(kicad_sch
	(version 20231120)
	(generator "eeschema")
	(generator_version "8.0")
	(paper "A3")
	(lib_symbols
		(symbol "Device:C"
			(pin_numbers hide)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Unpolarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C_*"
				(at 0 0 0)
			)
			(symbol "C_0_1"
				(polyline
					(pts
						(xy -2.032 -0.762) (xy 2.032 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.032 0.762) (xy 2.032 0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:R"
			(pin_numbers hide)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 2.032 0 90)
			)
			(property "Value" "R"
				(at 0 0 90)
			)
			(property "Footprint" ""
				(at -1.778 0 90)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Resistor"
				(at 0 0 0)
			)
			(property "ki_keywords" "R res resistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R_0_1"
				(rectangle
					(start -1.016 -2.54)
					(end 1.016 2.54)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "GND_1"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -6.35 0)
			)
			(property "Value" "GND_1"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_1_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_1_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND")
					(number "1")
				)
			)
		)
		(symbol "GND_2"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -6.35 0)
			)
			(property "Value" "GND_2"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_2_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_2_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND")
					(number "1")
				)
			)
		)
		(symbol "GND_3"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -6.35 0)
			)
			(property "Value" "GND_3"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_3_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_3_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND")
					(number "1")
				)
			)
		)
		(symbol "GND_5"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -6.35 0)
			)
			(property "Value" "GND_5"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_5_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_5_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND")
					(number "1")
				)
			)
		)
		(symbol "GND_7"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -6.35 0)
			)
			(property "Value" "GND_7"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_7_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_7_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND")
					(number "1")
				)
			)
		)
		(symbol "GND_8"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -6.35 0)
			)
			(property "Value" "GND_8"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_8_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_8_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND")
					(number "1")
				)
			)
		)
		(symbol "Isolator:ADuM1411"
			(pin_names
				(offset 1.016)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at 0 19.05 0)
			)
			(property "Value" "ADuM1411"
				(at 0 16.51 0)
			)
			(property "Footprint" "Package_SO:SOIC-16W_7.5x10.3mm_P1.27mm"
				(at 0 -17.78 0)
			)
			(property "Datasheet" "https://www.analog.com/media/en/technical-documentation/data-sheets/ADUM1410_1411_1412.pdf"
				(at -20.32 0 0)
			)
			(property "Description" "Quad Channel Digital Isolator,10Mbps,SO-16"
				(at 0 0 0)
			)
			(property "ki_keywords" "Digital Isolator"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOIC*7.5x10.3mm*P1.27mm*"
				(at 0 0 0)
			)
			(symbol "ADuM1411_0_0"
				(rectangle
					(start -1.905 0.635)
					(end -6.985 -0.635)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 1.016)
					(end 1.27 -1.016)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 3.556)
					(end 1.27 1.524)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 6.096)
					(end 1.27 4.064)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 8.636)
					(end 1.27 6.604)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 -0.762)
					(mid -0.2551 -0.508)
					(end -0.508 -0.254)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 -0.254)
					(mid -0.2551 0)
					(end -0.508 0.254)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 0.254)
					(mid -0.2551 0.508)
					(end -0.508 0.762)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 1.778)
					(mid -0.2551 2.032)
					(end -0.508 2.286)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 2.286)
					(mid -0.2551 2.54)
					(end -0.508 2.794)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 2.794)
					(mid -0.2551 3.048)
					(end -0.508 3.302)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 4.318)
					(mid -0.2551 4.572)
					(end -0.508 4.826)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 4.826)
					(mid -0.2551 5.08)
					(end -0.508 5.334)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 5.334)
					(mid -0.2551 5.588)
					(end -0.508 5.842)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 6.858)
					(mid -0.2551 7.112)
					(end -0.508 7.366)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 7.366)
					(mid -0.2551 7.62)
					(end -0.508 7.874)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 7.874)
					(mid -0.2551 8.128)
					(end -0.508 8.382)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -6.985 0) (xy -7.62 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -6.985 2.54) (xy -7.62 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -6.985 5.08) (xy -7.62 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -6.985 7.62) (xy -7.62 7.62)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -4.445 -1.27) (xy -4.445 -0.635)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.905 0) (xy -1.27 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.905 2.54) (xy -1.27 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.905 5.08) (xy -1.27 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.905 7.62) (xy -1.27 7.62)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 -0.762) (xy -0.508 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 0.762) (xy -0.508 0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 1.778) (xy -0.508 1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 3.302) (xy -0.508 3.302)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 4.318) (xy -0.508 4.318)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 5.842) (xy -0.508 5.842)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 6.858) (xy -0.508 6.858)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 8.382) (xy -0.508 8.382)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -10.795) (xy -0.635 -12.065)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -8.89) (xy -0.635 -10.16)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -6.985) (xy -0.635 -8.255)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -5.08) (xy -0.635 -6.35)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -3.175) (xy -0.635 -4.445)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -1.27) (xy -0.635 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 8.89) (xy -0.635 10.16)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 10.795) (xy -0.635 12.065)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 12.7) (xy -0.635 13.97)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 15.24) (xy -0.635 14.605)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -10.795) (xy 0.635 -12.065)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -8.89) (xy 0.635 -10.16)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -6.985) (xy 0.635 -8.255)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -5.08) (xy 0.635 -6.35)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -3.175) (xy 0.635 -4.445)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -1.27) (xy 0.635 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 8.89) (xy 0.635 10.16)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 12.065) (xy 0.635 10.795)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 13.97) (xy 0.635 12.7)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 14.605) (xy 0.635 15.24)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 -0.762) (xy 0.508 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 0.762) (xy 0.508 0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 1.778) (xy 0.508 1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 3.302) (xy 0.508 3.302)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 4.318) (xy 0.508 4.318)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 5.842) (xy 0.508 5.842)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 6.858) (xy 0.508 6.858)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 8.382) (xy 0.508 8.382)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.905 0) (xy 1.27 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.905 2.54) (xy 1.27 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.905 5.08) (xy 1.27 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.905 7.62) (xy 1.27 7.62)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 4.445 0.635) (xy 4.445 1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 4.445 3.175) (xy 4.445 4.445)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 4.445 5.715) (xy 4.445 6.985)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 6.985 0) (xy 7.62 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 6.985 2.54) (xy 7.62 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 6.985 5.08) (xy 7.62 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 6.985 7.62) (xy 7.62 7.62)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -4.445 -1.27) (xy -4.445 -5.08) (xy -5.715 -5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.715 -5.08) (xy 4.445 -5.08) (xy 4.445 -0.635)
					)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 -0.254)
					(mid 0.2551 -0.508)
					(end 0.508 -0.762)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 0.254)
					(mid 0.2551 0)
					(end 0.508 -0.254)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 0.762)
					(mid 0.2551 0.508)
					(end 0.508 0.254)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 2.286)
					(mid 0.2551 2.032)
					(end 0.508 1.778)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 2.794)
					(mid 0.2551 2.54)
					(end 0.508 2.286)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 3.302)
					(mid 0.2551 3.048)
					(end 0.508 2.794)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 4.826)
					(mid 0.2551 4.572)
					(end 0.508 4.318)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 5.334)
					(mid 0.2551 5.08)
					(end 0.508 4.826)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 5.842)
					(mid 0.2551 5.588)
					(end 0.508 5.334)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 7.366)
					(mid 0.2551 7.112)
					(end 0.508 6.858)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 7.874)
					(mid 0.2551 7.62)
					(end 0.508 7.366)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 8.382)
					(mid 0.2551 8.128)
					(end 0.508 7.874)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 1.905 0.635)
					(end 6.985 -0.635)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 1.905 3.175)
					(end 6.985 1.905)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 1.905 5.715)
					(end 6.985 4.445)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 1.905 8.255)
					(end 6.985 6.985)
					(fill
						(type none)
					)
				)
				(text "DECODE"
					(at -4.445 0 0)
				)
				(text "DECODE"
					(at 4.445 2.54 0)
				)
				(text "DECODE"
					(at 4.445 5.08 0)
				)
				(text "DECODE"
					(at 4.445 7.62 0)
				)
				(text "ENCODE"
					(at -4.445 2.54 0)
				)
				(text "ENCODE"
					(at -4.445 5.08 0)
				)
				(text "ENCODE"
					(at -4.445 7.62 0)
				)
				(text "ENCODE"
					(at 4.445 0 0)
				)
			)
			(symbol "ADuM1411_0_1"
				(rectangle
					(start -12.7 15.24)
					(end 12.7 -15.24)
					(fill
						(type background)
					)
				)
				(rectangle
					(start -1.905 3.175)
					(end -6.985 1.905)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.905 5.715)
					(end -6.985 4.445)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.905 8.255)
					(end -6.985 6.985)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -14.605) (xy -0.635 -15.24)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -12.7) (xy -0.635 -13.97)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -14.605) (xy 0.635 -15.24)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -12.7) (xy 0.635 -13.97)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "ADuM1411_1_1"
				(pin power_in line
					(at -15.24 12.7 0)
					(length 2.54)
					(name "VDD1")
					(number "1")
				)
				(pin input line
					(at 15.24 -5.08 180)
					(length 2.54)
					(name "CTRL2")
					(number "10")
				)
				(pin input line
					(at 15.24 0 180)
					(length 2.54)
					(name "VID")
					(number "11")
				)
				(pin output line
					(at 15.24 2.54 180)
					(length 2.54)
					(name "VOC")
					(number "12")
				)
				(pin output line
					(at 15.24 5.08 180)
					(length 2.54)
					(name "VOB")
					(number "13")
				)
				(pin output line
					(at 15.24 7.62 180)
					(length 2.54)
					(name "VOA")
					(number "14")
				)
				(pin power_in line
					(at 15.24 -12.7 180)
					(length 2.54)
					(name "GND2")
					(number "15")
				)
				(pin power_in line
					(at 15.24 12.7 180)
					(length 2.54)
					(name "VDD2")
					(number "16")
				)
				(pin power_in line
					(at -15.24 -10.16 0)
					(length 2.54)
					(name "GND1")
					(number "2")
				)
				(pin input line
					(at -15.24 7.62 0)
					(length 2.54)
					(name "VIA")
					(number "3")
				)
				(pin input line
					(at -15.24 5.08 0)
					(length 2.54)
					(name "VIB")
					(number "4")
				)
				(pin input line
					(at -15.24 2.54 0)
					(length 2.54)
					(name "VIC")
					(number "5")
				)
				(pin output line
					(at -15.24 0 0)
					(length 2.54)
					(name "VOD")
					(number "6")
				)
				(pin input line
					(at -15.24 -5.08 0)
					(length 2.54)
					(name "CTRL1")
					(number "7")
				)
				(pin power_in line
					(at -15.24 -12.7 0)
					(length 2.54)
					(name "GND1")
					(number "8")
				)
				(pin power_in line
					(at 15.24 -10.16 180)
					(length 2.54)
					(name "GND2")
					(number "9")
				)
			)
		)
		(symbol "Oscillator:ASDMB-xxxMHz"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -6.35 6.35 0)
			)
			(property "Value" "ASDMB-xxxMHz"
				(at 11.43 6.35 0)
			)
			(property "Footprint" "Oscillator:Oscillator_SMD_Abracon_ASDMB-4Pin_2.5x2.0mm"
				(at 0 0 0)
			)
			(property "Datasheet" "https://abracon.com/Oscillators/ASDMB.pdf"
				(at 7.62 11.43 0)
			)
			(property "Description" "1.8-3.3V SMD Ultra Miniature Crystal Clock Oscillator, Abracon"
				(at 0 0 0)
			)
			(property "ki_keywords" "1.8-3.3V SMD Ultra Miniature Crystal Clock Oscillator"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Oscillator*SMD*Abracon*ASDMB*2.5x2.0mm*"
				(at 0 0 0)
			)
			(symbol "ASDMB-xxxMHz_1_1"
				(rectangle
					(start -7.62 5.08)
					(end 7.62 -5.08)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy -4.445 2.54) (xy -3.81 2.54) (xy -3.81 3.81) (xy -3.175 3.81) (xy -3.175 2.54) (xy -2.54 2.54)
						(xy -2.54 3.81) (xy -1.905 3.81) (xy -1.905 2.54)
					)
					(fill
						(type none)
					)
				)
				(pin input line
					(at -10.16 0 0)
					(length 2.54)
					(name "Standby")
					(number "1")
				)
				(pin power_in line
					(at 2.54 -7.62 90)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "Out")
					(number "3")
				)
				(pin power_in line
					(at 2.54 7.62 270)
					(length 2.54)
					(name "VDD")
					(number "4")
				)
			)
		)
		(symbol "bitaxe:MCP1824"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U7"
				(at -3.175 6.985 0)
			)
			(property "Value" "MCP1824T-1802E"
				(at 0 5.08 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5"
				(at 0 0 0)
			)
			(property "Datasheet" "https://ww1.microchip.com/downloads/en/DeviceDoc/22070a.pdf"
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "PARTNO" ""
				(at 0 0 0)
			)
			(property "DK" ""
				(at 0 0 0)
			)
			(property "OrderNr" "MCP1824T-1802E/OTCT-ND"
				(at 0 0 0)
			)
			(property "Distributor" "D"
				(at 0 0 0)
			)
			(property "Manufacturer" "MCP1824T-1802E/OT"
				(at 0 0 0)
			)
			(symbol "MCP1824_0_1"
				(rectangle
					(start -7.62 3.81)
					(end 7.62 -6.35)
					(fill
						(type background)
					)
				)
			)
			(symbol "MCP1824_1_0"
				(pin power_in line
					(at -10.16 1.27 0)
					(length 2.54)
					(name "VIN")
					(number "1")
				)
				(pin power_in line
					(at 10.16 -1.27 180)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin input line
					(at -10.16 -1.27 0)
					(length 2.54)
					(name "EN")
					(number "3")
				)
				(pin bidirectional line
					(at -10.16 -3.81 0)
					(length 2.54)
					(name "PG")
					(number "4")
				)
				(pin power_out line
					(at 10.16 1.27 180)
					(length 2.54)
					(name "VOUT")
					(number "5")
				)
			)
		)
		(symbol "mylib7:+0V8_3"
			(exclude_from_sim no)
			(in_bom no)
			(on_board no)
			(property "Reference" "U5008"
				(at 3.81 1.27 0)
			)
			(property "Value" "+0V8"
				(at 0 3.175 90)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "Distributor" "-"
				(at 0 0 0)
			)
			(symbol "+0V8_3_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+0V8_3_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+0V8_3")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+1V2_3"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR05024"
				(at 0 -3.81 0)
			)
			(property "Value" "+1V2_3"
				(at 0 4.445 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+1V2\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+1V2_3_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+1V2_3_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+1V2_3")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+1V8_3"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR05017"
				(at 0 -3.81 0)
			)
			(property "Value" "+1V8_3"
				(at 0 5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+1V8\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+1V8_3_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+1V8_3_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+1V8_3")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+3V3_EXT"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR013"
				(at 0 -3.81 0)
			)
			(property "Value" "+3V3_EXT"
				(at 0 4.445 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+3V3\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+3V3_EXT_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+3V3_EXT_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+3V3_EXT")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+6.5V"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR034"
				(at 0 -3.81 0)
			)
			(property "Value" "+6.5V"
				(at 0 4.445 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+6.5V_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+6.5V_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+5V")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+V_IF"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR07"
				(at 0 -3.81 0)
			)
			(property "Value" "+V_IF"
				(at 0 5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+3V3\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+V_IF_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+V_IF_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+V_IF")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+V_IF_3"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR0148"
				(at 0 -3.81 0)
			)
			(property "Value" "+V_IF_3"
				(at 0 5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+V_IF_3_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+V_IF_3_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+V_IF_2")
					(number "1")
				)
			)
		)
		(symbol "mylib7:BM1366_mode1"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U8"
				(at 1.9559 24.13 0)
			)
			(property "Value" "BM1366_mode1"
				(at 1.9559 21.59 0)
			)
			(property "Footprint" "qaxe:BM1366"
				(at -7.62 0 0)
			)
			(property "Datasheet" ""
				(at -7.62 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "Distributor" "X"
				(at 0 0 0)
			)
			(symbol "BM1366_mode1_0_1"
				(rectangle
					(start -15.24 20.32)
					(end 15.24 -17.78)
					(fill
						(type background)
					)
				)
			)
			(symbol "BM1366_mode1_1_1"
				(pin input line
					(at -17.78 17.78 0)
					(length 2.54)
					(name "VDD1_0")
					(number "1")
				)
				(pin input line
					(at -17.78 -5.08 0)
					(length 2.54)
					(name "ADDR0")
					(number "10")
				)
				(pin input line
					(at -17.78 -7.62 0)
					(length 2.54)
					(name "ADDR1")
					(number "11")
				)
				(pin power_in line
					(at -17.78 -10.16 0)
					(length 2.54)
					(name "PLL_VSS")
					(number "12")
				)
				(pin power_in line
					(at -17.78 -12.7 0)
					(length 2.54)
					(name "VDDIO_08_0")
					(number "13")
				)
				(pin power_in line
					(at -17.78 -15.24 0)
					(length 2.54)
					(name "VDDIO_18_0")
					(number "14")
				)
				(pin power_in line
					(at 17.78 -15.24 180)
					(length 2.54)
					(name "VDDIO_18_1")
					(number "15")
				)
				(pin power_in line
					(at 17.78 -12.7 180)
					(length 2.54)
					(name "VDDIO_08_1")
					(number "16")
				)
				(pin power_in line
					(at 17.78 -10.16 180)
					(length 2.54)
					(name "VSS")
					(number "17")
				)
				(pin input line
					(at 17.78 -7.62 180)
					(length 2.54)
					(name "PIN_MODE")
					(number "18")
				)
				(pin input line
					(at 17.78 -5.08 180)
					(length 2.54)
					(name "INV_CLKO")
					(number "19")
				)
				(pin input line
					(at -17.78 15.24 0)
					(length 2.54)
					(name "VDD2_0")
					(number "2")
				)
				(pin output line
					(at 17.78 -2.54 180)
					(length 2.54)
					(name "CO")
					(number "20")
				)
				(pin output line
					(at 17.78 0 180)
					(length 2.54)
					(name "CLKO")
					(number "21")
				)
				(pin input line
					(at 17.78 2.54 180)
					(length 2.54)
					(name "RI")
					(number "22")
				)
				(pin output line
					(at 17.78 5.08 180)
					(length 2.54)
					(name "BO")
					(number "23")
				)
				(pin output line
					(at 17.78 7.62 180)
					(length 2.54)
					(name "NRSTO")
					(number "24")
				)
				(pin input line
					(at 17.78 10.16 180)
					(length 2.54)
					(name "VSS")
					(number "25")
				)
				(pin input line
					(at 17.78 12.7 180)
					(length 2.54)
					(name "VDD3_1")
					(number "26")
				)
				(pin input line
					(at 17.78 15.24 180)
					(length 2.54)
					(name "VDD2_1")
					(number "27")
				)
				(pin input line
					(at 17.78 17.78 180)
					(length 2.54)
					(name "VDD1_1")
					(number "28")
				)
				(pin power_in line
					(at 0 22.86 270)
					(length 2.54)
					(name "VDD")
					(number "29")
				)
				(pin input line
					(at -17.78 12.7 0)
					(length 2.54)
					(name "VDD3_0")
					(number "3")
				)
				(pin power_in line
					(at 0 -20.32 90)
					(length 2.54)
					(name "GND")
					(number "30")
				)
				(pin input line
					(at -17.78 10.16 0)
					(length 2.54)
					(name "VSS")
					(number "4")
				)
				(pin input line
					(at -17.78 7.62 0)
					(length 2.54)
					(name "NRSTI")
					(number "5")
				)
				(pin input line
					(at -17.78 5.08 0)
					(length 2.54)
					(name "BI")
					(number "6")
				)
				(pin output line
					(at -17.78 2.54 0)
					(length 2.54)
					(name "RO")
					(number "7")
				)
				(pin input line
					(at -17.78 0 0)
					(length 2.54)
					(name "CLKI")
					(number "8")
				)
				(pin input line
					(at -17.78 -2.54 0)
					(length 2.54)
					(name "CI")
					(number "9")
				)
			)
		)
		(symbol "mylib7:GND_EXT"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR0146"
				(at 0 -6.35 0)
			)
			(property "Value" "GND_EXT"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_EXT_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_EXT_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND_EXT")
					(number "1")
				)
			)
		)
		(symbol "mylib7:GND_IF"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR08"
				(at 0 -6.35 0)
			)
			(property "Value" "GND_IF"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_IF_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_IF_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND_IF")
					(number "1")
				)
			)
		)
		(symbol "mylib7:GND_IF_3"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR0149"
				(at 0 -6.35 0)
			)
			(property "Value" "GND_IF_3"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_IF_3_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_IF_3_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND_IF_2")
					(number "1")
				)
			)
		)
		(symbol "mylib7:NCP114-SN"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U4"
				(at 0 9.525 0)
			)
			(property "Value" "NCP115-SN"
				(at 0 6.985 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:TSOT-23-5"
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "300mA Low-Dropout Linear Regulators, 1.2V output voltage, LDO with low noise and enable pin, XDFN-4"
				(at 0 0 0)
			)
			(property "ki_keywords" "Single Output LDO"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "OnSemi*XDFN4*1EP*1.0x1.0mm*"
				(at 0 0 0)
			)
			(symbol "NCP114-SN_0_1"
				(rectangle
					(start -7.62 5.08)
					(end 7.62 -5.08)
					(fill
						(type background)
					)
				)
			)
			(symbol "NCP114-SN_1_1"
				(pin power_in line
					(at -10.16 2.54 0)
					(length 2.54)
					(name "IN")
					(number "1")
				)
				(pin power_in line
					(at 0 -7.62 90)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin input line
					(at -10.16 -2.54 0)
					(length 2.54)
					(name "EN")
					(number "3")
				)
				(pin power_out line
					(at 10.16 2.54 180)
					(length 2.54)
					(name "OUT")
					(number "5")
				)
			)
		)
		(symbol "power:GND"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -6.35 0)
			)
			(property "Value" "GND"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "power-flag"
				(at 0 0 0)
			)
			(symbol "GND_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND")
					(number "1")
				)
			)
		)
		(symbol "power:PWR_FLAG"
			(power)
			(pin_numbers hide)
			(pin_names
				(offset 0) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#FLG"
				(at 0 1.905 0)
			)
			(property "Value" "PWR_FLAG"
				(at 0 3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Special symbol for telling ERC where power comes from"
				(at 0 0 0)
			)
			(property "ki_keywords" "flag power"
				(at 0 0 0)
			)
			(symbol "PWR_FLAG_0_0"
				(pin power_out line
					(at 0 0 90)
					(length 0)
					(name "pwr")
					(number "1")
				)
			)
			(symbol "PWR_FLAG_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 1.27) (xy -1.016 1.905) (xy 0 2.54) (xy 1.016 1.905) (xy 0 1.27)
					)
					(fill
						(type none)
					)
				)
			)
		)
	)
	(junction
		(at 86.36 34.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 170.18 50.8)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 85.09 223.52)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 170.18 71.12)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 86.36 71.12)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 85.09 153.67)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 120.65 223.52)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 209.55 50.8)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 120.65 187.96)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 125.73 50.8)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 86.36 50.8)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 74.93 34.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 148.59 34.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 63.5 34.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 149.86 58.42)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 137.16 34.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 125.73 43.18)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 91.44 223.52)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 148.59 48.26)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 189.23 34.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 137.16 45.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 91.44 187.96)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 106.68 34.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 119.38 153.67)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 209.55 34.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 162.56 50.8)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 83.82 187.96)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 220.98 34.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 232.41 34.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 125.73 71.12)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 209.55 71.12)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 31.75 52.07)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 170.18 43.18)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 125.73 34.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(no_connect
		(at 86.36 146.05)
	)
	(no_connect
		(at 207.01 68.58)
	)
	(no_connect
		(at 207.01 63.5)
	)
	(no_connect
		(at 92.71 193.04)
	)
	(no_connect
		(at 116.84 146.05)
	)
	(no_connect
		(at 88.9 68.58)
	)
	(no_connect
		(at 207.01 60.96)
	)
	(no_connect
		(at 207.01 58.42)
	)
	(no_connect
		(at 207.01 55.88)
	)
	(no_connect
		(at 207.01 66.04)
	)
	(no_connect
		(at 171.45 66.04)
	)
	(no_connect
		(at 124.46 66.04)
	)
	(no_connect
		(at 171.45 68.58)
	)
	(no_connect
		(at 124.46 68.58)
	)
	(no_connect
		(at 207.01 53.34)
	)
	(no_connect
		(at 88.9 66.04)
	)
	(wire
		(pts
			(xy 213.36 184.15) (xy 213.36 185.42)
		)
	)
	(wire
		(pts
			(xy 93.98 228.6) (xy 91.44 228.6)
		)
	)
	(wire
		(pts
			(xy 74.93 45.72) (xy 88.9 45.72)
		)
	)
	(wire
		(pts
			(xy 86.36 135.89) (xy 76.2 135.89)
		)
	)
	(wire
		(pts
			(xy 236.22 193.04) (xy 236.22 194.31)
		)
	)
	(wire
		(pts
			(xy 170.18 34.29) (xy 173.99 34.29)
		)
	)
	(wire
		(pts
			(xy 86.36 50.8) (xy 86.36 71.12)
		)
	)
	(wire
		(pts
			(xy 71.12 63.5) (xy 88.9 63.5)
		)
	)
	(wire
		(pts
			(xy 189.23 34.29) (xy 189.23 38.1)
		)
	)
	(wire
		(pts
			(xy 229.87 222.25) (xy 229.87 223.52)
		)
	)
	(wire
		(pts
			(xy 209.55 50.8) (xy 209.55 71.12)
		)
	)
	(wire
		(pts
			(xy 49.53 50.8) (xy 49.53 34.29)
		)
	)
	(wire
		(pts
			(xy 91.44 190.5) (xy 92.71 190.5)
		)
	)
	(wire
		(pts
			(xy 146.05 147.32) (xy 146.05 149.86)
		)
	)
	(wire
		(pts
			(xy 220.98 45.72) (xy 220.98 34.29)
		)
	)
	(wire
		(pts
			(xy 287.02 231.14) (xy 287.02 232.41)
		)
	)
	(wire
		(pts
			(xy 125.73 50.8) (xy 125.73 71.12)
		)
	)
	(wire
		(pts
			(xy 85.09 34.29) (xy 86.36 34.29)
		)
	)
	(wire
		(pts
			(xy 214.63 222.25) (xy 214.63 223.52)
		)
	)
	(wire
		(pts
			(xy 166.37 73.66) (xy 171.45 73.66)
		)
	)
	(wire
		(pts
			(xy 293.37 193.04) (xy 293.37 194.31)
		)
	)
	(wire
		(pts
			(xy 207.01 71.12) (xy 209.55 71.12)
		)
	)
	(wire
		(pts
			(xy 149.86 73.66) (xy 149.86 76.2)
		)
	)
	(wire
		(pts
			(xy 231.14 193.04) (xy 231.14 194.31)
		)
	)
	(wire
		(pts
			(xy 231.14 34.29) (xy 232.41 34.29)
		)
	)
	(wire
		(pts
			(xy 76.2 138.43) (xy 86.36 138.43)
		)
	)
	(wire
		(pts
			(xy 242.57 231.14) (xy 242.57 232.41)
		)
	)
	(wire
		(pts
			(xy 85.09 233.68) (xy 85.09 237.49)
		)
	)
	(wire
		(pts
			(xy 124.46 76.2) (xy 129.54 76.2)
		)
	)
	(wire
		(pts
			(xy 86.36 43.18) (xy 88.9 43.18)
		)
	)
	(wire
		(pts
			(xy 201.93 222.25) (xy 201.93 223.52)
		)
	)
	(wire
		(pts
			(xy 189.23 34.29) (xy 196.85 34.29)
		)
	)
	(wire
		(pts
			(xy 219.71 193.04) (xy 219.71 194.31)
		)
	)
	(wire
		(pts
			(xy 74.93 45.72) (xy 74.93 34.29)
		)
	)
	(wire
		(pts
			(xy 31.75 52.07) (xy 31.75 53.34)
		)
	)
	(wire
		(pts
			(xy 106.68 81.28) (xy 106.68 86.36)
		)
	)
	(wire
		(pts
			(xy 125.73 133.35) (xy 116.84 133.35)
		)
	)
	(wire
		(pts
			(xy 86.36 50.8) (xy 49.53 50.8)
		)
	)
	(wire
		(pts
			(xy 63.5 48.26) (xy 88.9 48.26)
		)
	)
	(wire
		(pts
			(xy 285.75 193.04) (xy 285.75 194.31)
		)
	)
	(wire
		(pts
			(xy 125.73 71.12) (xy 125.73 86.36)
		)
	)
	(wire
		(pts
			(xy 85.09 151.13) (xy 85.09 153.67)
		)
	)
	(wire
		(pts
			(xy 124.46 48.26) (xy 148.59 48.26)
		)
	)
	(wire
		(pts
			(xy 91.44 223.52) (xy 91.44 228.6)
		)
	)
	(wire
		(pts
			(xy 116.84 138.43) (xy 125.73 138.43)
		)
	)
	(wire
		(pts
			(xy 74.93 34.29) (xy 77.47 34.29)
		)
	)
	(wire
		(pts
			(xy 232.41 34.29) (xy 234.95 34.29)
		)
	)
	(wire
		(pts
			(xy 149.86 58.42) (xy 171.45 58.42)
		)
	)
	(wire
		(pts
			(xy 148.59 48.26) (xy 171.45 48.26)
		)
	)
	(wire
		(pts
			(xy 148.59 34.29) (xy 151.13 34.29)
		)
	)
	(wire
		(pts
			(xy 86.36 133.35) (xy 76.2 133.35)
		)
	)
	(wire
		(pts
			(xy 120.65 223.52) (xy 120.65 227.33)
		)
	)
	(wire
		(pts
			(xy 91.44 223.52) (xy 93.98 223.52)
		)
	)
	(wire
		(pts
			(xy 293.37 184.15) (xy 293.37 185.42)
		)
	)
	(wire
		(pts
			(xy 86.36 34.29) (xy 92.71 34.29)
		)
	)
	(wire
		(pts
			(xy 116.84 151.13) (xy 119.38 151.13)
		)
	)
	(wire
		(pts
			(xy 31.75 50.8) (xy 31.75 52.07)
		)
	)
	(wire
		(pts
			(xy 85.09 128.27) (xy 85.09 125.73)
		)
	)
	(wire
		(pts
			(xy 209.55 50.8) (xy 246.38 50.8)
		)
	)
	(wire
		(pts
			(xy 72.39 34.29) (xy 74.93 34.29)
		)
	)
	(wire
		(pts
			(xy 124.46 63.5) (xy 171.45 63.5)
		)
	)
	(wire
		(pts
			(xy 209.55 34.29) (xy 210.82 34.29)
		)
	)
	(wire
		(pts
			(xy 220.98 34.29) (xy 223.52 34.29)
		)
	)
	(wire
		(pts
			(xy 278.13 193.04) (xy 278.13 194.31)
		)
	)
	(wire
		(pts
			(xy 181.61 34.29) (xy 189.23 34.29)
		)
	)
	(wire
		(pts
			(xy 104.14 233.68) (xy 104.14 237.49)
		)
	)
	(wire
		(pts
			(xy 170.18 34.29) (xy 170.18 43.18)
		)
	)
	(wire
		(pts
			(xy 207.01 50.8) (xy 209.55 50.8)
		)
	)
	(wire
		(pts
			(xy 146.05 137.16) (xy 146.05 139.7)
		)
	)
	(wire
		(pts
			(xy 86.36 151.13) (xy 85.09 151.13)
		)
	)
	(wire
		(pts
			(xy 120.65 222.25) (xy 120.65 223.52)
		)
	)
	(wire
		(pts
			(xy 259.08 231.14) (xy 259.08 232.41)
		)
	)
	(wire
		(pts
			(xy 100.33 34.29) (xy 106.68 34.29)
		)
	)
	(wire
		(pts
			(xy 189.23 31.75) (xy 189.23 34.29)
		)
	)
	(wire
		(pts
			(xy 287.02 222.25) (xy 287.02 223.52)
		)
	)
	(wire
		(pts
			(xy 125.73 50.8) (xy 162.56 50.8)
		)
	)
	(wire
		(pts
			(xy 166.37 76.2) (xy 171.45 76.2)
		)
	)
	(wire
		(pts
			(xy 31.75 101.6) (xy 35.56 101.6)
		)
	)
	(wire
		(pts
			(xy 120.65 199.39) (xy 120.65 201.93)
		)
	)
	(wire
		(pts
			(xy 207.01 43.18) (xy 209.55 43.18)
		)
	)
	(wire
		(pts
			(xy 120.65 34.29) (xy 125.73 34.29)
		)
	)
	(wire
		(pts
			(xy 116.84 128.27) (xy 119.38 128.27)
		)
	)
	(wire
		(pts
			(xy 124.46 55.88) (xy 171.45 55.88)
		)
	)
	(wire
		(pts
			(xy 71.12 58.42) (xy 88.9 58.42)
		)
	)
	(wire
		(pts
			(xy 125.73 135.89) (xy 116.84 135.89)
		)
	)
	(wire
		(pts
			(xy 207.01 73.66) (xy 213.36 73.66)
		)
	)
	(wire
		(pts
			(xy 86.36 128.27) (xy 85.09 128.27)
		)
	)
	(wire
		(pts
			(xy 124.46 43.18) (xy 125.73 43.18)
		)
	)
	(wire
		(pts
			(xy 85.09 223.52) (xy 85.09 226.06)
		)
	)
	(wire
		(pts
			(xy 91.44 190.5) (xy 91.44 187.96)
		)
	)
	(wire
		(pts
			(xy 204.47 34.29) (xy 209.55 34.29)
		)
	)
	(wire
		(pts
			(xy 71.12 55.88) (xy 88.9 55.88)
		)
	)
	(wire
		(pts
			(xy 285.75 185.42) (xy 285.75 184.15)
		)
	)
	(wire
		(pts
			(xy 31.75 114.3) (xy 35.56 114.3)
		)
	)
	(wire
		(pts
			(xy 114.3 190.5) (xy 114.3 201.93)
		)
	)
	(wire
		(pts
			(xy 137.16 45.72) (xy 137.16 34.29)
		)
	)
	(wire
		(pts
			(xy 124.46 50.8) (xy 125.73 50.8)
		)
	)
	(wire
		(pts
			(xy 170.18 50.8) (xy 170.18 71.12)
		)
	)
	(wire
		(pts
			(xy 207.01 76.2) (xy 213.36 76.2)
		)
	)
	(wire
		(pts
			(xy 119.38 128.27) (xy 119.38 125.73)
		)
	)
	(wire
		(pts
			(xy 88.9 50.8) (xy 86.36 50.8)
		)
	)
	(wire
		(pts
			(xy 124.46 58.42) (xy 149.86 58.42)
		)
	)
	(wire
		(pts
			(xy 125.73 43.18) (xy 170.18 43.18)
		)
	)
	(wire
		(pts
			(xy 106.68 34.29) (xy 113.03 34.29)
		)
	)
	(wire
		(pts
			(xy 170.18 43.18) (xy 171.45 43.18)
		)
	)
	(wire
		(pts
			(xy 125.73 140.97) (xy 116.84 140.97)
		)
	)
	(wire
		(pts
			(xy 149.86 58.42) (xy 149.86 66.04)
		)
	)
	(wire
		(pts
			(xy 86.36 71.12) (xy 86.36 86.36)
		)
	)
	(wire
		(pts
			(xy 119.38 151.13) (xy 119.38 153.67)
		)
	)
	(wire
		(pts
			(xy 201.93 231.14) (xy 201.93 232.41)
		)
	)
	(wire
		(pts
			(xy 231.14 184.15) (xy 231.14 185.42)
		)
	)
	(wire
		(pts
			(xy 91.44 187.96) (xy 92.71 187.96)
		)
	)
	(wire
		(pts
			(xy 124.46 73.66) (xy 129.54 73.66)
		)
	)
	(wire
		(pts
			(xy 229.87 231.14) (xy 229.87 232.41)
		)
	)
	(wire
		(pts
			(xy 82.55 76.2) (xy 88.9 76.2)
		)
	)
	(wire
		(pts
			(xy 120.65 187.96) (xy 120.65 191.77)
		)
	)
	(wire
		(pts
			(xy 85.09 220.98) (xy 85.09 223.52)
		)
	)
	(wire
		(pts
			(xy 218.44 34.29) (xy 220.98 34.29)
		)
	)
	(wire
		(pts
			(xy 242.57 222.25) (xy 242.57 223.52)
		)
	)
	(wire
		(pts
			(xy 162.56 50.8) (xy 162.56 34.29)
		)
	)
	(wire
		(pts
			(xy 314.96 185.42) (xy 314.96 184.15)
		)
	)
	(wire
		(pts
			(xy 170.18 71.12) (xy 170.18 86.36)
		)
	)
	(wire
		(pts
			(xy 171.45 50.8) (xy 170.18 50.8)
		)
	)
	(wire
		(pts
			(xy 209.55 71.12) (xy 209.55 86.36)
		)
	)
	(wire
		(pts
			(xy 124.46 60.96) (xy 171.45 60.96)
		)
	)
	(wire
		(pts
			(xy 31.75 52.07) (xy 17.78 52.07)
		)
	)
	(wire
		(pts
			(xy 49.53 34.29) (xy 53.34 34.29)
		)
	)
	(wire
		(pts
			(xy 119.38 153.67) (xy 116.84 153.67)
		)
	)
	(wire
		(pts
			(xy 85.09 223.52) (xy 91.44 223.52)
		)
	)
	(wire
		(pts
			(xy 148.59 48.26) (xy 148.59 34.29)
		)
	)
	(wire
		(pts
			(xy 139.7 137.16) (xy 139.7 139.7)
		)
	)
	(wire
		(pts
			(xy 106.68 31.75) (xy 106.68 34.29)
		)
	)
	(wire
		(pts
			(xy 236.22 184.15) (xy 236.22 185.42)
		)
	)
	(wire
		(pts
			(xy 17.78 60.96) (xy 19.05 60.96)
		)
	)
	(wire
		(pts
			(xy 86.36 71.12) (xy 88.9 71.12)
		)
	)
	(wire
		(pts
			(xy 31.75 104.14) (xy 35.56 104.14)
		)
	)
	(wire
		(pts
			(xy 246.38 50.8) (xy 246.38 34.29)
		)
	)
	(wire
		(pts
			(xy 85.09 153.67) (xy 85.09 156.21)
		)
	)
	(wire
		(pts
			(xy 147.32 34.29) (xy 148.59 34.29)
		)
	)
	(wire
		(pts
			(xy 114.3 190.5) (xy 113.03 190.5)
		)
	)
	(wire
		(pts
			(xy 63.5 48.26) (xy 63.5 34.29)
		)
	)
	(wire
		(pts
			(xy 120.65 234.95) (xy 120.65 237.49)
		)
	)
	(wire
		(pts
			(xy 219.71 184.15) (xy 219.71 185.42)
		)
	)
	(wire
		(pts
			(xy 31.75 106.68) (xy 35.56 106.68)
		)
	)
	(wire
		(pts
			(xy 232.41 48.26) (xy 232.41 34.29)
		)
	)
	(wire
		(pts
			(xy 63.5 34.29) (xy 64.77 34.29)
		)
	)
	(wire
		(pts
			(xy 120.65 186.69) (xy 120.65 187.96)
		)
	)
	(wire
		(pts
			(xy 189.23 81.28) (xy 189.23 86.36)
		)
	)
	(wire
		(pts
			(xy 82.55 73.66) (xy 88.9 73.66)
		)
	)
	(wire
		(pts
			(xy 86.36 153.67) (xy 85.09 153.67)
		)
	)
	(wire
		(pts
			(xy 259.08 222.25) (xy 259.08 223.52)
		)
	)
	(wire
		(pts
			(xy 113.03 187.96) (xy 120.65 187.96)
		)
	)
	(wire
		(pts
			(xy 86.36 34.29) (xy 86.36 43.18)
		)
	)
	(wire
		(pts
			(xy 135.89 34.29) (xy 137.16 34.29)
		)
	)
	(wire
		(pts
			(xy 207.01 48.26) (xy 232.41 48.26)
		)
	)
	(wire
		(pts
			(xy 31.75 109.22) (xy 35.56 109.22)
		)
	)
	(wire
		(pts
			(xy 125.73 34.29) (xy 128.27 34.29)
		)
	)
	(wire
		(pts
			(xy 137.16 45.72) (xy 171.45 45.72)
		)
	)
	(wire
		(pts
			(xy 83.82 198.12) (xy 83.82 201.93)
		)
	)
	(wire
		(pts
			(xy 60.96 34.29) (xy 63.5 34.29)
		)
	)
	(wire
		(pts
			(xy 314.96 193.04) (xy 314.96 194.31)
		)
	)
	(wire
		(pts
			(xy 39.37 60.96) (xy 88.9 60.96)
		)
	)
	(wire
		(pts
			(xy 124.46 53.34) (xy 171.45 53.34)
		)
	)
	(wire
		(pts
			(xy 17.78 52.07) (xy 17.78 60.96)
		)
	)
	(wire
		(pts
			(xy 170.18 71.12) (xy 171.45 71.12)
		)
	)
	(wire
		(pts
			(xy 71.12 53.34) (xy 88.9 53.34)
		)
	)
	(wire
		(pts
			(xy 31.75 68.58) (xy 31.75 69.85)
		)
	)
	(wire
		(pts
			(xy 83.82 186.69) (xy 83.82 187.96)
		)
	)
	(wire
		(pts
			(xy 162.56 34.29) (xy 158.75 34.29)
		)
	)
	(wire
		(pts
			(xy 114.3 223.52) (xy 120.65 223.52)
		)
	)
	(wire
		(pts
			(xy 83.82 187.96) (xy 83.82 190.5)
		)
	)
	(wire
		(pts
			(xy 125.73 43.18) (xy 125.73 34.29)
		)
	)
	(wire
		(pts
			(xy 119.38 153.67) (xy 119.38 156.21)
		)
	)
	(wire
		(pts
			(xy 31.75 111.76) (xy 35.56 111.76)
		)
	)
	(wire
		(pts
			(xy 213.36 193.04) (xy 213.36 194.31)
		)
	)
	(wire
		(pts
			(xy 106.68 34.29) (xy 106.68 38.1)
		)
	)
	(wire
		(pts
			(xy 43.18 72.39) (xy 43.18 74.93)
		)
	)
	(wire
		(pts
			(xy 207.01 45.72) (xy 220.98 45.72)
		)
	)
	(wire
		(pts
			(xy 278.13 185.42) (xy 278.13 184.15)
		)
	)
	(wire
		(pts
			(xy 83.82 187.96) (xy 91.44 187.96)
		)
	)
	(wire
		(pts
			(xy 124.46 45.72) (xy 137.16 45.72)
		)
	)
	(wire
		(pts
			(xy 86.36 140.97) (xy 76.2 140.97)
		)
	)
	(wire
		(pts
			(xy 209.55 43.18) (xy 209.55 34.29)
		)
	)
	(wire
		(pts
			(xy 278.13 231.14) (xy 278.13 232.41)
		)
	)
	(wire
		(pts
			(xy 124.46 71.12) (xy 125.73 71.12)
		)
	)
	(wire
		(pts
			(xy 137.16 34.29) (xy 139.7 34.29)
		)
	)
	(wire
		(pts
			(xy 139.7 147.32) (xy 139.7 149.86)
		)
	)
	(wire
		(pts
			(xy 246.38 34.29) (xy 242.57 34.29)
		)
	)
	(wire
		(pts
			(xy 214.63 231.14) (xy 214.63 232.41)
		)
	)
	(wire
		(pts
			(xy 278.13 222.25) (xy 278.13 223.52)
		)
	)
	(wire
		(pts
			(xy 162.56 50.8) (xy 170.18 50.8)
		)
	)
	(label "I_BI"
		(at 118.11 138.43 0)
		(fields_autoplaced yes)
	)
	(label "I_NRSTI"
		(at 118.11 135.89 0)
		(fields_autoplaced yes)
	)
	(label "I_NRSTI"
		(at 71.12 53.34 0)
		(fields_autoplaced yes)
	)
	(label "I_CI"
		(at 118.11 133.35 0)
		(fields_autoplaced yes)
	)
	(label "I_BI"
		(at 71.12 55.88 0)
		(fields_autoplaced yes)
	)
	(label "CLKI"
		(at 71.12 60.96 0)
		(fields_autoplaced yes)
	)
	(label "I_RO"
		(at 118.11 140.97 0)
		(fields_autoplaced yes)
	)
	(label "I_RO"
		(at 71.12 58.42 0)
		(fields_autoplaced yes)
	)
	(label "I_CI"
		(at 71.12 63.5 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "GND_OUT"
		(shape output)
		(at 31.75 114.3 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "NRSTI"
		(shape input)
		(at 76.2 135.89 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "+1.8V_OUT"
		(shape output)
		(at 31.75 111.76 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "V_IF"
		(shape input)
		(at 31.75 106.68 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "GND_IF"
		(shape input)
		(at 31.75 109.22 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "CI"
		(shape input)
		(at 76.2 133.35 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "NRSTO"
		(shape output)
		(at 125.73 135.89 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "RO"
		(shape output)
		(at 76.2 140.97 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "BI"
		(shape input)
		(at 76.2 138.43 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "GND"
		(shape passive)
		(at 31.75 104.14 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "+1V2"
		(shape passive)
		(at 31.75 101.6 180)
		(fields_autoplaced yes)
	)
	(symbol
		(lib_id "power:GND")
		(at 236.22 194.31 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08049"
			(at 236.22 200.66 0)
		)
		(property "Value" "GND"
			(at 236.22 198.755 0)
		)
		(property "Footprint" ""
			(at 236.22 194.31 0)
		)
		(property "Datasheet" ""
			(at 236.22 194.31 0)
		)
		(property "Description" ""
			(at 236.22 194.31 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08049")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0538")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 278.13 194.31 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08078"
			(at 278.13 200.66 0)
		)
		(property "Value" "GND"
			(at 278.13 198.755 0)
		)
		(property "Footprint" ""
			(at 278.13 194.31 0)
		)
		(property "Datasheet" ""
			(at 278.13 194.31 0)
		)
		(property "Description" ""
			(at 278.13 194.31 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08078")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0567")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 287.02 227.33 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C42"
			(at 285.75 226.06 90)
		)
		(property "Value" "330µ/4V"
			(at 290.83 231.14 90)
		)
		(property "Footprint" "Capacitor_SMD:C_1210_3225Metric"
			(at 287.9852 231.14 0)
		)
		(property "Datasheet" "~"
			(at 287.02 227.33 0)
		)
		(property "Description" ""
			(at 287.02 227.33 0)
		)
		(property "Distributor" "D"
			(at 287.02 227.33 0)
		)
		(property "Manufacturer" "GRM32ER60G337ME05K"
			(at 287.02 227.33 0)
		)
		(property "OrderNr" "490-GRM32ER60G337ME05KCT-ND"
			(at 287.02 227.33 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C42")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C259")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 219.71 194.31 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08039"
			(at 219.71 200.66 0)
		)
		(property "Value" "GND"
			(at 219.71 198.755 0)
		)
		(property "Footprint" ""
			(at 219.71 194.31 0)
		)
		(property "Datasheet" ""
			(at 219.71 194.31 0)
		)
		(property "Description" ""
			(at 219.71 194.31 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08039")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0530")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 68.58 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5"
			(at 66.04 31.75 90)
		)
		(property "Value" "1µ"
			(at 67.31 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 68.58 34.29 0)
		)
		(property "Datasheet" ""
			(at 68.58 34.29 0)
		)
		(property "Description" ""
			(at 68.58 34.29 0)
		)
		(property "DK" ""
			(at 68.58 34.29 0)
		)
		(property "PARTNO" ""
			(at 68.58 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 68.58 34.29 0)
		)
		(property "Distributor" "D"
			(at 68.58 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 68.58 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C5")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C222")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 314.96 189.23 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C49"
			(at 316.23 187.325 0)
		)
		(property "Value" "1µ"
			(at 316.23 192.405 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 314.96 189.23 0)
		)
		(property "Datasheet" ""
			(at 314.96 189.23 0)
		)
		(property "Description" ""
			(at 314.96 189.23 0)
		)
		(property "DK" ""
			(at 314.96 189.23 0)
		)
		(property "PARTNO" ""
			(at 314.96 189.23 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 314.96 189.23 0)
		)
		(property "Distributor" "D"
			(at 314.96 189.23 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 314.96 189.23 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C49")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C266")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 57.15 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C4"
			(at 54.61 31.75 90)
		)
		(property "Value" "1µ"
			(at 55.88 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 57.15 34.29 0)
		)
		(property "Datasheet" ""
			(at 57.15 34.29 0)
		)
		(property "Description" ""
			(at 57.15 34.29 0)
		)
		(property "DK" ""
			(at 57.15 34.29 0)
		)
		(property "PARTNO" ""
			(at 57.15 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 57.15 34.29 0)
		)
		(property "Distributor" "D"
			(at 57.15 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 57.15 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C4")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C221")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_3")
		(at 213.36 184.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U10"
			(at 217.17 182.88 0)
		)
		(property "Value" "+0V8"
			(at 213.36 180.975 90)
		)
		(property "Footprint" ""
			(at 213.36 184.15 0)
		)
		(property "Datasheet" ""
			(at 213.36 184.15 0)
		)
		(property "Description" ""
			(at 213.36 184.15 0)
		)
		(property "Distributor" "-"
			(at 213.36 184.15 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "U10")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U96")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_3")
		(at 35.56 111.76 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08017"
			(at 31.75 111.76 0)
		)
		(property "Value" "+1V8_3"
			(at 38.735 111.76 90)
		)
		(property "Footprint" ""
			(at 35.56 111.76 0)
		)
		(property "Datasheet" ""
			(at 35.56 111.76 0)
		)
		(property "Description" ""
			(at 35.56 111.76 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08017")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0492")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_3")
		(at 236.22 184.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U14"
			(at 240.03 182.88 0)
		)
		(property "Value" "+0V8"
			(at 236.22 180.975 90)
		)
		(property "Footprint" ""
			(at 236.22 184.15 0)
		)
		(property "Datasheet" ""
			(at 236.22 184.15 0)
		)
		(property "Description" ""
			(at 236.22 184.15 0)
		)
		(property "Distributor" "-"
			(at 236.22 184.15 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "U14")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U100")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_3")
		(at 219.71 184.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U11"
			(at 223.52 182.88 0)
		)
		(property "Value" "+0V8"
			(at 219.71 180.975 90)
		)
		(property "Footprint" ""
			(at 219.71 184.15 0)
		)
		(property "Datasheet" ""
			(at 219.71 184.15 0)
		)
		(property "Description" ""
			(at 219.71 184.15 0)
		)
		(property "Distributor" "-"
			(at 219.71 184.15 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "U11")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U97")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:BM1366_mode1")
		(at 189.23 60.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U26"
			(at 191.4241 36.195 0)
		)
		(property "Value" "BM1366_mode1"
			(at 191.4241 38.735 0)
		)
		(property "Footprint" "0xaxe:BM1366"
			(at 181.61 60.96 0)
		)
		(property "Datasheet" ""
			(at 181.61 60.96 0)
		)
		(property "Description" ""
			(at 189.23 60.96 0)
		)
		(property "Distributor" "-"
			(at 189.23 60.96 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "17")
		(pin "18")
		(pin "19")
		(pin "2")
		(pin "20")
		(pin "21")
		(pin "22")
		(pin "23")
		(pin "24")
		(pin "25")
		(pin "26")
		(pin "27")
		(pin "28")
		(pin "29")
		(pin "3")
		(pin "30")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "flex4"
				(path
					(reference "U26")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U111")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 201.93 227.33 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C13"
			(at 202.565 225.425 0)
		)
		(property "Value" "10µ/16V"
			(at 203.2 231.14 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 201.93 227.33 0)
		)
		(property "Datasheet" ""
			(at 201.93 227.33 0)
		)
		(property "Description" ""
			(at 201.93 227.33 0)
		)
		(property "DK" ""
			(at 201.93 227.33 0)
		)
		(property "PARTNO" ""
			(at 201.93 227.33 0)
		)
		(property "Manufacturer" "GRT188R61C106KE13D"
			(at 201.93 227.33 0)
		)
		(property "Distributor" "D"
			(at 201.93 227.33 0)
		)
		(property "OrderNr" "490-12317-1-ND"
			(at 201.93 227.33 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C13")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C230")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 318.77 229.87 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#FLG08003"
			(at 318.77 227.965 0)
		)
		(property "Value" "PWR_FLAG"
			(at 316.865 225.425 0)
		)
		(property "Footprint" ""
			(at 318.77 229.87 0)
		)
		(property "Datasheet" "~"
			(at 318.77 229.87 0)
		)
		(property "Description" ""
			(at 318.77 229.87 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#FLG08003")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG026")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_IF_3")
		(at 35.56 109.22 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0372"
			(at 41.91 109.22 0)
		)
		(property "Value" "GND_IF_3"
			(at 39.37 109.2199 90)
		)
		(property "Footprint" ""
			(at 35.56 109.22 0)
		)
		(property "Datasheet" ""
			(at 35.56 109.22 0)
		)
		(property "Description" ""
			(at 35.56 109.22 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0372")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_7")
		(lib_id "power:GND")
		(at 259.08 232.41 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08066"
			(at 259.08 238.76 0)
		)
		(property "Value" "GND"
			(at 259.08 237.49 0)
		)
		(property "Footprint" ""
			(at 259.08 232.41 0)
		)
		(property "Datasheet" ""
			(at 259.08 232.41 0)
		)
		(property "Description" ""
			(at 259.08 232.41 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08066")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0553")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_3")
		(lib_id "power:GND")
		(at 31.75 69.85 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08002"
			(at 31.75 76.2 0)
		)
		(property "Value" "GND"
			(at 31.75 74.93 0)
		)
		(property "Footprint" ""
			(at 31.75 69.85 0)
		)
		(property "Datasheet" ""
			(at 31.75 69.85 0)
		)
		(property "Description" ""
			(at 31.75 69.85 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08002")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0495")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_3")
		(at 287.02 222.25 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08085"
			(at 287.02 226.06 0)
		)
		(property "Value" "+1V2_3"
			(at 287.02 217.805 0)
		)
		(property "Footprint" ""
			(at 287.02 222.25 0)
		)
		(property "Datasheet" ""
			(at 287.02 222.25 0)
		)
		(property "Description" ""
			(at 287.02 222.25 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08085")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0572")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 120.65 195.58 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C158"
			(at 121.92 193.675 0)
		)
		(property "Value" "1µ"
			(at 122.555 199.39 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 120.65 195.58 0)
		)
		(property "Datasheet" ""
			(at 120.65 195.58 0)
		)
		(property "Description" ""
			(at 120.65 195.58 0)
		)
		(property "DK" ""
			(at 120.65 195.58 0)
		)
		(property "PARTNO" ""
			(at 120.65 195.58 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 120.65 195.58 0)
		)
		(property "Distributor" "D"
			(at 120.65 195.58 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 120.65 195.58 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "C158")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+6.5V")
		(at 83.82 186.69 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0272"
			(at 83.82 190.5 0)
		)
		(property "Value" "+6.5V"
			(at 83.82 181.61 0)
		)
		(property "Footprint" ""
			(at 83.82 186.69 0)
		)
		(property "Datasheet" ""
			(at 83.82 186.69 0)
		)
		(property "Description" ""
			(at 83.82 186.69 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0272")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 238.76 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C61"
			(at 236.22 31.75 90)
		)
		(property "Value" "1µ"
			(at 237.49 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 238.76 34.29 0)
		)
		(property "Datasheet" ""
			(at 238.76 34.29 0)
		)
		(property "Description" ""
			(at 238.76 34.29 0)
		)
		(property "DK" ""
			(at 238.76 34.29 0)
		)
		(property "PARTNO" ""
			(at 238.76 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 238.76 34.29 0)
		)
		(property "Distributor" "D"
			(at 238.76 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 238.76 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C61")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C277")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 345.44 229.87 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#FLG08005"
			(at 345.44 227.965 0)
		)
		(property "Value" "PWR_FLAG"
			(at 342.9 225.425 0)
		)
		(property "Footprint" ""
			(at 345.44 229.87 0)
		)
		(property "Datasheet" "~"
			(at 345.44 229.87 0)
		)
		(property "Description" ""
			(at 345.44 229.87 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#FLG08005")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG028")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 285.75 189.23 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C41"
			(at 287.02 187.325 0)
		)
		(property "Value" "1µ"
			(at 287.02 192.405 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 285.75 189.23 0)
		)
		(property "Datasheet" ""
			(at 285.75 189.23 0)
		)
		(property "Description" ""
			(at 285.75 189.23 0)
		)
		(property "DK" ""
			(at 285.75 189.23 0)
		)
		(property "PARTNO" ""
			(at 285.75 189.23 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 285.75 189.23 0)
		)
		(property "Distributor" "D"
			(at 285.75 189.23 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 285.75 189.23 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C41")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C258")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_1")
		(lib_id "power:GND")
		(at 35.56 114.3 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08018"
			(at 41.91 114.3 0)
		)
		(property "Value" "GND"
			(at 38.735 114.3 90)
		)
		(property "Footprint" ""
			(at 35.56 114.3 0)
		)
		(property "Datasheet" ""
			(at 35.56 114.3 0)
		)
		(property "Description" ""
			(at 35.56 114.3 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08018")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0493")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 120.65 237.49 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08014"
			(at 120.65 243.84 0)
		)
		(property "Value" "GND"
			(at 120.65 241.935 0)
		)
		(property "Footprint" ""
			(at 120.65 237.49 0)
		)
		(property "Datasheet" ""
			(at 120.65 237.49 0)
		)
		(property "Description" ""
			(at 120.65 237.49 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08014")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0507")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_3")
		(at 106.68 31.75 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08024"
			(at 106.68 35.56 0)
		)
		(property "Value" "+1V2_3"
			(at 106.68 27.305 0)
		)
		(property "Footprint" ""
			(at 106.68 31.75 0)
		)
		(property "Datasheet" ""
			(at 106.68 31.75 0)
		)
		(property "Description" ""
			(at 106.68 31.75 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08024")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0517")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+V_IF_3")
		(at 146.05 137.16 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0338"
			(at 146.05 140.97 0)
		)
		(property "Value" "+V_IF_3"
			(at 146.05 132.08 0)
		)
		(property "Footprint" ""
			(at 146.05 137.16 0)
		)
		(property "Datasheet" ""
			(at 146.05 137.16 0)
		)
		(property "Description" ""
			(at 146.05 137.16 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0338")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_3")
		(at 285.75 184.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR08083"
			(at 285.75 187.96 0)
		)
		(property "Value" "+1V8_3"
			(at 285.75 179.07 0)
		)
		(property "Footprint" ""
			(at 285.75 184.15 0)
		)
		(property "Datasheet" ""
			(at 285.75 184.15 0)
		)
		(property "Description" ""
			(at 285.75 184.15 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08083")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0570")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:NCP114-SN")
		(at 104.14 226.06 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U4"
			(at 104.14 216.535 0)
		)
		(property "Value" "NCP114ASN080T1G"
			(at 104.14 219.075 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5"
			(at 104.14 226.06 0)
		)
		(property "Datasheet" ""
			(at 104.14 226.06 0)
		)
		(property "Description" ""
			(at 104.14 226.06 0)
		)
		(property "Distributor" "D"
			(at 104.14 226.06 0)
		)
		(property "Manufacturer" "NCP114ASN080T1G"
			(at 104.14 226.06 0)
		)
		(property "OrderNr" "488-NCP114ASN080T1GCT-ND"
			(at 104.14 226.06 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "5")
		(instances
			(project "flex4"
				(path
					(reference "U4")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U90")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+V_IF_3")
		(at 85.09 125.73 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0337"
			(at 85.09 129.54 0)
		)
		(property "Value" "+V_IF_3"
			(at 85.09 120.65 0)
		)
		(property "Footprint" ""
			(at 85.09 125.73 0)
		)
		(property "Datasheet" ""
			(at 85.09 125.73 0)
		)
		(property "Description" ""
			(at 85.09 125.73 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0337")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_3")
		(at 214.63 222.25 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08037"
			(at 214.63 226.06 0)
		)
		(property "Value" "+1V2_3"
			(at 214.63 217.805 0)
		)
		(property "Footprint" ""
			(at 214.63 222.25 0)
		)
		(property "Datasheet" ""
			(at 214.63 222.25 0)
		)
		(property "Description" ""
			(at 214.63 222.25 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08037")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0528")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_3")
		(at 166.37 76.2 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR08118"
			(at 170.18 76.2 0)
		)
		(property "Value" "+1V8_3"
			(at 161.29 76.2 0)
		)
		(property "Footprint" ""
			(at 166.37 76.2 0)
		)
		(property "Datasheet" ""
			(at 166.37 76.2 0)
		)
		(property "Description" ""
			(at 166.37 76.2 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08118")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0599")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_7")
		(lib_id "power:GND")
		(at 229.87 232.41 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08045"
			(at 229.87 238.76 0)
		)
		(property "Value" "GND"
			(at 229.87 237.49 0)
		)
		(property "Footprint" ""
			(at 229.87 232.41 0)
		)
		(property "Datasheet" ""
			(at 229.87 232.41 0)
		)
		(property "Description" ""
			(at 229.87 232.41 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08045")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0535")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 293.37 194.31 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08090"
			(at 293.37 200.66 0)
		)
		(property "Value" "GND"
			(at 293.37 198.755 0)
		)
		(property "Footprint" ""
			(at 293.37 194.31 0)
		)
		(property "Datasheet" ""
			(at 293.37 194.31 0)
		)
		(property "Description" ""
			(at 293.37 194.31 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08090")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0577")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_3")
		(at 120.65 186.69 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0386"
			(at 120.65 190.5 0)
		)
		(property "Value" "+1V8_3"
			(at 120.65 181.61 0)
		)
		(property "Footprint" ""
			(at 120.65 186.69 0)
		)
		(property "Datasheet" ""
			(at 120.65 186.69 0)
		)
		(property "Description" ""
			(at 120.65 186.69 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0386")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 170.18 86.36 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08119"
			(at 170.18 92.71 0)
		)
		(property "Value" "GND"
			(at 170.18 90.805 0)
		)
		(property "Footprint" ""
			(at 170.18 86.36 0)
		)
		(property "Datasheet" ""
			(at 170.18 86.36 0)
		)
		(property "Description" ""
			(at 170.18 86.36 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08119")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0600")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_8")
		(lib_id "power:GND")
		(at 373.38 229.87 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08110"
			(at 373.38 236.22 0)
		)
		(property "Value" "GND"
			(at 373.38 234.315 0)
		)
		(property "Footprint" ""
			(at 373.38 229.87 0)
		)
		(property "Datasheet" ""
			(at 373.38 229.87 0)
		)
		(property "Description" ""
			(at 373.38 229.87 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08110")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0596")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_3")
		(at 35.56 101.6 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08024"
			(at 31.75 101.6 0)
		)
		(property "Value" "+1V2_3"
			(at 38.735 101.6 90)
		)
		(property "Footprint" ""
			(at 35.56 101.6 0)
		)
		(property "Datasheet" ""
			(at 35.56 101.6 0)
		)
		(property "Description" ""
			(at 35.56 101.6 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08024")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0488")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 177.8 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C57"
			(at 171.45 31.75 90)
		)
		(property "Value" "1µ"
			(at 172.72 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 177.8 34.29 0)
		)
		(property "Datasheet" ""
			(at 177.8 34.29 0)
		)
		(property "Description" ""
			(at 177.8 34.29 0)
		)
		(property "DK" ""
			(at 177.8 34.29 0)
		)
		(property "PARTNO" ""
			(at 177.8 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 177.8 34.29 0)
		)
		(property "Distributor" "D"
			(at 177.8 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 177.8 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C57")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C273")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_IF_3")
		(at 85.09 156.21 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0373"
			(at 85.09 162.56 0)
		)
		(property "Value" "GND_IF_3"
			(at 85.09 161.29 0)
		)
		(property "Footprint" ""
			(at 85.09 156.21 0)
		)
		(property "Datasheet" ""
			(at 85.09 156.21 0)
		)
		(property "Description" ""
			(at 85.09 156.21 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0373")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+V_IF")
		(at 325.12 229.87 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR08101"
			(at 325.12 233.68 0)
		)
		(property "Value" "+V_IF"
			(at 325.755 225.425 0)
		)
		(property "Footprint" ""
			(at 325.12 229.87 0)
		)
		(property "Datasheet" ""
			(at 325.12 229.87 0)
		)
		(property "Description" ""
			(at 325.12 229.87 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08101")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0588")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 373.38 229.87 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#FLG08007"
			(at 373.38 227.965 0)
		)
		(property "Value" "PWR_FLAG"
			(at 373.38 226.06 0)
		)
		(property "Footprint" ""
			(at 373.38 229.87 0)
		)
		(property "Datasheet" "~"
			(at 373.38 229.87 0)
		)
		(property "Description" ""
			(at 373.38 229.87 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#FLG08007")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG030")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 139.7 149.86 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR08023"
			(at 139.7 156.21 0)
		)
		(property "Value" "GND"
			(at 139.065 154.305 0)
		)
		(property "Footprint" ""
			(at 139.7 149.86 0)
		)
		(property "Datasheet" ""
			(at 139.7 149.86 0)
		)
		(property "Description" ""
			(at 139.7 149.86 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08023")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0516")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_3")
		(at 213.36 76.2 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR08123"
			(at 209.55 76.2 0)
		)
		(property "Value" "+1V8_3"
			(at 218.44 76.2 0)
		)
		(property "Footprint" ""
			(at 213.36 76.2 0)
		)
		(property "Datasheet" ""
			(at 213.36 76.2 0)
		)
		(property "Description" ""
			(at 213.36 76.2 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08123")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0604")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_5")
		(lib_id "power:GND")
		(at 120.65 201.93 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0273"
			(at 120.65 208.28 0)
		)
		(property "Value" "GND"
			(at 120.65 207.01 0)
		)
		(property "Footprint" ""
			(at 120.65 201.93 0)
		)
		(property "Datasheet" ""
			(at 120.65 201.93 0)
		)
		(property "Description" ""
			(at 120.65 201.93 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0273")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_3")
		(at 166.37 73.66 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U25"
			(at 165.1 69.85 0)
		)
		(property "Value" "+0V8"
			(at 163.195 73.66 90)
		)
		(property "Footprint" ""
			(at 166.37 73.66 0)
		)
		(property "Datasheet" ""
			(at 166.37 73.66 0)
		)
		(property "Description" ""
			(at 166.37 73.66 0)
		)
		(property "Distributor" "-"
			(at 166.37 73.66 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "U25")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U110")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_3")
		(at 213.36 73.66 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U27"
			(at 214.63 77.47 0)
		)
		(property "Value" "+0V8"
			(at 216.535 73.66 90)
		)
		(property "Footprint" ""
			(at 213.36 73.66 0)
		)
		(property "Datasheet" ""
			(at 213.36 73.66 0)
		)
		(property "Description" ""
			(at 213.36 73.66 0)
		)
		(property "Distributor" "-"
			(at 213.36 73.66 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "U27")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U112")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_3")
		(at 120.65 222.25 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U6"
			(at 124.46 220.98 0)
		)
		(property "Value" "+0V8"
			(at 120.65 219.075 90)
		)
		(property "Footprint" ""
			(at 120.65 222.25 0)
		)
		(property "Datasheet" ""
			(at 120.65 222.25 0)
		)
		(property "Description" ""
			(at 120.65 222.25 0)
		)
		(property "Distributor" "-"
			(at 120.65 222.25 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "U6")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U92")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 242.57 227.33 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C28"
			(at 243.205 225.425 0)
		)
		(property "Value" "1µ"
			(at 243.84 231.14 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 242.57 227.33 0)
		)
		(property "Datasheet" ""
			(at 242.57 227.33 0)
		)
		(property "Description" ""
			(at 242.57 227.33 0)
		)
		(property "DK" ""
			(at 242.57 227.33 0)
		)
		(property "PARTNO" ""
			(at 242.57 227.33 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 242.57 227.33 0)
		)
		(property "Distributor" "D"
			(at 242.57 227.33 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 242.57 227.33 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C28")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C245")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_3")
		(at 43.18 72.39 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08007"
			(at 43.18 76.2 0)
		)
		(property "Value" "+1V8_3"
			(at 43.18 67.31 0)
		)
		(property "Footprint" ""
			(at 43.18 72.39 0)
		)
		(property "Datasheet" ""
			(at 43.18 72.39 0)
		)
		(property "Description" ""
			(at 43.18 72.39 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08007")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0500")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+V_IF_3")
		(at 35.56 106.68 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0323"
			(at 31.75 106.68 0)
		)
		(property "Value" "+V_IF_3"
			(at 39.37 106.6799 90)
		)
		(property "Footprint" ""
			(at 35.56 106.68 0)
		)
		(property "Datasheet" ""
			(at 35.56 106.68 0)
		)
		(property "Description" ""
			(at 35.56 106.68 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0323")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 314.96 194.31 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08099"
			(at 314.96 200.66 0)
		)
		(property "Value" "GND"
			(at 314.96 198.755 0)
		)
		(property "Footprint" ""
			(at 314.96 194.31 0)
		)
		(property "Datasheet" ""
			(at 314.96 194.31 0)
		)
		(property "Description" ""
			(at 314.96 194.31 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08099")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0586")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 287.02 232.41 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR08086"
			(at 287.02 238.76 0)
		)
		(property "Value" "GND"
			(at 287.02 237.49 0)
		)
		(property "Footprint" ""
			(at 287.02 232.41 0)
		)
		(property "Datasheet" ""
			(at 287.02 232.41 0)
		)
		(property "Description" ""
			(at 287.02 232.41 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08086")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0573")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_EXT")
		(at 345.44 229.87 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR08104"
			(at 345.44 236.22 0)
		)
		(property "Value" "GND_EXT"
			(at 343.535 234.315 0)
		)
		(property "Footprint" ""
			(at 345.44 229.87 0)
		)
		(property "Datasheet" ""
			(at 345.44 229.87 0)
		)
		(property "Description" ""
			(at 345.44 229.87 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08104")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0591")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_5")
		(lib_id "power:GND")
		(at 83.82 201.93 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0379"
			(at 83.82 208.28 0)
		)
		(property "Value" "GND"
			(at 83.82 207.01 0)
		)
		(property "Footprint" ""
			(at 83.82 201.93 0)
		)
		(property "Datasheet" ""
			(at 83.82 201.93 0)
		)
		(property "Description" ""
			(at 83.82 201.93 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0379")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 214.63 227.33 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C17"
			(at 215.265 225.425 0)
		)
		(property "Value" "10µ/16V"
			(at 215.9 231.14 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 214.63 227.33 0)
		)
		(property "Datasheet" ""
			(at 214.63 227.33 0)
		)
		(property "Description" ""
			(at 214.63 227.33 0)
		)
		(property "DK" ""
			(at 214.63 227.33 0)
		)
		(property "PARTNO" ""
			(at 214.63 227.33 0)
		)
		(property "Manufacturer" "GRT188R61C106KE13D"
			(at 214.63 227.33 0)
		)
		(property "Distributor" "D"
			(at 214.63 227.33 0)
		)
		(property "OrderNr" "490-12317-1-ND"
			(at 214.63 227.33 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C17")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C234")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_3")
		(at 85.09 220.98 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08005"
			(at 85.09 224.79 0)
		)
		(property "Value" "+1V8_3"
			(at 85.09 215.9 0)
		)
		(property "Footprint" ""
			(at 85.09 220.98 0)
		)
		(property "Datasheet" ""
			(at 85.09 220.98 0)
		)
		(property "Description" ""
			(at 85.09 220.98 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08005")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0498")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Oscillator:ASDMB-xxxMHz")
		(at 29.21 60.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U2"
			(at 25.4 54.61 0)
		)
		(property "Value" "25MHz"
			(at 25.4 67.31 0)
		)
		(property "Footprint" "Oscillator:Oscillator_SMD_EuroQuartz_XO32-4Pin_3.2x2.5mm"
			(at 29.21 60.96 0)
		)
		(property "Datasheet" "https://abracon.com/Oscillators/ASDMB.pdf"
			(at 36.83 49.53 0)
		)
		(property "Description" ""
			(at 29.21 60.96 0)
		)
		(property "Distributor" "D"
			(at 29.21 60.96 0)
		)
		(property "OrderNr" "50-ECS-TXO-3225MV-250-CT-ND"
			(at 29.21 60.96 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(instances
			(project "flex4"
				(path
					(reference "U2")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U88")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_2")
		(lib_id "power:GND")
		(at 43.18 82.55 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08008"
			(at 43.18 88.9 0)
		)
		(property "Value" "GND"
			(at 43.18 87.63 0)
		)
		(property "Footprint" ""
			(at 43.18 82.55 0)
		)
		(property "Datasheet" ""
			(at 43.18 82.55 0)
		)
		(property "Description" ""
			(at 43.18 82.55 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08008")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0501")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 86.36 86.36 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08020"
			(at 86.36 92.71 0)
		)
		(property "Value" "GND"
			(at 86.36 90.805 0)
		)
		(property "Footprint" ""
			(at 86.36 86.36 0)
		)
		(property "Datasheet" ""
			(at 86.36 86.36 0)
		)
		(property "Description" ""
			(at 86.36 86.36 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08020")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0513")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_3")
		(at 293.37 184.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR08089"
			(at 293.37 187.96 0)
		)
		(property "Value" "+1V8_3"
			(at 293.37 179.07 0)
		)
		(property "Footprint" ""
			(at 293.37 184.15 0)
		)
		(property "Datasheet" ""
			(at 293.37 184.15 0)
		)
		(property "Description" ""
			(at 293.37 184.15 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08089")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0576")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 278.13 189.23 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C38"
			(at 279.4 187.325 0)
		)
		(property "Value" "1µ"
			(at 279.4 192.405 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 278.13 189.23 0)
		)
		(property "Datasheet" ""
			(at 278.13 189.23 0)
		)
		(property "Description" ""
			(at 278.13 189.23 0)
		)
		(property "DK" ""
			(at 278.13 189.23 0)
		)
		(property "PARTNO" ""
			(at 278.13 189.23 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 278.13 189.23 0)
		)
		(property "Distributor" "D"
			(at 278.13 189.23 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 278.13 189.23 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C38")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C255")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 35.56 104.14 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08025"
			(at 41.91 104.14 0)
		)
		(property "Value" "GND"
			(at 38.735 104.14 90)
		)
		(property "Footprint" ""
			(at 35.56 104.14 0)
		)
		(property "Datasheet" ""
			(at 35.56 104.14 0)
		)
		(property "Description" ""
			(at 35.56 104.14 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08025")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0489")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 231.14 189.23 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C62"
			(at 228.6 191.77 90)
		)
		(property "Value" "1µ"
			(at 231.775 190.5 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 231.14 189.23 0)
		)
		(property "Datasheet" ""
			(at 231.14 189.23 0)
		)
		(property "Description" ""
			(at 231.14 189.23 0)
		)
		(property "DK" ""
			(at 231.14 189.23 0)
		)
		(property "PARTNO" ""
			(at 231.14 189.23 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 231.14 189.23 0)
		)
		(property "Distributor" "D"
			(at 231.14 189.23 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 231.14 189.23 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C62")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C240")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_3")
		(at 259.08 222.25 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08065"
			(at 259.08 226.06 0)
		)
		(property "Value" "+1V2_3"
			(at 259.08 217.805 0)
		)
		(property "Footprint" ""
			(at 259.08 222.25 0)
		)
		(property "Datasheet" ""
			(at 259.08 222.25 0)
		)
		(property "Description" ""
			(at 259.08 222.25 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08065")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0552")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_7")
		(lib_id "power:GND")
		(at 242.57 232.41 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08054"
			(at 242.57 238.76 0)
		)
		(property "Value" "GND"
			(at 242.57 237.49 0)
		)
		(property "Footprint" ""
			(at 242.57 232.41 0)
		)
		(property "Datasheet" ""
			(at 242.57 232.41 0)
		)
		(property "Description" ""
			(at 242.57 232.41 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08054")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0543")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 285.75 194.31 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08084"
			(at 285.75 200.66 0)
		)
		(property "Value" "GND"
			(at 285.75 198.755 0)
		)
		(property "Footprint" ""
			(at 285.75 194.31 0)
		)
		(property "Datasheet" ""
			(at 285.75 194.31 0)
		)
		(property "Description" ""
			(at 285.75 194.31 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08084")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0571")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 213.36 189.23 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C16"
			(at 210.82 191.77 90)
		)
		(property "Value" "1µ"
			(at 213.995 190.5 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 213.36 189.23 0)
		)
		(property "Datasheet" ""
			(at 213.36 189.23 0)
		)
		(property "Description" ""
			(at 213.36 189.23 0)
		)
		(property "DK" ""
			(at 213.36 189.23 0)
		)
		(property "PARTNO" ""
			(at 213.36 189.23 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 213.36 189.23 0)
		)
		(property "Distributor" "D"
			(at 213.36 189.23 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 213.36 189.23 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C16")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C233")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 154.94 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C26"
			(at 152.4 31.75 90)
		)
		(property "Value" "1µ"
			(at 153.67 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 154.94 34.29 0)
		)
		(property "Datasheet" ""
			(at 154.94 34.29 0)
		)
		(property "Description" ""
			(at 154.94 34.29 0)
		)
		(property "DK" ""
			(at 154.94 34.29 0)
		)
		(property "PARTNO" ""
			(at 154.94 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 154.94 34.29 0)
		)
		(property "Distributor" "D"
			(at 154.94 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 154.94 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C26")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C243")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 231.14 194.31 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08046"
			(at 231.14 200.66 0)
		)
		(property "Value" "GND"
			(at 231.14 198.755 0)
		)
		(property "Footprint" ""
			(at 231.14 194.31 0)
		)
		(property "Datasheet" ""
			(at 231.14 194.31 0)
		)
		(property "Description" ""
			(at 231.14 194.31 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08046")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0536")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 143.51 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C20"
			(at 140.97 31.75 90)
		)
		(property "Value" "1µ"
			(at 142.24 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 143.51 34.29 0)
		)
		(property "Datasheet" ""
			(at 143.51 34.29 0)
		)
		(property "Description" ""
			(at 143.51 34.29 0)
		)
		(property "DK" ""
			(at 143.51 34.29 0)
		)
		(property "PARTNO" ""
			(at 143.51 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 143.51 34.29 0)
		)
		(property "Distributor" "D"
			(at 143.51 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 143.51 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C20")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C237")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 325.12 229.87 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#FLG08004"
			(at 325.12 231.775 0)
		)
		(property "Value" "PWR_FLAG"
			(at 328.295 234.315 0)
		)
		(property "Footprint" ""
			(at 325.12 229.87 0)
		)
		(property "Datasheet" "~"
			(at 325.12 229.87 0)
		)
		(property "Description" ""
			(at 325.12 229.87 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#FLG08004")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG027")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 120.65 231.14 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6"
			(at 121.92 229.235 0)
		)
		(property "Value" "1µ"
			(at 121.92 234.95 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 120.65 231.14 0)
		)
		(property "Datasheet" ""
			(at 120.65 231.14 0)
		)
		(property "Description" ""
			(at 120.65 231.14 0)
		)
		(property "DK" ""
			(at 120.65 231.14 0)
		)
		(property "PARTNO" ""
			(at 120.65 231.14 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 120.65 231.14 0)
		)
		(property "Distributor" "D"
			(at 120.65 231.14 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 120.65 231.14 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C6")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C223")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 106.68 86.36 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08025"
			(at 106.68 92.71 0)
		)
		(property "Value" "GND"
			(at 106.68 90.805 0)
		)
		(property "Footprint" ""
			(at 106.68 86.36 0)
		)
		(property "Datasheet" ""
			(at 106.68 86.36 0)
		)
		(property "Description" ""
			(at 106.68 86.36 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08025")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0518")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_3")
		(at 242.57 222.25 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08053"
			(at 242.57 226.06 0)
		)
		(property "Value" "+1V2_3"
			(at 242.57 217.805 0)
		)
		(property "Footprint" ""
			(at 242.57 222.25 0)
		)
		(property "Datasheet" ""
			(at 242.57 222.25 0)
		)
		(property "Description" ""
			(at 242.57 222.25 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08053")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0542")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_3")
		(at 278.13 184.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR08077"
			(at 278.13 187.96 0)
		)
		(property "Value" "+1V8_3"
			(at 278.13 179.07 0)
		)
		(property "Footprint" ""
			(at 278.13 184.15 0)
		)
		(property "Datasheet" ""
			(at 278.13 184.15 0)
		)
		(property "Description" ""
			(at 278.13 184.15 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08077")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0566")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 132.08 34.29 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C15"
			(at 134.62 31.75 90)
		)
		(property "Value" "1µ"
			(at 133.35 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 132.08 34.29 0)
		)
		(property "Datasheet" ""
			(at 132.08 34.29 0)
		)
		(property "Description" ""
			(at 132.08 34.29 0)
		)
		(property "DK" ""
			(at 132.08 34.29 0)
		)
		(property "PARTNO" ""
			(at 132.08 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 132.08 34.29 0)
		)
		(property "Distributor" "D"
			(at 132.08 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 132.08 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C15")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C232")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_3")
		(at 149.86 76.2 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR08047"
			(at 149.86 72.39 0)
		)
		(property "Value" "+1V8_3"
			(at 149.86 81.28 0)
		)
		(property "Footprint" ""
			(at 149.86 76.2 0)
		)
		(property "Datasheet" ""
			(at 149.86 76.2 0)
		)
		(property "Description" ""
			(at 149.86 76.2 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08047")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0537")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_3")
		(at 201.93 222.25 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08029"
			(at 201.93 226.06 0)
		)
		(property "Value" "+1V2_3"
			(at 201.93 217.805 0)
		)
		(property "Footprint" ""
			(at 201.93 222.25 0)
		)
		(property "Datasheet" ""
			(at 201.93 222.25 0)
		)
		(property "Description" ""
			(at 201.93 222.25 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08029")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0521")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_3")
		(at 278.13 222.25 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08079"
			(at 278.13 226.06 0)
		)
		(property "Value" "+1V2_3"
			(at 278.13 217.805 0)
		)
		(property "Footprint" ""
			(at 278.13 222.25 0)
		)
		(property "Datasheet" ""
			(at 278.13 222.25 0)
		)
		(property "Description" ""
			(at 278.13 222.25 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08079")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0568")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_5")
		(lib_id "power:GND")
		(at 114.3 201.93 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0378"
			(at 114.3 208.28 0)
		)
		(property "Value" "GND"
			(at 114.3 207.01 0)
		)
		(property "Footprint" ""
			(at 114.3 201.93 0)
		)
		(property "Datasheet" ""
			(at 114.3 201.93 0)
		)
		(property "Description" ""
			(at 114.3 201.93 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0378")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 351.79 229.87 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#FLG08006"
			(at 351.79 231.775 0)
		)
		(property "Value" "PWR_FLAG"
			(at 354.965 234.315 0)
		)
		(property "Footprint" ""
			(at 351.79 229.87 0)
		)
		(property "Datasheet" "~"
			(at 351.79 229.87 0)
		)
		(property "Description" ""
			(at 351.79 229.87 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#FLG08006")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG029")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_7")
		(lib_id "power:GND")
		(at 214.63 232.41 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08038"
			(at 214.63 238.76 0)
		)
		(property "Value" "GND"
			(at 214.63 237.49 0)
		)
		(property "Footprint" ""
			(at 214.63 232.41 0)
		)
		(property "Datasheet" ""
			(at 214.63 232.41 0)
		)
		(property "Description" ""
			(at 214.63 232.41 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08038")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0529")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 96.52 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C9"
			(at 90.17 31.75 90)
		)
		(property "Value" "1µ"
			(at 91.44 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 96.52 34.29 0)
		)
		(property "Datasheet" ""
			(at 96.52 34.29 0)
		)
		(property "Description" ""
			(at 96.52 34.29 0)
		)
		(property "DK" ""
			(at 96.52 34.29 0)
		)
		(property "PARTNO" ""
			(at 96.52 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 96.52 34.29 0)
		)
		(property "Distributor" "D"
			(at 96.52 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 96.52 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C9")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C226")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 116.84 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C12"
			(at 113.665 31.75 90)
		)
		(property "Value" "1µ"
			(at 115.57 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 116.84 34.29 0)
		)
		(property "Datasheet" ""
			(at 116.84 34.29 0)
		)
		(property "Description" ""
			(at 116.84 34.29 0)
		)
		(property "DK" ""
			(at 116.84 34.29 0)
		)
		(property "PARTNO" ""
			(at 116.84 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 116.84 34.29 0)
		)
		(property "Distributor" "D"
			(at 116.84 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 116.84 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C12")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C229")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:BM1366_mode1")
		(at 106.68 60.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U8"
			(at 108.8741 36.195 0)
		)
		(property "Value" "BM1366_mode1"
			(at 108.8741 38.735 0)
		)
		(property "Footprint" "0xaxe:BM1366"
			(at 99.06 60.96 0)
		)
		(property "Datasheet" ""
			(at 99.06 60.96 0)
		)
		(property "Description" ""
			(at 106.68 60.96 0)
		)
		(property "Distributor" "-"
			(at 106.68 60.96 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "17")
		(pin "18")
		(pin "19")
		(pin "2")
		(pin "20")
		(pin "21")
		(pin "22")
		(pin "23")
		(pin "24")
		(pin "25")
		(pin "26")
		(pin "27")
		(pin "28")
		(pin "29")
		(pin "3")
		(pin "30")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "flex4"
				(path
					(reference "U8")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U94")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 81.28 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7"
			(at 78.74 31.75 90)
		)
		(property "Value" "1µ"
			(at 80.01 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 81.28 34.29 0)
		)
		(property "Datasheet" ""
			(at 81.28 34.29 0)
		)
		(property "Description" ""
			(at 81.28 34.29 0)
		)
		(property "DK" ""
			(at 81.28 34.29 0)
		)
		(property "PARTNO" ""
			(at 81.28 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 81.28 34.29 0)
		)
		(property "Distributor" "D"
			(at 81.28 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 81.28 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C7")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C224")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_1")
		(lib_id "power:GND")
		(at 119.38 156.21 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08018"
			(at 119.38 162.56 0)
		)
		(property "Value" "GND"
			(at 119.38 161.29 0)
		)
		(property "Footprint" ""
			(at 119.38 156.21 0)
		)
		(property "Datasheet" ""
			(at 119.38 156.21 0)
		)
		(property "Description" ""
			(at 119.38 156.21 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08018")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0511")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_3")
		(at 129.54 76.2 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR08035"
			(at 125.73 76.2 0)
		)
		(property "Value" "+1V8_3"
			(at 134.62 76.2 0)
		)
		(property "Footprint" ""
			(at 129.54 76.2 0)
		)
		(property "Datasheet" ""
			(at 129.54 76.2 0)
		)
		(property "Description" ""
			(at 129.54 76.2 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08035")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0526")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 278.13 227.33 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C39"
			(at 278.765 225.425 0)
		)
		(property "Value" "100n"
			(at 279.4 231.14 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 278.13 227.33 0)
		)
		(property "Datasheet" ""
			(at 278.13 227.33 0)
		)
		(property "Description" ""
			(at 278.13 227.33 0)
		)
		(property "DK" ""
			(at 278.13 227.33 0)
		)
		(property "PARTNO" ""
			(at 278.13 227.33 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 278.13 227.33 0)
		)
		(property "Distributor" "D"
			(at 278.13 227.33 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 278.13 227.33 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C39")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C256")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 259.08 227.33 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C33"
			(at 259.715 225.425 0)
		)
		(property "Value" "100n"
			(at 260.35 231.14 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 259.08 227.33 0)
		)
		(property "Datasheet" ""
			(at 259.08 227.33 0)
		)
		(property "Description" ""
			(at 259.08 227.33 0)
		)
		(property "DK" ""
			(at 259.08 227.33 0)
		)
		(property "PARTNO" ""
			(at 259.08 227.33 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 259.08 227.33 0)
		)
		(property "Distributor" "D"
			(at 259.08 227.33 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 259.08 227.33 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C33")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C250")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 189.23 86.36 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08121"
			(at 189.23 92.71 0)
		)
		(property "Value" "GND"
			(at 189.23 90.805 0)
		)
		(property "Footprint" ""
			(at 189.23 86.36 0)
		)
		(property "Datasheet" ""
			(at 189.23 86.36 0)
		)
		(property "Description" ""
			(at 189.23 86.36 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08121")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0602")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_7")
		(lib_id "power:GND")
		(at 201.93 232.41 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08030"
			(at 201.93 238.76 0)
		)
		(property "Value" "GND"
			(at 201.93 237.49 0)
		)
		(property "Footprint" ""
			(at 201.93 232.41 0)
		)
		(property "Datasheet" ""
			(at 201.93 232.41 0)
		)
		(property "Description" ""
			(at 201.93 232.41 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08030")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0522")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_IF_3")
		(at 146.05 149.86 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0384"
			(at 146.05 156.21 0)
		)
		(property "Value" "GND_IF_3"
			(at 146.05 154.94 0)
		)
		(property "Footprint" ""
			(at 146.05 149.86 0)
		)
		(property "Datasheet" ""
			(at 146.05 149.86 0)
		)
		(property "Description" ""
			(at 146.05 149.86 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0384")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_3")
		(at 139.7 137.16 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR08022"
			(at 139.7 140.97 0)
		)
		(property "Value" "+1V8_3"
			(at 139.7 132.08 0)
		)
		(property "Footprint" ""
			(at 139.7 137.16 0)
		)
		(property "Datasheet" ""
			(at 139.7 137.16 0)
		)
		(property "Description" ""
			(at 139.7 137.16 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08022")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0515")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 149.86 69.85 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R3"
			(at 153.67 68.58 90)
		)
		(property "Value" "10k"
			(at 151.765 69.215 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 148.082 69.85 90)
		)
		(property "Datasheet" "~"
			(at 149.86 69.85 0)
		)
		(property "Description" ""
			(at 149.86 69.85 0)
		)
		(property "Manufacturer" "ERJ-H3EF1002V"
			(at 149.86 69.85 0)
		)
		(property "Distributor" "D"
			(at 149.86 69.85 0)
		)
		(property "OrderNr" "10-ERJ-H3EF1002VCT-ND"
			(at 149.86 69.85 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "R3")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R56")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 200.66 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C58"
			(at 197.485 31.75 90)
		)
		(property "Value" "1µ"
			(at 199.39 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 200.66 34.29 0)
		)
		(property "Datasheet" ""
			(at 200.66 34.29 0)
		)
		(property "Description" ""
			(at 200.66 34.29 0)
		)
		(property "DK" ""
			(at 200.66 34.29 0)
		)
		(property "PARTNO" ""
			(at 200.66 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 200.66 34.29 0)
		)
		(property "Distributor" "D"
			(at 200.66 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 200.66 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C58")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C274")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 213.36 194.31 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08036"
			(at 213.36 200.66 0)
		)
		(property "Value" "GND"
			(at 213.36 198.755 0)
		)
		(property "Footprint" ""
			(at 213.36 194.31 0)
		)
		(property "Datasheet" ""
			(at 213.36 194.31 0)
		)
		(property "Description" ""
			(at 213.36 194.31 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08036")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0527")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_3")
		(at 119.38 125.73 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08017"
			(at 119.38 129.54 0)
		)
		(property "Value" "+1V8_3"
			(at 119.38 120.65 0)
		)
		(property "Footprint" ""
			(at 119.38 125.73 0)
		)
		(property "Datasheet" ""
			(at 119.38 125.73 0)
		)
		(property "Description" ""
			(at 119.38 125.73 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08017")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0510")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 83.82 194.31 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C105"
			(at 85.09 192.405 0)
		)
		(property "Value" "100n"
			(at 85.09 198.12 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 83.82 194.31 0)
		)
		(property "Datasheet" ""
			(at 83.82 194.31 0)
		)
		(property "Description" ""
			(at 83.82 194.31 0)
		)
		(property "DK" ""
			(at 83.82 194.31 0)
		)
		(property "PARTNO" ""
			(at 83.82 194.31 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 83.82 194.31 0)
		)
		(property "Distributor" "D"
			(at 83.82 194.31 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 83.82 194.31 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "C105")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 229.87 227.33 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C22"
			(at 230.505 225.425 0)
		)
		(property "Value" "1µ"
			(at 231.14 231.14 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 229.87 227.33 0)
		)
		(property "Datasheet" ""
			(at 229.87 227.33 0)
		)
		(property "Description" ""
			(at 229.87 227.33 0)
		)
		(property "DK" ""
			(at 229.87 227.33 0)
		)
		(property "PARTNO" ""
			(at 229.87 227.33 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 229.87 227.33 0)
		)
		(property "Distributor" "D"
			(at 229.87 227.33 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 229.87 227.33 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C22")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C239")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 104.14 237.49 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08012"
			(at 104.14 243.84 0)
		)
		(property "Value" "GND"
			(at 104.14 241.935 0)
		)
		(property "Footprint" ""
			(at 104.14 237.49 0)
		)
		(property "Datasheet" ""
			(at 104.14 237.49 0)
		)
		(property "Description" ""
			(at 104.14 237.49 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08012")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0505")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 90.17 20.32 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#FLG08002"
			(at 90.17 22.225 0)
		)
		(property "Value" "PWR_FLAG"
			(at 90.17 24.765 0)
		)
		(property "Footprint" ""
			(at 90.17 20.32 0)
		)
		(property "Datasheet" "~"
			(at 90.17 20.32 0)
		)
		(property "Description" ""
			(at 90.17 20.32 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#FLG08002")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG025")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 293.37 189.23 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C43"
			(at 294.005 187.325 0)
		)
		(property "Value" "1µ"
			(at 294.64 193.04 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 293.37 189.23 0)
		)
		(property "Datasheet" ""
			(at 293.37 189.23 0)
		)
		(property "Description" ""
			(at 293.37 189.23 0)
		)
		(property "DK" ""
			(at 293.37 189.23 0)
		)
		(property "PARTNO" ""
			(at 293.37 189.23 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 293.37 189.23 0)
		)
		(property "Distributor" "D"
			(at 293.37 189.23 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 293.37 189.23 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C43")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C260")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 43.18 78.74 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C3"
			(at 41.91 76.835 90)
		)
		(property "Value" "100n"
			(at 41.91 85.725 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 43.18 78.74 0)
		)
		(property "Datasheet" ""
			(at 43.18 78.74 0)
		)
		(property "Description" ""
			(at 43.18 78.74 0)
		)
		(property "DK" ""
			(at 43.18 78.74 0)
		)
		(property "PARTNO" ""
			(at 43.18 78.74 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 43.18 78.74 0)
		)
		(property "Distributor" "D"
			(at 43.18 78.74 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 43.18 78.74 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C3")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C220")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_3")
		(at 229.87 222.25 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08044"
			(at 229.87 226.06 0)
		)
		(property "Value" "+1V2_3"
			(at 229.87 217.805 0)
		)
		(property "Footprint" ""
			(at 229.87 222.25 0)
		)
		(property "Datasheet" ""
			(at 229.87 222.25 0)
		)
		(property "Description" ""
			(at 229.87 222.25 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08044")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0534")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_IF")
		(at 318.77 229.87 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR08100"
			(at 318.77 236.22 0)
		)
		(property "Value" "GND_IF"
			(at 318.77 234.315 0)
		)
		(property "Footprint" ""
			(at 318.77 229.87 0)
		)
		(property "Datasheet" ""
			(at 318.77 229.87 0)
		)
		(property "Description" ""
			(at 318.77 229.87 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08100")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0587")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 209.55 86.36 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08122"
			(at 209.55 92.71 0)
		)
		(property "Value" "GND"
			(at 209.55 90.805 0)
		)
		(property "Footprint" ""
			(at 209.55 86.36 0)
		)
		(property "Datasheet" ""
			(at 209.55 86.36 0)
		)
		(property "Description" ""
			(at 209.55 86.36 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08122")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0603")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_3")
		(at 129.54 73.66 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U9"
			(at 130.81 77.47 0)
		)
		(property "Value" "+0V8"
			(at 132.715 73.66 90)
		)
		(property "Footprint" ""
			(at 129.54 73.66 0)
		)
		(property "Datasheet" ""
			(at 129.54 73.66 0)
		)
		(property "Description" ""
			(at 129.54 73.66 0)
		)
		(property "Distributor" "-"
			(at 129.54 73.66 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "U9")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U95")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+3V3_EXT")
		(at 351.79 229.87 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR08107"
			(at 351.79 233.68 0)
		)
		(property "Value" "+3V3_EXT"
			(at 354.965 225.425 0)
		)
		(property "Footprint" ""
			(at 351.79 229.87 0)
		)
		(property "Datasheet" ""
			(at 351.79 229.87 0)
		)
		(property "Description" ""
			(at 351.79 229.87 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08107")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0594")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 227.33 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C60"
			(at 224.79 31.75 90)
		)
		(property "Value" "1µ"
			(at 226.06 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 227.33 34.29 0)
		)
		(property "Datasheet" ""
			(at 227.33 34.29 0)
		)
		(property "Description" ""
			(at 227.33 34.29 0)
		)
		(property "DK" ""
			(at 227.33 34.29 0)
		)
		(property "PARTNO" ""
			(at 227.33 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 227.33 34.29 0)
		)
		(property "Distributor" "D"
			(at 227.33 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 227.33 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C60")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C276")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_3")
		(at 90.17 20.32 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08021"
			(at 90.17 24.13 0)
		)
		(property "Value" "+1V2_3"
			(at 90.17 15.875 0)
		)
		(property "Footprint" ""
			(at 90.17 20.32 0)
		)
		(property "Datasheet" ""
			(at 90.17 20.32 0)
		)
		(property "Description" ""
			(at 90.17 20.32 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08021")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0514")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_3")
		(at 189.23 31.75 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08120"
			(at 189.23 35.56 0)
		)
		(property "Value" "+1V2_3"
			(at 189.23 27.305 0)
		)
		(property "Footprint" ""
			(at 189.23 31.75 0)
		)
		(property "Datasheet" ""
			(at 189.23 31.75 0)
		)
		(property "Description" ""
			(at 189.23 31.75 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08120")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0601")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:MCP1824")
		(at 102.87 189.23 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U64"
			(at 99.695 182.245 0)
		)
		(property "Value" "MCP1824T-1802E"
			(at 102.87 184.15 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5"
			(at 102.87 189.23 0)
		)
		(property "Datasheet" "https://ww1.microchip.com/downloads/en/DeviceDoc/22070a.pdf"
			(at 102.87 189.23 0)
		)
		(property "Description" ""
			(at 102.87 189.23 0)
		)
		(property "PARTNO" ""
			(at 102.87 189.23 0)
		)
		(property "DK" ""
			(at 102.87 189.23 0)
		)
		(property "OrderNr" "MCP1824T-1802E/OTCT-ND"
			(at 102.87 189.23 0)
		)
		(property "Distributor" "D"
			(at 102.87 189.23 0)
		)
		(property "Manufacturer" "MCP1824T-1802E/OT"
			(at 102.87 189.23 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(instances
			(project "8]axe"
				(path
					(reference "U64")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Isolator:ADuM1411")
		(at 101.6 140.97 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U5"
			(at 101.6 120.65 0)
		)
		(property "Value" "ADUM141E0BRZ-RL7"
			(at 101.6 123.19 0)
		)
		(property "Footprint" "Package_SO:SOIC-16_3.9x9.9mm_P1.27mm"
			(at 101.6 158.75 0)
		)
		(property "Datasheet" "https://www.analog.com/media/en/technical-documentation/data-sheets/ADUM1410_1411_1412.pdf"
			(at 81.28 140.97 0)
		)
		(property "Description" ""
			(at 101.6 140.97 0)
		)
		(property "Distributor" "D"
			(at 101.6 140.97 0)
		)
		(property "Manufacturer" "ADUM141E0BRZ-RL7"
			(at 101.6 140.97 0)
		)
		(property "OrderNr" "505-ADUM141E0BRZ-RL7CT-ND"
			(at 101.6 140.97 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "flex4"
				(path
					(reference "U5")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U91")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_3")
		(at 82.55 76.2 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR08019"
			(at 86.36 76.2 0)
		)
		(property "Value" "+1V8_3"
			(at 77.47 76.2 0)
		)
		(property "Footprint" ""
			(at 82.55 76.2 0)
		)
		(property "Datasheet" ""
			(at 82.55 76.2 0)
		)
		(property "Description" ""
			(at 82.55 76.2 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08019")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0512")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 236.22 189.23 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C24"
			(at 233.68 191.77 90)
		)
		(property "Value" "1µ"
			(at 236.855 190.5 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 236.22 189.23 0)
		)
		(property "Datasheet" ""
			(at 236.22 189.23 0)
		)
		(property "Description" ""
			(at 236.22 189.23 0)
		)
		(property "DK" ""
			(at 236.22 189.23 0)
		)
		(property "PARTNO" ""
			(at 236.22 189.23 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 236.22 189.23 0)
		)
		(property "Distributor" "D"
			(at 236.22 189.23 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 236.22 189.23 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C24")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C241")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_7")
		(lib_id "power:GND")
		(at 278.13 232.41 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08080"
			(at 278.13 238.76 0)
		)
		(property "Value" "GND"
			(at 278.13 237.49 0)
		)
		(property "Footprint" ""
			(at 278.13 232.41 0)
		)
		(property "Datasheet" ""
			(at 278.13 232.41 0)
		)
		(property "Description" ""
			(at 278.13 232.41 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08080")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0569")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_3")
		(at 82.55 73.66 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U7"
			(at 81.28 69.85 0)
		)
		(property "Value" "+0V8"
			(at 79.375 73.66 90)
		)
		(property "Footprint" ""
			(at 82.55 73.66 0)
		)
		(property "Datasheet" ""
			(at 82.55 73.66 0)
		)
		(property "Description" ""
			(at 82.55 73.66 0)
		)
		(property "Distributor" "-"
			(at 82.55 73.66 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "U7")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U93")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 85.09 237.49 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08006"
			(at 85.09 243.84 0)
		)
		(property "Value" "GND"
			(at 85.09 241.935 0)
		)
		(property "Footprint" ""
			(at 85.09 237.49 0)
		)
		(property "Datasheet" ""
			(at 85.09 237.49 0)
		)
		(property "Description" ""
			(at 85.09 237.49 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08006")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0499")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 219.71 189.23 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C18"
			(at 217.17 191.77 90)
		)
		(property "Value" "1µ"
			(at 220.345 190.5 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 219.71 189.23 0)
		)
		(property "Datasheet" ""
			(at 219.71 189.23 0)
		)
		(property "Description" ""
			(at 219.71 189.23 0)
		)
		(property "DK" ""
			(at 219.71 189.23 0)
		)
		(property "PARTNO" ""
			(at 219.71 189.23 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 219.71 189.23 0)
		)
		(property "Distributor" "D"
			(at 219.71 189.23 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 219.71 189.23 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C18")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C235")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 139.7 143.51 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C10"
			(at 141.605 141.605 0)
		)
		(property "Value" "100n"
			(at 141.605 147.32 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 139.7 143.51 0)
		)
		(property "Datasheet" ""
			(at 139.7 143.51 0)
		)
		(property "Description" ""
			(at 139.7 143.51 0)
		)
		(property "DK" ""
			(at 139.7 143.51 0)
		)
		(property "PARTNO" ""
			(at 139.7 143.51 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 139.7 143.51 0)
		)
		(property "Distributor" "D"
			(at 139.7 143.51 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 139.7 143.51 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C10")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C227")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 85.09 229.87 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C2"
			(at 86.36 227.965 0)
		)
		(property "Value" "100n"
			(at 86.36 233.68 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 85.09 229.87 0)
		)
		(property "Datasheet" ""
			(at 85.09 229.87 0)
		)
		(property "Description" ""
			(at 85.09 229.87 0)
		)
		(property "DK" ""
			(at 85.09 229.87 0)
		)
		(property "PARTNO" ""
			(at 85.09 229.87 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 85.09 229.87 0)
		)
		(property "Distributor" "D"
			(at 85.09 229.87 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 85.09 229.87 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C2")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C219")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 146.05 143.51 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C11"
			(at 147.32 141.605 0)
		)
		(property "Value" "100n"
			(at 147.32 147.32 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 146.05 143.51 0)
		)
		(property "Datasheet" ""
			(at 146.05 143.51 0)
		)
		(property "Description" ""
			(at 146.05 143.51 0)
		)
		(property "DK" ""
			(at 146.05 143.51 0)
		)
		(property "PARTNO" ""
			(at 146.05 143.51 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 146.05 143.51 0)
		)
		(property "Distributor" "D"
			(at 146.05 143.51 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 146.05 143.51 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C11")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C228")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_3")
		(at 31.75 50.8 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08001"
			(at 31.75 54.61 0)
		)
		(property "Value" "+1V8_3"
			(at 31.75 45.72 0)
		)
		(property "Footprint" ""
			(at 31.75 50.8 0)
		)
		(property "Datasheet" ""
			(at 31.75 50.8 0)
		)
		(property "Description" ""
			(at 31.75 50.8 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08001")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0494")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_3")
		(at 314.96 184.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR08098"
			(at 314.96 187.96 0)
		)
		(property "Value" "+1V8_3"
			(at 314.96 179.07 0)
		)
		(property "Footprint" ""
			(at 314.96 184.15 0)
		)
		(property "Datasheet" ""
			(at 314.96 184.15 0)
		)
		(property "Description" ""
			(at 314.96 184.15 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08098")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0585")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_3")
		(at 231.14 184.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U13"
			(at 234.95 182.88 0)
		)
		(property "Value" "+0V8"
			(at 231.14 180.975 90)
		)
		(property "Footprint" ""
			(at 231.14 184.15 0)
		)
		(property "Datasheet" ""
			(at 231.14 184.15 0)
		)
		(property "Description" ""
			(at 231.14 184.15 0)
		)
		(property "Distributor" "-"
			(at 231.14 184.15 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "U13")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U99")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 125.73 86.36 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08032"
			(at 125.73 92.71 0)
		)
		(property "Value" "GND"
			(at 125.73 90.805 0)
		)
		(property "Footprint" ""
			(at 125.73 86.36 0)
		)
		(property "Datasheet" ""
			(at 125.73 86.36 0)
		)
		(property "Description" ""
			(at 125.73 86.36 0)
		)
		(pin "1")
		(instances
			(project "flex4"
				(path
					(reference "#PWR08032")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0523")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 214.63 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C59"
			(at 212.09 31.75 90)
		)
		(property "Value" "1µ"
			(at 213.36 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 214.63 34.29 0)
		)
		(property "Datasheet" ""
			(at 214.63 34.29 0)
		)
		(property "Description" ""
			(at 214.63 34.29 0)
		)
		(property "DK" ""
			(at 214.63 34.29 0)
		)
		(property "PARTNO" ""
			(at 214.63 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 214.63 34.29 0)
		)
		(property "Distributor" "D"
			(at 214.63 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 214.63 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex4"
				(path
					(reference "C59")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C275")
					(unit 1)
				)
			)
		)
	)
)
