(kicad_sch
	(version 20231120)
	(generator "eeschema")
	(generator_version "8.0")
	(paper "A3")
	(title_block
		(title "BM1366 PiAxe")
		(date "2023-10-10")
		(rev "202")
	)
	(lib_symbols
		(symbol "Device:C"
			(pin_numbers hide)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Unpolarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C_*"
				(at 0 0 0)
			)
			(symbol "C_0_1"
				(polyline
					(pts
						(xy -2.032 -0.762) (xy 2.032 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.032 0.762) (xy 2.032 0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:R"
			(pin_numbers hide)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 2.032 0 90)
			)
			(property "Value" "R"
				(at 0 0 90)
			)
			(property "Footprint" ""
				(at -1.778 0 90)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Resistor"
				(at 0 0 0)
			)
			(property "ki_keywords" "R res resistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R_0_1"
				(rectangle
					(start -1.016 -2.54)
					(end 1.016 2.54)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Isolator:ADuM1411"
			(pin_names
				(offset 1.016)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at 0 19.05 0)
			)
			(property "Value" "ADuM1411"
				(at 0 16.51 0)
			)
			(property "Footprint" "Package_SO:SOIC-16W_7.5x10.3mm_P1.27mm"
				(at 0 -17.78 0)
			)
			(property "Datasheet" "https://www.analog.com/media/en/technical-documentation/data-sheets/ADUM1410_1411_1412.pdf"
				(at -20.32 0 0)
			)
			(property "Description" "Quad Channel Digital Isolator,10Mbps,SO-16"
				(at 0 0 0)
			)
			(property "ki_keywords" "Digital Isolator"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOIC*7.5x10.3mm*P1.27mm*"
				(at 0 0 0)
			)
			(symbol "ADuM1411_0_0"
				(rectangle
					(start -1.905 0.635)
					(end -6.985 -0.635)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 1.016)
					(end 1.27 -1.016)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 3.556)
					(end 1.27 1.524)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 6.096)
					(end 1.27 4.064)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 8.636)
					(end 1.27 6.604)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 -0.762)
					(mid -0.2551 -0.508)
					(end -0.508 -0.254)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 -0.254)
					(mid -0.2551 0)
					(end -0.508 0.254)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 0.254)
					(mid -0.2551 0.508)
					(end -0.508 0.762)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 1.778)
					(mid -0.2551 2.032)
					(end -0.508 2.286)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 2.286)
					(mid -0.2551 2.54)
					(end -0.508 2.794)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 2.794)
					(mid -0.2551 3.048)
					(end -0.508 3.302)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 4.318)
					(mid -0.2551 4.572)
					(end -0.508 4.826)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 4.826)
					(mid -0.2551 5.08)
					(end -0.508 5.334)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 5.334)
					(mid -0.2551 5.588)
					(end -0.508 5.842)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 6.858)
					(mid -0.2551 7.112)
					(end -0.508 7.366)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 7.366)
					(mid -0.2551 7.62)
					(end -0.508 7.874)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.508 7.874)
					(mid -0.2551 8.128)
					(end -0.508 8.382)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -6.985 0) (xy -7.62 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -6.985 2.54) (xy -7.62 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -6.985 5.08) (xy -7.62 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -6.985 7.62) (xy -7.62 7.62)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -4.445 -1.27) (xy -4.445 -0.635)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.905 0) (xy -1.27 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.905 2.54) (xy -1.27 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.905 5.08) (xy -1.27 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.905 7.62) (xy -1.27 7.62)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 -0.762) (xy -0.508 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 0.762) (xy -0.508 0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 1.778) (xy -0.508 1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 3.302) (xy -0.508 3.302)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 4.318) (xy -0.508 4.318)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 5.842) (xy -0.508 5.842)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 6.858) (xy -0.508 6.858)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 8.382) (xy -0.508 8.382)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -10.795) (xy -0.635 -12.065)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -8.89) (xy -0.635 -10.16)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -6.985) (xy -0.635 -8.255)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -5.08) (xy -0.635 -6.35)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -3.175) (xy -0.635 -4.445)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -1.27) (xy -0.635 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 8.89) (xy -0.635 10.16)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 10.795) (xy -0.635 12.065)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 12.7) (xy -0.635 13.97)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 15.24) (xy -0.635 14.605)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -10.795) (xy 0.635 -12.065)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -8.89) (xy 0.635 -10.16)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -6.985) (xy 0.635 -8.255)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -5.08) (xy 0.635 -6.35)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -3.175) (xy 0.635 -4.445)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -1.27) (xy 0.635 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 8.89) (xy 0.635 10.16)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 12.065) (xy 0.635 10.795)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 13.97) (xy 0.635 12.7)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 14.605) (xy 0.635 15.24)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 -0.762) (xy 0.508 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 0.762) (xy 0.508 0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 1.778) (xy 0.508 1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 3.302) (xy 0.508 3.302)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 4.318) (xy 0.508 4.318)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 5.842) (xy 0.508 5.842)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 6.858) (xy 0.508 6.858)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 8.382) (xy 0.508 8.382)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.905 0) (xy 1.27 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.905 2.54) (xy 1.27 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.905 5.08) (xy 1.27 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.905 7.62) (xy 1.27 7.62)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 4.445 0.635) (xy 4.445 1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 4.445 3.175) (xy 4.445 4.445)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 4.445 5.715) (xy 4.445 6.985)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 6.985 0) (xy 7.62 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 6.985 2.54) (xy 7.62 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 6.985 5.08) (xy 7.62 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 6.985 7.62) (xy 7.62 7.62)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -4.445 -1.27) (xy -4.445 -5.08) (xy -5.715 -5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.715 -5.08) (xy 4.445 -5.08) (xy 4.445 -0.635)
					)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 -0.254)
					(mid 0.2551 -0.508)
					(end 0.508 -0.762)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 0.254)
					(mid 0.2551 0)
					(end 0.508 -0.254)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 0.762)
					(mid 0.2551 0.508)
					(end 0.508 0.254)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 2.286)
					(mid 0.2551 2.032)
					(end 0.508 1.778)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 2.794)
					(mid 0.2551 2.54)
					(end 0.508 2.286)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 3.302)
					(mid 0.2551 3.048)
					(end 0.508 2.794)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 4.826)
					(mid 0.2551 4.572)
					(end 0.508 4.318)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 5.334)
					(mid 0.2551 5.08)
					(end 0.508 4.826)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 5.842)
					(mid 0.2551 5.588)
					(end 0.508 5.334)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 7.366)
					(mid 0.2551 7.112)
					(end 0.508 6.858)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 7.874)
					(mid 0.2551 7.62)
					(end 0.508 7.366)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.508 8.382)
					(mid 0.2551 8.128)
					(end 0.508 7.874)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 1.905 0.635)
					(end 6.985 -0.635)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 1.905 3.175)
					(end 6.985 1.905)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 1.905 5.715)
					(end 6.985 4.445)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 1.905 8.255)
					(end 6.985 6.985)
					(fill
						(type none)
					)
				)
				(text "DECODE"
					(at -4.445 0 0)
				)
				(text "DECODE"
					(at 4.445 2.54 0)
				)
				(text "DECODE"
					(at 4.445 5.08 0)
				)
				(text "DECODE"
					(at 4.445 7.62 0)
				)
				(text "ENCODE"
					(at -4.445 2.54 0)
				)
				(text "ENCODE"
					(at -4.445 5.08 0)
				)
				(text "ENCODE"
					(at -4.445 7.62 0)
				)
				(text "ENCODE"
					(at 4.445 0 0)
				)
			)
			(symbol "ADuM1411_0_1"
				(rectangle
					(start -12.7 15.24)
					(end 12.7 -15.24)
					(fill
						(type background)
					)
				)
				(rectangle
					(start -1.905 3.175)
					(end -6.985 1.905)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.905 5.715)
					(end -6.985 4.445)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.905 8.255)
					(end -6.985 6.985)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -14.605) (xy -0.635 -15.24)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.635 -12.7) (xy -0.635 -13.97)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -14.605) (xy 0.635 -15.24)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -12.7) (xy 0.635 -13.97)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "ADuM1411_1_1"
				(pin power_in line
					(at -15.24 12.7 0)
					(length 2.54)
					(name "VDD1")
					(number "1")
				)
				(pin input line
					(at 15.24 -5.08 180)
					(length 2.54)
					(name "CTRL2")
					(number "10")
				)
				(pin input line
					(at 15.24 0 180)
					(length 2.54)
					(name "VID")
					(number "11")
				)
				(pin output line
					(at 15.24 2.54 180)
					(length 2.54)
					(name "VOC")
					(number "12")
				)
				(pin output line
					(at 15.24 5.08 180)
					(length 2.54)
					(name "VOB")
					(number "13")
				)
				(pin output line
					(at 15.24 7.62 180)
					(length 2.54)
					(name "VOA")
					(number "14")
				)
				(pin power_in line
					(at 15.24 -12.7 180)
					(length 2.54)
					(name "GND2")
					(number "15")
				)
				(pin power_in line
					(at 15.24 12.7 180)
					(length 2.54)
					(name "VDD2")
					(number "16")
				)
				(pin power_in line
					(at -15.24 -10.16 0)
					(length 2.54)
					(name "GND1")
					(number "2")
				)
				(pin input line
					(at -15.24 7.62 0)
					(length 2.54)
					(name "VIA")
					(number "3")
				)
				(pin input line
					(at -15.24 5.08 0)
					(length 2.54)
					(name "VIB")
					(number "4")
				)
				(pin input line
					(at -15.24 2.54 0)
					(length 2.54)
					(name "VIC")
					(number "5")
				)
				(pin output line
					(at -15.24 0 0)
					(length 2.54)
					(name "VOD")
					(number "6")
				)
				(pin input line
					(at -15.24 -5.08 0)
					(length 2.54)
					(name "CTRL1")
					(number "7")
				)
				(pin power_in line
					(at -15.24 -12.7 0)
					(length 2.54)
					(name "GND1")
					(number "8")
				)
				(pin power_in line
					(at 15.24 -10.16 180)
					(length 2.54)
					(name "GND2")
					(number "9")
				)
			)
		)
		(symbol "Oscillator:ASDMB-xxxMHz"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -6.35 6.35 0)
			)
			(property "Value" "ASDMB-xxxMHz"
				(at 11.43 6.35 0)
			)
			(property "Footprint" "Oscillator:Oscillator_SMD_Abracon_ASDMB-4Pin_2.5x2.0mm"
				(at 0 0 0)
			)
			(property "Datasheet" "https://abracon.com/Oscillators/ASDMB.pdf"
				(at 7.62 11.43 0)
			)
			(property "Description" "1.8-3.3V SMD Ultra Miniature Crystal Clock Oscillator, Abracon"
				(at 0 0 0)
			)
			(property "ki_keywords" "1.8-3.3V SMD Ultra Miniature Crystal Clock Oscillator"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Oscillator*SMD*Abracon*ASDMB*2.5x2.0mm*"
				(at 0 0 0)
			)
			(symbol "ASDMB-xxxMHz_1_1"
				(rectangle
					(start -7.62 5.08)
					(end 7.62 -5.08)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy -4.445 2.54) (xy -3.81 2.54) (xy -3.81 3.81) (xy -3.175 3.81) (xy -3.175 2.54) (xy -2.54 2.54)
						(xy -2.54 3.81) (xy -1.905 3.81) (xy -1.905 2.54)
					)
					(fill
						(type none)
					)
				)
				(pin input line
					(at -10.16 0 0)
					(length 2.54)
					(name "Standby")
					(number "1")
				)
				(pin power_in line
					(at 2.54 -7.62 90)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin output line
					(at 10.16 0 180)
					(length 2.54)
					(name "Out")
					(number "3")
				)
				(pin power_in line
					(at 2.54 7.62 270)
					(length 2.54)
					(name "VDD")
					(number "4")
				)
			)
		)
		(symbol "bitaxe:MCP1824"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U7"
				(at -3.175 6.985 0)
			)
			(property "Value" "MCP1824T-1802E"
				(at 0 5.08 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5"
				(at 0 0 0)
			)
			(property "Datasheet" "https://ww1.microchip.com/downloads/en/DeviceDoc/22070a.pdf"
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "PARTNO" ""
				(at 0 0 0)
			)
			(property "DK" ""
				(at 0 0 0)
			)
			(property "OrderNr" "MCP1824T-1802E/OTCT-ND"
				(at 0 0 0)
			)
			(property "Distributor" "D"
				(at 0 0 0)
			)
			(property "Manufacturer" "MCP1824T-1802E/OT"
				(at 0 0 0)
			)
			(symbol "MCP1824_0_1"
				(rectangle
					(start -7.62 3.81)
					(end 7.62 -6.35)
					(fill
						(type background)
					)
				)
			)
			(symbol "MCP1824_1_0"
				(pin power_in line
					(at -10.16 1.27 0)
					(length 2.54)
					(name "VIN")
					(number "1")
				)
				(pin power_in line
					(at 10.16 -1.27 180)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin input line
					(at -10.16 -1.27 0)
					(length 2.54)
					(name "EN")
					(number "3")
				)
				(pin bidirectional line
					(at -10.16 -3.81 0)
					(length 2.54)
					(name "PG")
					(number "4")
				)
				(pin power_out line
					(at 10.16 1.27 180)
					(length 2.54)
					(name "VOUT")
					(number "5")
				)
			)
		)
		(symbol "mylib7:+0V8_0"
			(exclude_from_sim no)
			(in_bom no)
			(on_board no)
			(property "Reference" "U5008"
				(at 3.81 1.27 0)
			)
			(property "Value" "+0V8"
				(at 0 3.175 90)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "Distributor" "-"
				(at 0 0 0)
			)
			(symbol "+0V8_0_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+0V8_0_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+0V8_0")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+1V2_0"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR05024"
				(at 0 -3.81 0)
			)
			(property "Value" "+1V2_0"
				(at 0 4.445 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+1V2\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+1V2_0_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+1V2_0_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+1V2_0")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+1V8_0"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR05017"
				(at 0 -3.81 0)
			)
			(property "Value" "+1V8_0"
				(at 0 5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+1V8\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+1V8_0_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+1V8_0_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+1V8_0")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+3V3_EXT"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR013"
				(at 0 -3.81 0)
			)
			(property "Value" "+3V3_EXT"
				(at 0 4.445 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+3V3\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+3V3_EXT_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+3V3_EXT_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+3V3_EXT")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+6.5V"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR034"
				(at 0 -3.81 0)
			)
			(property "Value" "+6.5V"
				(at 0 4.445 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+6.5V_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+6.5V_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+5V")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+V_IF"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR07"
				(at 0 -3.81 0)
			)
			(property "Value" "+V_IF"
				(at 0 5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+3V3\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+V_IF_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+V_IF_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+V_IF")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+V_IF_0"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR0148"
				(at 0 -3.81 0)
			)
			(property "Value" "+V_IF_0"
				(at 0 5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+V_IF_0_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+V_IF_0_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+V_IF")
					(number "1")
				)
			)
		)
		(symbol "mylib7:BM1366_mode1"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U8"
				(at 1.9559 24.13 0)
			)
			(property "Value" "BM1366_mode1"
				(at 1.9559 21.59 0)
			)
			(property "Footprint" "qaxe:BM1366"
				(at -7.62 0 0)
			)
			(property "Datasheet" ""
				(at -7.62 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "Distributor" "X"
				(at 0 0 0)
			)
			(symbol "BM1366_mode1_0_1"
				(rectangle
					(start -15.24 20.32)
					(end 15.24 -17.78)
					(fill
						(type background)
					)
				)
			)
			(symbol "BM1366_mode1_1_1"
				(pin input line
					(at -17.78 17.78 0)
					(length 2.54)
					(name "VDD1_0")
					(number "1")
				)
				(pin input line
					(at -17.78 -5.08 0)
					(length 2.54)
					(name "ADDR0")
					(number "10")
				)
				(pin input line
					(at -17.78 -7.62 0)
					(length 2.54)
					(name "ADDR1")
					(number "11")
				)
				(pin power_in line
					(at -17.78 -10.16 0)
					(length 2.54)
					(name "PLL_VSS")
					(number "12")
				)
				(pin power_in line
					(at -17.78 -12.7 0)
					(length 2.54)
					(name "VDDIO_08_0")
					(number "13")
				)
				(pin power_in line
					(at -17.78 -15.24 0)
					(length 2.54)
					(name "VDDIO_18_0")
					(number "14")
				)
				(pin power_in line
					(at 17.78 -15.24 180)
					(length 2.54)
					(name "VDDIO_18_1")
					(number "15")
				)
				(pin power_in line
					(at 17.78 -12.7 180)
					(length 2.54)
					(name "VDDIO_08_1")
					(number "16")
				)
				(pin power_in line
					(at 17.78 -10.16 180)
					(length 2.54)
					(name "VSS")
					(number "17")
				)
				(pin input line
					(at 17.78 -7.62 180)
					(length 2.54)
					(name "PIN_MODE")
					(number "18")
				)
				(pin input line
					(at 17.78 -5.08 180)
					(length 2.54)
					(name "INV_CLKO")
					(number "19")
				)
				(pin input line
					(at -17.78 15.24 0)
					(length 2.54)
					(name "VDD2_0")
					(number "2")
				)
				(pin output line
					(at 17.78 -2.54 180)
					(length 2.54)
					(name "CO")
					(number "20")
				)
				(pin output line
					(at 17.78 0 180)
					(length 2.54)
					(name "CLKO")
					(number "21")
				)
				(pin input line
					(at 17.78 2.54 180)
					(length 2.54)
					(name "RI")
					(number "22")
				)
				(pin output line
					(at 17.78 5.08 180)
					(length 2.54)
					(name "BO")
					(number "23")
				)
				(pin output line
					(at 17.78 7.62 180)
					(length 2.54)
					(name "NRSTO")
					(number "24")
				)
				(pin input line
					(at 17.78 10.16 180)
					(length 2.54)
					(name "VSS")
					(number "25")
				)
				(pin input line
					(at 17.78 12.7 180)
					(length 2.54)
					(name "VDD3_1")
					(number "26")
				)
				(pin input line
					(at 17.78 15.24 180)
					(length 2.54)
					(name "VDD2_1")
					(number "27")
				)
				(pin input line
					(at 17.78 17.78 180)
					(length 2.54)
					(name "VDD1_1")
					(number "28")
				)
				(pin power_in line
					(at 0 22.86 270)
					(length 2.54)
					(name "VDD")
					(number "29")
				)
				(pin input line
					(at -17.78 12.7 0)
					(length 2.54)
					(name "VDD3_0")
					(number "3")
				)
				(pin power_in line
					(at 0 -20.32 90)
					(length 2.54)
					(name "GND")
					(number "30")
				)
				(pin input line
					(at -17.78 10.16 0)
					(length 2.54)
					(name "VSS")
					(number "4")
				)
				(pin input line
					(at -17.78 7.62 0)
					(length 2.54)
					(name "NRSTI")
					(number "5")
				)
				(pin input line
					(at -17.78 5.08 0)
					(length 2.54)
					(name "BI")
					(number "6")
				)
				(pin output line
					(at -17.78 2.54 0)
					(length 2.54)
					(name "RO")
					(number "7")
				)
				(pin input line
					(at -17.78 0 0)
					(length 2.54)
					(name "CLKI")
					(number "8")
				)
				(pin input line
					(at -17.78 -2.54 0)
					(length 2.54)
					(name "CI")
					(number "9")
				)
			)
		)
		(symbol "mylib7:GND_0"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR05018"
				(at 0 -6.35 0)
			)
			(property "Value" "GND_0"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_0_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_0_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND_0")
					(number "1")
				)
			)
		)
		(symbol "mylib7:GND_EXT"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR0146"
				(at 0 -6.35 0)
			)
			(property "Value" "GND_EXT"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_EXT_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_EXT_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND_EXT")
					(number "1")
				)
			)
		)
		(symbol "mylib7:GND_IF"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR08"
				(at 0 -6.35 0)
			)
			(property "Value" "GND_IF"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_IF_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_IF_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND_IF")
					(number "1")
				)
			)
		)
		(symbol "mylib7:GND_IF_0"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR0149"
				(at 0 -6.35 0)
			)
			(property "Value" "GND_IF_0"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_IF_0_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_IF_0_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND_IF")
					(number "1")
				)
			)
		)
		(symbol "mylib7:NCP114-SN"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U4"
				(at 0 9.525 0)
			)
			(property "Value" "NCP115-SN"
				(at 0 6.985 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:TSOT-23-5"
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "300mA Low-Dropout Linear Regulators, 1.2V output voltage, LDO with low noise and enable pin, XDFN-4"
				(at 0 0 0)
			)
			(property "ki_keywords" "Single Output LDO"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "OnSemi*XDFN4*1EP*1.0x1.0mm*"
				(at 0 0 0)
			)
			(symbol "NCP114-SN_0_1"
				(rectangle
					(start -7.62 5.08)
					(end 7.62 -5.08)
					(fill
						(type background)
					)
				)
			)
			(symbol "NCP114-SN_1_1"
				(pin power_in line
					(at -10.16 2.54 0)
					(length 2.54)
					(name "IN")
					(number "1")
				)
				(pin power_in line
					(at 0 -7.62 90)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin input line
					(at -10.16 -2.54 0)
					(length 2.54)
					(name "EN")
					(number "3")
				)
				(pin power_out line
					(at 10.16 2.54 180)
					(length 2.54)
					(name "OUT")
					(number "5")
				)
			)
		)
		(symbol "power:PWR_FLAG"
			(power)
			(pin_numbers hide)
			(pin_names
				(offset 0) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#FLG"
				(at 0 1.905 0)
			)
			(property "Value" "PWR_FLAG"
				(at 0 3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Special symbol for telling ERC where power comes from"
				(at 0 0 0)
			)
			(property "ki_keywords" "flag power"
				(at 0 0 0)
			)
			(symbol "PWR_FLAG_0_0"
				(pin power_out line
					(at 0 0 90)
					(length 0)
					(name "pwr")
					(number "1")
				)
			)
			(symbol "PWR_FLAG_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 1.27) (xy -1.016 1.905) (xy 0 2.54) (xy 1.016 1.905) (xy 0 1.27)
					)
					(fill
						(type none)
					)
				)
			)
		)
	)
	(junction
		(at 243.84 40.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 220.98 77.47)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 232.41 40.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 85.09 40.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 135.89 40.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 220.98 40.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 181.61 57.15)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 181.61 49.53)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 85.09 77.47)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 200.66 40.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 147.32 54.61)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 161.29 57.15)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 181.61 77.47)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 73.66 40.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 148.59 64.77)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 234.95 64.77)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 124.46 40.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 123.19 152.4)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 147.32 40.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 85.09 57.15)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 135.89 52.07)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 30.48 58.42)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 87.63 214.63)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 124.46 214.63)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 87.63 152.4)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 124.46 49.53)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 95.25 186.69)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 95.25 214.63)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 220.98 57.15)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 62.23 40.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 124.46 186.69)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 124.46 77.47)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 87.63 186.69)
		(diameter 0.9144)
		(color 0 0 0 0)
	)
	(junction
		(at 105.41 40.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 124.46 57.15)
		(diameter 0)
		(color 0 0 0 0)
	)
	(no_connect
		(at 87.63 72.39)
	)
	(no_connect
		(at 96.52 191.77)
	)
	(no_connect
		(at 120.65 144.78)
	)
	(no_connect
		(at 182.88 74.93)
	)
	(no_connect
		(at 87.63 74.93)
	)
	(no_connect
		(at 218.44 72.39)
	)
	(no_connect
		(at 90.17 144.78)
	)
	(no_connect
		(at 182.88 72.39)
	)
	(no_connect
		(at 218.44 74.93)
	)
	(no_connect
		(at 123.19 74.93)
	)
	(no_connect
		(at 218.44 59.69)
	)
	(no_connect
		(at 218.44 67.31)
	)
	(no_connect
		(at 123.19 72.39)
	)
	(wire
		(pts
			(xy 59.69 40.64) (xy 62.23 40.64)
		)
	)
	(wire
		(pts
			(xy 135.89 52.07) (xy 182.88 52.07)
		)
	)
	(wire
		(pts
			(xy 200.66 40.64) (xy 208.28 40.64)
		)
	)
	(wire
		(pts
			(xy 69.85 62.23) (xy 87.63 62.23)
		)
	)
	(wire
		(pts
			(xy 148.59 64.77) (xy 148.59 72.39)
		)
	)
	(wire
		(pts
			(xy 123.19 59.69) (xy 182.88 59.69)
		)
	)
	(wire
		(pts
			(xy 30.48 57.15) (xy 30.48 58.42)
		)
	)
	(wire
		(pts
			(xy 69.85 64.77) (xy 87.63 64.77)
		)
	)
	(wire
		(pts
			(xy 35.56 120.65) (xy 39.37 120.65)
		)
	)
	(wire
		(pts
			(xy 87.63 186.69) (xy 95.25 186.69)
		)
	)
	(wire
		(pts
			(xy 142.24 146.05) (xy 142.24 148.59)
		)
	)
	(wire
		(pts
			(xy 182.88 49.53) (xy 181.61 49.53)
		)
	)
	(wire
		(pts
			(xy 124.46 49.53) (xy 124.46 40.64)
		)
	)
	(wire
		(pts
			(xy 280.67 231.14) (xy 280.67 232.41)
		)
	)
	(wire
		(pts
			(xy 73.66 52.07) (xy 87.63 52.07)
		)
	)
	(wire
		(pts
			(xy 242.57 40.64) (xy 243.84 40.64)
		)
	)
	(wire
		(pts
			(xy 87.63 152.4) (xy 87.63 154.94)
		)
	)
	(wire
		(pts
			(xy 233.68 193.04) (xy 233.68 194.31)
		)
	)
	(wire
		(pts
			(xy 120.65 127) (xy 123.19 127)
		)
	)
	(wire
		(pts
			(xy 85.09 49.53) (xy 87.63 49.53)
		)
	)
	(wire
		(pts
			(xy 218.44 77.47) (xy 220.98 77.47)
		)
	)
	(wire
		(pts
			(xy 48.26 40.64) (xy 52.07 40.64)
		)
	)
	(wire
		(pts
			(xy 95.25 189.23) (xy 95.25 186.69)
		)
	)
	(wire
		(pts
			(xy 147.32 40.64) (xy 149.86 40.64)
		)
	)
	(wire
		(pts
			(xy 35.56 113.03) (xy 39.37 113.03)
		)
	)
	(wire
		(pts
			(xy 257.81 40.64) (xy 254 40.64)
		)
	)
	(wire
		(pts
			(xy 148.59 64.77) (xy 182.88 64.77)
		)
	)
	(wire
		(pts
			(xy 123.19 54.61) (xy 147.32 54.61)
		)
	)
	(wire
		(pts
			(xy 116.84 214.63) (xy 124.46 214.63)
		)
	)
	(wire
		(pts
			(xy 73.66 52.07) (xy 73.66 40.64)
		)
	)
	(wire
		(pts
			(xy 161.29 57.15) (xy 181.61 57.15)
		)
	)
	(wire
		(pts
			(xy 87.63 212.09) (xy 87.63 214.63)
		)
	)
	(wire
		(pts
			(xy 134.62 40.64) (xy 135.89 40.64)
		)
	)
	(wire
		(pts
			(xy 87.63 214.63) (xy 87.63 217.17)
		)
	)
	(wire
		(pts
			(xy 96.52 219.71) (xy 95.25 219.71)
		)
	)
	(wire
		(pts
			(xy 38.1 67.31) (xy 87.63 67.31)
		)
	)
	(wire
		(pts
			(xy 90.17 134.62) (xy 78.74 134.62)
		)
	)
	(wire
		(pts
			(xy 81.28 80.01) (xy 87.63 80.01)
		)
	)
	(wire
		(pts
			(xy 123.19 52.07) (xy 135.89 52.07)
		)
	)
	(wire
		(pts
			(xy 280.67 185.42) (xy 280.67 184.15)
		)
	)
	(wire
		(pts
			(xy 161.29 57.15) (xy 161.29 40.64)
		)
	)
	(wire
		(pts
			(xy 261.62 231.14) (xy 261.62 232.41)
		)
	)
	(wire
		(pts
			(xy 73.66 40.64) (xy 76.2 40.64)
		)
	)
	(wire
		(pts
			(xy 218.44 52.07) (xy 232.41 52.07)
		)
	)
	(wire
		(pts
			(xy 123.19 62.23) (xy 182.88 62.23)
		)
	)
	(wire
		(pts
			(xy 78.74 137.16) (xy 90.17 137.16)
		)
	)
	(wire
		(pts
			(xy 220.98 77.47) (xy 220.98 92.71)
		)
	)
	(wire
		(pts
			(xy 200.66 87.63) (xy 200.66 92.71)
		)
	)
	(wire
		(pts
			(xy 129.54 132.08) (xy 120.65 132.08)
		)
	)
	(wire
		(pts
			(xy 218.44 80.01) (xy 224.79 80.01)
		)
	)
	(wire
		(pts
			(xy 124.46 226.06) (xy 124.46 228.6)
		)
	)
	(wire
		(pts
			(xy 238.76 184.15) (xy 238.76 185.42)
		)
	)
	(wire
		(pts
			(xy 87.63 196.85) (xy 87.63 200.66)
		)
	)
	(wire
		(pts
			(xy 95.25 214.63) (xy 96.52 214.63)
		)
	)
	(wire
		(pts
			(xy 142.24 135.89) (xy 142.24 138.43)
		)
	)
	(wire
		(pts
			(xy 234.95 64.77) (xy 240.03 64.77)
		)
	)
	(wire
		(pts
			(xy 148.59 135.89) (xy 148.59 138.43)
		)
	)
	(wire
		(pts
			(xy 62.23 40.64) (xy 63.5 40.64)
		)
	)
	(wire
		(pts
			(xy 90.17 127) (xy 87.63 127)
		)
	)
	(wire
		(pts
			(xy 123.19 149.86) (xy 123.19 152.4)
		)
	)
	(wire
		(pts
			(xy 16.51 58.42) (xy 16.51 67.31)
		)
	)
	(wire
		(pts
			(xy 233.68 184.15) (xy 233.68 185.42)
		)
	)
	(wire
		(pts
			(xy 222.25 193.04) (xy 222.25 194.31)
		)
	)
	(wire
		(pts
			(xy 90.17 149.86) (xy 87.63 149.86)
		)
	)
	(wire
		(pts
			(xy 120.65 137.16) (xy 129.54 137.16)
		)
	)
	(wire
		(pts
			(xy 243.84 40.64) (xy 246.38 40.64)
		)
	)
	(wire
		(pts
			(xy 85.09 57.15) (xy 85.09 77.47)
		)
	)
	(wire
		(pts
			(xy 99.06 40.64) (xy 105.41 40.64)
		)
	)
	(wire
		(pts
			(xy 218.44 57.15) (xy 220.98 57.15)
		)
	)
	(wire
		(pts
			(xy 85.09 77.47) (xy 87.63 77.47)
		)
	)
	(wire
		(pts
			(xy 295.91 184.15) (xy 295.91 185.42)
		)
	)
	(wire
		(pts
			(xy 124.46 57.15) (xy 161.29 57.15)
		)
	)
	(wire
		(pts
			(xy 182.88 77.47) (xy 181.61 77.47)
		)
	)
	(wire
		(pts
			(xy 35.56 123.19) (xy 39.37 123.19)
		)
	)
	(wire
		(pts
			(xy 182.88 57.15) (xy 181.61 57.15)
		)
	)
	(wire
		(pts
			(xy 215.9 40.64) (xy 220.98 40.64)
		)
	)
	(wire
		(pts
			(xy 181.61 77.47) (xy 181.61 92.71)
		)
	)
	(wire
		(pts
			(xy 87.63 186.69) (xy 87.63 189.23)
		)
	)
	(wire
		(pts
			(xy 124.46 185.42) (xy 124.46 186.69)
		)
	)
	(wire
		(pts
			(xy 87.63 185.42) (xy 87.63 186.69)
		)
	)
	(wire
		(pts
			(xy 220.98 40.64) (xy 222.25 40.64)
		)
	)
	(wire
		(pts
			(xy 295.91 193.04) (xy 295.91 194.31)
		)
	)
	(wire
		(pts
			(xy 87.63 127) (xy 87.63 124.46)
		)
	)
	(wire
		(pts
			(xy 217.17 231.14) (xy 217.17 232.41)
		)
	)
	(wire
		(pts
			(xy 123.19 82.55) (xy 128.27 82.55)
		)
	)
	(wire
		(pts
			(xy 232.41 40.64) (xy 234.95 40.64)
		)
	)
	(wire
		(pts
			(xy 218.44 54.61) (xy 243.84 54.61)
		)
	)
	(wire
		(pts
			(xy 95.25 214.63) (xy 95.25 219.71)
		)
	)
	(wire
		(pts
			(xy 147.32 54.61) (xy 147.32 40.64)
		)
	)
	(wire
		(pts
			(xy 41.91 78.74) (xy 41.91 81.28)
		)
	)
	(wire
		(pts
			(xy 90.17 152.4) (xy 87.63 152.4)
		)
	)
	(wire
		(pts
			(xy 222.25 184.15) (xy 222.25 185.42)
		)
	)
	(wire
		(pts
			(xy 30.48 58.42) (xy 30.48 59.69)
		)
	)
	(wire
		(pts
			(xy 95.25 189.23) (xy 96.52 189.23)
		)
	)
	(wire
		(pts
			(xy 280.67 222.25) (xy 280.67 223.52)
		)
	)
	(wire
		(pts
			(xy 245.11 231.14) (xy 245.11 232.41)
		)
	)
	(wire
		(pts
			(xy 123.19 80.01) (xy 128.27 80.01)
		)
	)
	(wire
		(pts
			(xy 181.61 57.15) (xy 181.61 77.47)
		)
	)
	(wire
		(pts
			(xy 232.41 231.14) (xy 232.41 232.41)
		)
	)
	(wire
		(pts
			(xy 35.56 115.57) (xy 39.37 115.57)
		)
	)
	(wire
		(pts
			(xy 289.56 222.25) (xy 289.56 223.52)
		)
	)
	(wire
		(pts
			(xy 261.62 222.25) (xy 261.62 223.52)
		)
	)
	(wire
		(pts
			(xy 71.12 40.64) (xy 73.66 40.64)
		)
	)
	(wire
		(pts
			(xy 118.11 189.23) (xy 116.84 189.23)
		)
	)
	(wire
		(pts
			(xy 106.68 224.79) (xy 106.68 228.6)
		)
	)
	(wire
		(pts
			(xy 234.95 64.77) (xy 234.95 71.12)
		)
	)
	(wire
		(pts
			(xy 87.63 149.86) (xy 87.63 152.4)
		)
	)
	(wire
		(pts
			(xy 148.59 80.01) (xy 148.59 82.55)
		)
	)
	(wire
		(pts
			(xy 81.28 82.55) (xy 87.63 82.55)
		)
	)
	(wire
		(pts
			(xy 234.95 78.74) (xy 234.95 81.28)
		)
	)
	(wire
		(pts
			(xy 218.44 64.77) (xy 234.95 64.77)
		)
	)
	(wire
		(pts
			(xy 217.17 222.25) (xy 217.17 223.52)
		)
	)
	(wire
		(pts
			(xy 245.11 222.25) (xy 245.11 223.52)
		)
	)
	(wire
		(pts
			(xy 123.19 127) (xy 123.19 124.46)
		)
	)
	(wire
		(pts
			(xy 85.09 40.64) (xy 85.09 49.53)
		)
	)
	(wire
		(pts
			(xy 218.44 69.85) (xy 240.03 69.85)
		)
	)
	(wire
		(pts
			(xy 105.41 40.64) (xy 111.76 40.64)
		)
	)
	(wire
		(pts
			(xy 238.76 193.04) (xy 238.76 194.31)
		)
	)
	(wire
		(pts
			(xy 30.48 58.42) (xy 16.51 58.42)
		)
	)
	(wire
		(pts
			(xy 288.29 193.04) (xy 288.29 194.31)
		)
	)
	(wire
		(pts
			(xy 35.56 125.73) (xy 39.37 125.73)
		)
	)
	(wire
		(pts
			(xy 218.44 49.53) (xy 220.98 49.53)
		)
	)
	(wire
		(pts
			(xy 229.87 40.64) (xy 232.41 40.64)
		)
	)
	(wire
		(pts
			(xy 116.84 186.69) (xy 124.46 186.69)
		)
	)
	(wire
		(pts
			(xy 204.47 222.25) (xy 204.47 223.52)
		)
	)
	(wire
		(pts
			(xy 177.8 82.55) (xy 182.88 82.55)
		)
	)
	(wire
		(pts
			(xy 124.46 213.36) (xy 124.46 214.63)
		)
	)
	(wire
		(pts
			(xy 120.65 149.86) (xy 123.19 149.86)
		)
	)
	(wire
		(pts
			(xy 124.46 186.69) (xy 124.46 190.5)
		)
	)
	(wire
		(pts
			(xy 95.25 186.69) (xy 96.52 186.69)
		)
	)
	(wire
		(pts
			(xy 204.47 231.14) (xy 204.47 232.41)
		)
	)
	(wire
		(pts
			(xy 83.82 40.64) (xy 85.09 40.64)
		)
	)
	(wire
		(pts
			(xy 123.19 67.31) (xy 182.88 67.31)
		)
	)
	(wire
		(pts
			(xy 217.17 184.15) (xy 217.17 185.42)
		)
	)
	(wire
		(pts
			(xy 87.63 57.15) (xy 85.09 57.15)
		)
	)
	(wire
		(pts
			(xy 124.46 40.64) (xy 127 40.64)
		)
	)
	(wire
		(pts
			(xy 220.98 49.53) (xy 220.98 40.64)
		)
	)
	(wire
		(pts
			(xy 123.19 57.15) (xy 124.46 57.15)
		)
	)
	(wire
		(pts
			(xy 35.56 118.11) (xy 39.37 118.11)
		)
	)
	(wire
		(pts
			(xy 90.17 139.7) (xy 78.74 139.7)
		)
	)
	(wire
		(pts
			(xy 105.41 40.64) (xy 105.41 44.45)
		)
	)
	(wire
		(pts
			(xy 147.32 54.61) (xy 182.88 54.61)
		)
	)
	(wire
		(pts
			(xy 318.77 193.04) (xy 318.77 194.31)
		)
	)
	(wire
		(pts
			(xy 123.19 69.85) (xy 182.88 69.85)
		)
	)
	(wire
		(pts
			(xy 280.67 193.04) (xy 280.67 194.31)
		)
	)
	(wire
		(pts
			(xy 181.61 40.64) (xy 185.42 40.64)
		)
	)
	(wire
		(pts
			(xy 123.19 49.53) (xy 124.46 49.53)
		)
	)
	(wire
		(pts
			(xy 105.41 87.63) (xy 105.41 92.71)
		)
	)
	(wire
		(pts
			(xy 218.44 82.55) (xy 224.79 82.55)
		)
	)
	(wire
		(pts
			(xy 129.54 134.62) (xy 120.65 134.62)
		)
	)
	(wire
		(pts
			(xy 123.19 152.4) (xy 123.19 154.94)
		)
	)
	(wire
		(pts
			(xy 289.56 231.14) (xy 289.56 232.41)
		)
	)
	(wire
		(pts
			(xy 90.17 132.08) (xy 78.74 132.08)
		)
	)
	(wire
		(pts
			(xy 85.09 40.64) (xy 91.44 40.64)
		)
	)
	(wire
		(pts
			(xy 124.46 57.15) (xy 124.46 77.47)
		)
	)
	(wire
		(pts
			(xy 318.77 185.42) (xy 318.77 184.15)
		)
	)
	(wire
		(pts
			(xy 87.63 214.63) (xy 95.25 214.63)
		)
	)
	(wire
		(pts
			(xy 218.44 62.23) (xy 240.03 62.23)
		)
	)
	(wire
		(pts
			(xy 193.04 40.64) (xy 200.66 40.64)
		)
	)
	(wire
		(pts
			(xy 69.85 59.69) (xy 87.63 59.69)
		)
	)
	(wire
		(pts
			(xy 69.85 69.85) (xy 87.63 69.85)
		)
	)
	(wire
		(pts
			(xy 288.29 185.42) (xy 288.29 184.15)
		)
	)
	(wire
		(pts
			(xy 243.84 54.61) (xy 243.84 40.64)
		)
	)
	(wire
		(pts
			(xy 129.54 139.7) (xy 120.65 139.7)
		)
	)
	(wire
		(pts
			(xy 123.19 152.4) (xy 120.65 152.4)
		)
	)
	(wire
		(pts
			(xy 200.66 40.64) (xy 200.66 44.45)
		)
	)
	(wire
		(pts
			(xy 30.48 74.93) (xy 30.48 76.2)
		)
	)
	(wire
		(pts
			(xy 124.46 49.53) (xy 181.61 49.53)
		)
	)
	(wire
		(pts
			(xy 85.09 77.47) (xy 85.09 92.71)
		)
	)
	(wire
		(pts
			(xy 257.81 57.15) (xy 257.81 40.64)
		)
	)
	(wire
		(pts
			(xy 148.59 146.05) (xy 148.59 148.59)
		)
	)
	(wire
		(pts
			(xy 85.09 57.15) (xy 48.26 57.15)
		)
	)
	(wire
		(pts
			(xy 119.38 40.64) (xy 124.46 40.64)
		)
	)
	(wire
		(pts
			(xy 200.66 38.1) (xy 200.66 40.64)
		)
	)
	(wire
		(pts
			(xy 123.19 77.47) (xy 124.46 77.47)
		)
	)
	(wire
		(pts
			(xy 48.26 57.15) (xy 48.26 40.64)
		)
	)
	(wire
		(pts
			(xy 105.41 38.1) (xy 105.41 40.64)
		)
	)
	(wire
		(pts
			(xy 232.41 52.07) (xy 232.41 40.64)
		)
	)
	(wire
		(pts
			(xy 177.8 80.01) (xy 182.88 80.01)
		)
	)
	(wire
		(pts
			(xy 161.29 40.64) (xy 157.48 40.64)
		)
	)
	(wire
		(pts
			(xy 135.89 52.07) (xy 135.89 40.64)
		)
	)
	(wire
		(pts
			(xy 146.05 40.64) (xy 147.32 40.64)
		)
	)
	(wire
		(pts
			(xy 62.23 54.61) (xy 62.23 40.64)
		)
	)
	(wire
		(pts
			(xy 181.61 40.64) (xy 181.61 49.53)
		)
	)
	(wire
		(pts
			(xy 220.98 57.15) (xy 257.81 57.15)
		)
	)
	(wire
		(pts
			(xy 220.98 57.15) (xy 220.98 77.47)
		)
	)
	(wire
		(pts
			(xy 123.19 64.77) (xy 148.59 64.77)
		)
	)
	(wire
		(pts
			(xy 135.89 40.64) (xy 138.43 40.64)
		)
	)
	(wire
		(pts
			(xy 118.11 189.23) (xy 118.11 200.66)
		)
	)
	(wire
		(pts
			(xy 124.46 198.12) (xy 124.46 200.66)
		)
	)
	(wire
		(pts
			(xy 87.63 224.79) (xy 87.63 228.6)
		)
	)
	(wire
		(pts
			(xy 217.17 193.04) (xy 217.17 194.31)
		)
	)
	(wire
		(pts
			(xy 124.46 214.63) (xy 124.46 218.44)
		)
	)
	(wire
		(pts
			(xy 232.41 222.25) (xy 232.41 223.52)
		)
	)
	(wire
		(pts
			(xy 124.46 77.47) (xy 124.46 92.71)
		)
	)
	(wire
		(pts
			(xy 16.51 67.31) (xy 17.78 67.31)
		)
	)
	(wire
		(pts
			(xy 62.23 54.61) (xy 87.63 54.61)
		)
	)
	(label "CLKI"
		(at 69.85 67.31 0)
		(fields_autoplaced yes)
	)
	(label "I_BI"
		(at 121.92 137.16 0)
		(fields_autoplaced yes)
	)
	(label "I_BI"
		(at 69.85 62.23 0)
		(fields_autoplaced yes)
	)
	(label "I_CI"
		(at 121.92 132.08 0)
		(fields_autoplaced yes)
	)
	(label "I_CI"
		(at 69.85 69.85 0)
		(fields_autoplaced yes)
	)
	(label "I_RO"
		(at 121.92 139.7 0)
		(fields_autoplaced yes)
	)
	(label "I_NRSTI"
		(at 121.92 134.62 0)
		(fields_autoplaced yes)
	)
	(label "I_NRSTI"
		(at 69.85 59.69 0)
		(fields_autoplaced yes)
	)
	(label "I_RO"
		(at 69.85 64.77 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "BI"
		(shape input)
		(at 78.74 137.16 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "+1.8V_OUT"
		(shape output)
		(at 35.56 123.19 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "GND"
		(shape input)
		(at 35.56 115.57 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "BO"
		(shape output)
		(at 240.03 62.23 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "NRSTI"
		(shape input)
		(at 78.74 134.62 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "CI"
		(shape input)
		(at 78.74 132.08 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "V_IF"
		(shape input)
		(at 35.56 118.11 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "+1V2"
		(shape input)
		(at 35.56 113.03 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "NRSTO"
		(shape output)
		(at 129.54 134.62 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "RI"
		(shape input)
		(at 240.03 64.77 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "GND_OUT"
		(shape output)
		(at 35.56 125.73 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "CO"
		(shape output)
		(at 240.03 69.85 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "RO"
		(shape output)
		(at 78.74 139.7 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "GND_IF"
		(shape input)
		(at 35.56 120.65 180)
		(fields_autoplaced yes)
	)
	(symbol
		(lib_id "mylib7:+0V8_0")
		(at 81.28 80.01 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U5006"
			(at 80.01 76.2 0)
		)
		(property "Value" "+0V8"
			(at 78.105 80.01 90)
		)
		(property "Footprint" ""
			(at 81.28 80.01 0)
		)
		(property "Datasheet" ""
			(at 81.28 80.01 0)
		)
		(property "Description" ""
			(at 81.28 80.01 0)
		)
		(property "Distributor" "-"
			(at 81.28 80.01 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "U5006")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U18")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 123.19 154.94 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05018"
			(at 123.19 161.29 0)
		)
		(property "Value" "GND_0"
			(at 123.19 160.02 0)
		)
		(property "Footprint" ""
			(at 123.19 154.94 0)
		)
		(property "Datasheet" ""
			(at 123.19 154.94 0)
		)
		(property "Description" ""
			(at 123.19 154.94 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05018")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0157")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_0")
		(at 204.47 222.25 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05029"
			(at 204.47 226.06 0)
		)
		(property "Value" "+1V2_0"
			(at 204.47 217.805 0)
		)
		(property "Footprint" ""
			(at 204.47 222.25 0)
		)
		(property "Datasheet" ""
			(at 204.47 222.25 0)
		)
		(property "Description" ""
			(at 204.47 222.25 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05029")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0167")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 233.68 189.23 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5023"
			(at 231.14 191.77 90)
		)
		(property "Value" "1µ"
			(at 234.315 190.5 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 233.68 189.23 0)
		)
		(property "Datasheet" ""
			(at 233.68 189.23 0)
		)
		(property "Description" ""
			(at 233.68 189.23 0)
		)
		(property "DK" ""
			(at 233.68 189.23 0)
		)
		(property "PARTNO" ""
			(at 233.68 189.23 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 233.68 189.23 0)
		)
		(property "Distributor" "D"
			(at 233.68 189.23 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 233.68 189.23 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5023")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C60")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+V_IF_0")
		(at 148.59 135.89 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0149"
			(at 148.59 139.7 0)
		)
		(property "Value" "+V_IF_0"
			(at 148.59 130.81 0)
		)
		(property "Footprint" ""
			(at 148.59 135.89 0)
		)
		(property "Datasheet" ""
			(at 148.59 135.89 0)
		)
		(property "Description" ""
			(at 148.59 135.89 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0149")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_0")
		(at 280.67 222.25 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05079"
			(at 280.67 226.06 0)
		)
		(property "Value" "+1V2_0"
			(at 280.67 217.805 0)
		)
		(property "Footprint" ""
			(at 280.67 222.25 0)
		)
		(property "Datasheet" ""
			(at 280.67 222.25 0)
		)
		(property "Description" ""
			(at 280.67 222.25 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05079")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0212")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 295.91 189.23 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5043"
			(at 296.545 187.325 0)
		)
		(property "Value" "1µ"
			(at 297.18 193.04 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 295.91 189.23 0)
		)
		(property "Datasheet" ""
			(at 295.91 189.23 0)
		)
		(property "Description" ""
			(at 295.91 189.23 0)
		)
		(property "DK" ""
			(at 295.91 189.23 0)
		)
		(property "PARTNO" ""
			(at 295.91 189.23 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 295.91 189.23 0)
		)
		(property "Distributor" "D"
			(at 295.91 189.23 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 295.91 189.23 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5043")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C80")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 234.95 74.93 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R5006"
			(at 238.76 73.66 90)
		)
		(property "Value" "10k"
			(at 236.855 74.295 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 233.172 74.93 90)
		)
		(property "Datasheet" "~"
			(at 234.95 74.93 0)
		)
		(property "Description" ""
			(at 234.95 74.93 0)
		)
		(property "Manufacturer" "ERJ-H3EF1002V"
			(at 234.95 74.93 0)
		)
		(property "Distributor" "D"
			(at 234.95 74.93 0)
		)
		(property "OrderNr" "10-ERJ-H3EF1002VCT-ND"
			(at 234.95 74.93 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "R5006")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R41")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_0")
		(at 123.19 124.46 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05017"
			(at 123.19 128.27 0)
		)
		(property "Value" "+1V8_0"
			(at 123.19 119.38 0)
		)
		(property "Footprint" ""
			(at 123.19 124.46 0)
		)
		(property "Datasheet" ""
			(at 123.19 124.46 0)
		)
		(property "Description" ""
			(at 123.19 124.46 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05017")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0156")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_0")
		(at 177.8 82.55 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR05118"
			(at 181.61 82.55 0)
		)
		(property "Value" "+1V8_0"
			(at 171.45 82.55 90)
		)
		(property "Footprint" ""
			(at 177.8 82.55 0)
		)
		(property "Datasheet" ""
			(at 177.8 82.55 0)
		)
		(property "Description" ""
			(at 177.8 82.55 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05118")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0245")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_0")
		(at 30.48 57.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05001"
			(at 30.48 60.96 0)
		)
		(property "Value" "+1V8_0"
			(at 30.48 52.07 0)
		)
		(property "Footprint" ""
			(at 30.48 57.15 0)
		)
		(property "Datasheet" ""
			(at 30.48 57.15 0)
		)
		(property "Description" ""
			(at 30.48 57.15 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05001")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0140")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_IF")
		(at 322.58 229.87 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR05100"
			(at 322.58 236.22 0)
		)
		(property "Value" "GND_IF"
			(at 322.58 234.315 0)
		)
		(property "Footprint" ""
			(at 322.58 229.87 0)
		)
		(property "Datasheet" ""
			(at 322.58 229.87 0)
		)
		(property "Description" ""
			(at 322.58 229.87 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05100")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0233")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 354.33 229.87 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#FLG05006"
			(at 354.33 231.775 0)
		)
		(property "Value" "PWR_FLAG"
			(at 357.505 234.315 0)
		)
		(property "Footprint" ""
			(at 354.33 229.87 0)
		)
		(property "Datasheet" "~"
			(at 354.33 229.87 0)
		)
		(property "Description" ""
			(at 354.33 229.87 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#FLG05006")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG08")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 124.46 228.6 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05014"
			(at 124.46 234.95 0)
		)
		(property "Value" "GND_0"
			(at 124.46 233.68 0)
		)
		(property "Footprint" ""
			(at 124.46 228.6 0)
		)
		(property "Datasheet" ""
			(at 124.46 228.6 0)
		)
		(property "Description" ""
			(at 124.46 228.6 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05014")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0153")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 261.62 227.33 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5033"
			(at 262.255 225.425 0)
		)
		(property "Value" "100n"
			(at 262.89 231.14 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 261.62 227.33 0)
		)
		(property "Datasheet" ""
			(at 261.62 227.33 0)
		)
		(property "Description" ""
			(at 261.62 227.33 0)
		)
		(property "DK" ""
			(at 261.62 227.33 0)
		)
		(property "PARTNO" ""
			(at 261.62 227.33 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 261.62 227.33 0)
		)
		(property "Distributor" "D"
			(at 261.62 227.33 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 261.62 227.33 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5033")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C70")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_0")
		(at 222.25 184.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U5010"
			(at 226.06 182.88 0)
		)
		(property "Value" "+0V8"
			(at 222.25 180.975 90)
		)
		(property "Footprint" ""
			(at 222.25 184.15 0)
		)
		(property "Datasheet" ""
			(at 222.25 184.15 0)
		)
		(property "Description" ""
			(at 222.25 184.15 0)
		)
		(property "Distributor" "-"
			(at 222.25 184.15 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "U5010")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U22")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 238.76 194.31 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05049"
			(at 238.76 200.66 0)
		)
		(property "Value" "GND_0"
			(at 238.76 199.39 0)
		)
		(property "Footprint" ""
			(at 238.76 194.31 0)
		)
		(property "Datasheet" ""
			(at 238.76 194.31 0)
		)
		(property "Description" ""
			(at 238.76 194.31 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05049")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0184")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 87.63 193.04 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C279"
			(at 88.9 191.135 0)
		)
		(property "Value" "100n"
			(at 88.9 196.85 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 87.63 193.04 0)
		)
		(property "Datasheet" ""
			(at 87.63 193.04 0)
		)
		(property "Description" ""
			(at 87.63 193.04 0)
		)
		(property "DK" ""
			(at 87.63 193.04 0)
		)
		(property "PARTNO" ""
			(at 87.63 193.04 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 87.63 193.04 0)
		)
		(property "Distributor" "D"
			(at 87.63 193.04 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 87.63 193.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "C279")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_0")
		(at 142.24 135.89 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR05022"
			(at 142.24 139.7 0)
		)
		(property "Value" "+1V8_0"
			(at 142.24 130.81 0)
		)
		(property "Footprint" ""
			(at 142.24 135.89 0)
		)
		(property "Datasheet" ""
			(at 142.24 135.89 0)
		)
		(property "Description" ""
			(at 142.24 135.89 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05022")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0161")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:BM1366_mode1")
		(at 200.66 67.31 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U5025"
			(at 202.8541 42.545 0)
		)
		(property "Value" "BM1366_mode1"
			(at 202.8541 45.085 0)
		)
		(property "Footprint" "0xaxe:BM1366"
			(at 193.04 67.31 0)
		)
		(property "Datasheet" ""
			(at 193.04 67.31 0)
		)
		(property "Description" ""
			(at 200.66 67.31 0)
		)
		(property "Distributor" "-"
			(at 200.66 67.31 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "17")
		(pin "18")
		(pin "19")
		(pin "2")
		(pin "20")
		(pin "21")
		(pin "22")
		(pin "23")
		(pin "24")
		(pin "25")
		(pin "26")
		(pin "27")
		(pin "28")
		(pin "29")
		(pin "3")
		(pin "30")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "flex1"
				(path
					(reference "U5025")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U36")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 148.59 76.2 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R5003"
			(at 152.4 74.93 90)
		)
		(property "Value" "10k"
			(at 150.495 75.565 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 146.812 76.2 90)
		)
		(property "Datasheet" "~"
			(at 148.59 76.2 0)
		)
		(property "Description" ""
			(at 148.59 76.2 0)
		)
		(property "Manufacturer" "ERJ-H3EF1002V"
			(at 148.59 76.2 0)
		)
		(property "Distributor" "D"
			(at 148.59 76.2 0)
		)
		(property "OrderNr" "10-ERJ-H3EF1002VCT-ND"
			(at 148.59 76.2 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "R5003")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "R38")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_IF_0")
		(at 87.63 154.94 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0137"
			(at 87.63 161.29 0)
		)
		(property "Value" "GND_IF_0"
			(at 87.63 160.02 0)
		)
		(property "Footprint" ""
			(at 87.63 154.94 0)
		)
		(property "Datasheet" ""
			(at 87.63 154.94 0)
		)
		(property "Description" ""
			(at 87.63 154.94 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0137")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 87.63 200.66 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0606"
			(at 87.63 207.01 0)
		)
		(property "Value" "GND_0"
			(at 87.63 205.74 0)
		)
		(property "Footprint" ""
			(at 87.63 200.66 0)
		)
		(property "Datasheet" ""
			(at 87.63 200.66 0)
		)
		(property "Description" ""
			(at 87.63 200.66 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0606")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 232.41 227.33 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5022"
			(at 233.045 225.425 0)
		)
		(property "Value" "1µ"
			(at 233.68 231.14 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 232.41 227.33 0)
		)
		(property "Datasheet" ""
			(at 232.41 227.33 0)
		)
		(property "Description" ""
			(at 232.41 227.33 0)
		)
		(property "DK" ""
			(at 232.41 227.33 0)
		)
		(property "PARTNO" ""
			(at 232.41 227.33 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 232.41 227.33 0)
		)
		(property "Distributor" "D"
			(at 232.41 227.33 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 232.41 227.33 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5022")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C59")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+V_IF_0")
		(at 87.63 124.46 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0148"
			(at 87.63 128.27 0)
		)
		(property "Value" "+V_IF_0"
			(at 87.63 119.38 0)
		)
		(property "Footprint" ""
			(at 87.63 124.46 0)
		)
		(property "Datasheet" ""
			(at 87.63 124.46 0)
		)
		(property "Description" ""
			(at 87.63 124.46 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0148")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "bitaxe:MCP1824")
		(at 106.68 187.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U115"
			(at 103.505 180.975 0)
		)
		(property "Value" "MCP1824T-1802E"
			(at 106.68 182.88 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5"
			(at 106.68 187.96 0)
		)
		(property "Datasheet" "https://ww1.microchip.com/downloads/en/DeviceDoc/22070a.pdf"
			(at 106.68 187.96 0)
		)
		(property "Description" ""
			(at 106.68 187.96 0)
		)
		(property "PARTNO" ""
			(at 106.68 187.96 0)
		)
		(property "DK" ""
			(at 106.68 187.96 0)
		)
		(property "OrderNr" "MCP1824T-1802E/OTCT-ND"
			(at 106.68 187.96 0)
		)
		(property "Distributor" "D"
			(at 106.68 187.96 0)
		)
		(property "Manufacturer" "MCP1824T-1802E/OT"
			(at 106.68 187.96 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(instances
			(project "8]axe"
				(path
					(reference "U115")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 204.47 227.33 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5013"
			(at 205.105 225.425 0)
		)
		(property "Value" "10µ/16V"
			(at 205.74 231.14 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 204.47 227.33 0)
		)
		(property "Datasheet" ""
			(at 204.47 227.33 0)
		)
		(property "Description" ""
			(at 204.47 227.33 0)
		)
		(property "DK" ""
			(at 204.47 227.33 0)
		)
		(property "PARTNO" ""
			(at 204.47 227.33 0)
		)
		(property "Manufacturer" "GRT188R61C106KE13D"
			(at 204.47 227.33 0)
		)
		(property "Distributor" "D"
			(at 204.47 227.33 0)
		)
		(property "OrderNr" "490-12317-1-ND"
			(at 204.47 227.33 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5013")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C50")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 85.09 92.71 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05020"
			(at 85.09 99.06 0)
		)
		(property "Value" "GND_0"
			(at 85.09 97.79 0)
		)
		(property "Footprint" ""
			(at 85.09 92.71 0)
		)
		(property "Datasheet" ""
			(at 85.09 92.71 0)
		)
		(property "Description" ""
			(at 85.09 92.71 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05020")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0159")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 289.56 232.41 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR05086"
			(at 289.56 238.76 0)
		)
		(property "Value" "GND_0"
			(at 289.56 237.49 0)
		)
		(property "Footprint" ""
			(at 289.56 232.41 0)
		)
		(property "Datasheet" ""
			(at 289.56 232.41 0)
		)
		(property "Description" ""
			(at 289.56 232.41 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05086")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0219")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:BM1366_mode1")
		(at 105.41 67.31 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U5007"
			(at 107.6041 42.545 0)
		)
		(property "Value" "BM1366_mode1"
			(at 107.6041 45.085 0)
		)
		(property "Footprint" "0xaxe:BM1366"
			(at 97.79 67.31 0)
		)
		(property "Datasheet" ""
			(at 97.79 67.31 0)
		)
		(property "Description" ""
			(at 105.41 67.31 0)
		)
		(property "Distributor" "-"
			(at 105.41 67.31 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "17")
		(pin "18")
		(pin "19")
		(pin "2")
		(pin "20")
		(pin "21")
		(pin "22")
		(pin "23")
		(pin "24")
		(pin "25")
		(pin "26")
		(pin "27")
		(pin "28")
		(pin "29")
		(pin "3")
		(pin "30")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "flex1"
				(path
					(reference "U5007")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U19")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_IF_0")
		(at 39.37 120.65 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0136"
			(at 45.72 120.65 0)
		)
		(property "Value" "GND_IF_0"
			(at 43.18 120.6499 90)
		)
		(property "Footprint" ""
			(at 39.37 120.65 0)
		)
		(property "Datasheet" ""
			(at 39.37 120.65 0)
		)
		(property "Description" ""
			(at 39.37 120.65 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0136")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 124.46 200.66 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR077"
			(at 124.46 207.01 0)
		)
		(property "Value" "GND_0"
			(at 124.46 205.74 0)
		)
		(property "Footprint" ""
			(at 124.46 200.66 0)
		)
		(property "Datasheet" ""
			(at 124.46 200.66 0)
		)
		(property "Description" ""
			(at 124.46 200.66 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR077")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 212.09 40.64 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5058"
			(at 208.915 38.1 90)
		)
		(property "Value" "1µ"
			(at 210.82 41.275 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 212.09 40.64 0)
		)
		(property "Datasheet" ""
			(at 212.09 40.64 0)
		)
		(property "Description" ""
			(at 212.09 40.64 0)
		)
		(property "DK" ""
			(at 212.09 40.64 0)
		)
		(property "PARTNO" ""
			(at 212.09 40.64 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 212.09 40.64 0)
		)
		(property "Distributor" "D"
			(at 212.09 40.64 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 212.09 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5058")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C94")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 39.37 125.73 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR05018"
			(at 45.72 125.73 0)
		)
		(property "Value" "GND_0"
			(at 42.926 125.73 90)
		)
		(property "Footprint" ""
			(at 39.37 125.73 0)
		)
		(property "Datasheet" ""
			(at 39.37 125.73 0)
		)
		(property "Description" ""
			(at 39.37 125.73 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05018")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0139")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 55.88 40.64 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5004"
			(at 53.34 38.1 90)
		)
		(property "Value" "1µ"
			(at 54.61 41.275 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 55.88 40.64 0)
		)
		(property "Datasheet" ""
			(at 55.88 40.64 0)
		)
		(property "Description" ""
			(at 55.88 40.64 0)
		)
		(property "DK" ""
			(at 55.88 40.64 0)
		)
		(property "PARTNO" ""
			(at 55.88 40.64 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 55.88 40.64 0)
		)
		(property "Distributor" "D"
			(at 55.88 40.64 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 55.88 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5004")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C41")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 280.67 189.23 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5038"
			(at 281.94 187.325 0)
		)
		(property "Value" "1µ"
			(at 281.94 192.405 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 280.67 189.23 0)
		)
		(property "Datasheet" ""
			(at 280.67 189.23 0)
		)
		(property "Description" ""
			(at 280.67 189.23 0)
		)
		(property "DK" ""
			(at 280.67 189.23 0)
		)
		(property "PARTNO" ""
			(at 280.67 189.23 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 280.67 189.23 0)
		)
		(property "Distributor" "D"
			(at 280.67 189.23 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 280.67 189.23 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5038")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C75")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 327.66 229.87 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#FLG05004"
			(at 327.66 231.775 0)
		)
		(property "Value" "PWR_FLAG"
			(at 330.835 234.315 0)
		)
		(property "Footprint" ""
			(at 327.66 229.87 0)
		)
		(property "Datasheet" "~"
			(at 327.66 229.87 0)
		)
		(property "Description" ""
			(at 327.66 229.87 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#FLG05004")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG06")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_0")
		(at 39.37 123.19 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05017"
			(at 35.56 123.19 0)
		)
		(property "Value" "+1V8_0"
			(at 42.545 123.19 90)
		)
		(property "Footprint" ""
			(at 39.37 123.19 0)
		)
		(property "Datasheet" ""
			(at 39.37 123.19 0)
		)
		(property "Description" ""
			(at 39.37 123.19 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05017")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0138")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Isolator:ADuM1411")
		(at 105.41 139.7 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U5004"
			(at 105.41 119.38 0)
		)
		(property "Value" "ADUM141E0BRZ-RL7"
			(at 105.41 121.92 0)
		)
		(property "Footprint" "Package_SO:SOIC-16_3.9x9.9mm_P1.27mm"
			(at 105.41 157.48 0)
		)
		(property "Datasheet" "https://www.analog.com/media/en/technical-documentation/data-sheets/ADUM1410_1411_1412.pdf"
			(at 85.09 139.7 0)
		)
		(property "Description" ""
			(at 105.41 139.7 0)
		)
		(property "Distributor" "D"
			(at 105.41 139.7 0)
		)
		(property "Manufacturer" "ADUM141E0BRZ-RL7"
			(at 105.41 139.7 0)
		)
		(property "OrderNr" "505-ADUM141E0BRZ-RL7CT-ND"
			(at 105.41 139.7 0)
		)
		(pin "1")
		(pin "10")
		(pin "11")
		(pin "12")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "8")
		(pin "9")
		(instances
			(project "flex1"
				(path
					(reference "U5004")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U16")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+6.5V")
		(at 87.63 185.42 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0491"
			(at 87.63 189.23 0)
		)
		(property "Value" "+6.5V"
			(at 87.63 180.34 0)
		)
		(property "Footprint" ""
			(at 87.63 185.42 0)
		)
		(property "Datasheet" ""
			(at 87.63 185.42 0)
		)
		(property "Description" ""
			(at 87.63 185.42 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0491")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_0")
		(at 124.46 185.42 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0608"
			(at 124.46 189.23 0)
		)
		(property "Value" "+1V8_0"
			(at 124.46 180.34 0)
		)
		(property "Footprint" ""
			(at 124.46 185.42 0)
		)
		(property "Datasheet" ""
			(at 124.46 185.42 0)
		)
		(property "Description" ""
			(at 124.46 185.42 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0608")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 124.46 194.31 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C280"
			(at 125.73 192.405 0)
		)
		(property "Value" "1µ"
			(at 126.365 198.12 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 124.46 194.31 0)
		)
		(property "Datasheet" ""
			(at 124.46 194.31 0)
		)
		(property "Description" ""
			(at 124.46 194.31 0)
		)
		(property "DK" ""
			(at 124.46 194.31 0)
		)
		(property "PARTNO" ""
			(at 124.46 194.31 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 124.46 194.31 0)
		)
		(property "Distributor" "D"
			(at 124.46 194.31 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 124.46 194.31 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "C280")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 322.58 229.87 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#FLG05003"
			(at 322.58 227.965 0)
		)
		(property "Value" "PWR_FLAG"
			(at 320.675 225.425 0)
		)
		(property "Footprint" ""
			(at 322.58 229.87 0)
		)
		(property "Datasheet" "~"
			(at 322.58 229.87 0)
		)
		(property "Description" ""
			(at 322.58 229.87 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#FLG05003")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG05")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 217.17 194.31 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05036"
			(at 217.17 200.66 0)
		)
		(property "Value" "GND_0"
			(at 217.17 199.39 0)
		)
		(property "Footprint" ""
			(at 217.17 194.31 0)
		)
		(property "Datasheet" ""
			(at 217.17 194.31 0)
		)
		(property "Description" ""
			(at 217.17 194.31 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05036")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0173")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_0")
		(at 261.62 222.25 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05065"
			(at 261.62 226.06 0)
		)
		(property "Value" "+1V2_0"
			(at 261.62 217.805 0)
		)
		(property "Footprint" ""
			(at 261.62 222.25 0)
		)
		(property "Datasheet" ""
			(at 261.62 222.25 0)
		)
		(property "Description" ""
			(at 261.62 222.25 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05065")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0198")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_0")
		(at 288.29 184.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR05083"
			(at 288.29 187.96 0)
		)
		(property "Value" "+1V8_0"
			(at 288.29 179.07 0)
		)
		(property "Footprint" ""
			(at 288.29 184.15 0)
		)
		(property "Datasheet" ""
			(at 288.29 184.15 0)
		)
		(property "Description" ""
			(at 288.29 184.15 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05083")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0216")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_0")
		(at 81.28 82.55 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR05019"
			(at 85.09 82.55 0)
		)
		(property "Value" "+1V8_0"
			(at 74.93 82.55 90)
		)
		(property "Footprint" ""
			(at 81.28 82.55 0)
		)
		(property "Datasheet" ""
			(at 81.28 82.55 0)
		)
		(property "Description" ""
			(at 81.28 82.55 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05019")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0158")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+3V3_EXT")
		(at 354.33 229.87 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR05107"
			(at 354.33 233.68 0)
		)
		(property "Value" "+3V3_EXT"
			(at 357.505 225.425 0)
		)
		(property "Footprint" ""
			(at 354.33 229.87 0)
		)
		(property "Datasheet" ""
			(at 354.33 229.87 0)
		)
		(property "Description" ""
			(at 354.33 229.87 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05107")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0240")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_0")
		(at 289.56 222.25 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05085"
			(at 289.56 226.06 0)
		)
		(property "Value" "+1V2_0"
			(at 289.56 217.805 0)
		)
		(property "Footprint" ""
			(at 289.56 222.25 0)
		)
		(property "Datasheet" ""
			(at 289.56 222.25 0)
		)
		(property "Description" ""
			(at 289.56 222.25 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05085")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0218")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 375.92 229.87 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#FLG05007"
			(at 375.92 227.965 0)
		)
		(property "Value" "PWR_FLAG"
			(at 375.92 226.06 0)
		)
		(property "Footprint" ""
			(at 375.92 229.87 0)
		)
		(property "Datasheet" "~"
			(at 375.92 229.87 0)
		)
		(property "Description" ""
			(at 375.92 229.87 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#FLG05007")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG09")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Oscillator:ASDMB-xxxMHz")
		(at 27.94 67.31 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U5001"
			(at 24.13 60.96 0)
		)
		(property "Value" "25MHz"
			(at 24.13 73.66 0)
		)
		(property "Footprint" "Oscillator:Oscillator_SMD_EuroQuartz_XO32-4Pin_3.2x2.5mm"
			(at 27.94 67.31 0)
		)
		(property "Datasheet" "https://abracon.com/Oscillators/ASDMB.pdf"
			(at 35.56 55.88 0)
		)
		(property "Description" ""
			(at 27.94 67.31 0)
		)
		(property "Distributor" "D"
			(at 27.94 67.31 0)
		)
		(property "OrderNr" "50-ECS-TXO-3225MV-250-CT-ND"
			(at 27.94 67.31 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(instances
			(project "flex1"
				(path
					(reference "U5001")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U13")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 295.91 194.31 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05090"
			(at 295.91 200.66 0)
		)
		(property "Value" "GND_0"
			(at 295.91 199.39 0)
		)
		(property "Footprint" ""
			(at 295.91 194.31 0)
		)
		(property "Datasheet" ""
			(at 295.91 194.31 0)
		)
		(property "Description" ""
			(at 295.91 194.31 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05090")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0223")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 261.62 232.41 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05066"
			(at 261.62 238.76 0)
		)
		(property "Value" "GND_0"
			(at 261.62 237.49 0)
		)
		(property "Footprint" ""
			(at 261.62 232.41 0)
		)
		(property "Datasheet" ""
			(at 261.62 232.41 0)
		)
		(property "Description" ""
			(at 261.62 232.41 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05066")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0199")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 245.11 227.33 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5028"
			(at 245.745 225.425 0)
		)
		(property "Value" "1µ"
			(at 246.38 231.14 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 245.11 227.33 0)
		)
		(property "Datasheet" ""
			(at 245.11 227.33 0)
		)
		(property "Description" ""
			(at 245.11 227.33 0)
		)
		(property "DK" ""
			(at 245.11 227.33 0)
		)
		(property "PARTNO" ""
			(at 245.11 227.33 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 245.11 227.33 0)
		)
		(property "Distributor" "D"
			(at 245.11 227.33 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 245.11 227.33 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5028")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C65")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 250.19 40.64 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5061"
			(at 247.65 38.1 90)
		)
		(property "Value" "1µ"
			(at 248.92 41.275 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 250.19 40.64 0)
		)
		(property "Datasheet" ""
			(at 250.19 40.64 0)
		)
		(property "Description" ""
			(at 250.19 40.64 0)
		)
		(property "DK" ""
			(at 250.19 40.64 0)
		)
		(property "PARTNO" ""
			(at 250.19 40.64 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 250.19 40.64 0)
		)
		(property "Distributor" "D"
			(at 250.19 40.64 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 250.19 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5061")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C97")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_0")
		(at 177.8 80.01 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U5024"
			(at 176.53 76.2 0)
		)
		(property "Value" "+0V8"
			(at 174.625 80.01 90)
		)
		(property "Footprint" ""
			(at 177.8 80.01 0)
		)
		(property "Datasheet" ""
			(at 177.8 80.01 0)
		)
		(property "Description" ""
			(at 177.8 80.01 0)
		)
		(property "Distributor" "-"
			(at 177.8 80.01 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "U5024")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U35")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 142.24 142.24 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5010"
			(at 144.145 140.335 0)
		)
		(property "Value" "100n"
			(at 144.145 146.05 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 142.24 142.24 0)
		)
		(property "Datasheet" ""
			(at 142.24 142.24 0)
		)
		(property "Description" ""
			(at 142.24 142.24 0)
		)
		(property "DK" ""
			(at 142.24 142.24 0)
		)
		(property "PARTNO" ""
			(at 142.24 142.24 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 142.24 142.24 0)
		)
		(property "Distributor" "D"
			(at 142.24 142.24 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 142.24 142.24 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5010")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C47")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 217.17 227.33 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5017"
			(at 217.805 225.425 0)
		)
		(property "Value" "10µ/16V"
			(at 218.44 231.14 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 217.17 227.33 0)
		)
		(property "Datasheet" ""
			(at 217.17 227.33 0)
		)
		(property "Description" ""
			(at 217.17 227.33 0)
		)
		(property "DK" ""
			(at 217.17 227.33 0)
		)
		(property "PARTNO" ""
			(at 217.17 227.33 0)
		)
		(property "Manufacturer" "GRT188R61C106KE13D"
			(at 217.17 227.33 0)
		)
		(property "Distributor" "D"
			(at 217.17 227.33 0)
		)
		(property "OrderNr" "490-12317-1-ND"
			(at 217.17 227.33 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5017")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C54")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 30.48 76.2 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05002"
			(at 30.48 82.55 0)
		)
		(property "Value" "GND_0"
			(at 30.48 81.28 0)
		)
		(property "Footprint" ""
			(at 30.48 76.2 0)
		)
		(property "Datasheet" ""
			(at 30.48 76.2 0)
		)
		(property "Description" ""
			(at 30.48 76.2 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05002")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0141")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 289.56 227.33 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5042"
			(at 288.29 226.06 90)
		)
		(property "Value" "330µ/4V"
			(at 293.37 231.14 90)
		)
		(property "Footprint" "Capacitor_SMD:C_1210_3225Metric"
			(at 290.5252 231.14 0)
		)
		(property "Datasheet" "~"
			(at 289.56 227.33 0)
		)
		(property "Description" ""
			(at 289.56 227.33 0)
		)
		(property "Distributor" "D"
			(at 289.56 227.33 0)
		)
		(property "Manufacturer" "GRM32ER60G337ME05K"
			(at 289.56 227.33 0)
		)
		(property "OrderNr" "490-GRM32ER60G337ME05KCT-ND"
			(at 289.56 227.33 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5042")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C79")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_0")
		(at 87.63 212.09 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05005"
			(at 87.63 215.9 0)
		)
		(property "Value" "+1V8_0"
			(at 87.63 207.01 0)
		)
		(property "Footprint" ""
			(at 87.63 212.09 0)
		)
		(property "Datasheet" ""
			(at 87.63 212.09 0)
		)
		(property "Description" ""
			(at 87.63 212.09 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05005")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0144")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+V_IF")
		(at 327.66 229.87 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR05101"
			(at 327.66 233.68 0)
		)
		(property "Value" "+V_IF"
			(at 328.295 225.425 0)
		)
		(property "Footprint" ""
			(at 327.66 229.87 0)
		)
		(property "Datasheet" ""
			(at 327.66 229.87 0)
		)
		(property "Description" ""
			(at 327.66 229.87 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05101")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0234")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_0")
		(at 224.79 80.01 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U5026"
			(at 226.06 83.82 0)
		)
		(property "Value" "+0V8"
			(at 227.965 80.01 90)
		)
		(property "Footprint" ""
			(at 224.79 80.01 0)
		)
		(property "Datasheet" ""
			(at 224.79 80.01 0)
		)
		(property "Description" ""
			(at 224.79 80.01 0)
		)
		(property "Distributor" "-"
			(at 224.79 80.01 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "U5026")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U37")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 280.67 194.31 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05078"
			(at 280.67 200.66 0)
		)
		(property "Value" "GND_0"
			(at 280.67 199.39 0)
		)
		(property "Footprint" ""
			(at 280.67 194.31 0)
		)
		(property "Datasheet" ""
			(at 280.67 194.31 0)
		)
		(property "Description" ""
			(at 280.67 194.31 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05078")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0211")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 118.11 200.66 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR078"
			(at 118.11 207.01 0)
		)
		(property "Value" "GND_0"
			(at 118.11 205.74 0)
		)
		(property "Footprint" ""
			(at 118.11 200.66 0)
		)
		(property "Datasheet" ""
			(at 118.11 200.66 0)
		)
		(property "Description" ""
			(at 118.11 200.66 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR078")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_0")
		(at 245.11 222.25 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05053"
			(at 245.11 226.06 0)
		)
		(property "Value" "+1V2_0"
			(at 245.11 217.805 0)
		)
		(property "Footprint" ""
			(at 245.11 222.25 0)
		)
		(property "Datasheet" ""
			(at 245.11 222.25 0)
		)
		(property "Description" ""
			(at 245.11 222.25 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05053")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0188")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 220.98 92.71 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05122"
			(at 220.98 99.06 0)
		)
		(property "Value" "GND_0"
			(at 220.98 97.79 0)
		)
		(property "Footprint" ""
			(at 220.98 92.71 0)
		)
		(property "Datasheet" ""
			(at 220.98 92.71 0)
		)
		(property "Description" ""
			(at 220.98 92.71 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05122")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0249")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_0")
		(at 124.46 213.36 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U5005"
			(at 128.27 212.09 0)
		)
		(property "Value" "+0V8"
			(at 121.285 209.55 0)
		)
		(property "Footprint" ""
			(at 124.46 213.36 0)
		)
		(property "Datasheet" ""
			(at 124.46 213.36 0)
		)
		(property "Description" ""
			(at 124.46 213.36 0)
		)
		(property "Distributor" "-"
			(at 124.46 213.36 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "U5005")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U17")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_0")
		(at 234.95 81.28 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR05124"
			(at 234.95 77.47 0)
		)
		(property "Value" "+1V8_0"
			(at 234.95 86.36 0)
		)
		(property "Footprint" ""
			(at 234.95 81.28 0)
		)
		(property "Datasheet" ""
			(at 234.95 81.28 0)
		)
		(property "Description" ""
			(at 234.95 81.28 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05124")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0251")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 41.91 88.9 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05008"
			(at 41.91 95.25 0)
		)
		(property "Value" "GND_0"
			(at 41.91 93.98 0)
		)
		(property "Footprint" ""
			(at 41.91 88.9 0)
		)
		(property "Datasheet" ""
			(at 41.91 88.9 0)
		)
		(property "Description" ""
			(at 41.91 88.9 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05008")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0147")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_0")
		(at 318.77 184.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR05098"
			(at 318.77 187.96 0)
		)
		(property "Value" "+1V8_0"
			(at 318.77 179.07 0)
		)
		(property "Footprint" ""
			(at 318.77 184.15 0)
		)
		(property "Datasheet" ""
			(at 318.77 184.15 0)
		)
		(property "Description" ""
			(at 318.77 184.15 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05098")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0231")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 226.06 40.64 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5059"
			(at 223.52 38.1 90)
		)
		(property "Value" "1µ"
			(at 224.79 41.275 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 226.06 40.64 0)
		)
		(property "Datasheet" ""
			(at 226.06 40.64 0)
		)
		(property "Description" ""
			(at 226.06 40.64 0)
		)
		(property "DK" ""
			(at 226.06 40.64 0)
		)
		(property "PARTNO" ""
			(at 226.06 40.64 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 226.06 40.64 0)
		)
		(property "Distributor" "D"
			(at 226.06 40.64 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 226.06 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5059")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C95")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 80.01 40.64 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5007"
			(at 77.47 38.1 90)
		)
		(property "Value" "1µ"
			(at 78.74 41.275 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 80.01 40.64 0)
		)
		(property "Datasheet" ""
			(at 80.01 40.64 0)
		)
		(property "Description" ""
			(at 80.01 40.64 0)
		)
		(property "DK" ""
			(at 80.01 40.64 0)
		)
		(property "PARTNO" ""
			(at 80.01 40.64 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 80.01 40.64 0)
		)
		(property "Distributor" "D"
			(at 80.01 40.64 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 80.01 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5007")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C44")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_0")
		(at 238.76 184.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U5013"
			(at 242.57 182.88 0)
		)
		(property "Value" "+0V8"
			(at 238.76 180.975 90)
		)
		(property "Footprint" ""
			(at 238.76 184.15 0)
		)
		(property "Datasheet" ""
			(at 238.76 184.15 0)
		)
		(property "Description" ""
			(at 238.76 184.15 0)
		)
		(property "Distributor" "-"
			(at 238.76 184.15 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "U5013")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U25")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 181.61 92.71 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05119"
			(at 181.61 99.06 0)
		)
		(property "Value" "GND_0"
			(at 181.61 97.79 0)
		)
		(property "Footprint" ""
			(at 181.61 92.71 0)
		)
		(property "Datasheet" ""
			(at 181.61 92.71 0)
		)
		(property "Description" ""
			(at 181.61 92.71 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05119")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0246")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_0")
		(at 88.9 26.67 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05021"
			(at 88.9 30.48 0)
		)
		(property "Value" "+1V2_0"
			(at 88.9 22.225 0)
		)
		(property "Footprint" ""
			(at 88.9 26.67 0)
		)
		(property "Datasheet" ""
			(at 88.9 26.67 0)
		)
		(property "Description" ""
			(at 88.9 26.67 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05021")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0160")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 375.92 229.87 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05110"
			(at 375.92 236.22 0)
		)
		(property "Value" "GND_0"
			(at 375.92 234.95 0)
		)
		(property "Footprint" ""
			(at 375.92 229.87 0)
		)
		(property "Datasheet" ""
			(at 375.92 229.87 0)
		)
		(property "Description" ""
			(at 375.92 229.87 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05110")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0242")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 245.11 232.41 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05054"
			(at 245.11 238.76 0)
		)
		(property "Value" "GND_0"
			(at 245.11 237.49 0)
		)
		(property "Footprint" ""
			(at 245.11 232.41 0)
		)
		(property "Datasheet" ""
			(at 245.11 232.41 0)
		)
		(property "Description" ""
			(at 245.11 232.41 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05054")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0189")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:NCP114-SN")
		(at 106.68 217.17 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U5003"
			(at 106.68 207.645 0)
		)
		(property "Value" "NCP114ASN080T1G"
			(at 106.68 210.185 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5"
			(at 106.68 217.17 0)
		)
		(property "Datasheet" ""
			(at 106.68 217.17 0)
		)
		(property "Description" ""
			(at 106.68 217.17 0)
		)
		(property "Distributor" "D"
			(at 106.68 217.17 0)
		)
		(property "Manufacturer" "NCP114ASN080T1G"
			(at 106.68 217.17 0)
		)
		(property "OrderNr" "488-NCP114ASN080T1GCT-ND"
			(at 106.68 217.17 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "5")
		(instances
			(project "flex1"
				(path
					(reference "U5003")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U15")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_0")
		(at 233.68 184.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U5012"
			(at 237.49 182.88 0)
		)
		(property "Value" "+0V8"
			(at 233.68 180.975 90)
		)
		(property "Footprint" ""
			(at 233.68 184.15 0)
		)
		(property "Datasheet" ""
			(at 233.68 184.15 0)
		)
		(property "Description" ""
			(at 233.68 184.15 0)
		)
		(property "Distributor" "-"
			(at 233.68 184.15 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "U5012")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U24")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 130.81 40.64 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5015"
			(at 133.35 38.1 90)
		)
		(property "Value" "1µ"
			(at 132.08 41.275 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 130.81 40.64 0)
		)
		(property "Datasheet" ""
			(at 130.81 40.64 0)
		)
		(property "Description" ""
			(at 130.81 40.64 0)
		)
		(property "DK" ""
			(at 130.81 40.64 0)
		)
		(property "PARTNO" ""
			(at 130.81 40.64 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 130.81 40.64 0)
		)
		(property "Distributor" "D"
			(at 130.81 40.64 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 130.81 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5015")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C52")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_0")
		(at 148.59 82.55 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR05047"
			(at 148.59 78.74 0)
		)
		(property "Value" "+1V8_0"
			(at 148.59 87.63 0)
		)
		(property "Footprint" ""
			(at 148.59 82.55 0)
		)
		(property "Datasheet" ""
			(at 148.59 82.55 0)
		)
		(property "Description" ""
			(at 148.59 82.55 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05047")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0183")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 142.24 40.64 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5020"
			(at 139.7 38.1 90)
		)
		(property "Value" "1µ"
			(at 140.97 41.275 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 142.24 40.64 0)
		)
		(property "Datasheet" ""
			(at 142.24 40.64 0)
		)
		(property "Description" ""
			(at 142.24 40.64 0)
		)
		(property "DK" ""
			(at 142.24 40.64 0)
		)
		(property "PARTNO" ""
			(at 142.24 40.64 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 142.24 40.64 0)
		)
		(property "Distributor" "D"
			(at 142.24 40.64 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 142.24 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5020")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C57")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 200.66 92.71 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05121"
			(at 200.66 99.06 0)
		)
		(property "Value" "GND_0"
			(at 200.66 97.79 0)
		)
		(property "Footprint" ""
			(at 200.66 92.71 0)
		)
		(property "Datasheet" ""
			(at 200.66 92.71 0)
		)
		(property "Description" ""
			(at 200.66 92.71 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05121")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0248")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_EXT")
		(at 349.25 229.87 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR05104"
			(at 349.25 236.22 0)
		)
		(property "Value" "GND_EXT"
			(at 347.345 234.315 0)
		)
		(property "Footprint" ""
			(at 349.25 229.87 0)
		)
		(property "Datasheet" ""
			(at 349.25 229.87 0)
		)
		(property "Description" ""
			(at 349.25 229.87 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05104")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0237")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_0")
		(at 295.91 184.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR05089"
			(at 295.91 187.96 0)
		)
		(property "Value" "+1V8_0"
			(at 295.91 179.07 0)
		)
		(property "Footprint" ""
			(at 295.91 184.15 0)
		)
		(property "Datasheet" ""
			(at 295.91 184.15 0)
		)
		(property "Description" ""
			(at 295.91 184.15 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05089")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0222")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 238.76 40.64 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5060"
			(at 236.22 38.1 90)
		)
		(property "Value" "1µ"
			(at 237.49 41.275 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 238.76 40.64 0)
		)
		(property "Datasheet" ""
			(at 238.76 40.64 0)
		)
		(property "Description" ""
			(at 238.76 40.64 0)
		)
		(property "DK" ""
			(at 238.76 40.64 0)
		)
		(property "PARTNO" ""
			(at 238.76 40.64 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 238.76 40.64 0)
		)
		(property "Distributor" "D"
			(at 238.76 40.64 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 238.76 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5060")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C96")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 204.47 232.41 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05030"
			(at 204.47 238.76 0)
		)
		(property "Value" "GND_0"
			(at 204.47 237.49 0)
		)
		(property "Footprint" ""
			(at 204.47 232.41 0)
		)
		(property "Datasheet" ""
			(at 204.47 232.41 0)
		)
		(property "Description" ""
			(at 204.47 232.41 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05030")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0168")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+V_IF_0")
		(at 39.37 118.11 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR089"
			(at 35.56 118.11 0)
		)
		(property "Value" "+V_IF_0"
			(at 43.18 118.1099 90)
		)
		(property "Footprint" ""
			(at 39.37 118.11 0)
		)
		(property "Datasheet" ""
			(at 39.37 118.11 0)
		)
		(property "Description" ""
			(at 39.37 118.11 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR089")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 238.76 189.23 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5024"
			(at 236.22 191.77 90)
		)
		(property "Value" "1µ"
			(at 239.395 190.5 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 238.76 189.23 0)
		)
		(property "Datasheet" ""
			(at 238.76 189.23 0)
		)
		(property "Description" ""
			(at 238.76 189.23 0)
		)
		(property "DK" ""
			(at 238.76 189.23 0)
		)
		(property "PARTNO" ""
			(at 238.76 189.23 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 238.76 189.23 0)
		)
		(property "Distributor" "D"
			(at 238.76 189.23 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 238.76 189.23 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5024")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C61")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_0")
		(at 200.66 38.1 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05120"
			(at 200.66 41.91 0)
		)
		(property "Value" "+1V2_0"
			(at 200.66 33.655 0)
		)
		(property "Footprint" ""
			(at 200.66 38.1 0)
		)
		(property "Datasheet" ""
			(at 200.66 38.1 0)
		)
		(property "Description" ""
			(at 200.66 38.1 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05120")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0247")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 288.29 189.23 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5041"
			(at 289.56 187.325 0)
		)
		(property "Value" "1µ"
			(at 289.56 192.405 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 288.29 189.23 0)
		)
		(property "Datasheet" ""
			(at 288.29 189.23 0)
		)
		(property "Description" ""
			(at 288.29 189.23 0)
		)
		(property "DK" ""
			(at 288.29 189.23 0)
		)
		(property "PARTNO" ""
			(at 288.29 189.23 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 288.29 189.23 0)
		)
		(property "Distributor" "D"
			(at 288.29 189.23 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 288.29 189.23 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5041")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C78")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_0")
		(at 39.37 113.03 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0134"
			(at 35.56 113.03 0)
		)
		(property "Value" "+1V2_0"
			(at 43.18 113.03 90)
		)
		(property "Footprint" ""
			(at 39.37 113.03 0)
		)
		(property "Datasheet" ""
			(at 39.37 113.03 0)
		)
		(property "Description" ""
			(at 39.37 113.03 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0134")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_0")
		(at 232.41 222.25 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05044"
			(at 232.41 226.06 0)
		)
		(property "Value" "+1V2_0"
			(at 232.41 217.805 0)
		)
		(property "Footprint" ""
			(at 232.41 222.25 0)
		)
		(property "Datasheet" ""
			(at 232.41 222.25 0)
		)
		(property "Description" ""
			(at 232.41 222.25 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05044")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0180")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 105.41 92.71 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05025"
			(at 105.41 99.06 0)
		)
		(property "Value" "GND_0"
			(at 105.41 97.79 0)
		)
		(property "Footprint" ""
			(at 105.41 92.71 0)
		)
		(property "Datasheet" ""
			(at 105.41 92.71 0)
		)
		(property "Description" ""
			(at 105.41 92.71 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05025")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0164")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_0")
		(at 41.91 78.74 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05007"
			(at 41.91 82.55 0)
		)
		(property "Value" "+1V8_0"
			(at 41.91 73.66 0)
		)
		(property "Footprint" ""
			(at 41.91 78.74 0)
		)
		(property "Datasheet" ""
			(at 41.91 78.74 0)
		)
		(property "Description" ""
			(at 41.91 78.74 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05007")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0146")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_0")
		(at 217.17 184.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U5009"
			(at 220.98 182.88 0)
		)
		(property "Value" "+0V8"
			(at 217.17 180.975 90)
		)
		(property "Footprint" ""
			(at 217.17 184.15 0)
		)
		(property "Datasheet" ""
			(at 217.17 184.15 0)
		)
		(property "Description" ""
			(at 217.17 184.15 0)
		)
		(property "Distributor" "-"
			(at 217.17 184.15 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "U5009")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U21")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_0")
		(at 128.27 82.55 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR05035"
			(at 124.46 82.55 0)
		)
		(property "Value" "+1V8_0"
			(at 134.62 82.55 90)
		)
		(property "Footprint" ""
			(at 128.27 82.55 0)
		)
		(property "Datasheet" ""
			(at 128.27 82.55 0)
		)
		(property "Description" ""
			(at 128.27 82.55 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05035")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0172")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+0V8_0")
		(at 128.27 80.01 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board no)
		(dnp no)
		(property "Reference" "U5008"
			(at 129.54 83.82 0)
		)
		(property "Value" "+0V8"
			(at 131.445 80.01 90)
		)
		(property "Footprint" ""
			(at 128.27 80.01 0)
		)
		(property "Datasheet" ""
			(at 128.27 80.01 0)
		)
		(property "Description" ""
			(at 128.27 80.01 0)
		)
		(property "Distributor" "-"
			(at 128.27 80.01 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "U5008")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "U20")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 88.9 26.67 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#FLG05002"
			(at 88.9 28.575 0)
		)
		(property "Value" "PWR_FLAG"
			(at 88.9 31.115 0)
		)
		(property "Footprint" ""
			(at 88.9 26.67 0)
		)
		(property "Datasheet" "~"
			(at 88.9 26.67 0)
		)
		(property "Description" ""
			(at 88.9 26.67 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#FLG05002")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG04")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_0")
		(at 224.79 82.55 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR05123"
			(at 220.98 82.55 0)
		)
		(property "Value" "+1V8_0"
			(at 231.14 82.55 90)
		)
		(property "Footprint" ""
			(at 224.79 82.55 0)
		)
		(property "Datasheet" ""
			(at 224.79 82.55 0)
		)
		(property "Description" ""
			(at 224.79 82.55 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05123")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0250")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 217.17 189.23 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5016"
			(at 214.63 191.77 90)
		)
		(property "Value" "1µ"
			(at 217.805 190.5 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 217.17 189.23 0)
		)
		(property "Datasheet" ""
			(at 217.17 189.23 0)
		)
		(property "Description" ""
			(at 217.17 189.23 0)
		)
		(property "DK" ""
			(at 217.17 189.23 0)
		)
		(property "PARTNO" ""
			(at 217.17 189.23 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 217.17 189.23 0)
		)
		(property "Distributor" "D"
			(at 217.17 189.23 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 217.17 189.23 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5016")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C53")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 124.46 222.25 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5006"
			(at 125.73 220.345 0)
		)
		(property "Value" "1µ"
			(at 125.73 226.06 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 124.46 222.25 0)
		)
		(property "Datasheet" ""
			(at 124.46 222.25 0)
		)
		(property "Description" ""
			(at 124.46 222.25 0)
		)
		(property "DK" ""
			(at 124.46 222.25 0)
		)
		(property "PARTNO" ""
			(at 124.46 222.25 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 124.46 222.25 0)
		)
		(property "Distributor" "D"
			(at 124.46 222.25 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 124.46 222.25 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5006")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C43")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 280.67 232.41 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05080"
			(at 280.67 238.76 0)
		)
		(property "Value" "GND_0"
			(at 280.67 237.49 0)
		)
		(property "Footprint" ""
			(at 280.67 232.41 0)
		)
		(property "Datasheet" ""
			(at 280.67 232.41 0)
		)
		(property "Description" ""
			(at 280.67 232.41 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05080")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0213")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 232.41 232.41 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05045"
			(at 232.41 238.76 0)
		)
		(property "Value" "GND_0"
			(at 232.41 237.49 0)
		)
		(property "Footprint" ""
			(at 232.41 232.41 0)
		)
		(property "Datasheet" ""
			(at 232.41 232.41 0)
		)
		(property "Description" ""
			(at 232.41 232.41 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05045")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0181")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 189.23 40.64 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5057"
			(at 182.88 38.1 90)
		)
		(property "Value" "1µ"
			(at 184.15 41.275 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 189.23 40.64 0)
		)
		(property "Datasheet" ""
			(at 189.23 40.64 0)
		)
		(property "Description" ""
			(at 189.23 40.64 0)
		)
		(property "DK" ""
			(at 189.23 40.64 0)
		)
		(property "PARTNO" ""
			(at 189.23 40.64 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 189.23 40.64 0)
		)
		(property "Distributor" "D"
			(at 189.23 40.64 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 189.23 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5057")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C93")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 318.77 194.31 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05099"
			(at 318.77 200.66 0)
		)
		(property "Value" "GND_0"
			(at 318.77 199.39 0)
		)
		(property "Footprint" ""
			(at 318.77 194.31 0)
		)
		(property "Datasheet" ""
			(at 318.77 194.31 0)
		)
		(property "Description" ""
			(at 318.77 194.31 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05099")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0232")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 115.57 40.64 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5012"
			(at 112.395 38.1 90)
		)
		(property "Value" "1µ"
			(at 114.3 41.275 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 115.57 40.64 0)
		)
		(property "Datasheet" ""
			(at 115.57 40.64 0)
		)
		(property "Description" ""
			(at 115.57 40.64 0)
		)
		(property "DK" ""
			(at 115.57 40.64 0)
		)
		(property "PARTNO" ""
			(at 115.57 40.64 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 115.57 40.64 0)
		)
		(property "Distributor" "D"
			(at 115.57 40.64 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 115.57 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5012")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C49")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 142.24 148.59 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR05023"
			(at 142.24 154.94 0)
		)
		(property "Value" "GND_0"
			(at 142.24 153.67 0)
		)
		(property "Footprint" ""
			(at 142.24 148.59 0)
		)
		(property "Datasheet" ""
			(at 142.24 148.59 0)
		)
		(property "Description" ""
			(at 142.24 148.59 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05023")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0162")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 233.68 194.31 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05046"
			(at 233.68 200.66 0)
		)
		(property "Value" "GND_0"
			(at 233.68 199.39 0)
		)
		(property "Footprint" ""
			(at 233.68 194.31 0)
		)
		(property "Datasheet" ""
			(at 233.68 194.31 0)
		)
		(property "Description" ""
			(at 233.68 194.31 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05046")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0182")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 288.29 194.31 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05084"
			(at 288.29 200.66 0)
		)
		(property "Value" "GND_0"
			(at 288.29 199.39 0)
		)
		(property "Footprint" ""
			(at 288.29 194.31 0)
		)
		(property "Datasheet" ""
			(at 288.29 194.31 0)
		)
		(property "Description" ""
			(at 288.29 194.31 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05084")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0217")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 124.46 92.71 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05032"
			(at 124.46 99.06 0)
		)
		(property "Value" "GND_0"
			(at 124.46 97.79 0)
		)
		(property "Footprint" ""
			(at 124.46 92.71 0)
		)
		(property "Datasheet" ""
			(at 124.46 92.71 0)
		)
		(property "Description" ""
			(at 124.46 92.71 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05032")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0169")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 318.77 189.23 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5049"
			(at 320.04 187.325 0)
		)
		(property "Value" "1µ"
			(at 320.04 192.405 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 318.77 189.23 0)
		)
		(property "Datasheet" ""
			(at 318.77 189.23 0)
		)
		(property "Description" ""
			(at 318.77 189.23 0)
		)
		(property "DK" ""
			(at 318.77 189.23 0)
		)
		(property "PARTNO" ""
			(at 318.77 189.23 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 318.77 189.23 0)
		)
		(property "Distributor" "D"
			(at 318.77 189.23 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 318.77 189.23 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5049")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C86")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 106.68 228.6 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05012"
			(at 106.68 234.95 0)
		)
		(property "Value" "GND_0"
			(at 106.68 233.68 0)
		)
		(property "Footprint" ""
			(at 106.68 228.6 0)
		)
		(property "Datasheet" ""
			(at 106.68 228.6 0)
		)
		(property "Description" ""
			(at 106.68 228.6 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05012")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0151")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 349.25 229.87 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#FLG05005"
			(at 349.25 227.965 0)
		)
		(property "Value" "PWR_FLAG"
			(at 346.71 225.425 0)
		)
		(property "Footprint" ""
			(at 349.25 229.87 0)
		)
		(property "Datasheet" "~"
			(at 349.25 229.87 0)
		)
		(property "Description" ""
			(at 349.25 229.87 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#FLG05005")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#FLG07")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_0")
		(at 217.17 222.25 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05037"
			(at 217.17 226.06 0)
		)
		(property "Value" "+1V2_0"
			(at 217.17 217.805 0)
		)
		(property "Footprint" ""
			(at 217.17 222.25 0)
		)
		(property "Datasheet" ""
			(at 217.17 222.25 0)
		)
		(property "Description" ""
			(at 217.17 222.25 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05037")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0174")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 222.25 189.23 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5018"
			(at 219.71 191.77 90)
		)
		(property "Value" "1µ"
			(at 222.885 190.5 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 222.25 189.23 0)
		)
		(property "Datasheet" ""
			(at 222.25 189.23 0)
		)
		(property "Description" ""
			(at 222.25 189.23 0)
		)
		(property "DK" ""
			(at 222.25 189.23 0)
		)
		(property "PARTNO" ""
			(at 222.25 189.23 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 222.25 189.23 0)
		)
		(property "Distributor" "D"
			(at 222.25 189.23 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 222.25 189.23 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5018")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C55")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V8_0")
		(at 280.67 184.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR05077"
			(at 280.67 187.96 0)
		)
		(property "Value" "+1V8_0"
			(at 280.67 179.07 0)
		)
		(property "Footprint" ""
			(at 280.67 184.15 0)
		)
		(property "Datasheet" ""
			(at 280.67 184.15 0)
		)
		(property "Description" ""
			(at 280.67 184.15 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05077")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0210")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 217.17 232.41 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05038"
			(at 217.17 238.76 0)
		)
		(property "Value" "GND_0"
			(at 217.17 237.49 0)
		)
		(property "Footprint" ""
			(at 217.17 232.41 0)
		)
		(property "Datasheet" ""
			(at 217.17 232.41 0)
		)
		(property "Description" ""
			(at 217.17 232.41 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05038")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0175")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+1V2_0")
		(at 105.41 38.1 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05024"
			(at 105.41 41.91 0)
		)
		(property "Value" "+1V2_0"
			(at 105.41 33.655 0)
		)
		(property "Footprint" ""
			(at 105.41 38.1 0)
		)
		(property "Datasheet" ""
			(at 105.41 38.1 0)
		)
		(property "Description" ""
			(at 105.41 38.1 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05024")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0163")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 67.31 40.64 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5005"
			(at 64.77 38.1 90)
		)
		(property "Value" "1µ"
			(at 66.04 41.275 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 67.31 40.64 0)
		)
		(property "Datasheet" ""
			(at 67.31 40.64 0)
		)
		(property "Description" ""
			(at 67.31 40.64 0)
		)
		(property "DK" ""
			(at 67.31 40.64 0)
		)
		(property "PARTNO" ""
			(at 67.31 40.64 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 67.31 40.64 0)
		)
		(property "Distributor" "D"
			(at 67.31 40.64 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 67.31 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5005")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C42")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 41.91 85.09 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5003"
			(at 40.64 83.185 90)
		)
		(property "Value" "100n"
			(at 40.64 92.075 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 41.91 85.09 0)
		)
		(property "Datasheet" ""
			(at 41.91 85.09 0)
		)
		(property "Description" ""
			(at 41.91 85.09 0)
		)
		(property "DK" ""
			(at 41.91 85.09 0)
		)
		(property "PARTNO" ""
			(at 41.91 85.09 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 41.91 85.09 0)
		)
		(property "Distributor" "D"
			(at 41.91 85.09 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 41.91 85.09 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5003")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C40")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 87.63 228.6 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05006"
			(at 87.63 234.95 0)
		)
		(property "Value" "GND_0"
			(at 87.63 233.68 0)
		)
		(property "Footprint" ""
			(at 87.63 228.6 0)
		)
		(property "Datasheet" ""
			(at 87.63 228.6 0)
		)
		(property "Description" ""
			(at 87.63 228.6 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05006")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0145")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 39.37 115.57 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0135"
			(at 45.72 115.57 0)
		)
		(property "Value" "GND_0"
			(at 43.18 115.57 90)
		)
		(property "Footprint" ""
			(at 39.37 115.57 0)
		)
		(property "Datasheet" ""
			(at 39.37 115.57 0)
		)
		(property "Description" ""
			(at 39.37 115.57 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0135")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_0")
		(at 222.25 194.31 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05039"
			(at 222.25 200.66 0)
		)
		(property "Value" "GND_0"
			(at 222.25 199.39 0)
		)
		(property "Footprint" ""
			(at 222.25 194.31 0)
		)
		(property "Datasheet" ""
			(at 222.25 194.31 0)
		)
		(property "Description" ""
			(at 222.25 194.31 0)
		)
		(pin "1")
		(instances
			(project "flex1"
				(path
					(reference "#PWR05039")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR0176")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 87.63 220.98 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5002"
			(at 88.9 219.075 0)
		)
		(property "Value" "100n"
			(at 88.9 224.79 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 87.63 220.98 0)
		)
		(property "Datasheet" ""
			(at 87.63 220.98 0)
		)
		(property "Description" ""
			(at 87.63 220.98 0)
		)
		(property "DK" ""
			(at 87.63 220.98 0)
		)
		(property "PARTNO" ""
			(at 87.63 220.98 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 87.63 220.98 0)
		)
		(property "Distributor" "D"
			(at 87.63 220.98 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 87.63 220.98 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5002")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C39")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 95.25 40.64 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5009"
			(at 88.9 38.1 90)
		)
		(property "Value" "1µ"
			(at 90.17 41.275 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 95.25 40.64 0)
		)
		(property "Datasheet" ""
			(at 95.25 40.64 0)
		)
		(property "Description" ""
			(at 95.25 40.64 0)
		)
		(property "DK" ""
			(at 95.25 40.64 0)
		)
		(property "PARTNO" ""
			(at 95.25 40.64 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 95.25 40.64 0)
		)
		(property "Distributor" "D"
			(at 95.25 40.64 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 95.25 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5009")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C46")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_IF_0")
		(at 148.59 148.59 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0165"
			(at 148.59 154.94 0)
		)
		(property "Value" "GND_IF_0"
			(at 148.59 153.67 0)
		)
		(property "Footprint" ""
			(at 148.59 148.59 0)
		)
		(property "Datasheet" ""
			(at 148.59 148.59 0)
		)
		(property "Description" ""
			(at 148.59 148.59 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0165")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 148.59 142.24 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5011"
			(at 149.86 140.335 0)
		)
		(property "Value" "100n"
			(at 149.86 146.05 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 148.59 142.24 0)
		)
		(property "Datasheet" ""
			(at 148.59 142.24 0)
		)
		(property "Description" ""
			(at 148.59 142.24 0)
		)
		(property "DK" ""
			(at 148.59 142.24 0)
		)
		(property "PARTNO" ""
			(at 148.59 142.24 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 148.59 142.24 0)
		)
		(property "Distributor" "D"
			(at 148.59 142.24 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 148.59 142.24 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5011")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C48")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 280.67 227.33 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5039"
			(at 281.305 225.425 0)
		)
		(property "Value" "100n"
			(at 281.94 231.14 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 280.67 227.33 0)
		)
		(property "Datasheet" ""
			(at 280.67 227.33 0)
		)
		(property "Description" ""
			(at 280.67 227.33 0)
		)
		(property "DK" ""
			(at 280.67 227.33 0)
		)
		(property "PARTNO" ""
			(at 280.67 227.33 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 280.67 227.33 0)
		)
		(property "Distributor" "D"
			(at 280.67 227.33 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 280.67 227.33 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5039")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C76")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 153.67 40.64 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5026"
			(at 151.13 38.1 90)
		)
		(property "Value" "1µ"
			(at 152.4 41.275 90)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 153.67 40.64 0)
		)
		(property "Datasheet" ""
			(at 153.67 40.64 0)
		)
		(property "Description" ""
			(at 153.67 40.64 0)
		)
		(property "DK" ""
			(at 153.67 40.64 0)
		)
		(property "PARTNO" ""
			(at 153.67 40.64 0)
		)
		(property "Manufacturer" "CC0603KRX7R7BB105"
			(at 153.67 40.64 0)
		)
		(property "Distributor" "D"
			(at 153.67 40.64 0)
		)
		(property "OrderNr" "311-1446-1-ND"
			(at 153.67 40.64 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "flex1"
				(path
					(reference "C5026")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C63")
					(unit 1)
				)
			)
		)
	)
)
