(kicad_sch
	(version 20231120)
	(generator "eeschema")
	(generator_version "8.0")
	(paper "A3")
	(lib_symbols
		(symbol "BM1366_mode1_1"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U6007"
				(at 2.1941 24.765 0)
			)
			(property "Value" "BM1366_mode1"
				(at 2.1941 22.225 0)
			)
			(property "Footprint" "qaxe:BM1366"
				(at -7.62 0 0)
			)
			(property "Datasheet" ""
				(at -7.62 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "Distributor" "X"
				(at 0 0 0)
			)
			(symbol "BM1366_mode1_1_0_1"
				(rectangle
					(start -15.24 20.32)
					(end 15.24 -17.78)
					(fill
						(type background)
					)
				)
			)
			(symbol "BM1366_mode1_1_1_1"
				(pin input line
					(at -17.78 17.78 0)
					(length 2.54)
					(name "VDD1_0")
					(number "1")
				)
				(pin input line
					(at -17.78 -5.08 0)
					(length 2.54)
					(name "ADDR0")
					(number "10")
				)
				(pin input line
					(at -17.78 -7.62 0)
					(length 2.54)
					(name "ADDR1")
					(number "11")
				)
				(pin power_in line
					(at -17.78 -10.16 0)
					(length 2.54)
					(name "PLL_VSS")
					(number "12")
				)
				(pin power_in line
					(at -17.78 -12.7 0)
					(length 2.54)
					(name "VDDIO_08_0")
					(number "13")
				)
				(pin power_in line
					(at -17.78 -15.24 0)
					(length 2.54)
					(name "VDDIO_18_0")
					(number "14")
				)
				(pin power_in line
					(at 17.78 -15.24 180)
					(length 2.54)
					(name "VDDIO_18_1")
					(number "15")
				)
				(pin power_in line
					(at 17.78 -12.7 180)
					(length 2.54)
					(name "VDDIO_08_1")
					(number "16")
				)
				(pin power_in line
					(at 17.78 -10.16 180)
					(length 2.54)
					(name "VSS")
					(number "17")
				)
				(pin input line
					(at 17.78 -7.62 180)
					(length 2.54)
					(name "PIN_MODE")
					(number "18")
				)
				(pin input line
					(at 17.78 -5.08 180)
					(length 2.54)
					(name "INV_CLKO")
					(number "19")
				)
				(pin input line
					(at -17.78 15.24 0)
					(length 2.54)
					(name "VDD2_0")
					(number "2")
				)
				(pin input line
					(at 17.78 -2.54 180)
					(length 2.54)
					(name "CI")
					(number "20")
				)
				(pin input line
					(at 17.78 0 180)
					(length 2.54)
					(name "CLKI")
					(number "21")
				)
				(pin output line
					(at 17.78 2.54 180)
					(length 2.54)
					(name "RO")
					(number "22")
				)
				(pin input line
					(at 17.78 5.08 180)
					(length 2.54)
					(name "BI")
					(number "23")
				)
				(pin input line
					(at 17.78 7.62 180)
					(length 2.54)
					(name "NRSTI")
					(number "24")
				)
				(pin input line
					(at 17.78 10.16 180)
					(length 2.54)
					(name "VSS")
					(number "25")
				)
				(pin input line
					(at 17.78 12.7 180)
					(length 2.54)
					(name "VDD3_1")
					(number "26")
				)
				(pin input line
					(at 17.78 15.24 180)
					(length 2.54)
					(name "VDD2_1")
					(number "27")
				)
				(pin input line
					(at 17.78 17.78 180)
					(length 2.54)
					(name "VDD1_1")
					(number "28")
				)
				(pin power_in line
					(at 0 22.86 270)
					(length 2.54)
					(name "VDD")
					(number "29")
				)
				(pin input line
					(at -17.78 12.7 0)
					(length 2.54)
					(name "VDD3_0")
					(number "3")
				)
				(pin power_in line
					(at 0 -20.32 90)
					(length 2.54)
					(name "GND")
					(number "30")
				)
				(pin input line
					(at -17.78 10.16 0)
					(length 2.54)
					(name "VSS")
					(number "4")
				)
				(pin output line
					(at -17.78 7.62 0)
					(length 2.54)
					(name "NRSTO")
					(number "5")
				)
				(pin output line
					(at -17.78 5.08 0)
					(length 2.54)
					(name "BO")
					(number "6")
				)
				(pin input line
					(at -17.78 2.54 0)
					(length 2.54)
					(name "RI")
					(number "7")
				)
				(pin output line
					(at -17.78 0 0)
					(length 2.54)
					(name "CLKO")
					(number "8")
				)
				(pin output line
					(at -17.78 -2.54 0)
					(length 2.54)
					(name "CO")
					(number "9")
				)
			)
		)
		(symbol "Device:C"
			(pin_numbers hide)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Unpolarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C_*"
				(at 0 0 0)
			)
			(symbol "C_0_1"
				(polyline
					(pts
						(xy -2.032 -0.762) (xy 2.032 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.032 0.762) (xy 2.032 0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:R"
			(pin_numbers hide)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 2.032 0 90)
			)
			(property "Value" "R"
				(at 0 0 90)
			)
			(property "Footprint" ""
				(at -1.778 0 90)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Resistor"
				(at 0 0 0)
			)
			(property "ki_keywords" "R res resistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R_0_1"
				(rectangle
					(start -1.016 -2.54)
					(end 1.016 2.54)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Isolator:ADuM1411"
			(pin_names
				(offset 1.016)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at 0 19.05 0)
			)
			(property "Value" "ADuM1411"
				(at 0 16.51 0)
			)
			(property "Footprint" "Package_SO:SOIC-16W_7.5x10.3mm_P1.27mm"
				(at 0 -17.78 0)
			)
			(property "Datasheet" "https://www.analog.com/media/en/technical-documentation/data-sheets/ADUM1410_1411_1412.pdf"
				(at -20.32 0 0)
			)
			(property "Description" "Quad Channel Digital Isolator,10Mbps,SO-16"
				(at 0 0 0)
			)
			(property "ki_keywords" "Digital Isolator"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOIC*7.5x10.3mm*P1.27mm*"
				(at 0 0 0)
			)
			(symbol "ADuM1411_0_0"
				(rectangle
					(start -1.905 0.635)
					(end -6.985 -0.635)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 1.016)
					(end 1.27 -1.016)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 3.556)
					(end 1.27 1.524)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 6.096)
					(end 1.27 4.064)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 8.636)
					(end 1.27 6.604)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 -0.762)
					(mid -0.2551 -0.508)
					(end -0.508 -0.254)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 -0.254)
					(mid -0.2551 0)
					(end -0.508 0.254)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 0.254)
					(mid -0.2551 0.508)
					(end -0.508 0.762)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 1.778)
					(mid -0.2551 2.032)
					(end -0.508 2.286)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 2.286)
					(mid -0.2551 2.54)
					(end -0.508 2.794)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 2.794)
					(mid -0.2551 3.048)
					(end -0.508 3.302)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 4.318)
					(mid -0.2551 4.572)
					(end -0.508 4.826)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 4.826)
					(mid -0.2551 5.08)
					(end -0.508 5.334)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 5.334)
					(mid -0.2551 5.588)
					(end -0.508 5.842)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 6.858)
					(mid -0.2551 7.112)
					(end -0.508 7.366)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 7.366)
					(mid -0.2551 7.62)
					(end -0.508 7.874)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 7.874)
					(mid -0.2551 8.128)
					(end -0.508 8.382)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -6.985 0) (xy -7.62 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -6.985 2.54) (xy -7.62 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -6.985 5.08) (xy -7.62 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -6.985 7.62) (xy -7.62 7.62)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -4.445 -1.27) (xy -4.445 -0.635)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.905 0) (xy -1.27 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.905 2.54) (xy -1.27 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.905 5.08) (xy -1.27 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.905 7.62) (xy -1.27 7.62)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 -0.762) (xy -0.508 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 0.762) (xy -0.508 0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 1.778) (xy -0.508 1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 3.302) (xy -0.508 3.302)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 4.318) (xy -0.508 4.318)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 5.842) (xy -0.508 5.842)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 6.858) (xy -0.508 6.858)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 8.382) (xy -0.508 8.382)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -10.795) (xy -0.635 -12.065)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -8.89) (xy -0.635 -10.16)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -6.985) (xy -0.635 -8.255)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -5.08) (xy -0.635 -6.35)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -3.175) (xy -0.635 -4.445)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -1.27) (xy -0.635 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 8.89) (xy -0.635 10.16)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 10.795) (xy -0.635 12.065)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 12.7) (xy -0.635 13.97)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 15.24) (xy -0.635 14.605)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -10.795) (xy 0.635 -12.065)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -8.89) (xy 0.635 -10.16)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -6.985) (xy 0.635 -8.255)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -5.08) (xy 0.635 -6.35)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -3.175) (xy 0.635 -4.445)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -1.27) (xy 0.635 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 8.89) (xy 0.635 10.16)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 12.065) (xy 0.635 10.795)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 13.97) (xy 0.635 12.7)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 14.605) (xy 0.635 15.24)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 -0.762) (xy 0.508 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 0.762) (xy 0.508 0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 1.778) (xy 0.508 1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 3.302) (xy 0.508 3.302)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 4.318) (xy 0.508 4.318)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 5.842) (xy 0.508 5.842)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 6.858) (xy 0.508 6.858)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 8.382) (xy 0.508 8.382)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.905 0) (xy 1.27 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.905 2.54) (xy 1.27 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.905 5.08) (xy 1.27 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.905 7.62) (xy 1.27 7.62)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 4.445 0.635) (xy 4.445 1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 4.445 3.175) (xy 4.445 4.445)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 4.445 5.715) (xy 4.445 6.985)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 6.985 0) (xy 7.62 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 6.985 2.54) (xy 7.62 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 6.985 5.08) (xy 7.62 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 6.985 7.62) (xy 7.62 7.62)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -4.445 -1.27) (xy -4.445 -5.08) (xy -5.715 -5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.715 -5.08) (xy 4.445 -5.08) (xy 4.445 -0.635)
					)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 -0.254)
					(mid 0.2551 -0.508)
					(end 0.508 -0.762)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 0.254)
					(mid 0.2551 0)
					(end 0.508 -0.254)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 0.762)
					(mid 0.2551 0.508)
					(end 0.508 0.254)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 2.286)
					(mid 0.2551 2.032)
					(end 0.508 1.778)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 2.794)
					(mid 0.2551 2.54)
					(end 0.508 2.286)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 3.302)
					(mid 0.2551 3.048)
					(end 0.508 2.794)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 4.826)
					(mid 0.2551 4.572)
					(end 0.508 4.318)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 5.334)
					(mid 0.2551 5.08)
					(end 0.508 4.826)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 5.842)
					(mid 0.2551 5.588)
					(end 0.508 5.334)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 7.366)
					(mid 0.2551 7.112)
					(end 0.508 6.858)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 7.874)
					(mid 0.2551 7.62)
					(end 0.508 7.366)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 8.382)
					(mid 0.2551 8.128)
					(end 0.508 7.874)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 1.905 0.635)
					(end 6.985 -0.635)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 1.905 3.175)
					(end 6.985 1.905)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 1.905 5.715)
					(end 6.985 4.445)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 1.905 8.255)
					(end 6.985 6.985)
					(fill
						(type none)
					)
				)
				(text "DECODE"
					(at -4.445 0 0)
				)
				(text "DECODE"
					(at 4.445 2.54 0)
				)
				(text "DECODE"
					(at 4.445 5.08 0)
				)
				(text "DECODE"
					(at 4.445 7.62 0)
				)
				(text "ENCODE"
					(at -4.445 2.54 0)
				)
				(text "ENCODE"
					(at -4.445 5.08 0)
				)
				(text "ENCODE"
					(at -4.445 7.62 0)
				)
				(text "ENCODE"
					(at 4.445 0 0)
				)
			)
			(symbol "ADuM1411_0_1"
				(rectangle
					(start -12.7 15.24)
					(end 12.7 -15.24)
					(fill
						(type background)
					)
				)
				(rectangle
					(start -1.905 3.175)
					(end -6.985 1.905)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.905 5.715)
					(end -6.985 4.445)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.905 8.255)
					(end -6.985 6.985)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -14.605) (xy -0.635 -15.24)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -12.7) (xy -0.635 -13.97)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -14.605) (xy 0.635 -15.24)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -12.7) (xy 0.635 -13.97)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "ADuM1411_1_1"
				(pin power_in line
					(at -15.24 12.7 0)
					(length 2.54)
					(name "VDD1")
					(number "1")
				)
				(pin input line
					(at 15.24 -5.08 180)
					(length 2.54)
					(name "CTRL2")
					(number "10")
				)
				(pin input line
					(at 15.24 0 180)
					(length 2.54)
					(name "VID")
					(number "11")
				)
				(pin output line
					(at 15.24 2.54 180)
					(length 2.54)
					(name "VOC")
					(number "12")
				)
				(pin output line
					(at 15.24 5.08 180)
					(length 2.54)
					(name "VOB")
					(number "13")
				)
				(pin output line
					(at 15.24 7.62 180)
					(length 2.54)
					(name "VOA")
					(number "14")
				)
				(pin power_in line
					(at 15.24 -12.7 180)
					(length 2.54)
					(name "GND2")
					(number "15")
				)
				(pin power_in line
					(at 15.24 12.7 180)
					(length 2.54)
					(name "VDD2")
					(number "16")
				)
				(pin power_in line
					(at -15.24 -10.16 0)
					(length 2.54)
					(name "GND1")
					(number "2")
				)
				(pin input line
					(at -15.24 7.62 0)
					(length 2.54)
					(name "VIA")
					(number "3")
				)
				(pin input line
					(at -15.24 5.08 0)
					(length 2.54)
					(name "VIB")
					(number "4")
				)
				(pin input line
					(at -15.24 2.54 0)
					(length 2.54)
					(name "VIC")
					(number "5")
				)
				(pin output line
					(at -15.24 0 0)
					(length 2.54)
					(name "VOD")
					(number "6")
				)
				(pin input line
					(at -15.24 -5.08 0)
					(length 2.54)
					(name "CTRL1")
					(number "7")
				)
				(pin power_in line
					(at -15.24 -12.7 0)
					(length 2.54)
					(name "GND1")
					(number "8")
				)
				(pin power_in line
					(at 15.24 -10.16 180)
					(length 2.54)
					(name "GND2")
					(number "9")
				)
			)
		)
		(symbol "Oscillator:ASDMB-xxxMHz"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -6.35 6.35 0)
			)
			(property "Value" "ASDMB-xxxMHz"
				(at 11.43 6.35 0)
			)
			(property "Footprint" "Oscillator:Oscillator_SMD_Abracon_ASDMB-4Pin_2.5x2.0mm"
				(at 0 0 0)
			)
			(property "Datasheet" "https://abracon.com/Oscillators/ASDMB.pdf"
				(at 7.62 11.43 0)
			)
			(property "Description" "1.8-3.3V SMD Ultra Miniature Crystal Clock Oscillator, Abracon"
				(at 0 0 0)
			)
			(property "ki_keywords" "1.8-3.3V SMD Ultra Miniature Crystal Clock Oscillator"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Oscillator*SMD*Abracon*ASDMB*2.5x2.0mm*"
				(at 0 0 0)
			)
			(symbol "ASDMB-xxxMHz_1_1"
				(rectangle
					(start -7.62 5.08)
					(end 7.62 -5.08)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy -4.445 2.54) (xy -3.81 2.54) (xy -3.81 3.81) (xy -3.175 3.81) (xy -3.175 2.54) (xy -2.54 2.54)
						(xy -2.54 3.81) (xy -1.905 3.81) (xy -1.905 2.54)
					)
					(fill
						(type none)
					)
				)
				(pin input line
					(at -10.16 0 0)
					(length 2.54)
					(name "Standby")
					(number "1")
				)
				(pin power_in line
					(at 2.54 -7.62 90)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "Out")
					(number "3")
				)
				(pin power_in line
					(at 2.54 7.62 270)
					(length 2.54)
					(name "VDD")
					(number "4")
				)
			)
		)
		(symbol "bitaxe:MCP1824"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U7"
				(at -3.175 6.985 0)
			)
			(property "Value" "MCP1824T-1802E"
				(at 0 5.08 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5"
				(at 0 0 0)
			)
			(property "Datasheet" "https://ww1.microchip.com/downloads/en/DeviceDoc/22070a.pdf"
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "PARTNO" ""
				(at 0 0 0)
			)
			(property "DK" ""
				(at 0 0 0)
			)
			(property "OrderNr" "MCP1824T-1802E/OTCT-ND"
				(at 0 0 0)
			)
			(property "Distributor" "D"
				(at 0 0 0)
			)
			(property "Manufacturer" "MCP1824T-1802E/OT"
				(at 0 0 0)
			)
			(symbol "MCP1824_0_1"
				(rectangle
					(start -7.62 3.81)
					(end 7.62 -6.35)
					(fill
						(type background)
					)
				)
			)
			(symbol "MCP1824_1_0"
				(pin power_in line
					(at -10.16 1.27 0)
					(length 2.54)
					(name "VIN")
					(number "1")
				)
				(pin power_in line
					(at 10.16 -1.27 180)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin input line
					(at -10.16 -1.27 0)
					(length 2.54)
					(name "EN")
					(number "3")
				)
				(pin bidirectional line
					(at -10.16 -3.81 0)
					(length 2.54)
					(name "PG")
					(number "4")
				)
				(pin power_out line
					(at 10.16 1.27 180)
					(length 2.54)
					(name "VOUT")
					(number "5")
				)
			)
		)
		(symbol "mylib7:+0V8_1"
			(exclude_from_sim no)
			(in_bom no)
			(on_board no)
			(property "Reference" "U5008"
				(at 3.81 1.27 0)
			)
			(property "Value" "+0V8"
				(at 0 3.175 90)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "Distributor" "-"
				(at 0 0 0)
			)
			(symbol "+0V8_1_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+0V8_1_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+0V8_1")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+1V2_1"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR05024"
				(at 0 -3.81 0)
			)
			(property "Value" "+1V2_1"
				(at 0 4.445 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+1V2\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+1V2_1_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+1V2_1_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+1V2_1")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+1V8_1"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR05017"
				(at 0 -3.81 0)
			)
			(property "Value" "+1V8_1"
				(at 0 5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+1V8\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+1V8_1_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+1V8_1_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+1V8_1")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+3V3_EXT"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR013"
				(at 0 -3.81 0)
			)
			(property "Value" "+3V3_EXT"
				(at 0 4.445 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+3V3\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+3V3_EXT_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+3V3_EXT_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+3V3_EXT")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+6.5V"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR034"
				(at 0 -3.81 0)
			)
			(property "Value" "+6.5V"
				(at 0 4.445 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+6.5V_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+6.5V_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+5V")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+V_IF"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR07"
				(at 0 -3.81 0)
			)
			(property "Value" "+V_IF"
				(at 0 5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+3V3\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+V_IF_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+V_IF_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+V_IF")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+V_IF_1"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR0148"
				(at 0 -3.81 0)
			)
			(property "Value" "+V_IF_1"
				(at 0 5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+V_IF_1_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+V_IF_1_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+V_IF_0")
					(number "1")
				)
			)
		)
		(symbol "mylib7:BM1366_mode1"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U8"
				(at 1.9559 24.13 0)
			)
			(property "Value" "BM1366_mode1"
				(at 1.9559 21.59 0)
			)
			(property "Footprint" "qaxe:BM1366"
				(at -7.62 0 0)
			)
			(property "Datasheet" ""
				(at -7.62 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "Distributor" "X"
				(at 0 0 0)
			)
			(symbol "BM1366_mode1_0_1"
				(rectangle
					(start -15.24 20.32)
					(end 15.24 -17.78)
					(fill
						(type background)
					)
				)
			)
			(symbol "BM1366_mode1_1_1"
				(pin input line
					(at -17.78 17.78 0)
					(length 2.54)
					(name "VDD1_0")
					(number "1")
				)
				(pin input line
					(at -17.78 -5.08 0)
					(length 2.54)
					(name "ADDR0")
					(number "10")
				)
				(pin input line
					(at -17.78 -7.62 0)
					(length 2.54)
					(name "ADDR1")
					(number "11")
				)
				(pin power_in line
					(at -17.78 -10.16 0)
					(length 2.54)
					(name "PLL_VSS")
					(number "12")
				)
				(pin power_in line
					(at -17.78 -12.7 0)
					(length 2.54)
					(name "VDDIO_08_0")
					(number "13")
				)
				(pin power_in line
					(at -17.78 -15.24 0)
					(length 2.54)
					(name "VDDIO_18_0")
					(number "14")
				)
				(pin power_in line
					(at 17.78 -15.24 180)
					(length 2.54)
					(name "VDDIO_18_1")
					(number "15")
				)
				(pin power_in line
					(at 17.78 -12.7 180)
					(length 2.54)
					(name "VDDIO_08_1")
					(number "16")
				)
				(pin power_in line
					(at 17.78 -10.16 180)
					(length 2.54)
					(name "VSS")
					(number "17")
				)
				(pin input line
					(at 17.78 -7.62 180)
					(length 2.54)
					(name "PIN_MODE")
					(number "18")
				)
				(pin input line
					(at 17.78 -5.08 180)
					(length 2.54)
					(name "INV_CLKO")
					(number "19")
				)
				(pin input line
					(at -17.78 15.24 0)
					(length 2.54)
					(name "VDD2_0")
					(number "2")
				)
				(pin output line
					(at 17.78 -2.54 180)
					(length 2.54)
					(name "CO")
					(number "20")
				)
				(pin output line
					(at 17.78 0 180)
					(length 2.54)
					(name "CLKO")
					(number "21")
				)
				(pin input line
					(at 17.78 2.54 180)
					(length 2.54)
					(name "RI")
					(number "22")
				)
				(pin output line
					(at 17.78 5.08 180)
					(length 2.54)
					(name "BO")
					(number "23")
				)
				(pin output line
					(at 17.78 7.62 180)
					(length 2.54)
					(name "NRSTO")
					(number "24")
				)
				(pin input line
					(at 17.78 10.16 180)
					(length 2.54)
					(name "VSS")
					(number "25")
				)
				(pin input line
					(at 17.78 12.7 180)
					(length 2.54)
					(name "VDD3_1")
					(number "26")
				)
				(pin input line
					(at 17.78 15.24 180)
					(length 2.54)
					(name "VDD2_1")
					(number "27")
				)
				(pin input line
					(at 17.78 17.78 180)
					(length 2.54)
					(name "VDD1_1")
					(number "28")
				)
				(pin power_in line
					(at 0 22.86 270)
					(length 2.54)
					(name "VDD")
					(number "29")
				)
				(pin input line
					(at -17.78 12.7 0)
					(length 2.54)
					(name "VDD3_0")
					(number "3")
				)
				(pin power_in line
					(at 0 -20.32 90)
					(length 2.54)
					(name "GND")
					(number "30")
				)
				(pin input line
					(at -17.78 10.16 0)
					(length 2.54)
					(name "VSS")
					(number "4")
				)
				(pin input line
					(at -17.78 7.62 0)
					(length 2.54)
					(name "NRSTI")
					(number "5")
				)
				(pin input line
					(at -17.78 5.08 0)
					(length 2.54)
					(name "BI")
					(number "6")
				)
				(pin output line
					(at -17.78 2.54 0)
					(length 2.54)
					(name "RO")
					(number "7")
				)
				(pin input line
					(at -17.78 0 0)
					(length 2.54)
					(name "CLKI")
					(number "8")
				)
				(pin input line
					(at -17.78 -2.54 0)
					(length 2.54)
					(name "CI")
					(number "9")
				)
			)
		)
		(symbol "mylib7:GND_1"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR05018"
				(at 0 -6.35 0)
			)
			(property "Value" "GND_1"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_1_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_1_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND_1")
					(number "1")
				)
			)
		)
		(symbol "mylib7:GND_EXT"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR0146"
				(at 0 -6.35 0)
			)
			(property "Value" "GND_EXT"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_EXT_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_EXT_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND_EXT")
					(number "1")
				)
			)
		)
		(symbol "mylib7:GND_IF"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR08"
				(at 0 -6.35 0)
			)
			(property "Value" "GND_IF"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_IF_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_IF_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND_IF")
					(number "1")
				)
			)
		)
		(symbol "mylib7:GND_IF_1"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR0149"
				(at 0 -6.35 0)
			)
			(property "Value" "GND_IF_1"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_IF_1_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_IF_1_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND_IF_0")
					(number "1")
				)
			)
		)
		(symbol "mylib7:NCP114-SN"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U4"
				(at 0 9.525 0)
			)
			(property "Value" "NCP115-SN"
				(at 0 6.985 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:TSOT-23-5"
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "300mA Low-Dropout Linear Regulators, 1.2V output voltage, LDO with low noise and enable pin, XDFN-4"
				(at 0 0 0)
			)
			(property "ki_keywords" "Single Output LDO"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "OnSemi*XDFN4*1EP*1.0x1.0mm*"
				(at 0 0 0)
			)
			(symbol "NCP114-SN_0_1"
				(rectangle
					(start -7.62 5.08)
					(end 7.62 -5.08)
					(fill
						(type background)
					)
				)
			)
			(symbol "NCP114-SN_1_1"
				(pin power_in line
					(at -10.16 2.54 0)
					(length 2.54)
					(name "IN")
					(number "1")
				)
				(pin power_in line
					(at 0 -7.62 90)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin input line
					(at -10.16 -2.54 0)
					(length 2.54)
					(name "EN")
					(number "3")
				)
				(pin power_out line
					(at 10.16 2.54 180)
					(length 2.54)
					(name "OUT")
					(number "5")
				)
			)
		)
		(symbol "power:PWR_FLAG"
			(power)
			(pin_numbers hide)
			(pin_names
				(offset 0) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#FLG"
				(at 0 1.905 0)
			)
			(property "Value" "PWR_FLAG"
				(at 0 3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Special symbol for telling ERC where power comes from"
				(at 0 0 0)
			)
			(property "ki_keywords" "flag power"
				(at 0 0 0)
			)
			(symbol "PWR_FLAG_0_0"
				(pin power_out line
					(at 0 0 90)
					(length 0)
					(name "pwr")
					(number "1")
				)
			)
			(symbol "PWR_FLAG_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 1.27) (xy -1.016 1.905) (xy 0 2.54) (xy 1.016 1.905) (xy 0 1.27)
					)
					(fill
						(type none)
					)
				)
			)
		)
	)
	(junction
		(at 85.09 34.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 30.48 52.07)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 121.92 146.05)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 147.32 48.26)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 278.13 34.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 121.92 210.82)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 135.89 45.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 87.63 146.05)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 255.27 34.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 215.9 43.18)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 124.46 71.12)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 255.27 50.8)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 234.95 34.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 269.24 58.42)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 73.66 34.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 124.46 43.18)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 93.98 176.53)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 124.46 50.8)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 86.36 210.82)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 215.9 71.12)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 148.59 58.42)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 135.89 34.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 147.32 34.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 105.41 34.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 86.36 176.53)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 215.9 50.8)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 124.46 34.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 62.23 34.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 85.09 50.8)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 92.71 210.82)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 161.29 50.8)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 85.09 71.12)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 255.27 71.12)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 123.19 176.53)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 266.7 34.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(no_connect
		(at 95.25 181.61)
	)
	(no_connect
		(at 88.9 138.43)
	)
	(no_connect
		(at 252.73 53.34)
	)
	(no_connect
		(at 87.63 66.04)
	)
	(no_connect
		(at 87.63 68.58)
	)
	(no_connect
		(at 252.73 60.96)
	)
	(no_connect
		(at 123.19 66.04)
	)
	(no_connect
		(at 119.38 138.43)
	)
	(no_connect
		(at 123.19 68.58)
	)
	(no_connect
		(at 217.17 68.58)
	)
	(no_connect
		(at 252.73 66.04)
	)
	(no_connect
		(at 252.73 68.58)
	)
	(no_connect
		(at 217.17 66.04)
	)
	(wire
		(pts
			(xy 294.64 196.85) (xy 294.64 198.12)
		)
	)
	(wire
		(pts
			(xy 124.46 50.8) (xy 124.46 71.12)
		)
	)
	(wire
		(pts
			(xy 119.38 120.65) (xy 121.92 120.65)
		)
	)
	(wire
		(pts
			(xy 105.41 30.48) (xy 105.41 34.29)
		)
	)
	(wire
		(pts
			(xy 259.08 226.06) (xy 259.08 227.33)
		)
	)
	(wire
		(pts
			(xy 95.25 215.9) (xy 92.71 215.9)
		)
	)
	(wire
		(pts
			(xy 48.26 50.8) (xy 48.26 34.29)
		)
	)
	(wire
		(pts
			(xy 123.19 43.18) (xy 124.46 43.18)
		)
	)
	(wire
		(pts
			(xy 123.19 48.26) (xy 147.32 48.26)
		)
	)
	(wire
		(pts
			(xy 123.19 50.8) (xy 124.46 50.8)
		)
	)
	(wire
		(pts
			(xy 215.9 34.29) (xy 219.71 34.29)
		)
	)
	(wire
		(pts
			(xy 231.14 226.06) (xy 231.14 227.33)
		)
	)
	(wire
		(pts
			(xy 231.14 187.96) (xy 231.14 189.23)
		)
	)
	(wire
		(pts
			(xy 16.51 52.07) (xy 16.51 60.96)
		)
	)
	(wire
		(pts
			(xy 88.9 128.27) (xy 78.74 128.27)
		)
	)
	(wire
		(pts
			(xy 231.14 196.85) (xy 231.14 198.12)
		)
	)
	(wire
		(pts
			(xy 81.28 76.2) (xy 87.63 76.2)
		)
	)
	(wire
		(pts
			(xy 88.9 120.65) (xy 87.63 120.65)
		)
	)
	(wire
		(pts
			(xy 292.1 50.8) (xy 292.1 34.29)
		)
	)
	(wire
		(pts
			(xy 92.71 210.82) (xy 92.71 215.9)
		)
	)
	(wire
		(pts
			(xy 87.63 50.8) (xy 85.09 50.8)
		)
	)
	(wire
		(pts
			(xy 246.38 226.06) (xy 246.38 227.33)
		)
	)
	(wire
		(pts
			(xy 85.09 34.29) (xy 91.44 34.29)
		)
	)
	(wire
		(pts
			(xy 59.69 34.29) (xy 62.23 34.29)
		)
	)
	(wire
		(pts
			(xy 88.9 146.05) (xy 87.63 146.05)
		)
	)
	(wire
		(pts
			(xy 212.09 76.2) (xy 217.17 76.2)
		)
	)
	(wire
		(pts
			(xy 71.12 34.29) (xy 73.66 34.29)
		)
	)
	(wire
		(pts
			(xy 86.36 208.28) (xy 86.36 210.82)
		)
	)
	(wire
		(pts
			(xy 218.44 234.95) (xy 218.44 236.22)
		)
	)
	(wire
		(pts
			(xy 128.27 133.35) (xy 119.38 133.35)
		)
	)
	(wire
		(pts
			(xy 86.36 210.82) (xy 92.71 210.82)
		)
	)
	(wire
		(pts
			(xy 85.09 34.29) (xy 85.09 43.18)
		)
	)
	(wire
		(pts
			(xy 123.19 73.66) (xy 128.27 73.66)
		)
	)
	(wire
		(pts
			(xy 236.22 187.96) (xy 236.22 189.23)
		)
	)
	(wire
		(pts
			(xy 269.24 58.42) (xy 274.32 58.42)
		)
	)
	(wire
		(pts
			(xy 215.9 50.8) (xy 215.9 71.12)
		)
	)
	(wire
		(pts
			(xy 292.1 34.29) (xy 288.29 34.29)
		)
	)
	(wire
		(pts
			(xy 88.9 143.51) (xy 87.63 143.51)
		)
	)
	(wire
		(pts
			(xy 85.09 71.12) (xy 85.09 86.36)
		)
	)
	(wire
		(pts
			(xy 124.46 50.8) (xy 161.29 50.8)
		)
	)
	(wire
		(pts
			(xy 269.24 72.39) (xy 269.24 73.66)
		)
	)
	(wire
		(pts
			(xy 255.27 50.8) (xy 255.27 71.12)
		)
	)
	(wire
		(pts
			(xy 121.92 208.28) (xy 121.92 210.82)
		)
	)
	(wire
		(pts
			(xy 234.95 34.29) (xy 242.57 34.29)
		)
	)
	(wire
		(pts
			(xy 119.38 130.81) (xy 128.27 130.81)
		)
	)
	(wire
		(pts
			(xy 252.73 48.26) (xy 278.13 48.26)
		)
	)
	(wire
		(pts
			(xy 252.73 63.5) (xy 274.32 63.5)
		)
	)
	(wire
		(pts
			(xy 135.89 34.29) (xy 138.43 34.29)
		)
	)
	(wire
		(pts
			(xy 255.27 71.12) (xy 255.27 86.36)
		)
	)
	(wire
		(pts
			(xy 33.02 109.22) (xy 36.83 109.22)
		)
	)
	(wire
		(pts
			(xy 302.26 196.85) (xy 302.26 198.12)
		)
	)
	(wire
		(pts
			(xy 88.9 133.35) (xy 78.74 133.35)
		)
	)
	(wire
		(pts
			(xy 81.28 73.66) (xy 87.63 73.66)
		)
	)
	(wire
		(pts
			(xy 62.23 48.26) (xy 62.23 34.29)
		)
	)
	(wire
		(pts
			(xy 266.7 34.29) (xy 269.24 34.29)
		)
	)
	(wire
		(pts
			(xy 86.36 176.53) (xy 86.36 179.07)
		)
	)
	(wire
		(pts
			(xy 121.92 210.82) (xy 121.92 214.63)
		)
	)
	(wire
		(pts
			(xy 33.02 114.3) (xy 36.83 114.3)
		)
	)
	(wire
		(pts
			(xy 147.32 48.26) (xy 147.32 34.29)
		)
	)
	(wire
		(pts
			(xy 123.19 176.53) (xy 123.19 180.34)
		)
	)
	(wire
		(pts
			(xy 73.66 45.72) (xy 87.63 45.72)
		)
	)
	(wire
		(pts
			(xy 252.73 45.72) (xy 266.7 45.72)
		)
	)
	(wire
		(pts
			(xy 62.23 48.26) (xy 87.63 48.26)
		)
	)
	(wire
		(pts
			(xy 105.41 81.28) (xy 105.41 86.36)
		)
	)
	(wire
		(pts
			(xy 99.06 34.29) (xy 105.41 34.29)
		)
	)
	(wire
		(pts
			(xy 124.46 34.29) (xy 127 34.29)
		)
	)
	(wire
		(pts
			(xy 142.24 139.7) (xy 142.24 142.24)
		)
	)
	(wire
		(pts
			(xy 332.74 196.85) (xy 332.74 198.12)
		)
	)
	(wire
		(pts
			(xy 123.19 63.5) (xy 217.17 63.5)
		)
	)
	(wire
		(pts
			(xy 255.27 43.18) (xy 255.27 34.29)
		)
	)
	(wire
		(pts
			(xy 252.73 43.18) (xy 255.27 43.18)
		)
	)
	(wire
		(pts
			(xy 123.19 187.96) (xy 123.19 190.5)
		)
	)
	(wire
		(pts
			(xy 302.26 189.23) (xy 302.26 187.96)
		)
	)
	(wire
		(pts
			(xy 119.38 143.51) (xy 121.92 143.51)
		)
	)
	(wire
		(pts
			(xy 234.95 34.29) (xy 234.95 38.1)
		)
	)
	(wire
		(pts
			(xy 85.09 71.12) (xy 87.63 71.12)
		)
	)
	(wire
		(pts
			(xy 83.82 34.29) (xy 85.09 34.29)
		)
	)
	(wire
		(pts
			(xy 161.29 50.8) (xy 215.9 50.8)
		)
	)
	(wire
		(pts
			(xy 231.14 234.95) (xy 231.14 236.22)
		)
	)
	(wire
		(pts
			(xy 48.26 34.29) (xy 52.07 34.29)
		)
	)
	(wire
		(pts
			(xy 123.19 53.34) (xy 217.17 53.34)
		)
	)
	(wire
		(pts
			(xy 234.95 30.48) (xy 234.95 34.29)
		)
	)
	(wire
		(pts
			(xy 116.84 179.07) (xy 115.57 179.07)
		)
	)
	(wire
		(pts
			(xy 86.36 176.53) (xy 93.98 176.53)
		)
	)
	(wire
		(pts
			(xy 255.27 34.29) (xy 256.54 34.29)
		)
	)
	(wire
		(pts
			(xy 30.48 52.07) (xy 16.51 52.07)
		)
	)
	(wire
		(pts
			(xy 85.09 43.18) (xy 87.63 43.18)
		)
	)
	(wire
		(pts
			(xy 128.27 128.27) (xy 119.38 128.27)
		)
	)
	(wire
		(pts
			(xy 147.32 34.29) (xy 149.86 34.29)
		)
	)
	(wire
		(pts
			(xy 119.38 34.29) (xy 124.46 34.29)
		)
	)
	(wire
		(pts
			(xy 252.73 73.66) (xy 259.08 73.66)
		)
	)
	(wire
		(pts
			(xy 87.63 146.05) (xy 87.63 148.59)
		)
	)
	(wire
		(pts
			(xy 218.44 226.06) (xy 218.44 227.33)
		)
	)
	(wire
		(pts
			(xy 161.29 50.8) (xy 161.29 34.29)
		)
	)
	(wire
		(pts
			(xy 105.41 34.29) (xy 105.41 38.1)
		)
	)
	(wire
		(pts
			(xy 252.73 196.85) (xy 252.73 198.12)
		)
	)
	(wire
		(pts
			(xy 123.19 60.96) (xy 217.17 60.96)
		)
	)
	(wire
		(pts
			(xy 33.02 104.14) (xy 36.83 104.14)
		)
	)
	(wire
		(pts
			(xy 123.19 76.2) (xy 128.27 76.2)
		)
	)
	(wire
		(pts
			(xy 92.71 210.82) (xy 95.25 210.82)
		)
	)
	(wire
		(pts
			(xy 215.9 71.12) (xy 215.9 86.36)
		)
	)
	(wire
		(pts
			(xy 105.41 34.29) (xy 111.76 34.29)
		)
	)
	(wire
		(pts
			(xy 142.24 129.54) (xy 142.24 132.08)
		)
	)
	(wire
		(pts
			(xy 86.36 210.82) (xy 86.36 213.36)
		)
	)
	(wire
		(pts
			(xy 123.19 58.42) (xy 148.59 58.42)
		)
	)
	(wire
		(pts
			(xy 252.73 55.88) (xy 274.32 55.88)
		)
	)
	(wire
		(pts
			(xy 33.02 116.84) (xy 36.83 116.84)
		)
	)
	(wire
		(pts
			(xy 148.59 58.42) (xy 148.59 66.04)
		)
	)
	(wire
		(pts
			(xy 86.36 220.98) (xy 86.36 223.52)
		)
	)
	(wire
		(pts
			(xy 215.9 71.12) (xy 217.17 71.12)
		)
	)
	(wire
		(pts
			(xy 148.59 129.54) (xy 148.59 132.08)
		)
	)
	(wire
		(pts
			(xy 87.63 143.51) (xy 87.63 146.05)
		)
	)
	(wire
		(pts
			(xy 303.53 234.95) (xy 303.53 236.22)
		)
	)
	(wire
		(pts
			(xy 30.48 68.58) (xy 30.48 69.85)
		)
	)
	(wire
		(pts
			(xy 236.22 196.85) (xy 236.22 198.12)
		)
	)
	(wire
		(pts
			(xy 135.89 45.72) (xy 135.89 34.29)
		)
	)
	(wire
		(pts
			(xy 115.57 176.53) (xy 123.19 176.53)
		)
	)
	(wire
		(pts
			(xy 259.08 234.95) (xy 259.08 236.22)
		)
	)
	(wire
		(pts
			(xy 227.33 34.29) (xy 234.95 34.29)
		)
	)
	(wire
		(pts
			(xy 121.92 222.25) (xy 121.92 223.52)
		)
	)
	(wire
		(pts
			(xy 264.16 34.29) (xy 266.7 34.29)
		)
	)
	(wire
		(pts
			(xy 294.64 234.95) (xy 294.64 236.22)
		)
	)
	(wire
		(pts
			(xy 294.64 226.06) (xy 294.64 227.33)
		)
	)
	(wire
		(pts
			(xy 33.02 106.68) (xy 36.83 106.68)
		)
	)
	(wire
		(pts
			(xy 247.65 196.85) (xy 247.65 198.12)
		)
	)
	(wire
		(pts
			(xy 115.57 210.82) (xy 121.92 210.82)
		)
	)
	(wire
		(pts
			(xy 121.92 120.65) (xy 121.92 118.11)
		)
	)
	(wire
		(pts
			(xy 247.65 187.96) (xy 247.65 189.23)
		)
	)
	(wire
		(pts
			(xy 69.85 55.88) (xy 87.63 55.88)
		)
	)
	(wire
		(pts
			(xy 215.9 43.18) (xy 217.17 43.18)
		)
	)
	(wire
		(pts
			(xy 246.38 234.95) (xy 246.38 236.22)
		)
	)
	(wire
		(pts
			(xy 135.89 45.72) (xy 217.17 45.72)
		)
	)
	(wire
		(pts
			(xy 41.91 72.39) (xy 41.91 73.66)
		)
	)
	(wire
		(pts
			(xy 276.86 34.29) (xy 278.13 34.29)
		)
	)
	(wire
		(pts
			(xy 275.59 234.95) (xy 275.59 236.22)
		)
	)
	(wire
		(pts
			(xy 16.51 60.96) (xy 17.78 60.96)
		)
	)
	(wire
		(pts
			(xy 116.84 179.07) (xy 116.84 190.5)
		)
	)
	(wire
		(pts
			(xy 252.73 76.2) (xy 259.08 76.2)
		)
	)
	(wire
		(pts
			(xy 62.23 34.29) (xy 63.5 34.29)
		)
	)
	(wire
		(pts
			(xy 332.74 189.23) (xy 332.74 187.96)
		)
	)
	(wire
		(pts
			(xy 252.73 71.12) (xy 255.27 71.12)
		)
	)
	(wire
		(pts
			(xy 124.46 43.18) (xy 124.46 34.29)
		)
	)
	(wire
		(pts
			(xy 86.36 186.69) (xy 86.36 190.5)
		)
	)
	(wire
		(pts
			(xy 38.1 60.96) (xy 87.63 60.96)
		)
	)
	(wire
		(pts
			(xy 309.88 187.96) (xy 309.88 189.23)
		)
	)
	(wire
		(pts
			(xy 87.63 120.65) (xy 87.63 118.11)
		)
	)
	(wire
		(pts
			(xy 212.09 73.66) (xy 217.17 73.66)
		)
	)
	(wire
		(pts
			(xy 278.13 34.29) (xy 280.67 34.29)
		)
	)
	(wire
		(pts
			(xy 147.32 48.26) (xy 217.17 48.26)
		)
	)
	(wire
		(pts
			(xy 123.19 45.72) (xy 135.89 45.72)
		)
	)
	(wire
		(pts
			(xy 69.85 53.34) (xy 87.63 53.34)
		)
	)
	(wire
		(pts
			(xy 303.53 226.06) (xy 303.53 227.33)
		)
	)
	(wire
		(pts
			(xy 73.66 34.29) (xy 76.2 34.29)
		)
	)
	(wire
		(pts
			(xy 124.46 71.12) (xy 124.46 86.36)
		)
	)
	(wire
		(pts
			(xy 266.7 45.72) (xy 266.7 34.29)
		)
	)
	(wire
		(pts
			(xy 123.19 55.88) (xy 217.17 55.88)
		)
	)
	(wire
		(pts
			(xy 30.48 52.07) (xy 30.48 53.34)
		)
	)
	(wire
		(pts
			(xy 255.27 50.8) (xy 292.1 50.8)
		)
	)
	(wire
		(pts
			(xy 215.9 34.29) (xy 215.9 43.18)
		)
	)
	(wire
		(pts
			(xy 124.46 43.18) (xy 215.9 43.18)
		)
	)
	(wire
		(pts
			(xy 252.73 58.42) (xy 269.24 58.42)
		)
	)
	(wire
		(pts
			(xy 275.59 226.06) (xy 275.59 227.33)
		)
	)
	(wire
		(pts
			(xy 69.85 63.5) (xy 87.63 63.5)
		)
	)
	(wire
		(pts
			(xy 33.02 111.76) (xy 36.83 111.76)
		)
	)
	(wire
		(pts
			(xy 234.95 81.28) (xy 234.95 86.36)
		)
	)
	(wire
		(pts
			(xy 123.19 175.26) (xy 123.19 176.53)
		)
	)
	(wire
		(pts
			(xy 105.41 220.98) (xy 105.41 223.52)
		)
	)
	(wire
		(pts
			(xy 86.36 175.26) (xy 86.36 176.53)
		)
	)
	(wire
		(pts
			(xy 69.85 58.42) (xy 87.63 58.42)
		)
	)
	(wire
		(pts
			(xy 134.62 34.29) (xy 135.89 34.29)
		)
	)
	(wire
		(pts
			(xy 161.29 34.29) (xy 157.48 34.29)
		)
	)
	(wire
		(pts
			(xy 78.74 130.81) (xy 88.9 130.81)
		)
	)
	(wire
		(pts
			(xy 121.92 143.51) (xy 121.92 146.05)
		)
	)
	(wire
		(pts
			(xy 85.09 50.8) (xy 48.26 50.8)
		)
	)
	(wire
		(pts
			(xy 148.59 58.42) (xy 217.17 58.42)
		)
	)
	(wire
		(pts
			(xy 73.66 45.72) (xy 73.66 34.29)
		)
	)
	(wire
		(pts
			(xy 121.92 146.05) (xy 121.92 148.59)
		)
	)
	(wire
		(pts
			(xy 121.92 146.05) (xy 119.38 146.05)
		)
	)
	(wire
		(pts
			(xy 250.19 34.29) (xy 255.27 34.29)
		)
	)
	(wire
		(pts
			(xy 85.09 50.8) (xy 85.09 71.12)
		)
	)
	(wire
		(pts
			(xy 278.13 48.26) (xy 278.13 34.29)
		)
	)
	(wire
		(pts
			(xy 294.64 189.23) (xy 294.64 187.96)
		)
	)
	(wire
		(pts
			(xy 93.98 179.07) (xy 93.98 176.53)
		)
	)
	(wire
		(pts
			(xy 148.59 73.66) (xy 148.59 74.93)
		)
	)
	(wire
		(pts
			(xy 252.73 187.96) (xy 252.73 189.23)
		)
	)
	(wire
		(pts
			(xy 30.48 50.8) (xy 30.48 52.07)
		)
	)
	(wire
		(pts
			(xy 88.9 125.73) (xy 78.74 125.73)
		)
	)
	(wire
		(pts
			(xy 148.59 139.7) (xy 148.59 142.24)
		)
	)
	(wire
		(pts
			(xy 128.27 125.73) (xy 119.38 125.73)
		)
	)
	(wire
		(pts
			(xy 146.05 34.29) (xy 147.32 34.29)
		)
	)
	(wire
		(pts
			(xy 252.73 50.8) (xy 255.27 50.8)
		)
	)
	(wire
		(pts
			(xy 93.98 179.07) (xy 95.25 179.07)
		)
	)
	(wire
		(pts
			(xy 93.98 176.53) (xy 95.25 176.53)
		)
	)
	(wire
		(pts
			(xy 269.24 58.42) (xy 269.24 64.77)
		)
	)
	(wire
		(pts
			(xy 309.88 196.85) (xy 309.88 198.12)
		)
	)
	(wire
		(pts
			(xy 123.19 71.12) (xy 124.46 71.12)
		)
	)
	(wire
		(pts
			(xy 217.17 50.8) (xy 215.9 50.8)
		)
	)
	(label "I_CI"
		(at 121.92 125.73 0)
		(fields_autoplaced yes)
	)
	(label "I_NRSTI"
		(at 69.85 53.34 0)
		(fields_autoplaced yes)
	)
	(label "I_RO"
		(at 69.85 58.42 0)
		(fields_autoplaced yes)
	)
	(label "I_NRSTI"
		(at 121.92 128.27 0)
		(fields_autoplaced yes)
	)
	(label "CLKI"
		(at 69.85 60.96 0)
		(fields_autoplaced yes)
	)
	(label "I_BI"
		(at 121.92 130.81 0)
		(fields_autoplaced yes)
	)
	(label "I_CI"
		(at 69.85 63.5 0)
		(fields_autoplaced yes)
	)
	(label "I_RO"
		(at 121.92 133.35 0)
		(fields_autoplaced yes)
	)
	(label "I_BI"
		(at 69.85 55.88 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "NRSTO"
		(shape output)
		(at 128.27 128.27 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "NRSTI"
		(shape input)
		(at 78.74 128.27 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "CI"
		(shape input)
		(at 78.74 125.73 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "+1V2"
		(shape passive)
		(at 33.02 104.14 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "BO"
		(shape output)
		(at 274.32 55.88 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "+1.8V_OUT"
		(shape output)
		(at 33.02 114.3 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "GND"
		(shape passive)
		(at 33.02 106.68 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "RI"
		(shape input)
		(at 274.32 58.42 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "RO"
		(shape output)
		(at 78.74 133.35 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "CO"
		(shape output)
		(at 274.32 63.5 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "GND_OUT"
		(shape output)
		(at 33.02 116.84 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "GND_IF"
		(shape input)
		(at 33.02 111.76 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "BI"
		(shape input)
		(at 78.74 130.81 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "V_IF"
		(shape input)
		(at 33.02 109.22 180)
		(fields_autoplaced yes)
	)
	(symbol
		(lib_id "Device:C")
		(at 302.26 193.04 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6041"
			(at 303.53 191.135 0)
		)
		(property "Value" "1µ"
			(at 303.53 196.215 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 302.26 193.04 0)
		)
		(property "Datasheet" ""
			(at 302.26 193.04 0)
		)
		(property "Description" ""
			(at 302.26 193.04 0)
		)
		(property "DK" ""
			(at 302.26 193.04 0)
		)
		(property "PARTNO" ""
			(at 302.26 193.04 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 302.26 193.04 0)
		)
		(property "Distributor" "D"
			(at 302.26 193.04 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 302.26 193.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6041")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C138")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 142.24 135.89 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6010"
			(at 144.145 133.985 0)
		)
		(property "Value" "100n"
			(at 144.145 139.7 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 142.24 135.89 0)
		)
		(property "Datasheet" ""
			(at 142.24 135.89 0)
		)
		(property "Description" ""
			(at 142.24 135.89 0)
		)
		(property "DK" ""
			(at 142.24 135.89 0)
		)
		(property "PARTNO" ""
			(at 142.24 135.89 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 142.24 135.89 0)
		)
		(property "Distributor" "D"
			(at 142.24 135.89 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 142.24 135.89 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6010")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C107")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+3V3_EXT")
		(at 368.3 233.68 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR06107"
			(at 368.3 237.49 0)
		)
		(property "Value" "+3V3_EXT"
			(at 371.475 229.235 0)
		)
		(property "Footprint" ""
			(at 368.3 233.68 0)
		)
		(property "Datasheet" ""
			(at 368.3 233.68 0)
		)
		(property "Description" ""
			(at 368.3 233.68 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06107")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0358")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_1")
		(at 36.83 114.3 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06017"
			(at 33.02 114.3 0)
		)
		(property "Value" "+1V8_1"
			(at 40.64 114.3 90)
		)
		(property "Footprint" ""
			(at 36.83 114.3 0)
		)
		(property "Datasheet" ""
			(at 36.83 114.3 0)
		)
		(property "Description" ""
			(at 36.83 114.3 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06017")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0256")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 148.59 69.85 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6003"
			(at 152.4 68.58 90)
		)
		(property "Value" "10k"
			(at 150.495 69.215 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 146.812 69.85 90)
		)
		(property "Datasheet" "~"
			(at 148.59 69.85 0)
		)
		(property "Description" ""
			(at 148.59 69.85 0)
		)
		(property "Manufacturer" "ERJ-H3EF1002V"
			(at 148.59 69.85 0)
		)
		(property "Distributor" "D"
			(at 148.59 69.85 0)
		)
		(property "OrderNr" "10-ERJ-H3EF1002VCT-ND"
			(at 148.59 69.85 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "R6003")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R44")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_1")
		(at 128.27 76.2 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR06035"
			(at 124.46 76.2 0)
		)
		(property "Value" "+1V8_1"
			(at 133.35 76.2 0)
		)
		(property "Footprint" ""
			(at 128.27 76.2 0)
		)
		(property "Datasheet" ""
			(at 128.27 76.2 0)
		)
		(property "Description" ""
			(at 128.27 76.2 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06035")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0290")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 124.46 86.36 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR06032"
			(at 124.46 92.71 0)
		)
		(property "Value" "GND_1"
			(at 124.46 91.44 0)
		)
		(property "Footprint" ""
			(at 124.46 86.36 0)
		)
		(property "Datasheet" ""
			(at 124.46 86.36 0)
		)
		(property "Description" ""
			(at 124.46 86.36 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06032")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0287")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_1")
		(at 269.24 73.66 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR06124"
			(at 269.24 69.85 0)
		)
		(property "Value" "+1V8_1"
			(at 269.24 78.74 0)
		)
		(property "Footprint" ""
			(at 269.24 73.66 0)
		)
		(property "Datasheet" ""
			(at 269.24 73.66 0)
		)
		(property "Description" ""
			(at 269.24 73.66 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06124")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0369")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_1")
		(at 303.53 226.06 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06085"
			(at 303.53 229.87 0)
		)
		(property "Value" "+1V2_1"
			(at 303.53 221.615 0)
		)
		(property "Footprint" ""
			(at 303.53 226.06 0)
		)
		(property "Datasheet" ""
			(at 303.53 226.06 0)
		)
		(property "Description" ""
			(at 303.53 226.06 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06085")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0334")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_IF_1")
		(at 148.59 142.24 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0214"
			(at 148.59 148.59 0)
		)
		(property "Value" "GND_IF_1"
			(at 148.59 147.32 0)
		)
		(property "Footprint" ""
			(at 148.59 142.24 0)
		)
		(property "Datasheet" ""
			(at 148.59 142.24 0)
		)
		(property "Description" ""
			(at 148.59 142.24 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0214")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_1")
		(at 128.27 73.66 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U6008"
			(at 129.54 77.47 0)
		)
		(property "Value" "+0V8"
			(at 131.445 73.66 90)
		)
		(property "Footprint" ""
			(at 128.27 73.66 0)
		)
		(property "Datasheet" ""
			(at 128.27 73.66 0)
		)
		(property "Description" ""
			(at 128.27 73.66 0)
		)
		(property "Distributor" "-"
			(at 128.27 73.66 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "U6008")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U45")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+V_IF")
		(at 341.63 233.68 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR06101"
			(at 341.63 237.49 0)
		)
		(property "Value" "+V_IF"
			(at 342.265 229.235 0)
		)
		(property "Footprint" ""
			(at 341.63 233.68 0)
		)
		(property "Datasheet" ""
			(at 341.63 233.68 0)
		)
		(property "Description" ""
			(at 341.63 233.68 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06101")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0352")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 86.36 223.52 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06006"
			(at 86.36 229.87 0)
		)
		(property "Value" "GND_1"
			(at 86.36 228.6 0)
		)
		(property "Footprint" ""
			(at 86.36 223.52 0)
		)
		(property "Datasheet" ""
			(at 86.36 223.52 0)
		)
		(property "Description" ""
			(at 86.36 223.52 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06006")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0263")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_1")
		(at 231.14 187.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U6009"
			(at 234.95 186.69 0)
		)
		(property "Value" "+0V8"
			(at 231.14 184.785 90)
		)
		(property "Footprint" ""
			(at 231.14 187.96 0)
		)
		(property "Datasheet" ""
			(at 231.14 187.96 0)
		)
		(property "Description" ""
			(at 231.14 187.96 0)
		)
		(property "Distributor" "-"
			(at 231.14 187.96 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "U6009")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U46")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 255.27 86.36 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06122"
			(at 255.27 92.71 0)
		)
		(property "Value" "GND_1"
			(at 255.27 91.44 0)
		)
		(property "Footprint" ""
			(at 255.27 86.36 0)
		)
		(property "Datasheet" ""
			(at 255.27 86.36 0)
		)
		(property "Description" ""
			(at 255.27 86.36 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06122")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0367")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 130.81 34.29 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6015"
			(at 133.35 31.75 90)
		)
		(property "Value" "1µ"
			(at 132.08 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 130.81 34.29 0)
		)
		(property "Datasheet" ""
			(at 130.81 34.29 0)
		)
		(property "Description" ""
			(at 130.81 34.29 0)
		)
		(property "DK" ""
			(at 130.81 34.29 0)
		)
		(property "PARTNO" ""
			(at 130.81 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 130.81 34.29 0)
		)
		(property "Distributor" "D"
			(at 130.81 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 130.81 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6015")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C112")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 88.9 19.05 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#FLG06002"
			(at 88.9 20.955 0)
		)
		(property "Value" "PWR_FLAG"
			(at 88.9 23.495 0)
		)
		(property "Footprint" ""
			(at 88.9 19.05 0)
		)
		(property "Datasheet" "~"
			(at 88.9 19.05 0)
		)
		(property "Description" ""
			(at 88.9 19.05 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#FLG06002")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG011")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 142.24 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6020"
			(at 139.7 31.75 90)
		)
		(property "Value" "1µ"
			(at 140.97 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 142.24 34.29 0)
		)
		(property "Datasheet" ""
			(at 142.24 34.29 0)
		)
		(property "Description" ""
			(at 142.24 34.29 0)
		)
		(property "DK" ""
			(at 142.24 34.29 0)
		)
		(property "PARTNO" ""
			(at 142.24 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 142.24 34.29 0)
		)
		(property "Distributor" "D"
			(at 142.24 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 142.24 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6020")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C117")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 105.41 223.52 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06012"
			(at 105.41 229.87 0)
		)
		(property "Value" "GND_1"
			(at 105.41 228.6 0)
		)
		(property "Footprint" ""
			(at 105.41 223.52 0)
		)
		(property "Datasheet" ""
			(at 105.41 223.52 0)
		)
		(property "Description" ""
			(at 105.41 223.52 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06012")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0269")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_1")
		(at 259.08 76.2 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR06123"
			(at 255.27 76.2 0)
		)
		(property "Value" "+1V8_1"
			(at 264.16 76.2 0)
		)
		(property "Footprint" ""
			(at 259.08 76.2 0)
		)
		(property "Datasheet" ""
			(at 259.08 76.2 0)
		)
		(property "Description" ""
			(at 259.08 76.2 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06123")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0368")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_1")
		(at 121.92 208.28 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U6005"
			(at 125.73 207.01 0)
		)
		(property "Value" "+0V8"
			(at 121.92 205.105 90)
		)
		(property "Footprint" ""
			(at 121.92 208.28 0)
		)
		(property "Datasheet" ""
			(at 121.92 208.28 0)
		)
		(property "Description" ""
			(at 121.92 208.28 0)
		)
		(property "Distributor" "-"
			(at 121.92 208.28 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "U6005")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U42")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 231.14 198.12 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06036"
			(at 231.14 204.47 0)
		)
		(property "Value" "GND_1"
			(at 231.14 203.2 0)
		)
		(property "Footprint" ""
			(at 231.14 198.12 0)
		)
		(property "Datasheet" ""
			(at 231.14 198.12 0)
		)
		(property "Description" ""
			(at 231.14 198.12 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06036")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0291")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 275.59 231.14 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6033"
			(at 276.225 229.235 0)
		)
		(property "Value" "100n"
			(at 276.86 234.95 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 275.59 231.14 0)
		)
		(property "Datasheet" ""
			(at 275.59 231.14 0)
		)
		(property "Description" ""
			(at 275.59 231.14 0)
		)
		(property "DK" ""
			(at 275.59 231.14 0)
		)
		(property "PARTNO" ""
			(at 275.59 231.14 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 275.59 231.14 0)
		)
		(property "Distributor" "D"
			(at 275.59 231.14 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 275.59 231.14 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6033")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C130")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 259.08 236.22 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06054"
			(at 259.08 242.57 0)
		)
		(property "Value" "GND_1"
			(at 259.08 241.3 0)
		)
		(property "Footprint" ""
			(at 259.08 236.22 0)
		)
		(property "Datasheet" ""
			(at 259.08 236.22 0)
		)
		(property "Description" ""
			(at 259.08 236.22 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06054")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0307")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_1")
		(at 148.59 74.93 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR06047"
			(at 148.59 71.12 0)
		)
		(property "Value" "+1V8_1"
			(at 148.59 80.01 0)
		)
		(property "Footprint" ""
			(at 148.59 74.93 0)
		)
		(property "Datasheet" ""
			(at 148.59 74.93 0)
		)
		(property "Description" ""
			(at 148.59 74.93 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06047")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0301")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 223.52 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6057"
			(at 217.17 31.75 90)
		)
		(property "Value" "1µ"
			(at 218.44 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 223.52 34.29 0)
		)
		(property "Datasheet" ""
			(at 223.52 34.29 0)
		)
		(property "Description" ""
			(at 223.52 34.29 0)
		)
		(property "DK" ""
			(at 223.52 34.29 0)
		)
		(property "PARTNO" ""
			(at 223.52 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 223.52 34.29 0)
		)
		(property "Distributor" "D"
			(at 223.52 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 223.52 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6057")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C153")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 284.48 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6061"
			(at 281.94 31.75 90)
		)
		(property "Value" "1µ"
			(at 283.21 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 284.48 34.29 0)
		)
		(property "Datasheet" ""
			(at 284.48 34.29 0)
		)
		(property "Description" ""
			(at 284.48 34.29 0)
		)
		(property "DK" ""
			(at 284.48 34.29 0)
		)
		(property "PARTNO" ""
			(at 284.48 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 284.48 34.29 0)
		)
		(property "Distributor" "D"
			(at 284.48 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 284.48 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6061")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C157")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 121.92 148.59 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06018"
			(at 121.92 154.94 0)
		)
		(property "Value" "GND_1"
			(at 121.92 153.67 0)
		)
		(property "Footprint" ""
			(at 121.92 148.59 0)
		)
		(property "Datasheet" ""
			(at 121.92 148.59 0)
		)
		(property "Description" ""
			(at 121.92 148.59 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06018")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0275")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Isolator:ADuM1411")
		(at 104.14 133.35 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U6004"
			(at 104.14 113.03 0)
		)
		(property "Value" "ADUM141E0BRZ-RL7"
			(at 104.14 115.57 0)
		)
		(property "Footprint" "Package_SO:SOIC-16_3.9x9.9mm_P1.27mm"
			(at 104.14 151.13 0)
		)
		(property "Datasheet" "https://www.analog.com/media/en/technical-documentation/data-sheets/ADUM1410_1411_1412.pdf"
			(at 83.82 133.35 0)
		)
		(property "Description" ""
			(at 104.14 133.35 0)
		)
		(property "Distributor" "D"
			(at 104.14 133.35 0)
		)
		(property "Manufacturer" "ADUM141E0BRZ-RL7"
			(at 104.14 133.35 0)
		)
		(property "OrderNr" "505-ADUM141E0BRZ-RL7CT-ND"
			(at 104.14 133.35 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "flex2_sch"
				(path
					(reference "U6004")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U41")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 236.22 193.04 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6018"
			(at 233.68 195.58 90)
		)
		(property "Value" "1µ"
			(at 236.855 194.31 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 236.22 193.04 0)
		)
		(property "Datasheet" ""
			(at 236.22 193.04 0)
		)
		(property "Description" ""
			(at 236.22 193.04 0)
		)
		(property "DK" ""
			(at 236.22 193.04 0)
		)
		(property "PARTNO" ""
			(at 236.22 193.04 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 236.22 193.04 0)
		)
		(property "Distributor" "D"
			(at 236.22 193.04 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 236.22 193.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6018")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C115")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 86.36 217.17 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6002"
			(at 87.63 215.265 0)
		)
		(property "Value" "100n"
			(at 87.63 220.98 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 86.36 217.17 0)
		)
		(property "Datasheet" ""
			(at 86.36 217.17 0)
		)
		(property "Description" ""
			(at 86.36 217.17 0)
		)
		(property "DK" ""
			(at 86.36 217.17 0)
		)
		(property "PARTNO" ""
			(at 86.36 217.17 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 86.36 217.17 0)
		)
		(property "Distributor" "D"
			(at 86.36 217.17 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 86.36 217.17 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6002")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C99")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 294.64 236.22 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06080"
			(at 294.64 242.57 0)
		)
		(property "Value" "GND_1"
			(at 294.64 241.3 0)
		)
		(property "Footprint" ""
			(at 294.64 236.22 0)
		)
		(property "Datasheet" ""
			(at 294.64 236.22 0)
		)
		(property "Description" ""
			(at 294.64 236.22 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06080")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0331")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 252.73 193.04 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6024"
			(at 250.19 195.58 90)
		)
		(property "Value" "1µ"
			(at 253.365 194.31 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 252.73 193.04 0)
		)
		(property "Datasheet" ""
			(at 252.73 193.04 0)
		)
		(property "Description" ""
			(at 252.73 193.04 0)
		)
		(property "DK" ""
			(at 252.73 193.04 0)
		)
		(property "PARTNO" ""
			(at 252.73 193.04 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 252.73 193.04 0)
		)
		(property "Distributor" "D"
			(at 252.73 193.04 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 252.73 193.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6024")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C121")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 389.89 233.68 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06110"
			(at 389.89 240.03 0)
		)
		(property "Value" "GND_1"
			(at 389.89 238.76 0)
		)
		(property "Footprint" ""
			(at 389.89 233.68 0)
		)
		(property "Datasheet" ""
			(at 389.89 233.68 0)
		)
		(property "Description" ""
			(at 389.89 233.68 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06110")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0360")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 259.08 231.14 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6028"
			(at 259.715 229.235 0)
		)
		(property "Value" "1µ"
			(at 260.35 234.95 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 259.08 231.14 0)
		)
		(property "Datasheet" ""
			(at 259.08 231.14 0)
		)
		(property "Description" ""
			(at 259.08 231.14 0)
		)
		(property "DK" ""
			(at 259.08 231.14 0)
		)
		(property "PARTNO" ""
			(at 259.08 231.14 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 259.08 231.14 0)
		)
		(property "Distributor" "D"
			(at 259.08 231.14 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 259.08 231.14 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6028")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C125")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "BM1366_mode1_1")
		(lib_id "mylib7:BM1366_mode1")
		(at 105.41 60.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U6007"
			(at 107.6041 36.195 0)
		)
		(property "Value" "BM1366_mode1"
			(at 107.6041 38.735 0)
		)
		(property "Footprint" "0xaxe:BM1366"
			(at 97.79 60.96 0)
		)
		(property "Datasheet" ""
			(at 97.79 60.96 0)
		)
		(property "Description" ""
			(at 105.41 60.96 0)
		)
		(property "Distributor" "-"
			(at 105.41 60.96 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "17")
		(pin "18")
		(pin "19")
		(pin "2")
		(pin "20")
		(pin "21")
		(pin "22")
		(pin "23")
		(pin "24")
		(pin "25")
		(pin "26")
		(pin "27")
		(pin "28")
		(pin "29")
		(pin "3")
		(pin "30")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "flex2_sch"
				(path
					(reference "U6007")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U44")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 41.91 77.47 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6003"
			(at 40.64 75.565 90)
		)
		(property "Value" "100n"
			(at 40.64 84.455 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 41.91 77.47 0)
		)
		(property "Datasheet" ""
			(at 41.91 77.47 0)
		)
		(property "Description" ""
			(at 41.91 77.47 0)
		)
		(property "DK" ""
			(at 41.91 77.47 0)
		)
		(property "PARTNO" ""
			(at 41.91 77.47 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 41.91 77.47 0)
		)
		(property "Distributor" "D"
			(at 41.91 77.47 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 41.91 77.47 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6003")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C100")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 332.74 198.12 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06099"
			(at 332.74 204.47 0)
		)
		(property "Value" "GND_1"
			(at 332.74 203.2 0)
		)
		(property "Footprint" ""
			(at 332.74 198.12 0)
		)
		(property "Datasheet" ""
			(at 332.74 198.12 0)
		)
		(property "Description" ""
			(at 332.74 198.12 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06099")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0350")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_1")
		(at 246.38 226.06 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06044"
			(at 246.38 229.87 0)
		)
		(property "Value" "+1V2_1"
			(at 246.38 221.615 0)
		)
		(property "Footprint" ""
			(at 246.38 226.06 0)
		)
		(property "Datasheet" ""
			(at 246.38 226.06 0)
		)
		(property "Description" ""
			(at 246.38 226.06 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06044")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0298")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_IF_1")
		(at 87.63 148.59 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0197"
			(at 87.63 154.94 0)
		)
		(property "Value" "GND_IF_1"
			(at 87.63 153.67 0)
		)
		(property "Footprint" ""
			(at 87.63 148.59 0)
		)
		(property "Datasheet" ""
			(at 87.63 148.59 0)
		)
		(property "Description" ""
			(at 87.63 148.59 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0197")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 153.67 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6026"
			(at 151.13 31.75 90)
		)
		(property "Value" "1µ"
			(at 152.4 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 153.67 34.29 0)
		)
		(property "Datasheet" ""
			(at 153.67 34.29 0)
		)
		(property "Description" ""
			(at 153.67 34.29 0)
		)
		(property "DK" ""
			(at 153.67 34.29 0)
		)
		(property "PARTNO" ""
			(at 153.67 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 153.67 34.29 0)
		)
		(property "Distributor" "D"
			(at 153.67 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 153.67 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6026")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C123")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+V_IF_1")
		(at 148.59 129.54 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0254"
			(at 148.59 133.35 0)
		)
		(property "Value" "+V_IF_1"
			(at 148.59 124.46 0)
		)
		(property "Footprint" ""
			(at 148.59 129.54 0)
		)
		(property "Datasheet" ""
			(at 148.59 129.54 0)
		)
		(property "Description" ""
			(at 148.59 129.54 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0254")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 86.36 182.88 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C21"
			(at 87.63 180.975 0)
		)
		(property "Value" "100n"
			(at 87.63 186.69 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 86.36 182.88 0)
		)
		(property "Datasheet" ""
			(at 86.36 182.88 0)
		)
		(property "Description" ""
			(at 86.36 182.88 0)
		)
		(property "DK" ""
			(at 86.36 182.88 0)
		)
		(property "PARTNO" ""
			(at 86.36 182.88 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 86.36 182.88 0)
		)
		(property "Distributor" "D"
			(at 86.36 182.88 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 86.36 182.88 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "C21")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 218.44 231.14 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6013"
			(at 219.075 229.235 0)
		)
		(property "Value" "10µ/16V"
			(at 219.71 234.95 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 218.44 231.14 0)
		)
		(property "Datasheet" ""
			(at 218.44 231.14 0)
		)
		(property "Description" ""
			(at 218.44 231.14 0)
		)
		(property "DK" ""
			(at 218.44 231.14 0)
		)
		(property "PARTNO" ""
			(at 218.44 231.14 0)
		)
		(property "Manufacturer" "GRT188R61C106KE13D"
			(at 218.44 231.14 0)
		)
		(property "Distributor" "D"
			(at 218.44 231.14 0)
		)
		(property "OrderNr" "490-12317-1-ND"
			(at 218.44 231.14 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6013")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C110")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 341.63 233.68 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#FLG06004"
			(at 341.63 235.585 0)
		)
		(property "Value" "PWR_FLAG"
			(at 344.805 238.125 0)
		)
		(property "Footprint" ""
			(at 341.63 233.68 0)
		)
		(property "Datasheet" "~"
			(at 341.63 233.68 0)
		)
		(property "Description" ""
			(at 341.63 233.68 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#FLG06004")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG013")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 95.25 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6009"
			(at 88.9 31.75 90)
		)
		(property "Value" "1µ"
			(at 90.17 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 95.25 34.29 0)
		)
		(property "Datasheet" ""
			(at 95.25 34.29 0)
		)
		(property "Description" ""
			(at 95.25 34.29 0)
		)
		(property "DK" ""
			(at 95.25 34.29 0)
		)
		(property "PARTNO" ""
			(at 95.25 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 95.25 34.29 0)
		)
		(property "Distributor" "D"
			(at 95.25 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 95.25 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6009")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C106")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 231.14 231.14 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6017"
			(at 231.775 229.235 0)
		)
		(property "Value" "10µ/16V"
			(at 232.41 234.95 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 231.14 231.14 0)
		)
		(property "Datasheet" ""
			(at 231.14 231.14 0)
		)
		(property "Description" ""
			(at 231.14 231.14 0)
		)
		(property "DK" ""
			(at 231.14 231.14 0)
		)
		(property "PARTNO" ""
			(at 231.14 231.14 0)
		)
		(property "Manufacturer" "GRT188R61C106KE13D"
			(at 231.14 231.14 0)
		)
		(property "Distributor" "D"
			(at 231.14 231.14 0)
		)
		(property "OrderNr" "490-12317-1-ND"
			(at 231.14 231.14 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6017")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C114")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_1")
		(at 275.59 226.06 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06065"
			(at 275.59 229.87 0)
		)
		(property "Value" "+1V2_1"
			(at 275.59 221.615 0)
		)
		(property "Footprint" ""
			(at 275.59 226.06 0)
		)
		(property "Datasheet" ""
			(at 275.59 226.06 0)
		)
		(property "Description" ""
			(at 275.59 226.06 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06065")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0314")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 36.83 106.68 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0253"
			(at 43.18 106.68 0)
		)
		(property "Value" "GND_1"
			(at 40.64 106.68 90)
		)
		(property "Footprint" ""
			(at 36.83 106.68 0)
		)
		(property "Datasheet" ""
			(at 36.83 106.68 0)
		)
		(property "Description" ""
			(at 36.83 106.68 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0253")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 247.65 198.12 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06046"
			(at 247.65 204.47 0)
		)
		(property "Value" "GND_1"
			(at 247.65 203.2 0)
		)
		(property "Footprint" ""
			(at 247.65 198.12 0)
		)
		(property "Datasheet" ""
			(at 247.65 198.12 0)
		)
		(property "Description" ""
			(at 247.65 198.12 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06046")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0300")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 302.26 198.12 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06084"
			(at 302.26 204.47 0)
		)
		(property "Value" "GND_1"
			(at 302.26 203.2 0)
		)
		(property "Footprint" ""
			(at 302.26 198.12 0)
		)
		(property "Datasheet" ""
			(at 302.26 198.12 0)
		)
		(property "Description" ""
			(at 302.26 198.12 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06084")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0333")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 368.3 233.68 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#FLG06006"
			(at 368.3 235.585 0)
		)
		(property "Value" "PWR_FLAG"
			(at 371.475 238.125 0)
		)
		(property "Footprint" ""
			(at 368.3 233.68 0)
		)
		(property "Datasheet" "~"
			(at 368.3 233.68 0)
		)
		(property "Description" ""
			(at 368.3 233.68 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#FLG06006")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG015")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 309.88 198.12 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06090"
			(at 309.88 204.47 0)
		)
		(property "Value" "GND_1"
			(at 309.88 203.2 0)
		)
		(property "Footprint" ""
			(at 309.88 198.12 0)
		)
		(property "Datasheet" ""
			(at 309.88 198.12 0)
		)
		(property "Description" ""
			(at 309.88 198.12 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06090")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0341")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 30.48 69.85 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06002"
			(at 30.48 76.2 0)
		)
		(property "Value" "GND_1"
			(at 30.48 74.93 0)
		)
		(property "Footprint" ""
			(at 30.48 69.85 0)
		)
		(property "Datasheet" ""
			(at 30.48 69.85 0)
		)
		(property "Description" ""
			(at 30.48 69.85 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06002")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0259")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_1")
		(at 86.36 208.28 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06005"
			(at 86.36 212.09 0)
		)
		(property "Value" "+1V8_1"
			(at 86.36 203.2 0)
		)
		(property "Footprint" ""
			(at 86.36 208.28 0)
		)
		(property "Datasheet" ""
			(at 86.36 208.28 0)
		)
		(property "Description" ""
			(at 86.36 208.28 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06005")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0262")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_1")
		(at 259.08 226.06 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06053"
			(at 259.08 229.87 0)
		)
		(property "Value" "+1V2_1"
			(at 259.08 221.615 0)
		)
		(property "Footprint" ""
			(at 259.08 226.06 0)
		)
		(property "Datasheet" ""
			(at 259.08 226.06 0)
		)
		(property "Description" ""
			(at 259.08 226.06 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06053")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0306")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 85.09 86.36 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR06020"
			(at 85.09 92.71 0)
		)
		(property "Value" "GND_1"
			(at 85.09 91.44 0)
		)
		(property "Footprint" ""
			(at 85.09 86.36 0)
		)
		(property "Datasheet" ""
			(at 85.09 86.36 0)
		)
		(property "Description" ""
			(at 85.09 86.36 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06020")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0277")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 294.64 231.14 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6039"
			(at 295.275 229.235 0)
		)
		(property "Value" "100n"
			(at 295.91 234.95 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 294.64 231.14 0)
		)
		(property "Datasheet" ""
			(at 294.64 231.14 0)
		)
		(property "Description" ""
			(at 294.64 231.14 0)
		)
		(property "DK" ""
			(at 294.64 231.14 0)
		)
		(property "PARTNO" ""
			(at 294.64 231.14 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 294.64 231.14 0)
		)
		(property "Distributor" "D"
			(at 294.64 231.14 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 294.64 231.14 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6039")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C136")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_1")
		(at 36.83 104.14 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0252"
			(at 33.02 104.14 0)
		)
		(property "Value" "+1V2_1"
			(at 40.64 104.14 90)
		)
		(property "Footprint" ""
			(at 36.83 104.14 0)
		)
		(property "Datasheet" ""
			(at 36.83 104.14 0)
		)
		(property "Description" ""
			(at 36.83 104.14 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0252")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+6.5V")
		(at 86.36 175.26 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0142"
			(at 86.36 179.07 0)
		)
		(property "Value" "+6.5V"
			(at 86.36 170.18 0)
		)
		(property "Footprint" ""
			(at 86.36 175.26 0)
		)
		(property "Datasheet" ""
			(at 86.36 175.26 0)
		)
		(property "Description" ""
			(at 86.36 175.26 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0142")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 231.14 193.04 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6016"
			(at 228.6 195.58 90)
		)
		(property "Value" "1µ"
			(at 231.775 194.31 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 231.14 193.04 0)
		)
		(property "Datasheet" ""
			(at 231.14 193.04 0)
		)
		(property "Description" ""
			(at 231.14 193.04 0)
		)
		(property "DK" ""
			(at 231.14 193.04 0)
		)
		(property "PARTNO" ""
			(at 231.14 193.04 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 231.14 193.04 0)
		)
		(property "Distributor" "D"
			(at 231.14 193.04 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 231.14 193.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6016")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C113")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_1")
		(at 218.44 226.06 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06029"
			(at 218.44 229.87 0)
		)
		(property "Value" "+1V2_1"
			(at 218.44 221.615 0)
		)
		(property "Footprint" ""
			(at 218.44 226.06 0)
		)
		(property "Datasheet" ""
			(at 218.44 226.06 0)
		)
		(property "Description" ""
			(at 218.44 226.06 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06029")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0285")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_1")
		(at 212.09 76.2 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR06118"
			(at 215.9 76.2 0)
		)
		(property "Value" "+1V8_1"
			(at 207.01 76.2 0)
		)
		(property "Footprint" ""
			(at 212.09 76.2 0)
		)
		(property "Datasheet" ""
			(at 212.09 76.2 0)
		)
		(property "Description" ""
			(at 212.09 76.2 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06118")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0363")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 148.59 135.89 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6011"
			(at 149.86 133.985 0)
		)
		(property "Value" "100n"
			(at 149.86 139.7 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 148.59 135.89 0)
		)
		(property "Datasheet" ""
			(at 148.59 135.89 0)
		)
		(property "Description" ""
			(at 148.59 135.89 0)
		)
		(property "DK" ""
			(at 148.59 135.89 0)
		)
		(property "PARTNO" ""
			(at 148.59 135.89 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 148.59 135.89 0)
		)
		(property "Distributor" "D"
			(at 148.59 135.89 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 148.59 135.89 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6011")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C108")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_1")
		(at 332.74 187.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR06098"
			(at 332.74 191.77 0)
		)
		(property "Value" "+1V8_1"
			(at 332.74 182.88 0)
		)
		(property "Footprint" ""
			(at 332.74 187.96 0)
		)
		(property "Datasheet" ""
			(at 332.74 187.96 0)
		)
		(property "Description" ""
			(at 332.74 187.96 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06098")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0349")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_1")
		(at 294.64 226.06 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06079"
			(at 294.64 229.87 0)
		)
		(property "Value" "+1V2_1"
			(at 294.64 221.615 0)
		)
		(property "Footprint" ""
			(at 294.64 226.06 0)
		)
		(property "Datasheet" ""
			(at 294.64 226.06 0)
		)
		(property "Description" ""
			(at 294.64 226.06 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06079")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0330")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_1")
		(at 231.14 226.06 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06037"
			(at 231.14 229.87 0)
		)
		(property "Value" "+1V2_1"
			(at 231.14 221.615 0)
		)
		(property "Footprint" ""
			(at 231.14 226.06 0)
		)
		(property "Datasheet" ""
			(at 231.14 226.06 0)
		)
		(property "Description" ""
			(at 231.14 226.06 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06037")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0292")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:NCP114-SN")
		(at 105.41 213.36 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U6003"
			(at 105.41 203.835 0)
		)
		(property "Value" "NCP114ASN080T1G"
			(at 105.41 206.375 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5"
			(at 105.41 213.36 0)
		)
		(property "Datasheet" ""
			(at 105.41 213.36 0)
		)
		(property "Description" ""
			(at 105.41 213.36 0)
		)
		(property "Distributor" "D"
			(at 105.41 213.36 0)
		)
		(property "Manufacturer" "NCP114ASN080T1G"
			(at 105.41 213.36 0)
		)
		(property "OrderNr" "488-NCP114ASN080T1GCT-ND"
			(at 105.41 213.36 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "5")
		(instances
			(project "flex2_sch"
				(path
					(reference "U6003")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U40")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 215.9 86.36 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06119"
			(at 215.9 92.71 0)
		)
		(property "Value" "GND_1"
			(at 215.9 91.44 0)
		)
		(property "Footprint" ""
			(at 215.9 86.36 0)
		)
		(property "Datasheet" ""
			(at 215.9 86.36 0)
		)
		(property "Description" ""
			(at 215.9 86.36 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06119")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0364")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_1")
		(at 234.95 30.48 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06120"
			(at 234.95 34.29 0)
		)
		(property "Value" "+1V2_1"
			(at 234.95 26.035 0)
		)
		(property "Footprint" ""
			(at 234.95 30.48 0)
		)
		(property "Datasheet" ""
			(at 234.95 30.48 0)
		)
		(property "Description" ""
			(at 234.95 30.48 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06120")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0365")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 115.57 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6012"
			(at 112.395 31.75 90)
		)
		(property "Value" "1µ"
			(at 114.3 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 115.57 34.29 0)
		)
		(property "Datasheet" ""
			(at 115.57 34.29 0)
		)
		(property "Description" ""
			(at 115.57 34.29 0)
		)
		(property "DK" ""
			(at 115.57 34.29 0)
		)
		(property "PARTNO" ""
			(at 115.57 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 115.57 34.29 0)
		)
		(property "Distributor" "D"
			(at 115.57 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 115.57 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6012")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C109")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 246.38 231.14 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6022"
			(at 247.015 229.235 0)
		)
		(property "Value" "1µ"
			(at 247.65 234.95 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 246.38 231.14 0)
		)
		(property "Datasheet" ""
			(at 246.38 231.14 0)
		)
		(property "Description" ""
			(at 246.38 231.14 0)
		)
		(property "DK" ""
			(at 246.38 231.14 0)
		)
		(property "PARTNO" ""
			(at 246.38 231.14 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 246.38 231.14 0)
		)
		(property "Distributor" "D"
			(at 246.38 231.14 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 246.38 231.14 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6022")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C119")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 389.89 233.68 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#FLG06007"
			(at 389.89 231.775 0)
		)
		(property "Value" "PWR_FLAG"
			(at 389.89 229.87 0)
		)
		(property "Footprint" ""
			(at 389.89 233.68 0)
		)
		(property "Datasheet" "~"
			(at 389.89 233.68 0)
		)
		(property "Description" ""
			(at 389.89 233.68 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#FLG06007")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG016")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 80.01 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6007"
			(at 77.47 31.75 90)
		)
		(property "Value" "1µ"
			(at 78.74 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 80.01 34.29 0)
		)
		(property "Datasheet" ""
			(at 80.01 34.29 0)
		)
		(property "Description" ""
			(at 80.01 34.29 0)
		)
		(property "DK" ""
			(at 80.01 34.29 0)
		)
		(property "PARTNO" ""
			(at 80.01 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 80.01 34.29 0)
		)
		(property "Distributor" "D"
			(at 80.01 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 80.01 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6007")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C104")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 231.14 236.22 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06038"
			(at 231.14 242.57 0)
		)
		(property "Value" "GND_1"
			(at 231.14 241.3 0)
		)
		(property "Footprint" ""
			(at 231.14 236.22 0)
		)
		(property "Datasheet" ""
			(at 231.14 236.22 0)
		)
		(property "Description" ""
			(at 231.14 236.22 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06038")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0293")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 294.64 198.12 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06078"
			(at 294.64 204.47 0)
		)
		(property "Value" "GND_1"
			(at 294.64 203.2 0)
		)
		(property "Footprint" ""
			(at 294.64 198.12 0)
		)
		(property "Datasheet" ""
			(at 294.64 198.12 0)
		)
		(property "Description" ""
			(at 294.64 198.12 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06078")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0329")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:BM1366_mode1")
		(at 234.95 60.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U6025"
			(at 237.1441 36.195 0)
		)
		(property "Value" "BM1366_mode1"
			(at 237.1441 38.735 0)
		)
		(property "Footprint" "0xaxe:BM1366"
			(at 227.33 60.96 0)
		)
		(property "Datasheet" ""
			(at 227.33 60.96 0)
		)
		(property "Description" ""
			(at 234.95 60.96 0)
		)
		(property "Distributor" "-"
			(at 234.95 60.96 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "17")
		(pin "18")
		(pin "19")
		(pin "2")
		(pin "20")
		(pin "21")
		(pin "22")
		(pin "23")
		(pin "24")
		(pin "25")
		(pin "26")
		(pin "27")
		(pin "28")
		(pin "29")
		(pin "3")
		(pin "30")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "flex2_sch"
				(path
					(reference "U6025")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U61")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 123.19 190.5 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0150"
			(at 123.19 196.85 0)
		)
		(property "Value" "GND_1"
			(at 123.19 195.58 0)
		)
		(property "Footprint" ""
			(at 123.19 190.5 0)
		)
		(property "Datasheet" ""
			(at 123.19 190.5 0)
		)
		(property "Description" ""
			(at 123.19 190.5 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0150")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 247.65 193.04 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6023"
			(at 245.11 195.58 90)
		)
		(property "Value" "1µ"
			(at 248.285 194.31 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 247.65 193.04 0)
		)
		(property "Datasheet" ""
			(at 247.65 193.04 0)
		)
		(property "Description" ""
			(at 247.65 193.04 0)
		)
		(property "DK" ""
			(at 247.65 193.04 0)
		)
		(property "PARTNO" ""
			(at 247.65 193.04 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 247.65 193.04 0)
		)
		(property "Distributor" "D"
			(at 247.65 193.04 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 247.65 193.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6023")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C120")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 246.38 236.22 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06045"
			(at 246.38 242.57 0)
		)
		(property "Value" "GND_1"
			(at 246.38 241.3 0)
		)
		(property "Footprint" ""
			(at 246.38 236.22 0)
		)
		(property "Datasheet" ""
			(at 246.38 236.22 0)
		)
		(property "Description" ""
			(at 246.38 236.22 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06045")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0299")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+V_IF_1")
		(at 36.83 109.22 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0166"
			(at 33.02 109.22 0)
		)
		(property "Value" "+V_IF_1"
			(at 40.64 109.2199 90)
		)
		(property "Footprint" ""
			(at 36.83 109.22 0)
		)
		(property "Datasheet" ""
			(at 36.83 109.22 0)
		)
		(property "Description" ""
			(at 36.83 109.22 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0166")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 236.22 198.12 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06039"
			(at 236.22 204.47 0)
		)
		(property "Value" "GND_1"
			(at 236.22 203.2 0)
		)
		(property "Footprint" ""
			(at 236.22 198.12 0)
		)
		(property "Datasheet" ""
			(at 236.22 198.12 0)
		)
		(property "Description" ""
			(at 236.22 198.12 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06039")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0294")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 275.59 236.22 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06066"
			(at 275.59 242.57 0)
		)
		(property "Value" "GND_1"
			(at 275.59 241.3 0)
		)
		(property "Footprint" ""
			(at 275.59 236.22 0)
		)
		(property "Datasheet" ""
			(at 275.59 236.22 0)
		)
		(property "Description" ""
			(at 275.59 236.22 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06066")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0315")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_IF_1")
		(at 36.83 111.76 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0196"
			(at 43.18 111.76 0)
		)
		(property "Value" "GND_IF_1"
			(at 40.64 111.7599 90)
		)
		(property "Footprint" ""
			(at 36.83 111.76 0)
		)
		(property "Datasheet" ""
			(at 36.83 111.76 0)
		)
		(property "Description" ""
			(at 36.83 111.76 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0196")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Oscillator:ASDMB-xxxMHz")
		(at 27.94 60.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U6001"
			(at 24.13 54.61 0)
		)
		(property "Value" "25MHz"
			(at 24.13 67.31 0)
		)
		(property "Footprint" "Oscillator:Oscillator_SMD_EuroQuartz_XO32-4Pin_3.2x2.5mm"
			(at 27.94 60.96 0)
		)
		(property "Datasheet" "https://abracon.com/Oscillators/ASDMB.pdf"
			(at 35.56 49.53 0)
		)
		(property "Description" ""
			(at 27.94 60.96 0)
		)
		(property "Distributor" "D"
			(at 27.94 60.96 0)
		)
		(property "OrderNr" "50-ECS-TXO-3225MV-250-CT-ND"
			(at 27.94 60.96 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(instances
			(project "flex2_sch"
				(path
					(reference "U6001")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U38")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 332.74 193.04 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6049"
			(at 334.01 191.135 0)
		)
		(property "Value" "1µ"
			(at 334.01 196.215 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 332.74 193.04 0)
		)
		(property "Datasheet" ""
			(at 332.74 193.04 0)
		)
		(property "Description" ""
			(at 332.74 193.04 0)
		)
		(property "DK" ""
			(at 332.74 193.04 0)
		)
		(property "PARTNO" ""
			(at 332.74 193.04 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 332.74 193.04 0)
		)
		(property "Distributor" "D"
			(at 332.74 193.04 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 332.74 193.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6049")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C146")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_1")
		(at 212.09 73.66 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U6024"
			(at 210.82 69.85 0)
		)
		(property "Value" "+0V8"
			(at 208.915 73.66 90)
		)
		(property "Footprint" ""
			(at 212.09 73.66 0)
		)
		(property "Datasheet" ""
			(at 212.09 73.66 0)
		)
		(property "Description" ""
			(at 212.09 73.66 0)
		)
		(property "Distributor" "-"
			(at 212.09 73.66 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "U6024")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U60")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 273.05 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6060"
			(at 270.51 31.75 90)
		)
		(property "Value" "1µ"
			(at 271.78 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 273.05 34.29 0)
		)
		(property "Datasheet" ""
			(at 273.05 34.29 0)
		)
		(property "Description" ""
			(at 273.05 34.29 0)
		)
		(property "DK" ""
			(at 273.05 34.29 0)
		)
		(property "PARTNO" ""
			(at 273.05 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 273.05 34.29 0)
		)
		(property "Distributor" "D"
			(at 273.05 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 273.05 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6060")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C156")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_1")
		(at 294.64 187.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR06077"
			(at 294.64 191.77 0)
		)
		(property "Value" "+1V8_1"
			(at 294.64 182.88 0)
		)
		(property "Footprint" ""
			(at 294.64 187.96 0)
		)
		(property "Datasheet" ""
			(at 294.64 187.96 0)
		)
		(property "Description" ""
			(at 294.64 187.96 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06077")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0328")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_1")
		(at 259.08 73.66 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U6026"
			(at 260.35 77.47 0)
		)
		(property "Value" "+0V8"
			(at 262.255 73.66 90)
		)
		(property "Footprint" ""
			(at 259.08 73.66 0)
		)
		(property "Datasheet" ""
			(at 259.08 73.66 0)
		)
		(property "Description" ""
			(at 259.08 73.66 0)
		)
		(property "Distributor" "-"
			(at 259.08 73.66 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "U6026")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U62")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 336.55 233.68 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#FLG06003"
			(at 336.55 231.775 0)
		)
		(property "Value" "PWR_FLAG"
			(at 334.645 229.235 0)
		)
		(property "Footprint" ""
			(at 336.55 233.68 0)
		)
		(property "Datasheet" "~"
			(at 336.55 233.68 0)
		)
		(property "Description" ""
			(at 336.55 233.68 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#FLG06003")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG012")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 303.53 231.14 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6042"
			(at 302.26 229.87 90)
		)
		(property "Value" "330µ/4V"
			(at 307.34 234.95 90)
		)
		(property "Footprint" "Capacitor_SMD:C_1210_3225Metric"
			(at 304.4952 234.95 0)
		)
		(property "Datasheet" "~"
			(at 303.53 231.14 0)
		)
		(property "Description" ""
			(at 303.53 231.14 0)
		)
		(property "Distributor" "D"
			(at 303.53 231.14 0)
		)
		(property "Manufacturer" "GRM32ER60G337ME05K"
			(at 303.53 231.14 0)
		)
		(property "OrderNr" "490-GRM32ER60G337ME05KCT-ND"
			(at 303.53 231.14 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6042")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C139")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 123.19 184.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C38"
			(at 124.46 182.245 0)
		)
		(property "Value" "1µ"
			(at 125.095 187.96 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 123.19 184.15 0)
		)
		(property "Datasheet" ""
			(at 123.19 184.15 0)
		)
		(property "Description" ""
			(at 123.19 184.15 0)
		)
		(property "DK" ""
			(at 123.19 184.15 0)
		)
		(property "PARTNO" ""
			(at 123.19 184.15 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 123.19 184.15 0)
		)
		(property "Distributor" "D"
			(at 123.19 184.15 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 123.19 184.15 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "C38")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 55.88 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6004"
			(at 53.34 31.75 90)
		)
		(property "Value" "1µ"
			(at 54.61 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 55.88 34.29 0)
		)
		(property "Datasheet" ""
			(at 55.88 34.29 0)
		)
		(property "Description" ""
			(at 55.88 34.29 0)
		)
		(property "DK" ""
			(at 55.88 34.29 0)
		)
		(property "PARTNO" ""
			(at 55.88 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 55.88 34.29 0)
		)
		(property "Distributor" "D"
			(at 55.88 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 55.88 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6004")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C101")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_1")
		(at 142.24 129.54 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR06022"
			(at 142.24 133.35 0)
		)
		(property "Value" "+1V8_1"
			(at 142.24 124.46 0)
		)
		(property "Footprint" ""
			(at 142.24 129.54 0)
		)
		(property "Datasheet" ""
			(at 142.24 129.54 0)
		)
		(property "Description" ""
			(at 142.24 129.54 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06022")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0279")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_1")
		(at 30.48 50.8 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06001"
			(at 30.48 54.61 0)
		)
		(property "Value" "+1V8_1"
			(at 30.48 45.72 0)
		)
		(property "Footprint" ""
			(at 30.48 50.8 0)
		)
		(property "Datasheet" ""
			(at 30.48 50.8 0)
		)
		(property "Description" ""
			(at 30.48 50.8 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06001")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0258")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 36.83 116.84 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06018"
			(at 43.18 116.84 0)
		)
		(property "Value" "GND_1"
			(at 40.005 116.84 90)
		)
		(property "Footprint" ""
			(at 36.83 116.84 0)
		)
		(property "Datasheet" ""
			(at 36.83 116.84 0)
		)
		(property "Description" ""
			(at 36.83 116.84 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06018")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0257")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_EXT")
		(at 363.22 233.68 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR06104"
			(at 363.22 240.03 0)
		)
		(property "Value" "GND_EXT"
			(at 361.315 238.125 0)
		)
		(property "Footprint" ""
			(at 363.22 233.68 0)
		)
		(property "Datasheet" ""
			(at 363.22 233.68 0)
		)
		(property "Description" ""
			(at 363.22 233.68 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06104")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0355")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:MCP1824")
		(at 105.41 177.8 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U14"
			(at 102.235 170.815 0)
		)
		(property "Value" "MCP1824T-1802E"
			(at 105.41 172.72 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5"
			(at 105.41 177.8 0)
		)
		(property "Datasheet" "https://ww1.microchip.com/downloads/en/DeviceDoc/22070a.pdf"
			(at 105.41 177.8 0)
		)
		(property "Description" ""
			(at 105.41 177.8 0)
		)
		(property "PARTNO" ""
			(at 105.41 177.8 0)
		)
		(property "DK" ""
			(at 105.41 177.8 0)
		)
		(property "OrderNr" "MCP1824T-1802E/OTCT-ND"
			(at 105.41 177.8 0)
		)
		(property "Distributor" "D"
			(at 105.41 177.8 0)
		)
		(property "Manufacturer" "MCP1824T-1802E/OT"
			(at 105.41 177.8 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(instances
			(project "8]axe"
				(path
					(reference "U14")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 105.41 86.36 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR06025"
			(at 105.41 92.71 0)
		)
		(property "Value" "GND_1"
			(at 105.41 91.44 0)
		)
		(property "Footprint" ""
			(at 105.41 86.36 0)
		)
		(property "Datasheet" ""
			(at 105.41 86.36 0)
		)
		(property "Description" ""
			(at 105.41 86.36 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06025")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0282")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_1")
		(at 302.26 187.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR06083"
			(at 302.26 191.77 0)
		)
		(property "Value" "+1V8_1"
			(at 302.26 182.88 0)
		)
		(property "Footprint" ""
			(at 302.26 187.96 0)
		)
		(property "Datasheet" ""
			(at 302.26 187.96 0)
		)
		(property "Description" ""
			(at 302.26 187.96 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06083")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0332")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 294.64 193.04 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6038"
			(at 295.91 191.135 0)
		)
		(property "Value" "1µ"
			(at 295.91 196.215 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 294.64 193.04 0)
		)
		(property "Datasheet" ""
			(at 294.64 193.04 0)
		)
		(property "Description" ""
			(at 294.64 193.04 0)
		)
		(property "DK" ""
			(at 294.64 193.04 0)
		)
		(property "PARTNO" ""
			(at 294.64 193.04 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 294.64 193.04 0)
		)
		(property "Distributor" "D"
			(at 294.64 193.04 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 294.64 193.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6038")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C135")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_1")
		(at 105.41 30.48 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06024"
			(at 105.41 34.29 0)
		)
		(property "Value" "+1V2_1"
			(at 105.41 26.035 0)
		)
		(property "Footprint" ""
			(at 105.41 30.48 0)
		)
		(property "Datasheet" ""
			(at 105.41 30.48 0)
		)
		(property "Description" ""
			(at 105.41 30.48 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06024")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0281")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_1")
		(at 123.19 175.26 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0143"
			(at 123.19 179.07 0)
		)
		(property "Value" "+1V8_1"
			(at 123.19 170.18 0)
		)
		(property "Footprint" ""
			(at 123.19 175.26 0)
		)
		(property "Datasheet" ""
			(at 123.19 175.26 0)
		)
		(property "Description" ""
			(at 123.19 175.26 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0143")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+V_IF_1")
		(at 87.63 118.11 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0215"
			(at 87.63 121.92 0)
		)
		(property "Value" "+V_IF_1"
			(at 87.63 113.03 0)
		)
		(property "Footprint" ""
			(at 87.63 118.11 0)
		)
		(property "Datasheet" ""
			(at 87.63 118.11 0)
		)
		(property "Description" ""
			(at 87.63 118.11 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0215")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_IF")
		(at 336.55 233.68 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR06100"
			(at 336.55 240.03 0)
		)
		(property "Value" "GND_IF"
			(at 336.55 238.125 0)
		)
		(property "Footprint" ""
			(at 336.55 233.68 0)
		)
		(property "Datasheet" ""
			(at 336.55 233.68 0)
		)
		(property "Description" ""
			(at 336.55 233.68 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06100")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0351")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 309.88 193.04 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6043"
			(at 310.515 191.135 0)
		)
		(property "Value" "1µ"
			(at 311.15 196.85 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 309.88 193.04 0)
		)
		(property "Datasheet" ""
			(at 309.88 193.04 0)
		)
		(property "Description" ""
			(at 309.88 193.04 0)
		)
		(property "DK" ""
			(at 309.88 193.04 0)
		)
		(property "PARTNO" ""
			(at 309.88 193.04 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 309.88 193.04 0)
		)
		(property "Distributor" "D"
			(at 309.88 193.04 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 309.88 193.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6043")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C140")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_1")
		(at 252.73 187.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U6013"
			(at 256.54 186.69 0)
		)
		(property "Value" "+0V8"
			(at 252.73 184.785 90)
		)
		(property "Footprint" ""
			(at 252.73 187.96 0)
		)
		(property "Datasheet" ""
			(at 252.73 187.96 0)
		)
		(property "Description" ""
			(at 252.73 187.96 0)
		)
		(property "Distributor" "-"
			(at 252.73 187.96 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "U6013")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U50")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 260.35 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6059"
			(at 257.81 31.75 90)
		)
		(property "Value" "1µ"
			(at 259.08 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 260.35 34.29 0)
		)
		(property "Datasheet" ""
			(at 260.35 34.29 0)
		)
		(property "Description" ""
			(at 260.35 34.29 0)
		)
		(property "DK" ""
			(at 260.35 34.29 0)
		)
		(property "PARTNO" ""
			(at 260.35 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 260.35 34.29 0)
		)
		(property "Distributor" "D"
			(at 260.35 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 260.35 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6059")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C155")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_1")
		(at 41.91 72.39 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06007"
			(at 41.91 76.2 0)
		)
		(property "Value" "+1V8_1"
			(at 41.91 67.31 0)
		)
		(property "Footprint" ""
			(at 41.91 72.39 0)
		)
		(property "Datasheet" ""
			(at 41.91 72.39 0)
		)
		(property "Description" ""
			(at 41.91 72.39 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06007")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0264")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_1")
		(at 247.65 187.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U6012"
			(at 251.46 186.69 0)
		)
		(property "Value" "+0V8"
			(at 247.65 184.785 90)
		)
		(property "Footprint" ""
			(at 247.65 187.96 0)
		)
		(property "Datasheet" ""
			(at 247.65 187.96 0)
		)
		(property "Description" ""
			(at 247.65 187.96 0)
		)
		(property "Distributor" "-"
			(at 247.65 187.96 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "U6012")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U49")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 363.22 233.68 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#FLG06005"
			(at 363.22 231.775 0)
		)
		(property "Value" "PWR_FLAG"
			(at 360.68 229.235 0)
		)
		(property "Footprint" ""
			(at 363.22 233.68 0)
		)
		(property "Datasheet" "~"
			(at 363.22 233.68 0)
		)
		(property "Description" ""
			(at 363.22 233.68 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#FLG06005")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG014")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_1")
		(at 309.88 187.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR06089"
			(at 309.88 191.77 0)
		)
		(property "Value" "+1V8_1"
			(at 309.88 182.88 0)
		)
		(property "Footprint" ""
			(at 309.88 187.96 0)
		)
		(property "Datasheet" ""
			(at 309.88 187.96 0)
		)
		(property "Description" ""
			(at 309.88 187.96 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06089")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0340")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 252.73 198.12 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06049"
			(at 252.73 204.47 0)
		)
		(property "Value" "GND_1"
			(at 252.73 203.2 0)
		)
		(property "Footprint" ""
			(at 252.73 198.12 0)
		)
		(property "Datasheet" ""
			(at 252.73 198.12 0)
		)
		(property "Description" ""
			(at 252.73 198.12 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06049")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0302")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_1")
		(at 81.28 76.2 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR06019"
			(at 85.09 76.2 0)
		)
		(property "Value" "+1V8_1"
			(at 76.2 76.2 0)
		)
		(property "Footprint" ""
			(at 81.28 76.2 0)
		)
		(property "Datasheet" ""
			(at 81.28 76.2 0)
		)
		(property "Description" ""
			(at 81.28 76.2 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06019")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0276")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 41.91 81.28 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06008"
			(at 41.91 87.63 0)
		)
		(property "Value" "GND_1"
			(at 41.91 86.36 0)
		)
		(property "Footprint" ""
			(at 41.91 81.28 0)
		)
		(property "Datasheet" ""
			(at 41.91 81.28 0)
		)
		(property "Description" ""
			(at 41.91 81.28 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06008")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0265")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 246.38 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6058"
			(at 243.205 31.75 90)
		)
		(property "Value" "1µ"
			(at 245.11 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 246.38 34.29 0)
		)
		(property "Datasheet" ""
			(at 246.38 34.29 0)
		)
		(property "Description" ""
			(at 246.38 34.29 0)
		)
		(property "DK" ""
			(at 246.38 34.29 0)
		)
		(property "PARTNO" ""
			(at 246.38 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 246.38 34.29 0)
		)
		(property "Distributor" "D"
			(at 246.38 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 246.38 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6058")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C154")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 67.31 34.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6005"
			(at 64.77 31.75 90)
		)
		(property "Value" "1µ"
			(at 66.04 34.925 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 67.31 34.29 0)
		)
		(property "Datasheet" ""
			(at 67.31 34.29 0)
		)
		(property "Description" ""
			(at 67.31 34.29 0)
		)
		(property "DK" ""
			(at 67.31 34.29 0)
		)
		(property "PARTNO" ""
			(at 67.31 34.29 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 67.31 34.29 0)
		)
		(property "Distributor" "D"
			(at 67.31 34.29 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 67.31 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6005")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C102")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 121.92 218.44 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6006"
			(at 123.19 216.535 0)
		)
		(property "Value" "1µ"
			(at 123.19 222.25 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 121.92 218.44 0)
		)
		(property "Datasheet" ""
			(at 121.92 218.44 0)
		)
		(property "Description" ""
			(at 121.92 218.44 0)
		)
		(property "DK" ""
			(at 121.92 218.44 0)
		)
		(property "PARTNO" ""
			(at 121.92 218.44 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 121.92 218.44 0)
		)
		(property "Distributor" "D"
			(at 121.92 218.44 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 121.92 218.44 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "C6006")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C103")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 303.53 236.22 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR06086"
			(at 303.53 242.57 0)
		)
		(property "Value" "GND_1"
			(at 303.53 241.3 0)
		)
		(property "Footprint" ""
			(at 303.53 236.22 0)
		)
		(property "Datasheet" ""
			(at 303.53 236.22 0)
		)
		(property "Description" ""
			(at 303.53 236.22 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06086")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0335")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 218.44 236.22 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06030"
			(at 218.44 242.57 0)
		)
		(property "Value" "GND_1"
			(at 218.44 241.3 0)
		)
		(property "Footprint" ""
			(at 218.44 236.22 0)
		)
		(property "Datasheet" ""
			(at 218.44 236.22 0)
		)
		(property "Description" ""
			(at 218.44 236.22 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06030")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0286")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 234.95 86.36 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06121"
			(at 234.95 92.71 0)
		)
		(property "Value" "GND_1"
			(at 234.95 91.44 0)
		)
		(property "Footprint" ""
			(at 234.95 86.36 0)
		)
		(property "Datasheet" ""
			(at 234.95 86.36 0)
		)
		(property "Description" ""
			(at 234.95 86.36 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06121")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0366")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_1")
		(at 88.9 19.05 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06021"
			(at 88.9 22.86 0)
		)
		(property "Value" "+1V2_1"
			(at 88.9 14.605 0)
		)
		(property "Footprint" ""
			(at 88.9 19.05 0)
		)
		(property "Datasheet" ""
			(at 88.9 19.05 0)
		)
		(property "Description" ""
			(at 88.9 19.05 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06021")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0278")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 121.92 223.52 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06014"
			(at 121.92 229.87 0)
		)
		(property "Value" "GND_1"
			(at 121.92 228.6 0)
		)
		(property "Footprint" ""
			(at 121.92 223.52 0)
		)
		(property "Datasheet" ""
			(at 121.92 223.52 0)
		)
		(property "Description" ""
			(at 121.92 223.52 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06014")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0271")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 86.36 190.5 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0154"
			(at 86.36 196.85 0)
		)
		(property "Value" "GND_1"
			(at 86.36 195.58 0)
		)
		(property "Footprint" ""
			(at 86.36 190.5 0)
		)
		(property "Datasheet" ""
			(at 86.36 190.5 0)
		)
		(property "Description" ""
			(at 86.36 190.5 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0154")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_1")
		(at 236.22 187.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U6010"
			(at 240.03 186.69 0)
		)
		(property "Value" "+0V8"
			(at 236.22 184.785 90)
		)
		(property "Footprint" ""
			(at 236.22 187.96 0)
		)
		(property "Datasheet" ""
			(at 236.22 187.96 0)
		)
		(property "Description" ""
			(at 236.22 187.96 0)
		)
		(property "Distributor" "-"
			(at 236.22 187.96 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "U6010")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U47")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 142.24 142.24 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR06023"
			(at 142.24 148.59 0)
		)
		(property "Value" "GND_1"
			(at 142.24 147.32 0)
		)
		(property "Footprint" ""
			(at 142.24 142.24 0)
		)
		(property "Datasheet" ""
			(at 142.24 142.24 0)
		)
		(property "Description" ""
			(at 142.24 142.24 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06023")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0280")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_1")
		(at 121.92 118.11 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06017"
			(at 121.92 121.92 0)
		)
		(property "Value" "+1V8_1"
			(at 121.92 113.03 0)
		)
		(property "Footprint" ""
			(at 121.92 118.11 0)
		)
		(property "Datasheet" ""
			(at 121.92 118.11 0)
		)
		(property "Description" ""
			(at 121.92 118.11 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "#PWR06017")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0274")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_1")
		(at 81.28 73.66 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U6006"
			(at 80.01 69.85 0)
		)
		(property "Value" "+0V8"
			(at 78.105 73.66 90)
		)
		(property "Footprint" ""
			(at 81.28 73.66 0)
		)
		(property "Datasheet" ""
			(at 81.28 73.66 0)
		)
		(property "Description" ""
			(at 81.28 73.66 0)
		)
		(property "Distributor" "-"
			(at 81.28 73.66 0)
		)
		(pin "1")
		(instances
			(project "flex2_sch"
				(path
					(reference "U6006")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U43")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 269.24 68.58 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6006"
			(at 273.05 67.31 90)
		)
		(property "Value" "10k"
			(at 271.145 67.945 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 267.462 68.58 90)
		)
		(property "Datasheet" "~"
			(at 269.24 68.58 0)
		)
		(property "Description" ""
			(at 269.24 68.58 0)
		)
		(property "Manufacturer" "ERJ-H3EF1002V"
			(at 269.24 68.58 0)
		)
		(property "Distributor" "D"
			(at 269.24 68.58 0)
		)
		(property "OrderNr" "10-ERJ-H3EF1002VCT-ND"
			(at 269.24 68.58 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex2_sch"
				(path
					(reference "R6006")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R47")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_1")
		(at 116.84 190.5 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0152"
			(at 116.84 196.85 0)
		)
		(property "Value" "GND_1"
			(at 116.84 195.58 0)
		)
		(property "Footprint" ""
			(at 116.84 190.5 0)
		)
		(property "Datasheet" ""
			(at 116.84 190.5 0)
		)
		(property "Description" ""
			(at 116.84 190.5 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0152")
					(unit 1)
				)
			)
		)
	)
)
