(kicad_sch
	(version 20231120)
	(generator "eeschema")
	(generator_version "8.0")
	(paper "A")
	(title_block
		(title "bitaxeHex")
		(date "2023-12-28")
		(rev "302")
	)
	(lib_symbols
		(symbol "Connector_Generic:Conn_01x04"
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "J"
				(at 0 5.08 0)
			)
			(property "Value" "Conn_01x04"
				(at 0 -7.62 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Generic connector, single row, 01x04, script generated (kicad-library-utils/schlib/autogen/connector/)"
				(at 0 0 0)
			)
			(property "ki_keywords" "connector"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Connector*:*_1x??_*"
				(at 0 0 0)
			)
			(symbol "Conn_01x04_1_1"
				(rectangle
					(start -1.27 -4.953)
					(end 0 -5.207)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 -2.413)
					(end 0 -2.667)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 0.127)
					(end 0 -0.127)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 2.667)
					(end 0 2.413)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 3.81)
					(end 1.27 -6.35)
					(fill
						(type background)
					)
				)
				(pin passive line
					(at -5.08 2.54 0)
					(length 3.81)
					(name "Pin_1")
					(number "1")
				)
				(pin passive line
					(at -5.08 0 0)
					(length 3.81)
					(name "Pin_2")
					(number "2")
				)
				(pin passive line
					(at -5.08 -2.54 0)
					(length 3.81)
					(name "Pin_3")
					(number "3")
				)
				(pin passive line
					(at -5.08 -5.08 0)
					(length 3.81)
					(name "Pin_4")
					(number "4")
				)
			)
		)
		(symbol "Device:C"
			(pin_numbers hide)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Unpolarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C_*"
				(at 0 0 0)
			)
			(symbol "C_0_1"
				(polyline
					(pts
						(xy -2.032 -0.762) (xy 2.032 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.032 0.762) (xy 2.032 0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:C_Polarized_Small_US"
			(pin_numbers hide)
			(pin_names
				(offset 0.254) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.254 1.778 0)
			)
			(property "Value" "C_Polarized_Small_US"
				(at 0.254 -2.032 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Polarized capacitor, small US symbol"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "CP_*"
				(at 0 0 0)
			)
			(symbol "C_Polarized_Small_US_0_1"
				(polyline
					(pts
						(xy -1.524 0.508) (xy 1.524 0.508)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 1.524) (xy -0.762 1.524)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.016 1.27) (xy -1.016 1.778)
					)
					(fill
						(type none)
					)
				)
				(arc
					(start 1.524 -0.762)
					(mid 0 -0.3734)
					(end -1.524 -0.762)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_Polarized_Small_US_1_1"
				(pin passive line
					(at 0 2.54 270)
					(length 2.032)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -2.54 90)
					(length 2.032)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:Fuse"
			(pin_numbers hide)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "F"
				(at 2.032 0 90)
			)
			(property "Value" "Fuse"
				(at -1.905 0 90)
			)
			(property "Footprint" ""
				(at -1.778 0 90)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Fuse"
				(at 0 0 0)
			)
			(property "ki_keywords" "fuse"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "*Fuse*"
				(at 0 0 0)
			)
			(symbol "Fuse_0_1"
				(rectangle
					(start -0.762 -2.54)
					(end 0.762 2.54)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0 -2.54)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "Fuse_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Device:L"
			(pin_numbers hide)
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "L"
				(at -1.27 0 90)
			)
			(property "Value" "L"
				(at 1.905 0 90)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Inductor"
				(at 0 0 0)
			)
			(property "ki_keywords" "inductor choke coil reactor magnetic"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Choke_* *Coil* Inductor_* L_*"
				(at 0 0 0)
			)
			(symbol "L_0_1"
				(arc
					(start 0 -2.54)
					(mid 0.6323 -1.905)
					(end 0 -1.27)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 -1.27)
					(mid 0.6323 -0.635)
					(end 0 0)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 0)
					(mid 0.6323 0.635)
					(end 0 1.27)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 1.27)
					(mid 0.6323 1.905)
					(end 0 2.54)
					(fill
						(type none)
					)
				)
			)
			(symbol "L_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "1")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "2")
					(number "2")
				)
			)
		)
		(symbol "Device:R"
			(pin_numbers hide)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 2.032 0 90)
			)
			(property "Value" "R"
				(at 0 0 90)
			)
			(property "Footprint" ""
				(at -1.778 0 90)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Resistor"
				(at 0 0 0)
			)
			(property "ki_keywords" "R res resistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R_0_1"
				(rectangle
					(start -1.016 -2.54)
					(end 1.016 2.54)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "~")
					(number "2")
				)
			)
		)
		(symbol "Diode:5KPxxA"
			(pin_numbers hide)
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "D"
				(at 0 2.54 0)
			)
			(property "Value" "5KPxxA"
				(at 0 -2.54 0)
			)
			(property "Footprint" "Diode_THT:D_P600_R-6_P20.00mm_Horizontal"
				(at 0 -5.08 0)
			)
			(property "Datasheet" "https://diotec.com/tl_files/diotec/files/pdf/datasheets/5kp65.pdf"
				(at -1.27 0 0)
			)
			(property "Description" "5000W unidirectional Transient Voltage Suppressor, P-600"
				(at 0 0 0)
			)
			(property "ki_keywords" "diode TVS voltage suppressor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "D?P600*"
				(at 0 0 0)
			)
			(symbol "5KPxxA_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy -1.27 1.27) (xy -1.27 -1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 1.27) (xy 1.27 -1.27) (xy -1.27 0) (xy 1.27 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "5KPxxA_1_1"
				(pin passive line
					(at -3.81 0 0)
					(length 2.54)
					(name "A1")
					(number "1")
				)
				(pin passive line
					(at 3.81 0 180)
					(length 2.54)
					(name "A2")
					(number "2")
				)
			)
		)
		(symbol "GND_2"
			(power)
			(pin_numbers hide)
			(pin_names
				(offset 0) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -6.35 0)
			)
			(property "Value" "GND"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_2_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_2_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0)
					(name "~")
					(number "1")
				)
			)
		)
		(symbol "PCM_Diode_Schottky_AKL:D_Schottky_Generic"
			(pin_numbers hide)
			(pin_names
				(offset 1.016) hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "D"
				(at 0 5.08 0)
			)
			(property "Value" "D_Schottky_Generic"
				(at 0 2.54 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Schottky diode, Generic Symbol, Alternate KiCAD Library"
				(at 0 0 0)
			)
			(property "ki_keywords" "diode Schottky generic"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "TO-???* *_Diode_* *SingleDiode* D_*"
				(at 0 0 0)
			)
			(symbol "D_Schottky_Generic_0_1"
				(polyline
					(pts
						(xy -1.27 0) (xy 1.27 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 -1.27) (xy -1.27 1.27) (xy 1.27 0) (xy -1.27 -1.27)
					)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy 1.905 -0.635) (xy 1.905 -1.27) (xy 1.27 -1.27) (xy 1.27 1.27) (xy 0.635 1.27) (xy 0.635 0.635)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "D_Schottky_Generic_1_1"
				(pin passive line
					(at 3.81 0 180)
					(length 2.54)
					(name "K")
					(number "1")
				)
				(pin passive line
					(at -3.81 0 0)
					(length 2.54)
					(name "A")
					(number "2")
				)
			)
		)
		(symbol "Transistor_FET:CSD16327Q3"
			(pin_names hide)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "Q"
				(at 5.08 1.905 0)
			)
			(property "Value" "CSD16327Q3"
				(at 5.08 0 0)
			)
			(property "Footprint" "Package_SON:VSON-8_3.3x3.3mm_P0.65mm_NexFET"
				(at 5.08 -1.905 0)
			)
			(property "Datasheet" "https://www.ti.com/lit/ds/symlink/csd16327q3.pdf"
				(at 5.08 -3.81 0)
			)
			(property "Description" "60A Id, 25V Vds, NexFET N-Channel Power MOSFET, 3.4mOhm Ron, Qg Typ 6.2nC, VSON-8 3.3x3.3mm"
				(at 0 0 0)
			)
			(property "ki_keywords" "NexFET Power MOSFET N-MOS"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "VSON*3.3x3.3mm*P0.65mm*NexFET*"
				(at 0 0 0)
			)
			(symbol "CSD16327Q3_0_1"
				(polyline
					(pts
						(xy 0.254 0) (xy -2.54 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.254 1.905) (xy 0.254 -1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 -1.27) (xy 0.762 -2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 0.508) (xy 0.762 -0.508)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 2.286) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 2.54) (xy 2.54 1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 -2.54) (xy 2.54 0) (xy 0.762 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 -1.778) (xy 3.302 -1.778) (xy 3.302 1.778) (xy 0.762 1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.016 0) (xy 2.032 0.381) (xy 2.032 -0.381) (xy 1.016 0)
					)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy 2.794 0.508) (xy 2.921 0.381) (xy 3.683 0.381) (xy 3.81 0.254)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 3.302 0.381) (xy 2.921 -0.254) (xy 3.683 -0.254) (xy 3.302 0.381)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 1.651 0)
					(radius 2.794)
					(fill
						(type none)
					)
				)
				(circle
					(center 2.54 -1.778)
					(radius 0.254)
					(fill
						(type outline)
					)
				)
				(circle
					(center 2.54 1.778)
					(radius 0.254)
					(fill
						(type outline)
					)
				)
			)
			(symbol "CSD16327Q3_1_1"
				(pin passive line
					(at 2.54 -5.08 90)
					(length 2.54)
					(name "S")
					(number "1")
				)
				(pin passive line
					(at 2.54 -5.08 90)
					(length 2.54) hide
					(name "S")
					(number "2")
				)
				(pin passive line
					(at 2.54 -5.08 90)
					(length 2.54) hide
					(name "S")
					(number "3")
				)
				(pin passive line
					(at -5.08 0 0)
					(length 2.54)
					(name "G")
					(number "4")
				)
				(pin passive line
					(at 2.54 5.08 270)
					(length 2.54)
					(name "D")
					(number "5")
				)
			)
		)
		(symbol "lm3348:LM3488QMM_NOPB"
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U23"
				(at 21.082 2.54 0)
			)
			(property "Value" "LM3488QMM/NOPB"
				(at 28.448 -3.81 0)
			)
			(property "Footprint" "digikey-footprints:DGK8"
				(at -12.7 11.938 0)
			)
			(property "Datasheet" "LM3488QMM/NOPB"
				(at -11.938 9.144 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "DK-Partnumber" "LM3488QMM/NOPBCT-ND"
				(at 0 0 0)
			)
			(property "MPN" "LM3488QMM/NOPB"
				(at 0 0 0)
			)
			(property "ki_locked" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "LM3488QMM/NOPB"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "DGK8 DGK8-M DGK8-L"
				(at 0 0 0)
			)
			(symbol "LM3488QMM_NOPB_0_1"
				(polyline
					(pts
						(xy 7.62 -35.56) (xy 52.07 -35.56)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 7.62 5.08) (xy 7.62 -35.56)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 52.07 -35.56) (xy 52.07 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 52.07 5.08) (xy 7.62 5.08)
					)
					(fill
						(type none)
					)
				)
				(pin input line
					(at 57.15 -12.7 180)
					(length 7.62)
					(name "ISEN")
					(number "1")
				)
				(pin unspecified line
					(at 2.54 -17.78 0)
					(length 7.62)
					(name "COMP")
					(number "2")
				)
				(pin unspecified line
					(at 31.75 10.16 270)
					(length 7.62)
					(name "FB")
					(number "3")
				)
				(pin power_in line
					(at 20.32 -41.91 90)
					(length 7.62)
					(name "AGND")
					(number "4")
				)
				(pin power_in line
					(at 25.4 -41.91 90)
					(length 7.62)
					(name "PGND")
					(number "5")
				)
				(pin unspecified line
					(at 57.15 -5.08 180)
					(length 7.62)
					(name "DR")
					(number "6")
				)
				(pin unspecified line
					(at 39.37 -41.91 90)
					(length 7.62)
					(name "FA/SYNC/SD")
					(number "7")
				)
				(pin input line
					(at 2.54 -6.35 0)
					(length 7.62)
					(name "VIN")
					(number "8")
				)
			)
		)
		(symbol "mylib7:+6.5V"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR034"
				(at 0 -3.81 0)
			)
			(property "Value" "+6.5V"
				(at 0 4.445 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+6.5V_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+6.5V_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+5V")
					(number "1")
				)
			)
		)
		(symbol "power:+12V"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
			)
			(property "Value" "+12V"
				(at 0 3.556 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+12V\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+12V_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+12V_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+12V")
					(number "1")
				)
			)
		)
		(symbol "power:+3V3"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
			)
			(property "Value" "+3V3"
				(at 0 3.556 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+3V3\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+3V3_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+3V3_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+3V3")
					(number "1")
				)
			)
		)
		(symbol "power:+5V"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
			)
			(property "Value" "+5V"
				(at 0 3.556 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+5V\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+5V_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+5V_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0) hide
					(name "+5V")
					(number "1")
				)
			)
		)
		(symbol "power:GND"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -6.35 0)
			)
			(property "Value" "GND"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0) hide
					(name "GND")
					(number "1")
				)
			)
		)
	)
	(junction
		(at 78.74 134.62)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 46.99 74.93)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 125.73 74.93)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 48.26 102.87)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 144.78 63.5)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 86.36 134.62)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 33.02 74.93)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 85.09 59.69)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 185.42 93.98)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 134.62 68.58)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 104.14 120.65)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 149.86 48.26)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 104.14 134.62)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 133.35 34.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 69.85 127)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 113.03 134.62)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 139.7 29.21)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 113.03 120.65)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 48.26 134.62)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 113.03 74.93)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 133.35 29.21)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 33.02 134.62)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 40.64 134.62)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 22.86 74.93)
		(diameter 0)
		(color 0 0 0 0)
	)
	(wire
		(pts
			(xy 231.14 72.39) (xy 233.68 72.39)
		)
	)
	(wire
		(pts
			(xy 40.64 134.62) (xy 48.26 134.62)
		)
	)
	(wire
		(pts
			(xy 132.08 26.67) (xy 133.35 26.67)
		)
	)
	(wire
		(pts
			(xy 86.36 124.46) (xy 86.36 127)
		)
	)
	(wire
		(pts
			(xy 104.14 115.57) (xy 104.14 120.65)
		)
	)
	(wire
		(pts
			(xy 220.98 99.06) (xy 233.68 99.06)
		)
	)
	(wire
		(pts
			(xy 113.03 74.93) (xy 113.03 85.09)
		)
	)
	(wire
		(pts
			(xy 85.09 57.15) (xy 85.09 59.69)
		)
	)
	(wire
		(pts
			(xy 78.74 59.69) (xy 85.09 59.69)
		)
	)
	(wire
		(pts
			(xy 124.46 48.26) (xy 149.86 48.26)
		)
	)
	(wire
		(pts
			(xy 78.74 74.93) (xy 78.74 59.69)
		)
	)
	(wire
		(pts
			(xy 33.02 74.93) (xy 46.99 74.93)
		)
	)
	(wire
		(pts
			(xy 220.98 106.68) (xy 233.68 106.68)
		)
	)
	(wire
		(pts
			(xy 40.64 102.87) (xy 40.64 111.76)
		)
	)
	(wire
		(pts
			(xy 113.03 134.62) (xy 125.73 134.62)
		)
	)
	(wire
		(pts
			(xy 22.86 74.93) (xy 33.02 74.93)
		)
	)
	(wire
		(pts
			(xy 85.09 59.69) (xy 85.09 68.58)
		)
	)
	(wire
		(pts
			(xy 181.61 81.28) (xy 196.85 81.28)
		)
	)
	(wire
		(pts
			(xy 46.99 74.93) (xy 46.99 91.44)
		)
	)
	(wire
		(pts
			(xy 181.61 63.5) (xy 184.15 63.5)
		)
	)
	(wire
		(pts
			(xy 149.86 59.69) (xy 153.67 59.69)
		)
	)
	(wire
		(pts
			(xy 69.85 127) (xy 72.39 127)
		)
	)
	(wire
		(pts
			(xy 104.14 90.17) (xy 105.41 90.17)
		)
	)
	(wire
		(pts
			(xy 185.42 93.98) (xy 196.85 93.98)
		)
	)
	(wire
		(pts
			(xy 113.03 129.54) (xy 113.03 134.62)
		)
	)
	(wire
		(pts
			(xy 181.61 83.82) (xy 196.85 83.82)
		)
	)
	(wire
		(pts
			(xy 123.19 74.93) (xy 125.73 74.93)
		)
	)
	(wire
		(pts
			(xy 46.99 91.44) (xy 49.53 91.44)
		)
	)
	(wire
		(pts
			(xy 227.33 109.22) (xy 227.33 113.03)
		)
	)
	(wire
		(pts
			(xy 233.68 109.22) (xy 227.33 109.22)
		)
	)
	(wire
		(pts
			(xy 231.14 82.55) (xy 233.68 82.55)
		)
	)
	(wire
		(pts
			(xy 104.14 58.42) (xy 104.14 57.15)
		)
	)
	(wire
		(pts
			(xy 181.61 93.98) (xy 185.42 93.98)
		)
	)
	(wire
		(pts
			(xy 220.98 74.93) (xy 233.68 74.93)
		)
	)
	(wire
		(pts
			(xy 220.98 77.47) (xy 233.68 77.47)
		)
	)
	(wire
		(pts
			(xy 97.79 68.58) (xy 134.62 68.58)
		)
	)
	(wire
		(pts
			(xy 125.73 74.93) (xy 125.73 95.25)
		)
	)
	(wire
		(pts
			(xy 149.86 29.21) (xy 149.86 48.26)
		)
	)
	(wire
		(pts
			(xy 133.35 31.75) (xy 132.08 31.75)
		)
	)
	(wire
		(pts
			(xy 40.64 102.87) (xy 48.26 102.87)
		)
	)
	(wire
		(pts
			(xy 86.36 134.62) (xy 104.14 134.62)
		)
	)
	(wire
		(pts
			(xy 133.35 34.29) (xy 133.35 31.75)
		)
	)
	(wire
		(pts
			(xy 185.42 93.98) (xy 185.42 113.03)
		)
	)
	(wire
		(pts
			(xy 17.78 48.26) (xy 17.78 74.93)
		)
	)
	(wire
		(pts
			(xy 181.61 59.69) (xy 233.68 59.69)
		)
	)
	(wire
		(pts
			(xy 104.14 120.65) (xy 104.14 121.92)
		)
	)
	(wire
		(pts
			(xy 113.03 95.25) (xy 113.03 120.65)
		)
	)
	(wire
		(pts
			(xy 220.98 101.6) (xy 233.68 101.6)
		)
	)
	(wire
		(pts
			(xy 104.14 129.54) (xy 104.14 134.62)
		)
	)
	(wire
		(pts
			(xy 149.86 48.26) (xy 149.86 59.69)
		)
	)
	(wire
		(pts
			(xy 33.02 134.62) (xy 33.02 96.52)
		)
	)
	(wire
		(pts
			(xy 134.62 68.58) (xy 134.62 74.93)
		)
	)
	(wire
		(pts
			(xy 78.74 134.62) (xy 86.36 134.62)
		)
	)
	(wire
		(pts
			(xy 48.26 102.87) (xy 48.26 111.76)
		)
	)
	(wire
		(pts
			(xy 149.86 29.21) (xy 139.7 29.21)
		)
	)
	(wire
		(pts
			(xy 227.33 113.03) (xy 185.42 113.03)
		)
	)
	(wire
		(pts
			(xy 33.02 88.9) (xy 33.02 74.93)
		)
	)
	(wire
		(pts
			(xy 220.98 80.01) (xy 233.68 80.01)
		)
	)
	(wire
		(pts
			(xy 194.31 73.66) (xy 196.85 73.66)
		)
	)
	(wire
		(pts
			(xy 125.73 100.33) (xy 125.73 134.62)
		)
	)
	(wire
		(pts
			(xy 85.09 68.58) (xy 90.17 68.58)
		)
	)
	(wire
		(pts
			(xy 220.98 104.14) (xy 233.68 104.14)
		)
	)
	(wire
		(pts
			(xy 181.61 66.04) (xy 184.15 66.04)
		)
	)
	(wire
		(pts
			(xy 48.26 102.87) (xy 49.53 102.87)
		)
	)
	(wire
		(pts
			(xy 22.86 134.62) (xy 33.02 134.62)
		)
	)
	(wire
		(pts
			(xy 113.03 74.93) (xy 115.57 74.93)
		)
	)
	(wire
		(pts
			(xy 139.7 29.21) (xy 139.7 30.48)
		)
	)
	(wire
		(pts
			(xy 116.84 48.26) (xy 17.78 48.26)
		)
	)
	(wire
		(pts
			(xy 104.14 97.79) (xy 104.14 107.95)
		)
	)
	(wire
		(pts
			(xy 194.31 71.12) (xy 196.85 71.12)
		)
	)
	(wire
		(pts
			(xy 85.09 57.15) (xy 90.17 57.15)
		)
	)
	(wire
		(pts
			(xy 181.61 68.58) (xy 184.15 68.58)
		)
	)
	(wire
		(pts
			(xy 22.86 105.41) (xy 22.86 134.62)
		)
	)
	(wire
		(pts
			(xy 48.26 128.27) (xy 48.26 134.62)
		)
	)
	(wire
		(pts
			(xy 144.78 63.5) (xy 153.67 63.5)
		)
	)
	(wire
		(pts
			(xy 48.26 134.62) (xy 78.74 134.62)
		)
	)
	(wire
		(pts
			(xy 194.31 76.2) (xy 196.85 76.2)
		)
	)
	(wire
		(pts
			(xy 139.7 38.1) (xy 139.7 39.37)
		)
	)
	(wire
		(pts
			(xy 144.78 60.96) (xy 144.78 63.5)
		)
	)
	(wire
		(pts
			(xy 33.02 134.62) (xy 40.64 134.62)
		)
	)
	(wire
		(pts
			(xy 104.14 134.62) (xy 113.03 134.62)
		)
	)
	(wire
		(pts
			(xy 86.36 132.08) (xy 86.36 134.62)
		)
	)
	(wire
		(pts
			(xy 134.62 68.58) (xy 134.62 63.5)
		)
	)
	(wire
		(pts
			(xy 132.08 29.21) (xy 133.35 29.21)
		)
	)
	(wire
		(pts
			(xy 99.06 74.93) (xy 113.03 74.93)
		)
	)
	(wire
		(pts
			(xy 134.62 63.5) (xy 144.78 63.5)
		)
	)
	(wire
		(pts
			(xy 48.26 119.38) (xy 48.26 120.65)
		)
	)
	(wire
		(pts
			(xy 40.64 119.38) (xy 40.64 134.62)
		)
	)
	(wire
		(pts
			(xy 133.35 34.29) (xy 133.35 39.37)
		)
	)
	(wire
		(pts
			(xy 17.78 74.93) (xy 22.86 74.93)
		)
	)
	(wire
		(pts
			(xy 125.73 74.93) (xy 134.62 74.93)
		)
	)
	(wire
		(pts
			(xy 67.31 127) (xy 69.85 127)
		)
	)
	(wire
		(pts
			(xy 46.99 74.93) (xy 91.44 74.93)
		)
	)
	(wire
		(pts
			(xy 139.7 29.21) (xy 133.35 29.21)
		)
	)
	(wire
		(pts
			(xy 104.14 120.65) (xy 113.03 120.65)
		)
	)
	(wire
		(pts
			(xy 113.03 120.65) (xy 113.03 121.92)
		)
	)
	(wire
		(pts
			(xy 133.35 34.29) (xy 132.08 34.29)
		)
	)
	(wire
		(pts
			(xy 104.14 57.15) (xy 97.79 57.15)
		)
	)
	(wire
		(pts
			(xy 22.86 74.93) (xy 22.86 100.33)
		)
	)
	(wire
		(pts
			(xy 231.14 64.77) (xy 233.68 64.77)
		)
	)
	(wire
		(pts
			(xy 78.74 134.62) (xy 78.74 138.43)
		)
	)
	(wire
		(pts
			(xy 133.35 26.67) (xy 133.35 29.21)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 40.64 115.57 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "Ccomp1"
			(at 41.91 112.776 90)
		)
		(property "Value" "1.5nF"
			(at 34.544 118.618 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 41.6052 119.38 0)
		)
		(property "Datasheet" "https://search.murata.co.jp/Ceramy/image/img/A01X/G101/ENG/GRM1885C1H152JA01-01.pdf"
			(at 40.64 115.57 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 40.64 115.57 0)
		)
		(property "DK-Partnumber" "490-1455-1-ND"
			(at 40.64 115.57 0)
		)
		(property "MPN" "GRM1885C1H152JA01D"
			(at 40.64 115.57 0)
		)
		(property "Distributor" "D"
			(at 40.64 115.57 0)
		)
		(property "OrderNr" "490-1455-1-ND"
			(at 40.64 115.57 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "Ccomp1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Diode:5KPxxA")
		(at 139.7 34.29 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "D3"
			(at 135.255 38.1 0)
		)
		(property "Value" "SMBJ5.0A"
			(at 137.16 31.75 0)
		)
		(property "Footprint" "Diode_SMD:D_SMB"
			(at 134.62 34.29 0)
		)
		(property "Datasheet" ""
			(at 139.7 33.02 0)
		)
		(property "Description" ""
			(at 139.7 34.29 0)
		)
		(property "Distributor" "D"
			(at 139.7 34.29 0)
		)
		(property "Manufacturer" "SMBJ5.0A"
			(at 139.7 34.29 0)
		)
		(property "OrderNr" "SMBJ5.0ALFCT-ND"
			(at 139.7 34.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "pferdibank"
				(path
					(reference "D3")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "D2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "PCM_Diode_Schottky_AKL:D_Schottky_Generic")
		(at 119.38 74.93 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "D6"
			(at 117.348 78.486 0)
		)
		(property "Value" "550mV 5A"
			(at 118.872 80.518 0)
		)
		(property "Footprint" "Library2:SMC_DIO"
			(at 119.38 74.93 0)
		)
		(property "Datasheet" "~"
			(at 119.38 74.93 0)
		)
		(property "Description" "Schottky diode, Generic Symbol, Alternate KiCAD Library"
			(at 119.38 74.93 0)
		)
		(property "DK-Partnumber" "B540C-FDICT-ND"
			(at 119.38 74.93 0)
		)
		(property "MPN" "B540C-13-F"
			(at 119.38 74.93 0)
		)
		(property "Distributor" "D"
			(at 119.38 74.93 0)
		)
		(property "OrderNr" "B540C-FDICT-ND"
			(at 119.38 74.93 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "D6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 33.02 92.71 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "Cbyp1"
			(at 36.83 91.4399 0)
		)
		(property "Value" "100nF"
			(at 36.83 93.9799 0)
		)
		(property "Footprint" "PCM_Capacitor_SMD_AKL:C_0603_1608Metric"
			(at 33.9852 96.52 0)
		)
		(property "Datasheet" "https://search.murata.co.jp/Ceramy/image/img/A01X/G101/ENG/GRM188R70J104KA01-01.pdf"
			(at 33.02 92.71 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 33.02 92.71 0)
		)
		(property "DK-Partnumber#" "490-9730-1-ND"
			(at 33.02 92.71 0)
		)
		(property "MPN" "GRM188R70J104KA01D"
			(at 33.02 92.71 0)
		)
		(property "Distributor" "D"
			(at 33.02 92.71 0)
		)
		(property "OrderNr" "490-9730-1-ND"
			(at 33.02 92.71 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "Cbyp1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 184.15 63.5 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06"
			(at 180.34 63.5 0)
		)
		(property "Value" "+3V3"
			(at 187.96 63.5 90)
		)
		(property "Footprint" ""
			(at 184.15 63.5 0)
		)
		(property "Datasheet" ""
			(at 184.15 63.5 0)
		)
		(property "Description" ""
			(at 184.15 63.5 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR06")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 78.74 138.43 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0171"
			(at 78.74 144.78 0)
		)
		(property "Value" "GND"
			(at 78.74 143.51 0)
		)
		(property "Footprint" ""
			(at 78.74 138.43 0)
		)
		(property "Datasheet" ""
			(at 78.74 138.43 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 78.74 138.43 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0171")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 104.14 125.73 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "Cfilt1"
			(at 104.394 130.048 0)
		)
		(property "Value" "10pF"
			(at 104.902 132.588 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0805_2012Metric"
			(at 105.1052 129.54 0)
		)
		(property "Datasheet" "~"
			(at 104.14 125.73 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 104.14 125.73 0)
		)
		(property "DK-Partnumber" "311-1099-1-ND"
			(at 104.14 125.73 0)
		)
		(property "MPN" "CC0805JRNPO9BN100"
			(at 104.14 125.73 0)
		)
		(property "Distributor" "D"
			(at 104.14 125.73 0)
		)
		(property "OrderNr" "311-1099-1-ND"
			(at 104.14 125.73 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "Cfilt1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector_Generic:Conn_01x04")
		(at 127 29.21 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "J2"
			(at 127 20.32 0)
		)
		(property "Value" "Conn_01x04"
			(at 127 22.86 0)
		)
		(property "Footprint" "Library2:Barrier Terminal 01x04"
			(at 127 29.21 0)
		)
		(property "Datasheet" "~"
			(at 127 29.21 0)
		)
		(property "Description" "Generic connector, single row, 01x04, script generated (kicad-library-utils/schlib/autogen/connector/)"
			(at 127 29.21 0)
		)
		(property "Distributor" "D"
			(at 127 29.21 0)
		)
		(property "Manufacturer" "YK5110403000G"
			(at 127 29.21 0)
		)
		(property "OrderNr" "YK5110403000G-ND"
			(at 127 29.21 0)
		)
		(pin "3")
		(pin "4")
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "J2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+5V")
		(at 184.15 66.04 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07"
			(at 180.34 66.04 0)
		)
		(property "Value" "+5V"
			(at 187.96 66.04 90)
		)
		(property "Footprint" ""
			(at 184.15 66.04 0)
		)
		(property "Datasheet" ""
			(at 184.15 66.04 0)
		)
		(property "Description" ""
			(at 184.15 66.04 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR07")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 139.7 39.37 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR012"
			(at 139.7 45.72 0)
		)
		(property "Value" "GND"
			(at 139.827 43.7642 0)
		)
		(property "Footprint" ""
			(at 139.7 39.37 0)
		)
		(property "Datasheet" ""
			(at 139.7 39.37 0)
		)
		(property "Description" ""
			(at 139.7 39.37 0)
		)
		(pin "1")
		(instances
			(project "pferdibank"
				(path
					(reference "#PWR012")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR05")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:L")
		(at 95.25 74.93 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "L2"
			(at 96.52 76.2 90)
		)
		(property "Value" "3.3uH"
			(at 96.52 78.486 90)
		)
		(property "Footprint" "Library2:IND_WE-CHSA-SMT_1011_WRE"
			(at 95.25 74.93 0)
		)
		(property "Datasheet" "~"
			(at 95.25 74.93 0)
		)
		(property "Description" "Inductor"
			(at 95.25 74.93 0)
		)
		(property "DK-Partnumber" "732-11758-1-ND"
			(at 95.25 74.93 90)
		)
		(property "MPN" "7843330330"
			(at 95.25 74.93 90)
		)
		(property "Distributor" "D"
			(at 95.25 74.93 0)
		)
		(property "OrderNr" "732-11758-1-ND"
			(at 95.25 74.93 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "L2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:Fuse")
		(at 120.65 48.26 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "F1"
			(at 120.65 43.2562 90)
		)
		(property "Value" "8A"
			(at 120.65 45.5676 90)
		)
		(property "Footprint" "Library2:0154Series_LTF"
			(at 120.65 46.482 90)
		)
		(property "Datasheet" "~"
			(at 120.65 48.26 0)
		)
		(property "Description" ""
			(at 120.65 48.26 0)
		)
		(property "Distributor" "D"
			(at 120.65 48.26 0)
		)
		(property "Manufacturer" "0154008.DR"
			(at 120.65 48.26 0)
		)
		(property "OrderNr" "F1239CT-ND"
			(at 120.65 48.26 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "F1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_name "GND_2")
		(lib_id "power:GND")
		(at 69.85 127 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0179"
			(at 69.85 133.35 0)
		)
		(property "Value" "GND"
			(at 69.85 132.08 0)
		)
		(property "Footprint" ""
			(at 69.85 127 0)
		)
		(property "Datasheet" ""
			(at 69.85 127 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 69.85 127 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0179")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 231.14 72.39 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR013"
			(at 234.95 72.39 0)
		)
		(property "Value" "+3V3"
			(at 227.965 72.39 90)
		)
		(property "Footprint" ""
			(at 231.14 72.39 0)
		)
		(property "Datasheet" ""
			(at 231.14 72.39 0)
		)
		(property "Description" ""
			(at 231.14 72.39 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR013")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 86.36 128.27 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "Rsync1"
			(at 88.9 126.9999 0)
		)
		(property "Value" "26.1k"
			(at 88.9 129.5399 0)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 84.582 128.27 90)
		)
		(property "Datasheet" "~"
			(at 86.36 128.27 0)
		)
		(property "Description" "Resistor"
			(at 86.36 128.27 0)
		)
		(property "DK-Partnumber" "311-26.1KHRCT-ND"
			(at 86.36 128.27 0)
		)
		(property "MPN" "RC0603FR-0726K1L"
			(at 86.36 128.27 0)
		)
		(property "Distributor" "D"
			(at 86.36 128.27 0)
		)
		(property "OrderNr" "311-26.1KHRCT-ND"
			(at 86.36 128.27 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "Rsync1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 93.98 57.15 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "Rfb1"
			(at 93.98 50.8 90)
		)
		(property "Value" "1k"
			(at 93.98 53.34 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 93.98 58.928 90)
		)
		(property "Datasheet" "~"
			(at 93.98 57.15 0)
		)
		(property "Description" "Resistor"
			(at 93.98 57.15 0)
		)
		(property "DK-Partnumber" "541-1.00KHCT-ND"
			(at 93.98 57.15 90)
		)
		(property "MPN" "CRCW06031K00FKEA"
			(at 93.98 57.15 90)
		)
		(property "Manufacturer" "RCS06031K00FKEA"
			(at 93.98 57.15 0)
		)
		(property "Distributor" "D"
			(at 93.98 57.15 0)
		)
		(property "OrderNr" "541-2788-1-ND"
			(at 93.98 57.15 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "Rfb1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Polarized_Small_US")
		(at 22.86 102.87 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "Cin1"
			(at 25.4 101.1681 0)
		)
		(property "Value" "470uF"
			(at 25.4 103.7081 0)
		)
		(property "Footprint" "Capacitor_SMD:CP_Elec_10x10.5"
			(at 22.86 102.87 0)
		)
		(property "Datasheet" "~"
			(at 22.86 102.87 0)
		)
		(property "Description" "Polarized capacitor, small US symbol"
			(at 22.86 102.87 0)
		)
		(property "DK-Partnumber" "493-2280-1-ND"
			(at 22.86 102.87 0)
		)
		(property "MPN" "UUD1E471MNL1GS"
			(at 22.86 102.87 0)
		)
		(property "Distributor" "D"
			(at 22.86 102.87 0)
		)
		(property "OrderNr" "493-2280-1-ND"
			(at 22.86 102.87 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "Cin1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 104.14 111.76 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "Rfilt1"
			(at 106.68 110.4899 0)
		)
		(property "Value" "100R"
			(at 106.68 113.0299 0)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 102.362 111.76 90)
		)
		(property "Datasheet" "~"
			(at 104.14 111.76 0)
		)
		(property "Description" "Resistor"
			(at 104.14 111.76 0)
		)
		(property "DK_Partnumber" "311-100HRCT-ND"
			(at 104.14 111.76 0)
		)
		(property "MPN" "RC0603FR-07100RL"
			(at 104.14 111.76 0)
		)
		(property "Distributor" "D"
			(at 104.14 111.76 0)
		)
		(property "OrderNr" "311-100HRCT-ND"
			(at 104.14 111.76 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "Rfilt1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 93.98 68.58 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "Rfb2"
			(at 93.98 62.23 90)
		)
		(property "Value" "8.45k"
			(at 93.98 64.77 90)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 93.98 70.358 90)
		)
		(property "Datasheet" "~"
			(at 93.98 68.58 0)
		)
		(property "Description" "Resistor"
			(at 93.98 68.58 0)
		)
		(property "DK-Partnumber" "311-8.45KHRCT-ND"
			(at 93.98 68.58 90)
		)
		(property "MPN" "RC0603FR-078K45L"
			(at 93.98 68.58 90)
		)
		(property "Distributor" "D"
			(at 93.98 68.58 0)
		)
		(property "OrderNr" "311-8.45KHRCT-ND"
			(at 93.98 68.58 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "Rfb2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 231.14 64.77 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR012"
			(at 234.95 64.77 0)
		)
		(property "Value" "+3V3"
			(at 227.965 64.77 90)
		)
		(property "Footprint" ""
			(at 231.14 64.77 0)
		)
		(property "Datasheet" ""
			(at 231.14 64.77 0)
		)
		(property "Description" ""
			(at 231.14 64.77 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR012")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+12V")
		(at 144.78 60.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR03"
			(at 144.78 64.77 0)
		)
		(property "Value" "+12V"
			(at 144.78 55.88 0)
		)
		(property "Footprint" ""
			(at 144.78 60.96 0)
		)
		(property "Datasheet" ""
			(at 144.78 60.96 0)
		)
		(property "Description" ""
			(at 144.78 60.96 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR03")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+12V")
		(at 194.31 76.2 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR010"
			(at 198.12 76.2 0)
		)
		(property "Value" "+12V"
			(at 191.135 76.2 90)
		)
		(property "Footprint" ""
			(at 194.31 76.2 0)
		)
		(property "Datasheet" ""
			(at 194.31 76.2 0)
		)
		(property "Description" ""
			(at 194.31 76.2 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR010")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 104.14 58.42 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0177"
			(at 104.14 64.77 0)
		)
		(property "Value" "GND"
			(at 104.14 63.5 0)
		)
		(property "Footprint" ""
			(at 104.14 58.42 0)
		)
		(property "Datasheet" ""
			(at 104.14 58.42 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 104.14 58.42 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0177")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 113.03 125.73 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "Rsense1"
			(at 115.57 124.4599 0)
		)
		(property "Value" "7mR"
			(at 115.57 126.9999 0)
		)
		(property "Footprint" "Library2:RES_3216_SUS"
			(at 111.252 125.73 90)
		)
		(property "Datasheet" "~"
			(at 113.03 125.73 0)
		)
		(property "Description" "Resistor"
			(at 113.03 125.73 0)
		)
		(property "DK-Partnumber" "PRL1632.007FCT-ND"
			(at 113.03 125.73 0)
		)
		(property "MPN" "PRL1632-R007-F-T1"
			(at 113.03 125.73 0)
		)
		(property "Distributor" "D"
			(at 113.03 125.73 0)
		)
		(property "OrderNr" "PRL1632.007FCT-ND"
			(at 113.03 125.73 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "Rsense1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 133.35 39.37 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR012"
			(at 133.35 45.72 0)
		)
		(property "Value" "GND"
			(at 133.477 43.7642 0)
		)
		(property "Footprint" ""
			(at 133.35 39.37 0)
		)
		(property "Datasheet" ""
			(at 133.35 39.37 0)
		)
		(property "Description" ""
			(at 133.35 39.37 0)
		)
		(pin "1")
		(instances
			(project "pferdibank"
				(path
					(reference "#PWR012")
					(unit 1)
				)
			)
			(project "8]axe"
				(path
					(reference "#PWR02")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "lm3348:LM3488QMM_NOPB")
		(at 46.99 85.09 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U23"
			(at 68.072 82.55 0)
		)
		(property "Value" "LM3488QMM/NOPB"
			(at 75.438 88.9 0)
		)
		(property "Footprint" "digikey-footprints:DGK8"
			(at 34.29 73.152 0)
		)
		(property "Datasheet" "LM3488QMM/NOPB"
			(at 35.052 75.946 0)
		)
		(property "Description" ""
			(at 46.99 85.09 0)
		)
		(property "DK-Partnumber" "LM3488QMM/NOPBCT-ND"
			(at 46.99 85.09 0)
		)
		(property "MPN" "LM3488QMM/NOPB"
			(at 46.99 85.09 0)
		)
		(property "Distributor" "D"
			(at 46.99 85.09 0)
		)
		(property "OrderNr" "LM3488QMM/NOPBCT-ND"
			(at 46.99 85.09 0)
		)
		(pin "5")
		(pin "2")
		(pin "8")
		(pin "7")
		(pin "4")
		(pin "6")
		(pin "3")
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "U23")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 231.14 82.55 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR014"
			(at 224.79 82.55 0)
		)
		(property "Value" "GND"
			(at 227.965 82.55 90)
		)
		(property "Footprint" ""
			(at 231.14 82.55 0)
		)
		(property "Datasheet" ""
			(at 231.14 82.55 0)
		)
		(property "Description" ""
			(at 231.14 82.55 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR014")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3V3")
		(at 194.31 73.66 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR09"
			(at 198.12 73.66 0)
		)
		(property "Value" "+3V3"
			(at 191.135 73.66 90)
		)
		(property "Footprint" ""
			(at 194.31 73.66 0)
		)
		(property "Datasheet" ""
			(at 194.31 73.66 0)
		)
		(property "Description" ""
			(at 194.31 73.66 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR09")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 48.26 115.57 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "Ccomp2"
			(at 52.07 114.2999 90)
		)
		(property "Value" "27nF"
			(at 49.276 118.11 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0603_1608Metric"
			(at 49.2252 119.38 0)
		)
		(property "Datasheet" "~"
			(at 48.26 115.57 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 48.26 115.57 0)
		)
		(property "DK-Partnumber" ""
			(at 48.26 115.57 0)
		)
		(property "MPN" ""
			(at 48.26 115.57 0)
		)
		(property "Distributor" "D"
			(at 48.26 115.57 0)
		)
		(property "OrderNr" "478-KGM15AR71C273KTCT-ND"
			(at 48.26 115.57 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "Ccomp2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+5V")
		(at 194.31 71.12 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08"
			(at 198.12 71.12 0)
		)
		(property "Value" "+5V"
			(at 190.5 71.12 90)
		)
		(property "Footprint" ""
			(at 194.31 71.12 0)
		)
		(property "Datasheet" ""
			(at 194.31 71.12 0)
		)
		(property "Description" ""
			(at 194.31 71.12 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR08")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Transistor_FET:CSD16327Q3")
		(at 110.49 90.17 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "Q6"
			(at 107.95 81.534 0)
		)
		(property "Value" "CSD16327Q3"
			(at 99.06 84.836 0)
		)
		(property "Footprint" "Package_SON:VSON-8_3.3x3.3mm_P0.65mm_NexFET"
			(at 115.57 92.075 0)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/csd16327q3.pdf"
			(at 115.57 93.98 0)
		)
		(property "Description" "60A Id, 25V Vds, NexFET N-Channel Power MOSFET, 3.4mOhm Ron, Qg Typ 6.2nC, VSON-8 3.3x3.3mm"
			(at 110.49 90.17 0)
		)
		(property "Distributor" "D"
			(at 110.49 90.17 0)
		)
		(property "Manufacturer" "CSD16327Q3"
			(at 110.49 90.17 0)
		)
		(property "OrderNr" "296-30138-1-ND"
			(at 110.49 90.17 0)
		)
		(pin "3")
		(pin "2")
		(pin "5")
		(pin "4")
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "Q6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Polarized_Small_US")
		(at 125.73 97.79 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "Cout1"
			(at 128.27 96.0881 0)
		)
		(property "Value" "390uF"
			(at 128.27 98.6281 0)
		)
		(property "Footprint" "Library2:PCAP_SVP_E12_PAN"
			(at 125.73 97.79 0)
		)
		(property "Datasheet" "https://industrial.panasonic.com/ww/products/pt/os-con/models/20SVPF390M"
			(at 125.73 97.79 0)
		)
		(property "Description" "Polarized capacitor, small US symbol"
			(at 125.73 97.79 0)
		)
		(property "DK-Partnumber" "P16500CT-ND"
			(at 125.73 97.79 0)
		)
		(property "MPN" "20SVPF390M"
			(at 125.73 97.79 0)
		)
		(property "Distributor" "D"
			(at 125.73 97.79 0)
		)
		(property "OrderNr" "P16500CT-ND"
			(at 125.73 97.79 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "Cout1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 48.26 124.46 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "Rcomp1"
			(at 50.8 123.1899 0)
		)
		(property "Value" "3.92k"
			(at 50.8 125.7299 0)
		)
		(property "Footprint" "Resistor_SMD:R_0603_1608Metric"
			(at 46.482 124.46 90)
		)
		(property "Datasheet" "~"
			(at 48.26 124.46 0)
		)
		(property "Description" "Resistor"
			(at 48.26 124.46 0)
		)
		(property "DK-Partnumber" "311-3.92KHRCT-ND"
			(at 48.26 124.46 0)
		)
		(property "MPN" "RC0603FR-073K92L"
			(at 48.26 124.46 0)
		)
		(property "Distributor" "D"
			(at 48.26 124.46 0)
		)
		(property "Manufacturer" "RC0603FR-073K92L"
			(at 48.26 124.46 0)
		)
		(property "OrderNr" "311-3.92KHRCT-ND"
			(at 48.26 124.46 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "8]axe"
				(path
					(reference "Rcomp1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "mylib7:+6.5V")
		(at 184.15 68.58 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR0490"
			(at 180.34 68.58 0)
		)
		(property "Value" "+6.5V"
			(at 187.96 68.5799 90)
		)
		(property "Footprint" ""
			(at 184.15 68.58 0)
		)
		(property "Datasheet" ""
			(at 184.15 68.58 0)
		)
		(property "Description" ""
			(at 184.15 68.58 0)
		)
		(pin "1")
		(instances
			(project "8]axe"
				(path
					(reference "#PWR0490")
					(unit 1)
				)
			)
		)
	)
	(sheet
		(at 196.85 62.23)
		(size 24.13 46.99)
		(fields_autoplaced yes)
		(fill
			(color 255 255 194 1.0000)
		)
		(property "Sheetname" "stm32"
			(at 196.85 61.5184 0)
		)
		(property "Sheetfile" "stm32.kicad_sch"
			(at 196.85 109.1696 0)
		)
		(pin "+5V" input
			(at 196.85 71.12 180)
		)
		(pin "+3V3" input
			(at 196.85 73.66 180)
		)
		(pin "V_FLEX4" input
			(at 220.98 106.68 0)
		)
		(pin "V_FLEX3" input
			(at 220.98 104.14 0)
		)
		(pin "V_FLEX1" input
			(at 220.98 99.06 0)
		)
		(pin "V_FLEX2" input
			(at 220.98 101.6 0)
		)
		(pin "RESET" output
			(at 220.98 80.01 0)
		)
		(pin "TXD" output
			(at 220.98 74.93 0)
		)
		(pin "RXD" input
			(at 220.98 77.47 0)
		)
		(pin "PWR_EN" output
			(at 196.85 81.28 180)
		)
		(pin "SHUTDOWN" bidirectional
			(at 196.85 93.98 180)
		)
		(pin "Q" input
			(at 196.85 83.82 180)
		)
		(pin "+12V_FAN" input
			(at 196.85 76.2 180)
		)
		(instances
			(project "8]axe"
				(path
					(page "4")
				)
			)
		)
	)
	(sheet
		(at 233.68 57.15)
		(size 20.32 54.61)
		(fields_autoplaced yes)
		(fill
			(color 255 255 194 1.0000)
		)
		(property "Sheetname" "flex"
			(at 233.68 56.4384 0)
		)
		(property "Sheetfile" "flex.kicad_sch"
			(at 233.68 111.7096 0)
		)
		(pin "V_FLEX3" output
			(at 233.68 104.14 180)
		)
		(pin "V_FLEX4" output
			(at 233.68 106.68 180)
		)
		(pin "V_FLEX2" output
			(at 233.68 101.6 180)
		)
		(pin "V_FLEX1" output
			(at 233.68 99.06 180)
		)
		(pin "RESET" input
			(at 233.68 80.01 180)
		)
		(pin "RXD" output
			(at 233.68 77.47 180)
		)
		(pin "TXD" input
			(at 233.68 74.93 180)
		)
		(pin "+3V3" input
			(at 233.68 64.77 180)
		)
		(pin "+5V_PWR" input
			(at 233.68 59.69 180)
		)
		(pin "SHUTDOWN" output
			(at 233.68 109.22 180)
		)
		(pin "+3V3_IF" input
			(at 233.68 72.39 180)
		)
		(pin "GND_IF" input
			(at 233.68 82.55 180)
		)
		(instances
			(project "8]axe"
				(path
					(page "3")
				)
			)
		)
	)
	(sheet
		(at 153.67 57.15)
		(size 27.94 39.37)
		(fill
			(color 255 255 194 1.0000)
		)
		(property "Sheetname" "Power"
			(at 156.845 56.515 0)
		)
		(property "Sheetfile" "power.kicad_sch"
			(at 154.305 96.52 0)
		)
		(pin "+5V" output
			(at 181.61 66.04 0)
		)
		(pin "+3V3" output
			(at 181.61 63.5 0)
		)
		(pin "+12V" input
			(at 153.67 63.5 180)
		)
		(pin "PWR_EN" input
			(at 181.61 81.28 0)
		)
		(pin "SHUTDOWN" input
			(at 181.61 93.98 0)
		)
		(pin "+5V_PWR_EXT" input
			(at 153.67 59.69 180)
		)
		(pin "+5V_PWR" output
			(at 181.61 59.69 0)
		)
		(pin "Q" output
			(at 181.61 83.82 0)
		)
		(pin "+6.5V" output
			(at 181.61 68.58 0)
		)
		(instances
			(project "8]axe"
				(path
					(page "2")
				)
			)
		)
	)
	(sheet_instances
		(path
			(page "1")
		)
	)
)
