83 25.4 0)
		)
		(property "Value" "+5V_PWR_EXT"
			(at 44.45 25.4 90)
		)
		(property "Footprint" ""
			(at 40.64 25.4 0)
		)
		(property "Datasheet" ""
			(at 40.64 25.4 0)
		)
		(property "Description" ""
			(at 40.64 25.4 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR015")
					(unit 1)
				)
			)
		)
	)
	(sheet_instances
		(path
			(page "1")
		)
	)
)
