(kicad_sch
	(version 20231120)
	(generator "eeschema")
	(generator_version "8.0")
	(paper "A3")
	(lib_symbols
		(symbol "Comparator:LM339"
			(pin_names
				(offset 0.127)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at 0 5.08 0)
			)
			(property "Value" "LM339"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at -1.27 2.54 0)
			)
			(property "Datasheet" "https://www.st.com/resource/en/datasheet/lm139.pdf"
				(at 1.27 5.08 0)
			)
			(property "Description" "Quad Differential Comparators, SOIC-14/TSSOP-14"
				(at 0 0 0)
			)
			(property "ki_locked" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "cmp open collector"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOIC*3.9x8.7mm*P1.27mm* TSSOP*4.4x5mm*P0.65mm*"
				(at 0 0 0)
			)
			(symbol "LM339_1_1"
				(polyline
					(pts
						(xy -5.08 5.08) (xy 5.08 0) (xy -5.08 -5.08) (xy -5.08 5.08)
					)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy 3.302 -0.508) (xy 2.794 -0.508) (xy 3.302 0) (xy 2.794 0.508) (xy 2.286 0) (xy 2.794 -0.508)
						(xy 2.286 -0.508)
					)
					(fill
						(type none)
					)
				)
				(pin open_collector line
					(at 7.62 0 180)
					(length 2.54)
					(name "~")
					(number "2")
				)
				(pin input line
					(at -7.62 -2.54 0)
					(length 2.54)
					(name "-")
					(number "4")
				)
				(pin input line
					(at -7.62 2.54 0)
					(length 2.54)
					(name "+")
					(number "5")
				)
			)
			(symbol "LM339_2_1"
				(polyline
					(pts
						(xy -5.08 5.08) (xy 5.08 0) (xy -5.08 -5.08) (xy -5.08 5.08)
					)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy 3.302 -0.508) (xy 2.794 -0.508) (xy 3.302 0) (xy 2.794 0.508) (xy 2.286 0) (xy 2.794 -0.508)
						(xy 2.286 -0.508)
					)
					(fill
						(type none)
					)
				)
				(pin open_collector line
					(at 7.62 0 180)
					(length 2.54)
					(name "~")
					(number "1")
				)
				(pin input line
					(at -7.62 -2.54 0)
					(length 2.54)
					(name "-")
					(number "6")
				)
				(pin input line
					(at -7.62 2.54 0)
					(length 2.54)
					(name "+")
					(number "7")
				)
			)
			(symbol "LM339_3_1"
				(polyline
					(pts
						(xy -5.08 5.08) (xy 5.08 0) (xy -5.08 -5.08) (xy -5.08 5.08)
					)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy 3.302 -0.508) (xy 2.794 -0.508) (xy 3.302 0) (xy 2.794 0.508) (xy 2.286 0) (xy 2.794 -0.508)
						(xy 2.286 -0.508)
					)
					(fill
						(type none)
					)
				)
				(pin input line
					(at -7.62 -2.54 0)
					(length 2.54)
					(name "-")
					(number "10")
				)
				(pin input line
					(at -7.62 2.54 0)
					(length 2.54)
					(name "+")
					(number "11")
				)
				(pin open_collector line
					(at 7.62 0 180)
					(length 2.54)
					(name "~")
					(number "13")
				)
			)
			(symbol "LM339_4_1"
				(polyline
					(pts
						(xy -5.08 5.08) (xy 5.08 0) (xy -5.08 -5.08) (xy -5.08 5.08)
					)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy 3.302 -0.508) (xy 2.794 -0.508) (xy 3.302 0) (xy 2.794 0.508) (xy 2.286 0) (xy 2.794 -0.508)
						(xy 2.286 -0.508)
					)
					(fill
						(type none)
					)
				)
				(pin open_collector line
					(at 7.62 0 180)
					(length 2.54)
					(name "~")
					(number "14")
				)
				(pin input line
					(at -7.62 -2.54 0)
					(length 2.54)
					(name "-")
					(number "8")
				)
				(pin input line
					(at -7.62 2.54 0)
					(length 2.54)
					(name "+")
					(number "9")
				)
			)
			(symbol "LM339_5_1"
				(pin power_in line
					(at -2.54 -7.62 90)
					(length 3.81)
					(name "V-")
					(number "12")
				)
				(pin power_in line
					(at -2.54 7.62 270)
					(length 3.81)
					(name "V+")
					(number "3")
				)
			)
		)
		(symbol "Device:C"
			(pin_numbers hide)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Unpolarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C_*"
				(at 0 0 0)
			)
			(symbol "C_0_1"
				(polyline
					(pts
						(xy -2.032 -0.762) (xy 2.032 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.032 0.762) (xy 2.032 0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:R"
			(pin_numbers hide)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 2.032 0 90)
			)
			(property "Value" "R"
				(at 0 0 90)
			)
			(property "Footprint" ""
				(at -1.778 0 90)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Resistor"
				(at 0 0 0)
			)
			(property "ki_keywords" "R res resistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R_0_1"
				(rectangle
					(start -1.016 -2.54)
					(end 1.016 2.54)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:R_Potentiometer_Small"
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "RV"
				(at -4.445 0 90)
			)
			(property "Value" "R_Potentiometer_Small"
				(at -2.54 0 90)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Potentiometer"
				(at 0 0 0)
			)
			(property "ki_keywords" "resistor variable"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Potentiometer*"
				(at 0 0 0)
			)
			(symbol "R_Potentiometer_Small_0_1"
				(polyline
					(pts
						(xy 0.889 0) (xy 0.635 0) (xy 1.651 0.381) (xy 1.651 -0.381) (xy 0.635 0) (xy 0.889 0)
					)
					(fill
						(type outline)
					)
				)
				(rectangle
					(start 0.762 1.8034)
					(end -0.762 -1.8034)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_Potentiometer_Small_1_1"
				(pin passive line
					(at 0 2.54 270)
					(length 0.635)
					(name "1")
					(number "1")
				)
				(pin passive line
					(at 2.54 0 180)
					(length 0.9906)
					(name "2")
					(number "2")
				)
				(pin passive line
					(at 0 -2.54 90)
					(length 0.635)
					(name "3")
					(number "3")
				)
			)
		)
		(symbol "Device:R_Small"
			(pin_numbers hide)
			(pin_names
				(offset 0.254) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 0.762 0.508 0)
			)
			(property "Value" "R_Small"
				(at 0.762 -1.016 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Resistor, small symbol"
				(at 0 0 0)
			)
			(property "ki_keywords" "R resistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R_Small_0_1"
				(rectangle
					(start -0.762 1.778)
					(end 0.762 -1.778)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_Small_1_1"
				(pin passive line
					(at 0 2.54 270)
					(length 0.762)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -2.54 90)
					(length 0.762)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Jumper:SolderJumper_2_Open"
			(pin_names
				(offset 0) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "JP"
				(at 0 2.032 0)
			)
			(property "Value" "SolderJumper_2_Open"
				(at 0 -2.54 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Solder Jumper, 2-pole, open"
				(at 0 0 0)
			)
			(property "ki_keywords" "solder jumper SPST"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SolderJumper*Open*"
				(at 0 0 0)
			)
			(symbol "SolderJumper_2_Open_0_1"
				(arc
					(start -0.254 1.016)
					(mid -1.2656 0)
					(end -0.254 -1.016)
					(fill
						(type none)
					)
				)
				(arc
					(start -0.254 1.016)
					(mid -1.2656 0)
					(end -0.254 -1.016)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy -0.254 1.016) (xy -0.254 -1.016)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.254 1.016) (xy 0.254 -1.016)
					)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.254 -1.016)
					(mid 1.2656 0)
					(end 0.254 1.016)
					(fill
						(type none)
					)
				)
				(arc
					(start 0.254 -1.016)
					(mid 1.2656 0)
					(end 0.254 1.016)
					(fill
						(type outline)
					)
				)
			)
			(symbol "SolderJumper_2_Open_1_1"
				(pin passive line
					(at -3.81 0 0)
					(length 2.54)
					(name "A")
					(number "1")
				)
				(pin passive line
					(at 3.81 0 180)
					(length 2.54)
					(name "B")
					(number "2")
				)
			)
		)
		(symbol "Reference_Voltage:ISL21070CIH320Z-TK"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -0.635 8.255 0)
			)
			(property "Value" "ISL21070CIH320Z-TK"
				(at -1.905 6.35 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:SOT-23"
				(at 12.7 -6.35 0)
			)
			(property "Datasheet" "http://www.intersil.com/content/dam/Intersil/documents/fn75/fn7599.pdf"
				(at 0 0 0)
			)
			(property "Description" "2.0V 25μA Micropower Voltage Reference, SOT-23"
				(at 0 0 0)
			)
			(property "ki_keywords" "Micropower Voltage Reference 2.0V"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOT?23*"
				(at 0 0 0)
			)
			(symbol "ISL21070CIH320Z-TK_0_1"
				(rectangle
					(start -5.08 5.08)
					(end 5.08 -5.08)
					(fill
						(type background)
					)
				)
			)
			(symbol "ISL21070CIH320Z-TK_1_1"
				(pin power_in line
					(at -2.54 7.62 270)
					(length 2.54)
					(name "Vin")
					(number "1")
				)
				(pin power_out line
					(at 7.62 0 180)
					(length 2.54)
					(name "Vout")
					(number "2")
				)
				(pin power_in line
					(at -2.54 -7.62 90)
					(length 2.54)
					(name "GND")
					(number "3")
				)
			)
		)
		(symbol "mylib7:+3V3_IF"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR07"
				(at 0 -3.81 0)
			)
			(property "Value" "+3V3_IF"
				(at 0 5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+3V3\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+3V3_IF_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+3V3_IF_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+3V3_IF")
					(number "1")
				)
			)
		)
		(symbol "mylib7:+5V_PWR"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR020"
				(at 0 -3.81 0)
			)
			(property "Value" "+5V_PWR"
				(at 0 4.445 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+1V2\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+5V_PWR_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+5V_PWR_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+5V_PWR")
					(number "1")
				)
			)
		)
		(symbol "mylib7:GND_IF"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR08"
				(at 0 -6.35 0)
			)
			(property "Value" "GND_IF"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_IF_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_IF_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND_IF")
					(number "1")
				)
			)
		)
		(symbol "mylib7:INA500-DCK"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at 3.81 7.62 0)
			)
			(property "Value" "INA500DCK"
				(at 7.62 -10.16 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:SOT-363_SC-70-6"
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "INA500-DCK_0_1"
				(rectangle
					(start -5.08 6.35)
					(end 7.62 -8.89)
					(fill
						(type none)
					)
				)
			)
			(symbol "INA500-DCK_1_1"
				(pin input line
					(at -7.62 2.54 0)
					(length 2.54)
					(name "IN+")
					(number "1")
				)
				(pin input line
					(at 1.27 -11.43 90)
					(length 2.54)
					(name "V-")
					(number "2")
				)
				(pin input line
					(at -7.62 -5.08 0)
					(length 2.54)
					(name "IN-")
					(number "3")
				)
				(pin input line
					(at 10.16 2.54 180)
					(length 2.54)
					(name "OUT")
					(number "4")
				)
				(pin input line
					(at 10.16 -5.08 180)
					(length 2.54)
					(name "REF")
					(number "5")
				)
				(pin input line
					(at 1.27 8.89 270)
					(length 2.54)
					(name "V+")
					(number "6")
				)
			)
		)
		(symbol "power:+3V3"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
			)
			(property "Value" "+3V3"
				(at 0 3.556 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+3V3\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+3V3_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+3V3_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+3V3")
					(number "1")
				)
			)
		)
		(symbol "power:GND"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -6.35 0)
			)
			(property "Value" "GND"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND")
					(number "1")
				)
			)
		)
	)
	(junction
		(at 166.37 173.99)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 223.52 173.99)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 132.08 210.82)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 194.31 132.08)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 265.43 215.9)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 270.51 168.91)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 299.72 129.54)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 166.37 91.44)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 266.7 68.58)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 133.35 86.36)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 166.37 99.06)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 133.35 127)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 132.08 168.91)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 223.52 132.08)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 265.43 132.08)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 223.52 91.44)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 223.52 215.9)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 270.51 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 265.43 173.99)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 166.37 215.9)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 166.37 139.7)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 166.37 181.61)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 270.51 127)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 270.51 86.36)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 274.32 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 167.64 156.21)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 194.31 215.9)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 194.31 173.99)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 299.72 171.45)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 167.64 114.3)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 265.43 91.44)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 166.37 223.52)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 168.91 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 166.37 132.08)
		(diameter 0)
		(color 0 0 0 0)
	)
	(no_connect
		(at 163.83 203.2)
	)
	(no_connect
		(at 163.83 208.28)
	)
	(no_connect
		(at 163.83 205.74)
	)
	(no_connect
		(at 163.83 198.12)
	)
	(no_connect
		(at 163.83 200.66)
	)
	(no_connect
		(at 163.83 210.82)
	)
	(bus_entry
		(at 118.11 114.3)
		(size -2.54 -2.54)
	)
	(bus_entry
		(at 118.11 158.75)
		(size -2.54 -2.54)
	)
	(bus_entry
		(at 186.69 78.74)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 186.69 168.91)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 118.11 163.83)
		(size -2.54 -2.54)
	)
	(bus_entry
		(at 113.03 114.3)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 186.69 163.83)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 186.69 73.66)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 186.69 119.38)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 186.69 124.46)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 186.69 76.2)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 118.11 116.84)
		(size -2.54 -2.54)
	)
	(bus_entry
		(at 186.69 81.28)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 113.03 156.21)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 186.69 114.3)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 113.03 198.12)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 113.03 127)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 118.11 210.82)
		(size -2.54 -2.54)
	)
	(bus_entry
		(at 186.69 86.36)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 118.11 168.91)
		(size -2.54 -2.54)
	)
	(bus_entry
		(at 118.11 124.46)
		(size -2.54 -2.54)
	)
	(bus_entry
		(at 118.11 166.37)
		(size -2.54 -2.54)
	)
	(bus_entry
		(at 186.69 121.92)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 118.11 208.28)
		(size -2.54 -2.54)
	)
	(bus_entry
		(at 186.69 127)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 118.11 121.92)
		(size -2.54 -2.54)
	)
	(bus_entry
		(at 118.11 161.29)
		(size -2.54 -2.54)
	)
	(bus_entry
		(at 186.69 156.21)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 118.11 205.74)
		(size -2.54 -2.54)
	)
	(bus_entry
		(at 186.69 116.84)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 118.11 156.21)
		(size -2.54 -2.54)
	)
	(bus_entry
		(at 186.69 158.75)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 113.03 168.91)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 118.11 200.66)
		(size -2.54 -2.54)
	)
	(bus_entry
		(at 186.69 83.82)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 113.03 210.82)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 186.69 161.29)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 118.11 127)
		(size -2.54 -2.54)
	)
	(bus_entry
		(at 186.69 166.37)
		(size 2.54 -2.54)
	)
	(bus_entry
		(at 118.11 203.2)
		(size -2.54 -2.54)
	)
	(bus_entry
		(at 118.11 198.12)
		(size -2.54 -2.54)
	)
	(bus_entry
		(at 118.11 119.38)
		(size -2.54 -2.54)
	)
	(wire
		(pts
			(xy 92.71 81.28) (xy 135.89 81.28)
		)
	)
	(wire
		(pts
			(xy 223.52 171.45) (xy 223.52 173.99)
		)
	)
	(wire
		(pts
			(xy 290.83 88.9) (xy 299.72 88.9)
		)
	)
	(wire
		(pts
			(xy 113.03 198.12) (xy 107.95 198.12)
		)
	)
	(wire
		(pts
			(xy 270.51 73.66) (xy 274.32 73.66)
		)
	)
	(wire
		(pts
			(xy 163.83 158.75) (xy 186.69 158.75)
		)
	)
	(wire
		(pts
			(xy 266.7 76.2) (xy 266.7 78.74)
		)
	)
	(wire
		(pts
			(xy 129.54 213.36) (xy 132.08 213.36)
		)
	)
	(wire
		(pts
			(xy 166.37 139.7) (xy 166.37 173.99)
		)
	)
	(wire
		(pts
			(xy 166.37 99.06) (xy 198.12 99.06)
		)
	)
	(wire
		(pts
			(xy 134.62 205.74) (xy 135.89 205.74)
		)
	)
	(bus
		(pts
			(xy 189.23 73.66) (xy 189.23 76.2)
		)
	)
	(wire
		(pts
			(xy 132.08 168.91) (xy 135.89 168.91)
		)
	)
	(wire
		(pts
			(xy 133.35 86.36) (xy 135.89 86.36)
		)
	)
	(wire
		(pts
			(xy 118.11 121.92) (xy 127 121.92)
		)
	)
	(wire
		(pts
			(xy 299.72 213.36) (xy 292.1 213.36)
		)
	)
	(wire
		(pts
			(xy 168.91 111.76) (xy 167.64 111.76)
		)
	)
	(wire
		(pts
			(xy 217.17 223.52) (xy 215.9 223.52)
		)
	)
	(bus
		(pts
			(xy 115.57 153.67) (xy 115.57 156.21)
		)
	)
	(wire
		(pts
			(xy 118.11 205.74) (xy 127 205.74)
		)
	)
	(bus
		(pts
			(xy 189.23 83.82) (xy 189.23 109.22)
		)
	)
	(wire
		(pts
			(xy 215.9 91.44) (xy 223.52 91.44)
		)
	)
	(wire
		(pts
			(xy 118.11 116.84) (xy 135.89 116.84)
		)
	)
	(wire
		(pts
			(xy 113.03 156.21) (xy 107.95 156.21)
		)
	)
	(wire
		(pts
			(xy 175.26 119.38) (xy 186.69 119.38)
		)
	)
	(bus
		(pts
			(xy 115.57 205.74) (xy 115.57 208.28)
		)
	)
	(bus
		(pts
			(xy 115.57 121.92) (xy 115.57 124.46)
		)
	)
	(wire
		(pts
			(xy 133.35 71.12) (xy 133.35 73.66)
		)
	)
	(bus
		(pts
			(xy 115.57 195.58) (xy 115.57 198.12)
		)
	)
	(wire
		(pts
			(xy 163.83 121.92) (xy 186.69 121.92)
		)
	)
	(wire
		(pts
			(xy 215.9 173.99) (xy 223.52 173.99)
		)
	)
	(wire
		(pts
			(xy 166.37 99.06) (xy 166.37 132.08)
		)
	)
	(wire
		(pts
			(xy 270.51 86.36) (xy 275.59 86.36)
		)
	)
	(wire
		(pts
			(xy 92.71 83.82) (xy 135.89 83.82)
		)
	)
	(wire
		(pts
			(xy 163.83 215.9) (xy 166.37 215.9)
		)
	)
	(wire
		(pts
			(xy 299.72 171.45) (xy 299.72 213.36)
		)
	)
	(wire
		(pts
			(xy 265.43 132.08) (xy 275.59 132.08)
		)
	)
	(wire
		(pts
			(xy 264.16 91.44) (xy 265.43 91.44)
		)
	)
	(wire
		(pts
			(xy 107.95 198.12) (xy 107.95 200.66)
		)
	)
	(wire
		(pts
			(xy 265.43 91.44) (xy 275.59 91.44)
		)
	)
	(wire
		(pts
			(xy 163.83 124.46) (xy 167.64 124.46)
		)
	)
	(wire
		(pts
			(xy 264.16 173.99) (xy 265.43 173.99)
		)
	)
	(wire
		(pts
			(xy 113.03 114.3) (xy 107.95 114.3)
		)
	)
	(bus
		(pts
			(xy 115.57 161.29) (xy 115.57 163.83)
		)
	)
	(bus
		(pts
			(xy 189.23 119.38) (xy 189.23 121.92)
		)
	)
	(bus
		(pts
			(xy 189.23 193.04) (xy 115.57 193.04)
		)
	)
	(wire
		(pts
			(xy 163.83 81.28) (xy 186.69 81.28)
		)
	)
	(wire
		(pts
			(xy 194.31 132.08) (xy 198.12 132.08)
		)
	)
	(bus
		(pts
			(xy 189.23 109.22) (xy 115.57 109.22)
		)
	)
	(bus
		(pts
			(xy 115.57 114.3) (xy 115.57 116.84)
		)
	)
	(wire
		(pts
			(xy 135.89 78.74) (xy 133.35 78.74)
		)
	)
	(wire
		(pts
			(xy 132.08 213.36) (xy 132.08 210.82)
		)
	)
	(bus
		(pts
			(xy 115.57 119.38) (xy 115.57 121.92)
		)
	)
	(wire
		(pts
			(xy 215.9 215.9) (xy 223.52 215.9)
		)
	)
	(wire
		(pts
			(xy 118.11 168.91) (xy 132.08 168.91)
		)
	)
	(wire
		(pts
			(xy 167.64 88.9) (xy 166.37 88.9)
		)
	)
	(wire
		(pts
			(xy 265.43 185.42) (xy 265.43 187.96)
		)
	)
	(wire
		(pts
			(xy 217.17 105.41) (xy 217.17 99.06)
		)
	)
	(wire
		(pts
			(xy 163.83 163.83) (xy 186.69 163.83)
		)
	)
	(wire
		(pts
			(xy 92.71 64.77) (xy 96.52 64.77)
		)
	)
	(wire
		(pts
			(xy 118.11 200.66) (xy 135.89 200.66)
		)
	)
	(wire
		(pts
			(xy 163.83 116.84) (xy 186.69 116.84)
		)
	)
	(wire
		(pts
			(xy 118.11 161.29) (xy 135.89 161.29)
		)
	)
	(wire
		(pts
			(xy 265.43 173.99) (xy 265.43 177.8)
		)
	)
	(wire
		(pts
			(xy 132.08 210.82) (xy 135.89 210.82)
		)
	)
	(wire
		(pts
			(xy 215.9 132.08) (xy 223.52 132.08)
		)
	)
	(wire
		(pts
			(xy 264.16 215.9) (xy 265.43 215.9)
		)
	)
	(wire
		(pts
			(xy 167.64 156.21) (xy 186.69 156.21)
		)
	)
	(wire
		(pts
			(xy 92.71 69.85) (xy 96.52 69.85)
		)
	)
	(wire
		(pts
			(xy 107.95 168.91) (xy 107.95 166.37)
		)
	)
	(wire
		(pts
			(xy 163.83 91.44) (xy 166.37 91.44)
		)
	)
	(wire
		(pts
			(xy 168.91 72.39) (xy 168.91 73.66)
		)
	)
	(wire
		(pts
			(xy 132.08 129.54) (xy 133.35 129.54)
		)
	)
	(bus
		(pts
			(xy 115.57 203.2) (xy 115.57 205.74)
		)
	)
	(bus
		(pts
			(xy 115.57 163.83) (xy 115.57 166.37)
		)
	)
	(wire
		(pts
			(xy 266.7 68.58) (xy 274.32 68.58)
		)
	)
	(wire
		(pts
			(xy 163.83 139.7) (xy 166.37 139.7)
		)
	)
	(wire
		(pts
			(xy 223.52 130.81) (xy 223.52 132.08)
		)
	)
	(wire
		(pts
			(xy 118.11 156.21) (xy 135.89 156.21)
		)
	)
	(wire
		(pts
			(xy 167.64 114.3) (xy 186.69 114.3)
		)
	)
	(bus
		(pts
			(xy 189.23 114.3) (xy 189.23 116.84)
		)
	)
	(wire
		(pts
			(xy 265.43 91.44) (xy 265.43 95.25)
		)
	)
	(wire
		(pts
			(xy 166.37 215.9) (xy 194.31 215.9)
		)
	)
	(wire
		(pts
			(xy 133.35 127) (xy 135.89 127)
		)
	)
	(wire
		(pts
			(xy 175.26 124.46) (xy 186.69 124.46)
		)
	)
	(wire
		(pts
			(xy 167.64 153.67) (xy 167.64 156.21)
		)
	)
	(wire
		(pts
			(xy 107.95 114.3) (xy 107.95 116.84)
		)
	)
	(wire
		(pts
			(xy 118.11 127) (xy 133.35 127)
		)
	)
	(wire
		(pts
			(xy 163.83 161.29) (xy 167.64 161.29)
		)
	)
	(bus
		(pts
			(xy 189.23 158.75) (xy 189.23 161.29)
		)
	)
	(bus
		(pts
			(xy 189.23 71.12) (xy 189.23 73.66)
		)
	)
	(wire
		(pts
			(xy 290.83 129.54) (xy 299.72 129.54)
		)
	)
	(wire
		(pts
			(xy 223.52 91.44) (xy 256.54 91.44)
		)
	)
	(wire
		(pts
			(xy 166.37 91.44) (xy 172.72 91.44)
		)
	)
	(wire
		(pts
			(xy 163.83 83.82) (xy 166.37 83.82)
		)
	)
	(wire
		(pts
			(xy 118.11 114.3) (xy 135.89 114.3)
		)
	)
	(wire
		(pts
			(xy 266.7 68.58) (xy 266.7 71.12)
		)
	)
	(bus
		(pts
			(xy 115.57 149.86) (xy 115.57 153.67)
		)
	)
	(wire
		(pts
			(xy 166.37 88.9) (xy 166.37 91.44)
		)
	)
	(wire
		(pts
			(xy 264.16 132.08) (xy 265.43 132.08)
		)
	)
	(wire
		(pts
			(xy 118.11 158.75) (xy 135.89 158.75)
		)
	)
	(wire
		(pts
			(xy 134.62 163.83) (xy 135.89 163.83)
		)
	)
	(wire
		(pts
			(xy 166.37 181.61) (xy 163.83 181.61)
		)
	)
	(wire
		(pts
			(xy 118.11 208.28) (xy 135.89 208.28)
		)
	)
	(wire
		(pts
			(xy 107.95 210.82) (xy 107.95 208.28)
		)
	)
	(wire
		(pts
			(xy 113.03 127) (xy 107.95 127)
		)
	)
	(wire
		(pts
			(xy 92.71 76.2) (xy 135.89 76.2)
		)
	)
	(bus
		(pts
			(xy 115.57 158.75) (xy 115.57 161.29)
		)
	)
	(bus
		(pts
			(xy 189.23 124.46) (xy 189.23 149.86)
		)
	)
	(bus
		(pts
			(xy 189.23 161.29) (xy 189.23 163.83)
		)
	)
	(wire
		(pts
			(xy 265.43 215.9) (xy 265.43 219.71)
		)
	)
	(bus
		(pts
			(xy 115.57 116.84) (xy 115.57 119.38)
		)
	)
	(wire
		(pts
			(xy 265.43 227.33) (xy 265.43 229.87)
		)
	)
	(wire
		(pts
			(xy 107.95 156.21) (xy 107.95 158.75)
		)
	)
	(wire
		(pts
			(xy 194.31 214.63) (xy 194.31 215.9)
		)
	)
	(wire
		(pts
			(xy 175.26 161.29) (xy 186.69 161.29)
		)
	)
	(bus
		(pts
			(xy 189.23 121.92) (xy 189.23 124.46)
		)
	)
	(wire
		(pts
			(xy 166.37 173.99) (xy 194.31 173.99)
		)
	)
	(wire
		(pts
			(xy 118.11 210.82) (xy 132.08 210.82)
		)
	)
	(wire
		(pts
			(xy 166.37 223.52) (xy 163.83 223.52)
		)
	)
	(bus
		(pts
			(xy 189.23 156.21) (xy 189.23 158.75)
		)
	)
	(wire
		(pts
			(xy 133.35 78.74) (xy 133.35 86.36)
		)
	)
	(wire
		(pts
			(xy 132.08 171.45) (xy 132.08 168.91)
		)
	)
	(wire
		(pts
			(xy 168.91 73.66) (xy 186.69 73.66)
		)
	)
	(wire
		(pts
			(xy 194.31 130.81) (xy 194.31 132.08)
		)
	)
	(wire
		(pts
			(xy 163.83 127) (xy 186.69 127)
		)
	)
	(bus
		(pts
			(xy 189.23 111.76) (xy 189.23 114.3)
		)
	)
	(wire
		(pts
			(xy 118.11 203.2) (xy 135.89 203.2)
		)
	)
	(wire
		(pts
			(xy 270.51 168.91) (xy 276.86 168.91)
		)
	)
	(bus
		(pts
			(xy 189.23 76.2) (xy 189.23 78.74)
		)
	)
	(wire
		(pts
			(xy 118.11 119.38) (xy 135.89 119.38)
		)
	)
	(wire
		(pts
			(xy 194.31 173.99) (xy 198.12 173.99)
		)
	)
	(wire
		(pts
			(xy 265.43 173.99) (xy 276.86 173.99)
		)
	)
	(wire
		(pts
			(xy 223.52 214.63) (xy 223.52 215.9)
		)
	)
	(wire
		(pts
			(xy 270.51 73.66) (xy 270.51 86.36)
		)
	)
	(wire
		(pts
			(xy 299.72 88.9) (xy 299.72 129.54)
		)
	)
	(wire
		(pts
			(xy 118.11 198.12) (xy 135.89 198.12)
		)
	)
	(wire
		(pts
			(xy 163.83 119.38) (xy 167.64 119.38)
		)
	)
	(wire
		(pts
			(xy 133.35 73.66) (xy 135.89 73.66)
		)
	)
	(bus
		(pts
			(xy 189.23 153.67) (xy 189.23 156.21)
		)
	)
	(wire
		(pts
			(xy 269.24 73.66) (xy 270.51 73.66)
		)
	)
	(wire
		(pts
			(xy 175.26 166.37) (xy 186.69 166.37)
		)
	)
	(bus
		(pts
			(xy 189.23 78.74) (xy 189.23 81.28)
		)
	)
	(wire
		(pts
			(xy 118.11 166.37) (xy 135.89 166.37)
		)
	)
	(wire
		(pts
			(xy 163.83 173.99) (xy 166.37 173.99)
		)
	)
	(wire
		(pts
			(xy 113.03 210.82) (xy 107.95 210.82)
		)
	)
	(wire
		(pts
			(xy 270.51 168.91) (xy 270.51 210.82)
		)
	)
	(wire
		(pts
			(xy 134.62 121.92) (xy 135.89 121.92)
		)
	)
	(wire
		(pts
			(xy 270.51 86.36) (xy 270.51 127)
		)
	)
	(wire
		(pts
			(xy 223.52 215.9) (xy 256.54 215.9)
		)
	)
	(wire
		(pts
			(xy 166.37 227.33) (xy 166.37 223.52)
		)
	)
	(wire
		(pts
			(xy 163.83 166.37) (xy 167.64 166.37)
		)
	)
	(wire
		(pts
			(xy 265.43 215.9) (xy 276.86 215.9)
		)
	)
	(wire
		(pts
			(xy 265.43 102.87) (xy 265.43 105.41)
		)
	)
	(wire
		(pts
			(xy 92.71 67.31) (xy 96.52 67.31)
		)
	)
	(wire
		(pts
			(xy 173.99 83.82) (xy 186.69 83.82)
		)
	)
	(wire
		(pts
			(xy 163.83 168.91) (xy 186.69 168.91)
		)
	)
	(bus
		(pts
			(xy 189.23 163.83) (xy 189.23 166.37)
		)
	)
	(wire
		(pts
			(xy 163.83 78.74) (xy 166.37 78.74)
		)
	)
	(wire
		(pts
			(xy 92.71 72.39) (xy 96.52 72.39)
		)
	)
	(wire
		(pts
			(xy 133.35 129.54) (xy 133.35 127)
		)
	)
	(wire
		(pts
			(xy 299.72 129.54) (xy 299.72 171.45)
		)
	)
	(bus
		(pts
			(xy 115.57 193.04) (xy 115.57 195.58)
		)
	)
	(bus
		(pts
			(xy 115.57 156.21) (xy 115.57 158.75)
		)
	)
	(wire
		(pts
			(xy 217.17 229.87) (xy 217.17 223.52)
		)
	)
	(wire
		(pts
			(xy 173.99 78.74) (xy 186.69 78.74)
		)
	)
	(bus
		(pts
			(xy 189.23 116.84) (xy 189.23 119.38)
		)
	)
	(wire
		(pts
			(xy 217.17 187.96) (xy 217.17 181.61)
		)
	)
	(wire
		(pts
			(xy 166.37 99.06) (xy 163.83 99.06)
		)
	)
	(bus
		(pts
			(xy 115.57 200.66) (xy 115.57 203.2)
		)
	)
	(wire
		(pts
			(xy 163.83 114.3) (xy 167.64 114.3)
		)
	)
	(wire
		(pts
			(xy 265.43 132.08) (xy 265.43 135.89)
		)
	)
	(wire
		(pts
			(xy 163.83 86.36) (xy 186.69 86.36)
		)
	)
	(wire
		(pts
			(xy 270.51 210.82) (xy 276.86 210.82)
		)
	)
	(wire
		(pts
			(xy 166.37 139.7) (xy 198.12 139.7)
		)
	)
	(wire
		(pts
			(xy 166.37 223.52) (xy 198.12 223.52)
		)
	)
	(wire
		(pts
			(xy 118.11 163.83) (xy 127 163.83)
		)
	)
	(wire
		(pts
			(xy 265.43 143.51) (xy 265.43 146.05)
		)
	)
	(wire
		(pts
			(xy 163.83 156.21) (xy 167.64 156.21)
		)
	)
	(wire
		(pts
			(xy 223.52 173.99) (xy 256.54 173.99)
		)
	)
	(wire
		(pts
			(xy 130.81 171.45) (xy 132.08 171.45)
		)
	)
	(wire
		(pts
			(xy 292.1 171.45) (xy 299.72 171.45)
		)
	)
	(wire
		(pts
			(xy 113.03 168.91) (xy 107.95 168.91)
		)
	)
	(wire
		(pts
			(xy 194.31 215.9) (xy 198.12 215.9)
		)
	)
	(wire
		(pts
			(xy 217.17 146.05) (xy 217.17 139.7)
		)
	)
	(wire
		(pts
			(xy 217.17 181.61) (xy 215.9 181.61)
		)
	)
	(wire
		(pts
			(xy 270.51 127) (xy 275.59 127)
		)
	)
	(bus
		(pts
			(xy 189.23 166.37) (xy 189.23 193.04)
		)
	)
	(bus
		(pts
			(xy 189.23 81.28) (xy 189.23 83.82)
		)
	)
	(wire
		(pts
			(xy 163.83 132.08) (xy 166.37 132.08)
		)
	)
	(wire
		(pts
			(xy 163.83 76.2) (xy 186.69 76.2)
		)
	)
	(wire
		(pts
			(xy 166.37 181.61) (xy 166.37 215.9)
		)
	)
	(wire
		(pts
			(xy 194.31 172.72) (xy 194.31 173.99)
		)
	)
	(bus
		(pts
			(xy 115.57 198.12) (xy 115.57 200.66)
		)
	)
	(wire
		(pts
			(xy 313.69 129.54) (xy 318.77 129.54)
		)
	)
	(wire
		(pts
			(xy 167.64 111.76) (xy 167.64 114.3)
		)
	)
	(wire
		(pts
			(xy 107.95 127) (xy 107.95 124.46)
		)
	)
	(wire
		(pts
			(xy 217.17 99.06) (xy 215.9 99.06)
		)
	)
	(wire
		(pts
			(xy 270.51 127) (xy 270.51 168.91)
		)
	)
	(wire
		(pts
			(xy 166.37 132.08) (xy 194.31 132.08)
		)
	)
	(wire
		(pts
			(xy 168.91 153.67) (xy 167.64 153.67)
		)
	)
	(wire
		(pts
			(xy 223.52 90.17) (xy 223.52 91.44)
		)
	)
	(wire
		(pts
			(xy 166.37 181.61) (xy 198.12 181.61)
		)
	)
	(wire
		(pts
			(xy 223.52 132.08) (xy 256.54 132.08)
		)
	)
	(bus
		(pts
			(xy 115.57 109.22) (xy 115.57 111.76)
		)
	)
	(wire
		(pts
			(xy 217.17 139.7) (xy 215.9 139.7)
		)
	)
	(bus
		(pts
			(xy 115.57 111.76) (xy 115.57 114.3)
		)
	)
	(wire
		(pts
			(xy 163.83 73.66) (xy 168.91 73.66)
		)
	)
	(wire
		(pts
			(xy 118.11 124.46) (xy 135.89 124.46)
		)
	)
	(bus
		(pts
			(xy 115.57 149.86) (xy 189.23 149.86)
		)
	)
	(wire
		(pts
			(xy 299.72 129.54) (xy 306.07 129.54)
		)
	)
	(wire
		(pts
			(xy 262.89 68.58) (xy 266.7 68.58)
		)
	)
	(label "RI_1"
		(at 186.69 121.92 180)
		(fields_autoplaced yes)
	)
	(label "BO_1"
		(at 186.69 119.38 180)
		(fields_autoplaced yes)
	)
	(label "NRSTO_2"
		(at 186.69 158.75 180)
		(fields_autoplaced yes)
	)
	(label "GND_2"
		(at 118.11 210.82 0)
		(fields_autoplaced yes)
	)
	(label "RI_2"
		(at 118.11 205.74 0)
		(fields_autoplaced yes)
	)
	(label "GND_2"
		(at 186.69 168.91 180)
		(fields_autoplaced yes)
	)
	(label "BO_0"
		(at 186.69 78.74 180)
		(fields_autoplaced yes)
	)
	(label "RI_0"
		(at 186.69 81.28 180)
		(fields_autoplaced yes)
	)
	(label "RI_2"
		(at 186.69 163.83 180)
		(fields_autoplaced yes)
	)
	(label "GND_1"
		(at 118.11 168.91 0)
		(fields_autoplaced yes)
	)
	(label "+1V8_0"
		(at 118.11 114.3 0)
		(fields_autoplaced yes)
	)
	(label "+1V8_2"
		(at 113.03 198.12 180)
		(fields_autoplaced yes)
	)
	(label "+1V8_2"
		(at 186.69 156.21 180)
		(fields_autoplaced yes)
	)
	(label "CO_2"
		(at 118.11 208.28 0)
		(fields_autoplaced yes)
	)
	(label "NRSTO_2"
		(at 118.11 200.66 0)
		(fields_autoplaced yes)
	)
	(label "NRSTO_0"
		(at 118.11 116.84 0)
		(fields_autoplaced yes)
	)
	(label "CO_1"
		(at 186.69 124.46 180)
		(fields_autoplaced yes)
	)
	(label "+1V8_1"
		(at 113.03 156.21 180)
		(fields_autoplaced yes)
	)
	(label "NRSTO_0"
		(at 186.69 76.2 180)
		(fields_autoplaced yes)
	)
	(label "CO_2"
		(at 186.69 166.37 180)
		(fields_autoplaced yes)
	)
	(label "+1V8_1"
		(at 186.69 114.3 180)
		(fields_autoplaced yes)
	)
	(label "NRSTO_1"
		(at 186.69 116.84 180)
		(fields_autoplaced yes)
	)
	(label "{1V8_2,NRSTO_2,BO_2,RI_2,CO_2,GND_2}"
		(at 138.43 193.04 0)
		(fields_autoplaced yes)
	)
	(label "2.5V"
		(at 264.16 68.58 0)
		(fields_autoplaced yes)
	)
	(label "RI_0"
		(at 118.11 121.92 0)
		(fields_autoplaced yes)
	)
	(label "+1V8_2"
		(at 118.11 198.12 0)
		(fields_autoplaced yes)
	)
	(label "GND_0"
		(at 118.11 127 0)
		(fields_autoplaced yes)
	)
	(label "{1V8_1,NRSTO_1,BO_1,RI_1,CO_1,GND_1}"
		(at 138.43 149.86 0)
		(fields_autoplaced yes)
	)
	(label "BO_0"
		(at 118.11 119.38 0)
		(fields_autoplaced yes)
	)
	(label "+1V8_0"
		(at 186.69 73.66 180)
		(fields_autoplaced yes)
	)
	(label "NRSTO_1"
		(at 118.11 158.75 0)
		(fields_autoplaced yes)
	)
	(label "GND_0"
		(at 113.03 127 180)
		(fields_autoplaced yes)
	)
	(label "GND_2"
		(at 113.03 210.82 180)
		(fields_autoplaced yes)
	)
	(label "CO_1"
		(at 118.11 166.37 0)
		(fields_autoplaced yes)
	)
	(label "{1V8_0,NRSTO_0,BO_0,RI_0,CO_0,GND_0}"
		(at 138.43 109.22 0)
		(fields_autoplaced yes)
	)
	(label "CO_0"
		(at 186.69 83.82 180)
		(fields_autoplaced yes)
	)
	(label "+1V8_1"
		(at 118.11 156.21 0)
		(fields_autoplaced yes)
	)
	(label "RI_1"
		(at 118.11 163.83 0)
		(fields_autoplaced yes)
	)
	(label "CO_0"
		(at 118.11 124.46 0)
		(fields_autoplaced yes)
	)
	(label "GND_1"
		(at 186.69 127 180)
		(fields_autoplaced yes)
	)
	(label "BO_2"
		(at 186.69 161.29 180)
		(fields_autoplaced yes)
	)
	(label "BO_2"
		(at 118.11 203.2 0)
		(fields_autoplaced yes)
	)
	(label "+1V8_0"
		(at 113.03 114.3 180)
		(fields_autoplaced yes)
	)
	(label "GND_0"
		(at 186.69 86.36 180)
		(fields_autoplaced yes)
	)
	(label "GND_1"
		(at 113.03 168.91 180)
		(fields_autoplaced yes)
	)
	(label "BO_1"
		(at 118.11 161.29 0)
		(fields_autoplaced yes)
	)
	(global_label "V3_G2"
		(shape passive)
		(at 194.31 214.63 90)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 194.31 207.0109 90)
		)
	)
	(global_label "V3_G2"
		(shape passive)
		(at 129.54 213.36 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 121.9209 213.36 0)
		)
	)
	(global_label "+1V8_1"
		(shape passive)
		(at 168.91 111.76 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 178.041 111.76 0)
		)
	)
	(global_label "+1V8_0"
		(shape passive)
		(at 168.91 72.39 90)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 168.91 63.259 90)
		)
	)
	(global_label "V2_G1"
		(shape passive)
		(at 130.81 171.45 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 123.1909 171.45 0)
		)
	)
	(global_label "V2_G1"
		(shape passive)
		(at 194.31 172.72 90)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 194.31 165.1009 90)
		)
	)
	(global_label "V1_G0"
		(shape passive)
		(at 194.31 130.81 90)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 194.31 123.1909 90)
		)
	)
	(global_label "V1_G0"
		(shape passive)
		(at 132.08 129.54 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 124.4609 129.54 0)
		)
	)
	(global_label "+1V8_2"
		(shape passive)
		(at 168.91 153.67 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 178.041 153.67 0)
		)
	)
	(global_label "+5V_PWR"
		(shape passive)
		(at 167.64 88.9 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 178.3434 88.9 0)
		)
	)
	(hierarchical_label "SHUTDOWN"
		(shape output)
		(at 318.77 129.54 0)
		(fields_autoplaced yes)
	)
	(hierarchical_label "V_FLEX2"
		(shape output)
		(at 223.52 130.81 90)
		(fields_autoplaced yes)
	)
	(hierarchical_label "V_FLEX4"
		(shape output)
		(at 223.52 214.63 90)
		(fields_autoplaced yes)
	)
	(hierarchical_label "V_FLEX1"
		(shape output)
		(at 223.52 90.17 90)
		(fields_autoplaced yes)
	)
	(hierarchical_label "RESET"
		(shape input)
		(at 92.71 76.2 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "+5V_PWR"
		(shape input)
		(at 92.71 64.77 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "V_FLEX3"
		(shape output)
		(at 223.52 171.45 90)
		(fields_autoplaced yes)
	)
	(hierarchical_label "+3V3"
		(shape input)
		(at 92.71 67.31 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "+3V3_IF"
		(shape input)
		(at 92.71 69.85 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "TXD"
		(shape input)
		(at 92.71 83.82 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "GND_IF"
		(shape input)
		(at 92.71 72.39 180)
		(fields_autoplaced yes)
	)
	(hierarchical_label "RXD"
		(shape output)
		(at 92.71 81.28 180)
		(fields_autoplaced yes)
	)
	(symbol
		(lib_id "power:GND")
		(at 274.32 78.74 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0390"
			(at 274.32 85.09 0)
		)
		(property "Value" "GND"
			(at 274.32 84.455 0)
		)
		(property "Footprint" ""
			(at 274.32 78.74 0)
		)
		(property "Datasheet" ""
			(at 274.32 78.74 0)
		)
		(property "Description" ""
			(at 274.32 78.74 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0390")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 233.68 184.15 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR065"
			(at 233.68 187.96 0)
		)
		(property "Value" "+3V3"
			(at 233.68 179.705 0)
		)
		(property "Footprint" ""
			(at 233.68 184.15 0)
		)
		(property "Datasheet" ""
			(at 233.68 184.15 0)
		)
		(property "Description" ""
			(at 233.68 184.15 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR065")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 317.5 69.85 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR086"
			(at 317.5 76.2 0)
		)
		(property "Value" "GND"
			(at 317.5 74.93 0)
		)
		(property "Footprint" ""
			(at 317.5 69.85 0)
		)
		(property "Datasheet" ""
			(at 317.5 69.85 0)
		)
		(property "Description" ""
			(at 317.5 69.85 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR086")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 265.43 139.7 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C17"
			(at 268.605 138.43 0)
		)
		(property "Value" "100n"
			(at 268.605 140.97 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 266.3952 143.51 0)
		)
		(property "Datasheet" "~"
			(at 265.43 139.7 0)
		)
		(property "Description" ""
			(at 265.43 139.7 0)
		)
		(property "Distributor" "D"
			(at 265.43 139.7 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 265.43 139.7 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 265.43 139.7 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "C17")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 252.73 60.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR069"
			(at 252.73 64.77 0)
		)
		(property "Value" "+3V3"
			(at 252.73 57.785 0)
		)
		(property "Footprint" ""
			(at 252.73 60.96 0)
		)
		(property "Datasheet" ""
			(at 252.73 60.96 0)
		)
		(property "Description" ""
			(at 252.73 60.96 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR069")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 240.03 67.31 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C15"
			(at 243.205 66.04 0)
		)
		(property "Value" "100n"
			(at 243.205 68.58 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 240.9952 71.12 0)
		)
		(property "Datasheet" "~"
			(at 240.03 67.31 0)
		)
		(property "Description" ""
			(at 240.03 67.31 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 240.03 67.31 0)
		)
		(property "Distributor" "D"
			(at 240.03 67.31 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 240.03 67.31 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "C15")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 233.68 187.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C14"
			(at 236.855 186.69 0)
		)
		(property "Value" "100n"
			(at 236.855 189.23 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 234.6452 191.77 0)
		)
		(property "Datasheet" "~"
			(at 233.68 187.96 0)
		)
		(property "Description" ""
			(at 233.68 187.96 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 233.68 187.96 0)
		)
		(property "Distributor" "D"
			(at 233.68 187.96 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 233.68 187.96 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "C14")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:INA500-DCK")
		(at 205.74 93.98 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U4"
			(at 209.2041 83.185 0)
		)
		(property "Value" "INA500DCK"
			(at 209.2041 85.725 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-363_SC-70-6"
			(at 205.74 93.98 0)
		)
		(property "Datasheet" ""
			(at 205.74 93.98 0)
		)
		(property "Description" ""
			(at 205.74 93.98 0)
		)
		(property "Distributor" "D"
			(at 205.74 93.98 0)
		)
		(property "Manufacturer" "INA500AIDCKR"
			(at 205.74 93.98 0)
		)
		(property "OrderNr" "296-INA500AIDCKRCT-ND"
			(at 205.74 93.98 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(instances
			(project "8]axe"
				(path
					(reference "U4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 260.35 215.9 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R18"
			(at 260.35 213.995 90)
		)
		(property "Value" "1k"
			(at 260.35 218.44 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 260.35 217.678 90)
		)
		(property "Datasheet" "~"
			(at 260.35 215.9 0)
		)
		(property "Description" ""
			(at 260.35 215.9 0)
		)
		(property "Manufacturer" "RCS06031K00FKEA"
			(at 260.35 215.9 0)
		)
		(property "DK-Partnumber" "541-1.00KHCT-ND"
			(at 260.35 215.9 0)
		)
		(property "Distributor" "D"
			(at 260.35 215.9 0)
		)
		(property "OrderNr" "541-2788-1-ND"
			(at 260.35 215.9 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "R18")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 171.45 124.46 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R12"
			(at 175.895 123.19 90)
		)
		(property "Value" "22"
			(at 171.45 124.46 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 171.45 126.238 90)
		)
		(property "Datasheet" "~"
			(at 171.45 124.46 0)
		)
		(property "Description" ""
			(at 171.45 124.46 0)
		)
		(property "Manufacturer" "RK73B1JTTD220J"
			(at 171.45 124.46 0)
		)
		(property "Distributor" "D"
			(at 171.45 124.46 0)
		)
		(property "OrderNr" "2019-RK73B1JTTD220JCT-ND"
			(at 171.45 124.46 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "R12")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 289.56 66.04 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C9"
			(at 288.925 63.5 0)
		)
		(property "Value" "10µ/50V"
			(at 292.735 69.85 90)
		)
		(property "Footprint" "Capacitor_SMD:C_1206_3216Metric"
			(at 288.5948 69.85 0)
		)
		(property "Datasheet" "~"
			(at 289.56 66.04 0)
		)
		(property "Description" ""
			(at 289.56 66.04 0)
		)
		(property "Distributor" "D"
			(at 289.56 66.04 0)
		)
		(property "Manufacturer" "CL31A106MBHNNNE"
			(at 289.56 66.04 0)
		)
		(property "OrderNr" "1276-6736-1-ND"
			(at 289.56 66.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pferdibank"
				(path
					(reference "C9")
					(unit 1)
				)
			)
			(project "power"
				(path
					(reference "C20")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C20")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 217.17 229.87 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR058"
			(at 217.17 236.22 0)
		)
		(property "Value" "GND"
			(at 217.17 234.95 0)
		)
		(property "Footprint" ""
			(at 217.17 229.87 0)
		)
		(property "Datasheet" ""
			(at 217.17 229.87 0)
		)
		(property "Description" ""
			(at 217.17 229.87 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR058")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 233.68 191.77 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR066"
			(at 233.68 198.12 0)
		)
		(property "Value" "GND"
			(at 233.68 196.85 0)
		)
		(property "Footprint" ""
			(at 233.68 191.77 0)
		)
		(property "Datasheet" ""
			(at 233.68 191.77 0)
		)
		(property "Description" ""
			(at 233.68 191.77 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR066")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Comparator:LM339")
		(at 284.48 171.45 0)
		(unit 2)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U9"
			(at 285.75 165.735 0)
		)
		(property "Value" "LM339"
			(at 287.02 167.64 0)
		)
		(property "Footprint" "Package_SO:SOIC-14_3.9x8.7mm_P1.27mm"
			(at 283.21 168.91 0)
		)
		(property "Datasheet" "https://www.st.com/resource/en/datasheet/lm139.pdf"
			(at 285.75 166.37 0)
		)
		(property "Description" ""
			(at 284.48 171.45 0)
		)
		(property "Distributor" "D"
			(at 284.48 171.45 0)
		)
		(property "Manufacturer" "LM339DR"
			(at 284.48 171.45 0)
		)
		(property "OrderNr" "296-1013-1-ND"
			(at 284.48 171.45 0)
		)
		(pin "2")
		(pin "4")
		(pin "5")
		(pin "1")
		(pin "6")
		(pin "7")
		(pin "10")
		(pin "11")
		(pin "13")
		(pin "14")
		(pin "8")
		(pin "9")
		(pin "12")
		(pin "3")
		(instances
			(project "8]axe"
				(path
					(reference "U9")
					(unit 2)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 308.61 66.04 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C9"
			(at 307.975 63.5 0)
		)
		(property "Value" "10µ/50V"
			(at 311.785 69.85 90)
		)
		(property "Footprint" "Capacitor_SMD:C_1206_3216Metric"
			(at 307.6448 69.85 0)
		)
		(property "Datasheet" "~"
			(at 308.61 66.04 0)
		)
		(property "Description" ""
			(at 308.61 66.04 0)
		)
		(property "Distributor" "D"
			(at 308.61 66.04 0)
		)
		(property "Manufacturer" "CL31A106MBHNNNE"
			(at 308.61 66.04 0)
		)
		(property "OrderNr" "1276-6736-1-ND"
			(at 308.61 66.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pferdibank"
				(path
					(reference "C9")
					(unit 1)
				)
			)
			(project "power"
				(path
					(reference "C20")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C23")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:INA500-DCK")
		(at 205.74 218.44 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U7"
			(at 209.2041 207.645 0)
		)
		(property "Value" "INA500DCK"
			(at 209.2041 210.185 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-363_SC-70-6"
			(at 205.74 218.44 0)
		)
		(property "Datasheet" ""
			(at 205.74 218.44 0)
		)
		(property "Description" ""
			(at 205.74 218.44 0)
		)
		(property "Distributor" "D"
			(at 205.74 218.44 0)
		)
		(property "Manufacturer" "INA500AIDCKR"
			(at 205.74 218.44 0)
		)
		(property "OrderNr" "296-INA500AIDCKRCT-ND"
			(at 205.74 218.44 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(instances
			(project "8]axe"
				(path
					(reference "U7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 166.37 227.33 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR044"
			(at 166.37 233.68 0)
		)
		(property "Value" "GND"
			(at 166.37 232.41 0)
		)
		(property "Footprint" ""
			(at 166.37 227.33 0)
		)
		(property "Datasheet" ""
			(at 166.37 227.33 0)
		)
		(property "Description" ""
			(at 166.37 227.33 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR044")
					(unit 1)
				)
			)
			(project "flex"
				(path
					(reference "#PWR030")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 314.96 177.8 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR083"
			(at 314.96 181.61 0)
		)
		(property "Value" "+3V3"
			(at 314.96 173.355 0)
		)
		(property "Footprint" ""
			(at 314.96 177.8 0)
		)
		(property "Datasheet" ""
			(at 314.96 177.8 0)
		)
		(property "Description" ""
			(at 314.96 177.8 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR083")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 107.95 162.56 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C9"
			(at 108.585 160.02 0)
		)
		(property "Value" "10µ/50V"
			(at 104.775 166.37 90)
		)
		(property "Footprint" "Capacitor_SMD:C_1206_3216Metric"
			(at 108.9152 166.37 0)
		)
		(property "Datasheet" "~"
			(at 107.95 162.56 0)
		)
		(property "Description" ""
			(at 107.95 162.56 0)
		)
		(property "Distributor" "D"
			(at 107.95 162.56 0)
		)
		(property "Manufacturer" "CL31A106MBHNNNE"
			(at 107.95 162.56 0)
		)
		(property "OrderNr" "1276-6736-1-ND"
			(at 107.95 162.56 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pferdibank"
				(path
					(reference "C9")
					(unit 1)
				)
			)
			(project "power"
				(path
					(reference "C20")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C9")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 265.43 105.41 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR071"
			(at 265.43 111.76 0)
		)
		(property "Value" "GND"
			(at 265.43 110.49 0)
		)
		(property "Footprint" ""
			(at 265.43 105.41 0)
		)
		(property "Datasheet" ""
			(at 265.43 105.41 0)
		)
		(property "Description" ""
			(at 265.43 105.41 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR071")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 223.52 97.79 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR059"
			(at 223.52 101.6 0)
		)
		(property "Value" "+3V3"
			(at 223.52 93.345 0)
		)
		(property "Footprint" ""
			(at 223.52 97.79 0)
		)
		(property "Datasheet" ""
			(at 223.52 97.79 0)
		)
		(property "Description" ""
			(at 223.52 97.79 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR059")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Potentiometer_Small")
		(at 266.7 73.66 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp yes)
		(property "Reference" "RV1"
			(at 265.684 72.39 0)
		)
		(property "Value" "10k -Pot"
			(at 265.43 74.93 0)
		)
		(property "Footprint" "Potentiometer_SMD:Potentiometer_Bourns_3214X_Vertical"
			(at 266.7 73.66 0)
		)
		(property "Datasheet" "~"
			(at 266.7 73.66 0)
		)
		(property "Description" "Potentiometer"
			(at 266.7 73.66 0)
		)
		(property "Distributor" "D"
			(at 266.7 73.66 0)
		)
		(property "Manufacturer" "3214X-1-103E"
			(at 266.7 73.66 0)
		)
		(property "OrderNr" "3214X-1-103ECT-ND"
			(at 266.7 73.66 0)
		)
		(pin "3")
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "RV1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:INA500-DCK")
		(at 205.74 134.62 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U5"
			(at 209.2041 123.825 0)
		)
		(property "Value" "INA500DCK"
			(at 209.2041 126.365 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-363_SC-70-6"
			(at 205.74 134.62 0)
		)
		(property "Datasheet" ""
			(at 205.74 134.62 0)
		)
		(property "Description" ""
			(at 205.74 134.62 0)
		)
		(property "Distributor" "D"
			(at 205.74 134.62 0)
		)
		(property "Manufacturer" "INA500AIDCKR"
			(at 205.74 134.62 0)
		)
		(property "OrderNr" "296-INA500AIDCKRCT-ND"
			(at 205.74 134.62 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(instances
			(project "8]axe"
				(path
					(reference "U5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 265.43 223.52 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C19"
			(at 268.605 222.25 0)
		)
		(property "Value" "100n"
			(at 268.605 224.79 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 266.3952 227.33 0)
		)
		(property "Datasheet" "~"
			(at 265.43 223.52 0)
		)
		(property "Description" ""
			(at 265.43 223.52 0)
		)
		(property "Distributor" "D"
			(at 265.43 223.52 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 265.43 223.52 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 265.43 223.52 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "C19")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 229.87 228.6 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR061"
			(at 229.87 232.41 0)
		)
		(property "Value" "+3V3"
			(at 229.87 224.155 0)
		)
		(property "Footprint" ""
			(at 229.87 228.6 0)
		)
		(property "Datasheet" ""
			(at 229.87 228.6 0)
		)
		(property "Description" ""
			(at 229.87 228.6 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR061")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 260.35 173.99 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R17"
			(at 260.35 172.085 90)
		)
		(property "Value" "1k"
			(at 260.35 176.53 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 260.35 175.768 90)
		)
		(property "Datasheet" "~"
			(at 260.35 173.99 0)
		)
		(property "Description" ""
			(at 260.35 173.99 0)
		)
		(property "Manufacturer" "RCS06031K00FKEA"
			(at 260.35 173.99 0)
		)
		(property "DK-Partnumber" "541-1.00KHCT-ND"
			(at 260.35 173.99 0)
		)
		(property "Distributor" "D"
			(at 260.35 173.99 0)
		)
		(property "OrderNr" "541-2788-1-ND"
			(at 260.35 173.99 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "R17")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+5V_PWR")
		(at 198.12 91.44 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR046"
			(at 201.93 91.44 0)
		)
		(property "Value" "+5V_PWR"
			(at 194.31 95.25 0)
		)
		(property "Footprint" ""
			(at 198.12 91.44 0)
		)
		(property "Datasheet" ""
			(at 198.12 91.44 0)
		)
		(property "Description" ""
			(at 198.12 91.44 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR046")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 171.45 119.38 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R11"
			(at 175.895 118.11 90)
		)
		(property "Value" "22"
			(at 171.45 119.38 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 171.45 121.158 90)
		)
		(property "Datasheet" "~"
			(at 171.45 119.38 0)
		)
		(property "Description" ""
			(at 171.45 119.38 0)
		)
		(property "Manufacturer" "RK73B1JTTD220J"
			(at 171.45 119.38 0)
		)
		(property "Distributor" "D"
			(at 171.45 119.38 0)
		)
		(property "OrderNr" "2019-RK73B1JTTD220JCT-ND"
			(at 171.45 119.38 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "R11")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+3V3_IF")
		(at 96.52 69.85 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR040"
			(at 92.71 69.85 0)
		)
		(property "Value" "+3V3_IF"
			(at 99.695 69.85 90)
		)
		(property "Footprint" ""
			(at 96.52 69.85 0)
		)
		(property "Datasheet" ""
			(at 96.52 69.85 0)
		)
		(property "Description" ""
			(at 96.52 69.85 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR040")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 229.87 232.41 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C12"
			(at 233.045 231.14 0)
		)
		(property "Value" "100n"
			(at 233.045 233.68 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 230.8352 236.22 0)
		)
		(property "Datasheet" "~"
			(at 229.87 232.41 0)
		)
		(property "Description" ""
			(at 229.87 232.41 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 229.87 232.41 0)
		)
		(property "Distributor" "D"
			(at 229.87 232.41 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 229.87 232.41 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "C12")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Jumper:SolderJumper_2_Open")
		(at 309.88 129.54 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "JP3"
			(at 309.88 125.73 0)
		)
		(property "Value" "SolderJumper_2_Open"
			(at 309.88 125.73 0)
		)
		(property "Footprint" "Jumper:SolderJumper-2_P1.3mm_Open_RoundedPad1.0x1.5mm"
			(at 309.88 129.54 0)
		)
		(property "Datasheet" "~"
			(at 309.88 129.54 0)
		)
		(property "Description" ""
			(at 309.88 129.54 0)
		)
		(property "Distributor" "-"
			(at 309.88 129.54 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "JP3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 265.43 146.05 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR072"
			(at 265.43 152.4 0)
		)
		(property "Value" "GND"
			(at 265.43 151.13 0)
		)
		(property "Footprint" ""
			(at 265.43 146.05 0)
		)
		(property "Datasheet" ""
			(at 265.43 146.05 0)
		)
		(property "Description" ""
			(at 265.43 146.05 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR072")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 308.61 69.85 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR082"
			(at 308.61 76.2 0)
		)
		(property "Value" "GND"
			(at 308.61 74.93 0)
		)
		(property "Footprint" ""
			(at 308.61 69.85 0)
		)
		(property "Datasheet" ""
			(at 308.61 69.85 0)
		)
		(property "Description" ""
			(at 308.61 69.85 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR082")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 130.81 205.74 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R8"
			(at 126.365 204.47 90)
		)
		(property "Value" "22"
			(at 130.81 205.74 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 130.81 207.518 90)
		)
		(property "Datasheet" "~"
			(at 130.81 205.74 0)
		)
		(property "Description" ""
			(at 130.81 205.74 0)
		)
		(property "Manufacturer" "RK73B1JTTD220J"
			(at 130.81 205.74 0)
		)
		(property "Distributor" "D"
			(at 130.81 205.74 0)
		)
		(property "OrderNr" "2019-RK73B1JTTD220JCT-ND"
			(at 130.81 205.74 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "R8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 317.5 66.04 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C9"
			(at 316.865 63.5 0)
		)
		(property "Value" "10µ/50V"
			(at 320.675 69.85 90)
		)
		(property "Footprint" "Capacitor_SMD:C_1206_3216Metric"
			(at 316.5348 69.85 0)
		)
		(property "Datasheet" "~"
			(at 317.5 66.04 0)
		)
		(property "Description" ""
			(at 317.5 66.04 0)
		)
		(property "Distributor" "D"
			(at 317.5 66.04 0)
		)
		(property "Manufacturer" "CL31A106MBHNNNE"
			(at 317.5 66.04 0)
		)
		(property "OrderNr" "1276-6736-1-ND"
			(at 317.5 66.04 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pferdibank"
				(path
					(reference "C9")
					(unit 1)
				)
			)
			(project "power"
				(path
					(reference "C20")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C24")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 240.03 63.5 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR067"
			(at 240.03 67.31 0)
		)
		(property "Value" "+3V3"
			(at 240.03 59.055 0)
		)
		(property "Footprint" ""
			(at 240.03 63.5 0)
		)
		(property "Datasheet" ""
			(at 240.03 63.5 0)
		)
		(property "Description" ""
			(at 240.03 63.5 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR067")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:INA500-DCK")
		(at 205.74 176.53 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U6"
			(at 209.2041 165.735 0)
		)
		(property "Value" "INA500DCK"
			(at 209.2041 168.275 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-363_SC-70-6"
			(at 205.74 176.53 0)
		)
		(property "Datasheet" ""
			(at 205.74 176.53 0)
		)
		(property "Description" ""
			(at 205.74 176.53 0)
		)
		(property "Distributor" "D"
			(at 205.74 176.53 0)
		)
		(property "Manufacturer" "INA500AIDCKR"
			(at 205.74 176.53 0)
		)
		(property "OrderNr" "296-INA500AIDCKRCT-ND"
			(at 205.74 176.53 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "5")
		(pin "6")
		(instances
			(project "8]axe"
				(path
					(reference "U6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 233.68 152.4 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR064"
			(at 233.68 158.75 0)
		)
		(property "Value" "GND"
			(at 233.68 157.48 0)
		)
		(property "Footprint" ""
			(at 233.68 152.4 0)
		)
		(property "Datasheet" ""
			(at 233.68 152.4 0)
		)
		(property "Description" ""
			(at 233.68 152.4 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR064")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Comparator:LM339")
		(at 283.21 129.54 0)
		(unit 3)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U9"
			(at 284.48 123.825 0)
		)
		(property "Value" "LM339"
			(at 285.75 125.73 0)
		)
		(property "Footprint" "Package_SO:SOIC-14_3.9x8.7mm_P1.27mm"
			(at 281.94 127 0)
		)
		(property "Datasheet" "https://www.st.com/resource/en/datasheet/lm139.pdf"
			(at 284.48 124.46 0)
		)
		(property "Description" ""
			(at 283.21 129.54 0)
		)
		(property "Distributor" "D"
			(at 283.21 129.54 0)
		)
		(property "Manufacturer" "LM339DR"
			(at 283.21 129.54 0)
		)
		(property "OrderNr" "296-1013-1-ND"
			(at 283.21 129.54 0)
		)
		(pin "2")
		(pin "4")
		(pin "5")
		(pin "1")
		(pin "6")
		(pin "7")
		(pin "10")
		(pin "11")
		(pin "13")
		(pin "14")
		(pin "8")
		(pin "9")
		(pin "12")
		(pin "3")
		(instances
			(project "8]axe"
				(path
					(reference "U9")
					(unit 3)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 170.18 83.82 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R10"
			(at 175.26 82.55 90)
		)
		(property "Value" "22"
			(at 170.18 83.82 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 170.18 85.598 90)
		)
		(property "Datasheet" "~"
			(at 170.18 83.82 0)
		)
		(property "Description" ""
			(at 170.18 83.82 0)
		)
		(property "Manufacturer" "RK73B1JTTD220J"
			(at 170.18 83.82 0)
		)
		(property "Distributor" "D"
			(at 170.18 83.82 0)
		)
		(property "OrderNr" "2019-RK73B1JTTD220JCT-ND"
			(at 170.18 83.82 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "R10")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 217.17 146.05 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR056"
			(at 217.17 152.4 0)
		)
		(property "Value" "GND"
			(at 217.17 151.13 0)
		)
		(property "Footprint" ""
			(at 217.17 146.05 0)
		)
		(property "Datasheet" ""
			(at 217.17 146.05 0)
		)
		(property "Description" ""
			(at 217.17 146.05 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR056")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Comparator:LM339")
		(at 317.5 185.42 0)
		(unit 5)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U9"
			(at 315.595 184.15 0)
		)
		(property "Value" "LM339"
			(at 315.595 186.69 0)
		)
		(property "Footprint" "Package_SO:SOIC-14_3.9x8.7mm_P1.27mm"
			(at 316.23 182.88 0)
		)
		(property "Datasheet" "https://www.st.com/resource/en/datasheet/lm139.pdf"
			(at 318.77 180.34 0)
		)
		(property "Description" ""
			(at 317.5 185.42 0)
		)
		(property "OrderNr" "296-1013-1-ND"
			(at 317.5 185.42 0)
		)
		(property "Distributor" "D"
			(at 317.5 185.42 0)
		)
		(property "Manufacturer" "LM339DR"
			(at 317.5 185.42 0)
		)
		(pin "2")
		(pin "4")
		(pin "5")
		(pin "1")
		(pin "6")
		(pin "7")
		(pin "10")
		(pin "11")
		(pin "13")
		(pin "14")
		(pin "8")
		(pin "9")
		(pin "12")
		(pin "3")
		(instances
			(project "8]axe"
				(path
					(reference "U9")
					(unit 5)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 289.56 62.23 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR075"
			(at 289.56 66.04 0)
		)
		(property "Value" "+3V3"
			(at 289.56 57.785 0)
		)
		(property "Footprint" ""
			(at 289.56 62.23 0)
		)
		(property "Datasheet" ""
			(at 289.56 62.23 0)
		)
		(property "Description" ""
			(at 289.56 62.23 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR075")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 107.95 120.65 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C9"
			(at 108.585 118.11 0)
		)
		(property "Value" "10µ/50V"
			(at 104.775 124.46 90)
		)
		(property "Footprint" "Capacitor_SMD:C_1206_3216Metric"
			(at 108.9152 124.46 0)
		)
		(property "Datasheet" "~"
			(at 107.95 120.65 0)
		)
		(property "Description" ""
			(at 107.95 120.65 0)
		)
		(property "Distributor" "D"
			(at 107.95 120.65 0)
		)
		(property "Manufacturer" "CL31A106MBHNNNE"
			(at 107.95 120.65 0)
		)
		(property "OrderNr" "1276-6736-1-ND"
			(at 107.95 120.65 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pferdibank"
				(path
					(reference "C9")
					(unit 1)
				)
			)
			(project "power"
				(path
					(reference "C20")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 130.81 121.92 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 126.365 120.65 90)
		)
		(property "Value" "22"
			(at 130.81 121.92 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 130.81 123.698 90)
		)
		(property "Datasheet" "~"
			(at 130.81 121.92 0)
		)
		(property "Description" ""
			(at 130.81 121.92 0)
		)
		(property "Manufacturer" "RK73B1JTTD220J"
			(at 130.81 121.92 0)
		)
		(property "Distributor" "D"
			(at 130.81 121.92 0)
		)
		(property "OrderNr" "2019-RK73B1JTTD220JCT-ND"
			(at 130.81 121.92 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "R6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 314.96 193.04 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR084"
			(at 314.96 199.39 0)
		)
		(property "Value" "GND"
			(at 314.96 198.12 0)
		)
		(property "Footprint" ""
			(at 314.96 193.04 0)
		)
		(property "Datasheet" ""
			(at 314.96 193.04 0)
		)
		(property "Description" ""
			(at 314.96 193.04 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR084")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 240.03 71.12 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR068"
			(at 240.03 77.47 0)
		)
		(property "Value" "GND"
			(at 240.03 76.2 0)
		)
		(property "Footprint" ""
			(at 240.03 71.12 0)
		)
		(property "Datasheet" ""
			(at 240.03 71.12 0)
		)
		(property "Description" ""
			(at 240.03 71.12 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR068")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 252.73 76.2 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR070"
			(at 252.73 82.55 0)
		)
		(property "Value" "GND"
			(at 252.73 81.915 0)
		)
		(property "Footprint" ""
			(at 252.73 76.2 0)
		)
		(property "Datasheet" ""
			(at 252.73 76.2 0)
		)
		(property "Description" ""
			(at 252.73 76.2 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR070")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 223.52 101.6 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C11"
			(at 226.695 100.33 0)
		)
		(property "Value" "100n"
			(at 226.695 102.87 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 224.4852 105.41 0)
		)
		(property "Datasheet" "~"
			(at 223.52 101.6 0)
		)
		(property "Description" ""
			(at 223.52 101.6 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 223.52 101.6 0)
		)
		(property "Distributor" "D"
			(at 223.52 101.6 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 223.52 101.6 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "C11")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+3V3_IF")
		(at 133.35 71.12 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR042"
			(at 133.35 74.93 0)
		)
		(property "Value" "+3V3_IF"
			(at 133.35 66.675 0)
		)
		(property "Footprint" ""
			(at 133.35 71.12 0)
		)
		(property "Datasheet" ""
			(at 133.35 71.12 0)
		)
		(property "Description" ""
			(at 133.35 71.12 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR042")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 107.95 204.47 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C9"
			(at 108.585 201.93 0)
		)
		(property "Value" "10µ/50V"
			(at 104.775 208.28 90)
		)
		(property "Footprint" "Capacitor_SMD:C_1206_3216Metric"
			(at 108.9152 208.28 0)
		)
		(property "Datasheet" "~"
			(at 107.95 204.47 0)
		)
		(property "Description" ""
			(at 107.95 204.47 0)
		)
		(property "Distributor" "D"
			(at 107.95 204.47 0)
		)
		(property "Manufacturer" "CL31A106MBHNNNE"
			(at 107.95 204.47 0)
		)
		(property "OrderNr" "1276-6736-1-ND"
			(at 107.95 204.47 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pferdibank"
				(path
					(reference "C9")
					(unit 1)
				)
			)
			(project "power"
				(path
					(reference "C20")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "C10")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 274.32 76.2 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R61"
			(at 276.86 74.9299 0)
		)
		(property "Value" "6.04k"
			(at 276.86 77.4699 0)
		)
		(property "Footprint" "Resistor_SMD:R_0805_2012Metric"
			(at 274.32 76.2 0)
		)
		(property "Datasheet" "~"
			(at 274.32 76.2 0)
		)
		(property "Description" "Resistor, small symbol"
			(at 274.32 76.2 0)
		)
		(property "Distributor" "D"
			(at 274.32 76.2 0)
		)
		(property "Manufacturer" "RC0805FR-076K04L"
			(at 274.32 76.2 0)
		)
		(property "OrderNr" "311-6.04KCRCT-ND"
			(at 274.32 76.2 0)
		)
		(property "DK-Partnumber" "311-3.92KHRCT-ND"
			(at 274.32 76.2 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "R61")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 303.53 189.23 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR080"
			(at 303.53 195.58 0)
		)
		(property "Value" "GND"
			(at 303.53 194.31 0)
		)
		(property "Footprint" ""
			(at 303.53 189.23 0)
		)
		(property "Datasheet" ""
			(at 303.53 189.23 0)
		)
		(property "Description" ""
			(at 303.53 189.23 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR080")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Comparator:LM339")
		(at 283.21 88.9 0)
		(unit 4)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U9"
			(at 284.48 83.185 0)
		)
		(property "Value" "LM339"
			(at 285.75 85.09 0)
		)
		(property "Footprint" "Package_SO:SOIC-14_3.9x8.7mm_P1.27mm"
			(at 281.94 86.36 0)
		)
		(property "Datasheet" "https://www.st.com/resource/en/datasheet/lm139.pdf"
			(at 284.48 83.82 0)
		)
		(property "Description" ""
			(at 283.21 88.9 0)
		)
		(property "Distributor" "D"
			(at 283.21 88.9 0)
		)
		(property "Manufacturer" "LM339DR"
			(at 283.21 88.9 0)
		)
		(property "OrderNr" "296-1013-1-ND"
			(at 283.21 88.9 0)
		)
		(pin "2")
		(pin "4")
		(pin "5")
		(pin "1")
		(pin "6")
		(pin "7")
		(pin "10")
		(pin "11")
		(pin "13")
		(pin "14")
		(pin "8")
		(pin "9")
		(pin "12")
		(pin "3")
		(instances
			(project "8]axe"
				(path
					(reference "U9")
					(unit 4)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 308.61 62.23 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR081"
			(at 308.61 66.04 0)
		)
		(property "Value" "+3V3"
			(at 308.61 57.785 0)
		)
		(property "Footprint" ""
			(at 308.61 62.23 0)
		)
		(property "Datasheet" ""
			(at 308.61 62.23 0)
		)
		(property "Description" ""
			(at 308.61 62.23 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR081")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 217.17 105.41 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR055"
			(at 217.17 111.76 0)
		)
		(property "Value" "GND"
			(at 217.17 110.49 0)
		)
		(property "Footprint" ""
			(at 217.17 105.41 0)
		)
		(property "Datasheet" ""
			(at 217.17 105.41 0)
		)
		(property "Description" ""
			(at 217.17 105.41 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR055")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 265.43 181.61 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C18"
			(at 268.605 180.34 0)
		)
		(property "Value" "100n"
			(at 268.605 182.88 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 266.3952 185.42 0)
		)
		(property "Datasheet" "~"
			(at 265.43 181.61 0)
		)
		(property "Description" ""
			(at 265.43 181.61 0)
		)
		(property "Distributor" "D"
			(at 265.43 181.61 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 265.43 181.61 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 265.43 181.61 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "C18")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 207.01 209.55 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR053"
			(at 207.01 213.36 0)
		)
		(property "Value" "+3V3"
			(at 207.01 205.105 0)
		)
		(property "Footprint" ""
			(at 207.01 209.55 0)
		)
		(property "Datasheet" ""
			(at 207.01 209.55 0)
		)
		(property "Description" ""
			(at 207.01 209.55 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR053")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 265.43 229.87 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR074"
			(at 265.43 236.22 0)
		)
		(property "Value" "GND"
			(at 265.43 234.95 0)
		)
		(property "Footprint" ""
			(at 265.43 229.87 0)
		)
		(property "Datasheet" ""
			(at 265.43 229.87 0)
		)
		(property "Description" ""
			(at 265.43 229.87 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR074")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 96.52 67.31 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR039"
			(at 92.71 67.31 0)
		)
		(property "Value" "+3V3"
			(at 100.33 67.31 90)
		)
		(property "Footprint" ""
			(at 96.52 67.31 0)
		)
		(property "Datasheet" ""
			(at 96.52 67.31 0)
		)
		(property "Description" ""
			(at 96.52 67.31 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR039")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 274.32 71.12 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R60"
			(at 276.86 69.8499 0)
		)
		(property "Value" "3.92k"
			(at 276.86 72.3899 0)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 274.32 71.12 0)
		)
		(property "Datasheet" "~"
			(at 274.32 71.12 0)
		)
		(property "Description" "Resistor, small symbol"
			(at 274.32 71.12 0)
		)
		(property "Distributor" "D"
			(at 274.32 71.12 0)
		)
		(property "Manufacturer" "RC0603FR-073K92L"
			(at 274.32 71.12 0)
		)
		(property "OrderNr" "311-3.92KHRCT-ND"
			(at 274.32 71.12 0)
		)
		(property "DK-Partnumber" "311-3.92KHRCT-ND"
			(at 274.32 71.12 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "R60")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 317.5 62.23 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR085"
			(at 317.5 66.04 0)
		)
		(property "Value" "+3V3"
			(at 317.5 57.785 0)
		)
		(property "Footprint" ""
			(at 317.5 62.23 0)
		)
		(property "Datasheet" ""
			(at 317.5 62.23 0)
		)
		(property "Description" ""
			(at 317.5 62.23 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR085")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 207.01 167.64 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR051"
			(at 207.01 171.45 0)
		)
		(property "Value" "+3V3"
			(at 207.01 163.195 0)
		)
		(property "Footprint" ""
			(at 207.01 167.64 0)
		)
		(property "Datasheet" ""
			(at 207.01 167.64 0)
		)
		(property "Description" ""
			(at 207.01 167.64 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR051")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 266.7 78.74 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0388"
			(at 266.7 85.09 0)
		)
		(property "Value" "GND"
			(at 266.7 84.455 0)
		)
		(property "Footprint" ""
			(at 266.7 78.74 0)
		)
		(property "Datasheet" ""
			(at 266.7 78.74 0)
		)
		(property "Description" ""
			(at 266.7 78.74 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0388")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 223.52 105.41 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR060"
			(at 223.52 111.76 0)
		)
		(property "Value" "GND"
			(at 223.52 110.49 0)
		)
		(property "Footprint" ""
			(at 223.52 105.41 0)
		)
		(property "Datasheet" ""
			(at 223.52 105.41 0)
		)
		(property "Description" ""
			(at 223.52 105.41 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR060")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 207.01 146.05 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR050"
			(at 207.01 152.4 0)
		)
		(property "Value" "GND"
			(at 207.01 151.13 0)
		)
		(property "Footprint" ""
			(at 207.01 146.05 0)
		)
		(property "Datasheet" ""
			(at 207.01 146.05 0)
		)
		(property "Description" ""
			(at 207.01 146.05 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR050")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+5V_PWR")
		(at 96.52 64.77 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR038"
			(at 92.71 64.77 0)
		)
		(property "Value" "+5V_PWR"
			(at 100.33 64.77 90)
		)
		(property "Footprint" ""
			(at 96.52 64.77 0)
		)
		(property "Datasheet" ""
			(at 96.52 64.77 0)
		)
		(property "Description" ""
			(at 96.52 64.77 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR038")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_IF")
		(at 133.35 86.36 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR043"
			(at 133.35 92.71 0)
		)
		(property "Value" "GND_IF"
			(at 129.54 86.36 0)
		)
		(property "Footprint" ""
			(at 133.35 86.36 0)
		)
		(property "Datasheet" ""
			(at 133.35 86.36 0)
		)
		(property "Description" ""
			(at 133.35 86.36 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR043")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 260.35 91.44 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R15"
			(at 260.35 89.535 90)
		)
		(property "Value" "1k"
			(at 260.35 93.98 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 260.35 93.218 90)
		)
		(property "Datasheet" "~"
			(at 260.35 91.44 0)
		)
		(property "Description" ""
			(at 260.35 91.44 0)
		)
		(property "Manufacturer" "RCS06031K00FKEA"
			(at 260.35 91.44 0)
		)
		(property "DK-Partnumber" "541-1.00KHCT-ND"
			(at 260.35 91.44 0)
		)
		(property "Distributor" "D"
			(at 260.35 91.44 0)
		)
		(property "OrderNr" "541-2788-1-ND"
			(at 260.35 91.44 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "R15")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 207.01 85.09 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR047"
			(at 207.01 88.9 0)
		)
		(property "Value" "+3V3"
			(at 207.01 80.645 0)
		)
		(property "Footprint" ""
			(at 207.01 85.09 0)
		)
		(property "Datasheet" ""
			(at 207.01 85.09 0)
		)
		(property "Description" ""
			(at 207.01 85.09 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR047")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 207.01 187.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR052"
			(at 207.01 194.31 0)
		)
		(property "Value" "GND"
			(at 207.01 193.04 0)
		)
		(property "Footprint" ""
			(at 207.01 187.96 0)
		)
		(property "Datasheet" ""
			(at 207.01 187.96 0)
		)
		(property "Description" ""
			(at 207.01 187.96 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR052")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 171.45 161.29 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R13"
			(at 175.895 160.02 90)
		)
		(property "Value" "22"
			(at 171.45 161.29 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 171.45 163.068 90)
		)
		(property "Datasheet" "~"
			(at 171.45 161.29 0)
		)
		(property "Description" ""
			(at 171.45 161.29 0)
		)
		(property "Manufacturer" "RK73B1JTTD220J"
			(at 171.45 161.29 0)
		)
		(property "Distributor" "D"
			(at 171.45 161.29 0)
		)
		(property "OrderNr" "2019-RK73B1JTTD220JCT-ND"
			(at 171.45 161.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "R13")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 260.35 132.08 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R16"
			(at 260.35 130.175 90)
		)
		(property "Value" "1k"
			(at 260.35 134.62 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 260.35 133.858 90)
		)
		(property "Datasheet" "~"
			(at 260.35 132.08 0)
		)
		(property "Description" ""
			(at 260.35 132.08 0)
		)
		(property "Manufacturer" "RCS06031K00FKEA"
			(at 260.35 132.08 0)
		)
		(property "DK-Partnumber" "541-1.00KHCT-ND"
			(at 260.35 132.08 0)
		)
		(property "Distributor" "D"
			(at 260.35 132.08 0)
		)
		(property "OrderNr" "541-2788-1-ND"
			(at 260.35 132.08 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "R16")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 170.18 78.74 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R9"
			(at 174.625 77.47 90)
		)
		(property "Value" "22"
			(at 170.18 78.74 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 170.18 80.518 90)
		)
		(property "Datasheet" "~"
			(at 170.18 78.74 0)
		)
		(property "Description" ""
			(at 170.18 78.74 0)
		)
		(property "Manufacturer" "RK73B1JTTD220J"
			(at 170.18 78.74 0)
		)
		(property "Distributor" "D"
			(at 170.18 78.74 0)
		)
		(property "OrderNr" "2019-RK73B1JTTD220JCT-ND"
			(at 170.18 78.74 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "R9")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 303.53 181.61 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR079"
			(at 303.53 185.42 0)
		)
		(property "Value" "+3V3"
			(at 303.53 177.165 0)
		)
		(property "Footprint" ""
			(at 303.53 181.61 0)
		)
		(property "Datasheet" ""
			(at 303.53 181.61 0)
		)
		(property "Description" ""
			(at 303.53 181.61 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR079")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 303.53 185.42 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C22"
			(at 306.705 184.15 0)
		)
		(property "Value" "100n"
			(at 306.705 186.69 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 304.4952 189.23 0)
		)
		(property "Datasheet" "~"
			(at 303.53 185.42 0)
		)
		(property "Description" ""
			(at 303.53 185.42 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 303.53 185.42 0)
		)
		(property "Distributor" "D"
			(at 303.53 185.42 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 303.53 185.42 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "C22")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 233.68 148.59 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C13"
			(at 236.855 147.32 0)
		)
		(property "Value" "100n"
			(at 236.855 149.86 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 234.6452 152.4 0)
		)
		(property "Datasheet" "~"
			(at 233.68 148.59 0)
		)
		(property "Description" ""
			(at 233.68 148.59 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 233.68 148.59 0)
		)
		(property "Distributor" "D"
			(at 233.68 148.59 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 233.68 148.59 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "C13")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 233.68 144.78 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR063"
			(at 233.68 148.59 0)
		)
		(property "Value" "+3V3"
			(at 233.68 140.335 0)
		)
		(property "Footprint" ""
			(at 233.68 144.78 0)
		)
		(property "Datasheet" ""
			(at 233.68 144.78 0)
		)
		(property "Description" ""
			(at 233.68 144.78 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR063")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 207.01 105.41 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR048"
			(at 207.01 111.76 0)
		)
		(property "Value" "GND"
			(at 207.01 110.49 0)
		)
		(property "Footprint" ""
			(at 207.01 105.41 0)
		)
		(property "Datasheet" ""
			(at 207.01 105.41 0)
		)
		(property "Description" ""
			(at 207.01 105.41 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR048")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 289.56 69.85 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR076"
			(at 289.56 76.2 0)
		)
		(property "Value" "GND"
			(at 289.56 74.93 0)
		)
		(property "Footprint" ""
			(at 289.56 69.85 0)
		)
		(property "Datasheet" ""
			(at 289.56 69.85 0)
		)
		(property "Description" ""
			(at 289.56 69.85 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR076")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:GND_IF")
		(at 96.52 72.39 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR041"
			(at 102.87 72.39 0)
		)
		(property "Value" "GND_IF"
			(at 96.52 76.2 0)
		)
		(property "Footprint" ""
			(at 96.52 72.39 0)
		)
		(property "Datasheet" ""
			(at 96.52 72.39 0)
		)
		(property "Description" ""
			(at 96.52 72.39 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR041")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 130.81 163.83 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R7"
			(at 126.365 162.56 90)
		)
		(property "Value" "22"
			(at 130.81 163.83 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 130.81 165.608 90)
		)
		(property "Datasheet" "~"
			(at 130.81 163.83 0)
		)
		(property "Description" ""
			(at 130.81 163.83 0)
		)
		(property "Manufacturer" "RK73B1JTTD220J"
			(at 130.81 163.83 0)
		)
		(property "Distributor" "D"
			(at 130.81 163.83 0)
		)
		(property "OrderNr" "2019-RK73B1JTTD220JCT-ND"
			(at 130.81 163.83 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "R7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 217.17 187.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR057"
			(at 217.17 194.31 0)
		)
		(property "Value" "GND"
			(at 217.17 193.04 0)
		)
		(property "Footprint" ""
			(at 217.17 187.96 0)
		)
		(property "Datasheet" ""
			(at 217.17 187.96 0)
		)
		(property "Description" ""
			(at 217.17 187.96 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR057")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 207.01 125.73 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR049"
			(at 207.01 129.54 0)
		)
		(property "Value" "+3V3"
			(at 207.01 121.285 0)
		)
		(property "Footprint" ""
			(at 207.01 125.73 0)
		)
		(property "Datasheet" ""
			(at 207.01 125.73 0)
		)
		(property "Description" ""
			(at 207.01 125.73 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR049")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 265.43 99.06 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C16"
			(at 268.605 97.79 0)
		)
		(property "Value" "100n"
			(at 268.605 100.33 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 266.3952 102.87 0)
		)
		(property "Datasheet" "~"
			(at 265.43 99.06 0)
		)
		(property "Description" ""
			(at 265.43 99.06 0)
		)
		(property "Distributor" "D"
			(at 265.43 99.06 0)
		)
		(property "Manufacturer" "CC0603KRX5R9BB104"
			(at 265.43 99.06 0)
		)
		(property "OrderNr" "311-4046-1-ND"
			(at 265.43 99.06 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "C16")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+5V_PWR")
		(at 172.72 91.44 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR045"
			(at 168.91 91.44 0)
		)
		(property "Value" "+5V_PWR"
			(at 176.53 91.44 90)
		)
		(property "Footprint" ""
			(at 172.72 91.44 0)
		)
		(property "Datasheet" ""
			(at 172.72 91.44 0)
		)
		(property "Description" ""
			(at 172.72 91.44 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR045")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 229.87 236.22 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR062"
			(at 229.87 242.57 0)
		)
		(property "Value" "GND"
			(at 229.87 241.3 0)
		)
		(property "Footprint" ""
			(at 229.87 236.22 0)
		)
		(property "Datasheet" ""
			(at 229.87 236.22 0)
		)
		(property "Description" ""
			(at 229.87 236.22 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR062")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Comparator:LM339")
		(at 284.48 213.36 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U9"
			(at 285.75 207.645 0)
		)
		(property "Value" "LM339"
			(at 287.02 209.55 0)
		)
		(property "Footprint" "Package_SO:SOIC-14_3.9x8.7mm_P1.27mm"
			(at 283.21 210.82 0)
		)
		(property "Datasheet" "https://www.st.com/resource/en/datasheet/lm139.pdf"
			(at 285.75 208.28 0)
		)
		(property "Description" ""
			(at 284.48 213.36 0)
		)
		(property "Distributor" "D"
			(at 284.48 213.36 0)
		)
		(property "Manufacturer" "LM339DR"
			(at 284.48 213.36 0)
		)
		(property "OrderNr" "296-1013-1-ND"
			(at 284.48 213.36 0)
		)
		(pin "2")
		(pin "4")
		(pin "5")
		(pin "1")
		(pin "6")
		(pin "7")
		(pin "10")
		(pin "11")
		(pin "13")
		(pin "14")
		(pin "8")
		(pin "9")
		(pin "12")
		(pin "3")
		(instances
			(project "8]axe"
				(path
					(reference "U9")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 171.45 166.37 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R14"
			(at 175.895 165.1 90)
		)
		(property "Value" "22"
			(at 171.45 166.37 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 171.45 168.148 90)
		)
		(property "Datasheet" "~"
			(at 171.45 166.37 0)
		)
		(property "Description" ""
			(at 171.45 166.37 0)
		)
		(property "Manufacturer" "RK73B1JTTD220J"
			(at 171.45 166.37 0)
		)
		(property "Distributor" "D"
			(at 171.45 166.37 0)
		)
		(property "OrderNr" "2019-RK73B1JTTD220JCT-ND"
			(at 171.45 166.37 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "R14")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Reference_Voltage:ISL21070CIH320Z-TK")
		(at 255.27 68.58 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U8"
			(at 258.445 60.325 0)
		)
		(property "Value" "ISL21080CIH315Z-TK"
			(at 274.955 62.23 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23"
			(at 267.97 74.93 0)
		)
		(property "Datasheet" ""
			(at 255.27 68.58 0)
		)
		(property "Description" ""
			(at 255.27 68.58 0)
		)
		(property "Distributor" "D"
			(at 255.27 68.58 0)
		)
		(property "Manufacturer" "ISL21080CIH325Z-TK"
			(at 255.27 68.58 0)
		)
		(property "OrderNr" "ISL21080CIH325Z-TKCT-ND"
			(at 255.27 68.58 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(instances
			(project "8]axe"
				(path
					(reference "U8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 207.01 229.87 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR054"
			(at 207.01 236.22 0)
		)
		(property "Value" "GND"
			(at 207.01 234.95 0)
		)
		(property "Footprint" ""
			(at 207.01 229.87 0)
		)
		(property "Datasheet" ""
			(at 207.01 229.87 0)
		)
		(property "Description" ""
			(at 207.01 229.87 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR054")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 265.43 187.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR073"
			(at 265.43 194.31 0)
		)
		(property "Value" "GND"
			(at 265.43 193.04 0)
		)
		(property "Footprint" ""
			(at 265.43 187.96 0)
		)
		(property "Datasheet" ""
			(at 265.43 187.96 0)
		)
		(property "Description" ""
			(at 265.43 187.96 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR073")
					(unit 1)
				)
			)
		)
	)
	(sheet
		(at 135.89 152.4)
		(size 27.94 30.48)
		(fields_autoplaced yes)
		(fill
			(color 0 0 0 0.0000)
		)
		(property "Sheetname" "flex3"
			(at 135.89 151.6884 0)
		)
		(property "Sheetfile" "flex3.kicad_sch"
			(at 135.89 183.4646 0)
		)
		(pin "NRSTI" input
			(at 135.89 158.75 180)
		)
		(pin "CI" input
			(at 135.89 166.37 180)
		)
		(pin "BI" input
			(at 135.89 161.29 180)
		)
		(pin "RO" output
			(at 135.89 163.83 180)
		)
		(pin "NRSTO" output
			(at 163.83 158.75 0)
		)
		(pin "+1V2" passive
			(at 163.83 173.99 0)
		)
		(pin "GND" passive
			(at 163.83 181.61 0)
		)
		(pin "CO" output
			(at 163.83 166.37 0)
		)
		(pin "BO" output
			(at 163.83 161.29 0)
		)
		(pin "RI" input
			(at 163.83 163.83 0)
		)
		(pin "V_IF" input
			(at 135.89 156.21 180)
		)
		(pin "GND_IF" input
			(at 135.89 168.91 180)
		)
		(pin "GND_OUT" output
			(at 163.83 168.91 0)
		)
		(pin "+1.8V_OUT" output
			(at 163.83 156.21 0)
		)
		(instances
			(project "8]axe"
				(path
					(page "7")
				)
			)
		)
	)
	(sheet
		(at 135.89 71.12)
		(size 27.94 30.48)
		(fields_autoplaced yes)
		(fill
			(color 0 0 0 0.0000)
		)
		(property "Sheetname" "flex1"
			(at 135.89 70.4084 0)
		)
		(property "Sheetfile" "flex1.kicad_sch"
			(at 135.89 102.1846 0)
		)
		(pin "+1V2" passive
			(at 163.83 91.44 0)
		)
		(pin "GND" passive
			(at 163.83 99.06 0)
		)
		(pin "NRSTI" input
			(at 135.89 76.2 180)
		)
		(pin "CI" input
			(at 135.89 83.82 180)
		)
		(pin "BI" input
			(at 135.89 78.74 180)
		)
		(pin "RO" output
			(at 135.89 81.28 180)
		)
		(pin "NRSTO" output
			(at 163.83 76.2 0)
		)
		(pin "RI" input
			(at 163.83 81.28 0)
		)
		(pin "BO" output
			(at 163.83 78.74 0)
		)
		(pin "CO" output
			(at 163.83 83.82 0)
		)
		(pin "GND_IF" input
			(at 135.89 86.36 180)
		)
		(pin "V_IF" input
			(at 135.89 73.66 180)
		)
		(pin "+1.8V_OUT" output
			(at 163.83 73.66 0)
		)
		(pin "GND_OUT" passive
			(at 163.83 86.36 0)
		)
		(instances
			(project "8]axe"
				(path
					(page "5")
				)
			)
		)
	)
	(sheet
		(at 135.89 110.49)
		(size 27.94 30.48)
		(fields_autoplaced yes)
		(fill
			(color 0 0 0 0.0000)
		)
		(property "Sheetname" "flex2"
			(at 135.89 109.7784 0)
		)
		(property "Sheetfile" "flex2.kicad_sch"
			(at 135.89 141.5546 0)
		)
		(pin "+1V2" passive
			(at 163.83 132.08 0)
		)
		(pin "GND" passive
			(at 163.83 139.7 0)
		)
		(pin "RI" input
			(at 163.83 121.92 0)
		)
		(pin "BO" output
			(at 163.83 119.38 0)
		)
		(pin "CO" output
			(at 163.83 124.46 0)
		)
		(pin "CI" input
			(at 135.89 124.46 180)
		)
		(pin "NRSTI" input
			(at 135.89 116.84 180)
		)
		(pin "BI" input
			(at 135.89 119.38 180)
		)
		(pin "RO" output
			(at 135.89 121.92 180)
		)
		(pin "NRSTO" output
			(at 163.83 116.84 0)
		)
		(pin "V_IF" input
			(at 135.89 114.3 180)
		)
		(pin "GND_IF" input
			(at 135.89 127 180)
		)
		(pin "+1.8V_OUT" output
			(at 163.83 114.3 0)
		)
		(pin "GND_OUT" output
			(at 163.83 127 0)
		)
		(instances
			(project "8]axe"
				(path
					(page "6")
				)
			)
		)
	)
	(sheet
		(at 135.89 194.31)
		(size 27.94 30.48)
		(fields_autoplaced yes)
		(fill
			(color 0 0 0 0.0000)
		)
		(property "Sheetname" "flex4"
			(at 135.89 193.5984 0)
		)
		(property "Sheetfile" "flex4.kicad_sch"
			(at 135.89 225.3746 0)
		)
		(pin "+1V2" passive
			(at 163.83 215.9 0)
		)
		(pin "GND" passive
			(at 163.83 223.52 0)
		)
		(pin "RI" input
			(at 163.83 205.74 0)
		)
		(pin "CO" output
			(at 163.83 208.28 0)
		)
		(pin "BO" output
			(at 163.83 203.2 0)
		)
		(pin "RO" output
			(at 135.89 205.74 180)
		)
		(pin "CI" input
			(at 135.89 208.28 180)
		)
		(pin "NRSTI" input
			(at 135.89 200.66 180)
		)
		(pin "BI" input
			(at 135.89 203.2 180)
		)
		(pin "NRSTO" output
			(at 163.83 200.66 0)
		)
		(pin "GND_IF" input
			(at 135.89 210.82 180)
		)
		(pin "V_IF" input
			(at 135.89 198.12 180)
		)
		(pin "+1.8V_OUT" output
			(at 163.83 198.12 0)
		)
		(pin "GND_OUT" output
			(at 163.83 210.82 0)
		)
		(instances
			(project "8]axe"
				(path
					(page "8")
				)
			)
		)
	)
	(sheet_instances
		(path
			(page "1")
		)
	)
)
