(kicad_sch
	(version 20231120)
	(generator "eeschema")
	(generator_version "8.0")
	(paper "A3")
	(lib_symbols
		(symbol "Device:C"
			(pin_numbers hide)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Unpolarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C_*"
				(at 0 0 0)
			)
			(symbol "C_0_1"
				(polyline
					(pts
						(xy -2.032 -0.762) (xy 2.032 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.032 0.762) (xy 2.032 0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:R"
			(pin_numbers hide)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 2.032 0 90)
			)
			(property "Value" "R"
				(at 0 0 90)
			)
			(property "Footprint" ""
				(at -1.778 0 90)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Resistor"
				(at 0 0 0)
			)
			(property "ki_keywords" "R res resistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R_0_1"
				(rectangle
					(start -1.016 -2.54)
					(end 1.016 2.54)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Isolator:ADuM1411"
			(pin_names
				(offset 1.016)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at 0 19.05 0)
			)
			(property "Value" "ADuM1411"
				(at 0 16.51 0)
			)
			(property "Footprint" "Package_SO:SOIC-16W_7.5x10.3mm_P1.27mm"
				(at 0 -17.78 0)
			)
			(property "Datasheet" "https://www.analog.com/media/en/technical-documentation/data-sheets/ADUM1410_1411_1412.pdf"
				(at -20.32 0 0)
			)
			(property "Description" "Quad Channel Digital Isolator,10Mbps,SO-16"
				(at 0 0 0)
			)
			(property "ki_keywords" "Digital Isolator"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOIC*7.5x10.3mm*P1.27mm*"
				(at 0 0 0)
			)
			(symbol "ADuM1411_0_0"
				(rectangle
					(start -1.905 0.635)
					(end -6.985 -0.635)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 1.016)
					(end 1.27 -1.016)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 3.556)
					(end 1.27 1.524)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 6.096)
					(end 1.27 4.064)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 8.636)
					(end 1.27 6.604)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 -0.762)
					(mid -0.2551 -0.508)
					(end -0.508 -0.254)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 -0.254)
					(mid -0.2551 0)
					(end -0.508 0.254)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 0.254)
					(mid -0.2551 0.508)
					(end -0.508 0.762)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 1.778)
					(mid -0.2551 2.032)
					(end -0.508 2.286)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 2.286)
					(mid -0.2551 2.54)
					(end -0.508 2.794)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 2.794)
					(mid -0.2551 3.048)
					(end -0.508 3.302)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 4.318)
					(mid -0.2551 4.572)
					(end -0.508 4.826)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 4.826)
					(mid -0.2551 5.08)
					(end -0.508 5.334)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 5.334)
					(mid -0.2551 5.588)
					(end -0.508 5.842)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 6.858)
					(mid -0.2551 7.112)
					(end -0.508 7.366)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 7.366)
					(mid -0.2551 7.62)
					(end -0.508 7.874)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 7.874)
					(mid -0.2551 8.128)
					(end -0.508 8.382)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -6.985 0) (xy -7.62 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -6.985 2.54) (xy -7.62 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -6.985 5.08) (xy -7.62 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -6.985 7.62) (xy -7.62 7.62)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -4.445 -1.27) (xy -4.445 -0.635)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.905 0) (xy -1.27 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.905 2.54) (xy -1.27 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.905 5.08) (xy -1.27 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.905 7.62) (xy -1.27 7.62)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 -0.762) (xy -0.508 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 0.762) (xy -0.508 0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 1.778) (xy -0.508 1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 3.302) (xy -0.508 3.302)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 4.318) (xy -0.508 4.318)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 5.842) (xy -0.508 5.842)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 6.858) (xy -0.508 6.858)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 8.382) (xy -0.508 8.382)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -10.795) (xy -0.635 -12.065)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -8.89) (xy -0.635 -10.16)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -6.985) (xy -0.635 -8.255)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -5.08) (xy -0.635 -6.35)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -3.175) (xy -0.635 -4.445)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -1.27) (xy -0.635 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 8.89) (xy -0.635 10.16)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 10.795) (xy -0.635 12.065)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 12.7) (xy -0.635 13.97)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 15.24) (xy -0.635 14.605)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -10.795) (xy 0.635 -12.065)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -8.89) (xy 0.635 -10.16)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -6.985) (xy 0.635 -8.255)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -5.08) (xy 0.635 -6.35)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -3.175) (xy 0.635 -4.445)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -1.27) (xy 0.635 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 8.89) (xy 0.635 10.16)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 12.065) (xy 0.635 10.795)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 13.97) (xy 0.635 12.7)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 14.605) (xy 0.635 15.24)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 -0.762) (xy 0.508 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 0.762) (xy 0.508 0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 1.778) (xy 0.508 1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 3.302) (xy 0.508 3.302)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 4.318) (xy 0.508 4.318)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 5.842) (xy 0.508 5.842)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 6.858) (xy 0.508 6.858)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 8.382) (xy 0.508 8.382)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.905 0) (xy 1.27 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.905 2.54) (xy 1.27 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.905 5.08) (xy 1.27 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.905 7.62) (xy 1.27 7.62)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 4.445 0.635) (xy 4.445 1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 4.445 3.175) (xy 4.445 4.445)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 4.445 5.715) (xy 4.445 6.985)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 6.985 0) (xy 7.62 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 6.985 2.54) (xy 7.62 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 6.985 5.08) (xy 7.62 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 6.985 7.62) (xy 7.62 7.62)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -4.445 -1.27) (xy -4.445 -5.08) (xy -5.715 -5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.715 -5.08) (xy 4.445 -5.08) (xy 4.445 -0.635)
					)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 -0.254)
					(mid 0.2551 -0.508)
					(end 0.508 -0.762)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 0.254)
					(mid 0.2551 0)
					(end 0.508 -0.254)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 0.762)
					(mid 0.2551 0.508)
					(end 0.508 0.254)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 2.286)
					(mid 0.2551 2.032)
					(end 0.508 1.778)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 2.794)
					(mid 0.2551 2.54)
					(end 0.508 2.286)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 3.302)
					(mid 0.2551 3.048)
					(end 0.508 2.794)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 4.826)
					(mid 0.2551 4.572)
					(end 0.508 4.318)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 5.334)
					(mid 0.2551 5.08)
					(end 0.508 4.826)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 5.842)
					(mid 0.2551 5.588)
					(end 0.508 5.334)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 7.366)
					(mid 0.2551 7.112)
					(end 0.508 6.858)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 7.874)
					(mid 0.2551 7.62)
					(end 0.508 7.366)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 8.382)
					(mid 0.2551 8.128)
					(end 0.508 7.874)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 1.905 0.635)
					(end 6.985 -0.635)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 1.905 3.175)
					(end 6.985 1.905)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 1.905 5.715)
					(end 6.985 4.445)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 1.905 8.255)
					(end 6.985 6.985)
					(fill
						(type none)
					)
				)
				(text "DECODE"
					(at -4.445 0 0)
				)
				(text "DECODE"
					(at 4.445 2.54 0)
				)
				(text "DECODE"
					(at 4.445 5.08 0)
				)
				(text "DECODE"
					(at 4.445 7.62 0)
				)
				(text "ENCODE"
					(at -4.445 2.54 0)
				)
				(text "ENCODE"
					(at -4.445 5.08 0)
				)
				(text "ENCODE"
					(at -4.445 7.62 0)
				)
				(text "ENCODE"
					(at 4.445 0 0)
				)
			)
			(symbol "ADuM1411_0_1"
				(rectangle
					(start -12.7 15.24)
					(end 12.7 -15.24)
					(fill
						(type background)
					)
				)
				(rectangle
					(start -1.905 3.175)
					(end -6.985 1.905)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.905 5.715)
					(end -6.985 4.445)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.905 8.255)
					(end -6.985 6.985)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -14.605) (xy -0.635 -15.24)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -12.7) (xy -0.635 -13.97)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -14.605) (xy 0.635 -15.24)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -12.7) (xy 0.635 -13.97)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "ADuM1411_1_1"
				(pin power_in line
					(at -15.24 12.7 0)
					(length 2.54)
					(name "VDD1")
					(number "1")
				)
				(pin input line
					(at 15.24 -5.08 180)
					(length 2.54)
					(name "CTRL2")
					(number "10")
				)
				(pin input line
					(at 15.24 0 180)
					(length 2.54)
					(name "VID")
					(number "11")
				)
				(pin output line
					(at 15.24 2.54 180)
					(length 2.54)
					(name "VOC")
					(number "12")
				)
				(pin output line
					(at 15.24 5.08 180)
					(length 2.54)
					(name "VOB")
					(number "13")
				)
				(pin output line
					(at 15.24 7.62 180)
					(length 2.54)
					(name "VOA")
					(number "14")
				)
				(pin power_in line
					(at 15.24 -12.7 180)
					(length 2.54)
					(name "GND2")
					(number "15")
				)
				(pin power_in line
					(at 15.24 12.7 180)
					(length 2.54)
					(name "VDD2")
					(number "16")
				)
				(pin power_in line
					(at -15.24 -10.16 0)
					(length 2.54)
					(name "GND1")
					(number "2")
				)
				(pin input line
					(at -15.24 7.62 0)
					(length 2.54)
					(name "VIA")
					(number "3")
				)
				(pin input line
					(at -15.24 5.08 0)
					(length 2.54)
					(name "VIB")
					(number "4")
				)
				(pin input line
					(at -15.24 2.54 0)
					(length 2.54)
					(name "VIC")
					(number "5")
				)
				(pin output line
					(at -15.24 0 0)
					(length 2.54)
					(name "VOD")
					(number "6")
				)
				(pin input line
					(at -15.24 -5.08 0)
					(length 2.54)
					(name "CTRL1")
					(number "7")
				)
				(pin power_in line
					(at -15.24 -12.7 0)
					(length 2.54)
					(name "GND1")
					(number "8")
				)
				(pin power_in line
					(at 15.24 -10.16 180)
					(length 2.54)
					(name "GND2")
					(number "9")
				)
			)
		)
		(symbol "Oscillator:ASDMB-xxxMHz"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -6.35 6.35 0)
			)
			(property "Value" "ASDMB-xxxMHz"
				(at 11.43 6.35 0)
			)
			(property "Footprint" "Oscillator:Oscillator_SMD_Abracon_ASDMB-4Pin_2.5x2.0mm"
				(at 0 0 0)
			)
			(property "Datasheet" "https://abracon.com/Oscillators/ASDMB.pdf"
				(at 7.62 11.43 0)
			)
			(property "Description" "1.8-3.3V SMD Ultra Miniature Crystal Clock Oscillator, Abracon"
				(at 0 0 0)
			)
			(property "ki_keywords" "1.8-3.3V SMD Ultra Miniature Crystal Clock Oscillator"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Oscillator*SMD*Abracon*ASDMB*2.5x2.0mm*"
				(at 0 0 0)
			)
			(symbol "ASDMB-xxxMHz_1_1"
				(rectangle
					(start -7.62 5.08)
					(end 7.62 -5.08)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy -4.445 2.54) (xy -3.81 2.54) (xy -3.81 3.81) (xy -3.175 3.81) (xy -3.175 2.54) (xy -2.54 2.54)
						(xy -2.54 3.81) (xy -1.905 3.81) (xy -1.905 2.54)
					)
					(fill
						(type none)
					)
				)
				(pin input line
					(at -10.16 0 0)
					(length 2.54)
					(name "Standby")
					(number "1")
				)
				(pin power_in line
					(at 2.54 -7.62 90)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "Out")
					(number "3")
				)
				(pin power_in line
					(at 2.54 7.62 270)
					(length 2.54)
					(name "VDD")
					(number "4")
				)
			)
		)
		(symbol "bitaxe:MCP1824"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U7"
				(at -3.175 6.985 0)
			)
			(property "Value" "MCP1824T-1802E"
				(at 0 5.08 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5"
				(at 0 0 0)
			)
			(property "Datasheet" "https://ww1.microchip.com/downloads/en/DeviceDoc/22070a.pdf"
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "PARTNO" ""
				(at 0 0 0)
			)
			(property "DK" ""
				(at 0 0 0)
			)
			(property "OrderNr" "MCP1824T-1802E/OTCT-ND"
				(at 0 0 0)
			)
			(property "Distributor" "D"
				(at 0 0 0)
			)
			(property "Manufacturer" "MCP1824T-1802E/OT"
				(at 0 0 0)
			)
			(symbol "MCP1824_0_1"
				(rectangle
					(start -7.62 3.81)
					(end 7.62 -6.35)
					(fill
						(type background)
					)
				)
			)
			(symbol "MCP1824_1_0"
				(pin power_in line
					(at -10.16 1.27 0)
					(length 2.54)
					(name "VIN")
					(number "1")
				)
				(pin power_in line
					(at 10.16 -1.27 180)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin input line
					(at -10.16 -1.27 0)
					(length 2.54)
					(name "EN")
					(number "3")
				)
				(pin bidirectional line
					(at -10.16 -3.81 0)
					(length 2.54)
					(name "PG")
					(number "4")
				)
				(pin power_out line
					(at 10.16 1.27 180)
					(length 2.54)
					(name "VOUT")
					(number "5")
				)
			)
		)
		(symbol "mylib7:+0V8_2"
			(exclude_from_sim no)
			(in_bom no)
			(on_board no)
			(property "Reference" "U5008"
				(at 3.81 1.27 0)
			)
			(property "Value" "+0V8"
				(at 0 3.175 90)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "Distributor" "-"
				(at 0 0 0)
			)
			(symbol "+0V8_2_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+0V8_2_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+0V8_2")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+1V2_2"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR05024"
				(at 0 -3.81 0)
			)
			(property "Value" "+1V2_2"
				(at 0 4.445 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+1V2\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+1V2_2_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+1V2_2_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+1V2_2")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+1V8_2"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR05017"
				(at 0 -3.81 0)
			)
			(property "Value" "+1V8_2"
				(at 0 5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+1V8\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+1V8_2_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+1V8_2_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+1V8_2")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+3V3_EXT"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR013"
				(at 0 -3.81 0)
			)
			(property "Value" "+3V3_EXT"
				(at 0 4.445 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+3V3\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+3V3_EXT_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+3V3_EXT_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+3V3_EXT")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+6.5V"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR034"
				(at 0 -3.81 0)
			)
			(property "Value" "+6.5V"
				(at 0 4.445 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+6.5V_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+6.5V_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+5V")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+V_IF"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR07"
				(at 0 -3.81 0)
			)
			(property "Value" "+V_IF"
				(at 0 5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+3V3\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+V_IF_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+V_IF_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+V_IF")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+V_IF_2"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR0148"
				(at 0 -3.81 0)
			)
			(property "Value" "+V_IF_2"
				(at 0 5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+V_IF_2_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+V_IF_2_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+V_IF_1")
					(number "1")
				)
			)
		)
		(symbol "mylib7:BM1366_mode1"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U8"
				(at 1.9559 24.13 0)
			)
			(property "Value" "BM1366_mode1"
				(at 1.9559 21.59 0)
			)
			(property "Footprint" "qaxe:BM1366"
				(at -7.62 0 0)
			)
			(property "Datasheet" ""
				(at -7.62 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "Distributor" "X"
				(at 0 0 0)
			)
			(symbol "BM1366_mode1_0_1"
				(rectangle
					(start -15.24 20.32)
					(end 15.24 -17.78)
					(fill
						(type background)
					)
				)
			)
			(symbol "BM1366_mode1_1_1"
				(pin input line
					(at -17.78 17.78 0)
					(length 2.54)
					(name "VDD1_0")
					(number "1")
				)
				(pin input line
					(at -17.78 -5.08 0)
					(length 2.54)
					(name "ADDR0")
					(number "10")
				)
				(pin input line
					(at -17.78 -7.62 0)
					(length 2.54)
					(name "ADDR1")
					(number "11")
				)
				(pin power_in line
					(at -17.78 -10.16 0)
					(length 2.54)
					(name "PLL_VSS")
					(number "12")
				)
				(pin power_in line
					(at -17.78 -12.7 0)
					(length 2.54)
					(name "VDDIO_08_0")
					(number "13")
				)
				(pin power_in line
					(at -17.78 -15.24 0)
					(length 2.54)
					(name "VDDIO_18_0")
					(number "14")
				)
				(pin power_in line
					(at 17.78 -15.24 180)
					(length 2.54)
					(name "VDDIO_18_1")
					(number "15")
				)
				(pin power_in line
					(at 17.78 -12.7 180)
					(length 2.54)
					(name "VDDIO_08_1")
					(number "16")
				)
				(pin power_in line
					(at 17.78 -10.16 180)
					(length 2.54)
					(name "VSS")
					(number "17")
				)
				(pin input line
					(at 17.78 -7.62 180)
					(length 2.54)
					(name "PIN_MODE")
					(number "18")
				)
				(pin input line
					(at 17.78 -5.08 180)
					(length 2.54)
					(name "INV_CLKO")
					(number "19")
				)
				(pin input line
					(at -17.78 15.24 0)
					(length 2.54)
					(name "VDD2_0")
					(number "2")
				)
				(pin output line
					(at 17.78 -2.54 180)
					(length 2.54)
					(name "CO")
					(number "20")
				)
				(pin output line
					(at 17.78 0 180)
					(length 2.54)
					(name "CLKO")
					(number "21")
				)
				(pin input line
					(at 17.78 2.54 180)
					(length 2.54)
					(name "RI")
					(number "22")
				)
				(pin output line
					(at 17.78 5.08 180)
					(length 2.54)
					(name "BO")
					(number "23")
				)
				(pin output line
					(at 17.78 7.62 180)
					(length 2.54)
					(name "NRSTO")
					(number "24")
				)
				(pin input line
					(at 17.78 10.16 180)
					(length 2.54)
					(name "VSS")
					(number "25")
				)
				(pin input line
					(at 17.78 12.7 180)
					(length 2.54)
					(name "VDD3_1")
					(number "26")
				)
				(pin input line
					(at 17.78 15.24 180)
					(length 2.54)
					(name "VDD2_1")
					(number "27")
				)
				(pin input line
					(at 17.78 17.78 180)
					(length 2.54)
					(name "VDD1_1")
					(number "28")
				)
				(pin power_in line
					(at 0 22.86 270)
					(length 2.54)
					(name "VDD")
					(number "29")
				)
				(pin input line
					(at -17.78 12.7 0)
					(length 2.54)
					(name "VDD3_0")
					(number "3")
				)
				(pin power_in line
					(at 0 -20.32 90)
					(length 2.54)
					(name "GND")
					(number "30")
				)
				(pin input line
					(at -17.78 10.16 0)
					(length 2.54)
					(name "VSS")
					(number "4")
				)
				(pin input line
					(at -17.78 7.62 0)
					(length 2.54)
					(name "NRSTI")
					(number "5")
				)
				(pin input line
					(at -17.78 5.08 0)
					(length 2.54)
					(name "BI")
					(number "6")
				)
				(pin output line
					(at -17.78 2.54 0)
					(length 2.54)
					(name "RO")
					(number "7")
				)
				(pin input line
					(at -17.78 0 0)
					(length 2.54)
					(name "CLKI")
					(number "8")
				)
				(pin input line
					(at -17.78 -2.54 0)
					(length 2.54)
					(name "CI")
					(number "9")
				)
			)
		)
		(symbol "mylib7:GND_2"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR05018"
				(at 0 -6.35 0)
			)
			(property "Value" "GND_2"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_2_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_2_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND_2")
					(number "1")
				)
			)
		)
		(symbol "mylib7:GND_EXT"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR0146"
				(at 0 -6.35 0)
			)
			(property "Value" "GND_EXT"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_EXT_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_EXT_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND_EXT")
					(number "1")
				)
			)
		)
		(symbol "mylib7:GND_IF"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR08"
				(at 0 -6.35 0)
			)
			(property "Value" "GND_IF"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_IF_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_IF_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND_IF")
					(number "1")
				)
			)
		)
		(symbol "mylib7:GND_IF_2"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR0149"
				(at 0 -6.35 0)
			)
			(property "Value" "GND_IF_2"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_IF_2_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_IF_2_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND_IF_1")
					(number "1")
				)
			)
		)
		(symbol "mylib7:NCP114-SN"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U4"
				(at 0 9.525 0)
			)
			(property "Value" "NCP115-SN"
				(at 0 6.985 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:TSOT-23-5"
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "300mA Low-Dropout Linear Regulators, 1.2V output voltage, LDO with low noise and enable pin, XDFN-4"
				(at 0 0 0)
			)
			(property "ki_keywords" "Single Output LDO"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "OnSemi*XDFN4*1EP*1.0x1.0mm*"
				(at 0 0 0)
			)
			(symbol "NCP114-SN_0_1"
				(rectangle
					(start -7.62 5.08)
					(end 7.62 -5.08)
					(fill
						(type background)
					)
				)
			)
			(symbol "NCP114-SN_1_1"
				(pin power_in line
					(at -10.16 2.54 0)
					(length 2.54)
					(name "IN")
					(number "1")
				)
				(pin power_in line
					(at 0 -7.62 90)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin input line
					(at -10.16 -2.54 0)
					(length 2.54)
					(name "EN")
					(number "3")
				)
				(pin power_out line
					(at 10.16 2.54 180)
					(length 2.54)
					(name "OUT")
					(number "5")
				)
			)
		)
		(symbol "power:PWR_FLAG"
			(power)
			(pin_numbers hide)
			(pin_names
				(offset 0) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#FLG"
				(at 0 1.905 0)
			)
			(property "Value" "PWR_FLAG"
				(at 0 3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Special symbol for telling ERC where power comes from"
				(at 0 0 0)
			)
			(property "ki_keywords" "flag power"
				(at 0 0 0)
			)
			(symbol "PWR_FLAG_0_0"
				(pin power_out line
					(at 0 0 90)
					(length 0)
					(name "pwr")
					(number "1")
				)
			)
			(symbol "PWR_FLAG_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 1.27) (xy -1.016 1.905) (xy 0 2.54) (xy 1.016 1.905) (xy 0 1.27)
					)
					(fill
						(type none)
					)
				)
			)
		)
	)
	(junction
		(at 185.42 45.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 64.77 36.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 123.19 146.05)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 224.79 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 88.9 146.05)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 128.27 45.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 151.13 36.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 124.46 219.71)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 128.27 36.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 95.25 219.71)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 87.63 219.71)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 185.42 53.34)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 165.1 53.34)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 152.4 60.96)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 107.95 36.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 205.74 36.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 124.46 185.42)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 34.29 54.61)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 240.03 60.96)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 139.7 36.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 128.27 53.34)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 88.9 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 128.27 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 247.65 36.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 88.9 36.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 236.22 36.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 151.13 50.8)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 87.63 185.42)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 224.79 53.34)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 88.9 53.34)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 95.25 185.42)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 224.79 36.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 139.7 48.26)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 77.47 36.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 185.42 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(no_connect
		(at 90.17 138.43)
	)
	(no_connect
		(at 223.52 71.12)
	)
	(no_connect
		(at 125.73 68.58)
	)
	(no_connect
		(at 223.52 63.5)
	)
	(no_connect
		(at 120.65 138.43)
	)
	(no_connect
		(at 90.17 68.58)
	)
	(no_connect
		(at 187.96 68.58)
	)
	(no_connect
		(at 223.52 68.58)
	)
	(no_connect
		(at 96.52 190.5)
	)
	(no_connect
		(at 90.17 71.12)
	)
	(no_connect
		(at 187.96 71.12)
	)
	(no_connect
		(at 223.52 55.88)
	)
	(no_connect
		(at 125.73 71.12)
	)
	(wire
		(pts
			(xy 88.9 73.66) (xy 88.9 88.9)
		)
	)
	(wire
		(pts
			(xy 107.95 36.83) (xy 107.95 40.64)
		)
	)
	(wire
		(pts
			(xy 34.29 54.61) (xy 19.05 54.61)
		)
	)
	(wire
		(pts
			(xy 64.77 36.83) (xy 67.31 36.83)
		)
	)
	(wire
		(pts
			(xy 128.27 73.66) (xy 128.27 88.9)
		)
	)
	(wire
		(pts
			(xy 151.13 36.83) (xy 153.67 36.83)
		)
	)
	(wire
		(pts
			(xy 224.79 73.66) (xy 224.79 88.9)
		)
	)
	(wire
		(pts
			(xy 223.52 60.96) (xy 240.03 60.96)
		)
	)
	(wire
		(pts
			(xy 95.25 187.96) (xy 96.52 187.96)
		)
	)
	(wire
		(pts
			(xy 85.09 76.2) (xy 90.17 76.2)
		)
	)
	(wire
		(pts
			(xy 256.54 193.04) (xy 256.54 194.31)
		)
	)
	(wire
		(pts
			(xy 77.47 48.26) (xy 77.47 36.83)
		)
	)
	(wire
		(pts
			(xy 129.54 125.73) (xy 120.65 125.73)
		)
	)
	(wire
		(pts
			(xy 124.46 196.85) (xy 124.46 199.39)
		)
	)
	(wire
		(pts
			(xy 152.4 76.2) (xy 152.4 77.47)
		)
	)
	(wire
		(pts
			(xy 224.79 36.83) (xy 227.33 36.83)
		)
	)
	(wire
		(pts
			(xy 118.11 187.96) (xy 116.84 187.96)
		)
	)
	(wire
		(pts
			(xy 80.01 130.81) (xy 90.17 130.81)
		)
	)
	(wire
		(pts
			(xy 90.17 133.35) (xy 80.01 133.35)
		)
	)
	(wire
		(pts
			(xy 116.84 219.71) (xy 124.46 219.71)
		)
	)
	(wire
		(pts
			(xy 107.95 83.82) (xy 107.95 88.9)
		)
	)
	(wire
		(pts
			(xy 313.69 193.04) (xy 313.69 194.31)
		)
	)
	(wire
		(pts
			(xy 87.63 184.15) (xy 87.63 185.42)
		)
	)
	(wire
		(pts
			(xy 250.19 231.14) (xy 250.19 232.41)
		)
	)
	(wire
		(pts
			(xy 86.36 36.83) (xy 88.9 36.83)
		)
	)
	(wire
		(pts
			(xy 123.19 146.05) (xy 123.19 148.59)
		)
	)
	(wire
		(pts
			(xy 90.17 143.51) (xy 88.9 143.51)
		)
	)
	(wire
		(pts
			(xy 151.13 50.8) (xy 187.96 50.8)
		)
	)
	(wire
		(pts
			(xy 124.46 185.42) (xy 124.46 189.23)
		)
	)
	(wire
		(pts
			(xy 95.25 219.71) (xy 95.25 224.79)
		)
	)
	(wire
		(pts
			(xy 90.17 128.27) (xy 80.01 128.27)
		)
	)
	(wire
		(pts
			(xy 44.45 74.93) (xy 44.45 76.2)
		)
	)
	(wire
		(pts
			(xy 128.27 53.34) (xy 165.1 53.34)
		)
	)
	(wire
		(pts
			(xy 33.02 111.76) (xy 36.83 111.76)
		)
	)
	(wire
		(pts
			(xy 87.63 185.42) (xy 87.63 187.96)
		)
	)
	(wire
		(pts
			(xy 33.02 116.84) (xy 36.83 116.84)
		)
	)
	(wire
		(pts
			(xy 236.22 48.26) (xy 236.22 36.83)
		)
	)
	(wire
		(pts
			(xy 224.79 45.72) (xy 224.79 36.83)
		)
	)
	(wire
		(pts
			(xy 129.54 128.27) (xy 120.65 128.27)
		)
	)
	(wire
		(pts
			(xy 123.19 120.65) (xy 123.19 118.11)
		)
	)
	(wire
		(pts
			(xy 87.63 195.58) (xy 87.63 199.39)
		)
	)
	(wire
		(pts
			(xy 128.27 45.72) (xy 128.27 36.83)
		)
	)
	(wire
		(pts
			(xy 116.84 185.42) (xy 124.46 185.42)
		)
	)
	(wire
		(pts
			(xy 125.73 50.8) (xy 151.13 50.8)
		)
	)
	(wire
		(pts
			(xy 124.46 231.14) (xy 124.46 232.41)
		)
	)
	(wire
		(pts
			(xy 88.9 120.65) (xy 88.9 118.11)
		)
	)
	(wire
		(pts
			(xy 152.4 60.96) (xy 187.96 60.96)
		)
	)
	(wire
		(pts
			(xy 240.03 74.93) (xy 240.03 76.2)
		)
	)
	(wire
		(pts
			(xy 223.52 53.34) (xy 224.79 53.34)
		)
	)
	(wire
		(pts
			(xy 306.07 201.93) (xy 306.07 203.2)
		)
	)
	(wire
		(pts
			(xy 87.63 217.17) (xy 87.63 219.71)
		)
	)
	(wire
		(pts
			(xy 123.19 143.51) (xy 123.19 146.05)
		)
	)
	(wire
		(pts
			(xy 90.17 146.05) (xy 88.9 146.05)
		)
	)
	(wire
		(pts
			(xy 88.9 73.66) (xy 90.17 73.66)
		)
	)
	(wire
		(pts
			(xy 143.51 130.81) (xy 143.51 132.08)
		)
	)
	(wire
		(pts
			(xy 88.9 146.05) (xy 88.9 148.59)
		)
	)
	(wire
		(pts
			(xy 223.52 50.8) (xy 247.65 50.8)
		)
	)
	(wire
		(pts
			(xy 223.52 76.2) (xy 228.6 76.2)
		)
	)
	(wire
		(pts
			(xy 34.29 71.12) (xy 34.29 72.39)
		)
	)
	(wire
		(pts
			(xy 128.27 45.72) (xy 185.42 45.72)
		)
	)
	(wire
		(pts
			(xy 72.39 58.42) (xy 90.17 58.42)
		)
	)
	(wire
		(pts
			(xy 240.03 60.96) (xy 240.03 67.31)
		)
	)
	(wire
		(pts
			(xy 118.11 187.96) (xy 118.11 199.39)
		)
	)
	(wire
		(pts
			(xy 129.54 133.35) (xy 120.65 133.35)
		)
	)
	(wire
		(pts
			(xy 52.07 36.83) (xy 55.88 36.83)
		)
	)
	(wire
		(pts
			(xy 77.47 36.83) (xy 78.74 36.83)
		)
	)
	(wire
		(pts
			(xy 128.27 36.83) (xy 129.54 36.83)
		)
	)
	(wire
		(pts
			(xy 124.46 219.71) (xy 124.46 223.52)
		)
	)
	(wire
		(pts
			(xy 96.52 224.79) (xy 95.25 224.79)
		)
	)
	(wire
		(pts
			(xy 88.9 53.34) (xy 52.07 53.34)
		)
	)
	(wire
		(pts
			(xy 234.95 240.03) (xy 234.95 241.3)
		)
	)
	(wire
		(pts
			(xy 165.1 53.34) (xy 185.42 53.34)
		)
	)
	(wire
		(pts
			(xy 88.9 53.34) (xy 88.9 73.66)
		)
	)
	(wire
		(pts
			(xy 236.22 36.83) (xy 238.76 36.83)
		)
	)
	(wire
		(pts
			(xy 307.34 231.14) (xy 307.34 232.41)
		)
	)
	(wire
		(pts
			(xy 139.7 36.83) (xy 142.24 36.83)
		)
	)
	(wire
		(pts
			(xy 185.42 45.72) (xy 187.96 45.72)
		)
	)
	(wire
		(pts
			(xy 223.52 48.26) (xy 236.22 48.26)
		)
	)
	(wire
		(pts
			(xy 33.02 106.68) (xy 36.83 106.68)
		)
	)
	(wire
		(pts
			(xy 63.5 36.83) (xy 64.77 36.83)
		)
	)
	(wire
		(pts
			(xy 139.7 48.26) (xy 187.96 48.26)
		)
	)
	(wire
		(pts
			(xy 107.95 33.02) (xy 107.95 36.83)
		)
	)
	(wire
		(pts
			(xy 95.25 219.71) (xy 96.52 219.71)
		)
	)
	(wire
		(pts
			(xy 152.4 60.96) (xy 152.4 68.58)
		)
	)
	(wire
		(pts
			(xy 240.03 193.04) (xy 240.03 194.31)
		)
	)
	(wire
		(pts
			(xy 87.63 185.42) (xy 95.25 185.42)
		)
	)
	(wire
		(pts
			(xy 123.19 36.83) (xy 128.27 36.83)
		)
	)
	(wire
		(pts
			(xy 41.91 63.5) (xy 90.17 63.5)
		)
	)
	(wire
		(pts
			(xy 95.25 187.96) (xy 95.25 185.42)
		)
	)
	(wire
		(pts
			(xy 246.38 36.83) (xy 247.65 36.83)
		)
	)
	(wire
		(pts
			(xy 223.52 78.74) (xy 228.6 78.74)
		)
	)
	(wire
		(pts
			(xy 33.02 114.3) (xy 36.83 114.3)
		)
	)
	(wire
		(pts
			(xy 33.02 109.22) (xy 36.83 109.22)
		)
	)
	(wire
		(pts
			(xy 125.73 66.04) (xy 187.96 66.04)
		)
	)
	(wire
		(pts
			(xy 151.13 50.8) (xy 151.13 36.83)
		)
	)
	(wire
		(pts
			(xy 125.73 60.96) (xy 152.4 60.96)
		)
	)
	(wire
		(pts
			(xy 185.42 73.66) (xy 185.42 88.9)
		)
	)
	(wire
		(pts
			(xy 205.74 33.02) (xy 205.74 36.83)
		)
	)
	(wire
		(pts
			(xy 124.46 184.15) (xy 124.46 185.42)
		)
	)
	(wire
		(pts
			(xy 223.52 73.66) (xy 224.79 73.66)
		)
	)
	(wire
		(pts
			(xy 185.42 36.83) (xy 185.42 45.72)
		)
	)
	(wire
		(pts
			(xy 123.19 146.05) (xy 120.65 146.05)
		)
	)
	(wire
		(pts
			(xy 185.42 36.83) (xy 189.23 36.83)
		)
	)
	(wire
		(pts
			(xy 33.02 119.38) (xy 36.83 119.38)
		)
	)
	(wire
		(pts
			(xy 298.45 240.03) (xy 298.45 241.3)
		)
	)
	(wire
		(pts
			(xy 120.65 120.65) (xy 123.19 120.65)
		)
	)
	(wire
		(pts
			(xy 298.45 201.93) (xy 298.45 203.2)
		)
	)
	(wire
		(pts
			(xy 224.79 53.34) (xy 261.62 53.34)
		)
	)
	(wire
		(pts
			(xy 223.52 45.72) (xy 224.79 45.72)
		)
	)
	(wire
		(pts
			(xy 247.65 50.8) (xy 247.65 36.83)
		)
	)
	(wire
		(pts
			(xy 95.25 185.42) (xy 96.52 185.42)
		)
	)
	(wire
		(pts
			(xy 165.1 53.34) (xy 165.1 36.83)
		)
	)
	(wire
		(pts
			(xy 240.03 60.96) (xy 243.84 60.96)
		)
	)
	(wire
		(pts
			(xy 88.9 143.51) (xy 88.9 146.05)
		)
	)
	(wire
		(pts
			(xy 125.73 78.74) (xy 132.08 78.74)
		)
	)
	(wire
		(pts
			(xy 139.7 48.26) (xy 139.7 36.83)
		)
	)
	(wire
		(pts
			(xy 102.87 36.83) (xy 107.95 36.83)
		)
	)
	(wire
		(pts
			(xy 72.39 60.96) (xy 90.17 60.96)
		)
	)
	(wire
		(pts
			(xy 219.71 36.83) (xy 224.79 36.83)
		)
	)
	(wire
		(pts
			(xy 87.63 219.71) (xy 95.25 219.71)
		)
	)
	(wire
		(pts
			(xy 77.47 48.26) (xy 90.17 48.26)
		)
	)
	(wire
		(pts
			(xy 125.73 48.26) (xy 139.7 48.26)
		)
	)
	(wire
		(pts
			(xy 125.73 63.5) (xy 187.96 63.5)
		)
	)
	(wire
		(pts
			(xy 298.45 231.14) (xy 298.45 232.41)
		)
	)
	(wire
		(pts
			(xy 279.4 231.14) (xy 279.4 232.41)
		)
	)
	(wire
		(pts
			(xy 307.34 240.03) (xy 307.34 241.3)
		)
	)
	(wire
		(pts
			(xy 247.65 36.83) (xy 250.19 36.83)
		)
	)
	(wire
		(pts
			(xy 88.9 36.83) (xy 88.9 45.72)
		)
	)
	(wire
		(pts
			(xy 90.17 120.65) (xy 88.9 120.65)
		)
	)
	(wire
		(pts
			(xy 335.28 194.31) (xy 335.28 193.04)
		)
	)
	(wire
		(pts
			(xy 196.85 36.83) (xy 205.74 36.83)
		)
	)
	(wire
		(pts
			(xy 224.79 53.34) (xy 224.79 73.66)
		)
	)
	(wire
		(pts
			(xy 251.46 193.04) (xy 251.46 194.31)
		)
	)
	(wire
		(pts
			(xy 185.42 73.66) (xy 187.96 73.66)
		)
	)
	(wire
		(pts
			(xy 87.63 219.71) (xy 87.63 222.25)
		)
	)
	(wire
		(pts
			(xy 120.65 143.51) (xy 123.19 143.51)
		)
	)
	(wire
		(pts
			(xy 223.52 58.42) (xy 243.84 58.42)
		)
	)
	(wire
		(pts
			(xy 90.17 125.73) (xy 80.01 125.73)
		)
	)
	(wire
		(pts
			(xy 19.05 54.61) (xy 19.05 63.5)
		)
	)
	(wire
		(pts
			(xy 85.09 78.74) (xy 90.17 78.74)
		)
	)
	(wire
		(pts
			(xy 107.95 36.83) (xy 115.57 36.83)
		)
	)
	(wire
		(pts
			(xy 233.68 193.04) (xy 233.68 194.31)
		)
	)
	(wire
		(pts
			(xy 52.07 53.34) (xy 52.07 36.83)
		)
	)
	(wire
		(pts
			(xy 74.93 36.83) (xy 77.47 36.83)
		)
	)
	(wire
		(pts
			(xy 125.73 58.42) (xy 187.96 58.42)
		)
	)
	(wire
		(pts
			(xy 125.73 53.34) (xy 128.27 53.34)
		)
	)
	(wire
		(pts
			(xy 34.29 53.34) (xy 34.29 54.61)
		)
	)
	(wire
		(pts
			(xy 222.25 240.03) (xy 222.25 241.3)
		)
	)
	(wire
		(pts
			(xy 261.62 53.34) (xy 261.62 36.83)
		)
	)
	(wire
		(pts
			(xy 223.52 66.04) (xy 243.84 66.04)
		)
	)
	(wire
		(pts
			(xy 64.77 50.8) (xy 64.77 36.83)
		)
	)
	(wire
		(pts
			(xy 187.96 53.34) (xy 185.42 53.34)
		)
	)
	(wire
		(pts
			(xy 124.46 217.17) (xy 124.46 219.71)
		)
	)
	(wire
		(pts
			(xy 306.07 194.31) (xy 306.07 193.04)
		)
	)
	(wire
		(pts
			(xy 87.63 229.87) (xy 87.63 232.41)
		)
	)
	(wire
		(pts
			(xy 262.89 240.03) (xy 262.89 241.3)
		)
	)
	(wire
		(pts
			(xy 120.65 130.81) (xy 129.54 130.81)
		)
	)
	(wire
		(pts
			(xy 72.39 55.88) (xy 90.17 55.88)
		)
	)
	(wire
		(pts
			(xy 72.39 66.04) (xy 90.17 66.04)
		)
	)
	(wire
		(pts
			(xy 251.46 201.93) (xy 251.46 203.2)
		)
	)
	(wire
		(pts
			(xy 88.9 36.83) (xy 95.25 36.83)
		)
	)
	(wire
		(pts
			(xy 233.68 201.93) (xy 233.68 203.2)
		)
	)
	(wire
		(pts
			(xy 125.73 55.88) (xy 187.96 55.88)
		)
	)
	(wire
		(pts
			(xy 205.74 36.83) (xy 205.74 40.64)
		)
	)
	(wire
		(pts
			(xy 261.62 36.83) (xy 257.81 36.83)
		)
	)
	(wire
		(pts
			(xy 125.73 73.66) (xy 128.27 73.66)
		)
	)
	(wire
		(pts
			(xy 234.95 231.14) (xy 234.95 232.41)
		)
	)
	(wire
		(pts
			(xy 165.1 36.83) (xy 161.29 36.83)
		)
	)
	(wire
		(pts
			(xy 205.74 83.82) (xy 205.74 88.9)
		)
	)
	(wire
		(pts
			(xy 256.54 201.93) (xy 256.54 203.2)
		)
	)
	(wire
		(pts
			(xy 234.95 36.83) (xy 236.22 36.83)
		)
	)
	(wire
		(pts
			(xy 19.05 63.5) (xy 21.59 63.5)
		)
	)
	(wire
		(pts
			(xy 250.19 240.03) (xy 250.19 241.3)
		)
	)
	(wire
		(pts
			(xy 335.28 201.93) (xy 335.28 203.2)
		)
	)
	(wire
		(pts
			(xy 106.68 229.87) (xy 106.68 232.41)
		)
	)
	(wire
		(pts
			(xy 185.42 53.34) (xy 185.42 73.66)
		)
	)
	(wire
		(pts
			(xy 240.03 201.93) (xy 240.03 203.2)
		)
	)
	(wire
		(pts
			(xy 149.86 139.7) (xy 149.86 143.51)
		)
	)
	(wire
		(pts
			(xy 125.73 45.72) (xy 128.27 45.72)
		)
	)
	(wire
		(pts
			(xy 313.69 201.93) (xy 313.69 203.2)
		)
	)
	(wire
		(pts
			(xy 143.51 139.7) (xy 143.51 143.51)
		)
	)
	(wire
		(pts
			(xy 298.45 194.31) (xy 298.45 193.04)
		)
	)
	(wire
		(pts
			(xy 262.89 231.14) (xy 262.89 232.41)
		)
	)
	(wire
		(pts
			(xy 128.27 53.34) (xy 128.27 73.66)
		)
	)
	(wire
		(pts
			(xy 88.9 45.72) (xy 90.17 45.72)
		)
	)
	(wire
		(pts
			(xy 34.29 54.61) (xy 34.29 55.88)
		)
	)
	(wire
		(pts
			(xy 90.17 53.34) (xy 88.9 53.34)
		)
	)
	(wire
		(pts
			(xy 222.25 231.14) (xy 222.25 232.41)
		)
	)
	(wire
		(pts
			(xy 181.61 78.74) (xy 187.96 78.74)
		)
	)
	(wire
		(pts
			(xy 125.73 76.2) (xy 132.08 76.2)
		)
	)
	(wire
		(pts
			(xy 181.61 76.2) (xy 187.96 76.2)
		)
	)
	(wire
		(pts
			(xy 137.16 36.83) (xy 139.7 36.83)
		)
	)
	(wire
		(pts
			(xy 64.77 50.8) (xy 90.17 50.8)
		)
	)
	(wire
		(pts
			(xy 149.86 130.81) (xy 149.86 132.08)
		)
	)
	(wire
		(pts
			(xy 279.4 240.03) (xy 279.4 241.3)
		)
	)
	(wire
		(pts
			(xy 149.86 36.83) (xy 151.13 36.83)
		)
	)
	(wire
		(pts
			(xy 205.74 36.83) (xy 212.09 36.83)
		)
	)
	(label "I_BI"
		(at 72.39 58.42 0)
		(fields_autoplaced yes)
	)
	(label "I_CI"
		(at 72.39 66.04 0)
		(fields_autoplaced yes)
	)
	(label "I_NRSTI"
		(at 121.92 128.27 0)
		(fields_autoplaced yes)
	)
	(label "CLKI"
		(at 73.66 63.5 0)
		(fields_autoplaced yes)
	)
	(label "I_RO"
		(at 72.39 60.96 0)
		(fields_autoplaced yes)
	)
	(label "I_BI"
		(at 121.92 130.81 0)
		(fields_autoplaced yes)
	)
	(label "I_RO"
		(at 121.92 133.35 0)
		(fields_autoplaced yes)
	)
	(label "I_NRSTI"
		(at 72.39 55.88 0)
		(fields_autoplaced yes)
	)
	(label "I_CI"
		(at 121.92 125.73 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "RI"
		(shape input)
		(at 243.84 60.96 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "BO"
		(shape output)
		(at 243.84 58.42 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "CO"
		(shape output)
		(at 243.84 66.04 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "GND_OUT"
		(shape output)
		(at 33.02 119.38 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "GND"
		(shape passive)
		(at 33.02 109.22 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "GND_IF"
		(shape input)
		(at 33.02 114.3 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "RO"
		(shape output)
		(at 80.01 133.35 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "+1.8V_OUT"
		(shape output)
		(at 33.02 116.84 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "CI"
		(shape input)
		(at 80.01 125.73 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "+1V2"
		(shape passive)
		(at 33.02 106.68 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "V_IF"
		(shape input)
		(at 33.02 111.76 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "NRSTO"
		(shape output)
		(at 129.54 128.27 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "NRSTI"
		(shape input)
		(at 80.01 128.27 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "BI"
		(shape input)
		(at 80.01 130.81 180)
		(fields_autoplaced yes)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 279.4 241.3 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07066"
			(at 279.4 247.65 0)
		)
		(property "Value" "GND_2"
			(at 279.4 246.38 0)
		)
		(property "Footprint" ""
			(at 279.4 241.3 0)
		)
		(property "Datasheet" ""
			(at 279.4 241.3 0)
		)
		(property "Description" ""
			(at 279.4 241.3 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07066")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0435")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_IF_2")
		(at 36.83 114.3 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0266"
			(at 43.18 114.3 0)
		)
		(property "Value" "GND_IF_2"
			(at 40.64 114.2999 90)
		)
		(property "Footprint" ""
			(at 36.83 114.3 0)
		)
		(property "Datasheet" ""
			(at 36.83 114.3 0)
		)
		(property "Description" ""
			(at 36.83 114.3 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0266")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 307.34 236.22 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7042"
			(at 306.07 234.95 90)
		)
		(property "Value" "330µ/4V"
			(at 311.15 240.03 90)
		)
		(property "Footprint" "Capacitor_SMD:C_1210_3225Metric"
			(at 308.3052 240.03 0)
		)
		(property "Datasheet" "~"
			(at 307.34 236.22 0)
		)
		(property "Description" ""
			(at 307.34 236.22 0)
		)
		(property "Distributor" "D"
			(at 307.34 236.22 0)
		)
		(property "Manufacturer" "GRM32ER60G337ME05K"
			(at 307.34 236.22 0)
		)
		(property "OrderNr" "490-GRM32ER60G337ME05KCT-ND"
			(at 307.34 236.22 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7042")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C199")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 106.68 232.41 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07012"
			(at 106.68 238.76 0)
		)
		(property "Value" "GND_2"
			(at 106.68 237.49 0)
		)
		(property "Footprint" ""
			(at 106.68 232.41 0)
		)
		(property "Datasheet" ""
			(at 106.68 232.41 0)
		)
		(property "Description" ""
			(at 106.68 232.41 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07012")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0387")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 298.45 241.3 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07080"
			(at 298.45 247.65 0)
		)
		(property "Value" "GND_2"
			(at 298.45 246.38 0)
		)
		(property "Footprint" ""
			(at 298.45 241.3 0)
		)
		(property "Datasheet" ""
			(at 298.45 241.3 0)
		)
		(property "Description" ""
			(at 298.45 241.3 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07080")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0451")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+V_IF_2")
		(at 149.86 130.81 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0283"
			(at 149.86 134.62 0)
		)
		(property "Value" "+V_IF_2"
			(at 149.86 125.73 0)
		)
		(property "Footprint" ""
			(at 149.86 130.81 0)
		)
		(property "Datasheet" ""
			(at 149.86 130.81 0)
		)
		(property "Description" ""
			(at 149.86 130.81 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0283")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 128.27 88.9 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07032"
			(at 128.27 95.25 0)
		)
		(property "Value" "GND_2"
			(at 128.27 93.98 0)
		)
		(property "Footprint" ""
			(at 128.27 88.9 0)
		)
		(property "Datasheet" ""
			(at 128.27 88.9 0)
		)
		(property "Description" ""
			(at 128.27 88.9 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07032")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0405")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_2")
		(at 298.45 193.04 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR07077"
			(at 298.45 196.85 0)
		)
		(property "Value" "+1V8_2"
			(at 298.45 187.96 0)
		)
		(property "Footprint" ""
			(at 298.45 193.04 0)
		)
		(property "Datasheet" ""
			(at 298.45 193.04 0)
		)
		(property "Description" ""
			(at 298.45 193.04 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07077")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0448")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+V_IF_2")
		(at 88.9 118.11 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0267"
			(at 88.9 121.92 0)
		)
		(property "Value" "+V_IF_2"
			(at 88.9 113.03 0)
		)
		(property "Footprint" ""
			(at 88.9 118.11 0)
		)
		(property "Datasheet" ""
			(at 88.9 118.11 0)
		)
		(property "Description" ""
			(at 88.9 118.11 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0267")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 262.89 241.3 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07054"
			(at 262.89 247.65 0)
		)
		(property "Value" "GND_2"
			(at 262.89 246.38 0)
		)
		(property "Footprint" ""
			(at 262.89 241.3 0)
		)
		(property "Datasheet" ""
			(at 262.89 241.3 0)
		)
		(property "Description" ""
			(at 262.89 241.3 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07054")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0425")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 393.7 238.76 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#FLG07007"
			(at 393.7 236.855 0)
		)
		(property "Value" "PWR_FLAG"
			(at 393.7 234.95 0)
		)
		(property "Footprint" ""
			(at 393.7 238.76 0)
		)
		(property "Datasheet" "~"
			(at 393.7 238.76 0)
		)
		(property "Description" ""
			(at 393.7 238.76 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#FLG07007")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG023")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 306.07 198.12 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7041"
			(at 307.34 196.215 0)
		)
		(property "Value" "1µ"
			(at 307.34 201.295 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 306.07 198.12 0)
		)
		(property "Datasheet" ""
			(at 306.07 198.12 0)
		)
		(property "Description" ""
			(at 306.07 198.12 0)
		)
		(property "DK" ""
			(at 306.07 198.12 0)
		)
		(property "PARTNO" ""
			(at 306.07 198.12 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 306.07 198.12 0)
		)
		(property "Distributor" "D"
			(at 306.07 198.12 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 306.07 198.12 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7041")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C198")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 87.63 191.77 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C45"
			(at 88.9 189.865 0)
		)
		(property "Value" "100n"
			(at 88.9 195.58 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 87.63 191.77 0)
		)
		(property "Datasheet" ""
			(at 87.63 191.77 0)
		)
		(property "Description" ""
			(at 87.63 191.77 0)
		)
		(property "DK" ""
			(at 87.63 191.77 0)
		)
		(property "PARTNO" ""
			(at 87.63 191.77 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 87.63 191.77 0)
		)
		(property "Distributor" "D"
			(at 87.63 191.77 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 87.63 191.77 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "C45")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 36.83 119.38 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07018"
			(at 43.18 119.38 0)
		)
		(property "Value" "GND_2"
			(at 40.005 119.38 90)
		)
		(property "Footprint" ""
			(at 36.83 119.38 0)
		)
		(property "Datasheet" ""
			(at 36.83 119.38 0)
		)
		(property "Description" ""
			(at 36.83 119.38 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07018")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0375")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 298.45 198.12 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7038"
			(at 299.72 196.215 0)
		)
		(property "Value" "1µ"
			(at 299.72 201.295 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 298.45 198.12 0)
		)
		(property "Datasheet" ""
			(at 298.45 198.12 0)
		)
		(property "Description" ""
			(at 298.45 198.12 0)
		)
		(property "DK" ""
			(at 298.45 198.12 0)
		)
		(property "PARTNO" ""
			(at 298.45 198.12 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 298.45 198.12 0)
		)
		(property "Distributor" "D"
			(at 298.45 198.12 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 298.45 198.12 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7038")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C195")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_2")
		(at 262.89 231.14 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07053"
			(at 262.89 234.95 0)
		)
		(property "Value" "+1V2_2"
			(at 262.89 226.695 0)
		)
		(property "Footprint" ""
			(at 262.89 231.14 0)
		)
		(property "Datasheet" ""
			(at 262.89 231.14 0)
		)
		(property "Description" ""
			(at 262.89 231.14 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07053")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0424")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 87.63 232.41 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07006"
			(at 87.63 238.76 0)
		)
		(property "Value" "GND_2"
			(at 87.63 237.49 0)
		)
		(property "Footprint" ""
			(at 87.63 232.41 0)
		)
		(property "Datasheet" ""
			(at 87.63 232.41 0)
		)
		(property "Description" ""
			(at 87.63 232.41 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07006")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0381")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 143.51 135.89 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7010"
			(at 145.415 133.985 0)
		)
		(property "Value" "100n"
			(at 145.415 139.7 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 143.51 135.89 0)
		)
		(property "Datasheet" ""
			(at 143.51 135.89 0)
		)
		(property "Description" ""
			(at 143.51 135.89 0)
		)
		(property "DK" ""
			(at 143.51 135.89 0)
		)
		(property "PARTNO" ""
			(at 143.51 135.89 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 143.51 135.89 0)
		)
		(property "Distributor" "D"
			(at 143.51 135.89 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 143.51 135.89 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7010")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C167")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 118.11 199.39 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0261"
			(at 118.11 205.74 0)
		)
		(property "Value" "GND_2"
			(at 118.11 204.47 0)
		)
		(property "Footprint" ""
			(at 118.11 199.39 0)
		)
		(property "Datasheet" ""
			(at 118.11 199.39 0)
		)
		(property "Description" ""
			(at 118.11 199.39 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0261")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_2")
		(at 240.03 193.04 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U7010"
			(at 243.84 191.77 0)
		)
		(property "Value" "+0V8"
			(at 240.03 189.865 90)
		)
		(property "Footprint" ""
			(at 240.03 193.04 0)
		)
		(property "Datasheet" ""
			(at 240.03 193.04 0)
		)
		(property "Description" ""
			(at 240.03 193.04 0)
		)
		(property "Distributor" "-"
			(at 240.03 193.04 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "U7010")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U72")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_2")
		(at 124.46 184.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0270"
			(at 124.46 187.96 0)
		)
		(property "Value" "+1V8_2"
			(at 124.46 179.07 0)
		)
		(property "Footprint" ""
			(at 124.46 184.15 0)
		)
		(property "Datasheet" ""
			(at 124.46 184.15 0)
		)
		(property "Description" ""
			(at 124.46 184.15 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0270")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 256.54 198.12 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7024"
			(at 254 200.66 90)
		)
		(property "Value" "1µ"
			(at 257.175 199.39 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 256.54 198.12 0)
		)
		(property "Datasheet" ""
			(at 256.54 198.12 0)
		)
		(property "Description" ""
			(at 256.54 198.12 0)
		)
		(property "DK" ""
			(at 256.54 198.12 0)
		)
		(property "PARTNO" ""
			(at 256.54 198.12 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 256.54 198.12 0)
		)
		(property "Distributor" "D"
			(at 256.54 198.12 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 256.54 198.12 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7024")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C181")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 44.45 83.82 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07008"
			(at 44.45 90.17 0)
		)
		(property "Value" "GND_2"
			(at 44.45 88.9 0)
		)
		(property "Footprint" ""
			(at 44.45 83.82 0)
		)
		(property "Datasheet" ""
			(at 44.45 83.82 0)
		)
		(property "Description" ""
			(at 44.45 83.82 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07008")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0383")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 339.09 238.76 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#FLG07003"
			(at 339.09 236.855 0)
		)
		(property "Value" "PWR_FLAG"
			(at 337.185 234.315 0)
		)
		(property "Footprint" ""
			(at 339.09 238.76 0)
		)
		(property "Datasheet" "~"
			(at 339.09 238.76 0)
		)
		(property "Description" ""
			(at 339.09 238.76 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#FLG07003")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG019")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_2")
		(at 298.45 231.14 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07079"
			(at 298.45 234.95 0)
		)
		(property "Value" "+1V2_2"
			(at 298.45 226.695 0)
		)
		(property "Footprint" ""
			(at 298.45 231.14 0)
		)
		(property "Datasheet" ""
			(at 298.45 231.14 0)
		)
		(property "Description" ""
			(at 298.45 231.14 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07079")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0450")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 59.69 36.83 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7004"
			(at 57.15 34.29 90)
		)
		(property "Value" "1µ"
			(at 58.42 37.465 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 59.69 36.83 0)
		)
		(property "Datasheet" ""
			(at 59.69 36.83 0)
		)
		(property "Description" ""
			(at 59.69 36.83 0)
		)
		(property "DK" ""
			(at 59.69 36.83 0)
		)
		(property "PARTNO" ""
			(at 59.69 36.83 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 59.69 36.83 0)
		)
		(property "Distributor" "D"
			(at 59.69 36.83 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 59.69 36.83 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7004")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C161")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_IF_2")
		(at 88.9 148.59 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0284"
			(at 88.9 154.94 0)
		)
		(property "Value" "GND_IF_2"
			(at 88.9 153.67 0)
		)
		(property "Footprint" ""
			(at 88.9 148.59 0)
		)
		(property "Datasheet" ""
			(at 88.9 148.59 0)
		)
		(property "Description" ""
			(at 88.9 148.59 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0284")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 234.95 241.3 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07038"
			(at 234.95 247.65 0)
		)
		(property "Value" "GND_2"
			(at 234.95 246.38 0)
		)
		(property "Footprint" ""
			(at 234.95 241.3 0)
		)
		(property "Datasheet" ""
			(at 234.95 241.3 0)
		)
		(property "Description" ""
			(at 234.95 241.3 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07038")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0411")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_2")
		(at 256.54 193.04 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U7013"
			(at 260.35 191.77 0)
		)
		(property "Value" "+0V8"
			(at 256.54 189.865 90)
		)
		(property "Footprint" ""
			(at 256.54 193.04 0)
		)
		(property "Datasheet" ""
			(at 256.54 193.04 0)
		)
		(property "Description" ""
			(at 256.54 193.04 0)
		)
		(property "Distributor" "-"
			(at 256.54 193.04 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "U7013")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U75")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_2")
		(at 107.95 33.02 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07024"
			(at 107.95 36.83 0)
		)
		(property "Value" "+1V2_2"
			(at 107.95 28.575 0)
		)
		(property "Footprint" ""
			(at 107.95 33.02 0)
		)
		(property "Datasheet" ""
			(at 107.95 33.02 0)
		)
		(property "Description" ""
			(at 107.95 33.02 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07024")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0399")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 87.63 226.06 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7002"
			(at 88.9 224.155 0)
		)
		(property "Value" "100n"
			(at 88.9 229.87 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 87.63 226.06 0)
		)
		(property "Datasheet" ""
			(at 87.63 226.06 0)
		)
		(property "Description" ""
			(at 87.63 226.06 0)
		)
		(property "DK" ""
			(at 87.63 226.06 0)
		)
		(property "PARTNO" ""
			(at 87.63 226.06 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 87.63 226.06 0)
		)
		(property "Distributor" "D"
			(at 87.63 226.06 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 87.63 226.06 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7002")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C159")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_2")
		(at 152.4 77.47 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR07047"
			(at 152.4 73.66 0)
		)
		(property "Value" "+1V8_2"
			(at 152.4 82.55 0)
		)
		(property "Footprint" ""
			(at 152.4 77.47 0)
		)
		(property "Datasheet" ""
			(at 152.4 77.47 0)
		)
		(property "Description" ""
			(at 152.4 77.47 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07047")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0419")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 251.46 198.12 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7023"
			(at 248.92 200.66 90)
		)
		(property "Value" "1µ"
			(at 252.095 199.39 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 251.46 198.12 0)
		)
		(property "Datasheet" ""
			(at 251.46 198.12 0)
		)
		(property "Description" ""
			(at 251.46 198.12 0)
		)
		(property "DK" ""
			(at 251.46 198.12 0)
		)
		(property "PARTNO" ""
			(at 251.46 198.12 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 251.46 198.12 0)
		)
		(property "Distributor" "D"
			(at 251.46 198.12 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 251.46 198.12 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7023")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C180")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 279.4 236.22 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7033"
			(at 280.035 234.315 0)
		)
		(property "Value" "100n"
			(at 280.67 240.03 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 279.4 236.22 0)
		)
		(property "Datasheet" ""
			(at 279.4 236.22 0)
		)
		(property "Description" ""
			(at 279.4 236.22 0)
		)
		(property "DK" ""
			(at 279.4 236.22 0)
		)
		(property "PARTNO" ""
			(at 279.4 236.22 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 279.4 236.22 0)
		)
		(property "Distributor" "D"
			(at 279.4 236.22 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 279.4 236.22 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7033")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C190")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 44.45 80.01 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7003"
			(at 43.18 78.105 90)
		)
		(property "Value" "100n"
			(at 43.18 86.995 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 44.45 80.01 0)
		)
		(property "Datasheet" ""
			(at 44.45 80.01 0)
		)
		(property "Description" ""
			(at 44.45 80.01 0)
		)
		(property "DK" ""
			(at 44.45 80.01 0)
		)
		(property "PARTNO" ""
			(at 44.45 80.01 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 44.45 80.01 0)
		)
		(property "Distributor" "D"
			(at 44.45 80.01 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 44.45 80.01 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7003")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C160")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 313.69 198.12 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7043"
			(at 314.325 196.215 0)
		)
		(property "Value" "1µ"
			(at 314.96 201.93 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 313.69 198.12 0)
		)
		(property "Datasheet" ""
			(at 313.69 198.12 0)
		)
		(property "Description" ""
			(at 313.69 198.12 0)
		)
		(property "DK" ""
			(at 313.69 198.12 0)
		)
		(property "PARTNO" ""
			(at 313.69 198.12 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 313.69 198.12 0)
		)
		(property "Distributor" "D"
			(at 313.69 198.12 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 313.69 198.12 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7043")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C200")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_2")
		(at 205.74 33.02 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07120"
			(at 205.74 36.83 0)
		)
		(property "Value" "+1V2_2"
			(at 205.74 28.575 0)
		)
		(property "Footprint" ""
			(at 205.74 33.02 0)
		)
		(property "Datasheet" ""
			(at 205.74 33.02 0)
		)
		(property "Description" ""
			(at 205.74 33.02 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07120")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0483")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+6.5V")
		(at 87.63 184.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0155"
			(at 87.63 187.96 0)
		)
		(property "Value" "+6.5V"
			(at 87.63 179.07 0)
		)
		(property "Footprint" ""
			(at 87.63 184.15 0)
		)
		(property "Datasheet" ""
			(at 87.63 184.15 0)
		)
		(property "Description" ""
			(at 87.63 184.15 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0155")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 298.45 203.2 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07078"
			(at 298.45 209.55 0)
		)
		(property "Value" "GND_2"
			(at 298.45 208.28 0)
		)
		(property "Footprint" ""
			(at 298.45 203.2 0)
		)
		(property "Datasheet" ""
			(at 298.45 203.2 0)
		)
		(property "Description" ""
			(at 298.45 203.2 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07078")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0449")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 149.86 135.89 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7011"
			(at 151.13 133.985 0)
		)
		(property "Value" "100n"
			(at 151.13 139.7 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 149.86 135.89 0)
		)
		(property "Datasheet" ""
			(at 149.86 135.89 0)
		)
		(property "Description" ""
			(at 149.86 135.89 0)
		)
		(property "DK" ""
			(at 149.86 135.89 0)
		)
		(property "PARTNO" ""
			(at 149.86 135.89 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 149.86 135.89 0)
		)
		(property "Distributor" "D"
			(at 149.86 135.89 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 149.86 135.89 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7011")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C168")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+V_IF")
		(at 345.44 238.76 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR07101"
			(at 345.44 242.57 0)
		)
		(property "Value" "+V_IF"
			(at 346.075 234.315 0)
		)
		(property "Footprint" ""
			(at 345.44 238.76 0)
		)
		(property "Datasheet" ""
			(at 345.44 238.76 0)
		)
		(property "Description" ""
			(at 345.44 238.76 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07101")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0470")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 233.68 203.2 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07036"
			(at 233.68 209.55 0)
		)
		(property "Value" "GND_2"
			(at 233.68 208.28 0)
		)
		(property "Footprint" ""
			(at 233.68 203.2 0)
		)
		(property "Datasheet" ""
			(at 233.68 203.2 0)
		)
		(property "Description" ""
			(at 233.68 203.2 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07036")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0409")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 107.95 88.9 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07025"
			(at 107.95 95.25 0)
		)
		(property "Value" "GND_2"
			(at 107.95 93.98 0)
		)
		(property "Footprint" ""
			(at 107.95 88.9 0)
		)
		(property "Datasheet" ""
			(at 107.95 88.9 0)
		)
		(property "Description" ""
			(at 107.95 88.9 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07025")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0400")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_IF_2")
		(at 149.86 143.51 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0322"
			(at 149.86 149.86 0)
		)
		(property "Value" "GND_IF_2"
			(at 149.86 148.59 0)
		)
		(property "Footprint" ""
			(at 149.86 143.51 0)
		)
		(property "Datasheet" ""
			(at 149.86 143.51 0)
		)
		(property "Description" ""
			(at 149.86 143.51 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0322")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 34.29 72.39 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07002"
			(at 34.29 78.74 0)
		)
		(property "Value" "GND_2"
			(at 34.29 77.47 0)
		)
		(property "Footprint" ""
			(at 34.29 72.39 0)
		)
		(property "Datasheet" ""
			(at 34.29 72.39 0)
		)
		(property "Description" ""
			(at 34.29 72.39 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07002")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0377")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_2")
		(at 228.6 78.74 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR07123"
			(at 224.79 78.74 0)
		)
		(property "Value" "+1V8_2"
			(at 234.442 78.74 90)
		)
		(property "Footprint" ""
			(at 228.6 78.74 0)
		)
		(property "Datasheet" ""
			(at 228.6 78.74 0)
		)
		(property "Description" ""
			(at 228.6 78.74 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07123")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0486")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 306.07 203.2 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07084"
			(at 306.07 209.55 0)
		)
		(property "Value" "GND_2"
			(at 306.07 208.28 0)
		)
		(property "Footprint" ""
			(at 306.07 203.2 0)
		)
		(property "Datasheet" ""
			(at 306.07 203.2 0)
		)
		(property "Description" ""
			(at 306.07 203.2 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07084")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0453")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 262.89 236.22 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7028"
			(at 263.525 234.315 0)
		)
		(property "Value" "1µ"
			(at 264.16 240.03 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 262.89 236.22 0)
		)
		(property "Datasheet" ""
			(at 262.89 236.22 0)
		)
		(property "Description" ""
			(at 262.89 236.22 0)
		)
		(property "DK" ""
			(at 262.89 236.22 0)
		)
		(property "PARTNO" ""
			(at 262.89 236.22 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 262.89 236.22 0)
		)
		(property "Distributor" "D"
			(at 262.89 236.22 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 262.89 236.22 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7028")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C185")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 82.55 36.83 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7007"
			(at 80.01 34.29 90)
		)
		(property "Value" "1µ"
			(at 81.28 37.465 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 82.55 36.83 0)
		)
		(property "Datasheet" ""
			(at 82.55 36.83 0)
		)
		(property "Description" ""
			(at 82.55 36.83 0)
		)
		(property "DK" ""
			(at 82.55 36.83 0)
		)
		(property "PARTNO" ""
			(at 82.55 36.83 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 82.55 36.83 0)
		)
		(property "Distributor" "D"
			(at 82.55 36.83 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 82.55 36.83 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7007")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C164")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 88.9 88.9 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07020"
			(at 88.9 95.25 0)
		)
		(property "Value" "GND_2"
			(at 88.9 93.98 0)
		)
		(property "Footprint" ""
			(at 88.9 88.9 0)
		)
		(property "Datasheet" ""
			(at 88.9 88.9 0)
		)
		(property "Description" ""
			(at 88.9 88.9 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07020")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0395")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 372.11 238.76 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#FLG07006"
			(at 372.11 240.665 0)
		)
		(property "Value" "PWR_FLAG"
			(at 375.285 243.205 0)
		)
		(property "Footprint" ""
			(at 372.11 238.76 0)
		)
		(property "Datasheet" "~"
			(at 372.11 238.76 0)
		)
		(property "Description" ""
			(at 372.11 238.76 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#FLG07006")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG022")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_2")
		(at 85.09 78.74 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR07019"
			(at 88.9 78.74 0)
		)
		(property "Value" "+1V8_2"
			(at 77.724 78.994 90)
		)
		(property "Footprint" ""
			(at 85.09 78.74 0)
		)
		(property "Datasheet" ""
			(at 85.09 78.74 0)
		)
		(property "Description" ""
			(at 85.09 78.74 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07019")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0394")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 124.46 199.39 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0268"
			(at 124.46 205.74 0)
		)
		(property "Value" "GND_2"
			(at 124.46 204.47 0)
		)
		(property "Footprint" ""
			(at 124.46 199.39 0)
		)
		(property "Datasheet" ""
			(at 124.46 199.39 0)
		)
		(property "Description" ""
			(at 124.46 199.39 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0268")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 313.69 203.2 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07090"
			(at 313.69 209.55 0)
		)
		(property "Value" "GND_2"
			(at 313.69 208.28 0)
		)
		(property "Footprint" ""
			(at 313.69 203.2 0)
		)
		(property "Datasheet" ""
			(at 313.69 203.2 0)
		)
		(property "Description" ""
			(at 313.69 203.2 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07090")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0459")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 124.46 227.33 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7006"
			(at 125.73 225.425 0)
		)
		(property "Value" "1µ"
			(at 125.73 231.14 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 124.46 227.33 0)
		)
		(property "Datasheet" ""
			(at 124.46 227.33 0)
		)
		(property "Description" ""
			(at 124.46 227.33 0)
		)
		(property "DK" ""
			(at 124.46 227.33 0)
		)
		(property "PARTNO" ""
			(at 124.46 227.33 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 124.46 227.33 0)
		)
		(property "Distributor" "D"
			(at 124.46 227.33 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 124.46 227.33 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7006")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C163")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 254 36.83 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7061"
			(at 251.46 34.29 90)
		)
		(property "Value" "1µ"
			(at 252.73 37.465 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 254 36.83 0)
		)
		(property "Datasheet" ""
			(at 254 36.83 0)
		)
		(property "Description" ""
			(at 254 36.83 0)
		)
		(property "DK" ""
			(at 254 36.83 0)
		)
		(property "PARTNO" ""
			(at 254 36.83 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 254 36.83 0)
		)
		(property "Distributor" "D"
			(at 254 36.83 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 254 36.83 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7061")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C217")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_2")
		(at 34.29 53.34 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07001"
			(at 34.29 57.15 0)
		)
		(property "Value" "+1V8_2"
			(at 34.29 48.26 0)
		)
		(property "Footprint" ""
			(at 34.29 53.34 0)
		)
		(property "Datasheet" ""
			(at 34.29 53.34 0)
		)
		(property "Description" ""
			(at 34.29 53.34 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07001")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0376")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Isolator:ADuM1411")
		(at 105.41 133.35 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U7004"
			(at 105.41 113.03 0)
		)
		(property "Value" "ADUM141E0BRZ-RL7"
			(at 105.41 115.57 0)
		)
		(property "Footprint" "Package_SO:SOIC-16_3.9x9.9mm_P1.27mm"
			(at 105.41 151.13 0)
		)
		(property "Datasheet" "https://www.analog.com/media/en/technical-documentation/data-sheets/ADUM1410_1411_1412.pdf"
			(at 85.09 133.35 0)
		)
		(property "Description" ""
			(at 105.41 133.35 0)
		)
		(property "Distributor" "D"
			(at 105.41 133.35 0)
		)
		(property "Manufacturer" "ADUM141E0BRZ-RL7"
			(at 105.41 133.35 0)
		)
		(property "OrderNr" "505-ADUM141E0BRZ-RL7CT-ND"
			(at 105.41 133.35 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "flex3"
				(path
					(reference "U7004")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U66")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_2")
		(at 85.09 76.2 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U7006"
			(at 83.82 72.39 0)
		)
		(property "Value" "+0V8"
			(at 81.915 76.2 90)
		)
		(property "Footprint" ""
			(at 85.09 76.2 0)
		)
		(property "Datasheet" ""
			(at 85.09 76.2 0)
		)
		(property "Description" ""
			(at 85.09 76.2 0)
		)
		(property "Distributor" "-"
			(at 85.09 76.2 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "U7006")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U68")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_2")
		(at 181.61 76.2 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U7024"
			(at 180.34 72.39 0)
		)
		(property "Value" "+0V8"
			(at 178.435 76.2 90)
		)
		(property "Footprint" ""
			(at 181.61 76.2 0)
		)
		(property "Datasheet" ""
			(at 181.61 76.2 0)
		)
		(property "Description" ""
			(at 181.61 76.2 0)
		)
		(property "Distributor" "-"
			(at 181.61 76.2 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "U7024")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U85")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 71.12 36.83 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7005"
			(at 68.58 34.29 90)
		)
		(property "Value" "1µ"
			(at 69.85 37.465 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 71.12 36.83 0)
		)
		(property "Datasheet" ""
			(at 71.12 36.83 0)
		)
		(property "Description" ""
			(at 71.12 36.83 0)
		)
		(property "DK" ""
			(at 71.12 36.83 0)
		)
		(property "PARTNO" ""
			(at 71.12 36.83 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 71.12 36.83 0)
		)
		(property "Distributor" "D"
			(at 71.12 36.83 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 71.12 36.83 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7005")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C162")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_2")
		(at 279.4 231.14 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07065"
			(at 279.4 234.95 0)
		)
		(property "Value" "+1V2_2"
			(at 279.4 226.695 0)
		)
		(property "Footprint" ""
			(at 279.4 231.14 0)
		)
		(property "Datasheet" ""
			(at 279.4 231.14 0)
		)
		(property "Description" ""
			(at 279.4 231.14 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07065")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0434")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+V_IF_2")
		(at 36.83 111.76 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0255"
			(at 33.02 111.76 0)
		)
		(property "Value" "+V_IF_2"
			(at 40.64 111.7599 90)
		)
		(property "Footprint" ""
			(at 36.83 111.76 0)
		)
		(property "Datasheet" ""
			(at 36.83 111.76 0)
		)
		(property "Description" ""
			(at 36.83 111.76 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0255")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 256.54 203.2 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07049"
			(at 256.54 209.55 0)
		)
		(property "Value" "GND_2"
			(at 256.54 208.28 0)
		)
		(property "Footprint" ""
			(at 256.54 203.2 0)
		)
		(property "Datasheet" ""
			(at 256.54 203.2 0)
		)
		(property "Description" ""
			(at 256.54 203.2 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07049")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0420")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 185.42 88.9 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07119"
			(at 185.42 95.25 0)
		)
		(property "Value" "GND_2"
			(at 185.42 93.98 0)
		)
		(property "Footprint" ""
			(at 185.42 88.9 0)
		)
		(property "Datasheet" ""
			(at 185.42 88.9 0)
		)
		(property "Description" ""
			(at 185.42 88.9 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07119")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0482")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_2")
		(at 251.46 193.04 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U7012"
			(at 255.27 191.77 0)
		)
		(property "Value" "+0V8"
			(at 251.46 189.865 90)
		)
		(property "Footprint" ""
			(at 251.46 193.04 0)
		)
		(property "Datasheet" ""
			(at 251.46 193.04 0)
		)
		(property "Description" ""
			(at 251.46 193.04 0)
		)
		(property "Distributor" "-"
			(at 251.46 193.04 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "U7012")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U74")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 222.25 236.22 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7013"
			(at 222.885 234.315 0)
		)
		(property "Value" "10µ/16V"
			(at 223.52 240.03 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 222.25 236.22 0)
		)
		(property "Datasheet" ""
			(at 222.25 236.22 0)
		)
		(property "Description" ""
			(at 222.25 236.22 0)
		)
		(property "DK" ""
			(at 222.25 236.22 0)
		)
		(property "PARTNO" ""
			(at 222.25 236.22 0)
		)
		(property "Manufacturer" "GRT188R61C106KE13D"
			(at 222.25 236.22 0)
		)
		(property "Distributor" "D"
			(at 222.25 236.22 0)
		)
		(property "OrderNr" "490-12317-1-ND"
			(at 222.25 236.22 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7013")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C170")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 157.48 36.83 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7026"
			(at 154.94 34.29 90)
		)
		(property "Value" "1µ"
			(at 156.21 37.465 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 157.48 36.83 0)
		)
		(property "Datasheet" ""
			(at 157.48 36.83 0)
		)
		(property "Description" ""
			(at 157.48 36.83 0)
		)
		(property "DK" ""
			(at 157.48 36.83 0)
		)
		(property "PARTNO" ""
			(at 157.48 36.83 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 157.48 36.83 0)
		)
		(property "Distributor" "D"
			(at 157.48 36.83 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 157.48 36.83 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7026")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C183")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 240.03 71.12 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R7006"
			(at 243.84 69.85 90)
		)
		(property "Value" "10k"
			(at 241.935 70.485 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 238.252 71.12 90)
		)
		(property "Datasheet" "~"
			(at 240.03 71.12 0)
		)
		(property "Description" ""
			(at 240.03 71.12 0)
		)
		(property "Manufacturer" "ERJ-H3EF1002V"
			(at 240.03 71.12 0)
		)
		(property "Distributor" "D"
			(at 240.03 71.12 0)
		)
		(property "OrderNr" "10-ERJ-H3EF1002VCT-ND"
			(at 240.03 71.12 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "R7006")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R53")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 193.04 36.83 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7057"
			(at 186.69 34.29 90)
		)
		(property "Value" "1µ"
			(at 187.96 37.465 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 193.04 36.83 0)
		)
		(property "Datasheet" ""
			(at 193.04 36.83 0)
		)
		(property "Description" ""
			(at 193.04 36.83 0)
		)
		(property "DK" ""
			(at 193.04 36.83 0)
		)
		(property "PARTNO" ""
			(at 193.04 36.83 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 193.04 36.83 0)
		)
		(property "Distributor" "D"
			(at 193.04 36.83 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 193.04 36.83 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7057")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C213")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+3V3_EXT")
		(at 372.11 238.76 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR07107"
			(at 372.11 242.57 0)
		)
		(property "Value" "+3V3_EXT"
			(at 375.285 234.315 0)
		)
		(property "Footprint" ""
			(at 372.11 238.76 0)
		)
		(property "Datasheet" ""
			(at 372.11 238.76 0)
		)
		(property "Description" ""
			(at 372.11 238.76 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07107")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0476")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_2")
		(at 132.08 76.2 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U7008"
			(at 133.35 80.01 0)
		)
		(property "Value" "+0V8"
			(at 135.255 76.2 90)
		)
		(property "Footprint" ""
			(at 132.08 76.2 0)
		)
		(property "Datasheet" ""
			(at 132.08 76.2 0)
		)
		(property "Description" ""
			(at 132.08 76.2 0)
		)
		(property "Distributor" "-"
			(at 132.08 76.2 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "U7008")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U70")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 242.57 36.83 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7060"
			(at 240.03 34.29 90)
		)
		(property "Value" "1µ"
			(at 241.3 37.465 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 242.57 36.83 0)
		)
		(property "Datasheet" ""
			(at 242.57 36.83 0)
		)
		(property "Description" ""
			(at 242.57 36.83 0)
		)
		(property "DK" ""
			(at 242.57 36.83 0)
		)
		(property "PARTNO" ""
			(at 242.57 36.83 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 242.57 36.83 0)
		)
		(property "Distributor" "D"
			(at 242.57 36.83 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 242.57 36.83 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7060")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C216")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 365.76 238.76 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#FLG07005"
			(at 365.76 236.855 0)
		)
		(property "Value" "PWR_FLAG"
			(at 363.22 234.315 0)
		)
		(property "Footprint" ""
			(at 365.76 238.76 0)
		)
		(property "Datasheet" "~"
			(at 365.76 238.76 0)
		)
		(property "Description" ""
			(at 365.76 238.76 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#FLG07005")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG021")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_2")
		(at 87.63 217.17 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07005"
			(at 87.63 220.98 0)
		)
		(property "Value" "+1V8_2"
			(at 87.63 212.09 0)
		)
		(property "Footprint" ""
			(at 87.63 217.17 0)
		)
		(property "Datasheet" ""
			(at 87.63 217.17 0)
		)
		(property "Description" ""
			(at 87.63 217.17 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07005")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0380")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_2")
		(at 36.83 116.84 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07017"
			(at 33.02 116.84 0)
		)
		(property "Value" "+1V8_2"
			(at 40.005 116.84 90)
		)
		(property "Footprint" ""
			(at 36.83 116.84 0)
		)
		(property "Datasheet" ""
			(at 36.83 116.84 0)
		)
		(property "Description" ""
			(at 36.83 116.84 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07017")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0374")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_2")
		(at 306.07 193.04 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR07083"
			(at 306.07 196.85 0)
		)
		(property "Value" "+1V8_2"
			(at 306.07 187.96 0)
		)
		(property "Footprint" ""
			(at 306.07 193.04 0)
		)
		(property "Datasheet" ""
			(at 306.07 193.04 0)
		)
		(property "Description" ""
			(at 306.07 193.04 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07083")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0452")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 87.63 199.39 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0260"
			(at 87.63 205.74 0)
		)
		(property "Value" "GND_2"
			(at 87.63 204.47 0)
		)
		(property "Footprint" ""
			(at 87.63 199.39 0)
		)
		(property "Datasheet" ""
			(at 87.63 199.39 0)
		)
		(property "Description" ""
			(at 87.63 199.39 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0260")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 222.25 241.3 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07030"
			(at 222.25 247.65 0)
		)
		(property "Value" "GND_2"
			(at 222.25 246.38 0)
		)
		(property "Footprint" ""
			(at 222.25 241.3 0)
		)
		(property "Datasheet" ""
			(at 222.25 241.3 0)
		)
		(property "Description" ""
			(at 222.25 241.3 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07030")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0404")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_EXT")
		(at 365.76 238.76 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR07104"
			(at 365.76 245.11 0)
		)
		(property "Value" "GND_EXT"
			(at 363.855 243.205 0)
		)
		(property "Footprint" ""
			(at 365.76 238.76 0)
		)
		(property "Datasheet" ""
			(at 365.76 238.76 0)
		)
		(property "Description" ""
			(at 365.76 238.76 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07104")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0473")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 240.03 198.12 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7018"
			(at 237.49 200.66 90)
		)
		(property "Value" "1µ"
			(at 240.665 199.39 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 240.03 198.12 0)
		)
		(property "Datasheet" ""
			(at 240.03 198.12 0)
		)
		(property "Description" ""
			(at 240.03 198.12 0)
		)
		(property "DK" ""
			(at 240.03 198.12 0)
		)
		(property "PARTNO" ""
			(at 240.03 198.12 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 240.03 198.12 0)
		)
		(property "Distributor" "D"
			(at 240.03 198.12 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 240.03 198.12 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7018")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C175")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 240.03 203.2 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07039"
			(at 240.03 209.55 0)
		)
		(property "Value" "GND_2"
			(at 240.03 208.28 0)
		)
		(property "Footprint" ""
			(at 240.03 203.2 0)
		)
		(property "Datasheet" ""
			(at 240.03 203.2 0)
		)
		(property "Description" ""
			(at 240.03 203.2 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07039")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0412")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 233.68 198.12 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7016"
			(at 231.14 200.66 90)
		)
		(property "Value" "1µ"
			(at 234.315 199.39 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 233.68 198.12 0)
		)
		(property "Datasheet" ""
			(at 233.68 198.12 0)
		)
		(property "Description" ""
			(at 233.68 198.12 0)
		)
		(property "DK" ""
			(at 233.68 198.12 0)
		)
		(property "PARTNO" ""
			(at 233.68 198.12 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 233.68 198.12 0)
		)
		(property "Distributor" "D"
			(at 233.68 198.12 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 233.68 198.12 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7016")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C173")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 123.19 148.59 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07018"
			(at 123.19 154.94 0)
		)
		(property "Value" "GND_2"
			(at 123.19 153.67 0)
		)
		(property "Footprint" ""
			(at 123.19 148.59 0)
		)
		(property "Datasheet" ""
			(at 123.19 148.59 0)
		)
		(property "Description" ""
			(at 123.19 148.59 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07018")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0393")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_2")
		(at 124.46 217.17 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U7005"
			(at 128.27 215.9 0)
		)
		(property "Value" "+0V8"
			(at 124.46 213.995 90)
		)
		(property "Footprint" ""
			(at 124.46 217.17 0)
		)
		(property "Datasheet" ""
			(at 124.46 217.17 0)
		)
		(property "Description" ""
			(at 124.46 217.17 0)
		)
		(property "Distributor" "-"
			(at 124.46 217.17 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "U7005")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U67")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_2")
		(at 233.68 193.04 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U7009"
			(at 237.49 191.77 0)
		)
		(property "Value" "+0V8"
			(at 233.68 189.865 90)
		)
		(property "Footprint" ""
			(at 233.68 193.04 0)
		)
		(property "Datasheet" ""
			(at 233.68 193.04 0)
		)
		(property "Description" ""
			(at 233.68 193.04 0)
		)
		(property "Distributor" "-"
			(at 233.68 193.04 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "U7009")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U71")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Oscillator:ASDMB-xxxMHz")
		(at 31.75 63.5 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U7001"
			(at 27.94 57.15 0)
		)
		(property "Value" "25MHz"
			(at 27.94 69.85 0)
		)
		(property "Footprint" "Oscillator:Oscillator_SMD_EuroQuartz_XO32-4Pin_3.2x2.5mm"
			(at 31.75 63.5 0)
		)
		(property "Datasheet" "https://abracon.com/Oscillators/ASDMB.pdf"
			(at 39.37 52.07 0)
		)
		(property "Description" ""
			(at 31.75 63.5 0)
		)
		(property "Distributor" "D"
			(at 31.75 63.5 0)
		)
		(property "OrderNr" "50-ECS-TXO-3225MV-250-CT-ND"
			(at 31.75 63.5 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(instances
			(project "flex3"
				(path
					(reference "U7001")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U63")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 92.71 21.59 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#FLG07002"
			(at 92.71 23.495 0)
		)
		(property "Value" "PWR_FLAG"
			(at 92.71 26.035 0)
		)
		(property "Footprint" ""
			(at 92.71 21.59 0)
		)
		(property "Datasheet" "~"
			(at 92.71 21.59 0)
		)
		(property "Description" ""
			(at 92.71 21.59 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#FLG07002")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG018")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_2")
		(at 143.51 130.81 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR07022"
			(at 143.51 134.62 0)
		)
		(property "Value" "+1V8_2"
			(at 143.51 125.73 0)
		)
		(property "Footprint" ""
			(at 143.51 130.81 0)
		)
		(property "Datasheet" ""
			(at 143.51 130.81 0)
		)
		(property "Description" ""
			(at 143.51 130.81 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07022")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0397")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 36.83 109.22 90)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR07025"
			(at 43.18 109.22 0)
		)
		(property "Value" "GND_2"
			(at 40.005 109.22 90)
		)
		(property "Footprint" ""
			(at 36.83 109.22 0)
		)
		(property "Datasheet" ""
			(at 36.83 109.22 0)
		)
		(property "Description" ""
			(at 36.83 109.22 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07025")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0371")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 307.34 241.3 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR07086"
			(at 307.34 247.65 0)
		)
		(property "Value" "GND_2"
			(at 307.34 246.38 0)
		)
		(property "Footprint" ""
			(at 307.34 241.3 0)
		)
		(property "Datasheet" ""
			(at 307.34 241.3 0)
		)
		(property "Description" ""
			(at 307.34 241.3 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07086")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0455")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_2")
		(at 250.19 231.14 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07044"
			(at 250.19 234.95 0)
		)
		(property "Value" "+1V2_2"
			(at 250.19 226.695 0)
		)
		(property "Footprint" ""
			(at 250.19 231.14 0)
		)
		(property "Datasheet" ""
			(at 250.19 231.14 0)
		)
		(property "Description" ""
			(at 250.19 231.14 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07044")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0416")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 393.7 238.76 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07110"
			(at 393.7 245.11 0)
		)
		(property "Value" "GND_2"
			(at 393.7 243.84 0)
		)
		(property "Footprint" ""
			(at 393.7 238.76 0)
		)
		(property "Datasheet" ""
			(at 393.7 238.76 0)
		)
		(property "Description" ""
			(at 393.7 238.76 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07110")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0478")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_2")
		(at 92.71 21.59 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07021"
			(at 92.71 25.4 0)
		)
		(property "Value" "+1V2_2"
			(at 92.71 17.145 0)
		)
		(property "Footprint" ""
			(at 92.71 21.59 0)
		)
		(property "Datasheet" ""
			(at 92.71 21.59 0)
		)
		(property "Description" ""
			(at 92.71 21.59 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07021")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0396")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:NCP114-SN")
		(at 106.68 222.25 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U7003"
			(at 106.68 212.725 0)
		)
		(property "Value" "NCP114ASN080T1G"
			(at 106.68 215.265 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5"
			(at 106.68 222.25 0)
		)
		(property "Datasheet" ""
			(at 106.68 222.25 0)
		)
		(property "Description" ""
			(at 106.68 222.25 0)
		)
		(property "Distributor" "D"
			(at 106.68 222.25 0)
		)
		(property "Manufacturer" "NCP114ASN080T1G"
			(at 106.68 222.25 0)
		)
		(property "OrderNr" "488-NCP114ASN080T1GCT-ND"
			(at 106.68 222.25 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "5")
		(instances
			(project "flex3"
				(path
					(reference "U7003")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U65")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 298.45 236.22 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7039"
			(at 299.085 234.315 0)
		)
		(property "Value" "100n"
			(at 299.72 240.03 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 298.45 236.22 0)
		)
		(property "Datasheet" ""
			(at 298.45 236.22 0)
		)
		(property "Description" ""
			(at 298.45 236.22 0)
		)
		(property "DK" ""
			(at 298.45 236.22 0)
		)
		(property "PARTNO" ""
			(at 298.45 236.22 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 298.45 236.22 0)
		)
		(property "Distributor" "D"
			(at 298.45 236.22 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 298.45 236.22 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7039")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C196")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_2")
		(at 123.19 118.11 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07017"
			(at 123.19 121.92 0)
		)
		(property "Value" "+1V8_2"
			(at 123.19 113.03 0)
		)
		(property "Footprint" ""
			(at 123.19 118.11 0)
		)
		(property "Datasheet" ""
			(at 123.19 118.11 0)
		)
		(property "Description" ""
			(at 123.19 118.11 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07017")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0392")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 152.4 72.39 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R7003"
			(at 156.21 71.12 90)
		)
		(property "Value" "10k"
			(at 154.305 71.755 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 150.622 72.39 90)
		)
		(property "Datasheet" "~"
			(at 152.4 72.39 0)
		)
		(property "Description" ""
			(at 152.4 72.39 0)
		)
		(property "Manufacturer" "ERJ-H3EF1002V"
			(at 152.4 72.39 0)
		)
		(property "Distributor" "D"
			(at 152.4 72.39 0)
		)
		(property "OrderNr" "10-ERJ-H3EF1002VCT-ND"
			(at 152.4 72.39 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "R7003")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R50")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 224.79 88.9 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07122"
			(at 224.79 95.25 0)
		)
		(property "Value" "GND_2"
			(at 224.79 93.98 0)
		)
		(property "Footprint" ""
			(at 224.79 88.9 0)
		)
		(property "Datasheet" ""
			(at 224.79 88.9 0)
		)
		(property "Description" ""
			(at 224.79 88.9 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07122")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0485")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 119.38 36.83 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7012"
			(at 116.205 34.29 90)
		)
		(property "Value" "1µ"
			(at 118.11 37.465 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 119.38 36.83 0)
		)
		(property "Datasheet" ""
			(at 119.38 36.83 0)
		)
		(property "Description" ""
			(at 119.38 36.83 0)
		)
		(property "DK" ""
			(at 119.38 36.83 0)
		)
		(property "PARTNO" ""
			(at 119.38 36.83 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 119.38 36.83 0)
		)
		(property "Distributor" "D"
			(at 119.38 36.83 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 119.38 36.83 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7012")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C169")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:MCP1824")
		(at 106.68 186.69 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U39"
			(at 103.505 179.705 0)
		)
		(property "Value" "MCP1824T-1802E"
			(at 106.68 181.61 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5"
			(at 106.68 186.69 0)
		)
		(property "Datasheet" "https://ww1.microchip.com/downloads/en/DeviceDoc/22070a.pdf"
			(at 106.68 186.69 0)
		)
		(property "Description" ""
			(at 106.68 186.69 0)
		)
		(property "PARTNO" ""
			(at 106.68 186.69 0)
		)
		(property "DK" ""
			(at 106.68 186.69 0)
		)
		(property "OrderNr" "MCP1824T-1802E/OTCT-ND"
			(at 106.68 186.69 0)
		)
		(property "Distributor" "D"
			(at 106.68 186.69 0)
		)
		(property "Manufacturer" "MCP1824T-1802E/OT"
			(at 106.68 186.69 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(instances
			(project "8]axe"
				(path
					(reference "U39")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 215.9 36.83 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7058"
			(at 212.725 34.29 90)
		)
		(property "Value" "1µ"
			(at 214.63 37.465 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 215.9 36.83 0)
		)
		(property "Datasheet" ""
			(at 215.9 36.83 0)
		)
		(property "Description" ""
			(at 215.9 36.83 0)
		)
		(property "DK" ""
			(at 215.9 36.83 0)
		)
		(property "PARTNO" ""
			(at 215.9 36.83 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 215.9 36.83 0)
		)
		(property "Distributor" "D"
			(at 215.9 36.83 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 215.9 36.83 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7058")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C214")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 345.44 238.76 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#FLG07004"
			(at 345.44 240.665 0)
		)
		(property "Value" "PWR_FLAG"
			(at 348.615 243.205 0)
		)
		(property "Footprint" ""
			(at 345.44 238.76 0)
		)
		(property "Datasheet" "~"
			(at 345.44 238.76 0)
		)
		(property "Description" ""
			(at 345.44 238.76 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#FLG07004")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG020")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 146.05 36.83 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7020"
			(at 143.51 34.29 90)
		)
		(property "Value" "1µ"
			(at 144.78 37.465 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 146.05 36.83 0)
		)
		(property "Datasheet" ""
			(at 146.05 36.83 0)
		)
		(property "Description" ""
			(at 146.05 36.83 0)
		)
		(property "DK" ""
			(at 146.05 36.83 0)
		)
		(property "PARTNO" ""
			(at 146.05 36.83 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 146.05 36.83 0)
		)
		(property "Distributor" "D"
			(at 146.05 36.83 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 146.05 36.83 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7020")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C177")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 335.28 198.12 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7049"
			(at 336.55 196.215 0)
		)
		(property "Value" "1µ"
			(at 336.55 201.295 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 335.28 198.12 0)
		)
		(property "Datasheet" ""
			(at 335.28 198.12 0)
		)
		(property "Description" ""
			(at 335.28 198.12 0)
		)
		(property "DK" ""
			(at 335.28 198.12 0)
		)
		(property "PARTNO" ""
			(at 335.28 198.12 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 335.28 198.12 0)
		)
		(property "Distributor" "D"
			(at 335.28 198.12 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 335.28 198.12 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7049")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C206")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 250.19 236.22 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7022"
			(at 250.825 234.315 0)
		)
		(property "Value" "1µ"
			(at 251.46 240.03 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 250.19 236.22 0)
		)
		(property "Datasheet" ""
			(at 250.19 236.22 0)
		)
		(property "Description" ""
			(at 250.19 236.22 0)
		)
		(property "DK" ""
			(at 250.19 236.22 0)
		)
		(property "PARTNO" ""
			(at 250.19 236.22 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 250.19 236.22 0)
		)
		(property "Distributor" "D"
			(at 250.19 236.22 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 250.19 236.22 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7022")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C179")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_2")
		(at 313.69 193.04 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR07089"
			(at 313.69 196.85 0)
		)
		(property "Value" "+1V8_2"
			(at 313.69 187.96 0)
		)
		(property "Footprint" ""
			(at 313.69 193.04 0)
		)
		(property "Datasheet" ""
			(at 313.69 193.04 0)
		)
		(property "Description" ""
			(at 313.69 193.04 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07089")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0458")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_2")
		(at 132.08 78.74 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR07035"
			(at 128.27 78.74 0)
		)
		(property "Value" "+1V8_2"
			(at 138.938 78.74 90)
		)
		(property "Footprint" ""
			(at 132.08 78.74 0)
		)
		(property "Datasheet" ""
			(at 132.08 78.74 0)
		)
		(property "Description" ""
			(at 132.08 78.74 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07035")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0408")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 124.46 193.04 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C98"
			(at 125.73 191.135 0)
		)
		(property "Value" "1µ"
			(at 126.365 196.85 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 124.46 193.04 0)
		)
		(property "Datasheet" ""
			(at 124.46 193.04 0)
		)
		(property "Description" ""
			(at 124.46 193.04 0)
		)
		(property "DK" ""
			(at 124.46 193.04 0)
		)
		(property "PARTNO" ""
			(at 124.46 193.04 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 124.46 193.04 0)
		)
		(property "Distributor" "D"
			(at 124.46 193.04 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 124.46 193.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "C98")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 99.06 36.83 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7009"
			(at 92.71 34.29 90)
		)
		(property "Value" "1µ"
			(at 93.98 37.465 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 99.06 36.83 0)
		)
		(property "Datasheet" ""
			(at 99.06 36.83 0)
		)
		(property "Description" ""
			(at 99.06 36.83 0)
		)
		(property "DK" ""
			(at 99.06 36.83 0)
		)
		(property "PARTNO" ""
			(at 99.06 36.83 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 99.06 36.83 0)
		)
		(property "Distributor" "D"
			(at 99.06 36.83 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 99.06 36.83 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7009")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C166")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_2")
		(at 240.03 76.2 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR07124"
			(at 240.03 72.39 0)
		)
		(property "Value" "+1V8_2"
			(at 240.03 81.28 0)
		)
		(property "Footprint" ""
			(at 240.03 76.2 0)
		)
		(property "Datasheet" ""
			(at 240.03 76.2 0)
		)
		(property "Description" ""
			(at 240.03 76.2 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07124")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0487")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_2")
		(at 335.28 193.04 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR07098"
			(at 335.28 196.85 0)
		)
		(property "Value" "+1V8_2"
			(at 335.28 187.96 0)
		)
		(property "Footprint" ""
			(at 335.28 193.04 0)
		)
		(property "Datasheet" ""
			(at 335.28 193.04 0)
		)
		(property "Description" ""
			(at 335.28 193.04 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07098")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0467")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:BM1366_mode1")
		(at 205.74 63.5 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U7025"
			(at 207.9341 38.735 0)
		)
		(property "Value" "BM1366_mode1"
			(at 207.9341 41.275 0)
		)
		(property "Footprint" "0xaxe:BM1366"
			(at 198.12 63.5 0)
		)
		(property "Datasheet" ""
			(at 198.12 63.5 0)
		)
		(property "Description" ""
			(at 205.74 63.5 0)
		)
		(property "Distributor" "-"
			(at 205.74 63.5 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "17")
		(pin "18")
		(pin "19")
		(pin "2")
		(pin "20")
		(pin "21")
		(pin "22")
		(pin "23")
		(pin "24")
		(pin "25")
		(pin "26")
		(pin "27")
		(pin "28")
		(pin "29")
		(pin "3")
		(pin "30")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "flex3"
				(path
					(reference "U7025")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U86")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_2")
		(at 181.61 78.74 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR07118"
			(at 185.42 78.74 0)
		)
		(property "Value" "+1V8_2"
			(at 174.498 78.74 90)
		)
		(property "Footprint" ""
			(at 181.61 78.74 0)
		)
		(property "Datasheet" ""
			(at 181.61 78.74 0)
		)
		(property "Description" ""
			(at 181.61 78.74 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07118")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0481")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_2")
		(at 222.25 231.14 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07029"
			(at 222.25 234.95 0)
		)
		(property "Value" "+1V2_2"
			(at 222.25 226.695 0)
		)
		(property "Footprint" ""
			(at 222.25 231.14 0)
		)
		(property "Datasheet" ""
			(at 222.25 231.14 0)
		)
		(property "Description" ""
			(at 222.25 231.14 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07029")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0403")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 205.74 88.9 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07121"
			(at 205.74 95.25 0)
		)
		(property "Value" "GND_2"
			(at 205.74 93.98 0)
		)
		(property "Footprint" ""
			(at 205.74 88.9 0)
		)
		(property "Datasheet" ""
			(at 205.74 88.9 0)
		)
		(property "Description" ""
			(at 205.74 88.9 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07121")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0484")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 133.35 36.83 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7015"
			(at 135.89 34.29 90)
		)
		(property "Value" "1µ"
			(at 134.62 37.465 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 133.35 36.83 0)
		)
		(property "Datasheet" ""
			(at 133.35 36.83 0)
		)
		(property "Description" ""
			(at 133.35 36.83 0)
		)
		(property "DK" ""
			(at 133.35 36.83 0)
		)
		(property "PARTNO" ""
			(at 133.35 36.83 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 133.35 36.83 0)
		)
		(property "Distributor" "D"
			(at 133.35 36.83 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 133.35 36.83 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7015")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C172")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_2")
		(at 228.6 76.2 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U7026"
			(at 229.87 80.01 0)
		)
		(property "Value" "+0V8"
			(at 231.775 76.2 90)
		)
		(property "Footprint" ""
			(at 228.6 76.2 0)
		)
		(property "Datasheet" ""
			(at 228.6 76.2 0)
		)
		(property "Description" ""
			(at 228.6 76.2 0)
		)
		(property "Distributor" "-"
			(at 228.6 76.2 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "U7026")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U87")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_2")
		(at 36.83 106.68 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07024"
			(at 33.02 106.68 0)
		)
		(property "Value" "+1V2_2"
			(at 40.64 106.68 90)
		)
		(property "Footprint" ""
			(at 36.83 106.68 0)
		)
		(property "Datasheet" ""
			(at 36.83 106.68 0)
		)
		(property "Description" ""
			(at 36.83 106.68 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07024")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0370")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 124.46 232.41 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07014"
			(at 124.46 238.76 0)
		)
		(property "Value" "GND_2"
			(at 124.46 237.49 0)
		)
		(property "Footprint" ""
			(at 124.46 232.41 0)
		)
		(property "Datasheet" ""
			(at 124.46 232.41 0)
		)
		(property "Description" ""
			(at 124.46 232.41 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07014")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0389")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 251.46 203.2 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07046"
			(at 251.46 209.55 0)
		)
		(property "Value" "GND_2"
			(at 251.46 208.28 0)
		)
		(property "Footprint" ""
			(at 251.46 203.2 0)
		)
		(property "Datasheet" ""
			(at 251.46 203.2 0)
		)
		(property "Description" ""
			(at 251.46 203.2 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07046")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0418")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_2")
		(at 307.34 231.14 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07085"
			(at 307.34 234.95 0)
		)
		(property "Value" "+1V2_2"
			(at 307.34 226.695 0)
		)
		(property "Footprint" ""
			(at 307.34 231.14 0)
		)
		(property "Datasheet" ""
			(at 307.34 231.14 0)
		)
		(property "Description" ""
			(at 307.34 231.14 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07085")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0454")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 234.95 236.22 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7017"
			(at 235.585 234.315 0)
		)
		(property "Value" "10µ/16V"
			(at 236.22 240.03 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 234.95 236.22 0)
		)
		(property "Datasheet" ""
			(at 234.95 236.22 0)
		)
		(property "Description" ""
			(at 234.95 236.22 0)
		)
		(property "DK" ""
			(at 234.95 236.22 0)
		)
		(property "PARTNO" ""
			(at 234.95 236.22 0)
		)
		(property "Manufacturer" "GRT188R61C106KE13D"
			(at 234.95 236.22 0)
		)
		(property "Distributor" "D"
			(at 234.95 236.22 0)
		)
		(property "OrderNr" "490-12317-1-ND"
			(at 234.95 236.22 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7017")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C174")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:BM1366_mode1")
		(at 107.95 63.5 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U7007"
			(at 110.1441 38.735 0)
		)
		(property "Value" "BM1366_mode1"
			(at 110.1441 41.275 0)
		)
		(property "Footprint" "0xaxe:BM1366"
			(at 100.33 63.5 0)
		)
		(property "Datasheet" ""
			(at 100.33 63.5 0)
		)
		(property "Description" ""
			(at 107.95 63.5 0)
		)
		(property "Distributor" "-"
			(at 107.95 63.5 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "17")
		(pin "18")
		(pin "19")
		(pin "2")
		(pin "20")
		(pin "21")
		(pin "22")
		(pin "23")
		(pin "24")
		(pin "25")
		(pin "26")
		(pin "27")
		(pin "28")
		(pin "29")
		(pin "3")
		(pin "30")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "flex3"
				(path
					(reference "U7007")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U69")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_2")
		(at 44.45 74.93 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07007"
			(at 44.45 78.74 0)
		)
		(property "Value" "+1V8_2"
			(at 44.45 69.85 0)
		)
		(property "Footprint" ""
			(at 44.45 74.93 0)
		)
		(property "Datasheet" ""
			(at 44.45 74.93 0)
		)
		(property "Description" ""
			(at 44.45 74.93 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07007")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0382")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 335.28 203.2 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07099"
			(at 335.28 209.55 0)
		)
		(property "Value" "GND_2"
			(at 335.28 208.28 0)
		)
		(property "Footprint" ""
			(at 335.28 203.2 0)
		)
		(property "Datasheet" ""
			(at 335.28 203.2 0)
		)
		(property "Description" ""
			(at 335.28 203.2 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07099")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0468")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 250.19 241.3 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07045"
			(at 250.19 247.65 0)
		)
		(property "Value" "GND_2"
			(at 250.19 246.38 0)
		)
		(property "Footprint" ""
			(at 250.19 241.3 0)
		)
		(property "Datasheet" ""
			(at 250.19 241.3 0)
		)
		(property "Description" ""
			(at 250.19 241.3 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07045")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0417")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_2")
		(at 143.51 143.51 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR07023"
			(at 143.51 149.86 0)
		)
		(property "Value" "GND_2"
			(at 143.51 148.59 0)
		)
		(property "Footprint" ""
			(at 143.51 143.51 0)
		)
		(property "Datasheet" ""
			(at 143.51 143.51 0)
		)
		(property "Description" ""
			(at 143.51 143.51 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07023")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0398")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 231.14 36.83 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7059"
			(at 228.6 34.29 90)
		)
		(property "Value" "1µ"
			(at 229.87 37.465 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 231.14 36.83 0)
		)
		(property "Datasheet" ""
			(at 231.14 36.83 0)
		)
		(property "Description" ""
			(at 231.14 36.83 0)
		)
		(property "DK" ""
			(at 231.14 36.83 0)
		)
		(property "PARTNO" ""
			(at 231.14 36.83 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 231.14 36.83 0)
		)
		(property "Distributor" "D"
			(at 231.14 36.83 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 231.14 36.83 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex3"
				(path
					(reference "C7059")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C215")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_2")
		(at 234.95 231.14 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07037"
			(at 234.95 234.95 0)
		)
		(property "Value" "+1V2_2"
			(at 234.95 226.695 0)
		)
		(property "Footprint" ""
			(at 234.95 231.14 0)
		)
		(property "Datasheet" ""
			(at 234.95 231.14 0)
		)
		(property "Description" ""
			(at 234.95 231.14 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07037")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0410")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_IF")
		(at 339.09 238.76 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR07100"
			(at 339.09 245.11 0)
		)
		(property "Value" "GND_IF"
			(at 339.09 243.205 0)
		)
		(property "Footprint" ""
			(at 339.09 238.76 0)
		)
		(property "Datasheet" ""
			(at 339.09 238.76 0)
		)
		(property "Description" ""
			(at 339.09 238.76 0)
		)
		(pin "1")
		(instances
			(project "flex3"
				(path
					(reference "#PWR07100")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0469")
					(unit 1)
				)
			)
		)
	)
)
